Table of Contents

spa100-rn-1-3-5-xu

Release Notes for SPA100 Series Analog Telephone Adapters Firmware Version 1.3.5(XU)

Firmware Released: September 2014

Document Revised: July 2015

These Release Notes provide information about SPA100 Series Analog Telephone Adapters firmware version 1.3.5(XU).

IMPORTANT

As with any firmware release, read these release notes before upgrading the firmware. Cisco also recommends backing up the configuration before any firmware upgrade.

Changes in Firmware Version 1.3.5(XU) from 1.3.2(XU)

- Improvement in reboot time for SPA122, to increase in RC provisioning speed.

- User is able to add configurable prefix to syslog. For example: $PN, $MA, etc.

- Support SIP Notify event. When the parameter <Provisioning Enable> is set to “no”, SPA can resync to turn on provisioning remotely. Note: This feature applies only to RC unit.

- Support logs over TLS.

- Support SSL email.

- Enhancement to include device MAC address in syslog messages.

- Report low memory availability via syslog, and show memory usage on the web page.

- Support firmware upgrade using HTTP 302 redirection.

- Caller ID can be updated while creating a conference.

- Support Call Hold reminder when the caller makes the second call while the first call is on hold.

- Open Secure Sockets Layer (SSL) open source library used in the ATA is upgraded to 1.0.1g in order to support TLS 1.2.

- LED pattern is added specifically for RC status in SPA122-RC to allow users to view and monitor the RC process.

- The SIP parameter “Hook Flash MIME Type” is set to application/broadsoft, so that the Metaswitch server recognizes the flashhook event.

- Add a new parameter “Feature Key Sync” for FXS. The default value is no.

This parameter enables synchronization of DND and CFWD (forward all, forward busy, and forward no answer) settings between ATA and the proxy server. Any change in the fields on the ATA is notified to the proxy and vice versa.

- Support “Conference Bridge URL”. The default setting is blank. After setting it to a valid URL, the user can establish a 3-way conference by hookflash of FXS port. For

n>3, user can add participants by making new calls.

Hardware and Firmware Compatibility Matrix

SPA112/SPA122

(3 types of devices)

SN Range

1.3.5p(XU), 1.3.5p, 1.3.2p

1.3.5(XU), 1.3.5, 1.3.4, 1.3.3, 1.3.2n

1.3.2(XU), 1.3.2 or earlier

Device 1

New Si3217x-B SLIC)

SPA112

- CCQ18400001 to CCQ1841033K

- After CCQ18500DAE

SPA122

- CCQ1834031U to CCQ1834037D

- CCQ1847066I to CCQ184707YA

- CCQ184902ED to CCQ184904UL

- CCQ184904UM to CCQ184904Y3

- CCQ184904Y4 to CCQ184904Y5

- After CCQ185001YH

Yes

No

No

Device 2

Old Si3217x-B SLIC)

SPA112

- CCQ175106J3 to CCQ175106OM

- CCQ181607OO to CCQ181607U7

- CCQ18240E34 to CCQ18400000

- CCQ1841033L to CCQ18500D9K

SPA122

- CCQ174602V3 to CCQ1746030M

- CCQ181502B7 to CCQ181502GQ

- CCQ182002W3 to CCQ1834031T

- CCQ1834037E to CCQ18470660

- CCQ184707YB to CCQ184902EC

- CCQ184904UM to CCQ184904UL

- CCQ184904Y4 to CCQ184904Y3

- CCQ184904Y6 to CCQ185001YH

Yes

Yes

No

Device 3

Old Si3217x-B SLIC)

SPA112: Before CCQ182002W2

SPA122: Before CCQ181805KR

Yes

Yes

Yes

Note Do not upgrade any device to an unsupported firmware version as detailed in the Hardware and Firmware Compatibility Matrix table.

Note 1.3.2p is identical to 1.3.2 and additionally supports 128MB flash and new SLIC.

1.3.2n is based on 1.3.2; both have the same feature set, except that 1.3.2n supports 128MB flash while 1.3.2 does not.

1.3.5p is based on 1.3.5; both have the same feature set, except that 1.3.5p supports new SLIC while 1.3.5 does not.

1.3.5p(XU), 1.3.5(XU), 1.3.2(XU): SRTP functionality has been removed, and it cannot be configured or provisioned in firmware versions that are designated with XU in the filename.

Note New devices have a label that reads S/W: Must use 1.3.5(004p) or later.

Resolved Issues

Identifier

Headline

CSCuf02996

Resync error retry delay is applicable even after profile rule is modified.

CSCue99038

Reset button factory reset is not always effective.

CSCue99016

Web Access Admin Access is disabled from web-GUI but not from config.

CSCuo85817

DNS retry optimization for RC provisioning.

CSCup79722

The default value of LLDP is different from the configuration generated by the SPC tool.

CSCuq14803

SPA112: Admin access not available in the configuration file generated by the SPC tool.

CSCtz07722

SRP references in the administration guide changed to SPA100.

CSCtz15389

Blind Transfer: When a complete number is entered, the ATA sends a SIP INVITE message with the Refer-To target equals to *98 target_number.

CSCud44154

SPA122 fails to load the first profile rule when both the profile rules are changed.

CSCuh26401

SPA112: IVR option 170 does not work properly.

CSCuo42957

SPA112: PSTN Caller ID is not displayed on the phone connected to SPA112/SPA122.

CSCuo44768

IVR Menu Options 1911 and 1921 are not valid anymore.

CSCuo49341

SPA122-RC: Power LED Indicator on RC devices to check the status of RC provisioning process.

CSCuo77458

SPA122-RC: DNS retry missed the first value in the Resync Error Retry Delay.

CSCuo85834

Monitor and document the SPA122-RC Provisioning Time Optimization. (Reduce the RC provisioning time by at least 2 minutes. NOTE: The complete RC device provisioning time should be between 5 - 7 minutes.)

CSCuo44802

Obsolete Link for Music Coupler needs to be updated.

CSCuq87602

SPA1xx&SPA232D: Some parameters for supplementary Service do not work.

CSCuj33644

SPA1xx: version-style conditional expression broken on XU image.

Known Issues

Identifier

Headline

CSCul21696

T38 fax fails with model “Cannon MX850,” but successful with other models like Brother FAX 8360P, Xerox WorkCentre Pro 575, Panasonic UF-9000, and HP Officejet 7110.

CSCtq39251

The volume is 2dbm lower than the SPA2102 with default settings.

CSCuf54553

FQDN is required in the profile rule after setting Restricted Access Domains.

CSCul61825

The SPA100/200 series does not support RFC2543 Call Hold. (NOTE: Re-INVITE message always has the device ip address in its SDP and not 0.0.0.0.)

CSCuq06381

SPA122-RC: To get the new configuration on RC, power cycle is needed after custom reset.

CSCuq17200

SPA112&122: The minor version number in brackets () is ignored while upgrading using “Upgrade Rule.”

CSCuq21428

SPA112: Cannot change Web Utility Access and Remote Management Port via resync.

Note 1: Firmware Downgrade Limitation

The devices with the following PID and TAN (or later TAN number) cannot be downgraded to a version older than 1.3.3.

PID

TAN

SPA112-BR

74-11115-01 G0

SPA122-BR

74-11116-01 F0

SPA112

74-9317-02 G0

SPA122

74-9318-02 G0

SPA122-RC

74-9319-02 G0

Note 2: 2K Certificate

Server Certification

If the device is upgraded to 1.3.3 or later (no hardware related), the server could request a server certification signed by the “Cisco 2k Small Business CA” or keep using certificate signed by 1k CA. Be careful, it is optional because the new singed 2k server certificate is not compatible with old firmware (before 1.3.3). While the server certificates signed by 1k CA are working for all firmware, before and after 1.3.3.

Client Certification

SPA112&122&232D with SN CCQ18230001 and after have a built-in 2k Client Certificate. Then server must update the new Combined CA if the client certification is required. The new Combined CA is compatible with the old 1k & 2k certificate, that means it works for all the devices.

Upgrade the Firmware

Follow these instructions to upgrade the phone adapter.

Step 2 Launch a web browser, and enter the LAN IP addresses of the phone adapter.

Step 3 Log in to the Configuration Utility.

in the navigation tree.

and select the location of the upgrade file that you downloaded.

button to upgrade the firmware.

Note Upgrading the firmware may take several minutes. Until the process is complete, DO NOT turn off the power, press the hardware reset button, or click the Back button in your current browser.

Behavior During Times of Network Congestion

Anything that degrades network performance can affect voice and video quality, and in some cases, can cause a call to drop. Sources of network degradation can include, but are not limited to, the following activities:

- Administrative tasks, such as an internal port scan or security scan

- Attacks that occur on your network, such as a Denial of Service attack

To reduce or eliminate any adverse effects to the devices, schedule administrative network tasks during a time when the devices are not being used or exclude the devices from testing.

Related Information

Support

Cisco Small Business Support Community

Online Technical Support and Documentation (Login Required)

Cisco Small Business Support and Resources

Downloads and Documentation

Firmware

Cisco Small Business Voice Gateways Documentation

Open Source Documentation

Cisco Small Business

Cisco Partner Central for Small Business (Partner Login Required)

Cisco Small Business Home

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

© 2014 Cisco Systems, Inc. All rights reserved.