Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Configurar

Diagrama de la red

Configuraciones

Verificación

Troubleshoot

Comandos para resolución de problemas

Ejemplo de resultado del comando debug

Configuración errónea del modo de túnel

Información Relacionada

Introducción

Este documento describe cómo configurar la encapsulación de ruteo genérico (GRE) sobre IPSec entre un Cisco VPN 5000 Series Concentrator y un router Cisco que ejecuta Cisco IOS® Software. La función GRE sobre IPSec se introduce en la versión de software del VPN 5000 Concentrator 6.0(19).

En este ejemplo, el ruteo estático se utiliza para rutear paquetes a través del túnel.

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Versión 12.2(3) del software Cisco IOS

- Software Cisco VPN 5000 Concentrator versión 6.0(19)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Convenciones

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos usados en este documento, utilice la Command Lookup Tool (sólo clientes registrados) .

Diagrama de la red

Este documento utiliza la configuración de red que se muestra en el siguiente diagrama.

El GRE sobre IPSec se configura entre el router 1720-1 que ejecuta el software Cisco IOS y el concentrador VPN 5002. Detrás del router y del concentrador VPN, hay varias redes que se anuncian a través de OSPF (Open Shortest Path First, trayecto más corto abierto primero). OSPF se ejecuta dentro del túnel GRE entre el router y el concentrador VPN.

- Estas redes están detrás del router 1720-1.

- 10.1.1.0/24

- 10.1.2.0/24

- 10.1.3.0/24

- Estas redes están detrás del VPN 5002 Concentrator.

- 20.1.1.0/24

- 20.1.2.0/24

- 20.1.3.0/24

Configuraciones

Este documento usa estas configuraciones.

- Router 1720-1

- Concentrador VPN 5002

Nota: Con Cisco IOS Software Releases 12.2(13)T y posteriores (códigos T-train con número más alto, 12.3 y códigos posteriores), debe aplicar el mapa criptográfico IPSec configurado solamente a la interfaz física. Ya no tiene que aplicar el mapa criptográfico en la interfaz de túnel GRE. Tener el mapa criptográfico en las interfaces física y de túnel cuando utiliza Cisco IOS Software Releases 12.2.13(13)T y posteriores todavía debería funcionar, pero Cisco Systems recomienda que aplique el mapa criptográfico solamente en la interfaz física.

Router 1720-1

Current configuration : 1305 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-1

!

no logging buffered

no logging monitor

enable secret 5 $1$vIzI$RqD0LqlqbSFCCjVELFLfH/

!

memory-size iomem 15

ip subnet-zero

no ip domain-lookup

!

ip audit notify log

ip audit po max-events 100

ip ssh time-out 120

ip ssh authentication-retries 3

!

crypto isakmp policy 1

hash md5

authentication pre-share

crypto isakmp key cisco123 address 172.16.172.21

!

!

crypto ipsec transform-set myset esp-des esp-md5-hmac

mode transport

!

crypto map vpn 10 ipsec-isakmp

set peer 172.16.172.21

set transform-set myset

match address 102

!

cns event-service server

!

!

!

interface Tunnel0

ip address 50.1.1.1 255.255.255.252

tunnel source FastEthernet0

tunnel destination 172.16.172.21

crypto map vpn

!

interface FastEthernet0

ip address 172.16.172.39 255.255.255.240

speed auto

crypto map vpn

!

interface Serial0

ip address 10.1.1.2 255.255.255.0

encapsulation ppp

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.172.33

ip route 10.1.0.0 255.255.0.0 10.1.1.1

ip route 20.1.0.0 255.255.0.0 Tunnel0

no ip http server

!

access-list 102 permit gre host 172.16.172.39 host 172.16.172.21

!

line con 0

line aux 0

line vty 0 4

password cisco

login

!

no scheduler allocate

end

Concentrador VPN 5002

[ General ]

VPNGateway               = 172.16.172.17

EthernetAddress          = 00:05:32:3e:90:40

DeviceType               = VPN 5002/8 Concentrator

ConfiguredOn             = Timeserver not configured

ConfiguredFrom           = Command Line, from Console

[ IKE Policy ]

Protection               = SHA_DES_G1

Protection               = MD5_DES_G2

Protection               = MD5_DES_G1

[ Tunnel Partner VPN 1 ]

KeyLifeSecs              = 3500

KeepaliveInterval        = 120

TunnelType               = GREinIPSec

InactivityTimeout        = 120

Transform                = ESP(MD5,DES)

BindTo                   = "Ethernet 1:0"

SharedKey                = "cisco123"

Certificates             = Off

Mode                     = Main

KeyManage                = Reliable

Partner                  = 172.16.172.39

[ IP VPN 1 ]

HelloInterval            = 10

SubnetMask               = 255.255.255.252

IPAddress                = 50.1.1.2

DirectedBroadcast        = Off

Numbered                 = On

Mode                     = Routed

[ IP Ethernet 1:0 ]

Mode                     = Routed

SubnetMask               = 255.255.255.240

IPBroadcast              = 172.16.172.32

IPAddress                = 172.16.172.21

[ IP Ethernet 0:0 ]

Mode                     = Routed

IPBroadcast              = 20.1.1.255

SubnetMask               = 255.255.255.0

IPAddress                = 20.1.1.1

[ Logging ]

Level                    = Debug

LogToAuxPort             = On

Enabled                  = On

[ Ethernet Interface Ethernet 0:0 ]

DUPLEX                   = half

SPEED                    = 10meg

[ IP Static ]

0.0.0.0 0.0.0.0 20.1.1.5 1

10.1.1.0 255.255.255.0 VPN 1 1

10.1.2.0 255.255.255.0 VPN 1 1

10.1.3.0 255.255.255.0 VPN 1 1

Configuration size is 1696 out of 65500 bytes.

Verificación

En esta sección encontrará información que puede utilizar para confirmar que su configuración esté funcionando correctamente.

La herramienta Output Interpreter (sólo para clientes registrados) permite utilizar algunos comandos “show” y ver un análisis del resultado de estos comandos.

- Estos comandos se pueden ejecutar en el router Cisco IOS.

- show crypto isakmp sa: muestra todas las asociaciones de seguridad (SA) actuales de Internet Security Association y Key Management Protocol (ISAKMP).

- show crypto ipsec sa: muestra todas las SA IPSec actuales.

- show crypto engine connection active: muestra el contador de cifrado/descifrado de paquetes para cada SA IPSec.

- Puede ejecutar estos comandos en el VPN 5002 Concentrator.

- show system log buffer: muestra información básica de syslog.

- vpn trace dump: muestra información detallada sobre los procesos de VPN.

Troubleshoot

En esta sección encontrará información que puede utilizar para solucionar problemas de configuración.

Comandos para resolución de problemas

Nota: Antes de ejecutar comandos debug, consulte Información Importante sobre Comandos Debug.

Puede ejecutar estos comandos en el router Cisco IOS.

- debug crypto isakmp: muestra información detallada sobre la negociación de la fase I (Modo principal) del Intercambio de claves de Internet (IKE).

- debug crypto ipsec: muestra información detallada sobre la negociación de la fase II de IKE (modo rápido).

- debug crypto engine: depura el proceso de cifrado/descifrado de paquetes y Diffie-Hellman (DH).

Ejemplo de resultado del comando debug

Aquí se muestra el ejemplo de salida de depuración para el router y el concentrador VPN.

- Router del Cisco IOS

- Concentrador VPN 5002

Depuraciones en el router Cisco IOS

Aquí se muestra la salida de los comandos debug crypto isakmp y debug crypto ipsec en el router.

5d20h: ISAKMP (0:0): received packet from 172.16.172.21 (N) NEW SA

5d20h: ISAKMP: local port 500, remote port 500

5d20h: ISAKMP (0:81): processing SA payload. message ID = 0

5d20h: ISAKMP (0:81): found peer pre-shared key matching 172.16.172.21

5d20h: ISAKMP (0:81): Checking ISAKMP transform 1 against priority 1 policy

5d20h: ISAKMP:      encryption DES-CBC

5d20h: ISAKMP:      hash SHA

5d20h: ISAKMP:      auth pre-share

5d20h: ISAKMP:      default group 1

5d20h: ISAKMP (0:81): atts are not acceptable. Next payload is 3

5d20h: ISAKMP (0:81): Checking ISAKMP transform 2 against priority 1 policy

5d20h: ISAKMP:      encryption DES-CBC

5d20h: ISAKMP:      hash MD5

5d20h: ISAKMP:      auth pre-share

5d20h: ISAKMP:      default group 2

5d20h: ISAKMP (0:81): atts are not acceptable. Next payload is 3

5d20h: ISAKMP (0:81): Checking ISAKMP transform 3 against priority 1 policy

5d20h: ISAKMP:      encryption DES-CBC

5d20h: ISAKMP:      hash MD5

5d20h: ISAKMP:      auth pre-share

5d20h: ISAKMP:      default group 1

5d20h: ISAKMP (0:81): atts are acceptable. Next payload is 0

5d20h: ISAKMP (0:81): processing vendor id payload

5d20h: ISAKMP (0:81): SA is doing pre-shared key authentication

using id type ID_IPV4_ADDR

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) MM_SA_SETUP

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) MM_SA_SETUP

5d20h: ISAKMP (0:81): processing KE payload. message ID = 0

5d20h: ISAKMP (0:81): processing NONCE payload. message ID = 0

5d20h: ISAKMP (0:81): found peer pre-shared key matching 172.16.172.21

5d20h: ISAKMP (0:81): SKEYID state generated

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) MM_KEY_EXCH

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) MM_KEY_EXCH

5d20h: ISAKMP (0:81): processing ID payload. message ID = 0

5d20h: ISAKMP (0:81): processing HASH payload. message ID = 0

5d20h: ISAKMP (0:81): SA has been authenticated with 172.16.172.21

5d20h: ISAKMP (81): ID payload

next-payload : 8

type         : 1

protocol     : 17

port         : 500

length       : 8

5d20h: ISAKMP (81): Total payload length: 12

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): processing HASH payload. message ID = 241

5d20h: ISAKMP (0:81): processing SA payload. message ID = 241

5d20h: ISAKMP (0:81): Checking IPSec proposal 1

5d20h: ISAKMP: transform 1, ESP_DES

5d20h: ISAKMP:   attributes in transform:

5d20h: ISAKMP:      SA life type in seconds

5d20h: ISAKMP:      SA life duration (VPI) of  0x0 0x0 0xD 0xAC

5d20h: ISAKMP:      SA life type in kilobytes

5d20h: ISAKMP:      SA life duration (VPI) of  0x0 0x10 0x0 0x0

5d20h: ISAKMP:      encaps is 2

5d20h: ISAKMP:      authenticator is HMAC-MD5

5d20h: ISAKMP (0:81): atts are acceptable.

5d20h: IPSEC(validate_proposal_request): proposal part #1,

(key eng. msg.) dest= 172.16.172.39, src= 172.16.172.21,

dest_proxy= 172.16.172.39/255.255.255.255/47/0 (type=1),

src_proxy= 172.16.172.21/255.255.255.255/47/0 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 0s and 0kb,

spi= 0x0(0), conn_id= 0, keysize= 0, flags= 0x0

5d20h: ISAKMP (0:81): processing NONCE payload. message ID = 241

5d20h: ISAKMP (0:81): processing ID payload. message ID = 241

5d20h: ISAKMP (81): ID_IPV4_ADDR src 172.16.172.21 prot 47 port 0

5d20h: ISAKMP (0:81): processing ID payload. message ID = 241

5d20h: ISAKMP (81): ID_IPV4_ADDR dst 172.16.172.39 prot 47 port 0

5d20h: ISAKMP (0:81): asking for 1 spis from ipsec

5d20h: IPSEC(key_engine): got a queue event...

5d20h: IPSEC(spi_response): getting spi 895566248 for SA

from 172.16.172.21   to 172.16.172.39   for prot 3

5d20h: ISAKMP: received ke message (2/1)

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): Creating IPSec SAs

5d20h:         inbound SA from 172.16.172.21 to 172.16.172.39

(proxy 172.16.172.21 to 172.16.172.39)

5d20h:         has spi 0x356141A8 and conn_id 362 and flags 0

5d20h:         lifetime of 3500 seconds

5d20h:         lifetime of 1048576 kilobytes

5d20h:         outbound SA from 172.16.172.39   to 172.16.172.21

(proxy 172.16.172.39   to 172.16.172.21  )

5d20h:         has spi 337 and conn_id 363 and flags 0

5d20h:         lifetime of 3500 seconds

5d20h:         lifetime of 1048576 kilobytes

5d20h: ISAKMP (0:81): deleting node 241 error FALSE reason

"quick mode done (await()"

5d20h: IPSEC(key_engine): got a queue event...

5d20h: IPSEC(initialize_sas): ,

(key eng. msg.) dest= 172.16.172.39, src= 172.16.172.21,

dest_proxy= 172.16.172.39/0.0.0.0/47/0 (type=1),

src_proxy= 172.16.172.21/0.0.0.0/47/0 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 3500s and 1048576kb,

spi= 0x356141A8(895566248), conn_id= 362, keysize= 0, flags= 0x0

5d20h: IPSEC(initialize_sas): ,

(key eng. msg.) src= 172.16.172.39, dest= 172.16.172.21,

src_proxy= 172.16.172.39/0.0.0.0/47/0 (type=1),

dest_proxy= 172.16.172.21/0.0.0.0/47/0 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 3500s and 1048576kb,

spi= 0x151(337), conn_id= 363, keysize= 0, flags= 0x0

5d20h: IPSEC(create_sa): sa created,

(sa) sa_dest= 172.16.172.39, sa_prot= 50,

sa_spi= 0x356141A8(895566248),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 362

5d20h: IPSEC(create_sa): sa created,

(sa) sa_dest= 172.16.172.21, sa_prot= 50,

sa_spi= 0x151(337),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 363

5d20h: IPSEC(add_sa): peer asks for new SAs -- expire current in 120 sec.,

(sa) sa_dest= 172.16.172.21, sa_prot= 50,

sa_spi= 0x150(336),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 361,

(identity) local= 172.16.172.39, remote= 172.16.172.21,

local_proxy= 172.16.172.39/255.255.255.255/47/0 (type=1),

remote_proxy= 172.16.172.21/255.255.255.255/47/0 (type=1)

1720-1#

1720-1#show crypto isakmp sa

dst             src             state           conn-id    slot

172.16.172.39   172.16.172.21   QM_IDLE              81       0

1720-1#show crypto ipsec sa

interface: FastEthernet0

Crypto map tag: vpn, local addr. 172.16.172.39

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/0/0)

current_peer: 172.16.172.21

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1514, media mtu 1514

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/47/0)

current_peer: 172.16.172.21

PERMIT, flags={origin_is_acl,transport_parent,parent_is_transport,}

#pkts encaps: 34901, #pkts encrypt: 34901, #pkts digest 34901

#pkts decaps: 34900, #pkts decrypt: 34900, #pkts verify 34900

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1500, media mtu 1500

current outbound spi: 151

inbound esp sas:

spi: 0x356141A8(895566248)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 362, flow_id: 163, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046258/3306)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x151(337)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 363, flow_id: 164, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046258/3306)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

interface: Tunnel0

Crypto map tag: vpn, local addr. 172.16.172.39

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/0/0)

current_peer: 172.16.172.21

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1514, media mtu 1514

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/47/0)

current_peer: 172.16.172.21

PERMIT, flags={origin_is_acl,transport_parent,parent_is_transport,}

#pkts encaps: 35657, #pkts encrypt: 35657, #pkts digest 35657

#pkts decaps: 35656, #pkts decrypt: 35656, #pkts verify 35656

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1500, media mtu 1500

current outbound spi: 151

inbound esp sas:

spi: 0x356141A8(895566248)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 362, flow_id: 163, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046154/3302)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x151(337)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 363, flow_id: 164, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046154/3302)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

1720-1#show crypto engine connections active

ID Interface             IP-Address    State  Algorithm    Encrypt Decrypt

81 FastEthernet0  172.16.172.39   set  HMAC_MD5+DES_56_CB      0       0

362 FastEthernet0  172.16.172.39   set  HMAC_MD5+DES_56_CB      0   23194

363 FastEthernet0  172.16.172.39   set  HMAC_MD5+DES_56_CB  23195       0

Depuraciones en el concentrador VPN 5002

La salida de Syslog en el VPN Concentrator se muestra aquí.

VPN5002_8_323E9040: Main# VPN 0:1 opened for 172.16.172.39 from 172.16.172.39.

User assigned IP address 50.1.1.2

VPN5002_8_323E9040: Main#show vpn partner verbose

Port        Partner         Partner  Default  Bindto          Connect

Number      Address         Port     Partner  Address         Time

--------------------------------------------------------------------------

VPN 0:1     172.16.172.39   500      No       172.16.172.21   00:00:13:26

Auth/Encrypt: MD5e/DES  User Auth: Shared Key

Access: Static Peer: 172.16.172.39    Local: 172.16.172.21

Start:14518 seconds Managed:15299 seconds State:imnt_maintenance

IOP slot 1:

No active connections found.

VPN5002_8_323E9040: Main#show vpn statistics verbose

Current  In       High     Running  Script   Script   Script

Active   Negot    Water    Total    Starts   OK       Error

--------------------------------------------------------------

Users     0        0        0        0        0        0        0

Partners  1        0        1        81       81       1        158

Total     1        0        1        81       81       1        158

Stats             VPN0:1

Wrapped            79733

Unwrapped          79734

BadEncap               0

BadAuth                0

BadEncrypt             0

rx IP              79749

rx IPX                 0

rx Other               0

tx IP              79761

tx IPX                 0

tx Other               0

IKE rekey              0

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

IOP slot 1:

Current  In       High     Running  Script   Script   Script

Active   Negot    Water    Total    Starts   OK       Error

--------------------------------------------------------------

Users     0        0        0        0        0        0        0

Partners  0        0        0        0        0        0        0

Total     0        0        0        0        0        0        0

Stats

Wrapped

Unwrapped

BadEncap

BadAuth

BadEncrypt

rx IP

rx IPX

rx Other

tx IP

tx IPX

tx Other

IKE rekey

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

Configuración errónea del modo de túnel

El concentrador VPN 5000 propone el modo de transporte de forma predeterminada cuando se utiliza GRE sobre IPSec. Cuando el router del IOS de Cisco está mal configurado para el modo de túnel, se producen estos errores.

Aquí se muestra la salida de depuración en el router del IOS de Cisco.

2d21h: ISAKMP (0:23): Checking IPSec proposal 1

2d21h: ISAKMP: transform 1, ESP_DES

2d21h: ISAKMP: attributes in transform:

2d21h: ISAKMP: SA life type in seconds

2d21h: ISAKMP: SA life duration (VPI) of 0x0 0x1 0x51 0x80

2d21h: ISAKMP: SA life type in kilobytes

2d21h: ISAKMP: SA life duration (VPI) of 0x0 0x10 0x0 0x0

2d21h: ISAKMP: encaps is 2

2d21h: ISAKMP: authenticator is HMAC-MD5

2d21h: IPSEC(validate_proposal): invalid transform proposal flags -- 0x0

El registro en el VPN 5002 Concentrator muestra una entrada similar a esta salida.

lan-lan-VPN0:1:[172.16.172.39]: received notify from partner --

notify: NO PROPOSAL CHOSEN

Información Relacionada

- Anuncio de fin de venta de los concentradores Serie VPN 5000 de Cisco

- Página de soporte del concentrador VPN 5000 de Cisco

- Página de soporte para Cisco VPN 5000 Client

- Página de soporte de IPSec

- Soporte Técnico - Cisco Systems