Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Configurar

Diagrama de la red

Configuraciones de router local

Configuración final del router local

Configuración ISP

Configuración final del router remoto

Verificación

Troubleshoot

Introducción

Este documento describe una configuración para configurar un túnel IPv6, basado en ruta, de sitio a sitio entre dos routers Cisco que utilizan el protocolo Intercambio de claves de Internet versión 2 (IKEv2).

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Conocimientos fundamentales de la configuración CLI de Cisco IOS®/Cisco IOS® XE

- Conocimientos fundamentales de los protocolos IPsec y ISAKMP (Internet Security Association and Key Management Protocol)

- Comprensión del direccionamiento y el routing IPv6

Componentes Utilizados

La información que contiene este documento se basa en estas versiones de software:

- Cisco IOS XE con 17.03.04a como router local

- Cisco IOS que ejecuta 17.03.04a como router remoto

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Configurar

Diagrama de la red

Configuraciones de router local

Paso 1. Habilitación del routing unidifusión IPv6.

ipv6 unicast-routing

Paso 2. Configure las interfaces del router.

interface GigabitEthernet1

ipv6 address 2001:DB8:1::1/64

no shutdown

interface GigabitEthernet2

ipv6 address FC00::1/64

no shutdown

Paso 3. Establecer la ruta predeterminada de IPv6.

ipv6 route ::/0 GigabitEthernet1

Paso 4. Configuración De La Propuesta Ikev2.

crypto ikev2 proposal IKEv2-PROP

encryption aes-cbc-128

integrity sha1

group 14

Paso 5. Configuración De La Política Ikev2.

crypto ikev2 policy IKEv2-POLI

proposal IKEv2-PROP

Paso 6. Configure el llavero con una clave previamente compartida.

crypto ikev2 keyring IPV6_KEY

peer Remote_IPV6

address 2001:DB8:2::2/64

pre-shared-key cisco123

Paso 7. Configure el perfil Ikev2.

crypto ikev2 profile IKEV2-PROF

match identity remote address 2001:DB8:2::2/64

authentication remote pre-share

authentication local pre-share

keyring local IPV6_KEY

Paso 8. Configure la política de la Fase 2.

crypto ipsec transform-set ESP-AES-SHA esp-aes esp-sha-hmac

mode tunnel

Paso 9. Configure el perfil IPsec.

crypto ipsec profile IPSEC-PROF

set transform-set ESP-AES-SHA

set ikev2-profile IKEV2-PROF

Paso 10. Configure la interfaz de túnel.

interface Tunnel1

ipv6 address 2001:DB8:3::1/64

tunnel source GigabitEthernet1

tunnel mode ipsec ipv6

tunnel destination 2001:DB8:2::2

tunnel protection ipsec profile IPSEC-PROF

end

Paso 11. Configure las rutas para el tráfico interesante.

ipv6 route FC00::/64 2012::1

Configuración final del router local

ipv6 unicast-routing

!

interface GigabitEthernet1

ipv6 address 2001:DB8:1::1/64

no shutdown

!

interface GigabitEthernet2

ipv6 address FC00::1/64

no shutdown

!

ipv6 route ::/0 GigabitEthernet1

!

crypto ikev2 proposal IKEv2-PROP

encryption aes-cbc-128

integrity sha1

group 14

!

crypto ikev2 policy IKEv2-POLI

proposal IKEv2-PROP

!

crypto ikev2 keyring IPV6_KEY

peer Remote_IPV6

address 2001:DB8:2::2/64

pre-shared-key cisco123

!

crypto ikev2 profile IKEV2-PROF

match identity remote address 2001:DB8:2::2/64

authentication remote pre-share

authentication local pre-share

keyring local IPV6_KEY

!

crypto ipsec transform-set ESP-AES-SHA esp-aes esp-sha-hmac

mode tunnel

!

crypto ipsec profile Prof1

set transform-set ESP-AES-SHA

!

crypto ipsec profile IPSEC-PROF

set transform-set ESP-AES-SHA

set ikev2-profile IKEV2-PROF

!

interface Tunnel1

ipv6 address 2001:DB8:3::1/64

tunnel source GigabitEthernet1

tunnel mode ipsec ipv6

tunnel destination 2001:DB8:2::2

tunnel protection ipsec profile IPSEC-PROF

end

!

ipv6 route FC00::/64 2012::1

Configuración ISP

ipv6 unicast-routing

!

!

interface GigabitEthernet1

description Link to R1

ipv6 address 2001:DB8:1::2/64

!

interface GigabitEthernet2

description Link to R3

ipv6 address 2001:DB8:2::1/64

!

!

!

ipv6 route 2001:DB8:1::/64 GigabitEthernet1

ipv6 route 2001:DB8:2::/64 GigabitEthernet2

!

Configuración final del router remoto

ipv6 unicast-routing

!

interface GigabitEthernet1

ipv6 address 2001:DB8:2::2/64

no shutdown

!

interface GigabitEthernet2

ipv6 address FC00::2/64

no shutdown

!

ipv6 route ::/0 GigabitEthernet1

!

crypto ikev2 proposal IKEv2-PROP

encryption aes-cbc-128

integrity sha1

group 14

!

crypto ikev2 policy IKEv2-POLI

proposal IKEv2-PROP

!

crypto ikev2 keyring IPV6_KEY

peer Remote_IPV6

address 2001:DB8:1::1/64

pre-shared-key cisco123

!

crypto ikev2 profile IKEV2-PROF

match identity remote address 2001:DB8:1::1/64

authentication remote pre-share

authentication local pre-share

keyring local IPV6_KEY

!

crypto ipsec transform-set ESP-AES-SHA esp-aes esp-sha-hmac

mode tunnel

!

crypto ipsec profile Prof1

set transform-set ESP-AES-SHA

!

crypto ipsec profile IPSEC-PROF

set transform-set ESP-AES-SHA

set ikev2-profile IKEV2-PROF

!

interface Tunnel1

ipv6 address 2001:DB8:3::2/64

tunnel source GigabitEthernet1

tunnel mode ipsec ipv6

tunnel destination 2001:DB8:1::1

tunnel protection ipsec profile IPSEC-PROF

end

!

ipv6 route FC00::/64 2012::1

Verificación

On Router 1

R1#show crypto ikev2 sa

IPv4 Crypto IKEv2  SA

IPv6 Crypto IKEv2  SA

Tunnel-id    fvrf/ivrf              Status

2          none/none             READY

Local  2001:DB8:1::1/500

Remote  2001:DB8:2::2/500

Encr: AES-CBC, keysize: 256, PRF: SHA256, Hash: SHA256, DH Grp:14, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/75989 sec

R1#show crypto ipsec sa

interface: Tunnel1

Crypto map tag: Tunnel1-head-0, local addr 2001:DB8:1::1

protected vrf: (none)

local  ident (addr/mask/prot/port): (::/0/0/0)

remote ident (addr/mask/prot/port): (::/0/0/0)

current_peer 2001:DB8:2::2 port 500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 14, #pkts encrypt: 14, #pkts digest: 14

#pkts decaps: 14, #pkts decrypt: 14, #pkts verify: 14

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 2001:DB8:1::1,

remote crypto endpt.: 2001:DB8:2::2

plaintext mtu 1422, path mtu 1500, ipv6 mtu 1500, ipv6 mtu idb GigabitEthernet1

current outbound spi: 0x9DC2A6F6(2646779638)

PFS (Y/N): N, DH group: none

inbound esp sas:

spi: 0x18569EF7(408329975)

transform: esp-aes esp-sha-hmac ,

in use settings ={Tunnel, }

conn id: 2104, flow_id: CSR:104, sibling_flags FFFFFFFF80000049, crypto map: Tunnel1-head-0

sa timing: remaining key lifetime (k/sec): (4608000/1193)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x9DC2A6F6(2646779638)

transform: esp-aes esp-sha-hmac ,

in use settings ={Tunnel, }

conn id: 2103, flow_id: CSR:103, sibling_flags FFFFFFFF80000049, crypto map: Tunnel1-head-0

sa timing: remaining key lifetime (k/sec): (4608000/1193)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

outbound ah sas:

outbound pcp sas:

On Router 2

R2#show crypto ikev2 sa

IPv4 Crypto IKEv2  SA

IPv6 Crypto IKEv2  SA

Tunnel-id    fvrf/ivrf              Status

1          none/none             READY

Local  2001:DB8:2::2/500

Remote  2001:DB8:1::1/500

Encr: AES-CBC, keysize: 256, PRF: SHA256, Hash: SHA256, DH Grp:14, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/19 sec

R2#show cryto ipsec sa

interface: Tunnel1

Crypto map tag: Tunnel1-head-0, local addr 2001:DB8:2::2

protected vrf: (none)

local  ident (addr/mask/prot/port): (::/0/0/0)

remote ident (addr/mask/prot/port): (::/0/0/0)

current_peer 2001:DB8:1::1 port 500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 14, #pkts encrypt: 14, #pkts digest: 14

#pkts decaps: 14, #pkts decrypt: 14, #pkts verify: 14

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 2001:DB8:2::2,

remote crypto endpt.: 2001:DB8:1::1

plaintext mtu 1422, path mtu 1500, ipv6 mtu 1500, ipv6 mtu idb GigabitEthernet1

current outbound spi: 0xEF1D3BA2(4011670434)

PFS (Y/N): N, DH group: none

inbound esp sas:

spi: 0x9829B86D(2552871021)

transform: esp-aes esp-sha-hmac ,

in use settings ={Tunnel, }

conn id: 2006, flow_id: CSR:6, sibling_flags FFFFFFFF80000049, crypto map: Tunnel1-head-0

sa timing: remaining key lifetime (k/sec): (4608000/3556)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0xEF1D3BA2(4011670434)

transform: esp-aes esp-sha-hmac ,

in use settings ={Tunnel, }

conn id: 2005, flow_id: CSR:5, sibling_flags FFFFFFFF80000049, crypto map: Tunnel1-head-0

sa timing: remaining key lifetime (k/sec): (4607998/3556)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

outbound ah sas:

outbound pcp sas:

Troubleshoot

Para resolver problemas del túnel, utilice estos comandos debug:

- debug crypto ikev2

- debug crypto ikev2 error

- debug crypto ipsec

- debug crypto ipsec error