Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Configurar

Diagrama de la red

Configuraciones

Configure la interfaz WAN y los parámetros de cifrado IKEv2 en el ASA del hub

Configuración de los parámetros IKEv2 en el ASA del hub

Creación de una Interfaz de Loopback y Plantilla Virtual

Cree un grupo de túnel y anuncie las IP de la interfaz de túnel a través de IKEv2 Exchange

Configuración del routing EIGRP en el ASA del hub

Configuración de las Interfaces en el Spoke ASA

Configuración de los Parámetros Crypto IKEv2 en el Spoke ASA

Configuración de la Interfaz de Túnel Virtual Estática en el Spoke ASA

Cree un Grupo de Túnel y Anuncie las IPs de la Interfaz de Túnel a través de IKEv2 Exchange

Configuración del Ruteo EIGRP en el Spoke ASA

Configuración de las interfaces en el router de radio

Configure los parámetros IKEv2 y AAA en el router de radio

Configuración de la Interfaz de Túnel Virtual Estática en el Router Spoke

Configuración del Ruteo EIGRP en el Router Spoke

Verificación

Troubleshoot

Información Relacionada

Introducción

Este documento describe cómo implementar una solución radial de interfaz de túnel virtual dinámico con EIGRP en Adaptive Security Appliance.

Prerequisites

Requirements

- Comprensión básica de las interfaces de túnel virtual en ASA

- Conectividad subyacente básica entre concentradores/radios/ISP

- Conocimientos básicos de EIGRP

- Adaptive Security Appliance versión 9.19(1) o superior

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Dos dispositivos ASAv, ambos versión 9.19(1). Utilizado para el spoke 1 y el hub

- Dos dispositivos Cisco IOS® v versión 15.9(3)M4. Uno para el dispositivo ISP, otro para Spoke 2.

- Dos hosts Ubuntu para el tráfico genérico destinado a los túneles

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Configurar

Diagrama de la red

Configuraciones

Configure la interfaz WAN y los parámetros de cifrado IKEv2 en el ASA del hub

Entre en el modo de configuración del hub.

interface g0/0

ip address 198.51.100.1 255.255.255.0

nameif OUTSIDE

Configuración de los parámetros IKEv2 en el ASA del hub

Cree una política IKEv2 que defina los parámetros de fase 1 de la conexión IKE.

crypto ikev2 policy 1      (The number is locally significant on the device, this determine the order in which the IKEv2 policies are presented to the peer)

encryption aes-256         (Defines the encryption parameter used to encrypt the initial communication between the devices)

integrity sha256           (Defines the integrity used to secure the initial communication between the devices)

group 21                   (Defines the Diffie-Hellman group used to protect the key exchange between devices)

prf sha256                 (Pseudo Random Function, an optional value to define, automatically chooses the value defined for integrity)

lifetime seconds 86400     (Controls the phase 1 rekey, specified in seconds. Optional value, as the default is 86400)

Cree una propuesta IKEv2 IPsec para definir los parámetros de fase 2 utilizados para proteger el tráfico.

crypto ipsec ikev2 ipsec-proposal NAME                (Name is locally signicant and is used as a reference point later in the configuration)

protocol esp encryption aes-256                       (specifies that Encapsulating Security Payload and aes-256 is used to encrypt the traffic traversing the tunnel)

protocol esp integrity sha-256                        (specifies that Encapsulating Security Payload and sha-256 is used to ensure the integrity of the traffic traversing the tunnel)

Cree un perfil IPsec que contenga la propuesta de IPsec.

crypto ipsec profile NAME                    (This name is referenced on the Virtual-Template Interface to allow the crypto parameters to be utilized)

set ikev2 ipsec-proposal NAME                (This is the name previously used when creating the ipsec-proposal)

Creación de una Interfaz de Loopback y Plantilla Virtual

interface loopback 1

ip address 172.16.50.254 255.255.255.255        (This IP address is used for all of the Virtual-Access Interfaces spawned from the Virtual-Template)

nameif LOOP1

interface Virtual-Template 1 type tunnel

ip unnumbered LOOP1                                (Borrows the IP address specified in Loopback1 for all Virtual-Access Interfaces)

nameif DVTI

tunnel source Interface OUTSIDE                    (Specifies the Interface that the tunnel terminates on, commonly used as the WAN Interface)

tunnel mode ipsec ipv4                             (Specifies that the mode uses ipsec, and uses ipv4)

tunnel protection ipsec profile NAME               (Reference the name of the previously created ipsec profile)

Cree un grupo de túnel y anuncie las IP de la interfaz de túnel a través de IKEv2 Exchange

Cree un grupo de túnel para especificar el tipo de túnel y el método de autenticación.

tunnel-group DefaultL2LGroup ipsec-attributes             ('DefaultL2LGroup' is a default tunnel-group used for hub DVTI with pre-shared keys, this applied with the virtual template allows dynamic spoke connections)

virtual-template 1                                        (This command ties the Virtual-Template previously created to the tunnel-group to allow for proper authentication and connection)

ikev2 remote-authentication pre-shared-key cisco123       (This specifies the remote authentication as a pre-shared-key with the key being cisco123)

ikev2 local-authentication pre-shared-key cisco123        (This specifies the local authentication as a pre-shared-key with the key being cisco123)

ikev2 route set Interface                                 (Advertises the VTI Interface IP over IKEv2 exchanges. Enables unicast reachability between VTI Interfaces for BGP or path monitoring to work over the tunnel)

Configuración del routing EIGRP en el ASA del hub

router eigrp 100

network 172.16.50.254 255.255.255.255         (Advertise the IP address of the Loopback used for the Virtual-Template. This is used to form an EIGRP neighborship via VTI connectivity)

Configuración de las Interfaces en el Spoke ASA

Configuración de la interfaz WAN.

interface g0/1

ip address 203.0.113.1 255.255.255.0

nameif OUTSIDE-SPOKE-1

Configuración de la interfaz LAN.

interface g0/0

ip address 10.45.0.4 255.255.255.0

nameif INSIDE-SPOKE-1

Configuración de una interfaz de loopback.

interface loopback1

ip address 172.16.50.1 255.255.255.255

nameif Loop1

Configuración de los Parámetros Crypto IKEv2 en el Spoke ASA

Cree una política IKEv2 que coincida con los parámetros del hub.

crypto ikev2 policy 1

encryption aes-256

integrity sha256

group 21

prf sha256

lifetime 86400

Cree una propuesta de IPsec IKEv2 que coincida con los parámetros del hub.

crypto ipsec ikev2 ipsec-proposal NAME           (Name is locally signicant, this does not need to match the hub device)

protocol esp encryption aes-256

protocol esp integrity sha-256

Cree un perfil IPsec que contenga la propuesta de IPsec.

crypto ipsec profile NAME               (This name is locally significant and is referenced in the SVTI configuration)

set ikev2 ipsec-proposal NAME           (This is the name previously used when creating the ipsec-proposal)

Configuración de la Interfaz de Túnel Virtual Estática en el Spoke ASA

Configure una interfaz de túnel virtual estática que apunte al hub. Los dispositivos spoke configuran interfaces de túnel virtual estáticas regulares al hub; sólo el hub requiere una plantilla virtual.

interface tunnel1

ip unnumbered loopback1

nameif ASA-SPOKE-SVTI

tunnel destination  198.51.100.254          (Tunnel destination references the Hub ASA tunnel source. Commonly referred to as the WAN address)

tunnel mode ipsec ipv4

tunnel protection ipsec profile NAME

Cree un Grupo de Túnel y Anuncie las IPs de la Interfaz de Túnel a través de IKEv2 Exchange

tunnel-group 198.51.100.1 type ipsec-l2l                   (This specifies the connection type as ipsec-L2L (Lan-to-Lan), using the IKE ID of the hub device)

tunnel-group 198.51.100.1 ipsec-attributes                 (Ipsec attributes allows you to make changes to the method of authentication and parameters used)

ikev2 remote-authentication pre-shared-key cisco123

ikev2 local-authentication pre-shared-key cisco123

ikev2 route set Interface

Configuración del Ruteo EIGRP en el Spoke ASA

Cree un sistema autónomo EIGRP y aplique las redes deseadas que se anunciarán.

router eigrp 100

network 10.45.0.0 255.255.255.0                          (Advertises the Host-A network to the hub. This allows the hub to notify connecting spokes how to reach this network)

network 172.16.50.1 255.255.255.255                      (Advertises and utilizes the tunnel IP address to form an EIGRP neighborship)

Configuración de las interfaces en el router de radio

interface g0/0

ip address 192.0.2.1 255.255.255.0

no shut

interface g0/1

ip address 10.12.0.2

no shut

interface loopback1

ip address 172.16.50.2 255.255.255.255

Configure los parámetros IKEv2 y AAA en el router de radio

Cree una propuesta IKEv2 para que coincida con los parámetros de la fase 1 en el ASA.

crypto ikev2 proposal NAME       (These parameters must match the ASA IKEv2 Policy)

encryption aes-cbc-256           (aes-cbc-256 is the same as the ASA aes-256. However, AES-GCM of any variant is not the same, and is not a matching parameter with plain AES)

integrity sha256

group 21

Cree una política IKEv2 para adjuntar las propuestas.

crypto ikev2 policy NAME

proposal NAME               (This is the name of the IKEv2 proposal created in the step ikev2)

Cree una política de autorización IKEv2.

crypto ikev2 authorization policy NAME      (IKEv2 authorization policy serves as a container of IKEv2 local AAA group authorization parameters)

route set Interface

Active AAA en el dispositivo.

aaa new-model

Cree una red de autorización AAA.

aaa authorization network NAME local                (Creates a name and method for aaa authorization that is referenced in the IKEv2 profile along with the IKEv2 authorization policy)

Cree un perfil IKEv2 que contenga un repositorio de los parámetros no negociables de la SA IKE, como identidades locales o remotas y métodos de autenticación.

crypto ikev2 profile NAME

match identity remote address  198.51.100.1    (Used to match the address of the Hub VTI source Interface, can also be 0.0.0.0 to match any peer address but this is not best practice)

identity local address  192.0.2.1              (Defines the local IKE-ID of the router for this IKEv2 profile)

authentication remote pre-share key cisco123

authentication local pre-share key cisco123

no config-exchange request                     (Applies to Cisco IOS, Cisco IOS-XE devices do this by default. This stops the device from sending IKEv2 config-exchange requests to the ASA, which is unsupported on the ASA)

aaa authorization group psk list NAME NAME     (Specifies an AAA method list and username for group. The first NAME is the aaa network name, the second NAME is the IKEv2 authorization policy)

Cree un conjunto de transformación para definir los parámetros de cifrado y de hash utilizados para proteger el tráfico tunelado.

crypto ipsec transform-set NAME esp aes 256 esp-sha256-hmac

Cree un perfil IPSec de cifrado para alojar el conjunto de transformación y el perfil IKEv2.

crypto ipsec profile NAME                  (Define the name of the ipsec-profile)

set transform-set NAME                     (Reference the name of the created transform set)

set ikev2-profile NAME                     (Reference the name of the created IKEv2 profile)

Configuración de la Interfaz de Túnel Virtual Estática en el Router Spoke

Configure una interfaz de túnel virtual estática que apunte al hub.

interface tunnel1

ip unnumbered loopback1

tunnel source g0/0

tunnel mode ipsec ipv4

tunnel destination 198.51.100.1

tunnel protection ipsec profile NAME             (Reference the name of the created ipsec profile. This applies the IKEv2 and transform set parameters to the tunnel Interface)

Configuración del Ruteo EIGRP en el Router Spoke

Cree un sistema autónomo EIGRP y aplique las redes deseadas que se anunciarán.

router eigrp 100

network 172.16.50.2 0.0.0.0             (Routers advertise EIGRP networks with the wildcard mask. This advertises the tunnel IP address to allow the device to form an EIGRP neighborship via the tunnel)

network 10.12.0.0 0.0.0.255             (Advertises the Host-B network to the hub. This allows the hub to notify connecting spokes how to reach this network

Verificación

Utilize esta sección para confirmar que su configuración funcione correctamente.

Routing de ASA:

show run router

show eigrp topology

show eigrp neighbors

show route [eigrp]

Cifrado ASA:

show run crypto ikev2

show run crypto ipsec

show run tunnel-group [NAME]

show crypto ikev2 sa

show crypto ipsec sa peer X.X.X.X

ASA Virtual-Template y Virtual-Accesses:

show run interface virtual-template # type tunnel

show interface virtual-access #

Routing de Cisco IOS:

show run | sec eigrp

show ip eigrp topology

show ip eigrp neighbors

show ip route

show ip route eigrp

Cisco IOS Crypto:

show run | sec cry

show crypto ikev2 sa

show crypto ipsec sa peer X.X.X.X

Interfaz de túnel de Cisco IOS:

show run interface tunnel#

Troubleshoot

En esta sección se brinda información que puede utilizar para resolver problemas en su configuración.

Depuraciones de ASA:

debug crypto ikev2 platform 255

debug crypto ikev2 protocol 255

debug crypto ipsec 255

debug ip eigrp #

debug ip eigrp neighbor X.X.X.X

Depuraciones de Cisco IOS:

debug crypto ikev2

debug crypto ikev2 error

debug crypto ikev2 packet

debug crypto ikev2 internal

debug crypto ipsec

debug crypto ipsec error

debug ip eigrp #

debug ip eigrp neighbor X.X.X.X

Información Relacionada

- Asistencia técnica y descargas de Cisco