Table of Contents

1810_EU

EU Directive 1999/5/EC - Compliance Information for the Cisco Aironet 1810 series IEEE802.11 a/b/g/n/ac Wireless LAN products

June 2, 2016

This document contains compliance information for the Cisco Aironet 1810 Series Access Points which are intended to be placed on the market within the European Union, Lichtenstein, Switzerland, Iceland, Norway, Turkey and other countries that have implemented the EU Directive 1999/5/EC.

Contents

This document contains these sections:

- Scope

- Declaration of Conformity with Regard to the EU Directive 1999/5/EC (R&TTE Directive)

- CE Marking

- National Restrictions

- Antennas

- Operating Frequency

- Intended use of the equipment

- Changing Output Power

- Related Support and Documentation

- Obtaining Documentation and Submitting a Service Request

Scope

The information in this document is applicable to the Cisco Aironet 1810 series wireless LAN products that currently include the following products:

1810 series:

AIR-AP1810W-E-K9

AIR-OEAP1810-E-K9

The equipment operates in the 2400 MHz to 2483.5 MHz, the 5150 MHz to 5350 MHz, and the 5470 MHz to 5725 MHz frequency range.

Declaration of Conformity with Regard to the EU Directive 1999/5/EC (R&TTE Directive)

This declaration is only valid for configurations (combinations of software, firmware and hardware) provided and/or supported by Cisco Systems for use within the EU. The use of software or firmware not supported/provided by Cisco Systems may result that the equipment is no longer compliant with the regulatory requirements.

The full declaration of conformity for the Cisco Aironet 1810 Series can be found at the following URL:

The following standards were applied during the assessment of the product against the requirements of Directive 1999/5/EC:

- Radio: EN 301 893 and EN 300 328

- EMC: EN 301 489-1 and EN 301 489-17

- Safety: EN 60950-1 and EN 50385

CE Marking

For the Cisco Aironet 1810 Series Access Points, the following CE mark and Class-2 identifier are affixed to the equipment and its packaging.

National Restrictions

The following sections identify countries having additional requirements or restrictions.

Denmark

In Denmark, the band 5150 - 5350 MHz is also allowed for outdoor usage.

I Danmark må frekvensbåndet 5150 - 5350 også anvendes udendørs.

Italy

for more details.

per maggiori dettagli.

Latvia

for more details.

.

Note Although Norway, Switzerland and Liechtenstein are not EU member states, the EU Directive 1999/5/EC has also been implemented in those countries.

Antennas

The device has integrated antennas which cannot be replaced.

Operating Frequency

Cisco PID

Frequency Bands

Maximum Power level (EIRP)

AIR-AP1810W-E-K9

AIR-OEAP1810-E-K9

2400 MHz - 2483.5 MHz

100 mW

5150 MHz - 5350 MHz

200 mW

5470 MHz - 5725 MHz

1000 W

The operating frequency in a Wireless LAN is determined by the access point. As such, it is important that the access point is correctly configured to meet the local regulations.

Wireless LAN equipment operating in the 5 GHz frequency band and installed outdoors need to have the 5 150 MHz to 5 350 MHz band disabled. Check the User Manual for correctly configuring the equipment so that outdoor operation only takes place in 5 470 MHz to 5 725 MHz.

Intended use of the equipment

This product is wireless Access Point to be used in large enterprise organizations for the deployment of a wireless network whereby Wi-Fi compliant devices can connect to the network. The product is intended to be used indoors.

Changing Output Power

To change the output power of the Cisco wireless products, follow the instructions at:

Note Administrator privileges may be required to change access point settings.

Related Support and Documentation

Support information and documentation for Cisco Aironet 1810w Series Access Points is available at:

Support information and documentation for Cisco Aironet 1810 Series OfficeExtend Access Points is available at:

The following documents provide information about the controllers and access points:

- Cisco WLAN Controller Web Interface User Guide—Describes the web-based user interface that is built into each Cisco Wireless LAN Controller.

- Cisco Wireless LAN Controller Installation and Configuration Guide—Describes installation, configuration, and logging into Cisco Wireless LAN Controllers.

- Cisco Aironet Access Point Hardware Installation Guide and/or Getting Started Guide—Provides a product overview and basic instructions for getting an access point connected to a wireless LAN. It also describes the access point's hardware installation and specifications.

Note If you still have questions regarding the compliance of these products or you cannot find the information you are looking for, please send an email request to Cisco at complianceinfo@cisco.com

Obtaining Documentation and Submitting a Service Request

.

. The RSS feeds are a free service.

This document is to be used in conjunction with the documents listed in the “Related Support and Documentation” section.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

© 2016 Cisco Systems, Inc. All rights reserved.