Contenido

Introducción

Vida de un paquete en el reenvío de ASIC

ASIC de reenvío de operador

IRPP (término de puerto, analizador)

Trayectoria de Punt

Ruta de punteo entre dos nodos de CPU

Trayectoria de Punt de NPU a CPU RP

Inyección de CPU RP a CPU NPU o LC

Inyectar Trayectoria de la CPU LC a NPU

CLI para Punt/Inject Debugging

Ping remoto

Ruta del paquete: Solicitud de eco

Ruta del paquete: Respuesta de eco

Ping local

Ruta del paquete: Solicitud de eco

Ruta del paquete: Respuesta de eco

Depuraciones Útiles:

Topología

Comandos para verificar Ping Remoto

Solicitud de eco: RP local: TX

Solicitud de eco: LC remota: RX

Respuesta de eco: Nodo remoto (LC): TX

Respuesta de eco: Nodo local (LC): RX

Ping local

Introducción

Este documento describe la trayectoria tomada por los paquetes de solicitud de eco/respuesta de eco ICMP dentro del cuadro NCS55xx(Fretta).

Vida de un paquete en el reenvío de ASIC

IRPP

Se recibe un paquete en una interfaz y se pasa a IRPP donde se extraerán y procesarán los primeros 128 bytes. Como resultado, se antepone el encabezado interno del sistema.

ITM

El paquete se almacena en DRAM/OCB

ITPP

Si es necesario, reescriba el encabezado del sistema (replicación de multidifusión, duplicación de puertos, etc.)

Los paquetes se dividen en celdas y se equilibran a fabric

ERPP

Las celdas se reciben y se reensamblan. Los primeros 128 bytes se extraen y aplican todos los filtros de capa de link, ACL de salida, Replicación de salida (multidifusión)

ETPP/ETM

El paquete completo se almacena en un búfer hasta que se programa el paquete de salida. Los encabezados del sistema se quitan.

ASIC de reenvío de operador

IRPP (término de puerto, analizador)

Terminación de puerto: Paquetes recibidos de la interfaz de red/CPU/recirculación

- Determine el puerto de origen y marque el paquete con él.

- Decida el programa inicial que se utilizará en el analizador.

- Identifique dónde se inicia el encabezado de red.

Analizador: Extraer Ethertype, direcciones MAC, Determinar desplazamiento para las siguientes etapas de la canalización.

IRPP(Capa de línea, VLAN Trans)

Capa de link: Filtrado en L2 y autenticación de dirección de origen.

Traducción de VLAN: Asignamos la interfaz lógica del paquete.

Trayectoria de Punt

- En la NPU sólo hay algunas entradas LPTS TCAM disponibles debido a la falta de recursos TCAM.

- La búsqueda de LPTS principal se realiza en SW LPTS Pre-IFIB en la Red LC

- Paquete de punteo LPTS de NPU a RP directamente a través de la búsqueda PMF TCAM:

- Los paquetes OSPF, OSPFv3 mcast, ISIS se envían directamente al RP activo y en espera

- Paquete de punteo LPTS de NPU a la CPU local a través de la búsqueda PMF TCAM:

- Cualquier protocolo que utilice TCP, UDP; ICMP, ND

- Los paquetes de protocolo L2 se envían a LC a través de la trampa de CPU BRCM:

- ARP, RARP, CDP, LACP, LLDP, Ether-Link OAM, MACSec

- Los paquetes de excepción se envían a LC a través de la trampa de CPU BRCM.

- TTL0, TTL1, MTU Excede, paquetes de opciones

Ruta de punteo entre dos nodos de CPU

Trayectoria de Punt de NPU a CPU RP

Los paquetes RX Forus se replican en NPU. Uno se envía al RP Activo y otro al RP Estático

Inyección de CPU RP a CPU NPU o LC

Los paquetes L3 se inyectan directamente a NPU si la adyacencia del prefijo está completa o es un paquete de ruta previa

Los paquetes L3 se inyectan a la CPU LC por si acaso:

- La adyacencia Prefix es GLEAN.

- paquete de ruta previa MPLS

- El tamaño del paquete supera la MTU.

Inyectar Trayectoria de la CPU LC a NPU

Estos paquetes se inyectan de la CPU LC a la NPU:

- ARP, ND, respuesta de eco ICMP, paquetes fragmentados

- Paquetes CDP, LACP, LLDP, EtherLink OAM

CLI para Punt/Inject Debugging

Show SPP node counters location <>

show netio chain

location <>

show netio drop location <>

show ipv4/ipv6 traffic location <>

show fwd statistics location <>

show lpts pifib entry brief statistics location <>

show controllers fia diagshell

"diag counters g cdsp" location <>

show interface <> location <>

Ping remoto

Ruta del paquete: Solicitud de eco

Local Node[ICMP(RP) -> IP I/O(RP) -> NetIO/Forwarder(RP) -> SPP(RP) -> NPU] -> wire -> Remote[NPU -> LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> LPTS(SW)(LC) -> IP I/O (LC) -> ICMP (LC)]

Ruta del paquete: Respuesta de eco

Remote Node[IPv4/ICMP (LC) -> FWD/NetIO (LC) -> SPP (LC) -> NPU] -> wire -> Local Node[LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> NetIO(RP) -> IP I/O (RP) -> ICMP (RP)]

Ping local

Ruta del paquete: Solicitud de eco

RP(ICMP/IPv4 IO -> netio -> SPP -> CE) -> LC(SPP -> netio -> ICMP/ipv4 IO)

Ruta del paquete: Respuesta de eco

LC(IPv4 IO/ICMP -> Netio -> SPP -> CE) -> RP(SPP -> net -> ipv4 io/ICMP)

Depuraciones Útiles:

debug icmp ipv4 location 0/0/CPU0

debug ipv4 packet location 0/0/CPU0

debug ipv4 ping events location 0/0/CPU0

Topología

Fretta_1(GigabitEthernet0/0/0/16 ) <---->(GigabitEthernet0/0/0/16 ) Fretta_2

RP/0/RP0/CPU0:fretta_1#  ping 1.1.16.2 count 10000

Comandos para verificar Ping Remoto

Solicitud de eco: RP local: TX

Path: ICMP(RP) -> IP I/O(RP) -> NetIO/Forwarder(RP) -> SPP(RP) -> NPU

1. E/S IP: Compruebe si se genera la solicitud de eco:

show ipv4 traffic brief

ICMP statistics:

Sent: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

10000 echo request, 0 echo reply

0 mask request, 0 mask reply

0 parameter error, 0 redirects

10000 total

2.  NetIO

RP/0/RP0/CPU0:fretta_1#show netio clients location 0/rP0/CPU0

Counters                  Errors/Total

----------------------------------------

Output                        0/10019

Input                         0/11804

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10002

Mutex Bypass Counters        Total

----------------------------------------

Egress handled               0

Egress chainwalked           10006

Egress dropped               0

Ingress handled              10000

Ingress chainwalked          0

Ingress dropped              0

ClientID         Drop/Total        Drop/Total      Cur/High/Max    Cur/High/Max

--------------------------------------------------------------------------------

ipv6_icmp           0/0               0/0             0/0/1000        0/0/1000

icmp                0/10000           0/0             0/1/1000        0/0/1000

If ping is failing then check if it is getting dropped in Netio:

RP/0/RP0/CPU0:fretta_1#show netio drops location 0/rP0/CPU0

Thu Apr 20 20:28:09.577 UTC

Drops for interfaces on node 0/RP0/CPU0

No drops

3. SPP

RP/0/RP0/CPU0:fretta_1#show spp node-counters

Thu Apr 20 20:29:05.785 UTC

0/0/CPU0:

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              24

Fwded to CoPP sampler:               1

PUNT ARP:               1

PUNT IFIB:           10006

IFIB RAWIP4_FM:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:               2

NetIO->CPU injected into spp:           10000

NetIO->NPU PROTO ARP:               2

NetIO->CPU PKT LPTS:           10000

-------------------------------

socket/rx

ether raw pkts:           10031

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10007

-------------------------------

0/RP0/CPU0:

socket/rx

ether raw pkts:           10002

mgmt interface pkts:            3204

-------------------------------

socket/tx

ce pkts:           10000

mgmt interface pkts:               5

-------------------------------

fretta/classify

forwarded to spp clients:           13204

forwarded CPU packet to NetIO:           10000

forwarded Mgmt packet to NetIO:            3204

dropped in classify node:               2

-------------------------------

client/inject

pkts injected into spp:           10005

NetIO->NPU injected into spp:           10000

MGMT_IF injected into spp:               5

NetIO->NPU PROTO IPV4_PREROUTE:           10000

-------------------------------

client/punt

punted to client:           13204

-------------------------------

4. Compruebe si la solicitud de eco se envía al cable:

RP/0/RP0/CPU0:fretta_1#show controllers gigabitEthernet 0/0/0/16 stats | be Egress

Thu Apr 20 21:17:28.176 UTC

Egress:

Output total bytes          = 1140270

Output good bytes           = 1140270

Output total packets        = 10004

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 1

Output pkts 65-127 bytes    = 10003

Output pkts 128-255 bytes   = 0

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 0

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10004

Output unicast pkts         = 10000

Output multicast pkts       = 3

Output broadcast pkts       = 1

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

Solicitud de eco: LC remota: RX

Path: NPU -> LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> LPTS(SW)(LC) -> IP I/O (LC) -> ICMP (LC)

1. Verifique si el paquete se recibe del cable:

RP/0/RP0/CPU0:fretta_2#show controllers gigabitEthernet 0/0/0/16 stats

Thu Apr 20 20:44:22.115 UTC

Statistics for interface GigabitEthernet0/0/0/16 (cached values):

Ingress:

Input total bytes           = 1140270

Input good bytes            = 1140270

Input total packets         = 10004

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 1

Input pkts 65-127 bytes     = 10003

2. Verifique el contador LPTS.

RP/0/RP0/CPU0:fretta_2#show lpts pifib hardware entry brief location 0/0/CPU0 | i ICMP

Thu Apr 20 20:45:54.687 UTC

DestIP               SrcIP                vrf   L4   LPort/Type   RPort  npu  Flowtype           DestNode     PuntPrio Accept Drop

0.0.0.0              0.0.0.0              0     1    ECHO         0      0    ICMP-local         Local LC     MEDIUM   10000  0

3. SPP

RP/0/RP0/CPU0:fretta_2#show spp node-counters location 0/0/CPU0

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              22

Fwded to CoPP sampler:               2

PUNT ARP:               2

PUNT IFIB:           10006

IFIB IPv4_STACK:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:           10002

NetIO->NPU PROTO ARP:               2

NetIO->NPU PROTO IPV4:           10000

-------------------------------

socket/rx

ether raw pkts:           10030

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10008

-------------------------------

4. Netio

show netio chains gigabitEthernet 0/0/0/16 location 0/0/cpu0

<12> (ipv4)   Stats IN: 10000 pkts, 1140000 bytes; OUT: 10000 pkts, 1140000 bytes

Protocol        SAFI       Pkts In    Bytes In    Pkts Out   Bytes Out

---------------  ----------    ----------  ----------  ----------  ----------

ipv4     Unicast         10000     1140000       10000     1000000

ipv4   Multicast             0           0           0           0

ipv4   Broadcast             0           0           0           0

ipv6     Unicast             0           0           0           0

ipv6   Multicast             0           0           0           0

RP/0/RP0/CPU0:fretta_2#show netio clients location 0/0/CPU0

Thu Apr 20 20:52:26.802 UTC

Counters                  Errors/Total

----------------------------------------

Output                        0/10002

Input                         0/10008

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10002

XIPC queues              Dropped/Queued    Cur/High/Max

------------------------------------------------------------

OutputL                       0/10000         0/1/6000

OutputH                       0/2             0/1/3000

Puntback                      0/0             0/0/6000

Input              Punt         XIPC InputQ      XIPC PuntQ

ClientID         Drop/Total        Drop/Total      Cur/High/Max    Cur/High/Max

--------------------------------------------------------------------------------

ipv6_icmp           0/0               0/0             0/0/1000        0/0/1000

icmp                0/10000           0/0             0/1/1000        0/0/1000

clns              L 0/0               0/0           L 0/0/1000        0/0/0

H 0/0                             H 0/0/1000

ipv6_io             0/0               0/0             0/0/1000        0/0/1000

ipv6_nd             0/0               0/0             0/0/1500        0/0/1000

l2snoop             0/0               0/0             0/0/1000        0/0/0

ether_sock          0/0               0/0

tp_oam              0/0               0/0             0/0/1000        0/0/1000

icmpv6_unreach_jump        0/0               0/0

arp                 0/2               0/0             0/1/1000        0/0/1000

mpls_io             0/0               0/0             0/0/1000        0/0/1000

ipv4                0/0               0/0             0/0/1000        0/0/1000

ipv6                0/0               0/0             0/0/1000        0/0/1000

Key:

L = queue for lower priority packets

H = queue for higher priority packets

5. estadísticas FWD

RP/0/RP0/CPU0:fretta_2#show fwd statistics all location 0/0/cpu0

Thu Apr 20 20:51:50.347 UTC

RECEIVE STATISTICS SUMMARY:

rx_pkts: 10008

punt_pkts: 10008

ingress_total_drops: 0

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 10002

tx_pkts: 10002

egress_total_drops: 0

RP/0/RP0/CPU0:fretta_2#

6. IOS IP

show ipv4 traffic brief location 0/0/CPU0

Rcvd: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

10000 echo request, 0 echo reply

0 mask request, 0 mask reply

0 redirect, 0 parameter error

0 source quench, 0 timestamp, 0 timestamp reply

0 router advertisement, 0 router solicitation

10000 total, 0 checksum errors, 0 unknown

Respuesta de eco: Nodo remoto (LC): TX

Path: IPv4/ICMP (LC) -> FWD/NetIO (LC) -> SPP (LC) -> NPU

1. E/S IP

RP/0/RP0/CPU0:fretta_2#show ipv4 traffic brief location 0/0/CPU0

ICMP statistics:

Sent: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

0 echo request, 10000 echo reply

0 mask request, 0 mask reply

0 parameter error, 0 redirects

10000 total

2. Netio

show netio chains gigabitEthernet 0/0/0/16 location 0/0/cpu0

<12> (ipv4)   Stats IN: 10000 pkts, 1140000 bytes; OUT: 10000 pkts, 1140000 bytes

Protocol        SAFI       Pkts In    Bytes In    Pkts Out   Bytes Out

---------------  ----------    ----------  ----------  ----------  ----------

ipv4     Unicast         10000     1140000       10000     1000000

ipv4   Multicast             0           0           0           0

ipv4   Broadcast             0           0           0           0

ipv6     Unicast             0           0           0           0

ipv6   Multicast             0           0           0           0

RP/0/RP0/CPU0:fretta_2#show netio clients location 0/0/CPU0

Thu Apr 20 20:52:26.802 UTC

Counters                  Errors/Total

----------------------------------------

Output                        0/10002

Input                         0/10008

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10002

XIPC queues              Dropped/Queued    Cur/High/Max

------------------------------------------------------------

OutputL                       0/10000         0/1/6000

OutputH                       0/2             0/1/3000

Puntback                      0/0             0/0/6000

3. Estadísticas FWD

RP/0/RP0/CPU0:fretta_2#show fwd statistics all location 0/0/cpu0

Thu Apr 20 20:51:50.347 UTC

RECEIVE STATISTICS SUMMARY:

rx_pkts: 10008

punt_pkts: 10008

ingress_total_drops: 0

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 10002

tx_pkts: 10002

egress_total_drops: 0

4. SPP

show spp node-counters location 0/0/CPU0

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              22

Fwded to CoPP sampler:               2

PUNT ARP:               2

PUNT IFIB:           10006

IFIB IPv4_STACK:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:           10002

NetIO->NPU PROTO ARP:               2

NetIO->NPU PROTO IPV4:           10000

-------------------------------

socket/rx

ether raw pkts:           10030

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10008

-------------------------------

5. Verifique si el paquete se envía al cable.

RP/0/RP0/CPU0:fretta_2#show controllers gigabitEthernet 0/0/0/16 stats

Thu Apr 20 21:20:22.593 UTC

Statistics for interface GigabitEthernet0/0/0/16 (cached values):

Egress:

Output total bytes          = 1140270

Output good bytes           = 1140270

Output total packets        = 10004

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 1

Output pkts 65-127 bytes    = 10003

Output pkts 128-255 bytes   = 0

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 0

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10004

Output unicast pkts         = 10000

Output multicast pkts       = 3

Output broadcast pkts       = 1

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

6. Estadísticas de interfaz

RP/0/RP0/CPU0:fretta_2#show int gigabitEthernet 0/0/0/16

Thu Apr 20 21:21:37.942 UTC

GigabitEthernet0/0/0/16 is up, line protocol is up

Interface state transitions: 1

Hardware is GigabitEthernet, address is 008a.964a.7040 (bia 008a.964a.7040)

Internet address is 1.1.16.2/24

MTU 1514 bytes, BW 1000000 Kbit (Max: 1000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 1000Mb/s, link type is force-up

output flow control is off, input flow control is off

Carrier delay (up) is 10 msec

loopback not set,

Last link flapped 01:00:13

ARP type ARPA, ARP timeout 04:00:00

Last input 00:56:58, output 00:56:58

Last clearing of "show interface" counters never

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

10004 packets input, 1140270 bytes, 0 total input drops

3 drops for unrecognized upper-level protocol

Received 1 broadcast packets, 3 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10004 packets output, 1140270 bytes, 0 total output drops

Output 1 broadcast packets, 3 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Respuesta de eco: Nodo local (LC): RX

LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> LPTS PreIFIB Lookup -> SPP(LC) -> CE(LC) -> SPP(RP) -> NetIO(RP) -> IP I/O (RP) -> ICMP (RP)

1. Verifique si los paquetes vienen del cable.

RP/0/RP0/CPU0:fretta_1#show controllers gigabitEthernet 0/0/0/16 stats

Thu Apr 20 21:17:28.176 UTC

Statistics for interface GigabitEthernet0/0/0/16 (cached values):

Ingress:

Input total bytes           = 1140270

Input good bytes            = 1140270

Input total packets         = 10004

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 1

Input pkts 65-127 bytes     = 10003

Input pkts 128-255 bytes    = 0

Input pkts 256-511 bytes    = 0

Input pkts 512-1023 bytes   = 0

Input pkts 1024-1518 bytes  = 0

Input pkts 1519-Max bytes   = 0

Input good pkts             = 10004

Input unicast pkts          = 10000

Input multicast pkts        = 3

Input broadcast pkts        = 1

Input drop overrun          = 0

Input drop abort            = 0

Input drop invalid VLAN     = 0

Input drop invalid DMAC     = 0

Input drop invalid encap    = 0

Input drop other            = 0

Input error giant           = 0

Input error runt            = 0

Input error jabbers         = 0

Input error fragments       = 0

Input error CRC             = 0

Input error collisions      = 0

Input error symbol          = 0

Input error other           = 0

Input MIB giant             = 0

Input MIB jabber            = 0

Input MIB CRC               = 0

2. Contadores LPTS

RP/0/RP0/CPU0:fretta_1#show lpts pifib hardware entry brief locatio 0/0/CPU0

0.0.0.0              0.0.0.0              0     1    ECHOREPLY    0      0    ICMP-app-default   Local LC     LOW      10000  0

3. SPP en LC

RP/0/RP0/CPU0:fretta_1#show spp node-counters location 0/0/CPU0

Thu Apr 20 21:01:31.974 UTC

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              24

Fwded to CoPP sampler:               1

PUNT ARP:               1

PUNT IFIB:           10006

IFIB RAWIP4_FM:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:               2

NetIO->CPU injected into spp:           10000

NetIO->NPU PROTO ARP:               2

NetIO->CPU PKT LPTS:           10000

-------------------------------

socket/rx

ether raw pkts:           10031

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10007

-------------------------------

4. Netio en LC

RP/0/RP0/CPU0:fretta_1# show netio chains gigabitEthernet 0/0/0/16 location 0/0/cpu0

<12> (ipv4)   Stats IN: 10000 pkts, 1140000 bytes; OUT: 0 pkts, 0 bytes

Protocol SAFI counts:

--------------------

Protocol        SAFI       Pkts In    Bytes In    Pkts Out   Bytes Out

---------------  ----------    ----------  ----------  ----------  ----------

ipv4     Unicast         10000     1140000           0           0

ipv4   Multicast             0           0           0           0

ipv4   Broadcast             0           0           0           0

ipv6     Unicast             0           0           0           0

ipv6   Multicast             0           0           0           0

5. Estadísticas FWD en LC.

RP/0/RP0/CPU0:fretta_1#show fwd statistics all location 0/0/CPU0

Thu Apr 20 21:04:27.767 UTC

RECEIVE STATISTICS SUMMARY:

rx_pkts: 10007

punt_pkts: 10007

ingress_total_drops: 0

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 10002

tx_pkts: 10002

egress_total_drops: 0

RP/0/RP0/CPU0:fretta_1#

5. SPP en LC para enviar a SPP en RP.

RP/0/RP0/CPU0:fretta_1#show spp node-counters location 0/0/CPU0

Thu Apr 20 21:01:31.974 UTC

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              24

Fwded to CoPP sampler:               1

PUNT ARP:               1

PUNT IFIB:           10006

IFIB RAWIP4_FM:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:               2

NetIO->CPU injected into spp:           10000

NetIO->NPU PROTO ARP:               2

NetIO->CPU PKT LPTS:           10000

-------------------------------

socket/rx

ether raw pkts:           10031

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10007

-------------------------------

6. SPP en RP

RP/0/RP0/CPU0:fretta_1#show spp node-counters location 0/rP0/CPU0

Thu Apr 20 21:06:33.045 UTC

socket/rx

ether raw pkts:           10002

mgmt interface pkts:           16651

-------------------------------

socket/tx

ce pkts:           10000

mgmt interface pkts:              14

-------------------------------

fretta/classify

forwarded to spp clients:           26651

forwarded CPU packet to NetIO:           10000

forwarded Mgmt packet to NetIO:           16651

dropped in classify node:               2

-------------------------------

client/inject

pkts injected into spp:           10014

NetIO->NPU injected into spp:           10000

MGMT_IF injected into spp:              14

NetIO->NPU PROTO IPV4_PREROUTE:           10000

-------------------------------

client/punt

punted to client:           26651

-------------------------------

7. Netio en RP.

RP/0/RP0/CPU0:fretta_1#show netio clients location 0/RP0/CPU0

Thu Apr 20 21:05:05.977 UTC

Counters                  Errors/Total

----------------------------------------

Output                        0/10031

Input                         0/25872

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10014

Mutex Bypass Counters        Total

----------------------------------------

Egress handled               0

Egress chainwalked           10018

Egress dropped               0

Ingress handled              10000

Ingress chainwalked          0

Ingress dropped              0

XIPC queues              Dropped/Queued    Cur/High/Max

------------------------------------------------------------

OutputL                       0/10004         0/1/6000

OutputH                       0/14            0/1/3000

Puntback                      0/0             0/0/6000

PMutex_egressL                0/10004         0/1/6000

PMutex_egressH                0/14            0/1/1500

PMutex_ingressL               0/0             0/0/6000

PMutex_ingressH               0/0             0/0/1500

Input              Punt         XIPC InputQ      XIPC PuntQ

ClientID         Drop/Total        Drop/Total      Cur/High/Max    Cur/High/Max

--------------------------------------------------------------------------------

ipv6_icmp           0/0               0/0             0/0/1000        0/0/1000

icmp                0/10000           0/0             0/1/1000        0/0/1000

clns              L 0/0               0/0           L 0/0/1000        0/0/0

H 0/0                             H 0/0/1000

eth_mgmt            0/0               0/0

ipv6_io             0/0               0/4             0/0/1000        0/1/1000

ipv6_nd             0/4               0/0             0/1/1500        0/0/1000

l2snoop             0/0               0/0             0/0/1000        0/0/0

ether_sock          0/0               0/0

icmpv6_unreach_jump        0/0               0/0

raw               L 0/0               0/0           L 0/0/1600        0/0/0

H 0/0                             H 0/0/1600

tcp               L 0/0               0/0           L 0/0/1600        0/0/0

H 0/0                             H 0/0/1600

udp               L 0/307             0/0           L 0/1/1600        0/0/0

H 0/0                             H 0/0/1600

arp                 0/15565           0/0             0/4/1000        0/0/1000

mpls_io             0/0               0/0             0/0/1000        0/0/1000

lspv_server         0/0               0/0

ipv4                0/0               0/0             0/0/1000        0/0/1000

ipv6                0/0               0/0             0/0/1000        0/0/1000

Key:

L = queue for lower priority packets

H = queue for higher priority packets

8. E/S IP

RP/0/RP0/CPU0:fretta_1#

RP/0/RP0/CPU0:fretta_1#show ipv4 traffic brief

Rcvd: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

0 echo request, 10000 echo reply

0 mask request, 0 mask reply

0 redirect, 0 parameter error

0 source quench, 0 timestamp, 0 timestamp reply

0 router advertisement, 0 router solicitation

10000 total, 0 checksum errors, 0 unknown

9. Estadísticas de interfaz:

RP/0/RP0/CPU0:fretta_1# show int gigabitEthernet 0/0/0/16

Thu Apr 20 21:22:12.822 UTC

GigabitEthernet0/0/0/16 is up, line protocol is up

Interface state transitions: 1

Hardware is GigabitEthernet, address is 008a.964b.7040 (bia 008a.964b.7040)

Internet address is 1.1.16.1/24

MTU 1514 bytes, BW 1000000 Kbit (Max: 1000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 1000Mb/s, link type is force-up

output flow control is off, input flow control is off

Carrier delay (up) is 10 msec

loopback not set,

Last link flapped 01:01:11

ARP type ARPA, ARP timeout 04:00:00

Last input 00:58:03, output 00:58:03

Last clearing of "show interface" counters never

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

10004 packets input, 1140270 bytes, 0 total input drops

3 drops for unrecognized upper-level protocol

Received 1 broadcast packets, 3 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10004 packets output, 1140270 bytes, 0 total output drops

Output 1 broadcast packets, 3 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

RP/0/RP0/CPU0:fretta_1#

Ping local

<TBD>