Table of Contents

spa100-rn-1-3-3

Release Notes for SPA100 Series Analog Telephone Adapters Firmware Version 1.3.3

Firmware Released: May 2013; Document Revised: July 2015

These Release Notes provide information about SPA100 Series Analog Telephone Adapters firmware version 1.3.3.

IMPORTANT

As with any firmware release, read these release notes before upgrading the firmware. Cisco also recommends backing up the configuration before any firmware upgrade.

Changes in Firmware Version 1.3.3

For the Cisco SPA100 series, the following changes are made in firmware version 1.3.3:

- Improvement in reboot time for SPA122 (increase in RC provisioning speed.)

- User is able to add configurable prefix to syslog (For example: $PN, $MA, etc.)

- SPA reboots upon every resync: This feature reduces unnecessary reboot when the same parameter appears in multiple profile files.

- Use SIP Notify event: When the parameter, <Provisioning Enable> is set to "no", SPA can resync to turn on provisioning remotely.

- Logs over TLS.

- Supports SSL email.

- Enhancement to include MAC address of the device in syslog messages.

- Reports memory (low) availability via syslog.

- FW upgrade using HTTP 302 redirection.

- Caller ID updated while creating a conference.

- Call Hold reminder when the caller makes the second call, while the first call is on hold.

- ATA memory usage displayed on the GUI.

Hardware and Firmware Compatibility Matrix

SPA112/SPA122

(3 types of devices)

SN Range

1.3.5p(XU), 1.3.5p, 1.3.2p

1.3.5(XU), 1.3.5, 1.3.4, 1.3.3, 1.3.2n

1.3.2(XU), 1.3.2 or earlier

Device 1

New Si3217x-B SLIC)

SPA112

- CCQ18400001 to CCQ1841033K

- After CCQ18500DAE

SPA122

- CCQ1834031U to CCQ1834037D

- CCQ1847066I to CCQ184707YA

- CCQ184902ED to CCQ184904UL

- CCQ184904UM to CCQ184904Y3

- CCQ184904Y4 to CCQ184904Y5

- After CCQ185001YH

Yes

No

No

Device 2

Old Si3217x-B SLIC)

SPA112

- CCQ175106J3 to CCQ175106OM

- CCQ181607OO to CCQ181607U7

- CCQ18240E34 to CCQ18400000

- CCQ1841033L to CCQ18500D9K

SPA122

- CCQ174602V3 to CCQ1746030M

- CCQ181502B7 to CCQ181502GQ

- CCQ182002W3 to CCQ1834031T

- CCQ1834037E to CCQ18470660

- CCQ184707YB to CCQ184902EC

- CCQ184904UM to CCQ184904UL

- CCQ184904Y4 to CCQ184904Y3

- CCQ184904Y6 to CCQ185001YH

Yes

Yes

No

Device 3

Old Si3217x-B SLIC)

SPA112: Before CCQ182002W2

SPA122: Before CCQ181805KR

Yes

Yes

Yes

Note Do not upgrade any device to an unsupported firmware version as detailed in the Hardware and Firmware Compatibility Matrix table.

Note 1.3.2p is identical to 1.3.2 and additionally supports 128MB flash and new SLIC.

1.3.2n is based on 1.3.2; both have the same feature set, except that 1.3.2n supports 128MB flash while 1.3.2 does not.

1.3.5p is based on 1.3.5; both have the same feature set, except that 1.3.5p supports new SLIC while 1.3.5 does not.

1.3.5p(XU), 1.3.5(XU), 1.3.2(XU): SRTP functionality has been removed, and it cannot be configured or provisioned in firmware versions that are designated with XU in the filename.

Note New devices have a label that reads S/W: Must use 1.3.5(004p) or later.

Resolved Issues

Tracking Number

Description

CSCuf02996

Resync error retry delay is applicable even after profile rule is modified.

CSCue99038

Reset button factory reset is not always effective.

CSCue99016

Web Access Admin Access is disabled from web-GUI but not from config.

Known Issues

Tracking Number

Description

CSCud44154

When profile_rule and profile_rule_b are both changed, the SPA100/200 fails to load first profile rule.

CSCul21696

T38 fax fails with model "Cannon MX850", but successful with other models like Brother FAX 8360P, Xerox WorkCentre Pro 575, Panasonic UF-9000, and HP Officejet 7110.

CSCtq39251

The volume is 2dbm lower than the SPA2102 with default settings.

CSCuf54553

FQDN is required in the profile rule after setting Restricted Access Domains.

CSCul61825

The SPA100/200 series does not support RFC2543 Call Hold.

Note Re-INVITE message always has the device ip address in its SDP and not 0.0.0.0

Upgrade the Firmware

Follow these instructions to upgrade the phone adapter.

Step 2 Launch a web browser, and enter the LAN IP addresses of the phone adapter.

Step 3 Log in to the Configuration Utility.

in the navigation tree.

and select the location of the upgrade file that you downloaded.

button to upgrade the firmware.

Note Upgrading the firmware may take several minutes. Until the process is complete, DO NOT turn off the power, press the hardware reset button, or click the Back button in your current browser.

Behavior During Times of Network Congestion

Anything that degrades network performance can affect voice and video quality, and in some cases, can cause a call to drop. Sources of network degradation can include, but are not limited to, the following activities:

- Administrative tasks, such as an internal port scan or security scan

- Attacks that occur on your network, such as a Denial of Service attack

To reduce or eliminate any adverse effects to the devices, schedule administrative network tasks during a time when the devices are not being used or exclude the devices from testing.

Related Information

Support

Cisco Small Business Support Community

Online Technical Support and Documentation (Login Required)

Cisco Small Business Support and Resources

Downloads and Documentation

Firmware

Cisco Small Business Voice Gateways Documentation

Open Source Documentation

Cisco Small Business

Cisco Partner Central for Small Business (Partner Login Required)

Cisco Small Business Home

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

© 2013 Cisco Systems, Inc. All rights reserved.

78-21259-01