Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Antecedentes

Configurar

Diagrama de la red

Configuraciones

Verificación

Troubleshoot

Información Relacionada

Introducción

Este documento proporciona una configuración de ejemplo para un Cisco 827 Digital Subscriber Line (DSL) Router conectado a un Cisco 6130 Digital Subscriber Line Access Multiplexer (DSLAM), que termina en un Cisco 6400 Universal Access Concentrator (UAC).

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Equipo en las instalaciones del cliente (CPE) Cisco 827-4V con software IOS® versión 12.1(1)XB.

- Cisco 6400 UAC-NRP IOS Software Release 12.1(1)DC1 (servidor DHCP externo) o 12.2(2)B (servidor DHCP de IOS).

- Software Cisco 6400 UAC-NSP IOS versión 12.0(4)DB.

- Cisco 6130 DSLAM-NI2 IOS Software Release 12.1(1)DA.

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). If your network is live, make sure that you understand the potential impact of any command.

Convenciones

Para obtener más información sobre las convenciones del documento, consulte Convenciones de Consejos Técnicos de Cisco.

Antecedentes

El Cisco 827 está configurado con puentes RFC1483 y routing y puentes integrados (IRB). El Cisco 827 permite que los PC del segmento Ethernet obtengan direcciones de un servidor DHCP detrás del 6400, o del servidor DHCP del IOS 6400. Además, la dirección BVI también se ha configurado para obtener una dirección y una ruta predeterminada del servidor DHCP. La interfaz de modo de transferencia asincrónica (ATM) de Cisco 6400 se configura con encapsulación de puente enrutado (RBE) y se configura para funcionar con un servidor DHCP externo o con un servidor DHCP de IOS en el NRP.

Para Cisco 6400, la función ATM RBE en el procesador de ruta de nodos (NRP) Cisco 6400 enruta el tráfico IP sobre el tráfico Ethernet RFC1483 con puente desde una LAN con puente Stub. Los paquetes IP en puente recibidos en una interfaz ATM configurada en el modo route-bridged se rutean a través del encabezado IP. Las interfaces aprovechan las características de una topología de LAN stub comúnmente utilizada para el acceso DSL, y ofrecen un mayor rendimiento y flexibilidad sobre IRB.

Además, las rutas de host para los clientes DHCP se agregan automáticamente a la tabla de ruteo 6400 a medida que se distribuyen las direcciones IP. Las rutas del host se eliminan de la tabla de ruteo cuando se libera la dirección DHCP.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos utilizados en este documento, utilice la Command Lookup Tool (sólo para clientes registrados) .

Diagrama de la red

Este documento utiliza la configuración de red que se muestra en las figuras 1 y 2:

Figura 1: Situación 1

Figura 2: Situación 2

Configuraciones

En este documento, se utilizan estas configuraciones:

- Cisco 827

- Cisco 6400 NRP

- Depuración 6400 (uso de RBE con servidor DHCP externo)

- Depuración 6400 (uso de RBE con servidor DHCP IOS)

Cisco 827

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

bridge irb

!

interface Ethernet0

no ip address

bridge-group 1

!--- Because the Ethernet0 is bridged to the WAN interface, !--- PCs behind the ethernet0 can be setup as DHCP clients. !--- They get their addresses from the DHCP server behind the 6400, !--- or from the IOS DHCP server on the 6400.

!

interface ATM0

no ip address

no ip directed-broadcast

no ip mroute-cache

no atm ilmi-keepalive

pvc 4/100

encapsulation aal5snap

!

bundle-enable

bridge-group 1

hold-queue 224 in

!

interface BVI1

ip address dhcp client-id Ethernet0

!--- This command tells the BVI interface to get the address !--- from DHCP, and also to get the default route from DHCP.

!

ip classless

!--- Note: The default route will be inserted into !--- the routing table automatically from the DHCP server, and !--- no static routing statement is required.

no ip http server

!

bridge 1 protocol ieee

bridge 1 route ip

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 6400 NRP

Current configuration:

!

version 12.1

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback1

ip address 198.1.1.1 255.255.255.0

no ip directed-broadcast

!--- This address and mask must match the intended !--- scope and network configured on the external DHCP server.

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip mroute-cache

no ATM ilmi-keepalive

!

interface ATM0/0/0.4 point-to-point

!--- The interface ATM0/0/0.4 point-to-point uses IP !--- unnumbered Loopback1 for its IP address requirements.

ip unnumbered Loopback1

ip helper-address <dhcp server ip address>

atm route-bridged ip

PVC 4/100

encapsulation aal5snap

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

ip classless

!--- Note: For every DHCP client that is relayed an address, !--- a host route will be automatically inserted in the routing !--- table, and no host route statement for a DHCP client is required.

end

Depuración 6400 (uso de RBE con servidor DHCP externo)

debug ip dhcp server events

Looks for existing binding. . .

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

00:10:56:  find_or_create(): Creating new binding with data

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards DHCP DISCOVER packet from the client to the !--- external DHCP server.

00:10:56: DHCPD: Received DHCPDISCOVER on UNNUM-IF

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP OFFER packet from the external DHCP server !--- to the client.

00:10:56: DHCPD: Unnum: Received DHCPOFFER

00:10:56:  DHCPD: Server Address = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards the DHCP REQUEST packet from the client to the external !--- DHCP server.

00:10:56: DHCPD: Received DHCPREQUEST on UNNUM-IF

00:10:56:  DHCPD: request_on_unnumif ():Real Server = 200.200.200.2

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP ACK packet from the DHCP server to the client.

00:10:56: DHCPD: Unnum: Received DHCPACK

00:10:56:  DHCPD: lease time = 86400

!--- Adds a dynamic host route to the client into the routing table.

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56:  DHCPD: Adding new route to host 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_create_and_hash_route index = 126

00:10:56: DHCPD: dhcpd_add_route: lease = 86400

00:10:56:  DHCPD: Server ID saved in Binding = 200.200.200.2

00:10:56:  DHCPD: Server ID saved in Route block = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

Depuración 6400 (uso de RBE con servidor DHCP IOS)

debug ip dhcp server events

Assigns an address to the client from the IOS DHCP server.

23:19:09: DHCPD: assigned IP address 124.124.124.3 to

client 0063.6973.636f.2d30.3030.302e.3063.3036.2e32.3339.342d.4256.31.

23:19:10:  DHCPD: lease time = 86400

Adds a dynamic host route to the client into the routing table.

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10:  DHCPD: Adding new route to host 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_create_and_hash_route index = 127

23:19:10: DHCPD: dhcpd_add_route: lease = 86400

Verificación

Actualmente, no hay un procedimiento de verificación disponible para esta configuración.

Troubleshoot

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.

Información Relacionada

- Configuración de una terminación de router Cisco 827 en un Cisco 6400 en modo RBE usando puentes RFC1483

- Página de soporte del producto DSL