Contenido

Introducción

Antecedentes

Problema

Solución

Introducción

Este documento describe los pasos necesarios para realizar un switchover de la tarjeta Synchronous Transport Module (STM)/OC3 en Cisco ASR5000.

Antecedentes

Las tarjetas STM1/OC3 en ASR5000 proporcionan puertos STM-1 y, por lo tanto, deben manejarse con especial cuidado.

STM-1 (level-1) es la jerarquía digital sincrónica (SDH) estándar de transmisión de red de fibra óptica ITU-T. Tiene una velocidad de bits de 155,52 Mbps.

SDH es diferente de Ethernet y tiene algunos detalles que deben tenerse en cuenta.

Problema

La configuración tiene un par de tarjetas STM1/OC3 configuradas con redundancia de modo de conmutación de protección automática (APS): tarjeta 21 y tarjeta 37. La tarjeta 37 está activa y la tarjeta 21 está en espera. Los puertos 21/1 y 21/2 están desactivados y APS funciona. Los puertos 37/1 y 37/2 están activos y protegidos por APS.

card 21

redundancy aps-mode

aps 1+1 uni-directional non-revertive

framing sdh e1

initial-e1-framing crc4

service-type frame-relay

#exit

******** show card table all *******

Slot        Card Type                               Oper State   SPOF Attach

----------- -------------------------------------- ------------- ---- ------

21: LC      4 PORT STM1/OC3 Channelized Card       Standby          -    5

37: LC      4 PORT STM1/OC3 Channelized Card       Active          No    5

[local]gre2mme01# show aps info 37/1

Port :37/1

Role : Protected

Mode : 1+1

Revertive : No

State : Active

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 21/1

Lockout : No

[local]gre2mme01# show aps info 21/1

Port :21/1

Role : Working

Mode : 1+1

Revertive : No

State : Standby

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 37/1

Lockout : No

[local]mme01# show port table

Thursday March 08 11:20:20 CET 2018

Port  Role Type                      Admin   Oper Link State   Pair Redundant

----- ---- ------------------------ -------- ---- ---- ------- ----- ---------

21/1  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/1 APS Workn

21/2  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/2 APS Workn

37/1  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/1 APS Protd

37/2  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/2 APS Protd

Las tentativas de realizar un switchover entre las tarjetas 21 y 37 fallan con el error "modo de redundancia incorrecto".

[local]gre2mme01# card switch from 37 to 21

Friday March 09 00:28:10 CET 2018

Failure: wrong redundancy mode

Solución

El switchover con el switch de tarjeta de X a Y no se soporta para las tarjetas STM1/OC3 con redundancia de modo APS.

En su lugar, se deben utilizar los comandos específicos de APS.

aps { clear slot#/port# | exercise slot#/port# | lockout slot#/port# | switch { force | manual } slot#/port# }

switch { force | manual } slot#/port#

Switch to either the working port or the protection port:

force: Forces a switch of ports, even if there is an active alarm state.

manual: Implements a switch of ports if there are no active alarms.

slot#/port# is the CLC2/OLC2 slot number (valid range is 17 - 48) and appropriate port number (CLC2 valid range is 1 - 4; OLC2 valid value is 1)

En este caso, el problema se resolvió con:

aps switch manual 37/1

aps switch manual 37/2

Nota: Si falla el switchover manual, puede ser debido a errores en el puerto. Verifique el estado del puerto con "show aps port-status <card/slot>". El switchover todavía se puede forzar con la opción "force".

[local]gre2mme01# show aps port-status 21/1

Friday March 09 13:19:49 CET 2018

Port                      : 21/1

Role                      : Working

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

[local]gre2mme01#

[local]gre2mme01# show aps port-status 37/1

Friday March 09 13:20:07 CET 2018

Port                      : 37/1

Role                      : Protected

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

Invalid K1 K2             : No

Rx K1                     : Reqest : 0x 0  (--              Channel - 0)

Rx K2                     : Status : 0x 0  (--              Channel - 0)

Tx K1                     : Reqest : 0x 0  (No Request      Channel - 0)

Tx K2                     : Status : 0x 4  (UNI,1+1         Channel - 0)