Chapter 1. New and Changed Information for This Release

New and Changed Information for this Release

Chapter 2. Overview

Cisco UCS Director

Features and Benefits

Physical and Virtual Management Features

About the Cisco UCS Director Red Hat Enterprise KVM Connector

Prerequisites

System Requirements

About Workflows

About the Workflow Tasks

Workflow Designer

Provisioning Support for Microsoft Windows

Chapter 3. Adding the KVM Connector

Creating a RHEV KVM Cloud

Initiating Inventory Collection for a VM

Computing Policies

Creating a RHEV KVM Computing Policy

Creating a RHEV KVM Storage Policy

Creating a RHEV KVM Networking Policy

Virtual Data Centers

Creating a RHEV KVM Virtual Pod

Creating a KVM Deployment Policy

About Managing Catalogs

Publishing a Catalog

Service Requests

Creating a Service Request for a Standard Catalog

Chapter 4. Managing the KVM Connector

Viewing Summary Information

Using VM and Host Level Monitoring

Viewing Polling Information

Viewing vDCs

Viewing Data Centers

Viewing Clusters

Viewing Hosts

Viewing VMs

Viewing RHEV KVM Events

Viewing VM Action Requests

Viewing VM Pools

Viewing Events

Viewing Roles

Viewing Images

Viewing Tags

Viewing Users

Viewing Deleted VMs

Reports

Accessing Reports

Accessing Trend Reports (Summary Level)

Accessing Trend Reports (VM Level)

Managing VM Power Settings

Preface

Audience

Conventions

Related Documentation

Documentation Feedback

Obtaining Documentation and Submitting a Service Request

Copyright Page

Chapter 1. New and Changed Information for This Release

- New and Changed Information for this Release

New and Changed Information for this Release

No significant changes were made to this guide for the current release.

Chapter 2. Overview

This chapter contains the following sections:

- Cisco UCS Director

- About the Cisco UCS Director Red Hat Enterprise KVM Connector

- Prerequisites

- System Requirements

- About Workflows

- Workflow Designer

- Provisioning Support for Microsoft Windows

Cisco UCS Director

Cisco UCS Director is a complete, highly secure, end-to-end management, orchestration, and automation solution for a wide array of Cisco and non-Cisco data infrastructure components, and for the industry's leading converged infrastructure solutions based on the Cisco UCS and Cisco Nexus platforms. For a complete list of supported infrastructure components and solutions, see the Cisco UCS Director Compatibility Matrix.

Cisco UCS Director is a 64-bit appliance that uses the following standard templates:

- Open Virtualization Format (OVF) for VMware vSphere

- Virtual Hard Disk (VHD) for Microsoft Hyper-V

Management through Cisco UCS Director

Cisco UCS Director extends the unification of computing and networking layers through Cisco UCS to provide you with comprehensive visibility and management of your data center infrastructure components. You can use Cisco UCS Director to configure, administer, and monitor supported Cisco and non-Cisco components. The tasks you can perform include the following:

- Create, clone, and deploy service profiles and templates for all Cisco UCS servers and compute applications.

- Monitor organizational usage, trends, and capacity across a converged infrastructure on a continuous basis. For example, you can view heat maps that show virtual machine (VM) utilization across all your data centers.

- Deploy and add capacity to converged infrastructures in a consistent, repeatable manner.

- Manage, monitor, and report on data center components, such as Cisco UCS domains or Cisco Nexus network devices.

- Extend virtual service catalogs to include services for your physical infrastructure.

- Manage secure multi-tenant environments to accommodate virtualized workloads that run with non-virtualized workloads.

Automation and Orchestration with Cisco UCS Director

Cisco UCS Director enables you to build workflows that provide automation services, and to publish the workflows and extend their services to your users on demand. You can collaborate with other experts in your company to quickly and easily create policies. You can build Cisco UCS Director workflows to automate simple or complex provisioning and configuration processes.

Once built and validated, these workflows perform the same way every time, no matter who runs the workflows. An experienced data center administrator can run them, or you can implement role-based access control to enable your users and customers to run the workflows on a self-service basis, as needed.

With Cisco UCS Director, you can automate a wide array of tasks and use cases across a wide variety of supported Cisco and non-Cisco hardware and software data center components. A few examples of the use cases that you can automate include, but are not limited to:

- VM provisioning and lifecycle management

- Network resource configuration and lifecycle management

- Storage resource configuration and lifecycle management

- Tenant onboarding and infrastructure configuration

- Application infrastructure provisioning

- Self-service catalogs and VM provisioning

- Bare metal server provisioning, including installation of an operating system

- Features and Benefits

- Physical and Virtual Management Features

Features and Benefits

The features and benefits of Cisco UCS Director are as follows:

Feature

Benefit

Central management

- Provides a single interface for administrators to provision, monitor, and manage the system across physical, virtual, and bare metal environments

- Provides unified dashboards, reports, and heat maps, which reduce troubleshooting and performance bottlenecks

Self-service catalog

- Allows end users to order and deploy new infrastructure instances conforming to IT-prescribed policies and governance

Adaptive provisioning

- Provides a real-time available capability, internal policies, and application workload requirements to optimize the availability of your resources

Dynamic capacity management

- Provides continuous monitoring of infrastructure resources to improve capacity planning, utilization, and management

- Identifies underutilized and overutilized resources

Multiple hypervisor support

- Supports VMware ESX, ESXi, Microsoft Hyper-V, and Red Hat hypervisors

Computing management

- Provisions, monitors, and manages physical, virtual, and bare metal servers, as well as blades

- Allows end users to implement virtual machine life-cycle management and business continuance through snapshots

- Allows administrators to access server utilization trend analysis

Network management

- Provides policy-based provisioning of physical and virtual switches and dynamic network topologies

- Allows administrators to configure VLANs, virtual network interface cards (vNICs), port groups and port profiles, IP and Dynamic Host Control Protocol (DHCP) allocation, and access control lists (ACLs) across network devices

Storage management

- Provides policy-based provisioning and management of filers, virtual filers (vFilers), logical unit numbers (LUNs), and volumes

- Provides unified dashboards that allow administrators comprehensive visibility into organizational usage, trends, and capacity analysis details.

Physical and Virtual Management Features

Physical Server Management

- Discover and collect configurations and changes

- Monitor and manage physical servers

- Perform policy-based server provisioning

- Manage blade power

- Manage server life cycle

- Perform server use trending and capacity analysis

- Perform bare metal provisioning using preboot execution environment (PXE) boot management

Virtual Computing Management

- Discover, collect, and monitor virtual computing environments

- Perform policy-based provisioning and dynamic resource allocation

- Manage the host server load and power

- Manage VM life cycle and snapshots

- Perform analysis to assess VM capacity, sprawl, and host utilization

Physical Storage Management

- Discover, collect, and monitor storage filers

- Perform policy-based provisioning of vFilers

- Provision and map volumes

- Create and map Logical Unit Number (LUN) and iGroup instances

- Perform SAN zone management

- Monitor and manage network-attached storage (NAS) and SAN-based storage

- Implement storage best practices and recommendation

Virtual Storage Management

- Discover, collect, and monitor storage of vFilers and storage pools

- Perform policy-based storage provisioning for thick and thin clients

- Create new datastores and map them to virtual device contexts (VDCs)

- Add and resize disks to VMs

- Monitor and manage organizational storage use

- Perform virtual storage trend and capacity analysis

Physical Network Management

- Discover, collect, and monitor physical network elements

- Provision VLANs across multiple switches

- Configure Access Control Lists (ACLs) on network devices

- Configure storage network s

- Implement dynamic network topologies

Virtual Network Management

- Add networks to VMs

- Perform policy-based provisioning with IP and DHCP allocation

- Configure and connect Virtual Network Interface Cards ( vNICs) to VLANs and private VLANs

- Create port groups and port profiles for VMs

- Monitor organizational use of virtual networks

About the Cisco UCS Director Red Hat Enterprise KVM Connector

The Cisco UCS Director Red Hat Enterprise (RHEV) VM Kernel-based Virtual Machine (KVM) Connector is a full virtualization solution for Linux on AMD64 and Intel 64 hardware. KVM is a Linux kernel module created for the standard Red Hat Enterprise Linux 6 kernel.

The Red Hat Enterprise Virtualization Manager can be managed by Cisco UCS Director through the Representational State Transfer (REST) API.

The Cisco UCS Director KVM Connector provides for basic inventory, VM/host level monitoring, VM basic power actions, and snapshot actions. The following provisioning services are also supported:

- Compute Policy—Memory and CPU resize options.

- Storage Policy—Local, NFS, and iSCSI storage types are supported.

- Network Policy—Multiple NICs are supported.

Prerequisites

Note

Cisco UCS Director recognizes Red Hat Enterprise Virtual Machine (VM), Red Hat Enterprise Virtual Hypervisor Hosts, and Red Hat Enterprise Linux Hosts for additional functionality.

- Installation of Red Hat Enterprise Virtualization Manager version 3.2 and 3.3

- Installation of Red Hat Enterprise Virtual Hypervisor Hosts/RHEL Hosts (version 6.5)

- Configured system administrator privileges

- Cisco UCS Director release 5.0 or later release

System Requirements

The minimum system requirements depend upon how many VMs you plan to manage.

Note

For optimal performance, reserve additional CPU and memory resources.

For information about minimum system requirements for a multi-node setup, see the Cisco UCS Director Multi-Node Installation and Configuration Guide.

Up to 2000 VMs

If you plan to manage up to 2000 VMs, the Cisco UCS Director environment must meet at least the minimum system requirements in the following table.

Minimum System Requirements for up to 2000 VMs

Element

Minimum Supported Requirement

vCPU

4

Memory

8 GB

Hard Disk

100 GB

About Workflows

Cisco UCS Director Orchestrator allows you to organize workflows so that you can automate simple or complex actions on your infrastructure (either physical or virtual). By using Orchestrator you can organize tasks into distinct workflows to accomplish specific IT services, such as adding VMs. You can then add multiple tasks to a workflow is accomplished using the workflow UI designer. Triggers help initiate actions inside a workflow. You can execute the workflow directory or have a trigger begin the process. A typical workflow consists of the following elements:

- Workflow Designer (GUI interface)

- Predefined Tasks

The simplest workflow consists of two connected tasks. A task represents a particular action or operation. The workflow determines the order in which your tasks are executed by Orchestrator. When constructing workflows, by dragging-and-dropping tasks, it is possible to route the output of one workflow into the input of another workflow. This connecting of multiple tasks is how you create more complex workflows.

- About the Workflow Tasks

About the Workflow Tasks

Cisco UCS Director includes several workflows tasks to aid in the construction of RHEV KVM-specific workflows using Workflow Designer. The following available workflow tasks are:

- RHEV KVEM VM Tasks

- RHEV KVM Resource Allocation

- RHEV KVM VM Provision

Workflow Designer

You use the workflow designer to implement actions or to select tasks from a list and then drag and drop them onto your Workflow Designer pane.

Provisioning Support for Microsoft Windows

Cisco UCS Director in conjunction with the Cisco UCS Director Baremetal Agent supports all types of Linux and Microsoft Windows operating systems in baremetal provisioning workflows. Certain operating systems are packaged out-of-the-box with the Cisco UCS Director Baremetal Agent. However, additional operating systems can be added as necessary. Any operating system that supports PXE boot and/or install is supported and can be leveraged in baremetal provisioning workflows.

RHEV KVM supports Microsoft Windows 2008/2012 provisioning.

Chapter 3. Adding the KVM Connector

This chapter contains the following sections:

- Creating a RHEV KVM Cloud

- Initiating Inventory Collection for a VM

- Computing Policies

- Creating a RHEV KVM Storage Policy

- Creating a RHEV KVM Networking Policy

- Virtual Data Centers

- About Managing Catalogs

- Publishing a Catalog

- Service Requests

Creating a RHEV KVM Cloud

Before You Begin

Installation of Red Hat Enterprise Virtual Machine (VM) and Hypervisor.

Procedure

Step 1

Choose Administration > Virtual Accounts.

Step 2

On the Virtual Accounts page, click Virtual Accounts.

Step 3

Click Add (+).

Step 4

On the Add Cloud screen, choose Red Hat KVM from the Cloud Type drop-down list.
Note:
The following fields are displayed when RHEV KVM is chosen. Other cloud types display fields that are specific to that cloud type.

Step 5

On the Add Account screen, complete the following fields:

Name

Description

Pod drop-down list

Choose a Pod to associate the account to from the drop-down list.

Account Name field

A unique account name.

Description field

A description of the new account.

Server Address field

The RHEV KVM server address.

Use Credentials Policy check box

Check this box if you want to use a credential policy for this account rather than enter the username and password information manually.

Credential Policy drop-down list

This field appears only when the Use Credential Policy box is checked. Choose a policy from the Credential Policy drop-down list.

Server User ID field

This field appears only when the Use Credential Policy box is unchecked. The RHEV KVM server username.

Note:
You must enter only the username in this field. Do not include the domain name with the user name. Enter the domain name in the Domain field.

Server Password field

This field appears only when the Use Credential Policy box is unchecked. The RHEV KVM server password.

Domain field

The domain associated to the new account.

Server Access Port field

The server access port used by the account (default value is 443).

Service Provider field

The service provider associated with the account

Contact field

The contact email address for the cloud.

Location field

The location of the account.

Step 6

Click Submit.

Initiating Inventory Collection for a VM

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, choose the cloud.

Step 3

On the Compute page, click VMs.

Step 4

Click the row with the VM for which you want to request an inventory collection.

Step 5

From the More Actions drop-down list, choose Inventory Collection Request for VM.

Step 6

Click Submit.

Computing Policies

Computing policies determine the compute resources that can be used during provisioning to satisfy group or workload requirements.

As an administrator, you can define advanced policies by mixing and matching various conditions in the computing policy.

Note

We recommend that you thoroughly understand all the fields in the computing policy. Some combinations of conditions can result in no host machines being available during self-service provisioning.

- Creating a RHEV KVM Computing Policy

Creating a RHEV KVM Computing Policy

Procedure

Step 1

Choose Policies > Virtual/Hypervisor Policies > Computing.

Step 2

On the Computing page, click RHEV KVM Computing Policy.

Step 3

Click RHEV KVM Computing Policy.

Step 4

Click Add (+).

Step 5

On the Add Policy screen, complete the following fields:

Name

Description

Policy Name field

The name of the policy.

Note:   This name is used during catalog definition

Policy Description field

The description of the policy.

Cloud Name drop-down list

Choose the cloud where resource allocation occurs.

Datacenter drop-down list

Choose a datacenter (Pod).

Cluster Scope drop-down list

Choose a type of cluster scope.

Note:   You can narrow the scope of deployment by specifying whether to use all, include selected cluster, or exclude selected clusters. Depending on the choices, a Selected Clusters field appears where the required clusters can be chosen.

Filter Conditions field

Check the check boxes for one or more conditions and set the condition that should match. Any hosts that do not meet these criteria are excluded from consideration. If more than one condition is chosen, all of the chosen conditions must match.

Deployment Options

Override Template check box

Check the check box to override the template properties. On selection, you will get additional fields to enter custom settings for CPU and memory.

Resizing Options

Allow Resizing of VM check box

Check the check box to allow VM resizing before provisioning or to resize an existing VM.

Permitted Values of No. of CPU Sockets field

The range of CPUs to use while provisioning a VM or resizing an existing VM. A range of more than 8 is visible during VM provisioning or resizing only if the chosen cloud is 5 or above and has VM version 8. Only the values specified in the box are visible.

Note:   This option appears if you choose Allow Resizing of VM.

Permitted Values of No. of Cores per Sockets field

The range of cores poermitted per socket.

Note:   This option appears if you choose Allow Resizing of VM.

Permitted Values for Memory in MB field

The range of memory to use while provisioning a VM or resizing an existing VM. For example: 512, 768, 1024, 1536, 2048, 3072, 4096, and so on. Only the values specified in the box are visible.

Note:   This option appears if you choose Allow Resizing of VM.

Step 6

Click Add.

Creating a RHEV KVM Storage Policy

Procedure

Step 1

Choose Policies > Virtual/Hypervisor Policies > Storage.

Step 2

On the Storage page, click RHEV KVM Storage Policy.

Step 3

Click Add (+).

Step 4

On the Add Policy screen, complete the following fields:

Name

Description

Policy Name field

The name of the storage policy

Policy Description field

The description of the storage policy.

Cloud Name drop-down list

Choose the cloud in which resource allocation occurs.

Datacenter drop-down list

Choose a data center.

Scope

Data Stores Scope drop-down list

Choose All, Include Selected Datastores, or Exclude Selected Datastores as the scope of deployment.

Selected Data Stores field

This field appears when you chose Include Selected Datastores or Exclude Selected Datastores from the Data Stores Scope drop-down list. Exapnd Selected Data Stores and select the appropriate datastores.

Storage Options

Filter Conditions drop-down list

Check the check boxes for one or more conditions and set the condition that should match the data store storage.

Step 5

Click Submit.

Creating a RHEV KVM Networking Policy

Procedure

Step 1

Choose Policies > Virtual/Hypervisor Policies > Network.

Step 2

On the Network page, click RHEV KVM Networking Policy.

Step 3

Click Add (+).

Step 4

On the Add Policy screen, complete the following fields:

Name

Description

Policy Name field

The name of the network policy.

Policy Description field

The description of the network policy.

Cloud Name drop-down list

Choose the cloud account to which the policy applies.

Datacenter drop-down list

Choose a data center.

Network Name field

Expand Network Name, check the network that you want to use, and then click Validate.

Link State drop-down list

Choose On or OFF as the NIC link state.

Adapter Type drop-down list

Choose the adapter type. Check this option if you want to have the same Adapter Type that is available in the template.

Note:
This option is not visible if the Copy Adapter from Template option is chosen.

Step 5

Click Next.

Step 6

Expand Additional Networks and click Add (+).

Step 7

On the Add Entry to Additional Networks screen, complete the following fields:

Name

Description

NIC Alias field

The name of the network policy.

Network Name field

Expand Network Name, check the network that you want to use, and then click Validate.

Link State drop-down list

Choose On or OFF as the NIC link state.

Adapter Type drop-down list

Choose the adapter type. Check this option if you want to have the same Adapter Type that is available in the template.

Note:
This option is not visible if the Copy Adapter from Template option is chosen.

Step 8

Click Submit to add the network.

Step 9

Click Submit to add the policy.

Virtual Data Centers

A Virtual Data Center (VDC) is a logical grouping that combines virtual resources, operational details, rules, and policies to manage specific group requirements.

A group or organization can manage multiple VDCs, images, templates, and policies. Organizations can allocate quotas and assign resource limits for individual groups at the VDC level.

You can also define approvers specific to a VDC. The approvers assigned to a particular VDC must approve all service requests from users for VM provisioning.

Note

There is a default VDC in Cisco UCS Director, and all discovered VMs are part of this default VDC. Discovered VMs are VMs that are created outside of Cisco UCS Director or were already created on VMware vCenter before Cisco UCS Director was installed. Cisco UCS Director automatically discovers such VMs and adds them to the default VDC.

A VM that is provisioned using a service request can be associated with a specific VDC. When you create a service request, you can choose the VDC on which this VM is provisioned. You can view a list of the VDCs that are available for a particular group and choose the required VDC when provisioning VMs.

- Creating a RHEV KVM Virtual Pod

- Creating a KVM Deployment Policy

Creating a RHEV KVM Virtual Pod

In this task, you specify deployment, storage, network, and computing policies. Refer to the Cisco UCS Director System Administration Guide for additional information.

Procedure

Step 1

Choose Policies > Virtual/Hypervisor Policies > Virtual Data Centers.

Step 2

On the Virtual Data Centers page, click vDC.

Step 3

Click Add.

Step 4

On the Add vDC screen, choose Red Hat KVM from the Account Type drop-down list.

Step 5

Click Submit.

Step 6

On the Add vDC screen, complete the following fields:

Name

Description

vDC Name field

The name of the VDC.

After entering the name, it cannot be edited.

vDC Locked check box

Check the check box to deny the use of the VDC for any further deployments. Actions on existing VMs, within this VDC, are disabled. Uncheck the check box to allow the use of the VDC for further deployments.

vDC Description field

The VDC-specific description.

Group field

Expand Group and check the group for which the VDC is being set up. Click the + icon to add a group.

Cloud Name drop-down list

Choose the cloud on which the VDC is being set up.

Approvers and Contacts

First Level Approver(s) field

Expand First Level Approvers and check each user who must approve the service request at first level.

Second Level Approver(s) field

Expand Second Level Approver(s) and check each user who must approve the service request at second level.

Approval required from all the users check box

If checked, requires approval from all users.

Number of Approval Request Reminders drop-down list

Choose the number of reminders that has to be sent at the specified interval. Set the reminder to zero to send the reminder email at the specified interval till the request is approved or rejected.

Reminder Intervals (Hours) drop-down list

The time interval to send the next request approval reminder email.

Provider Support Email Address field

The contact or user’s email address. The person who is notified about VM provisioning using this VDC.

Copy Notifications to Email Address field

The second contact’s email for copying notifications about this VDC.

Policies

Computing Policy drop-down list

Choose the computing policy applicable to the VDC.

Network Policy drop-down list

Choose the network policy applicable to the VDC.

Storage Policy drop-down list

Choose the storage policy applicable to the VDC.

System Policy drop-down list

Choose the system policy applicable to the VDC.

VM Management Policy drop-down list

Choose the VM management policy applicable to the VDC

End User Self-Service Policies drop-down list

Choose an end user policy.

Creating a KVM Deployment Policy

Procedure

Step 1

Choose Policies > Virtual/Hypervisor Policies > Service Delivery.

Step 2

On the Service Delivery page, click RHEV KVM Deployment Policy.

Step 3

Click Add.

Step 4

On the Add Policy screen, complete the following fields:

Name

Description

Policy Name field

The name for the KVM deployment policy.

Policy Description field

The description of the KVM deployment policy

VM Name Template field

The VM name template to use. Cisco UCS Director allows automatically created using a set of variable names. Each variable must be enclosed in ${VARIABLE_NAME}. For example: vm-${GROUP_NAME}-SR${SR_ID}.

Cloud Name drop-down list

Choose a cloud from the drop-down list.

Recycle VM Name check box

By default, decommissioned VM names that were previously provisioned are used when creating a new VM. Uncheck this check box if you do not want to recycle previously used VM names.

Step 5

Click Submit.

About Managing Catalogs

You can self-provision virtual machines (VMs) and bare metal (BM) servers using predefined catalog items. Only a system administrator can create a catalog. A catalog defines parameters, such as the cloud name and the group name to which the VM is bound.

The following folders are available by default. You cannot edit or delete them.

- Standard

- Advanced

- Service Container

- Bare Metal

To aid in managing catalogs, Cisco UCS Director allows you to group similar catalogs within a folder. While creating a catalog, you can choose to add it in a previously created folder, or create a new folder. A folder is visible in the system only when it contains a catalog.

The Manage Folder option on the Catalog page allows you to perform the following tasks:

- Edit a folder—Modify the name of a user-created folder or the folder icon for all folders. You cannot modify the name of a default folder.

- Delete a folder—Delete a folder from Cisco UCS Director. If this folder contains catalogs, then these catalogs are automatically moved into the folders that are available by default, based on the catalog type.

Default folders cannot be deleted.

- Re-order the list of folder—Change the order in which the folders are listed in the Catalog page. By default, folders are listed alphabetically.

Important:
If you have upgraded Cisco UCS Director to the latest version, then all catalogs created in prior versions are grouped into folders available by default, based on their catalog types.

By default, catalogs are displayed in a tile view format. You can choose to have the catalogs displayed in a table view format as well. Use the options on the far right of the screen to switch between the table view and the tile view format. In the table view format, you can use the options to expand or collapse all folders.

Publishing a Catalog

Procedure

Step 1

Choose Policies > Catalogs.

Step 2

On the Catalogs page, click Add.

Step 3

On the Add Catalog screen, choose the Catalog Type that you want to add.
It can be one of the following:

- Standard—Used to create catalogs for VM provisioning, using images from a list of clouds.

- Advanced—Used to publish orchestration workflows, such as catalog items.

- Service Container—Used to publish application containers as catalog items.

- Bare Metal—Used to create catalogs for bare metal server provisioning.

Step 4

Click Submit.

Step 5

On the Add Catalog: Basic Information screen, complete the required fields, including the following:

Name

Description

Catalog Name field

Enter a name for the catalog.

Note:
After created, a catalog name cannot be modified.

Catalog Description field

Enter a description of the catalog.

Catalog Type drop-down list

Displays the type of catalog you previously chose. To change the catalog type, you need to cancel and restart this procedure.

Catalog Icon drop-down list

Choose from a list of icons to associate this catalog with an image. This icon is seen when you are creating a service request using this catalog.

Applied to all groups check box

Check the box to enable all groups to use this catalog. Leave it unchecked to deny its use to other groups.

Support Contact Email Address field

Enter the email address of the support contact who is notified when a service request is created using this catalog item.

Selected Groups list

Expand the list and click the checkboxes to select specific user groups. The checked groups use this catalog to provision new VMs.

Click Validate.

Publish to end users check box

By default, this box is checked. Uncheck this box if you do not want this catalog to be visible to users. If you do not uncheck this box, then this catalog is visible to the users of the system.

Cloud Name drop-down list

Choose the cloud with the image for VM provisioning.

Provision new VM for ISO mounting check box

Check this box to clone a new VM from a selected image. If you do not check this check box, a blank VM is created.

Image list

Choose the type of image (any existing templates such as Windows, Linux, and other files that make up the image) to use when VMs are provisioned using this catalog and click Validate.

If you are a group administrator, or a user in a group with permissions to create catalogs, this field displays images that are assigned to the group to which you belong.

If you are an MSP administrator, then this field displays images that are assigned to your MSP organization, and to the groups within the MSP organization.

Provision new VM using Content Library VM Template check box

Check this box to ensure that the new VM is provisioned using the Content Library VM Template.

If you choose this option, the Image list is hidden.

Content Library VM Template list

Choose the content library VM template.

Windows License Pool field

Enter the Windows License.

Note:
This field appears only when a Windows image is chosen. This option is not supported in the RHEV KVM Connector.

Use ReadyClone check box

Check the box to ensure that VMs are deployed using ReadyClones.

When this box is checked, the Use Linked Clone and Provision all disks in single datastore check boxes are not available for editing.

Note:
This checkbox is not visible if:

1. The selected image is not on the HX datastore.

2. The VM has multiple disks.

Use Linked Clone check box

Check the box if you want to use a linked clone.

Linked Clone or Full Clone depends on the Linked Clone selection in the Storage Policy.

Note:
This field appears only when a Snapshot image is chosen.

Provision all disks in single datastore check box

Check the box to provision all disks in a single datastore. You can also choose to use the datastores configured for each disk in the storage policy.

Note:
This field appears only if the chosen template has multiple disks. This option is not supported in the RHEV KVM Connector.

Service Container Template Name drop-down list

Choose the template from the list.

Note:
This field appears only when the chosen Catalog Type is Service Container.

Select Folder drop-down list

Choose the folder within which this catalog must be created.

Note:
The drop-down list includes names of folders that are available by default. You can either choose a folder that is available, or click Create New Folder.

On the Add New Folder screen, enter a Folder Name, choose a Folder Icon, and click Add.

Bare Metal Server Provisioning Policy drop-down list

Note:
This field appears only when the chosen Catalog Type is Bare Metal.

Configure Service Request Support Email check box

Check this box to enable the user to set the support email for sending service request status.

Step 6

Click Next.

Step 7

On the Add Catalog: Application Details screen, complete the required fields, including the following:

Name

Description

Category list

Expand the list to choose a VDC category and click Select.

Override check box

Check the box to enable the user to override the selected category while provisioning a VM using a service request.

Support Contact Email Address field

Enter the email address of the contact who is notified when a service request is created using this catalog item.

Specify OS drop-down list

Choose the type of OS installed on the VM when it is provisioned.

Note:
This option is not supported in the RHEV KVM Connector.

Specify Other OS field

Enter an OS that is not available in the Specify OS drop-down list.

Note:
This option is not supported in the RHEV KVM Connector.

Specify Applications check boxes

Check the appropriate boxes to specify applications that are installed on the VM during provisioning.

Note:
This option is not supported in the RHEV KVM Connector.

Specify Other Applications field

Enter other applications that are not available from the Specify Applications check boxes.

Note:
This option is not supported in the RHEV KVM Connector.

Application Code field

Enter an application code that is used in the VM name.

The application code can be between 1 to 4 characters (for example: W2K3, DB, WS). The application code can be used in a system policy for the VM name by using the variable ${APPCODE}.

For example, if the VM Name Template is vm-${GROUP_NAME}-${APPCODE}, the VM provisioned with the system policy has the name vm-groupname-W2K3.

Note:
This option is not supported in the RHEV KVM Connector.

Step 8

Click Next.

Step 9

On the Add Catalog: User credentials screen, complete the required fields, including the following:
Note:
These options are not supported in the RHEV KVM Connector.

Name

Description

Credential Options drop-down list

Choose to allow or disallow users to retrieve VM access credentials (shared). The following options are available:

- Do not share

- Share after password reset

- Share template credentials

The Do not share option is chosen if the administrator wants to send the credentials privately to another user outside Cisco UCS Director.

User ID field

Enter the user ID.

Note:
This field is available only if a choice is made to share under Credential Options.

Password field

Enter the password.

Note:
This field is available only if a choice is made to share under Credential Options.

Step 10

Click Next.

Step 11

On the Add Catalog: Customization screen, complete the required fields, including the following:

Name

Description

Automatic Guest Customization Enable check box

Check the box to enable automatic guest customization.

If you do not check this check box, then Cisco UCS Director does not configure the DNS, Network, and Guest OS properties.

Post Provisioning Custom Actions Enable check box

Check the box to enable execution of an orchestration workflow after VM provisioning.

Workflow drop-down list

Choose a defined workflow for provisioning.

Note:
This field appears when Post Provisioning Custom Actions Enable is checked.

Virtual Storage Catalog Enable check box

Check the box to choose storage entries from the Virtual Storage catalog.

Virtual Storage Catalog drop-down list

Chose a storage entry from the catalog.

Note:
This field appears when Virtual Storage Catalog Enable is checked.

Cost Computation

Charge Duration drop-down list

Choose Hourly or Monthly.

Active VM Application Cost USD field

Enter the cost for the application that is included in the template.
Note:
This option is not supported in the RHEV KVM Connector.

Inactive VM Application Cost USD field

Enter the cost to this catalog of a VM in inactive state, per hour or month.
Note:
This option is not supported in the RHEV KVM Connector.

VM Life Cycle Configuration

Lease Time check box

Check the box to define a lease time (in days and hours).

Days field

Enter the number of days.

Note:
This field appears when Lease Time is checked.

Hours field

Enter the number of hours.

Note:
This field appears when Lease Time is checked.

Hide end user lease configuration check box

Check the box to prevent service users from configuring a lease time for VMs.

Hide end user VM provision later check box

Check the box to prevent service users from provisioning VMs at a later time.

Step 12

Click Next.

Step 13

On the Add Catalog: VM Access screen, complete the required fields, including the following:

Name

Description

Web Access Configuration Enable check box

Check the box to enable web access to the VM. By default, this check box is unchecked which means that web access to the VM is disabled.

URL field

Enter the URL of the VM.

Note:
This field appears when Web Access Configuration Enable is checked.

Label field

Enter the label that is defined for this URL.

Note:
This field appears when Web Access Configuration Enable is checked.

Remote Desktop Access Configuration Enable check box

Check the box to enable remote desktop access to the VM. By default, this check box is unchecked, which means that remote desktop access to the VM is disabled.

Server field

Enter the IP address of the server for remote access.

Note:
This field appears when Remote Desktop Access Configuration Enable is checked.

Port field

Enter the port number on the server for remote access.

Note:
This field appears when Remote Desktop Access Configuration Enable is checked.

Label field

Enter the label that is defined for this remote access.

Note:
This field appears when Remote Desktop Access Configuration Enable is checked.

VMRC Console Configuration Enable check box

Check the box to enable VMRC console access to the VM. By default, this check box is unchecked, which means that the VMRC console access to the VM is disabled.

Step 14

Click Next.

Step 15

Review the catalog information on the Add Catalog: Summary screen.

Step 16

Click Submit.

Service Requests

You can use the self-service provisioning feature to create a service request to provision virtual machines (VMs), services, or applications. The service request process produces a provisioning workflow for VM creation that includes the following actions:

- Budget validation

- Dynamic resource allocation

- Approvals

- Provisioning

- Lifecycle setup and notification

Note

If you change the number of CPU Cores or memory allocation while in the Deployment Configuration screen, the total cost is automatically updated and displayed.

To provision a VM or execute an orchestration workflow, you must first create a service request. If desired, you can require approval from one or two administrators or designated users before the VM is provisioned or the workflow executed. VMs can be immediately approved or scheduled to be approved within a maximum of 90 days from the original request.

- Creating a Service Request for a Standard Catalog

Creating a Service Request for a Standard Catalog

The administrator publishes catalogs to a group and an end user can choose the required catalog to create a service request. The administrator provides the Self-Service portal with orchestration workflows in the form of catalogs. A catalog, published by the administrator, can be a standard catalog, advanced, or service container.

Important:
You can complete this procedure only if the administrator has enabled the Create Service Request permission for your role. This Create Service Request permission enables or disables the Create Request option in the Service Requests tab. It does not have any impact on the Create Request option from the Catalog menu option.

Procedure

Step 1

Choose Organizations > Service Requests.

Step 2

On the Service Requests page, click Service Requests.

Step 3

Click Create Request.

Step 4

On the Create Request screen, choose Standard as the catalog type.

Step 5

Click Submit.

Step 6

On the Create Service Request screen, complete the following fields:

Name

Description

Catalog Selection

VM Ownership

Choose one of the following radio button:

- Group—Select this radio button to choose the group for which a VM is provisioned. On selecting this radio button, expand Select Group, check the group for which the VM has to be provisioned, and then click Validate.

- User—Select this radio button to choose the users to whom you want a VM is provisioned. On selecting this radio button, expand User, check the user for whom the VM has to be provisioned, and then click Validate.

Catalog Type drop-down list

Displays the catalog type.

Select Catalog drop-down list

Choose the catalog created for the KVM cloud. The chosen catalog is used for VM provisioning

Step 7

Click Next.

Step 8

On the Deployment Configuration screen, complete the following fields:

Name

Description

Select VDC drop-down list

The VDC on which the VM is provisioned.

VDCs are defined by the administrator.

Comment field

Any comments relating to the deployment configuration.

Provision drop-down list

Choose either Now or Later.

When you choose Now, the VM is provisioned immediately or up to 90 days in the future. When you choose Later, a calendar for choosing the date and a drop-down list for choosing the time appear.

Important:
This check box is visible only if the administrator has unchecked the Hide end user VM provision later check box.

Lease Time check box

Check this check box to configure a lease time for the VM.

The lifetime of the VM can be assigned in terms of days and hours (automatically). The VM is terminated after the specified number of days and hours have elapsed.

Important:
This field is editable only if the administrator has not specified a lease time in the catalog used for VM provisioning and has unchecked the Hide end user lease configuration check box.

Days field

The number of days after which the VM is terminated.

Note:
This option appears when the Lease Time check box is checked.

Hours field

Choose the number of hours after which the VM is terminated.

Note:
This option appears when the Lease Time check box is checked.

Charge Duration drop-down list

Choose a charge duration from the drop-down list. It can be Monthly, Daily, or Hourly.

Month field

If you selected Monthly as the charge duration, then specify the number of months the default cost must be calculated for.

Hourly field

If you selected Hourly as the charge duration, then specify the number of hours the default cost must be calculated for.

Daily field

If you selected Daily as the charge duration, then specify the number of days to be included in the cost computation.

Step 9

Click Next.

Step 10

On the KVM Custom Specification screen, complete the following fields.

Name

Description

CPU Cores field

The number of CPUs being utilized for the VM being provisioned. This list is available only if you configured the resizing option in the computing policy.

Memory field

The amount of memory for the VM being provisioned. This list is available only if you have configured the resizing option in the computing policy.

Disks field

The datastore for the VM being provisioned. The list of datastores available for selection depends upon the conditions established in the storage policy. You can enable or disable this option in the storage policy.

Storage Tier field

The storage entry for the VM being provisioned. This list appears only if the Virtual Storage Catalog is enabled for the selected catalog.

Select Datastore drop-down list

Choose a datastore. Click Submit to confirm your selection. For templates with multiple disks, you must repeat the datastore selection process for each disk.

Note:
You can select only one datastore for each disk category (System, Data, Database, Swap, and Log). The list of datastore items depends upon the scope conditions in the storage policy.

Step 11

Click Next.

Step 12

On the Custom Workflow Inputs screen, complete the following fields:
Note:
The custom workflow inputs are applicable, if the catalog selected for VM provisioning has Post Provisioning Custom Actions selected during catalog creation. In this scenario, the post provisioning workflow allows end users to specify custom inputs. The inputs option depends upon the workflow attached to a catalog.

Name

Description

MAC Address field

The MAC address of the server.

IP Address field

The IP address of the server.

Host Name field

The hostname of the server.

Step 13

Click Next.

Step 14

The Summary screen appears. Review the information for accuracy.

Step 15

Click Submit.

What to Do Next

View the service request status.

Chapter 4. Managing the KVM Connector

This chapter contains the following sections:

- Viewing Summary Information

- Using VM and Host Level Monitoring

- Reports

- Managing VM Power Settings

Viewing Summary Information

Note

If the network in the Red Hat KVM account is configured with both, management and VM type, then the Network Usage column in the user interface displays only VM.

Before You Begin

Create a cloud account (KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the summary.

Step 4

Click View Details.

Step 5

Click Summary to examine the information.
The Summary tab provides tabular data and charts that describe the status of the RHEV KVM cloud account and general trends. The following information is displayed:

- Number of Host Nodes (Last Week)

- Memory (Last Week)

- Disk

- VMs Active vs Inactive graphs

- Number of VMs (Last Week)

- Cloud Overview

- Host Nodes

- New VMs

- Deleted VMs

Using VM and Host Level Monitoring

After creating a RHEV KVM cloud (virtual) account and creating a computing policy, you can monitor your VMs and host-related information.

- Viewing Polling Information

- Viewing vDCs

- Viewing Data Centers

- Viewing Clusters

- Viewing Hosts

- Viewing VMs

- Viewing RHEV KVM Events

- Viewing VM Action Requests

- Viewing VM Pools

- Viewing Events

- Viewing Roles

- Viewing Images

- Viewing Tags

- Viewing Users

- Viewing Deleted VMs

Viewing Polling Information

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the polling information.

Step 4

Click View Details.

Step 5

Click Polling to examine the information.
The Polling tab provides tabular data that describe the polling information in use in the cloud account. The following information is displayed:

- Start Time

- Collection Type

- Status

- Message

- End Time

Viewing vDCs

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the VDC details.

Step 4

Click View Details.

Step 5

Click vDCs to examine the information.
The vDCs tab provides tabular data that describe the VDCs in use in the cloud account. The following information is presented:

- Group

- vDC

- Type

- Lock State

- Total VMs

- Active VMs

- Custom Categories

- Status

Viewing Data Centers

Before You Begin

Create a cloud account (KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the data center details.

Step 4

Click View Details.

Step 5

Click Data Centers to examine the information.
The Data Centers tab provides tabular data that describe the current pods in use in the cloud account. The following information is displayed:

- Account Name

- Name

- Description

- Storage Type

- Storage Format

- Status

- Minor Version

- Major Version

- Minor Supported Version

- Major Supported Version

Viewing Clusters

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the cluster details.

Step 4

Click View Details.

Step 5

Click Clusters to examine the information.
The Clusters tab provides tabular data that describe the current clusters in use in the cloud account. The following information is displayed:

- Account Name

- Name

- Description

- On Error

- Scheduling Policy

Viewing Hosts

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the host details.

Step 4

Click View Details.

Step 5

Click Hosts to examine the information.
The Hosts tab provides tabular data that describe the current hosts nodes in use in the cloud account. The following information is presented:

- Name

- Is Storage Manager

- Ksm Status

- OS Type

- Type

- IP Address

- State

Step 6

Click the row with a host and click View Details to view the VMs, service request details, events, deleted VMs, details, NICs, and more reports of the host node.

Viewing VMs

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the VM details.

Step 4

Click View Details.

Step 5

Click VMs to examine the information.
The VMs tab provides insight into the VMs used by the RHEV KVM cloud account. The following information is displayed:

- Cloud

- VM ID

- VM Label

- VM Name

- Host Name

- IP Address

- Image ID

- Power State

- VM Protected

- Group Name

- VDC

- Category

- Provisioned Time

- Scheduled Termination Time

- Last Status Update

Viewing RHEV KVM Events

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the RHEV KVM events details.

Step 4

Click View Details.

Step 5

Click RHEV KVM Events to examine the information.
The RHEV KVM Events tab provides tabular data that describe the current RHEV KVM-specific events in use in the cloud account. The following information is displayed:

- Account Name

- ID

- Description

- Severity

- Code

- Origin

- Time

Viewing VM Action Requests

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the VM action request details.

Step 4

Click View Details.

Step 5

Click VM Action Requests to examine the information.
The VM Action Requests tab provides tabular data that describe the current VM action request in the cloud account. The following information is presented:

- VM ID

- Action ID

- User Name

- Comment

- Schedule Time

- Status

Viewing VM Pools

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the VM pool details.

Step 4

Click View Details.

Step 5

Click VM Pools to examine the information.
The VM Pools tab provides tabular data that describe the VM pools in use in the cloud account. The following information is displayed:

- Account Name

- Name

- Description

- Size

Viewing Events

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the event details.

Step 4

Click View Details.

Step 5

Click Events to examine the information.
The Events tab provides tabular data that describe the current events in the cloud account. The following information is displayed:

- Cloud Name

- Severity

- Event Time

- Event ID

- Event Code

- Description

- Instance Name

- Host Name

- VM Type

- Parent Node

Viewing Roles

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the role details.

Step 4

Click View Details.

Step 5

Click Roles to examine the information.
The Roles tab provides tabular data that describe the current roles in use in the cloud account. The following information is displayed:

- Account Name

- ID

- Name

- Description

- Is Mutable

- Is Administrative

Viewing Images

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the image details.

Step 4

Click View Details.

Step 5

Click Images to examine the information.
The Images tab provides insight into the images used by the RHEV KVM cloud account. The following information is displayed:

- Description

- Image ID

- Image Name

- Guest OS

- Memory (MB)

- Number of CPUs

- Last time the image was updated

- Tag

Click the row with the image and click View Details to view the disks and NICs details of the image.

Viewing Tags

Before You Begin

Create a cloud account (KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the tag details.

Step 4

Click View Details.

Step 5

Click Tags to examine the information.
The Tags tab provides tag data that describe the current roles in use in the cloud account. Tags allow system resources to be arranged into groups or categories on the RHEV KVM connector. The following information is displayed:

- Account Name

- ID

- Name

- Description

Viewing Users

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the user details.

Step 4

Click View Details.

Step 5

Click Users to examine the information.
The Users tab provides information on which users are associated to a particular cloud account. The following information is displayed:

- Account Name

- ID

- Name

- User Name

Viewing Deleted VMs

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the data center details.

Step 4

Click View Details.

Step 5

Click Deleted VMs to examine the information.
The Deleted VMs tab provides information on VMs which have been deleted for a particular cloud account. The following information is displayed:

- Cloud

- VM ID

- VM Label

- Instance Name

- Host Name

- IP Address

- Image ID

- Group Name

- Deleted Time

Reports

Cisco UCS Director can help you monitor virtual infrastructure and system resources. It displays a wide variety of reports that provide insight into how the system is performing

Following are the types of reports:

- Tabular reports for system information, including overview, host nodes, new VMs, and deleted VMs.

- Bar and pie graph comparisons, including VMs active versus inactive, and CPU provisioned versus capacity.

- Trend graphs about system resources, including CPU trends, memory trends, and VM additions and deletions.

- Other reports include Top 5 reports at the group, VDC, host node, and VM levels. The Top 5 reports focus on groups with the highest number of VMs, groups with the greatest CPU usage, VDCs with the highest number of VMs, and host nodes with the greatest CPU usage.

- Map reports, displaying the system resource information in the form of heat maps or color-coded maps.

Additional trend reports are available for certain accounts (for example: KVM accounts). Trend reports display data over a selected time frame.

- Accessing Reports

- Accessing Trend Reports (Summary Level)

- Accessing Trend Reports (VM Level)

Accessing Reports

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, choose the cloud.

Step 3

Click the name of the report that you want to view (Map, Top 5, or More Reports).

Accessing Trend Reports (Summary Level)

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the report.

Step 4

Click View Details.

Step 5

Click Summary to examine the information.
The Summary tab provides access to trend reports (at the summary level). Trend reports display data collected over a selected time period. The drop-down list (at the right-side of menu bar) lets you choose last day, last week, or last month durations for the trending report. The following information is presented (based upon configuration):

- Trend: Number of Host Nodes (Last Week)

- Memory

- Disk

- VMs Active vs Inactive

- Trend: Number of VMs (Last Week)

- Overview

- Host Nodes

- New VMs

- Deleted VMs

Accessing Trend Reports (VM Level)

Before You Begin

Create a cloud account (RHEV KVM).

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, click Clouds.

Step 3

Click the row with the RHEV KVM cloud account for which you want to view the trend report at VM level.

Step 4

Click View Details.

Step 5

Click VMs.

Step 6

Click the row with the VM for which you want to view the trend report.

Step 7

Click View Details.
Trend reports display data collected over a selected time period. The Duration for Trending drop-down list (right-side of menu bar) lets you choose daily, weekly, or monthly durations. The following information is presented (based on configuration):

- Trend: CPU Usage (Percent) (Last Week)

- Trend: Memory Consumption (Bytes) (Last Week)

- CPU Usage

- Memory Usage

- Overview

- Ownership

- Resources

- Host Nodes

- Display

- Hard Disk 1

- Nic 1

- Catalog Details

Managing VM Power Settings

Before You Begin

You must be logged in to the appliance to complete this task.

Procedure

Step 1

Choose Virtual > Compute.

Step 2

On the Compute page, choose the cloud.

Step 3

On the Compute page, click VMs.

Step 4

Click the row with the VM on which you want to perform an action.

Step 5

Choose an action and the VM Task screen appears.

Name

Description

VM Name display-only field

The name of the VM that is the subject of the action.

Power Off display-only field

The task to power off the VM.

Power On display-only field

The task to power on the VM.

Suspend display-only field

The task to put the VM in a suspended state.

Shutdown Guest display-only field

The task to shut down the guest OS on the VM.

Standby display-only field

The task to move the VM into a standby state.
Note:
Not supported in the RHEV KVM Connector.

Reset display-only field

The task to perform a hard reset of the VM.
Note:
Not supported in the RHEV KVM Connector.

Reboot display-only field

The task to perform a soft reboot of the VM.
Note:
Not supported in the RHEV KVM Connector.

Comments field

Enter any comments that help identify the VM.

Schedule Action radio button

The task to power on a VM now or later at a specific date and time.

Step 6

Click Proceed.

Preface

- Audience

- Conventions

- Related Documentation

- Documentation Feedback

- Obtaining Documentation and Submitting a Service Request

Audience

This guide is intended primarily for data center administrators who use Cisco UCS Director and who have responsibilities and expertise in one or more of the following:

- Server administration

- Storage administration

- Network administration

- Network security

- Virtualization and virtual machines

Conventions

Text Type

Indication

GUI elements

GUI elements such as tab titles, area names, and field labels appear in this font.

Main titles such as window, dialog box, and wizard titles appear in this font.

Document titles

Document titles appear in this font.

TUI elements

In a Text-based User Interface, text the system displays appears in this font.

System output

Terminal sessions and information that the system displays appear in this font.

CLI commands

CLI command keywords appear in this font.

Variables in a CLI command appear in this font.

[ ]

Elements in square brackets are optional.

{x | y | z}

Required alternative keywords are grouped in braces and separated by vertical bars.

[x | y | z]

Optional alternative keywords are grouped in brackets and separated by vertical bars.

string

A nonquoted set of characters. Do not use quotation marks around the string or the string will include the quotation marks.

< >

Nonprinting characters such as passwords are in angle brackets.

[ ]

Default responses to system prompts are in square brackets.

!, #

An exclamation point (!) or a pound sign (#) at the beginning of a line of code indicates a comment line.

Note

Means reader take note. Notes contain helpful suggestions or references to material not covered in the document.

Caution

Means reader be careful. In this situation, you might perform an action that could result in equipment damage or loss of data.

Tip

Means the following information will help you solve a problem. The tips information might not be troubleshooting or even an action, but could be useful information, similar to a Timesaver.

Timesaver

Means the described action saves time. You can save time by performing the action described in the paragraph.

Warning

IMPORTANT SAFETY INSTRUCTIONS

This warning symbol means danger. You are in a situation that could cause bodily injury. Before you work on any equipment, be aware of the hazards involved with electrical circuitry and be familiar with standard practices for preventing accidents. Use the statement number provided at the end of each warning to locate its translation in the translated safety warnings that accompanied this device.

SAVE THESE INSTRUCTIONS

Related Documentation

Cisco UCS Director Documentation Roadmap

For a complete list of Cisco UCS Director documentation, see the Cisco UCS Director Documentation Roadmap available at the following URL: Click Here .

Cisco UCS Documentation Roadmaps

For a complete list of all B-Series documentation, see the Cisco UCS B-Series Servers Documentation Roadmap available at the following URL: Click Here .

For a complete list of all C-Series documentation, see the Cisco UCS C-Series Servers Documentation Roadmap available at the following URL: Click Here .

Note

The Cisco UCS B-Series Servers Documentation Roadmap includes links to documentation for Cisco UCS Manager and Cisco UCS Central. The Cisco UCS C-Series Servers Documentation Roadmap includes links to documentation for Cisco Integrated Management Controller.

Documentation Feedback

To provide technical feedback on this document, or to report an error or omission, please send your comments to ucs-director-docfeedback@cisco.com. We appreciate your feedback.

Obtaining Documentation and Submitting a Service Request

For information on obtaining documentation, using the Cisco Bug Search Tool (BST), submitting a service request, and gathering additional information, see What's New in Cisco Product Documentation.

To receive new and revised Cisco technical content directly to your desktop, you can subscribe to the What's New in Cisco Product Documentation RSS feed. RSS feeds are a free service.

THE SPECIFICATIONS AND INFORMATION REGARDING THE PRODUCTS IN THIS MANUAL ARE SUBJECT TO CHANGE WITHOUT NOTICE. ALL STATEMENTS, INFORMATION, AND RECOMMENDATIONS IN THIS MANUAL ARE BELIEVED TO BE ACCURATE BUT ARE PRESENTED WITHOUT WARRANTY OF ANY KIND, EXPRESS OR IMPLIED. USERS MUST TAKE FULL RESPONSIBILITY FOR THEIR APPLICATION OF ANY PRODUCTS.

THE SOFTWARE LICENSE AND LIMITED WARRANTY FOR THE ACCOMPANYING PRODUCT ARE SET FORTH IN THE INFORMATION PACKET THAT SHIPPED WITH THE PRODUCT AND ARE INCORPORATED HEREIN BY THIS REFERENCE. IF YOU ARE UNABLE TO LOCATE THE SOFTWARE LICENSE OR LIMITED WARRANTY, CONTACT YOUR CISCO REPRESENTATIVE FOR A COPY.

The Cisco implementation of TCP header compression is an adaptation of a program developed by the University of California, Berkeley (UCB) as part of UCB's public domain version of the UNIX operating system. All rights reserved. Copyright © 1981, Regents of the University of California.

NOTWITHSTANDING ANY OTHER WARRANTY HEREIN, ALL DOCUMENT FILES AND SOFTWARE OF THESE SUPPLIERS ARE PROVIDED “AS IS" WITH ALL FAULTS. CISCO AND THE ABOVE-NAMED SUPPLIERS DISCLAIM ALL WARRANTIES, EXPRESSED OR IMPLIED, INCLUDING, WITHOUT LIMITATION, THOSE OF MERCHANTABILITY, FITNESS FOR A PARTICULAR PURPOSE AND NONINFRINGEMENT OR ARISING FROM A COURSE OF DEALING, USAGE, OR TRADE PRACTICE.

IN NO EVENT SHALL CISCO OR ITS SUPPLIERS BE LIABLE FOR ANY INDIRECT, SPECIAL, CONSEQUENTIAL, OR INCIDENTAL DAMAGES, INCLUDING, WITHOUT LIMITATION, LOST PROFITS OR LOSS OR DAMAGE TO DATA ARISING OUT OF THE USE OR INABILITY TO USE THIS MANUAL, EVEN IF CISCO OR ITS SUPPLIERS HAVE BEEN ADVISED OF THE POSSIBILITY OF SUCH DAMAGES.

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: Click Here . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)