Table of Contents

OL_26535

Catalyst 4500-X AC-Input Power Supply Installation Note

Revised: October 15, 2012

Product Numbers:

C4KX-PWR-750AC-F(=)

C4KX-PWR-750AC-R(=)

C4KX-PWR-BLANK(=)

This document covers installing and removing the AC-input power supply in the Catalyst 4500-X series switch chassis.

Note AC-input power supplies are not included as part of the basic chassis configuration product numbers. The AC-input power supplies are ordered separately.

Contents

This installation note contains the following sections

- AC-Input Power Supply Features

- Safety

- Tools Required

- Installing the Power Supply

- Removing the Power Supply

- Power Supply Specifications

- Power Cords

- Related Documentation

- Obtaining Documentation and Submitting a Service Request

AC-Input Power Supply Features

There are two versions of the 750 W AC-input power supply, the C4KX-PWR-750AC-F power supply which has back-to-front airflow (the release lever is color-coded blue indicating cool side) and the C4KX-PWR-750AC-R power supply which has front-to-back airflow (the release lever is color-coded burgundy indicating warm side). Both power supplies provide 750 W of power. Figure 1 shows the AC-input power supply and identifies the major features.

Figure 1 750 W AC-Input Power Supply Features

1

FAIL LED (amber)

5

AC power cord receptacle (IEC 60320 C15)

2

OK LED (green)

6

Fan (directional arrow on top indicates airflow direction)

3

Power supply handle

7

Release lever (color-coded for airflow direction. Burgundy indicates front-to-back airflow; blue indicates back-to-front airflow)

4

AC power cord retaining strap (velcro)

8

Retention clip

Table 1 AC-Input Power Supply Status LEDs Meanings

OK LED (Green)

FAIL LED (Amber)

Description

Off

Off

No source AC power is detected by the power supply.

Off

On

Power supply failure (can include overvoltage, overcurrent, overtemperature, or fan failure).

Off

Blinking

Power supply warning situation where the power supply continues to operate (possible scenerios include high temperature, overvoltage, or slow fan).

Blinking

Off

Source AC is present. The 3.3 VDCsb (standby) is present. The power supply 12 VDC off.

On

Off

Power supply is ON and is functioning normally.

Note Two LEDs labeled, PS1 and PS2, are located on the chassis front panel. The LEDs indicate the status of their respective power supplies: Green indicates OK and red indicates a fault (either voltage out of tolerance or fan failure) in the power supply.

Safety

Warning

IMPORTANT SAFETY INSTRUCTIONS
This warning symbol means danger. You are in a situation that could cause bodily injury. Before you work on any equipment, be aware of the hazards involved with electrical circuitry and be familiar with standard practices for preventing accidents. Use the statement number provided at the end of each warning to locate its translation in the translated safety warnings that accompanied this device.

SAVE THESE INSTRUCTIONS

Waarschuwing

BELANGRIJKE VEILIGHEIDSINSTRUCTIES

Dit waarschuwingssymbool betekent gevaar. U verkeert in een situatie die lichamelijk letsel kan veroorzaken. Voordat u aan enige apparatuur gaat werken, dient u zich bewust te zijn van de bij elektrische schakelingen betrokken risico's en dient u op de hoogte te zijn van de standaard praktijken om ongelukken te voorkomen. Gebruik het nummer van de verklaring onderaan de waarschuwing als u een vertaling van de waarschuwing die bij het apparaat wordt geleverd, wilt raadplegen.

BEWAAR DEZE INSTRUCTIES

Varoitus

TÄRKEITÄ TURVALLISUUSOHJEITA

Tämä varoitusmerkki merkitsee vaaraa. Tilanne voi aiheuttaa ruumiillisia vammoja. Ennen kuin käsittelet laitteistoa, huomioi sähköpiirien käsittelemiseen liittyvät riskit ja tutustu onnettomuuksien yleisiin ehkäisytapoihin. Turvallisuusvaroitusten käännökset löytyvät laitteen mukana toimitettujen käännettyjen turvallisuusvaroitusten joukosta varoitusten lopussa näkyvien lausuntonumeroiden avulla.

SÄILYTÄ NÄMÄ OHJEET

Attention

IMPORTANTES INFORMATIONS DE SÉCURITÉ

Ce symbole d'avertissement indique un danger. Vous vous trouvez dans une situation pouvant entraîner des blessures ou des dommages corporels. Avant de travailler sur un équipement, soyez conscient des dangers liés aux circuits électriques et familiarisez-vous avec les procédures couramment utilisées pour éviter les accidents. Pour prendre connaissance des traductions des avertissements figurant dans les consignes de sécurité traduites qui accompagnent cet appareil, référez-vous au numéro de l'instruction situé à la fin de chaque avertissement.

CONSERVEZ CES INFORMATIONS

Warnung

WICHTIGE SICHERHEITSHINWEISE

Dieses Warnsymbol bedeutet Gefahr. Sie befinden sich in einer Situation, die zu Verletzungen führen kann. Machen Sie sich vor der Arbeit mit Geräten mit den Gefahren elektrischer Schaltungen und den üblichen Verfahren zur Vorbeugung vor Unfällen vertraut. Suchen Sie mit der am Ende jeder Warnung angegebenen Anweisungsnummer nach der jeweiligen Übersetzung in den übersetzten Sicherheitshinweisen, die zusammen mit diesem Gerät ausgeliefert wurden.

BEWAHREN SIE DIESE HINWEISE GUT AUF.

Avvertenza

IMPORTANTI ISTRUZIONI SULLA SICUREZZA

Questo simbolo di avvertenza indica un pericolo. La situazione potrebbe causare infortuni alle persone. Prima di intervenire su qualsiasi apparecchiatura, occorre essere al corrente dei pericoli relativi ai circuiti elettrici e conoscere le procedure standard per la prevenzione di incidenti. Utilizzare il numero di istruzione presente alla fine di ciascuna avvertenza per individuare le traduzioni delle avvertenze riportate in questo documento.

CONSERVARE QUESTE ISTRUZIONI

Advarsel

VIKTIGE SIKKERHETSINSTRUKSJONER

Dette advarselssymbolet betyr fare. Du er i en situasjon som kan føre til skade på person. Før du begynner å arbeide med noe av utstyret, må du være oppmerksom på farene forbundet med elektriske kretser, og kjenne til standardprosedyrer for å forhindre ulykker. Bruk nummeret i slutten av hver advarsel for å finne oversettelsen i de oversatte sikkerhetsadvarslene som fulgte med denne enheten.

TA VARE PÅ DISSE INSTRUKSJONENE

Aviso

INSTRUÇÕES IMPORTANTES DE SEGURANÇA

Este símbolo de aviso significa perigo. Você está em uma situação que poderá ser causadora de lesões corporais. Antes de iniciar a utilização de qualquer equipamento, tenha conhecimento dos perigos envolvidos no manuseio de circuitos elétricos e familiarize-se com as práticas habituais de prevenção de acidentes. Utilize o número da instrução fornecido ao final de cada aviso para localizar sua tradução nos avisos de segurança traduzidos que acompanham este dispositivo.

GUARDE ESTAS INSTRUÇÕES

¡Advertencia!

INSTRUCCIONES IMPORTANTES DE SEGURIDAD

Este símbolo de aviso indica peligro. Existe riesgo para su integridad física. Antes de manipular cualquier equipo, considere los riesgos de la corriente eléctrica y familiarícese con los procedimientos estándar de prevención de accidentes. Al final de cada advertencia encontrará el número que le ayudará a encontrar el texto traducido en el apartado de traducciones que acompaña a este dispositivo.

GUARDE ESTAS INSTRUCCIONES

Varning!

VIKTIGA SÄKERHETSANVISNINGAR

Denna varningssignal signalerar fara. Du befinner dig i en situation som kan leda till personskada. Innan du utför arbete på någon utrustning måste du vara medveten om farorna med elkretsar och känna till vanliga förfaranden för att förebygga olyckor. Använd det nummer som finns i slutet av varje varning för att hitta dess översättning i de översatta säkerhetsvarningar som medföljer denna anordning.

SPARA DESSA ANVISNINGAR

Aviso

INSTRUÇÕES IMPORTANTES DE SEGURANÇA

Este símbolo de aviso significa perigo. Você se encontra em uma situação em que há risco de lesões corporais. Antes de trabalhar com qualquer equipamento, esteja ciente dos riscos que envolvem os circuitos elétricos e familiarize-se com as práticas padrão de prevenção de acidentes. Use o número da declaração fornecido ao final de cada aviso para localizar sua tradução nos avisos de segurança traduzidos que acompanham o dispositivo.

GUARDE ESTAS INSTRUÇÕES

Advarsel

VIGTIGE SIKKERHEDSANVISNINGER

Dette advarselssymbol betyder fare. Du befinder dig i en situation med risiko for legemesbeskadigelse. Før du begynder arbejde på udstyr, skal du være opmærksom på de involverede risici, der er ved elektriske kredsløb, og du skal sætte dig ind i standardprocedurer til undgåelse af ulykker. Brug erklæringsnummeret efter hver advarsel for at finde oversættelsen i de oversatte advarsler, der fulgte med denne enhed.

GEM DISSE ANVISNINGER

Tools Required

No specific tools are required to install or remove the AC-input power supply.

Installing the Power Supply

To install the AC-input power supply, follow these steps:

Step 1 Remove the power supply from the shipping packaging and discard the packaging.

Step 2 Verify that the new power supply has the correct airflow direction (front-to-back or back-to-front) for your situation. The power supply release lever (see Figure 1), is color-coded blue for back-to-front airflow or burgundy for front-to-back airflow.

Note The chassis determines which airflow direction is correct by polling all of the fan assemblies and the power supplies. The airflow direction for all of the devices must be the same. If the airflow direction of the replacement power supply or the redundant power supply does not match the fan assemblies airflow direction, the system software shuts down the power supply and generates a power supply mismatch error message on the console.

Step 3 If the chassis power supply bay is empty, proceed to Step 4. If you are replacing a power supply already installed in the chassis power supply bay, go to the “Removing the Power Supply” section. If the chassis power supply bay is empty, but has a power supply blank cover installed, you must remove the blank cover (see Figure 2):

a. Grasp the two retaining clips with your thumb and forefinger and squeeze to release the blank cover from the power supply bay.

b. While still squeezing the two clips, pull on them to remove the blank cover from the power supply bay.

Figure 2 Power Supply Blank Cover

Note If the redundant power supply bay on the Catalyst 4500-X chassis is unused, you must cover it with a power supply blank cover (part no. C4KX-PWR-BLANK=) to maintain proper airflow through the chassis.

Step 4 Using two hands to support the new power supply, position it in front of the power supply bay and slide it into the bay.

Step 5 Firmly push on the power supply handle to fully seat the power supply in the bay. (See Figure 3.)

Note The retaining clip will pivot in and then snap into place when the power supply is fully installed in the bay. You can hear a click as the power supply release lever snaps into place.

Figure 3 Installing the AC-Input Power Supply

Step 6 Verify that you have the correct source AC power cord for your installation. See the “Power Cords” section for a list, including descriptions and illustrations, of the AC power cords supported on the power supply.

Step 7 Attach the AC power cord’s appliance connector to the AC-in receptacle on the power supply and secure the power cord in place with the velcro retaining strap on the power supply. Connect the power cord’s AC plug to the source AC outlet.

Note If the source AC outlet is live, the power supply will immediately power up. There is no power switch on the AC-input power supply.

Step 8 Verify that the power supply powers up correctly by visually monitoring the two LEDs on the power supply. (See Figure 1.) See Table 1 for a list of LED conditions and meanings.

Removing the Power Supply

To remove the AC-input power supply from the chassis, follow these steps:

Step 1 Release the AC power cord from the velcro restraint strap.

Step 2 Disconnect the AC power cord from the power supply.

Note The AC-input power supply does not have an on/off switch. Disconnecting the AC power cord immediately powers down the AC power supply.

Step 3 Grasp the power supply handle with your forefinger and place your thumb on the power supply release handle.

Step 4 Squeeze your forefinger and thumb together and pull on the power supply handle to release the power supply from the chassis bay. (See Figure 4.)

Figure 4 Removing the AC-Input Power Supply

Step 5 Slide the power supply out of the chassis bay.

Note The power supply is approximately 14 inches (35.56 cm) long. Place your other hand underneath of the power supply to support the power supply as you extract it from the chassis.

Step 6 Set the removed power supply aside.

Step 7 If you are not going to replace the power supply, place a power supply blank cover (part no. C4KX-PWR-BLANK=) over the empty power supply bay opening and snap it into place. If you are going to install a new power supply in the chassis, see the “Installing the Power Supply” section for instructions.

Power Supply Specifications

Table 2 Electrical Specifications, 750 W AC-Input Power Supply

Specification

Description

AC-input type

Autoranging input with power factor correction (PFC)

AC-input voltage

100 to 240 VAC (115/230 VAC nominal) single-phase

AC-input current

- 11 A @ 100 VAC (max)

- 6 A @ 200 VAC (max)

AC-input frequency

47 to 63 Hz (50/60 Hz nominal)

Branch circuit requirement

Each chassis power supply should have its own dedicated, fused-branch circuit:

- For North America—15 A

- For International—Circuits should be sized to local and national codes

- All AC power supply inputs are fully isolated.

- Source AC can be out of phase between multiple power supplies in the same chassis, which means that PS1 can be operating from phase A and PS2 can be operating from phase B.

Power supply output capacity

750 W

Power supply output

- 12 VDC @ 62 A

- 3.3 VDC @ 3 A

Output holdup time

16 ms minimum (20 ms @ 60% load)

BTU (total output)1

1122 BTU/hour (nominal)

1365 BTU/hour (max)

1.1000 BTU/hour = 293 W

Table 3 Dimensions and Weight for an AC-Input Power Supply

Specification

Description

AC-input power supply dimensions

(H x W x D)

1.57 x 2.15 x 14.28 in

(3.99 x 5.46 x 36.27 cm)

Weight

2 lb (0.91 kg)

Shipping box dimensions, spare power supply

(H x W x D)

4.38 x 7.13 x 20.13 in

(11.13 x 18.11 x 51.13 cm)

Shipping weight

3.7 lb (1.68 kg)

Power Cords

Table 4 lists and describes the power cords supported by the AC-input power supply. Illustrations of the power cords are included.

CAB-9K10A-SW=

CAB-C15-ACS=

MP232-A

10 A, 250 VAC

Figure 5

Australia

CAB-AS3112-C15-AU=

AS3112

10 A, 250 VAC

Figure 6

United Kingdom

CAB-BS1363-C15-UK=

BS 1363

10 A, 250 VAC

Figure 7

South Africa, India

CAB-BS546-C15-SA=

BS 546

10 A, 250 VAC

Figure 8

Italy

CAB-C2316-C15-IT=

CEI 23-16/7

10 A, 250 VAC

Figure 9

Continental Europe

CAB-CEE77-C15-EU=

CEE 7/7

16 A, 250 VAC

Figure 10

Argentina

CAB-IR2073-C15-AR=

IRAM 2073

10 A, 250 VAC

Figure 11

North America

CAB-US515-C15-US=

NEMA 5-15P

13 A, 125 VAC

Figure 12

Israel

CAB-C15-ISR=

EL 212 (SI-32)

10 A, 250 VAC

Figure 13

Japan

CAB-C15-JPN=

JIS C8303

12 A, 125 VAC

Figure 14

Brazil

CAB-EL223-C15-BR=

EL223 (NBR 14136)

10 A, 250 VAC

Figure 15

Figure 5 CAB-9K10A-SW=, CAB-C15-ACS= (AC Power Cord, Switzerland)

Figure 6 CAB-AS3112-C15-AU= (AC Power Cord, Australia)

Figure 7 CAB-BS1363-C15-UK= (AC Power Cord, United Kingdom)

Figure 8 CAB-BS546-C15-SA= (AC Power Cord, South Africa, India)

Figure 9 CAB-C2316-C15-IT= (AC Power Cord, Italy)

Figure 10 CAB-CEE77-C15-EU= (AC Power Cord, Europe)

Figure 11 CAB-IR2073-C15-AR= (AC Power Cord, Argentina)

Figure 12 CAB-US515-C15-US= (AC Power Cord, North America)

Figure 13 CAB-C15-ISR= (AC Power Cord, Israel)

Figure 14 CAB-C15-JPN= (AC Power Cord, Japan)

Figure 15 CAB-EL223-C15-BR= (AC Power Cord, Brazil)

Related Documentation

Table 5 Documentation Supporting the Catalyst 4500-X Series Switch

Title

Description of Contents

Catalyst 4500-X Series Switch Installation Note

Contains instructions for rack-mounting the switch chassis.

Catalyst 4500-X 8-Port Network Uplink Module Installation Note

Contains instructions for installing and removing the optional 8-port network uplink module in the Catalyst 4500-X switch chassis.

Catalyst 4500-X DC-Input Power Supply Installation Note

Contains instructions for removing and installing the DC-input power supply in the Catalyst 4500-X switch chassis.

Catalyst 4500-X Fan Assembly Installation Note

Contains instructions for removing and installing a fan assembly in the Catalyst 4500-X switch chassis.

Regulatory Compliance and Safety Information for the Catalyst 4500-X Series Switch

Contains the regulatory compliance and safety information for the Catalyst 4500-X switch chassis. Also includes language translations of the warnings that appear in the other Catalyst 4500-X documentation.

Catalyst 4500 Series Switch Cisco IOS Software Configuration Guide, Release IOS XE 3.3.0SG(15.1(1)SG)

Contains instructions on how to configure the Catalyst 4500-X switch.

Catalyst 4500 Series Switch Cisco IOS Conmmand Reference, Release IOS XE 3.3.0SG(15.1(1)SG)

Contains descriptions of all of the software commands available that support the Catalyst 4500-X switch.

Release Notes for the Catalyst 4500 Series Switch, Release IOS XE 3.3.0SG(15.1(1)SG)

Contains the latest software caveats and workarounds related to the Catalyst 4500-X switch.

Obtaining Documentation and Submitting a Service Request

For information on obtaining documentation, submitting a service request, and gathering additional information, see the monthly What’s New in Cisco Product Documentation, which also lists all new and revised Cisco technical documentation, at:

http://www.cisco.com/en/US/docs/general/whatsnew/whatsnew.html

Subscribe to the What’s New in Cisco Product Documentation as an RSS feed and set content to be delivered directly to your desktop using a reader application. The RSS feeds are a free service. Cisco currently supports RSS Version 2.0.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2012 Cisco Systems, Inc. All rights reserved.