Contenido

Introducción

Background

Óptica

Interfaz

Velocidad de puerto

Mecanismo de señalización de fallas

Óptica ajustable DWDM

IPoDWDM: DSP coherente

Resolución de problemas detallada

Primeras cosas que hay que comprobar

Alarmas

Show Controller Optics

DSP coherente

Show Controllers PHY

NPU

Summary

Recopilar registros

Introducción

Este documento describe cómo resolver problemas de interfaz inactiva o de inestabilidad de interfaz.

Este documento es específico de Cisco IOS®XR, pero no se limita a una versión de software específica.

Este documento es específico de la plataforma NCS.

Background

Hay múltiples razones por las que la interfaz se interrumpe o puede ocurrir la inestabilidad de la interfaz. Los links pueden caer debido a múltiples dispositivos como se muestra en la imagen 1. Muestra un router NCS con un puerto del panel frontal conectado a la NPU (unidad de procesador de red) a través de un dispositivo PHY (capa física) entre ambos (conocidos como puertos basados en PHY). Hay plataformas en las que los puertos del panel frontal están conectados directamente a la NPU (conocidos como puertos PHYless). Un único router puede tener ambas variantes.

Imagen 1

Óptica

Interfaz

Tenga en cuenta que una interfaz siempre se describe de esta manera en Cisco IOS XR.

R/S/I/P: Rack/Slot/Instance/Port/Breakout

R/S/I/P/B: Rack/Ranura/Instancia/Puerto/

Velocidad de puerto

Algunas plataformas/tarjetas de línea admiten varias velocidades en algunos puertos. Algunos ejemplos son: 1/10 GE, 25/40 GE, 40/100 GE, 1/10/25 GE.

La velocidad se puede configurar en cada puerto individual o por grupo de puertos. Consulte la documentación del hardware para la asignación de puertos en NCS. Compruebe si la velocidad del puerto está establecida correctamente. Algunos puertos pueden detectar automáticamente la velocidad, otros necesitan configuración.

Algunos puertos se pueden configurar por grupo (normalmente un quad: un grupo de cuatro).

Por ejemplo:

(config)#hw-module quad 0 location 0/0/CPU0 mode ?

WORD  10g or 25g

Algunos puertos se pueden configurar individualmente. Estos suelen ser los puertos de 100 G. La velocidad predeterminada es 100 G, pero puede configurar 40 G.

Por ejemplo:

(config)#controller optics 0/0/1/0

(config-Optics)#speed 40g

Mecanismo de señalización de fallas

Tenga en cuenta que un mecanismo de señalización de fallas de link puede desempeñar un papel cuando usted resuelve el problema de la interfaz. En 10G y superiores, hay un mecanismo de señalización de fallas de link incluido en la capa PHY. Por lo tanto, cuando se detecta un fallo local, se informa al extremo remoto.

Imagen 2

En la interfaz GigE, no existe tal mecanismo a bordo. Compruebe si "oam ethernet" está configurado como alternativa.

Por ejemplo:

interface GigabitEthernet0/6/0/2

ethernet oam

uni-directional link-fault detection

action

uni-directional link-fault efd

Óptica ajustable DWDM

En la óptica DWDM que admite el ajuste de frecuencia, utilice esta configuración para establecer la frecuencia que se puede utilizar (en función de la configuración del circuito DWDM por parte del proveedor del circuito):

Éste es el comando:

controller optics 0/6/0/2

dwdm-carrier {100MHz-grid | 50GHz-grid} frequency {frequency}

Compruebe los parámetros:

RP/0/RP0/CPU0:NCS-5508#show controllers optics 0/6/0/2 dwdm-carrier-map

DWDM Carrier Band:: OPTICS_C_BAND

MSA ITU channel range supported: 1~96

DWDM Carrier Map table

----------------------------------------------------

ITU Ch      G.694.1     Frequency     Wavelength

Num        Ch Num        (THz)          (nm)

----------------------------------------------------

1       -35           191.35      1566.723

----------------------------------------------------

2       -34           191.40      1566.314

----------------------------------------------------

3       -33           191.45      1565.905

----------------------------------------------------

4       -32           191.50      1565.496

----------------------------------------------------

...

----------------------------------------------------

95        59           196.05      1529.163

----------------------------------------------------

96        60           196.10      1528.773

----------------------------------------------------

En la óptica de DWDM, todos los ajustes específicos de DWDM se realizan bajo la configuración de dwdm del controlador :

RP/0/RP0/CPU0:NCS-5508(config)#controller dwdm 0/6/0/2 ?

admin-state       Configure the transport admin state of the controller: in-service, out-of-service or maintenance

g709              Configure G709 parameters

laser             To be deprecated and removed in 7.5.1 release

log               Proactive log

loopback          Configure loopback mode

network           Configure DWDM network information

pm                Configure pm parameters

proactive         Enable Proactive Protection Feature

rx-los-threshold  Configure transponder receive power LOS threshold

transmit-power    Configure transponder transmit power

vtxp-monitor      Enable VTXP monitoring function

wavelength        Configure ITU Channel, Wavelength and Frequency

<cr>

RP/0/RP0/CPU0:NCS-5508(config-dwdm)#g709 fec ?

15sdfec                       15%-SD Forward Error Correction

15sdfecde                     15%-SD Forward Error Correction with Diff

ci-bch                        Continuously Interleaved BCH FEC

disable                       Disable FEC

enhanced                      Enhanced FEC mode

high-gain                     To be deprecated and removed in 7.5.1 release

high-gain-hd-fec              7% HD FEC (Staircase FEC)

high-gain-multivendor-hd-fec  7% HD FEC (Staircase FEC) Multivendor Interoperable

high-gain-sd-fec              7% CISCO SD FEC (Soft-Decision FEC)

long-haul                     To be deprecated and removed in 7.5.1 release

long-haul-hd-fec              20% HD FEC (Staircase FEC)

long-haul-sd-fec              20% CISCO SD FEC (Soft-Decision FEC)

standard                      Standard FEC mode

IPoDWDM: DSP coherente

El DSP coherente admite velocidades de alta velocidad (100/200/400 G) en largas distancias. El procesamiento de DWDM se gestiona mediante DSP coherente (procesador de señales digitales).

Ejemplos de tales módulos NCS: NC55-6X200-DWDM-S o NC55-MPA-2TH-S (con CFP2-WDM-D-1HL)

RP/0/RP0/CPU0:NCS-5508(config)# controller coherentDSP 0/6/0/0

RP/0/RP0/CPU0:NCS-5508(config-CoDSP)#fec ?

CFEC                 Forward Error Correction C_FEC

EnhancedHG20         Forward Error Correction Enhanced_HG20

EnhancedHG7          Forward Error Correction Enhanced_HG7

EnhancedI4           Forward Error Correction Enhanced_I_4

EnhancedI7           Forward Error Correction Enhanced_I_7

EnhancedSD15         Forward Error Correction Soft-Decision 15

EnhancedSD15DE       Forward Error Correction Soft-Decision 15 with DE

EnhancedSD20         Forward Error Correction Soft-Decision 20

EnhancedSD27         Forward Error Correction Soft-Decision 27

EnhancedSD7          Forward Error Correction Soft-Decision 7

EnhancedStaircaseDE  Forward Error Correction Enhanced Staircase FEC with DE

EnhancedSwizzle      Forward Error Correction Enhanced_Swizzle

OFEC                 Forward Error Correction O_FEC

Standard             Forward Error Correction Standard

none                 No Forward Error Correction

Resolución de problemas detallada

En esta sección se tratan las técnicas/depuración básicas desde la perspectiva óptica.

Primeras cosas que hay que comprobar

Verifique si la óptica aparece en el inventario. Si no se muestra la óptica, compruebe si está insertada correctamente en R/S/I/P y si se utilizan cables sin problemas.

++++++++++ show inventory details [18:06:56.572 UTC Thu Apr 06 2023] ++++++++++

NAME: "0/RP0", DESCR: "NC55A1 24Q6H SS Route Processor Card"

PID: NCS-55A1-24Q6H-SS , VID: V01, SN: FOC2528002Q

MFG_NAME: Cisco Systems, Inc., SNMP_IDX: 1 , Type: Module

PN: 73-20057-02

NAME: "TenGigE0/0/0/0", DESCR: "Cisco SFP+ 10G ZR Pluggable Optics Module"

PID: SFP-10G-ZR , VID: V02, SN: BD211218N1T

MFG_NAME: CISCO-PRE , SNMP_IDX: 2129921 , Type: Module

PN: TSFP10G-1558.17

NAME: "TenGigE0/0/0/1", DESCR: "Cisco SFP+ 10G ZR Pluggable Optics Module"

PID: SFP-10G-ZR , VID: V02, SN: BD211218N3K

MFG_NAME: CISCO-PRE , SNMP_IDX: 2134017 , Type: Module

PN: TSFP10G-1557.36

RP/0/RP0/CPU0:NCS-5501#show controllers te0/0/0/14 internal

Internal data for interface: TenGigE0/0/0/14

Subport Number      : 255

Port Number         : 14 *

Bay Number          : 0 *

Board Type          : 0x60020201 *

Port Type           : 10GE *

Bandwidth(Kbps)     : 10000000 *

Transport mode      : LAN *

BIA MAC addr        : 008a:9617:4838

Oper. MAC addr      : 008a:9617:4838

Egress MAC addr     : 008a:9617:4838

Port Available      : true *

Status polling is   : disabled *

Status events are   : disabled

I/F Handle          : 0x00000158 *

Cfg Link Enabled    : enabled

H/W Tx Enable       : yes

MTU                 : 1514 *

H/W Speed           : 10 Gbps *

H/W Duplex          : Full *

H/W Loopback Type   : None *

FEC                 : Not Configured *

H/W FlowCtrl Type   : Disabled *

H/W AutoNeg Enable  : Off *

H/W Link Defects    : No Fault *

Link Up             : yes *

Link Led Status     : Green ON *

Pluggable Present   : Yes *

Pluggable Type      : SFP+ 10G CU3M

Pluggable PID       : SFP-H10GB-CU3M *

Pluggable Compl.    : Failed - Bad Vendor CRC

Si no se reconoce el transceptor, compruebe si el tipo de transceptor es compatible aquí: https://tmgmatrix.cisco.com/.

El CRC del proveedor debe ser correcto.

Compruebe la potencia de la señal.

Requiere compatibilidad con DOM (supervisión óptica digital) en el transceptor.

RP/0/RP0/CPU0:BRU-SPCORE-P2#show controllers hundredGigE0/0/0/10 phy

QSFP8636 EEPROM port: 10

Xcvr Type: QSFP28

Ext Type: 3.5W, CLEI, TX CDR, RX CDR,

Connector Type: MPO

Ethernet Compliance Codes: 100G BASE-SR4,

BR, nominal: 25500 Mbps

Length SMF: 0KM, OM3: 70M, OM2: 0M, OM1: 0M, Cable: 50M

Deice Tech: 850nm VCSEL,

Vendor Name: CISCO-FINISAR

Vendor OUI: 00.90.65

Vendor Part Number: FTLC9555REPM-C1   (rev.: A )

Wavelength: 850.000 nm

Wavelength Tolerance: 10.000 nm

Vendor Serial Number: FIW2638016W

Date Code (yy/mm/dd): 22/09/13  lot code:

Diagnostic Monitoring Type: RX Avg, TX,

Enhanced Options: Init Complete Flag Impl,

Extended Module Codes:

Options:

L-Tx/Rx LOS:

L-Tx Fault:

L-Tx/Rx LOL:

Module DDM: Volt, Temp, TX Power, TX Bias, RX Power,

MSA Data (Lower Memory)

0x0000: 11 07 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0010: 00 00 00 00 00 00 1d 75 : 00 00 81 2f 00 00 00 00

0x0020: 00 00 20 b6 2e 9a 2d ba : 27 44 0d ed 0e 0c 0e 0c

0x0030: 0e 0c 28 46 2a dc 29 1f : 2a 72 00 00 00 00 00 00

0x0040: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0050: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 01 00 00

0x0060: 00 00 ff 00 00 00 00 00 : 00 01 1f 00 00 00 00 00

0x0070: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

MSA Data (Upper Memory Page 00)

0x0080: 11 dc 0c 80 00 00 00 00 : 00 00 00 05 ff 00 00 23

0x0090: 00 00 32 00 43 49 53 43 : 4f 2d 46 49 4e 49 53 41

0x00a0: 52 20 20 20 00 00 90 65 : 46 54 4c 43 39 35 35 35

0x00b0: 52 45 50 4d 2d 43 31 20 : 41 20 42 68 07 d0 46 ef

0x00c0: 02 07 ff f6 46 49 57 32 : 36 33 38 30 31 36 57 20

0x00d0: 20 20 20 20 32 32 30 39 : 31 33 20 20 0c 10 68 3a

0x00e0: 00 00 02 3c c0 ff c6 b6 : 3b 05 e6 30 86 bb 80 05

0x00f0: df 65 71 00 00 00 00 00 : 00 00 00 00 79 eb c1 06

CLEI Code: CMUIATKCAA

Part Number: FTLC9555REPM-C1 (ver.: V03)

Product Id: QSFP-100G-SR4-S

MSA Data (Upper Memory Page 02)

0x0180: 43 4d 55 49 41 54 4b 43 : 41 41 31 30 2d 33 31 34

0x0190: 32 2d 30 33 56 30 33 20 : 01 00 00 31 20 20 20 20

0x01a0: 20 66 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x01b0: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 aa aa

0x01c0: 51 53 46 50 2d 31 30 30 : 47 2d 53 52 34 2d 53 20

0x01d0: 20 20 20 20 00 00 00 00 : 00 00 00 00 00 00 00 65

0x01e0: 31 33 33 39 39 37 31 36 : 31 d8 00 00 00 00 00 00

0x01f0: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

Module

Thresholds:                   Alarm High          Warning High          Warning Low          Alarm Low

Temperature:            +75.000 C             +70.000 C              +0.000 C              -5.000 C

Voltage:           3.630 Volt            3.465 Volt            3.135 Volt            2.970 Volt

Temperature: +29.457 C

Voltage: 3.315 Volt

Lanes

Thresholds:                   Alarm High          Warning High          Warning Low          Alarm Low

Bias:         15.000 mAmps          14.000 mAmps           3.000 mAmps           2.000 mAmps

Transmit Power:  3.46740 mW (5.40004 dBm)   1.73780 mW (2.40000 dBm)   0.14450 mW (-8.40132 dBm)   0.05750 mW (-12.40332 dBm)

Receive Power:  3.46740 mW (5.40004 dBm)   1.73780 mW (2.40000 dBm)   0.09330 mW (-10.30118 dBm)   0.03720 mW (-14.29457 dBm)

TxRxIOMagId:

RxOpAmpSupprt:

Lane            Temp            Bias                   Tx Power                   Rx Power

0             N/A     7.130 mAmps   1.03100 mW (0.13259 dBm)   1.18990 mW (0.75510 dBm)

1             N/A     7.192 mAmps   1.09760 mW (0.40444 dBm)   1.19300 mW (0.76640 dBm)

2             N/A     7.192 mAmps   1.05440 mW (0.23005 dBm)   1.17110 mW (0.68594 dBm)

3             N/A     7.192 mAmps   1.08020 mW (0.33504 dBm)   1.00480 mW (0.02080 dBm)

MSA Data (Upper Memory Page 03)

0x0200: 4b 00 fb 00 46 00 00 00 : 00 00 00 00 00 00 00 00

0x0210: 8d cc 74 04 87 5a 7a 76 : 00 00 00 00 00 00 00 00

0x0220: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0230: 87 72 01 74 43 e2 03 a5 : 1d 4c 03 e8 1b 58 05 dc

0x0240: 87 72 02 3f 43 e2 05 a5 : 00 00 00 00 00 00 00 00

0x0250: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0260: a6 0f 00 00 00 00 00 00 : 00 00 66 66 00 00 33 33

0x0270: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

Utilice este comando para verificar cualquier problema.

RP/0/RP0/CPU0:BRU-SPCORE-P2#show controllers optics 0/0/0/10 summary

Port                Controller State        Admin State            LED State         Lane   Laser Bias   TX Power     RX Power     Wavelength     Optics Type       Description

(dBm)        (dBm)        (nm)

------------------  ----------------------  ---------------------  ----------------  -----  ------------ -----------  ----------   -----------    --------------    -----------

Optics 0/0/0/10     Up                      In Service             Green             0      7.1mA        0.12         0.75         850.00         QSFP28-100G-SR4

1      7.2mA        0.41         0.75

2      7.2mA        0.22         0.69

3      7.2mA        0.31         0.02

Alarmas

Verifique las alarmas para ver si hay entradas de temas.

RP/0/RP0/CPU0:NCS#show alarms brief

--------------------------------------------------------------------------------

Active Alarms for 0/0

--------------------------------------------------------------------------------

Location        Severity     Group            Set Time                   Description

--------------------------------------------------------------------------------

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-0 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-1 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-2 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-3 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-0 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-1 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-2 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-3 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-0 LOW ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-1 LOW ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-2 LOW ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-3 LOW ALARM

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-0 LOW WARNING

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-1 LOW WARNING

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-2 LOW WARNING

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-3 LOW WARNING

0/0/CPU0        Major        Software         05/02/2023 11:18:17 CEST    Optics0/0/0/26 - hw_optics:  OPTICS Module is not supported on this port

0/0/CPU0        Major        Software         05/02/2023 11:18:17 CEST    Optics0/0/0/26 - hw_optics: Port speed not supported on the optics

0/0/CPU0        Major        Software         05/02/2023 11:18:23 CEST    Optics0/0/0/26 - hw_optics:  RX LOS LANE-0 ALARM

0/0/CPU0        Major        Software         05/02/2023 11:18:23 CEST    Optics0/0/0/26 - hw_optics:  RX LOS LANE-1 ALARM

…

Show Controller Optics

Verifique si el SFP/QSFP se detecta con el comando "show controller optics <r/s/i/p>".

Compruebe lo siguiente:

- Compruebe si la óptica insertada se muestra correctamente (compruebe PID y VID).

- Compruebe si el láser está activado.

- Compruebe si los niveles de alimentación son correctos.

- Compruebe si se ha producido alguna alarma o fallo.

Este es un ejemplo de salida si la óptica se detecta y está en servicio.

Compruebe si el "estado del controlador" es activo o inactivo.

Compruebe si el estado del láser es Activado o Desactivado. El estado Off se observa cuando la interfaz está cerrada. Si no es así, recopile lo siguiente:

- show tech-support optics

- show tech-support ofa

RP/0/RP0/CPU0:ios#show controllers optics 0/0/0/12

Controller State: Up

Transport Admin State: In Service

Laser State: Off

Compruebe el estado del LED. El estado Off se ve cuando la interfaz se apaga. Cuando la interfaz no está apagada, el estado puede ser Down-Yellow o Up-Green.

Si hay desconexión de puerto: Si incluso un subpuerto está activo, todos los subpuertos muestran Verde. Si al menos un subpuerto es admin up (no shut), todos los subpuertos muestran amarillo. Si todos los subpuertos están inactivos (apagados), el estado de LED es Off (Apagado).

Compruebe el estado de FEC. Es posible que algunos tipos de plataforma tengan la FEC inhabilitada. Entonces no se muestra la parte FEC. Si FEC está habilitado en PHY, debería mostrar el estado FEC de PHY, no NPU. Si el estado de FEC no es correcto, verifique el estado de FEC en "show controller <speed> <r/s/i/p>".

Lea este artículo para obtener más información sobre FEC: Comprensión de FEC y su implementación en la óptica de Cisco

Descargue esta tabla para obtener más detalles sobre los tipos de FEC para cada óptica de Cisco: https://www.cisco.com/c/dam/en/us/products/se/2022/4/Collateral/fec-summary-table.pdf

Compruebe si se ha producido alguna alarma junto a "Alarmas detectadas". En caso de problemas de link, verifique si se muestran alarmas RX-LOS/RX-LOL/TX-LOS/TX-LOL aquí o en "show alarms brief/history" para la interfaz y la marca de tiempo cuando el link inestable. En el caso de las alarmas RX, verifique si el par tiene alarmas TX. Si el par tiene alarmas TX, vaya al siguiente paso. Si no hay alarmas TX de par, intente volver a conectar el cable o el elemento conectable. Intente sustituirlos por otros si es necesario.

Compruebe la corriente TX. Si se espera que el puerto esté activo, pero tiene una potencia de -40 Tx, vaya al siguiente paso. Compruebe la potencia RX. Si se espera que el puerto esté en funcionamiento, pero tiene -40dBm de potencia Rx, verifique si el par tiene alarmas TX. Si el par no tiene alarmas TX, intente volver a conectar el cable o el elemento conectable. Intente sustituirlos por otros si es necesario.

RP/0/RP0/CPU0:ios#show controllers optics 0/0/0/13

Controller State: Down

Transport Admin State: In Service

Laser State: Off

Optics not present

Optics Type: Unavailable

DWDM Carrier Info: Unavailable, MSA ITU Channel= Unavailable, Frequency= Unavailable , Wavelength= Unavailable

TX Power = Unavailable

RX Power = Unavailable

LED State: Off

FEC State: FEC ENABLED

Optics Status

Optics Type: SFP28 25G SR-S

Wavelength = 850.00 nm

Alarm Status:

-------------

Detected Alarms: None

LOS/LOL/Fault Status:

Laser Bias Current = 0.0 mA Actual

TX Power = -40.00 dBm

RX Power = -0.93

Performance Monitoring: Disable

THRESHOLD VALUES

----------------

Parameter                           High Alarm  Low Alarm  High Warning  Low Warning

------------------------            ----------  ---------  ------------  -----------

Rx Power Threshold(dBm)                 5.4       -14.2              2.3       -10.3

Tx Power Threshold(dBm)                 5.4       -12.4              2.3        -8.4

LBC Threshold(mA)                     10.00        2.00             8.00         3.00

Temp. Threshold(celsius)              75.00       -5.00            70.00         0.00

Voltage Threshold(volt)                3.63        2.97             3.46         3.13

Polarization parameters not supported by optics

Temperature = 28.00 Celsius               Voltage = 3.28 V

Transceiver Vendor Details

Form Factor              : SFP28

Optics type              : SFP28 25G SR-S

Name                      : CISCO-AVAGO

OUI Number               : 00.17.6a

Part Number              : SFBR-725SMZ-CS1

Rev Number               : 01

Serial Number            : AVD2227E1FU

PID                       : SFP-25G-SR-S

VID                       : V01

Date Code(yy/mm/dd) : 18/07/07

Este es un ejemplo de salida si la óptica no se detecta o no está en servicio.

RP/0/RP0/CPU0:ios# RP/0/RP0/CPU0:ios#show controllers optics 0/0/0/13

UTC Controller State: Down

Transport Admin State: In Service

Laser State: Off

Optics not present

Optics Type: Unavailable

DWDM Carrier Info: Unavailable, MSA ITU Channel= Unavailable, Frequency= Unavailable , Wavelength= Unavailable

TX Power = Unavailable          RX Power = Unavailable

DSP coherente

Si el link está inactivo para QDD-400G-ZR-S / QDD-400G-ZRP-S, junto con una verificación de las alarmas y los datos de "show controller optics", verifique las alarmas en "show controller coherenteDSP <R/S/I/P>".

RP/0/RP0/CPU0:ios#show controllers coherentDSP 0/0/1/0

Port : CoherentDSP 0/0/1/0

Controller State : Up

Inherited Secondary State : Normal

Configured Secondary State : Normal

Derived State : In Service

Loopback mode : None

BER Thresholds : SF = 1.0E-5 SD = 1.0E-7

Performance Monitoring : Enable

Bandwidth : 400.0Gb/s

Alarm Information:LOS = 0 LOF = 0 LOM = 0

OOF = 0 OOM = 0 AIS = 0IAE = 0 B

IAE = 0 SF_BER = 0

SD_BER = 0 BDI = 0 TIM = 0

FECMISMATCH = 0 FEC-UNC = 0 FLEXO_GIDM = 0

FLEXO-MM = 0 FLEXO-LOM = 0 FLEXO-RDI = 0

FLEXO-LOF = 0

Detected Alarms : None

Si se ve LOS/LOF/BER, verifique la conexión de fibra, los valores TX del extremo remoto y el modo de operación del extremo ZR/ZRP local y del extremo par.

ZR/ZRP admite varios modos de funcionamiento. Consulte esta guía de configuración de enlaces.

El modo de configuración, FEC, DAC y la modulación deben coincidir con la configuración de la interfaz y con la configuración del par.

Utilice este comando: show optics-driver debug optics port <fp_port> instance <bayinst> location <LC>.

RP/0/RP0/CPU0:ios#show optics-driver debug optics port 0 instance 0 location 0/0/CPU0

flexcoh_hdlr : [0x0]

R_S_I_P : [0.0.1.0]

module_type : [400G-ZRPLUS:Cisco-Qualified-Module]

Traffic-Setup : [Requested/Programmed]

client_rate : [100_GAUI_2_KP4_FEC/100_GAUI_2_KP4_FEC]                      <- needs to match the configured interface speed

trunk_rate : [400G Muxponder/400G Muxponder] line_fec_mode : [oFEC/oFEC]   <- needs to match the peer end for link up

dac_rate : [1x1.25 => pulse_shaping On/1x1.25 => pulse_shaping On]         <- needs to match the peer end for link up

modulation : [16QAM/16QAM]                                                 <- needs to match the peer end for link up

framing_format : [400G_ZR/400G_ZR]

framing_mode : [Enhanced/Enhanced]

hw_cfg_in_progress : [False]

hw transactions : [3]

polling enabled : [True]

pm_notify enabled : [True]

alarms_notify enabled : [True]

sdk laser oper state : [Enabled]

sdk hw laser oper state : [Enabled]

hw laser oper state : [Enabled]

sdk channel-frequency : [1931000]

hw channel-frequency : [1931000]

sdk tx-power : [-100 0.1dBm]

hw tx-power : [-113 0.1dBm]

hw tx-power-range : [-2289, -65135 0.01dBm]

sdk cd-min : [-13000]hw cd-min : [-13000]

sdk cd-max : [13000]hw cd-max : [13000]

sdk baud-rate : [60.138546]

hw baud-rate : [60.138546]

sdk hw thresholds : [Valid]

config-thresh-flags : [0x0]

trf-cfg-lsr-pm-flags : [0x0]

polling_mask : [0xf]

is_fw_dl_in_progress : [False]

is_fw_commit_in_progress: [False]

sdk dsp-internal-loopback: [Disabled]

hw dsp-internal-loopback: [Disabled]

sdk dsp-line-loopback : [Disabled]

hw dsp-line-loopback : [Disabled]

Flexcoh SDK API execution status

--------------------------------------------------------------------------------------------------

traffic | tx-power | cd-min | cd-max | frequency | laser-set | pm-set | alarm-set | poll_set |

==================================================================================================

Success | Success  | Success| Success| Success   | Success   | Success| Success   | Success  |      <- No failure to be seen in any of the status

--------------------------------------------------------------------------------------------------

Show Controllers PHY

Recopile esta información para la interfaz correcta. Este comando vuelca la información EEPROM.

RP/0/RP0/CPU0:ios#show controllers tenGigE 0/0/1/0 phy

SFP EEPROM port: 32

Xcvr Type: SFP

Xcvr Code: SFP+ 10G SR

Encoding: 64B66B

Bit Rate: 10300 Mbps

Link Reach 50u fiber: 80 meter

Link Reach 62.5u fiber: 20 meter

Vendor Name: CISCO-SUMITOMO

Vendor OUI: 00.00.5f

Vendor Part Number: SPP5100SR-C5 (rev.: A )

Laser wavelength: 850 nm (fraction: 0.00 nm)

Optional SFP Signal: Tx_Disable, Tx_Fault, LOS

Vendor Serial Number: SPC17050AZ0

Date Code (yy/mm/dd): 13/01/31 lot code: MA

Diagnostic Monitoring: DOM, Int. Cal.,

Enhanced Options: SW RX LOS Mon., SW TX Fault Mon, SW TX Disable, Alarm/Warning Flags

MSA Data

0x0000: 03 04 07 10 00 00 00 00 : 00 00 00 06 67 00 00 00

0x0010: 08 02 00 1e 43 49 53 43 : 4f 2d 53 55 4d 49 54 4f

0x0020: 4d 4f 20 20 00 00 00 5f : 53 50 50 35 31 30 30 53

0x0030: 52 2d 43 35 20 20 20 20 : 41 20 20 20 03 52 00 e6

0x0040: 00 1a 00 00 53 50 43 31 : 37 30 35 30 41 5a 30 20

0x0050: 20 20 20 20 31 33 30 31 : 33 31 4d 41 68 f0 03 7a

0x0060: 00 00 0b ea 11 8a 3a 43 : 9d 9c 2b 0d 84 89 fd c5

0x0070: a4 0e 5b 00 00 00 00 00 : 00 00 00 00 8b 64 8d fc

Thresholds: Alarm High Warning High Warning Low Alarm Low

Temperature: +75.000 C +70.000 C +0.000 C -5.000 C

Voltage: 3.630 Volt 3.465 Volt 3.135 Volt 2.970 Volt

Bias: 10.500 mAmps 9.000 mAmps 2.500 mAmps 2.000 mAmps

Transmit Power: 1.47910 mW (1.69998 dBm) 0.74130 mW (-1.30006 dBm) 0.18620 mW (-7.30020 dBm) 0.07410 mW (-11.30182 dBm)

Receive Power: 1.58490 mW (2.00002 dBm) 0.79430 mW (-1.00015 dBm) 0.10230 mW (-9.90124 dBm) 0.04070 mW (-13.90406 dBm)

Temperature: 24.012

Voltage: 3.304 Volt

Tx Bias: 0.000 mAmps

Tx Power: 0.000 mW (<-40.00 dBm)

Rx Power: 0.000 mW (<-40.00 dBm)

Oper. Status/Control: Tx Disabled, Rx Rate Select, LOS,

EEPROM Memory (A2 lower)

0x0100: 4b 00 fb 00 46 00 00 00 : 8d cc 74 04 87 5a 7a 75

0x0110: 14 82 03 e8 11 94 04 e2 : 39 c7 02 e5 1c f5 07 46

0x0120: 3d e9 01 97 1f 07 03 ff : 00 00 00 00 00 00 00 00

0x0130: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0140: 00 00 00 00 3f 80 00 00 : 00 00 00 00 01 00 00 00

0x0150: 01 00 00 00 01 00 00 00 : 01 00 00 00 00 00 00 27

0x0160: 18 03 81 13 00 00 00 00 : 00 00 00 00 00 00 b2 00

0x0170: 00 40 00 00 00 40 00 00 : 00 00 00 00 00 00 00 00

CLEI Code: COUIA8NCAA

Part Number: 10-2415-03 (ver.: V03 )

Temp/Alarm/Power Flags: COM, commercial 0C to 70C

Minimum Temperature: 0

Maximum Temperature: 70

Calibration Constants: LBC Scale, Temperature, Laser bias current, Output power,

Product Id: SFP-10G-SR

EEPROM Memory (A2 upper)

0x0180: 43 4f 55 49 41 38 4e 43 : 41 41 31 30 2d 32 34 31

0x0190: 35 2d 30 33 56 30 33 20 : 01 00 46 00 00 00 00 c6

0x01a0: 00 00 00 00 00 00 00 00 : 00 00 85 99 8f 00 a8 3b

0x01b0: d4 4b 00 00 1e 00 0a ff : 16 93 0f 8e 00 00 aa aa

0x01c0: 53 46 50 2d 31 30 47 2d : 53 52 20 20 20 20 20 20

0x01d0: 20 20 20 20 32 33 00 00 : 00 00 00 00 00 00 00 35

0x01e0: 14 1b 20 20 20 26 20 26 : 00 00 00 00 00 00 00 00

0x01f0: 00 00 00 00 00 fb 00 00 : ff ff ff ff 00 00 00 aa

MSA Data LOWER PAGE (QSA)

0x0000: 0d 00 02 01 00 00 01 00 : 00 00 00 00 00 00 00 00

0x0010: 00 00 00 00 00 01 00 00 : 00 00 00 00 00 00 00 00

0x0020: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0030: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0040: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0050: 00 00 44 32 50 30 0f 00 : 00 00 00 00 00 00 00 00

0x0060: 00 00 00 00 01 01 00 00 : 00 00 00 00 00 00 00 00

0x0070: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

MSA Data UPPER PAGE (QSA)

0x0080: 0d 9b 80 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0090: 00 00 00 00 43 49 53 43 : 4f 2d 44 4e 49 20 20 20

0x00a0: 20 20 20 20 00 30 30 30 : 43 41 5a 41 44 45 52 4f

0x00b0: 2d 30 32 20 20 20 20 20 : 30 33 00 00 00 00 46 32

0x00c0: 00 00 00 00 44 54 59 32 : 32 32 31 30 36 47 38 20

0x00d0: 20 20 20 20 32 30 31 38 : 30 35 33 30 00 00 f2 c2

0x00e0: f2 00 07 d0 45 c2 18 57 : 2b 29 67 3f 51 03 49 be

0x00f0: 37 c4 da 00 00 00 00 00 : 00 00 00 00 81 96 b0 b1

NPU

En esta sección se tratan aspectos específicos de cuándo la interfaz está conectada directamente a la NPU. Por lo tanto, no hay PHY. Estos puertos son puertos PHYless.

RP/0/RP0/CPU0:ios#show controllers twentyFiveGigE 0/0/0/12 (partial output)

Operational data for interface TwentyFiveGigE0/0/0/12:

State:    Administrative state: disabled                ==> Check if admin state display is correct

Operational state: Down (Reason: Link is shutdown)  ==> Check if link state display is correct. If interface is down with Remote fault/Link Loss (local fault), verify the peer.

MAC address information:

Operational address: fc58.9a01.8e10

Burnt-in address: fc58.9a01.8e10

Autonegotiation disabled.

Priority flow control information for interface TwentyFiveGigE0/0/0/12:

Forward error correction: Standard (Reed-Solomon)  ==> Check if FEC status is correct.

RP/0/RP0/CPU0:ios#show controllers tenGigE 0/0/0/14

Operational data for interface TenGigE0/0/0/14:

State:    Administrative state: enabled

Operational state: Down (Reason: Link loss or low light, no loopback) ==> This router has a Local Fault/Down.

LED state: Yellow On

RP/0/RP0/CPU0:ios#show controllers tenGigE 0/0/0/15

Operational data for interface TenGigE0/0/0/15:

State:

Administrative state: enabled

Operational state: Down (Reason: Remote Fault)   ==> The peer has a Fault

LED state: Yellow On

Summary

- Compruebe si el estado de administración de la interfaz está inactivo. Si la respuesta es sí, llévelo al estado de funcionamiento del administrador con el comando "no shut" en la interfaz.

- Verifique el estado de FEC tanto en el router como en el dispositivo par. Si hay alguna discordancia, intente corregirla.

- Verifique el estado de la negociación automática tanto en el router como en el dispositivo par. Si hay alguna discordancia, intente corregirla.

- Si la FEC y la negociación automática están correctamente configuradas, verifique el estado de las alarmas tanto en el router como en el par en la salida "show controller optics".

RX-LOS, RX-LOL : Problema en la dirección de recepción de la señal.

TX-LOS, TX-LOL: La señal recibida por SFP/QSFP desde NPU o PHY tiene el problema.

Si hay un Link Down/Flap con RX-LOL/RX-LOS:

- Verifique si el par tiene TX-LOS/TX-LOL.

- Si no hay alarmas TX, intente cambiar el cable/conectable (SFP/QSFP).

Si hay un Link Down/Flap con TX-LOL/TX-LOS:

Puede aplicar un loopback externo para excluir el par remoto y la fibra al par remoto. Utilice un cable de fibra localmente para conectar en bucle físicamente la señal de transmisión (Tx) en el puerto de recepción (Rx). Opcionalmente, utilice un atenuador para lograr lo siguiente:

RP/0/RSP0/CPU0:NCS(config)#int Hu0/3/0/31

RP/0/RSP0/CPU0:NCS(config-if)#loopback ?

external Enable external loopback (requires loopback connector)

internal Enable internal loopback

line Enable line loopback

RP/0/RSP0/CPU0:NCS(config-if)#loopback external ?

<cr>

RP/0/RSP0/CPU0:NCS(config-if)#loopback external

RP/0/RSP0/CPU0:NCS(config-if)#commit

Puede aplicar una configuración interna de loopback tanto en el router como en el par para verificar la óptica mediante un desvío de la fibra/óptica. Esto significa que si la interfaz todavía no aparece, indica que el problema no es con la parte óptica!

RP/0/RP0/CPU0:BRU-SPCORE-P2(config)#int hundredGigE 0/0/0/10

RP/0/RP0/CPU0:BRU-SPCORE-P2(config-if)#loopback internal ?

<cr>

RP/0/RP0/CPU0:BRU-SPCORE-P2(config-if)#loopback internal

RP/0/RP0/CPU0:BRU-SPCORE-P2(config-if)#commit

Recopilar registros

Estos comandos, tanto en el router como en el peer, pueden ser la causa del problema.

- show ip interface brief

- show alarms brief

- show controller optics <r/s/i/p> de la interfaz con el problema

- show tech-support optics

Muestra alarmas, estado del LED, estado del láser y otra información óptica

- show controller <tengige/hundredgige/other> <r/s/i/p> internal of interface with the issue.

Muestra FEC, AN, Up/Down, falla local/falla remota, etc.

- show controllers npu voq-usage interface all instance all location all

Proporciona un puerto del panel frontal al puerto IP, la npu y la asignación de núcleo.

Recopilación completa de registros para el problema de la interfaz:

- show version

- show running-config

- show install active

- show platform

- show tech-support ethernet platform location 0/x/CPU0

- show tech-support ethernet interfaces

- show tech-support ethernet controllers location 0/x/CPU0

- show tech-support dpa location 0/x/CPU0

- show tech-support of a location 0/x/CPU0

- show tech-support optics location 0/x/CPU0

- show tech-support consistency location 0/x/CPU0

- show tech-support pfi location all

- show tech-support qos platform location 0/x/CPU0

- show tech-support fabric

- show controllers npu voq-usage interface all instance 0 location all

- show optics trace all

- show ethernet infra trace location 0/x/cpu0

- show ethernet v-ether trace location 0/x/CPU0

- show vether-ea trace all location 0/x/CPU0

- show portmapper trace all location 0/0/CPU0