Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Configurar

Verificación

Programación del script

Uso de EEM

Uso de Planificador

Troubleshoot

Introducción

Este documento describe cómo monitorear la CPU y la memoria con el uso del módulo PIX incorporado y programar notificaciones de syslog.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Embedded Event Manager

- Nexus Scheduler

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Nexus 3000 - 7.0(3)I4(7)

- Nexus 9000 - 7.0(3)I7(1)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configurar

Para este ejemplo, monitoree el proceso PTP para su CPU y memoria.

Asegúrese de configurar.

feature ptp

feature scheduler

El script python se utiliza para monitorear la CPU y la memoria de un proceso determinado que se ejecuta en el dispositivo.

import cisco

import sys

from cli import *

def main(process):

mem = ""

cpu = ""

ptp_cpu = cli('sh proc cpu | i '+process)

ptp_mem = cli('sh proc mem | i '+process)

if ptp_cpu:

csplit = ptp_cpu.split()

cpu = csplit[4]

if ptp_mem:

msplit = ptp_mem.split()

mem = msplit[3]

cli('syslog priority notifications msg for '+process+' mem: '+mem +' and cpu ' + cpu)

return

if __name__ == "__main__":

main(sys.argv[1])

Guarde el archivo como ptp_alert_mem_cpu.py.

Verificación

Utilize esta sección para confirmar que su configuración funcione correctamente.

Ejecute el archivo desde CLI.

Sintaxis para ejecutar el script:

python <script file> <process name>

Nexus# python bootflash:ptp_alert_mem_cpu.py ptp

Nexus# show logg last 5

2018 Dec 13 10:59:30 Nexus %VSHD-5-VSHD_SYSLOG_CONFIG_I: Configured from vty by admin on vsh.28744

2018 Dec 13 11:02:30 Nexus %VSHD-5-VSHD_SYSLOG_CONFIG_I: Configured from vty by admin on vsh.28867

2018 Dec 13 11:03:37 Nexus %EEM_ACTION-5-NOTIF: for ptp mem: 649089024 and cpu 0.00%

Como se ve aquí, esta alerta de syslog se activa para el proceso PTP e incluye el uso de CPU y memoria.

El mismo resultado se ve desde la CLI de Nexus.

Nexus(config-schedule)# show proc cpu | i ptp

21037          233      4586     50   0.00%  ptp

Nexus(config-schedule)# show proc mem | i ptp

21037   4669440  1018201484649089024   fff201d0/fff1e65c  ptp

Este es otro ejemplo que muestra cómo se utiliza el script para matar un proceso tan pronto como la memoria cruza el umbral especificado.

La secuencia de comandos toma dos entradas, nombre del proceso y tamaño del mem después de lo cual se va a matar el proceso.

Nexus# python bootflash:Check_mem_kill_process.py ptp 23423

Nexus# show logg last 5

2018 Dec 20 07:00:09 BGL14.1-G.17-N3K-C31108PC-1 %EEM_ACTION-5-NOTIF: Killing ptp mem: 691027968

2018 Dec 20 07:00:09 BGL14.1-G.17-N3K-C31108PC-1 %VSHD-5-VSHD_SYSLOG_CMD_EXEC: User:admin executed the command:run bash

2018 Dec 20 07:00:09 BGL14.1-G.17-N3K-C31108PC-1 %SYSMGR-2-SERVICE_CRASHED: Service "ptp" (PID 29107) hasn't caught signal 6 (core will be saved).

Programación del script

Uso de EEM

Este script EEM se activará cada minuto y luego se generará el mensaje syslog.

Nexus(config)# event manager applet mem_cpu

Nexus(config-applet)# event snmp oid 1.3.6.1.4.1.9.9.109.1.1.1.1.6.1 get-type exact entry-op le entry-val 12345 poll-interval 60

Nexus(config-applet)# action 1.0 syslog priority notifications msg Running_mem_cpu_script

Nexus(config-applet)# action 2.0 cli command python bootflash:ptp_alert_mem_cpu.py ptp

Nexus(config-schedule)# show event manager policy internal mem_cpu

Name : mem_cpu

Policy Type : applet

Event Specification : event snmp oid 1.3.6.1.4.1.9.9.109.1.1.1.1.6.1 get-type exact entry-op le entry-val 12345 poll-interval 60

Action : 1.0,sup:syslog priority notifications msg Running_mem_cpu_script;2.0,vsh,sup:command python bootflash:ptp_alert_mem_cpu.py

Event Specification active on : Active

Uso de Planificador

Este trabajo del programador se activará cada minuto y luego se generará el mensaje syslog.

Nexus(config)# feature scheduler

Nexus(config)# scheduler job name ptp

Nexus(config-job)# python bootflash:ptp_alert_mem_cpu.py ptp

Nexus(config-job)# exit

Nexus(config)# scheduler schedule name ptp

Nexus(config-schedule)# job name ptp

Nexus(config-schedule)# time start now repeat 0:0:1

Schedule starts from Thu Dec 13 11:21:13 2018

Nexus(config-schedule)# show scheduler schedule

Schedule Name       : ptp

-------------------------

User Name           : admin

Schedule Type       : Run every 0 Days 0 Hrs 1 Mins

Start Time          : Thu Dec 13 11:21:13 2018

Last Execution Time : Thu Dec 13 11:21:13 2018

Last Completion Time: Thu Dec 13 11:21:17 2018

Execution count     : 1

-----------------------------------------------

Job Name            Last Execution Status

-----------------------------------------------

ptp                               Success (0)

Nexus(config-schedule)# sh logg last 5

2018 Dec 13 11:20:19 Nexus %VSHD-5-VSHD_SYSLOG_CONFIG_I: Configured from vty by admin on vsh.29770

2018 Dec 13 11:20:31 Nexus %VSHD-5-VSHD_SYSLOG_CONFIG_I: Configured from vty by admin on vsh.29777

2018 Dec 13 11:21:17 Nexus %EEM_ACTION-5-NOTIF: for ptp mem: 649089024 and cpu 0.00%

Troubleshoot

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.