Table of Contents

spa100-rn-135p-xu

Release Notes for SPA100 Series Analog Telephone Adapters Firmware Version 1.3.5p(XU)

First Published: May 5, 2015

Revised: July 7, 2015

These Release Notes provide information about SPA100 Series Analog Telephone Adapters firmware version 1.3.5p(XU).

IMPORTANT:

Changes in Firmware Version 1.3.5p(XU) From 1.3.5(XU)

For the Cisco SPA112 and SPA122, the following changes are made in firmware version 1.3.5p(XU):

- Silicon Labs changed the voltage component supplier from Telefunken to Vanguard. The new Silicon Labs chip requires a small code change.

Hardware Change

To identify the new Silicon Labs chip, the new box HID format 1.1.x is used.

Software Changes

The following software changes apply to firmware release 1.3.5p(XU):

- Support for the new Silicon Labs chip is added, but compatibility with the old Silicon Labs chip is preserved.

- A downgrade limit applies to the new Silicon Labs chip.

Hardware and Firmware Compatibility Matrix

SPA112/SPA122

(3 types of devices)

SN Range

1.3.5p(XU), 1.3.5p, 1.3.2p

1.3.5(XU), 1.3.5, 1.3.4, 1.3.3, 1.3.2n

1.3.2(XU), 1.3.2 or earlier

Device 1

New Si3217x-B SLIC)

SPA112

- CCQ18400001 to CCQ1841033K

- After CCQ18500DAE

SPA122

- CCQ1834031U to CCQ1834037D

- CCQ1847066I to CCQ184707YA

- CCQ184902ED to CCQ184904UL

- CCQ184904UM to CCQ184904Y3

- CCQ184904Y4 to CCQ184904Y5

- After CCQ185001YH

Yes

No

No

Device 2

Old Si3217x-B SLIC)

SPA112

- CCQ175106J3 to CCQ175106OM

- CCQ181607OO to CCQ181607U7

- CCQ18240E34 to CCQ18400000

- CCQ1841033L to CCQ18500D9K

SPA122

- CCQ174602V3 to CCQ1746030M

- CCQ181502B7 to CCQ181502GQ

- CCQ182002W3 to CCQ1834031T

- CCQ1834037E to CCQ18470660

- CCQ184707YB to CCQ184902EC

- CCQ184904UM to CCQ184904UL

- CCQ184904Y4 to CCQ184904Y3

- CCQ184904Y6 to CCQ185001YH

Yes

Yes

No

Device 3

Old Si3217x-B SLIC)

SPA112: Before CCQ182002W2

SPA122: Before CCQ181805KR

Yes

Yes

Yes

Note Do not upgrade any device to an unsupported firmware version as detailed in the Hardware and Firmware Compatibility Matrix table.

Note 1.3.2p is identical to 1.3.2 and additionally supports 128MB flash and new SLIC.

1.3.2n is based on 1.3.2; both have the same feature set, except that 1.3.2n supports 128MB flash while 1.3.2 does not.

1.3.5p is based on 1.3.5; both have the same feature set, except that 1.3.5p supports new SLIC while 1.3.5 does not.

1.3.5p(XU), 1.3.5(XU), 1.3.2(XU): SRTP functionality has been removed, and it cannot be configured or provisioned in firmware versions that are designated with XU in the filename.

Note New devices have a label that reads S/W: Must use 1.3.5(004p) or later.

Resolved Issues

Firmware version 1.3.5p(XU) is based on 1.3.5(XU), and it resolves the following defect.

Tracking Number

Description

CSCur99365

SPA100 and SPA232D require new firmware 1.3.2p 1.3.5p to support new SLIC.

Known Issues

Note 1.3.5p(XU) and 1.3.5(XU) Known Issues are the same as stated in the 1.3.5 Release Notes.

Upgrade the Firmware

Follow these instructions to upgrade the phone adapter.

Step 2 Access the adapter Configuration Utility in one of the following two ways:

a. If the adapter is SPA112, connect one analog phone to its FXS port, press **** to access IVR, enter 110 to get SPA112 WAN IP address. Then, launch a web browser, and enter WAN IP address.

b. If the adapter is SPA122 or SPA232D, connect one PC to its LAN port. Then, launch a web browser, and enter the LAN IP address. The default value is 192.168.15.1.

Step 3 Log in to the Configuration Utility.

in the navigation tree.

and select the location of the upgrade file that you downloaded.

button to upgrade the firmware.

Note Upgrading the firmware may take several minutes. Until the process is complete, DO NOT turn off the power, press the hardware reset button, or click the Back button in your current browser.

Behavior During Times of Network Congestion

Anything that degrades network performance can affect voice and video quality, and in some cases, can cause a call to drop. Sources of network degradation can include, but are not limited to, the following activities:

- Administrative tasks, such as an internal port scan or security scan

- Attacks that occur on your network, such as a Denial of Service attack

To reduce or eliminate any adverse effects to the devices, schedule administrative network tasks during a time when the devices are not being used or exclude the devices from testing.

Related Information

Support

Cisco Small Business Support Community

Online Technical Support and Documentation (Login Required)

Cisco Small Business Support and Resources

Downloads and Documentation

Firmware

Cisco Small Business Voice Gateways Documentation

Open Source Documentation

then search in the Release Notes area.

Cisco Small Business

Cisco Partner Central for Small Business (Partner Login Required)

Cisco Small Business Home

Documentation, Service Requests, and Additional Information

, which also lists all new and revised Cisco technical documentation, at:

as a Really Simple Syndication (RSS) feed and set content to be delivered directly to your desktop using a reader application. The RSS feeds are a free service and Cisco currently supports RSS Version 2.0.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Copyright © 2015 Cisco Systems, Inc. All rights reserved.