Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Adyacencia descendente IS-IS

Adyacencia ISIS descendente (no relacionada con discordancia de MTU)

Inestable de adyacencia IS-IS

Adyacencia IS-IS inestable (inestabilidades aleatorias)

Introducción

Este documento describe cómo resolver problemas del protocolo IS-IS para las plataformas Cisco IOS® XE.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Sistema intermedio a sistema intermedio (IS-IS)

- Cisco IOS XE

Para obtener más información sobre estos temas, consulte:

- ip routing: Guía de configuración de ISIS

- Configuración de la Adyacencia IS-IS y los Tipos de Área

Componentes Utilizados

La información de este documento se basa en el software Cisco IOS XE.

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Adyacencia descendente IS-IS

Esta sección proporciona una solución al problema común de IS-IS inactivo. Este diagrama de red se utiliza como ejemplo:

Topología de referencia

IS-IS está inactivo entre el dispositivo A y el dispositivo B.

DeviceA#show isis neighbors detail

System Id       Type Interface     IP Address      State Holdtime Circuit Id

DeviceA#

DeviceB#show isis neighbors detail

System Id       Type Interface     IP Address      State Holdtime Circuit Id

DeviceA         L1L2 Twe1/0/9      192.0.2.1       DOWN  28       05

Area Address(es): 49.0001

SNPA: a84f.b1c3.9484

State Changed: never

Format: Phase V

Remote TID: 0

Local TID:  0

Interface name: TwentyFiveGigE1/0/9

Neighbor Circuit Id: 5

Adj sync: Full

Diagnostique el problema:

1. Valide la conectividad entre los dispositivos.

DeviceA#ping 192.0.2.2 size 1500  df-bit

Type escape sequence to abort.

Sending 5, 1500-byte ICMP Echos to 192.0.2.2, timeout is 2 seconds:

Packet sent with the DF bit set

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/1 ms

DeviceA#

DeviceB#ping 192.0.2.1 size 1500  df-bit

Type escape sequence to abort.

Sending 5, 1500-byte ICMP Echos to 192.0.2.1, timeout is 2 seconds:

Packet sent with the DF bit set

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/1 ms

DeviceB#

2. Revise la configuración en ambos lados.

DeviceA#show running-config | sec router isis

ip router isis

router isis

net 49.0001.0000.0000.000a.00

DeviceA#

DeviceB#show running-config | sec router isis

ip router isis

router isis

net 49.0001.0000.0000.000b.00

DeviceB#

3. Valide si la adyacencia está activa en el Servicio de red sin conexión (CLNS). Esto proporciona un resumen de los vecinos conectados a su dispositivo.

DeviceA#show clns neighbors  detail

System Id       Interface     SNPA                State  Holdtime  Type Protocol

0000.0000.000B  Te0/0/4       6c31.0edb.3b5f      Up     257       IS   ES-IS

Area Address(es): 49.0001

Uptime: 02:02:11

Interface name: TenGigabitEthernet0/0/4

DeviceA#

DeviceB#show clns neighbors  detail

System Id       Interface     SNPA                State  Holdtime  Type Protocol

0000.0000.000A  Twe1/0/9      a84f.b1c3.9484      Down   20        L1L2 IS-IS

Area Address(es): 49.0001

IP Address(es):  192.0.2.1*

Uptime: 02:02:09

NSF capable

Interface name: TwentyFiveGigE1/0/9

DeviceB#

Las direcciones MAC enumeradas en cada vecino CLNS son las direcciones MAC de los dispositivos remotos que se emparejan con el dispositivo local.

DeviceA#show interface TenGigabitEthernet0/0/4

TenGigabitEthernet0/0/4 is up, line protocol is up

Hardware is 8xSFP+, address is a84f.b1c3.9484 (bia a84f.b1c3.9484) < mac address appeared on SNPA DeviceB

Internet address is 192.0.2.1/30

MTU 1500 bytes, BW 10000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

DeviceB#show interface TwentyFiveGigE1/0/9

TwentyFiveGigE1/0/9 is up, line protocol is up (connected)

Hardware is Twenty Five Gigabit Ethernet, address is 6c31.0edb.3b5f (bia 6c31.0edb.3b5f) < mac address appeared on SNPA DeviceA

Internet address is 192.0.2.2/30

MTU 9216 bytes, BW 10000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

4. Ejecute el comandoshow clns interface

para validar si los parámetros coinciden con el par.

Asegúrese de que coincide con estos valores:

- Unidad de transmisión máxima (MTU)

- Tipo de circuito

DispositivoA

DeviceA#show clns interface TenGigabitEthernet0/0/4

TenGigabitEthernet0/0/4 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 19 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0x5

Neighbor Extended Local Circuit ID: 0x0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 908 milliseconds

if state DOWN

DispositivoB

DeviceB#show clns interface TwentyFiveGigE1/0/9

TwentyFiveGigE1/0/9 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 9213, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 8 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0xB

Neighbor Extended Local Circuit ID: 0x5

Neighbor System-ID: 0000.0000.000A

P2P retransmit queue size: 0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 2 seconds

if state INIT

En este escenario, el problema está relacionado con la discordancia de MTU. Si no se puede acceder al par remoto, el debug isis adj-packets

puede mostrar el valor de MTU que se envía y recibe.

Nota: Esto sólo se aplica cuando se show clns interfaceimprime el comando if state INIT.

DeviceA#debug isis adj-packets TenGigabitEthernet 0/0/4

IS-IS Adjacency related packets debugging is on for router process null

*Jul 18 23:24:16.598: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:16.599: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496 < MTU sent to the neighbor >

*Jul 18 23:24:25.189: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:25.189: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 18 23:24:34.057: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:34.057: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 18 23:24:42.866: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:42.866: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 18 23:24:51.646: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:51.646: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 18 23:24:59.606: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:59.606: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

DeviceB#debug isis adj-packets twentyFiveGigE 1/0/9

*Jul 18 23:53:22.420: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:INIT, length 9212  < MTU sent to the neighbor >

*Jul 18 23:53:22.591: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

*Jul 18 23:53:22.591: ISIS-Adj: cir type L1L2, cir id 05, length 1496   < MTU received from neighbor >

*Jul 18 23:53:22.592: ISIS-Adj: rcvd state DOWN, old state INIT, new state INIT, nbr usable TRUE

*Jul 18 23:53:22.592: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x49000184 Length:5

*Jul 18 23:53:22.592: ISIS-Adj: Nghbr Ckt ID changed: FALSE

*Jul 18 23:53:22.592: ISIS-Adj: newstate:1, state_changed:0, going_up:0, going_down:0

*Jul 18 23:53:22.592: ISIS-Adj: Action = ACCEPT

*Jul 18 23:53:22.592: ISIS-Adj: ACTION_ACCEPT:

...

Adyacencia ISIS descendente (no relacionada con discordancia de MTU)

IS-IS está inactivo y la MTU coincide en las interfaces.

DeviceA#show clns neighbors

System Id       Interface     SNPA                State  Holdtime  Type Protocol

DeviceA#

DeviceB#show clns neighbors

System Id       Interface     SNPA                State  Holdtime  Type Protocol

DeviceB#

1. Valide la configuración que coincida con el par.

2. Asegúrese de que la interfaz física esté en buenas condiciones para transmitir (sin errores o problemas de niveles de luz).

3. Verifique la conectividad entre pares (prueba de ping agregando el tamaño de MTU y el bit df).

4. Valide los vecinos CLNS entre los pares.

5. Asegúrese de que ambos extremos tengan la misma MTU y el mismo Circuit-Type junto con el estado.

DispositivoA

DeviceA#show clns interface TenGigabitEthernet 0/0/4

TenGigabitEthernet0/0/4 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 41 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0x5

Neighbor Extended Local Circuit ID: 0x0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 2 seconds

if state DOWN

DispositivoB

DeviceB#show clns interface twentyFiveGigE 1/0/9

TwentyFiveGigE1/0/9 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 42 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0xB

Neighbor Extended Local Circuit ID: 0x0

P2P retransmit queue size: 0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 5 seconds

if state DOWN

6. Habilite debug isis adj-packet

y valide los paquetes que se envían y reciben.

DeviceA#debug isis adj-packets TenGigabitEthernet 0/0/4

IS-IS Adjacency related packets debugging is on for router process null

*Jul 19 13:32:52.788: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:32:52.788: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 19 13:33:00.708: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:33:00.709: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 19 13:33:09.726: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:33:09.726: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 19 13:33:18.376: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:33:18.376: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 19 13:33:26.132: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:33:26.132: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

DeviceA#

DeviceB#debug isis adj-packets TwentyFiveGigE1/0/9

IS-IS Adjacency related packets debugging is on for router process null

*Jul 19 14:01:32.125: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

*Jul 19 14:01:32.125: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

*Jul 19 14:01:40.005: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

*Jul 19 14:01:40.005: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

*Jul 19 14:01:49.602: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

*Jul 19 14:01:49.602: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

*Jul 19 14:01:58.284: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

*Jul 19 14:01:58.284: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

Ambos dispositivos están enviando, pero no reciben el paquete de saludo de sus vecinos.

7. Habilite una captura para validar que los paquetes se envían a cada vecino. Una vez que la captura se haya completado, expórtela a la memoria flash de inicialización o a la memoria flash como.pcap file y cárguela en un servidor TFTP para obtener más detalles.

DeviceA#show monitor cap cap parameter

monitor capture cap interface TenGigabitEthernet0/0/4 BOTH < Interface from where send and receive the Hello Packets >

monitor capture cap control-plane IN  < Packets to be process and generated by the CPU >

monitor capture cap access-list TAC  < ACL for capture only the IS-IS packets >

monitor capture cap buffer size 10

monitor capture cap limit pps 1000

DeviceA#show access-list TAC

Extended MAC access list TAC

permit host a84f.b1c3.9484 host 0900.2b00.0005  < Local MAC address towards the IS-IS Hello >

permit host 6c31.0edb.3b5f host 0900.2b00.0005  < Remote MAC address towards the IS-IS Hello >

DeviceB#show monitor capture cap parameter

monitor capture cap interface TwentyFiveGigE1/0/9 BOTH < Interface from where send and receive the Hello Packets >

monitor capture cap control-plane BOTH < Packets to be process and generated by the CPU >

monitor capture cap match any < match all the packets on the switch >

monitor capture cap buffer size 10

Nota: EPC en los switches Catalyst Cisco IOS XE solo captura los saludos IS-IS salientes y no los paquetes de ingreso. Como alternativa, se recomiendan capturas de SPAN.

En esta tabla se muestra una referencia a los paquetes de saludo.

Nombre

Dirección Mac de destino

Todos los IS L1

0180.c200.0014

Todos los IS L2

0180.c200.0015

Todos los IS

0900.2b00.0005

Todos los ES

0900.2b00.0004

8. Revise la captura exportada y asegúrese de que los paquetes hello se intercambian entre vecinos.

El dispositivo A envía los paquetes de saludo añadiendo su ID de sistema (cuadrado rojo). Se espera que reciba un paquete de su vecino con su ID de sistema. En esta captura, puede apreciar que DeviceB no reenvía estos paquetes al par.

DispositivoCaptura descendente de ISIS

La captura del dispositivo B muestra que los paquetes hello se envían a su vecino (cuadrado rojo). Sin embargo, de manera similar a la última captura, no recibe los paquetes de saludo de su vecino.

DeviceB ISIS Down Capture

El problema en este escenario se debe a un dispositivo intermedio que no permite enviar los paquetes de saludo. Si observa una situación similar y necesita resolver más problemas, abra un caso de Cisco TAC.

Inestable de adyacencia IS-IS

Esta sección proporciona una solución al problema común de los flaps IS-IS.

Diagnostique el problema:

IS-IS es inestable entre DeviceA y DeviceB.

DeviceA#show logging

Jul 19 15:05:03.623: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 19 15:05:15.075: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

Jul 19 15:07:04.575: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 19 15:07:15.759: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

Jul 19 15:09:04.983: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 19 15:09:14.835: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

DeviceB#show logging

Jul 19 15:05:02.316: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 19 15:05:18.191: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

Jul 19 15:07:09.280: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 19 15:07:18.876: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

Jul 19 15:09:06.080: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired!

Jul 19 15:09:17.948: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

1. Verifique la conectividad entre pares (prueba de ping con el tamaño de MTU y el conjunto de bits df).

2. Asegúrese de que la interfaz física esté en buenas condiciones para transmitir (sin errores o problemas de niveles de luz).

3. Valide que los vecinos CLNS se envíen tráfico entre sí con el comando show clns traffic interface

.

DeviceA#show clns traffic interface TenGigabitEthernet0/0/4

CLNS:  Time since last clear: 00:01:57

CLNS & ESIS Output: 3, Input: 21

Dropped Protocol not enabled on interface: 0

CLNS Local: 0, Forward: 0

Interface TenGigabitEthernet0/0/4:

IS-IS: Time since last clear: 00:01:57

IS-IS: Level-1 Hellos (sent/rcvd): 0/0

IS-IS: Level-2 Hellos (sent/rcvd): 0/0

IS-IS: PTP Hellos     (sent/rcvd): 15/11  < DeviceA sends hello packets and receives less than its sends>

IS-IS: Level-1 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-2 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-1 CSNPs (sent/rcvd): 1/1

IS-IS: Level-2 CSNPs (sent/rcvd): 1/1

IS-IS: Level-1 PSNPs (sent/rcvd): 1/1

IS-IS: Level-2 PSNPs (sent/rcvd): 1/1

IS-IS: Level-1 DR Elections: 0

IS-IS: Level-2 DR Elections: 0

DeviceB#show clns traffic interface TwentyFiveGigE1/0/9

CLNS:  Time since last clear: 00:00:27

CLNS queue depth: 0/100, drops: 0, highest: 2

CLNS & ESIS Output: 1, Input: 14

Dropped Protocol not enabled on interface: 0

CLNS Local: 0, Forward: 0

Interface TwentyFiveGigE1/0/9:

IS-IS: Time since last clear: 00:00:27

IS-IS: Level-1 Hellos (sent/rcvd): 0/0

IS-IS: Level-2 Hellos (sent/rcvd): 0/0

IS-IS: PTP Hellos     (sent/rcvd): 4/5  < DeviceB, sends and receives a couple of hellos in comparison with DeviceA>

IS-IS: Level-1 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-2 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-1 CSNPs (sent/rcvd): 1/1

IS-IS: Level-2 CSNPs (sent/rcvd): 1/1

IS-IS: Level-1 PSNPs (sent/rcvd): 1/1

IS-IS: Level-2 PSNPs (sent/rcvd): 1/1

IS-IS: Level-1 DR Elections: 0

IS-IS: Level-2 DR Elections: 0

Consejo: El comandoclns trafficmuestra los saludos IS-IS basados en el nivel IS-IS y el tipo de red IS-IS.

4. Habilite debug ISIS adj-packets

para ver qué paquetes se intercambian entre vecinos.

DeviceA#show isis adj-packets TenGigabitEthernet0/0/4

<  Hellos sent to the DeviceB with no response >

Jul 19 18:58:34.779: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:58:34.779: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 19 18:58:42.719: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:58:42.719: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 19 18:58:50.430: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:58:50.430: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 19 18:58:58.356: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:58:58.356: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

< IS-IS declares the protocol down >

Jul 19 18:59:01.879: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

< IS-IS sends hellos to the neighbor and receives a response from DeviceB >

Jul 19 18:59:01.879: ISIS-Adj: L2 adj count 0

Jul 19 18:59:07.724: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

Jul 19 18:59:07.724: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

Jul 19 18:59:15.894: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

Jul 19 18:59:15.894: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

Jul 19 18:59:15.896: ISIS-Adj: Rec serial IIH from 6c31.0edb.3b5f (TenGigabitEthernet0/0/4)

Jul 19 18:59:15.896: ISIS-Adj: cir type L2, cir id 0B, length 1496

Jul 19 18:59:15.896: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:59:15.896: ISIS-Adj: Nghbr Ckt ID changed: TRUE

Jul 19 18:59:15.896: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000A

Jul 19 18:59:15.896: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0x5

Jul 19 18:59:15.896: ISIS-Adj: newstate:1, state_changed:1, going_up:0, going_down:0

Jul 19 18:59:15.896: ISIS-Adj: Action = GOING UP, new type = L2

< DeviceA declares that the adjacency is UP and starts to establish the session >

Jul 19 18:59:15.896: ISIS-Adj: New serial adjacency

Jul 19 18:59:15.896: ISIS-Adj: rcvd state INIT, old state DOWN, new state INIT, nbr usable TRUE

Jul 19 18:59:15.898: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:59:15.898: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:INIT, length 1496

Jul 19 18:59:15.900: ISIS-Adj: Rec serial IIH from 6c31.0edb.3b5f (TenGigabitEthernet0/0/4)

Jul 19 18:59:15.900: ISIS-Adj: cir type L2, cir id 0B, length 1496

Jul 19 18:59:15.900: ISIS-Adj: rcvd state UP, old state INIT, new state UP, nbr usable TRUE

Jul 19 18:59:15.900: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:59:15.900: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 19 18:59:15.900: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000A

Jul 19 18:59:15.900: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0x5

Jul 19 18:59:15.900: ISIS-Adj: newstate:0, state_changed:1, going_up:1, going_down:0

Jul 19 18:59:15.900: ISIS-Adj: Action = GOING UP, new type = L2

Jul 19 18:59:15.900: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

DeviceB#debug isis adj-packets TwentyFiveGigE1/0/9

<  Hello sent to the DeviceA with no response >

Jul 19 18:58:44.105: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:58:44.105: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 19 18:58:51.814: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:58:51.814: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 19 18:58:59.768: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:58:59.768: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

< IS-IS declares the protocol down >

Jul 19 18:59:07.886: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

< IS-IS sends hellos to the neighbor and receives a response from DeviceA >

Jul 19 18:59:07.887: ISIS-Adj: L2 adj count 0

Jul 19 18:59:08.422: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

Jul 19 18:59:08.422: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

Jul 19 18:59:16.144: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

Jul 19 18:59:16.144: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

Jul 19 18:59:19.001: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

Jul 19 18:59:19.001: ISIS-Adj: cir type L2, cir id 05, length 1496

Jul 19 18:59:19.001: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x49000184 Length:5

Jul 19 18:59:19.001: ISIS-Adj: Nghbr Ckt ID changed: TRUE

Jul 19 18:59:19.001: ISIS-Adj: newstate:1, state_changed:1, going_up:0, going_down:0

Jul 19 18:59:19.001: ISIS-Adj: Action = GOING UP, new type = L2

< DeviceB declares that the adjacency is UP and starts to establish the session >

Jul 19 18:59:19.001: ISIS-Adj: New serial adjacency

Jul 19 18:59:19.001: ISIS-Adj: rcvd state DOWN, old state DOWN, new state INIT, nbr usable TRUE

Jul 19 18:59:19.002: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:59:19.002: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:INIT, length 1496

Jul 19 18:59:19.004: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

Jul 19 18:59:19.004: ISIS-Adj: cir type L2, cir id 05, length 1496

Jul 19 18:59:19.004: ISIS-Adj: rcvd state INIT, old state INIT, new state UP, nbr usable TRUE

Jul 19 18:59:19.004: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:59:19.004: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 19 18:59:19.004: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000B

Jul 19 18:59:19.004: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0xB

Jul 19 18:59:19.004: ISIS-Adj: newstate:0, state_changed:1, going_up:1, going_down:0

Jul 19 18:59:19.004: ISIS-Adj: Action = GOING UP, new type = L2

Jul 19 18:59:19.004: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

5. Habilite una captura para validar que los paquetes se envían a cada vecino. Una vez que la captura se haya completado, exporte la captura a la memoria flash de inicialización como un .pcap file archivo y cárguela en un servidor TFTP para obtener más detalles.

El dispositivo A recibe un paquete del dispositivo B (19:15.05) después de recibir este paquete. El dispositivo A envía su saludo correspondiente sin ninguna respuesta del vecino hasta que alcanza el tiempo de espera vencido que es 30 segundos de forma predeterminada (cuadrado rojo).

Esto es cuando este router declara la adyacencia inactiva. Después de este período, el dispositivo B envía su saludo y es recibido por el dispositivo A y estos paquetes se intercambian sin ningún problema (cuadrado verde).

Dispositivo inestable de ISISa

La captura del dispositivo B es similar al síntoma del par. El dispositivo no recibe los paquetes de saludo de su vecino. El último paquete se envía desde el dispositivo B sin respuesta del dispositivo A hasta que alcanza el temporizador de espera de 30 segundos. Este switch considera que la adyacencia está inactiva. Después de esta falla, el switch recibe el saludo del dispositivo A e inicia la vecindad.

Dispositivo inestable ISIS B

Esto concluye que hay un problema con el transporte y debe revisar por qué se pierden los paquetes.

Adyacencia IS-IS inestable (inestabilidades aleatorias)

IS-IS es inestable entre DeviceA y DeviceB. El protocolo encuentra flaps aleatorios.

DeviceA#show logging

Jul 21 10:03:38.633: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 21 10:05:10.272: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

Jul 21 10:33:41.528: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 21 10:35:07.979: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

Jul 21 11:03:42.442: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 21 11:05:08.469: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

DeviceB#show logging

Jul 21 10:03:44.535: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 21 10:05:13.281: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

Jul 21 10:33:38.408: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 21 10:35:10.989: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

Jul 21 11:03:39.291: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 21 11:05:11.479: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

Cuando se produzca el problema, asegúrese de continuar con estas acciones:

1. Valide que la configuración coincida con el par.

2. Asegúrese de que la interfaz física esté en buenas condiciones para transmitir (sin errores o problemas de niveles de luz).

3. Verifique la conectividad entre pares (prueba de ping con el tamaño de MTU y el conjunto de bits df).

Consejo: No es fácil resolver este tipo de problemas debido a la condición de los flaps aleatorios. Para hacer frente a esta situación, considere la posibilidad de utilizar secuencias de comandos para ejecutar los comandos necesarios y continuar con la solución de problemas.

4. Proceda a configurar una captura de monitor con una lista de acceso para ser más específico en la resolución de problemas.

5. Inhabilite la consola de registro y habilite eldebug isis adj-packets

.

DeviceA(config)#no logging console

DeviceA(config)#exit

DeviceA#debug isis adj-packets TenGigabitEthernet0/0/4

6. Habilite la captura de paquetes en el equipo y actívelo.

DeviceA#show monitor capture cap parameter

monitor capture cap interface TenGigabitEthernet0/0/4 BOTH

monitor capture cap control-plane IN

monitor capture cap access-list TAC > match only the packets allowed on the ACL

monitor capture cap buffer size 100 circular > when the capture reaches the size of 100 MB this overwrite the previous information.

monitor capture cap limit pps 1000

DeviceA#show access-lists TAC

Extended MAC access list TAC

permit host a84f.b1c3.9484 host 0900.2b00.0005  < Local MAC address towards the IS-IS Hello >

permit host 6c31.0edb.3b5f host 0900.2b00.0005  < Remote MAC address towards the IS-IS Hello >

DeviceA#monitor capture cap start

7. Configure Embedded Event Manager (EEM) en el dispositivo de Cisco. Una vez que el problema acciona el patrón de syslog, esto genera registros que se almacenan en la memoria flash como un.txtarchivo. Proceda a cargarlos a un servidor TFTP para obtener más información.

DeviceA#show running-config | sec event

event manager applet ISIS_Flap authorization bypass

event syslog pattern "%CLNS-5-ADJCHANGE:.*hold time expired"

action 1.0 syslog msg "ISIS down Please wait - capturing the traffic"

action 1.1 cli command "enable"

action 1.2 cli command "show clns interface ten0/0/4 | append bootflash:ISIS_DeviceA.txt"

action 1.3 cli command "show clns traffic interface tenGigabitEthernet 0/0/4 | append bootflash:ISIS_DeviceA.txt"

action 2.0 cli command "show logging | append bootflash:debug_DeviceA.txt"

action 2.1 cli command "undebug all"

action 2.2 cli command "monitor capture cap stop"

action 3.0 cli command "end"

For switches to append the logs it is neccesary to use the append flash:

, as example:

event manager applet ISIS_Flap authorization bypass

event syslog pattern "%CLNS-5-ADJCHANGE:.*hold time expired"

action 1.0 syslog msg "ISIS down Please wait - capturing the traffic"

action 1.1 cli command "enable"

action 1.2 cli command "show clns interface ten0/0/4 | append flash:ISIS_DeviceB.txt"

action 3.0 cli command "end"

8. Una vez que se desencadene el problema, proceda a exportar la captura en la memoria flash de inicialización/flash y asegúrese de que los.txtarchivos se almacenan correctamente en la misma ubicación.

DeviceA#monitor capture cap export bootflash:ISIS_DeviceA.pcap

Exported Successfully

DeviceA#dir bootflash:*.txt

Directory of bootflash:/*.txt

Directory of bootflash:/

19  -rw-        6048  Jul 22 2023 13:33:40 +00:00  ISIS_DeviceA.txt

20  -rw-      103153  Jul 22 2023 13:33:40 +00:00  debug_DeviceA.txt

26975526912 bytes total (20527607808 bytes free)

DeviceB#monitor capture cap export location flash:ISIS_DeviceB.pcap

Exported Successfully

DeviceB#dir bootflash:*.txt

Directory of bootflash:/*.txt

Directory of bootflash:/

356939  -rw-         660  Jul 22 2023 13:33:42 +00:00  ISIS_DeviceB.txt

356943  -rw-      103283  Jul 22 2023 13:33:42 +00:00  debug_DeviceB.txt

9. Cargue los archivos en un servidor TFTP para comparar los registros entre los dispositivos.

DeviceA#copy bootflash:ISIS_DeviceA.txt tftp:

Address or name of remote host []? < TFTP IP address >

Destination filename [ISIS_DeviceA.txt]?

!!

18144 bytes copied in 0.095 secs (190989 bytes/sec)

10. Compare las capturas y los registros para validar si los paquetes se envían y reciben desde ambos routers.

Análisis de los registros IS-IS:

- Ambas interfaces IS-IS se configuran con el mismo tipo de red L1-L2.

- El estado de las interfaces (si el estado es INACTIVO) muestra que ambas interfaces no reciben el paquete de saludo.

- IS-IS: Los saludos PTP tienen una discordancia en los paquetes enviados y recibidos. Mientras que el dispositivo A envía 205 paquetes y recibe 199 del par, el dispositivo B tiene 202 de 202. Esto indica que el transporte no es confiable.

DeviceA

TenGigabitEthernet0/0/4 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 30 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0x5

Neighbor Extended Local Circuit ID: 0x0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 574 milliseconds

if state DOWN

CLNS:  Time since last clear: 00:29:37

CLNS & ESIS Output: 33, Input: 241

Dropped Protocol not enabled on interface: 0

CLNS Local: 0, Forward: 0

Interface TenGigabitEthernet0/0/4:

IS-IS: Time since last clear: 00:29:37

IS-IS: Level-1 Hellos (sent/rcvd): 0/0

IS-IS: Level-2 Hellos (sent/rcvd): 0/0

IS-IS: PTP Hellos     (sent/rcvd): 205/199

IS-IS: Level-1 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-2 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-1 CSNPs (sent/rcvd): 0/0

IS-IS: Level-2 CSNPs (sent/rcvd): 0/0

IS-IS: Level-1 PSNPs (sent/rcvd): 2/2

IS-IS: Level-2 PSNPs (sent/rcvd): 2/2

IS-IS: Level-1 DR Elections: 0

IS-IS: Level-2 DR Elections: 0

DeviceB

TwentyFiveGigE1/0/9 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 20 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0xB

Neighbor Extended Local Circuit ID: 0x0

P2P retransmit queue size: 0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 7 seconds

if state DOWN

CLNS:  Time since last clear: 00:29:34

CLNS queue depth: 0/100, drops: 0, highest: 1

CLNS & ESIS Output: 34, Input: 243

Dropped Protocol not enabled on interface: 0

CLNS Local: 0, Forward: 0

Interface TwentyFiveGigE1/0/9:

IS-IS: Time since last clear: 00:29:34

IS-IS: Level-1 Hellos (sent/rcvd): 0/0

IS-IS: Level-2 Hellos (sent/rcvd): 0/0

IS-IS: PTP Hellos     (sent/rcvd): 202/202

IS-IS: Level-1 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-2 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-1 CSNPs (sent/rcvd): 0/0

IS-IS: Level-2 CSNPs (sent/rcvd): 0/0

IS-IS: Level-1 PSNPs (sent/rcvd): 2/2

IS-IS: Level-2 PSNPs (sent/rcvd): 2/2

IS-IS: Level-1 DR Elections: 0

IS-IS: Level-2 DR Elections: 0

El siguiente paso es comparar las depuraciones y capturas.

DeviceA

Jul 22 19:17:24.929: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:24.929: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:17:31.685: ISIS-Adj: Rec serial IIH from 6c31.0edb.3b5f (TenGigabitEthernet0/0/4)

Jul 22 19:17:31.685: ISIS-Adj: cir type L1L2, cir id 0B, length 1496

Jul 22 19:17:31.685: ISIS-Adj: rcvd state UP, old state UP, new state UP, nbr usable TRUE

Jul 22 19:17:31.685: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:31.685: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 22 19:17:31.685: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000A

Jul 22 19:17:31.685: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0x5

Jul 22 19:17:31.685: ISIS-Adj: newstate:0, state_changed:0, going_up:0, going_down:0

Jul 22 19:17:31.685: ISIS-Adj: Action = ACCEPT

Jul 22 19:17:31.685: ISIS-Adj: ACTION_ACCEPT:

Jul 22 19:17:33.626: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:33.627: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:17:42.671: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:42.672: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:17:52.008: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:52.008: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:18:01.475: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:18:01.475: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:18:01.685: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 22 19:18:01.685: ISIS-Adj: L1 adj count 0

Jul 22 19:18:01.685: ISIS-Adj: L2 adj count 0

DeviceB

Jul 22 19:17:25.693: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:25.693: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:27.882: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

Jul 22 19:17:27.882: ISIS-Adj: cir type L1L2, cir id 05, length 1496

Jul 22 19:17:27.882: ISIS-Adj: rcvd state UP, old state UP, new state UP, nbr usable TRUE

Jul 22 19:17:27.882: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:27.882: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 22 19:17:27.882: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000B

Jul 22 19:17:27.882: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0xB

Jul 22 19:17:27.882: ISIS-Adj: newstate:0, state_changed:0, going_up:0, going_down:0

Jul 22 19:17:27.882: ISIS-Adj: Action = ACCEPT

Jul 22 19:17:27.882: ISIS-Adj: ACTION_ACCEPT:

Jul 22 19:17:34.637: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:34.637: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:36.579: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

Jul 22 19:17:36.579: ISIS-Adj: cir type L1L2, cir id 05, length 1496

Jul 22 19:17:36.579: ISIS-Adj: rcvd state UP, old state UP, new state UP, nbr usable TRUE

Jul 22 19:17:36.579: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:36.579: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 22 19:17:36.579: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000B

Jul 22 19:17:36.579: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0xB

Jul 22 19:17:36.579: ISIS-Adj: newstate:0, state_changed:0, going_up:0, going_down:0

Jul 22 19:17:36.579: ISIS-Adj: Action = ACCEPT

Jul 22 19:17:36.579: ISIS-Adj: ACTION_ACCEPT:

Jul 22 19:17:43.270: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:43.271: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:51.658: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:51.658: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:18:00.248: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:18:00.248: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:18:06.579: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 22 19:18:06.579: ISIS-Adj: L1 adj count 0

Jul 22 19:18:06.579: ISIS-Adj: L2 adj count 0

Análisis de los registros de depuración IS-IS:

- El dispositivo A envía un paquete de saludo (22 jul 19:17:24), el dispositivo B responde a este paquete (22 jul 19:17:25), el dispositivo A recibe esta respuesta (22 jul 19:17:31).

DispositivoA

Jul 22 19:17:24.929: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:24.929: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:17:31.685: ISIS-Adj: Rec serial IIH from 6c31.0edb.3b5f (TenGigabitEthernet0/0/4)

DispositivoB

Jul 22 19:17:25.693: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:25.693: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:27.882: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

- El dispositivo A envía otro paquete de saludo (22 de julio a las 19:17:33), el dispositivo B envía su paquete de saludo (22 de julio a las 19:17:34) y dos segundos después recibe el paquete de su par.

DispositivoA

Jul 22 19:17:33.626: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:33.627: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

DispositivoB

Jul 22 19:17:34.637: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:34.637: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:36.579: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

- Durante el período en que el dispositivo A no recibe el paquete enviado por el dispositivo B, el protocolo se declara inactivo después de 30 segundos.

DispositivoA

Jul 22 19:17:42.671: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:42.672: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:18:01.475: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:18:01.685: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

- El dispositivo B no recibe ningún paquete de su par. Después del período de tiempo de espera predeterminado, este protocolo se declara inactivo.

DispositivoB

Jul 22 19:17:43.270: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:43.271: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

<snip>

Jul 22 19:18:06.579: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Captura el análisis:

El dispositivo A recibe paquetes del dispositivo B, pero el último paquete que este router recibe del par se encuentra en el minuto 13:17.31. Luego, el dispositivo A envía paquetes de saludo

sin ninguna respuesta del par.

Dispositivo de inestabilidad aleatoria ISISa

La captura del dispositivo B muestra una condición similar, el switch recibe el último paquete de saludo de su par, sin embargo, el dispositivo B comienza a enviar sus paquetes de saludo sin respuesta.

Dispositivo inestable ISIS B

En las capturas exportadas, los paquetes de saludo no se entregan entre pares. Este problema parece estar relacionado con el transporte.