Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Secuencia de arranque del switch

Mensaje del switch

Procedimiento de recuperación

Introducción

Este documento describe cómo recuperar un Multilayer Datacenter Switch (MDS) del Modo de inicio y del Mensaje del cargador de arranque.

Para funcionar correctamente, los switches MDS requieren un Kickstart no dañado válido e imagen del sistema para arrancar completamente. Las imágenes de Kickstart no válidas, dañadas o faltantes impiden que un switch se inicie y se detenga en el mensaje del cargador de inicio. Un switch con una imagen Kickstart válida, pero una imagen del sistema no válida o faltante termina en el modo de arranque.

Prerequisites

Requirements

Cisco recomienda que conozca estos temas:

- Comandos de configuración de MDS9000 CLI

- Cómo configurar una conexión de consola al switch MDS.

- Cómo configurar o conectar un switch MDS a una red a través de su puerto de administración.

- Familiaridad con TFTP.

Componentes Utilizados

La información de este documento se basa en los requisitos de software de la versión 6.2(9) y posteriores.

Este documento utiliza un switch MDS9148S, tempest de nombre de switch que admite de 12 a 48 puertos de Fibre Channel de 16 Gbps a velocidad de línea.

The information in this document was created from the devices in a specific lab environment. Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Secuencia de arranque del switch

BIOS > Cargador > Imagen de Kickstart > Imagen del sistema

1. El sistema básico de entrada y salida (BIOS) carga el cargador.

2. El cargador carga la imagen de Kickstart en la RAM e inicia la imagen de Kickstart.

3. La imagen de Kickstart se carga e inicia la imagen del sistema.

4. La imagen del sistema lee el archivo de configuración de inicio.

Mensaje del switch

Fase

Prompt

Descripción

BIOS

No arrancable

El BIOS comienza la prueba de encendido automático y la prueba de memoria.

Cargador

loader>

El cargador de arranque descomprime el software cargado para arrancar una imagen kickstart.

Ctrl + C (tecla de control y tecla C) para introducir la indicación del cargador de arranque.

Arranque

switch(boot)#

Una vez finalizada la fase del cargador de arranque, pulse Ctrl + ] (tecla Control y tecla de corchete derecho) para entrar en el modo de arranque.

Sistema

inicio de sesión:

La imagen del sistema carga el archivo de configuración de inicio y devuelve un switch al mensaje de inicio de sesión.

Procedimiento de recuperación

Desde la sesión de la consola del switch.

loader>

Paso 1. Descargue las imágenes Kickstart y System del switch y colóquelas en el directorio del servidor TFTP.

En este ejemplo, la dirección IP del servidor TFTP es 64.104.204.100.

Paso 2. Configure la dirección IP de administración del switch y su gateway predeterminado.

1. Configure la dirección IP de gestión de la interfaz del switch.

loader> net —ip=10.66.78.80

2. Configuración de la máscara de subred de administración de la interfaz del switch

loader> net —nm=255.255.255.128

3. Configure la dirección IP de la puerta de enlace predeterminada del switch.

loader> net —gw=10.66.78.4

En este ejemplo:

- La dirección IP mgmt0 de la interfaz del switch es 10.66.78.80 255.255.255.128

- La dirección IP de la gateway predeterminada del switch es 10.66.78.4

Paso 3. Pruebe la conectividad IP entre el servidor TFTP y el switch.

Haga ping en la dirección IP de administración del switch desde el servidor TFTP.

C:\Users\mpandika> ping 10.66.78.80

Pinging 10.66.78.80 with 32 bytes of data:

Reply from 10.66.78.80: bytes=32 time=2ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Ping statistics for 10.66.78.80:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 2ms, Maximum = 3ms, Average = 2ms

C:\Users\mpandika>

Paso 4. Arranque la imagen Kickstart que se encuentra en el directorio del servidor TFTP, para llevar el switch al modo de arranque.

loader> boot tftp://64.104.204.100/ m9100-s5ek9-kickstart-mz.8.3.1.bin

eTSEC2: Speed 1000, full duplex

Using eTSEC2 device

TFTP from server 64.104.204.100; our IP address is 10.66.78.80; sending through gateway 10.66.78.4

Filename 'm9100-s5ek9-kickstart-mz.8.3.1.bin'.

Load address: 0x8000000

Loading:         *#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#######

done

Bytes transferred = 26027008 (18d2400 hex)

NBI at 08000000 size 26027008

Booting image at addr 0x00800000 ...

Memory <- <0x0 0x0 0x1 0x0> (4096MB)

ethernet0: local-mac-address <- 10:05:ca:b6:c5:a0

ethernet1: local-mac-address <- 00:e0:0c:00:01:fd

ethernet2: local-mac-address <- 00:e0:0c:00:02:fd

CPU clock-frequency <- 0x3f941f80 (1067MHz)

CPU timebase-frequency <- 0x3f941f8 (67MHz)

CPU bus-frequency <- 0x1fca0fc0 (533MHz)

zImage starting: loaded at 0x00800000 (sp: 0x7fedc620)

Allocating 0x620d88 bytes for kernel ...

gunzipping (0x00000000 <- 0x00817000:0x00de3838)...done 0x5bc060 bytes

Using loader supplied ramdisk at 0x2800000-0x3de8e00

initrd head: 0x1f8b0808

Linux/PowerPC load: rw root=/dev/ram0 rdbase=0x7000000 card_index=9046 maxcpus=2 ip=off ramdisk_size=262144 noquiet obfl_type_ide=1 kgdboc=ttyS0,9600,B console=ttyS0,9600n8nn loader_ver="02.01.17" card_index=9046 quiet bootdev=mgmt0 server_ip=64.104.204.100 ksimg=m9100-s5ek9-kickstart-mz.8.3.1.bin isanimg=  Finalizing device tree... flat tree at 0xdf0140

Ísetup_arch: bootmem

mpc85xx_ds_setup_arch()

arch: exit

[    0.060378] Host controller irq 26

[    0.103390] Assign root port irq 26

[    0.144046] Host controller irq 24

[    0.193691] Assign root port irq 24

[    0.810630] physmap-flash physmap-flash.0: Could not reserve memory region

[    1.084751] Enabling all PCI devices

INIT: Checking all filesystems..r.r.r.retval=[1]

r done

WARNING: Image sync is going to be disabled after a loader netboot.

Loading system software

No system image is specified

/etc/init.d/functions: li

INIT: Sending processes the KILL signal

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

switch(boot)#

Paso 5. Recupere el switch del modo de arranque.

1. Configure la dirección IP de administración de interfaz y la dirección IP de gateway predeterminada.

switch(boot)# config t

Enter configuration commands, one per line. End with CNTL/Z.

switch(boot)(config)# interface mgmt 0

switch(boot)(config-if)# ip address 10.66.78.80 255.255.255.128

switch(boot)(config-if)# no shut

switch(boot)(config-if)# exit

switch(boot)(config)# ip default-gateway 10.66.78.4

switch(boot)(config)# exit

2. Descargue las imágenes de Kickstart y del sistema desde el servidor TFTP a la memoria flash de inicialización del switch.

switch(boot)# copy tftp://64.104.204.100/m9100-s5ek9-kickstart-mz.8.3.1.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

switch(boot)#

switch(boot)#copy tftp://64.104.204.100/m9100-s5ek9-mz.8.3.1.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

switch(boot)#

3. Verifique que las imágenes de Kickstart y del sistema se descarguen correctamente en la memoria flash de inicialización del switch.

switch(boot)# dir bootflash:

4096   Dec 22 2002 01:38:31  .partner/

297  Nov 09 2017 07:18:54  MDS201711091818530370.lic

297  Nov 09 2017 07:28:42  MDS201711091828418770.lic

4096  Jul 23 2018 14:44:25  lost+found/

26027008  Aug 08 2018 02:55:31  m9100-s5ek9-kickstart-mz.8.3.1.bin

109635731  Aug 08 2018 02:53:38  m9100-s5ek9-mz.8.3.1.bin

3430222  Feb 01 2000 02:31:30  moonlake.1.f.xsvf

23467  Jul 30 2018 12:40:56  mts.log

347607  Jul 28 2017 04:46:31  portchannel

4096  Dec 22 2002 02:38:54  scripts/

31812  Jun 30 2018 05:07:27  snmp.pcap

Usage for bootflash: filesystem

1264746496 bytes used

2106781696 bytes free

3371528192 bytes total

switch(boot)#

4. Cargue la imagen del sistema.

switch(boot)# load bootflash:m9100-s5ek9-mz.8.3.1.bin

Uncompressing system image: bootflash:/m9100-s5ek9-mz.8.3.1.bin

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

Load plugins that defined in image conf: /isan/plugin_img/img.conf

No Patching support on this platform

Loading plugin 0: core_plugin...

No Patching support on this platform

Enter pboot_chk_compatibility

num srgs 1

0: swid-core-s5ek9m, swid-core-s5ek9m

num srgs 1

0: swid-sup-mini-ks, swid-sup-mini-ks

INIT: Switching to runlevel: 3

INIT: Sending processes the TERM signal

switch(boot)#

INIT:

2018 Aug  8 03:13:03  %SYSLOG-2-SYSTEM_MSG : Syslogs wont be logged into logflash until logflash is online

2018 Aug  8 03:13:06  %KERN-0-SYSTEM_MSG: [    1.084751] Enabling all PCI devices - kernel

2018 Aug  8 03:14:13 switch %CARDCLIENT-2-REG: OK

System is coming up ... Please wait ...

System is coming up ... Please wait ...

2018 Aug  8 03:14:22 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Bootstrap Replay Started.

System is coming up ... Please wait ...

User Access Verification

10.66.78.80 login: 2018 Aug  8 03:14:41 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Bootstrap Replay Done.

2018 Aug  8 03:14:44 switch %PMON-SLOT1-2-PMON_CRIT_INFO: Port Monitor Critical Information: Config download success .

2018 Aug  8 03:14:45 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Ascii Replay Started.

2018 Aug  8 03:14:45 switch %PMON-SLOT1-2-PMON_CRIT_INFO: Port Monitor Critical Information: Policy (slowdrain) activation is successfull .

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_OK: Power supply 1 ok(Serial number QCS18242L8D)

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_FANOK: Fan in Power supply 1 ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_FAIL: Power supply 2 failed or shut down(Serial number QCS18242L0H)

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 14:15:35 tempest %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Ascii Replay Done.

User Access Verification

tempest login:

Nota: El switch se configuró previamente con la tempestad switchname.

5. Inicie sesión en el switch.

tempest login: admin

Password:

Last login: Wed Aug  8 14:20:01 on pts/0

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

tempest#

6. Verifique las variables de inicio.

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

tempest#

7. Establezca las variables de arranque en la imagen correcta.

tempest# show version

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Documents: http://www.cisco.com/en/US/products/ps9372/tsd_products_support_serie

s_home.html

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained herein are owned by

other third parties and are used and distributed under license.

Some parts of this software are covered under the GNU Public

License. A copy of the license is available at

http://www.gnu.org/licenses/gpl.html.

Software

BIOS:      version 2.1.17

loader:    version N/A

kickstart: version 8.3(1)

system:    version 8.3(1)

BIOS compile time:       01/08/14

system image file is:    bootflash:///m9100-s5ek9-mz.8.3.1.bin

system compile time:     7/30/2018 12:00:00 [07/12/2018 19:32:46]

Hardware

cisco MDS 9148S 16G 48 FC (1 Slot) Chassis ("2/4/8/16 Gbps FC/Supervisor")

Motorola, e500v2 with 4088556 kB of memory.

Processor Board ID JAE18250A8C

Device name: tempest

bootflash:    4018896 kB

Kernel uptime is 0 day(s), 0 hour(s), 47 minute(s), 44 second(s)

Last reset at 362296 usecs after Wed Aug  8 13:02:31 2018

Reason: Reset Requested by CLI command reload

System version: 8.1(1)

Service:

plugin

Core Plugin

tempest# config t

Enter configuration commands, one per line.  End with CNTL/Z.

tempest(config)# boot kickstart bootflash:m9100-s5ek9-kickstart-mz.8.3.1.bin

Performing image verification and compatibility check, please wait....

tempest(config)# boot system bootflash:m9100-s5ek9-mz.8.3.1.bin

Performing image verification and compatibility check, please wait....

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.3.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.3.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

8. Guarde la configuración en ejecución del switch.

tempest# copy running-config startup-config

[########################################] 100%

Copy complete.

tempest#