Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Problema

Solución

Introducción

Este documento describe un error recibido al implementar una versión 4.8.0. imagen de trabajador a VMware con Application Centric Infrastructure (ACI).

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

La información de este documento se basa en la versión 4.8.0 de Cloud Center.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Problema

Al implementar una versión 4.8.0. imagen de trabajador en VMware con ACI, puede ver uno de dos mensajes de error:

ERROR policy.AciSecurityPolicyUtil [threadPoolExecutor-1]  -

External network parameter ECS:L3out:L3Out-EPG is of the wrong format!

or

ERROR policy.AciSecurityPolicyUtil [threadPoolExecutor-1]  -

External network parameter is of the wrong format

Solución

Este es un problema conocido con la versión 4.8.0. imagen del trabajador. No puede entender la salida L3 con 3 valores, consulte CORE-15315 (Estado: Fijado en v. 4.8.1.) para obtener más información.

Este problema se ha resuelto en 4.8.0.1, actualice la imagen de Trabajador a 4.8.0.1 para resolverlo.