Cisco UCS Director Release Notes for Cisco ACI Multi-Site Connector Pack, Release 6.6.x.x

Chapter 1. Release Notes for Cisco ACI Multi-Site connector pack

Cisco UCS Director

Connector Pack

Cisco Application Centric Infrastructure Multi-Site Controller Connector Pack

New and Changed Features

Open and Resolved Bugs

Obtaining Documentation and Submitting a Service Request

Cisco UCS Director

Cisco UCS Director delivers unified, highly secure management for supported compute, network, storage, and virtualization platforms and for the industry's leading converged infrastructure solutions, which are based on the Cisco Unified Computing System (Cisco UCS) and Cisco Nexus platforms. Cisco UCS Director extends the unification of computing and network layers through Cisco UCS to provide data center administrators with comprehensive visibility and management capabilities for compute, network, storage, and virtualization. For more information, see Cisco UCS Director on Cisco.com.

Revision History

Revision History

Release

Date

Description

6.6.0.1

June 29, 2018

Created for Release 6.6.0.1.

6.6.0.2

August 22, 2018

Suport for Layer 4 to Layer 7 service for Multi-Site.

Support for Policy-Based Redirect (PBR).

Connector Pack

Connector packs help you perform connector level upgrade in Cisco UCS Director without impacting other connectors. After claiming Cisco UCS Director in Cisco Intersight, as a system administrator, you can view information on new versions of connector packs that are available for upgrade. The top header pane of the user interface displays a Download icon indicating that new connector pack versions are available. You can select and upgrade the connector packs in Cisco UCS Director.

Cisco Application Centric Infrastructure Multi-Site Controller Connector Pack

Cisco Application Centric Infrastructure (ACI) Multi-Site Controller connector pack provides the support for new versions of Cisco ACI Multi-Site Controller. Using the connector pack, you can upgrade to the latest version of Cisco ACI Multi-Site Controller. During the upgrade process, Cisco UCS Director gets restarted automatically.

Upgrading Connector Packs

Viewing Connector Pack Upgrade Information

Upgrading Connector Packs

You have system administrator privileges.

Cisco UCS Director has been claimed in Cisco Intersight. For information on claiming a device, see the integrated guided walkthrough titled Learn How to Claim a Device available within the Online Help menu in the Cisco Intersight user interface.

Cisco UCS Director is successfully connected to Cisco Intersight.

Take a snapshot of Cisco UCS Director before you initiate the upgrade.

Procedure

Step 1

On the header, click Available Connector Packs for Upgrade.

The Available Connector Packs for Upgrade screen appears that displays a list of available connector packs for upgrade along with the version information. Clicking Yes in the pop-up message that appeared immediately after you logged in to the user interface will display this screen.

Note

The Available Connector Packs for Upgrade icon is visible on the header only when new versions of the current running connector packs are available for upgrade.

Step 2

Check the check box of a connector pack from the list.

You can check the check boxes of multiple connector packs.

Step 3

Click Upgrade.

Step 4

In the Confirm Upgrade dialog box, click Yes.

After you confirm that the connector version must be upgraded, the validation process is initiated. If the validation process completes successfully, the upgrade process is initiated and the Connector Pack Upgrade Status screen displays the upgrade status. After the upgrade process is successful, the Logout option is enabled. Proceed to step 5.

Following are some of the possible outcomes of the validation and upgrade process:

If the validation process fails due to issues in the connector pack, the Connector Pack Validation screen is displayed with error details and corrective measures.

Review the information and click Close.

If the connector pack upgrade process fails, click Logout.

Note

If any of the connector pack upgrade fails, the connector pack is rolled back to the earlier version.

The validation process fails if other users have logged in to the system or if workflows are in progress. An upgrade failure error message with appropriate corrective action is displayed.

Review the corrective action, and click Force Upgrade to proceed with the connector pack upgrade.

The Connector Pack Upgrade Status screen is displayed with current status for the connector pack upgrade request. The other users are automatically logged out of the system with a system broadcast message about the upgrade and are redirected to the login page.

Note

When a connector pack upgrade is in progress, and if another user with system administrator privileges logs in to the system, the Connector Pack Upgrade Status screen is displayed with the status of the upgrade process. When a connector pack upgrade is in progress, and if an end user logs in to the system, the system startup page is displayed.

Step 5

Click Logout.

You can login to Cisco UCS Director after the upgrade process is complete.

What to do next

You can view the upgrade reports by choosing Administration > System > Connector Pack Upgrades. From this screen, you can double-click on a report, and view additional details on the upgrade process. For more information, see Viewing Connector Pack Upgrade Information.

Viewing Connector Pack Upgrade Information

Procedure

Step 1

Choose Administration > System.

Step 2

On the System page, click Connector Pack Upgrades.

Information such as upgrade request ID, user that initiated the upgrade, upgrade start time and end time, and the upgrade status are displayed.

Step 3

Select a connector pack and choose View Details to view details such as connector pack name, upgraded version, and prior version.

Step 4

Click State History to view the various states of the connector pack upgrade process. For example, upgrade request received, upgrade process initiated or upgrade process completed.

Step 5

Click Stages to view the entire lifecycle of the connector pack upgrade request.

New and Changed Features

This section provides an overview of the significant new and changed features in this release. This section does not provide an exhaustive list of all enhancements included in this release.

New and Changed Features in Release 6.6.0.1

New and Changed Features in Release 6.6.0.2

New and Changed Features in Release 6.6.0.1

The connector pack offers support for:

Cisco ACI Multi-Site Controller, version 1.2 (1g).

Cisco Application Centric Infrastructure Controllers, version 3.2(1m)

New and Changed Features in Release 6.6.0.2

The connector pack offers:

Support for Layer 4 to Layer 7 services:

Capability to add a service graph with one or more nodes and to add the service graph to contract.

Support for Policy-Based Redirect (PBR) in MSC.

Capability to add or update external EPG of MSC in multiple sites.

Open and Resolved Bugs

The open and resolved bugs for this release are accessible through the Cisco Bug Search Tool. This web-based tool provides you with access to the Cisco bug tracking system, which maintains information about bugs and vulnerabilities in this product and other Cisco hardware and software products.

Note

You must have a Cisco.com account to log in and access the Cisco Bug Search Tool. If you do not have one, you can register for an account.

For more information about the Cisco Bug Search Tool, see the Bug Search Tool Help & FAQ.

Open Bugs in Release 6.6.0.1

Open Bugs in Release 6.6.0.2

Resolved Bugs in Release 6.6.0.1

Resolved Bugs in Release 6.6.0.2

Open Bugs in Release 6.6.0.1

There are no open bugs in this release, at the moment.

Open Bugs in Release 6.6.0.2

There are no open bugs in this release, at the moment.

Resolved Bugs in Release 6.6.0.1

There are no resolved bugs in this release, at the moment.

Resolved Bugs in Release 6.6.0.2

There are no resolved bugs in this release, at the moment.

Obtaining Documentation and Submitting a Service Request

For information on obtaining documentation, using the Cisco Bug Search Tool (BST), submitting a service request, and gathering additional information, see What's New in Cisco Product Documentation.

To receive new and revised Cisco technical content directly to your desktop, you can subscribe to the . RSS feeds are a free service.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: http://www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1721R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.