Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Topología

Problema

Procedimiento de actualización

Introducción

Este documento describe un procedimiento paso a paso sobre cómo actualizar la versión de Complex Programmable Logic Device (CPLD) en una configuración de Catalyst 9400 StackWise Virtual Link (SVL).

Prerequisites

Requirements

Cisco recomienda tener conocimientos básicos de la configuración de Stackwise-Virtual en Catalyst 9400.

Componentes Utilizados

La información de este documento se basa en las versiones de software y hardware de PID: C9404R.

Módulos:

C9400-SUP-1XL

C9400-LC-24XS

Versión del software: 17.09.4a

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Topología

Problema

En Catalyst 9400, mientras se actualiza la versión de Cisco IOS®, en algunos casos excepcionales, la versión CPLD del dispositivo no se actualiza. El CPLD y la versión Rommon para la versión particular se pueden verificar desde el enlace https://www.cisco.com/c/en/us/td/docs/switches/lan/catalyst9400/software/release/17-13/release_notes/ol-17-13-9400/rommon_versions.html.

Consulte este fragmento de código:

9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:05:00

1/0       C9400-LC-24XS       ok                    00:00:56

2         C9400-SUP-1XL       ok                    00:05:00

2/0       C9400-SUP-1XL       ok                    00:00:53

R0                            ok, active            00:05:00

P1        C9400-PWR-3200AC    ok                    00:04:38

P9        C9404-FAN           ok                    00:04:37

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:04:57

1/0       C9400-LC-24XS       ok                    00:00:08

2         C9400-SUP-1XL       ok                    00:04:57

2/0       C9400-SUP-1XL       ok                    00:00:07

R0                            ok, standby           00:04:57

P1        C9400-PWR-3200AC    ok                    00:04:35

P9        C9404-FAN           ok                    00:04:33

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

2         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

En este caso, el CPLD del modo en espera no se actualizó después de la actualización.

Procedimiento de actualización

Paso 1. Utilice show redundacny para verificar si el SVL funciona correctamente.

9400-1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 4 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = Switch 1

Current Software state = ACTIVE

Uptime in current state = 4 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

Peer Processor Information :

----------------------------

Standby Location = Switch 2 >>>>>>>>>>Switch 2 is standby

Current Software state = STANDBY HOT

Uptime in current state = 0 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

Paso 2. Para actualizar la versión de CPLD utilice este comando:

upgrade hw-programmable cpld filename bootflash: switch {1-2} RP active

9400-1#upgrade hw-programmable cpld filename bootflash: switch 2 R0

Firmware upgrade requires the SVL member to reload. Do you want to proceed?(y/n)y

Use cli 'redundancy reload peer' to upgrade the firmware on peer

9400-1#redundancy reload peer

Stack is in Half ring setup; Reloading a switch might cause stack split

Reload peer [confirm]

Preparing to reload peer

Paso 3. Aquí puede ver que el CPLD se está actualizando:

Chassis 2 reloading, reason - Admin reload CLI

May 4 01:34:23.829: %PMAN-5-EXITACTION: R0/0: pvp:

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

Current ROMMON image : Primary

Last reset cause : SoftwareResetTrig

C9400-SUP-1XL platform with 16777216 Kbytes of main memory

Starting System FPGA Upgrade .....

Programming SPI Primary image is completed.

Authenticating SPI Primary image .....

IO FPGA image is authenticated successfully.

Programming Header .....

FPGA HDR file size: 12

Image page count: 1

Verifying programmed header .....

Verifying programmed header .....

Programmed header is verified successfully.

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Power Cycle is needed to complete System firmware upgrade.

It takes ~7 mins to upgrade firmwre after power cycle starts.

DO NOT DISRUPT AFTER POWER C

Initializing Hardware......

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

Paso 4. Confirme si el CPLD se actualiza en modo de espera:

F241.24.02-9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:38

1/0       C9400-LC-24XS       ok                    00:25:34

2         C9400-SUP-1XL       ok                    00:29:38

2/0       C9400-SUP-1XL       ok                    00:25:31

R0                            ok, active            00:29:38

P1        C9400-PWR-3200AC    ok                    00:29:16

P9        C9404-FAN           ok                    00:29:14

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:35

1/0       C9400-LC-24XS       ok                    00:00:11

2         C9400-SUP-1XL       ok                    00:29:35

2/0       C9400-SUP-1XL       ok                    00:00:10

R0                            ok, standby           00:29:35

P1        C9400-PWR-3200AC    ok                    00:29:13

P9        C9404-FAN           ok                    00:29:11

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

2 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

Paso 5. En este caso, si es necesario actualizar la versión CPLD del switch activo, debe seguir estos pasos:

1. Do a switchover

9400-1#redundency force-switchover                             >>>>>>>>>>Initially Switch 1 is active and Switch 2 is standby.

After switchover it is vise-versa

2. Upgrade the CPLD version of previous active [now standby] with the command:

9400-1#upgrade hw-programmable cpld filename bootflash: switch 1 R0

3. Reload the the standby

9400-1#redundancy reload peer