Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Configuración

Información Relacionada

Introducción

Este documento proporciona la configuración actual del AS5300 en el laboratorio de marcado de San José, Estados Unidos. Este servidor posee 24 módems Microcom y 60 MICA que se pueden utilizar para probar cómo se desempeña su módem cliente.

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

Módems MICA/Microcom/NextPort que ejecutan códigos V.34, V.90 y V.92.

Convenciones

Consulte Convenciones de Consejos TécnicosCisco para obtener más información sobre las convenciones del documento.

Configuración

Esta es la configuración AS5300 en el laboratorio de acceso telefónico de San José:

access-3#wr t

Building configuration...

Current configuration:

!

version 11.3

no service pad

service tcp-keepalives-in

service tcp-keepalives-out

service timestamps debug datetime msec

service timestamps log datetime msec

service password-encryption

service linenumber

!

hostname access-3

!

aaa new-model

aaa authentication login default local

aaa authentication login console none

aaa authentication login use-tacacs local tacacs+

aaa authentication enable default enable

aaa authentication ppp default if-needed local tacacs+

aaa authentication arap default local

aaa authorization exec default none

aaa authorization exec console none

aaa authorization network default local

aaa accounting exec default stop-only tacacs+

aaa accounting network default stop-only tacacs+

aaa accounting system default stop-only tacacs+

enable secret 5 $1$oMKx$kPcop1zxkpxa8fkxXBWp21

!

username cisco password *******

username callback callback-dialstring "" password *******

!

modem-pool microcom_v90_dialin

pool-range 1-6

called-number 4085703930 max-conn 6

modem-pool microcom_k56flex_dialin

pool-range 7-12

called-number 4085703931 max-conn 6

modem-pool mica_v90_dialin

pool-range 25-54

called-number 4085703932 max-conn 30

modem-pool mica_k56flex_dialin

pool-range 55-84

called-number 4085703933 max-conn 30

modem-pool microcom_v34_dialin

pool-range 13-24

called-number 4085703934 max-conn 12

modem call-record terse

modem recovery threshold 50

modem buffer-size 250

ip nat pool global_pool 172.16.24.121 172.16.24.126 netmask

255.255.255.240

ip nat inside source list 101 pool global_pool overload

no ip finger

no ip domain-lookup

ip host publinux 172.16.24.117

ip host dialin-test 172.16.24.118

ip domain-name cisco.com

ip name-server 172.16.24.117

multilink virtual-template 1

virtual-profile virtual-template 1

rlogin trusted-remoteuser-source local

rlogin trusted-localuser-source local

appletalk routing

ipx routing 00e0.1e81.636c

isdn switch-type primary-ni

clock timezone PST -8

clock summer-time PDT recurring

!

!

controller T1 0

framing esf

clock source line primary

linecode b8zs

pri-group timeslots 1-24

description 408-570-3930 (666-2300)

!

controller T1 1

shutdown

clock source line secondary

!

controller T1 2

shutdown

clock source internal

!

controller T1 3

shutdown

clock source internal

!

!

interface Loopback0

ip address 10.1.1.1 255.255.255.0

ipx network CE2

!

interface Ethernet0

ip address 172.16.24.116 255.255.255.240

ip nat outside

no ip mroute-cache

appletalk cable-range 666-666 666.90

appletalk zone NeverNeverLand

ipx network CE

ipx type-20-propagation

netbios nbf

!

interface Virtual-Template1

ip unnumbered Loopback0

ip helper-address 172.16.24.118

ip tcp header-compression passive

no keepalive

appletalk client-mode

ipx ppp-client Loopback0

ipx update interval rip passive

ipx update interval sap passive

ipx type-20-propagation

peer default ip address pool default

compress mppc

ppp authentication chap pap

ppp multilink

multilink max-links 2

netbios nbf

!

interface Serial0:23

ip unnumbered Loopback0

encapsulation ppp

ip mroute-cache

no keepalive

dialer-group 1

isdn switch-type primary-5ess

isdn incoming-voice modem

no peer default ip address

no fair-queue

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

!

interface FastEthernet0

no ip address

no ip mroute-cache

shutdown

!

interface Group-Async1

description Microcom V.90 modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 1 6

hold-queue 10 in

!

interface Group-Async2

description Microcom K56flex modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 7 12

hold-queue 10 in

!

interface Group-Async3

description MICA V.90 modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 25 54

!

interface Group-Async4

description MICA K56flex modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 55 84

!

interface Group-Async5

description Microcom V.34 modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 13 24

!

ip local pool default 10.1.1.2 10.1.1.254

ip default-gateway 172.16.24.113

ip classless

no ip forward-protocol udp bootpc

no ip forward-protocol udp tftp

no ip forward-protocol udp nameserver

no ip forward-protocol udp domain

no ip forward-protocol udp time

no ip forward-protocol udp tacacs

ip route 0.0.0.0 0.0.0.0 172.16.24.113

ip http server

!

no logging buffered

no logging console

access-list 1 permit 171.68.0.0 0.3.255.255

access-list 101 permit ip 10.0.0.0 0.255.255.255 172.16.24.112

0.0.0.15

dialer-list 1 protocol ip permit

!

!

!

!

tacacs-server host 172.16.24.117

tacacs-server key cisco

banner motd ^CC

Welcome! Please login with username cisco, password

cisco, and type the appropriate commands for your test:

ppp  -  to start ppp

slip -  to start slip

arap -  to start arap

Please e-mail comments about this service to dpeng@cisco.com.

^C

privilege exec level 0 modem at-mode

privilege exec level 0 modem

privilege exec level 0 arap

privilege exec level 0 telnet

privilege exec level 0 rlogin

privilege exec level 0 ppp negotiate

privilege exec level 0 ppp default

privilege exec level 0 ppp

privilege exec level 0 slip negotiate

privilege exec level 0 slip default

privilege exec level 0 slip

privilege exec level 0 terminal monitor

privilege exec level 0 terminal

privilege exec level 0 show line

privilege exec level 0 show isdn status

privilege exec level 0 show isdn service

privilege exec level 0 show isdn

privilege exec level 0 show modem connect-speeds

privilege exec level 0 show modem log

privilege exec level 0 show modem operational-status

privilege exec level 0 show modem configuration

privilege exec level 0 show modem csm

privilege exec level 0 show modem summary

privilege exec level 0 show modem version

privilege exec level 0 show modem call-stats

privilege exec level 0 show modem

privilege exec level 0 show version

privilege exec level 0 show controllers t1

privilege exec level 0 show controllers

privilege exec level 0 show users

privilege exec level 0 show interfaces

privilege exec level 0 show

privilege exec level 0 debug dhcp

privilege exec level 0 debug radius

privilege exec level 0 debug callback

privilege exec level 0 debug vtemplate

privilege exec level 0 debug isdn q931

privilege exec level 0 debug isdn

privilege exec level 0 debug tacacs

privilege exec level 0 debug ppp cbcp

privilege exec level 0 debug ppp authentication

privilege exec level 0 debug ppp mppc

privilege exec level 0 debug ppp error

privilege exec level 0 debug ppp negotiation

privilege exec level 0 debug ppp multilink fragments

privilege exec level 0 debug ppp multilink

privilege exec level 0 debug ppp

privilege exec level 0 debug ip icmp

privilege exec level 0 debug ip

privilege exec level 0 debug aaa per-user

privilege exec level 0 debug aaa accounting

privilege exec level 0 debug aaa authorization

privilege exec level 0 debug aaa authentication

privilege exec level 0 debug aaa

privilege exec level 0 debug modem csm

privilege exec level 0 debug modem

privilege exec level 0 debug

!

line con 0

exec-timeout 0 0

authorization exec console

login authentication console

transport input none

line 1 24

access-class 1 in

autoselect arap

autoselect during-login

autoselect ppp

arap enable

modem InOut

rotary 1

transport input all

escape-character BREAK

line 25 84

access-class 1 in

autoselect arap

autoselect during-login

autoselect ppp

arap enable

modem InOut

rotary 2

transport input all

escape-character BREAK

line aux 0

line vty 0 4

exec-timeout 60 0

access-class 1 in

line vty 5 19

exec-timeout 60 0

access-class 1 in

!

end

Información Relacionada

- Prueba de DDR asincrónica en el Laboratorio de marcación para clientes de San José

- Laboratorio de llamadas entrantes para clientes (San José, EE.UU.)

- Resolución de problemas de conexiones de marcado

- Implementación de RAS de gateway

- Guía para la conexión del módem-router

- Soporte Técnico y Documentación - Cisco Systems