Table of Contents

Messages and Recovery Procedures

AAA Messages

AAA-1

AAA-3

AAA-6

ACLLOG Messages

ACLLOG-4

ACLLOG-6

ACLMGR Messages

ACLMGR-2

ACLMGR-3

ACLQOS Messages

ACLQOS-SLOT#-2

ACLQOS-SLOT#-4

ACLTCAM Messages

ACLTCAM-6

ACL Messages

ACL-6

ASCII-CFG Messages

ASCII-CFG-2

ASCII-CFG-3

ASCII-CFG-6

ASSOC_MGR Messages

ASSOC_MGR-0

ASSOC_MGR-1

ASSOC_MGR-2

ASSOC_MGR-3

ASSOC_MGR-4

ASSOC_MGR-5

ASSOC_MGR-6

ASSOC_MGR-7

BFD Messages

BFD-5

CALLHOME Messages

CALLHOME-3

CALLHOME-6

CDP Messages

CDP-2

CDP-3

CDP-5

CDP-6

CERT_ENROLL Messages

CERT_ENROLL-3

CERT_ENROLL-6

CFS Messages

CFS-2

CFS-3

CFS-4

CFS-6

CLK_MGR Messages

CLK_MGR-2

CLK_MGR-5

CLK_MGR-6

CLOUD Messages

CLOUD-3

CLOUD-6

CMOND Messages

CMOND-2

COPP Messages

COPP-5

DCEFIB Messages

DCEFIB-SLOT#-2

DCEFIB-SLOT#-6

DEV_LOG Messages

DEV_LOG-3

DEV_LOG-SLOT#-4

DHCLIENT Messages

DHCLIENT-2

DHCLIENT-4

DHCLIENT-5

DHCLIENT-6

DHCLIENT-7

DHCP_SNOOP Messages

DHCP_SNOOP-2

DHCP_SNOOP-3

DHCP_SNOOP-5

DHCP_SNOOP-6

DIAG_PORT_LB Messages

DIAG_PORT_LB-5

DOT1X Messages

DOT1X-5

DSTATS Messages

DSTATS-3

EOU Messages

EOU-5

EPLD_UPGRADE Messages

EPLD_UPGRADE-2

EPP Messages

EPP-5

ETH-PORT-SEC Messages

ETH-PORT-SEC-2

ETH-PORT-SEC-3

ETH-PORT-SEC-5

ETH_PORT_CHANNEL Messages

ETH_PORT_CHANNEL-3

ETH_PORT_CHANNEL-4

ETH_PORT_CHANNEL-5

FABRICPATH Messages

FABRICPATH-2

FC-TUNNEL Messages

FC-TUNNEL-3

FEATURE-MGR Messages

FEATURE-MGR-6

FEX Messages

FEX-2

FEX-4

FEX-5

FS-DAEMON Messages

FS-DAEMON-6

GLBP Messages

GLBP-2

GLBP-3

HSRP_ENGINE Messages

HSRP_ENGINE-3

IKE Messages

IKE-3

IMP Messages

IMP-5

INTERFACE_VLAN Messages

INTERFACE_VLAN-4

INTERFACE_VLAN-5

IOA_LC Messages

IOA_LC-5

IPSEC Messages

IPSEC-5

ISCM Messages

ISCM-2

ISCM-4

LACP Messages

LACP-3

LACP-5

LC-SPAN Messages

LC-SPAN-3

LDAP Messages

LDAP-3

LDAP-5

LDAP-6

LDP Messages

LDP-5

LICMGR Messages

LICMGR-3

LICMGR-6

LLDP Messages

LLDP-5

MCAST Messages

MCAST-2

MCAST-4

MCAST-5

MCECTEST Messages

MCECTEST-3

MCECTEST-5

MCECTEST-6

MCM Messages

MCM-2

MCM-5

NAT Messages

NAT-2

NAT-3

NAT-4

NAT-5

NFP Messages

NFP-SLOT#-2

NFP-SLOT#-5

NPV Messages

NPV-3

NPV-5

NPV-6

NPV-7

NTP Messages

NTP-2

NTP-3

NTP-6

OTM Messages

OTM-2

OTM-3

OTM-5

OTM-6

PATCH-INSTALLER Messages

PATCH-INSTALLER-3

PIXM Messages

PIXM-2

PIXM-3

PIXM-4

PIXM-7

PLATFORM Messages

PLATFORM-0

PLATFORM-1

PLATFORM-2

PLATFORM-3

PLATFORM-4

PLATFORM-5

PLATFORM-6

PLATFORM-7

PLOG_SUP Messages

PLOG_SUP-4

PLOG Messages

PLOG-4

POAP Messages

POAP-2

POAP-5

PONG Messages

PONG-5

PORT-CHANNEL Messages

PORT-CHANNEL-3

PORT-CHANNEL-4

PORT-CHANNEL-5

PORT Messages

PORT-3

PORT-4

PRIVATE_VLAN Messages

PRIVATE_VLAN-2

PRIVATE_VLAN-3

PRIVATE_VLAN-5

PSS Messages

PSS-2

PSS-4

PSS-5

PTPLC Messages

PTPLC-3

PTP Messages

PTP-2

PTP-5

PTP-6

QOS Messages

QOS-2

QOS-3

QOS-4

QOS-6

QUACK_SMC Messages

QUACK_SMC-6

RADIUS Messages

RADIUS-3

RADIUS-4

RADIUS-5

RADIUS-6

RES_MGR Messages

RES_MGR-2

RES_MGR-5

SAL Messages

SAL-5

SCHEDULER Messages

SCHEDULER-3

SCHEDULER-4

SCHEDULER-6

SECURITYD Messages

SECURITYD-2

SECURITYD-3

SECURITYD-6

SKSD Messages

SKSD-2

SKSD-3

SKSD-4

SKSD-5

SKSD-6

SNMPD Messages

SNMPD-1

SNMPD-2

SNMPD-3

SNMPD-4

SNMPD-5

SNMPD-6

SNMPD-7

STP Messages

STP-2

TACACS Messages

TACACS-3

TACACS-4

TACACS-5

TACACS-6

TBIRD_CMN_USD Messages

TBIRD_CMN_USD-6

TELEMETRY Messages

TELEMETRY-1

TELEMETRY-2

TELEMETRY-3

TELEMETRY-4

TELEMETRY-5

TELEMETRY-6

TELEMETRY-7

TUNNEL Messages

TUNNEL-2

TUNNEL-3

TUNNEL-5

TUNNEL-7

U2RIB Messages

U2RIB-5

UDLD Messages

UDLD-5

UFDM Messages

UFDM-5

VLAN_MGR Messages

VLAN_MGR-2

VLAN_MGR-3

VLAN_MGR-4

VLAN_MGR-5

VLAN_MGR-6

VMTRACKER Messages

VMTRACKER-2

VMTRACKER-3

VMTRACKER-4

VMTRACKER-5

VPC Messages

VPC-2

VPC-3

VPC-4

VPC-5

VPC-6

VSHD Messages

VSHD-5

XMLSA Messages

XMLSA-2

XMLSA-5

Messages and Recovery Procedures

This chapter lists the system messages by facility. Within each facility, the messages are listed by severity levels 0 to 7: 0 is the highest severity level, and 7 is the lowest severity level. Each message is followed by an explanation and a recommended action.

AAA Messages

This section contains the AAA messages.

AAA-1

Error Message  AAA-1-AAA_SESSION_LIMIT_REJECT: aaa request rejected as maximum aaa sessions are in progress

Explanation  Aaa request rejected as the limit for maximum concurrent aaa sessions is reached

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-3

Error Message  AAA-3-AAA_NVRAMFAILURE: nvram failure

Explanation  Nvram can not be read/written to. Hence accounting log can not be stored there

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-6

Error Message  AAA-6-AAA_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

ACLLOG Messages

This section contains the ACLLOG messages.

ACLLOG-4

Error Message  ACLLOG-4-ACLLOG_MAXFLOW_REACHED: [chars]

Explanation  Max flow reached in current interval: [chars]

Recommended Action  No action is required.

Error Message  ACLLOG-4-ACLLOG_THRESHOLD: [chars]

Explanation  Threshold Reached for Flow: [chars]

Recommended Action  No action is required.

ACLLOG-6

Error Message  ACLLOG-6-ACLLOG_FLOW_INTERVAL: [chars]

Explanation  Flow info in current alert interval: [chars]

Recommended Action  No action is required.

Error Message  ACLLOG-6-ACLLOG_NEW_FLOW: [chars]

Explanation  New Acllog Flow: [chars]

Recommended Action  No action is required.

ACLMGR Messages

This section contains the ACLMGR messages.

ACLMGR-2

Error Message  ACLMGR-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The ACLMGR service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

ACLMGR-3

Error Message  ACLMGR-3-MTSERROR: [chars]

Explanation  ACLMGR Service encountered an MTS error. [chars] specifies the context where the error occured.

Recommended Action  No action is required.

ACLQOS Messages

This section contains the ACLQOS messages.

ACLQOS-SLOT#-2

Error Message  ACLQOS-SLOT#-2-ACLQOS_UNEXPECTED_PFC_FRAMES: [chars]

Explanation  Unexpected PFC frames received

Recommended Action  No DDTS.

ACLQOS-SLOT#-4

Error Message  ACLQOS-SLOT#-4-ACLQOS_ATOMIC_ERR: [chars]

Explanation  Tcam will be overused, please turn off atomic update

Recommended Action  No DDTS.

ACLTCAM Messages

This section contains the ACLTCAM messages.

ACLTCAM-6

Error Message  ACLTCAM-6-ACL_TCAM_STATUS: Status: [chars].

Explanation  ACLTCAM status is reported as: [chars].

Recommended Action  No action is required.

ACL Messages

This section contains the ACL messages.

ACL-6

Error Message  ACL-6-ACL_DIAG_EVENT_STATUS: [chars] [hex].

Explanation  ACL system health management event status is reported as [chars] [hex].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_SPAN_DEST_CONFIG_STATUS: [chars] [chars].

Explanation  ACL SPAN destination config event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_SPAN_SRC_CONFIG_STATUS: [chars] [chars].

Explanation  ACL SPAN source config event status is reported as [chars] [chars].

Recommended Action  No action is required.

ASCII-CFG Messages

This section contains the ASCII-CFG messages.

ASCII-CFG-2

Error Message  ASCII-CFG-2-CONFIG_REPLAY_STATUS: [chars] Replay [chars].

Explanation  Bootstrap or Ascii Configuration Replay Status info.

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-CONF_CONTROL: [chars]

Explanation  Configuration restore control info.

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-SYSERR_ACFG_NO_STARTUP_CFG_FILE: [chars]

Explanation  Startup configuration file is empty

Recommended Action  No action is required.

ASCII-CFG-3

Error Message  ASCII-CFG-3-ACFG_MTSERROR: [chars]

Explanation  Ascii-cfg-server (rollback process) encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

ASCII-CFG-6

Error Message  ASCII-CFG-6-INFORMATION: [chars]

Explanation  An event happend that affects Acfg-Rollback. [chars] indicates the event

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-PSS_ERR: [chars]

Explanation  An error occurred during an Acfg PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

ASSOC_MGR Messages

This section contains the ASSOC_MGR messages.

ASSOC_MGR-0

Error Message  ASSOC_MGR-0-EMERGENCY_MSG: [chars]

Explanation  Association Manager Emergency Message

Recommended Action  Please file the bug for Association Manager Component thro' CDETS

ASSOC_MGR-1

Error Message  ASSOC_MGR-1-ALERT_MSG: [chars]

Explanation  Association Manager Alert Message

Recommended Action  Association Manager Internal Operation Alert

ASSOC_MGR-2

Error Message  ASSOC_MGR-2-CRITICAL_MSG: [chars]

Explanation  Association Manager Critical Message

Recommended Action  No action is required.

ASSOC_MGR-3

Error Message  ASSOC_MGR-3-ERROR_MSG: [chars]

Explanation  Association Manager Error Message

Recommended Action  No action is required.

ASSOC_MGR-4

Error Message  ASSOC_MGR-4-WARN_MSG: [chars]

Explanation  Association Manager Warning Message

Recommended Action  No action is required.

ASSOC_MGR-5

Error Message  ASSOC_MGR-5-NOTIF_MSG: [chars]

Explanation  Association Manager Notification Message

Recommended Action  No action is required.

ASSOC_MGR-6

Error Message  ASSOC_MGR-6-ASSOC_ACTIVATED: Association Activated for vlan id:[dec] <--> vsan id:[dec]

Explanation  Association Activated

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_CREATED: Association Created for vlan id:[dec] <--> vsan id:[dec]

Explanation  Association Created

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_DEACTIVATED: Association Deactivated for vlan id: [dec] <--> vsan id: [dec]

Explanation  Association Deactivated

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_DELETED: Association Deleted for vlan id: [dec] <--> vsan id: [dec]

Explanation  Association Deleted

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_MGR_STATEFULL_RESTART: Association Manager Statefull Restart

Explanation  Association Manager Stateful Restart

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_MGR_STATELESS_RESTART: Association Manager Stateless Restart

Explanation  Association Manager Stateless Restart

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_OPER_STATUS_CHG: Association status for vlan id: [dec] <--> vsan id: [dec] changed from [chars] to [chars]

Explanation  Association Operational State Change

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-INFO_MSG: [chars]

Explanation  ASSOC Manager Informational Message

Recommended Action  No action is required.

ASSOC_MGR-7

Error Message  ASSOC_MGR-7-DEBUG_MSG: [chars]

Explanation  Association Manager Debug Message

Recommended Action  No action is required.

BFD Messages

This section contains the BFD messages.

BFD-5

Error Message  BFD-5-BFD_DISABLED: BFD Disabled

Explanation  BFD Service Disabled

Recommended Action  No action is required.

Error Message  BFD-5-BFD_ENABLED: BFD Enabled

Explanation  BFD Service enabled

Recommended Action  No action is required.

CALLHOME Messages

This section contains the CALLHOME messages.

CALLHOME-3

Error Message  CALLHOME-3-CALLHOME_CFS_MERGE_OPERATION_FAILED: [chars]

Explanation  [chars1]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CALLHOME-3-CALLHOME_CFS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CALLHOME-3-CALLHOME_MAX_ALERT_MSG: [chars]

Explanation  [chars]

Recommended Action  Please check the reason for the generation of the callhome messages and rectify the problem

CALLHOME-6

Error Message  CALLHOME-6-NONCRIT_EVENT: [chars]

Explanation  Non-critical Callhome event [chars] occurred.

Recommended Action  If you have configured your email address to receive callhome notifications, please check your email for more details about this callhome event. If callhome was not enabled, please execute CLI commands relevant to the callhome event to get more information about the error

CDP Messages

This section contains the CDP messages.

CDP-2

Error Message  CDP-2-INITFAIL: CDP Daemon Initialization failed: [chars]

Explanation  CDP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

CDP-3

Error Message  CDP-3-GENERROR: [chars]

Explanation  CDP Daemon encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  CDP-3-MTSERROR: [chars]

Explanation  CDP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  CDP-3-PSSERROR: [chars]

Explanation  CDP Daemon encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

CDP-5

Error Message  CDP-5-DISABLED: CDP is disabled

Explanation  CDP is disabled on the device.

Recommended Action  No action is required.

Error Message  CDP-5-ENABLED: CDP is enabled

Explanation  CDP is enabled on the device.

Recommended Action  No action is required.

CDP-6

Error Message  CDP-6-CDPDUP: CDP Daemon Up.

Explanation  CDP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTDISABLE: CDP disabled on port [chars]

Explanation  CDP was disabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTDOWN: A CDP enabled port [chars] went down.

Explanation  A CDP enabled port became un-operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTENABLE: CDP enabled on port [chars]

Explanation  CDP was enabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTUP: A CDP enabled port [chars] came up.

Explanation  A CDP enabled port became operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

CERT_ENROLL Messages

This section contains the CERT_ENROLL messages.

CERT_ENROLL-3

Error Message  CERT_ENROLL-3-CERT_EN_ERROR_MESSAGE: [chars]

Explanation  CERT_ENROLL Error Message

Recommended Action  No action is required.

Error Message  CERT_ENROLL-3-CERT_EN_FIPS_MODE_INIT_ERROR: Could not initialize FIPS mode : [chars]

Explanation  FIPS mode initialization error

Recommended Action  No action is required.

Error Message  CERT_ENROLL-3-CERT_EN_IMPORT_TRUSTPOOL_ERROR: Trustpool import from URL : [chars] failed

Explanation  Trustpool download

Recommended Action  No action is required.

Error Message  CERT_ENROLL-3-CERT_EN_TRUSTPOOL_INIT_ERROR: Trustpool initialization error : [dec]

Explanation  Trustpool initialization

Recommended Action  No action is required.

Error Message  CERT_ENROLL-3-CERT_EN_TRUSTPOOL_TIMER_ERROR: Trustpool timer error : [chars]

Explanation  Trustpool download timer

Recommended Action  No action is required.

CERT_ENROLL-6

Error Message  CERT_ENROLL-6-CERT_EN_IMPORT_TRUSTPOOL: Successfully imported trustpool from URL : [chars]

Explanation  Trustpool download

Recommended Action  No action is required.

Error Message  CERT_ENROLL-6-CERT_EN_MESSAGE: [chars]

Explanation  CERT_ENROLL Message

Recommended Action  No action is required.

CFS Messages

This section contains the CFS messages.

CFS-2

Error Message  CFS-2-GENERAL_ERROR: [chars]

Explanation  The CFS service has encountered an critical error. The description of error is [str.]

Recommended Action  No action is required.

Error Message  CFS-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The CFS service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

CFS-3

Error Message  CFS-3-DBERROR: [chars]

Explanation  CFS Service encountered a database error. [chars] specifies the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-FAILURE_RESPONSE: [chars] [hex]

Explanation  CFS Service failed to get response [chars][hex] specify the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-GENERROR: [chars]

Explanation  CFS Service encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  CFS-3-LICERR: [chars]

Explanation  CFS Service failed to get license.

Recommended Action  No action is required.

Error Message  CFS-3-MTSERROR: [chars]

Explanation  CFS Service encountered an MTS error. [chars] specifies the context where the error occured.

Recommended Action  No action is required.

Error Message  CFS-3-PSSERROR: [chars]

Explanation  CFS Service encountered a PSS error. [chars] specifies the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-TIMEOUT_ERROR: [chars] [hex]

Explanation  CFS Service encountered a timeout [chars][hex] specify the context where the failure occured.

Recommended Action  No action is required.

CFS-4

Error Message  CFS-4-LICEXP: [chars]

Explanation  CFS Service license is going to expire. [chars] gives the expected time of expiry

Recommended Action  No action is required.

CFS-6

Error Message  CFS-6-SRVCREATED: CFS Service created

Explanation  CFS Service was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

CLK_MGR Messages

This section contains the CLK_MGR messages.

CLK_MGR-2

Error Message  CLK_MGR-2-CLK_MGR_FC2_CRIT: CLK_MGR critical error: [chars]

Explanation  CLK_MGR fc2 clock synchronization critical error

Recommended Action  No action is required.

CLK_MGR-5

Error Message  CLK_MGR-5-CLK_MGR_CLI_CONFIG: CLK_MGR clock is synchronized by [chars] from VDC [dec]

Explanation  CLK_MGR clock is synchronized by [chars] from VDC

Recommended Action  No action is required.

CLK_MGR-6

Error Message  CLK_MGR-6-CLK_MGR_TSTAMP_CHKS_DISABLED: CLK_MGR timestamp checks disabled: [chars]

Explanation  CLK_MGR timestamp checks disabled

Recommended Action  No action is required.

Error Message  CLK_MGR-6-CLK_MGR_TSTAMP_CHKS_ENABLED: CLK_MGR timestamp checks enabled

Explanation  CLK_MGR timestamp checks enabled

Recommended Action  No action is required.

CLOUD Messages

This section contains the CLOUD messages.

CLOUD-3

Error Message  CLOUD-3-CLOUD_CFS_MERGE_OPERATION_FAILED: [chars]

Explanation  [chars1]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CLOUD-3-CLOUD_CFS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CLOUD-3-CLOUD_FEATURE_MANAGER_ERROR: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for error using feature manager and rectify the problem

Error Message  CLOUD-3-CLOUD_PSS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the pss operation and rectify the problem

CLOUD-6

Error Message  CLOUD-6-CLOUD_DISCOVERY_DONE: discovery over

Explanation  Cloud-discovery started

Recommended Action  Check cloud membership

CMOND Messages

This section contains the CMOND messages.

CMOND-2

Error Message  CMOND-2-CMOND_ALERT_MSG: [chars]

Explanation  Alert message

Recommended Action  No action is required.

Error Message  CMOND-2-CMOND_ERROR_MSG: [chars]

Explanation  Error message

Recommended Action  No action is required.

COPP Messages

This section contains the COPP messages.

COPP-5

Error Message  COPP-5-COPP_DISABLED: COPP Disabled

Explanation  COPP Service Disabled

Recommended Action  No action is required.

Error Message  COPP-5-COPP_ENABLED: COPP Enabled

Explanation  COPP Service nabled

Recommended Action  No action is required.

Error Message  COPP-5-COPP_INIT: COPP initialized

Explanation  COPP Service Initialized

Recommended Action  No action is required.

DCEFIB Messages

This section contains the DCEFIB messages.

DCEFIB-SLOT#-2

Error Message  DCEFIB-SLOT#-2-U2FIB_ERR: [chars]

Explanation  L2mp unicast fib encountered an error:

Recommended Action  No action is required.

DCEFIB-SLOT#-6

Error Message  DCEFIB-SLOT#-6-U2FIB_INFO: [chars]

Explanation  L2mp unicast fib notice:

Recommended Action  No action is required.

DEV_LOG Messages

This section contains the DEV_LOG messages.

DEV_LOG-3

Error Message  DEV_LOG-3-ERROR: [chars]

Explanation  Dev_log_lc encountered an error

Recommended Action  No action is required.

DEV_LOG-SLOT#-4

Error Message  DEV_LOG-SLOT#-4-DEV_LOG_LC_ERROR: [chars]

Explanation  Dev_log_lc encountered an error

Recommended Action  No action is required.

DHCLIENT Messages

This section contains the DHCLIENT messages.

DHCLIENT-2

Error Message  DHCLIENT-2-DHCLIENT_DISCOVER_RECVD_NAK: [chars] - Received DHCP NAK

Explanation  Received DHCP NAK

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_DISCOVER_START: [chars] - DHCLIENT DHCP Discover phase started

Explanation  DHCLIENT DHCP Discover phase started

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_FAILURE: [chars]

Explanation  DHCLIENT Failure

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_FLASH_FULL: DHCLIENT bootflash doesn't have enough space (85% FULL)

Explanation  DHCLIENT bootflash doesn't have enough space (85% FULL)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_INITED: [chars] - DHCLIENT process initialized

Explanation  DHCLIENT process initialized

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_DOWNLOADED: [chars] - Successfully downloaded DHCLIENT script file

Explanation  Successfully downloaded DHCLIENT script file

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_NOT_VALIDATED: [chars] - DHCLIENT script execution started(MD5 not validated)

Explanation  DHCLIENT script execution started(MD5 not validated)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_VALIDATED: [chars] - DHCLIENT script execution started(MD5 validated)

Explanation  DHCLIENT script execution started(MD5 validated)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_VALIDATION_FAIL: [chars] - DHCLIENT boot file validation failed

Explanation  DHCLIENT boot file validation failed.

Recommended Action  No action is required.

DHCLIENT-4

Error Message  DHCLIENT-4-DHCLIENT_WARNING: [chars]

Explanation  DHCLIENT Warning

Recommended Action  No action is required.

DHCLIENT-5

Error Message  DHCLIENT-5-DHCLIENT_DISABLED: [chars] - DHCLIENT Disabled

Explanation  DHCLIENT Service Disabled

Recommended Action  No action is required.

Error Message  DHCLIENT-5-DHCLIENT_ENABLED: [chars] - DHCLIENT Enabled

Explanation  DHCLIENT Service nabled

Recommended Action  No action is required.

DHCLIENT-6

Error Message  DHCLIENT-6-DHCLIENT_INFO: [chars]

Explanation  DHCLIENT Info

Recommended Action  No action is required.

DHCLIENT-7

Error Message  DHCLIENT-7-DHCLIENT_DEBUG: [chars]

Explanation  DHCLIENT Debug

Recommended Action  No action is required.

DHCP_SNOOP Messages

This section contains the DHCP_SNOOP messages.

DHCP_SNOOP-2

Error Message  DHCP_SNOOP-2-BD_LABEL_FAILURE: Unable to allocate BD label.

Explanation  Unable to allocate BD label.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-DHCP_SNOOP_PROGRAM_EXIT: [chars]

Explanation  DHCP snoop process did an abnormal exit

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-DHCP_SNOOP_Q_FULL: [chars]

Explanation  DHCP snoop process received QUEUE FULL Notification from MTS

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-DHCP_SNOOP_Q_HIGH: [chars]

Explanation  DHCP snoop process received QUEUE HIGH Notification from MTS

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-IFACL_LABEL_FAILURE: Unable to allocate IFACL label.

Explanation  Unable to allocate IFACL label.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-INITFAIL: DHCP Daemon Initialization failed: [chars]

Explanation  DHCP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-PSSERROR: [chars]

Explanation  DHCP Daemon encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

DHCP_SNOOP-3

Error Message  DHCP_SNOOP-3-ASSERTION_FAILED: [chars]:[dec]

Explanation  DHCP Snoop process has hit an assert condition at file [chars] line number [dec]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-IPV6APIINIT_FAILED: [chars]

Explanation  DHCP Snoop process failed to do ipv6_api_init [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-IPV6REGISTER_FAILED: [chars]

Explanation  DHCP Snoop process failed to do ipv6_register [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-MTSERROR: [chars]

Explanation  DHCP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

DHCP_SNOOP-5

Error Message  DHCP_SNOOP-5-VLANENABLE: DHCP Snooping enabled on vlan [dec]

Explanation  DHCP Snooping was enabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

DHCP_SNOOP-6

Error Message  DHCP_SNOOP-6-DHCPUP: DHCP Daemon Up.

Explanation  DHCP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INTFDISABLE: IP Src Guard disabled on intf [chars]

Explanation  IP Src Guard was disabled on a given intf. [chars] is the intf-ID string that identifies the intf. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INTFENABLE: IP Src Guard enabled on intf [chars]

Explanation  IP Src Guard was enabled on a given intf. [chars] is the intf-ID string that identifies the intf. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-OPT82INSTFAIL: [chars] [chars]

Explanation  Insertion of Option82 suboptions failed. [chars] tells the failure. [chars] explains the reason for failure. This is an informational message.

Recommended Action  No action is required.

DIAG_PORT_LB Messages

This section contains the DIAG_PORT_LB messages.

DIAG_PORT_LB-5

Error Message  DIAG_PORT_LB-5-DIAG_PORT_LB_DISABLED: DIAG_PORT_LB Disabled

Explanation  DIAG_PORT_LB Service Disabled

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-5-DIAG_PORT_LB_ENABLED: DIAG_PORT_LB Enabled

Explanation  DIAG_PORT_LB Service Enabled

Recommended Action  No action is required.

DOT1X Messages

This section contains the DOT1X messages.

DOT1X-5

Error Message  DOT1X-5-DOT1X_DISABLED: dot1x Disabled

Explanation  Dot1x Service Disabled

Recommended Action  No action is required.

Error Message  DOT1X-5-DOT1X_ENABLED: dot1x Enabled

Explanation  Dot1x Service Enabled

Recommended Action  No action is required.

Error Message  DOT1X-5-DOT1X_NOTIF: [chars]

Explanation  Dot1x Notification

Recommended Action  No action is required.

DSTATS Messages

This section contains the DSTATS messages.

DSTATS-3

Error Message  DSTATS-3-PSS_CREATE_FAIL: pss create runtime database failed due to error: [hex]

Explanation  Dstats process pss create runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_DELETE_FAIL: pss delete runtime entry key:[hex] failed due to error: [hex]

Explanation  Dstats process pss delete runtime entry key [hex] failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_MAX_KEY_FAIL: pss set runtime max key failed due to error: [hex]

Explanation  Dstats process pss set runtime max key failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_MAX_VALUE_FAIL: pss set runtime max value failed due to error: [hex]

Explanation  Dstats process pss set runtime max value failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_OPEN_FAIL: pss open runtime database failed due to error: [hex]

Explanation  Dstats process pss open runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_RELOAD_FAIL: pss reload runtime database failed due to error: [hex]

Explanation  Dstats process pss reload runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_SNAPSHOT_DEBUG_FAIL: pss snapshot runtime debug to uri:[chars] failed due to error: [hex]

Explanation  Dstats process pss snapshot of runtime debug to uri [string] failed due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_SNAPSHOT_FAIL: pss snapshot runtime to uri:[chars] failed due to error: [hex]

Explanation  Dstats process pss snapshot of runtime to uri [string] failed due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_STORE_FAIL: pss store runtime entry key:[hex] val:[hex] failed due to error: [hex]

Explanation  Dstats process pss store runtime entry key [hex] value [hex] failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

EOU Messages

This section contains the EOU messages.

EOU-5

Error Message  EOU-5-L2NAC_DISABLED: EOU Disabled

Explanation  Service EOU Disabled

Recommended Action  No action is required.

Error Message  EOU-5-L2NAC_ENABLED: EOU Enabled

Explanation  Service EOU enabled

Recommended Action  No action is required.

EPLD_UPGRADE Messages

This section contains the EPLD_UPGRADE messages.

EPLD_UPGRADE-2

Error Message  EPLD_UPGRADE-2-ACTIVE_SINGLE_SUP_UPGRADE: install all epld does not upgrade Active Supervisor module [dec].

Explanation  Install all epld does not upgrade Active Supervisor in a switch with a single supervisor.

Recommended Action  No action is required.

Error Message  EPLD_UPGRADE-2-ACTIVE_SUP_UPGRADE: install all epld does not upgrade Active Supervisor module [dec]. Please do a switchover and upgrade the EPLDs on module [dec].

Explanation  Install all epld did not upgrade Active Supervisor.

Recommended Action  No action is required.

EPP Messages

This section contains the EPP messages.

EPP-5

Error Message  EPP-5-EPP_FAILURE: Interface [chars] EPP Failure

Explanation  Trunk protocol failed

Recommended Action  'show epp internal event-history err' will indicate the errors encountered

ETH-PORT-SEC Messages

This section contains the ETH-PORT-SEC messages.

ETH-PORT-SEC-2

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_ADDR_SEEN: MAC address already secured on peer-switch. Please re-configure after VPC comes up, if this interface is supposed to be a VPC PO

Explanation  Mac already secured on peer

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_MISCONFIG: MAC Addresses present exceed the allowed number of MAC addresses on Port [chars]. Fix the inconsistency on this port.

Explanation  MAC Addresses present exceed the allowed number of MAC addresses.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_REGMAC_ADD_FAIL: Unable to add regmac [chars] for <[chars], vlan [dec]> since it is already registered for <[chars], vlan [dec]>

Explanation  Duplicate regmac detected

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_SECURITY_VIOLATION: Triggered violation [chars] on Port [chars]

Explanation  Violation action triggered on port due to security violation.

Recommended Action  No action is required.

ETH-PORT-SEC-3

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_CONFIG_MAC_FAILED: Failed to configure MACs

Explanation  Failed to configure MACs

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_INVALID_VLAN: Invalid VLAN configuration

Explanation  Invalid VLAN configuration

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_PKTSENDFAIL: Failed to send packet, - [chars]

Explanation  Failed to send packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_SECURITY_VIOLATION_ANOTHER_PORT: Host [chars] bound to Port [chars] in Vlan [dec] is trying to access Port [chars] in Vlan [dec]

Explanation  Moved the port to violation state due to a mac address seen on one port being seen on another

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_SECURITY_VIOLATION_MAX_MAC_VLAN: Port [chars] moved to [chars] state as host [chars] is trying to access the port in vlan [dec]

Explanation  Moved the port to violation state due to exceeding address count

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_UNABLE_TO_DISABLE: Unable to disable eth_port_sec [chars].

Explanation  Unable to disable eth_port_sec Service

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_UNABLE_TO_ENABLE: Unable to enable eth_port_sec [chars].

Explanation  Unable to enable eth_port_sec Service

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_VIOL_UPDATE_FAILED: Failed to update violation mode

Explanation  Failed to update violation mode

Recommended Action  No action is required.

ETH-PORT-SEC-5

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_AGE_TIME_EXPIRY: Age Time expired for host [chars] in VLAN [dec] in port [chars]

Explanation  Age time expired for host

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_DISABLED: eth_port_sec Disabled on if_index:[hex]

Explanation  Eth_port_sec Service Disabled

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_DYNAMIC_MAC_ADDRESS_CLEARED: Dynamic MAC addresses for port [chars] cleared

Explanation  Dynamic MAC address for port cleared

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_ENABLED: eth_port_sec Enabled on if_index:[hex]

Explanation  Eth_port_sec Service Enabled

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_HOST_ADDITION: A new Host [chars] learnt on Port [chars] in Vlan [dec]

Explanation  A new host is learnt on a port

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_HOST_DELETION: Host [chars] bound to secure port [chars] in Vlan [dec] has been removed

Explanation  A host has been removed

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_INITFAIL: Eth Port Security Initialization failed: [chars]

Explanation  Eth Port Security Initialization failed.[chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_MAX_LIMIT_EXCEED: Max Addr per port config cannot be accepted as it will violate the System Max limit. [chars]

Explanation  System wide Max Limit Exceeds

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_PORT_SEC_ENABLED_PARTIALLY: Port security enabled partially in configuration on this vpc port, port security is not enabled operationally since peer VPC port doesnt have port security enabled.

Explanation  Port security enabled partially in configuration

Recommended Action  No action is required.

ETH_PORT_CHANNEL Messages

This section contains the ETH_PORT_CHANNEL messages.

ETH_PORT_CHANNEL-3

Error Message  ETH_PORT_CHANNEL-3-ADD_REM_MEMBERS_FAILURE: [chars]

Explanation  Some service(s) failed to add or remove ports to port-channel

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-CLEAR_PORT_CLIENT_STATS_FAILURE: [chars]

Explanation  Failed to clear stats for port [chars] err: [hex] ([chars])

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-3-RESOURCE_ALLOC_FAILED_PORT_CHANNEL_DELETED: [chars] deleted

Explanation  Port-channel deleted from running config

Recommended Action  May need to re-configure the port-channel and its members

Error Message  ETH_PORT_CHANNEL-3-SHADOW_MBR_CHANGE_FAILURE: [chars]

Explanation  Some service failed shadow member change to port-channel

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_PC_CREATE_FAILURE: [chars]

Explanation  Some service failed shadow port-channel create

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_PC_DELETE_FAILURE: [chars]

Explanation  Some service failed shadow port-channel delete

Recommended Action  None

ETH_PORT_CHANNEL-4

Error Message  ETH_PORT_CHANNEL-4-PORT_CFG_DELETED: [chars] removed from [chars] (different module inserted)

Explanation  Port is removed from a port-channel because a different module was inserted to the same slot

Recommended Action  You lost some ports from port-channel, check if you want to add ports in the new module to the same port-channel.

Error Message  ETH_PORT_CHANNEL-4-RACE_WARN: [chars]

Explanation  Warning of possible race condition

Recommended Action  No action is required.

ETH_PORT_CHANNEL-5

Error Message  ETH_PORT_CHANNEL-5-CREATED: [chars] created

Explanation  A port-channel is created

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-DELETED: [chars] deleted

Explanation  A port-channel is deleted

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_ADDED: [chars] added to [chars]

Explanation  Ports are added to a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_REMOVED: [chars] removed from [chars]

Explanation  Ports are removed from a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_WAIT_BFD: [chars] waiting for BFD session to get established

Explanation  Port waiting for BFD session establishment

Recommended Action  None

FABRICPATH Messages

This section contains the FABRICPATH messages.

FABRICPATH-2

Error Message  FABRICPATH-2-FABRICPATH_LINK_BRINGUP_STALLED_STATIC: Link bringup stalled due to conflicts: [chars]

Explanation  Interface is disabled due to conflicts

Recommended Action  No action is required.

FC-TUNNEL Messages

This section contains the FC-TUNNEL messages.

FC-TUNNEL-3

Error Message  FC-TUNNEL-3-INTERNAL_ERROR: Internal error: [chars]

Explanation  FCMPLS tunnel process encountered a general error, one that does not fall in any of the categories. [chars] describes the error and its context.

Recommended Action  No action is required.

FEATURE-MGR Messages

This section contains the FEATURE-MGR messages.

FEATURE-MGR-6

Error Message  FEATURE-MGR-6-FM_FSET_VMM_OP_ERROR: [chars]

Explanation  The error seen at FM and VMM interaction

Recommended Action  Please contact FM/VMM team

FEX Messages

This section contains the FEX messages.

FEX-2

Error Message  FEX-2-FEXCONFIG_ON_VPC: A green start is a must after ISSU for VPC config on FPC([hex]) for AA-FEX bringup. Please ignore if you already reloaded the switch after upgrading to version >= 7.0.3(I5)2

Explanation  Green start (post ISSU) is a must to ensure programming correctness before configuring AA-FEXes

Recommended Action  No action is required.

Error Message  FEX-2-FEX_NOT_ONLINE_SUP_ISSU: FEX [dec] did not come online after SUP ISSU

Explanation  FEX did not come online after sup ISSU

Recommended Action  No action is required.

Error Message  FEX-2-FEX_OFFLINE: FEX [dec] has gone OFFLINE

Explanation  FEX has gone OFFLINE

Recommended Action  No action is required.

Error Message  FEX-2-FEX_ONLINE: FEX [dec] has come ONLINE

Explanation  FEX has come ONLINE

Recommended Action  No action is required.

Error Message  FEX-2-NOHMS_ENV_FEX_OFFLINE: [chars]

Explanation  Fex off-line

Recommended Action  Show inventory

Error Message  FEX-2-NOHMS_ENV_FEX_ONLINE: [chars]

Explanation  Fex on-line

Recommended Action  Show inventory

FEX-4

Error Message  FEX-4-FEX_SCALING_LIMITS_REACHED: You have exceeded the advisable FEX scaling limits.

Explanation  More FEX/FEX ports in the system than recommended by Cisco.

Recommended Action  No action is required.

FEX-5

Error Message  FEX-5-FEX_DISABLED: FEX Disabled

Explanation  FEX Service Disabled

Recommended Action  No action is required.

Error Message  FEX-5-FEX_ENABLED: FEX Enabled

Explanation  FEX Service Enabled

Recommended Action  No action is required.

Error Message  FEX-5-FEX_LOG_COPY: [chars]

Explanation  Fex log copy information

Recommended Action  No action is required.

Error Message  FEX-5-SATMGR_DISABLE_FAILED: Disabling of feature FEX failed. Please remove FEX related configs from interfaces

Explanation  Disabling of FEX feature failed

Recommended Action  No action is required.

FS-DAEMON Messages

This section contains the FS-DAEMON messages.

FS-DAEMON-6

Error Message  FS-DAEMON-6-FSD_ENOSPC_LOGFLASH: System logflash usage has reached [dec]%. You may delete some old files on logflash to free up space

Explanation  System logflash space is almost full

Recommended Action  Use 'clear core archived' or 'delete' CLI to free up space on logflash

Error Message  FS-DAEMON-6-FSD_ENOSPC_ROOT: System root usage has reached [dec]%. You may delete some old files from root or /var/log to free up space

Explanation  System root space is almost full

Recommended Action  Use 'clear core archived' or 'delete' CLI to free up space on root dir or /var/log

Error Message  FS-DAEMON-6-FSD_ENOSPC_TMP: System temporary directory usage has reached [dec]%.

Explanation  System /tmp space usage.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FS-DAEMON-6-FSD_REEXPORT_NFS: Re-exported NFS mounts

Explanation  Exported NFS mounts are not visible in kernel and had to be reexported

Recommended Action  Please use 'show system internal flash' to make sure there are no Stale NFS handles

GLBP Messages

This section contains the GLBP messages.

GLBP-2

Error Message  GLBP-2-GLBP_URIB_INIT_ERROR: [chars]

Explanation  Unicast routing initialization failed and the GLBP process terminated

Recommended Action  Please check syslog messages for URIB failures and rectify the problem

GLBP-3

Error Message  GLBP-3-GLBP_FEATURE_MANAGER_ERROR: [chars]: [chars]

Explanation  There was a problem in GLBP interaction with feature manager.

Recommended Action  Please check the reason for error using feature manager and rectify the problem

HSRP_ENGINE Messages

This section contains the HSRP_ENGINE messages.

HSRP_ENGINE-3

Error Message  HSRP_ENGINE-3-NOSOCKET: Unable to open socket

Explanation  The system was unable to initialize an IP connection for the Hot Standby protocol.

Recommended Action  Make sure that there is at least one interface configured to run IP.

IKE Messages

This section contains the IKE messages.

IKE-3

Error Message  IKE-3-IKE_PROGRAM_EXIT: [chars]

Explanation  IKE process did an abnormal exit

Recommended Action  No action is required.

IMP Messages

This section contains the IMP messages.

IMP-5

Error Message  IMP-5-IMP_DISABLED: IMP Disabled

Explanation  IMP Service Disabled

Recommended Action  No action is required.

Error Message  IMP-5-IMP_ENABLED: IMP Enabled

Explanation  IMP Service nabled

Recommended Action  No action is required.

INTERFACE_VLAN Messages

This section contains the INTERFACE_VLAN messages.

INTERFACE_VLAN-4

Error Message  INTERFACE_VLAN-4-SVI_IF_CONFIG_DELETED_NOTIF_DELAYED_DROPPED: Interface VLAN Delete Notification Not Processed on Time by SAP [dec] ([chars])

Explanation  This SAP took long time in processing Interface VLAN delete notification and caused timeout

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-4-SVI_IF_CONFIG_REMOVED_NOTIF_DELAYED_DROPPED: Interface VLAN Remove Notification Not Processed on Time by SAP [dec] ([chars])

Explanation  This SAP took long time in processing Interface VLAN remove notification and caused timeout

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-4-SVI_VLAN_DOES_NOT_EXIST: Vlan [dec] does not exist

Explanation  Vlan not created before assignment

Recommended Action  Interface-vlan

Error Message  INTERFACE_VLAN-4-SVI_WARN_SVI_UP_IN_NON_ROUTABLE_VDC: Interface VLAN [dec] is being kept up in non-routable VDC. Reason: management configuration enabled. Please disable all the routing protocols

Explanation  Keeping Interface VLAN up in non-routable VDC may cause potenital traffic blackhole

Recommended Action  No action is required.

INTERFACE_VLAN-5

Error Message  INTERFACE_VLAN-5-IF_DOWN_ADMIN_DOWN: Interface [chars] is down(Administratively Down)

Explanation  Interface has been configured to be administratively down

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-IF_DOWN_ERROR_DISABLED: Interface [chars] is down. Reason [dec]

Explanation  The interface encountered an error while configuring it

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-IF_DOWN_INACTIVE: Interface [chars] is down (Inactive)

Explanation  Interface VLAN has been suspended or deleted

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_DISABLED: SVI Disabled

Explanation  SVI Service Disabled

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_ENABLED: SVI Enabled

Explanation  SVI Service Enabled

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_GET_MAC_FAILED: Failed to acquire MAC address for SVI [hex]

Explanation  SVI failed to acquire MAC address

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_INIT: SVI intialization failed with error [hex]

Explanation  SVI initialziation error

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_IOD_RELEASE_ERROR_RESPONSE: IM failed to release SVI IOD error [hex]

Explanation  IM failed to release SVI IOD

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_MTS_SEND_FAILURE: MTS send failure for opcode [dec], error [hex]

Explanation  SVI encountered an error in with MTS message

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_MTS_TIME_OUT: MTS send timed out for rrtoken [hex], vlans [chars]

Explanation  SVI did not recieve response for mts message

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_RSRVD_VLAN_FAILED: Failed to get list of reserved vlans [hex]

Explanation  SVI failed to get the list reserved vlans

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_SDB_UPDATE_FAILED: sdb update failed with ret_val [dec]

Explanation  SDB updated failed for SVI

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_SEC_VLAN_FAILED: Failed to get list of secondary vlans [hex]

Explanation  SVI failed to get the list of secondary vlans

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-UPDOWN: Line Protocol on Interface [chars], changed state to [chars]

Explanation  Line protocol status changed for an interface

Recommended Action  No action is required.

IOA_LC Messages

This section contains the IOA_LC messages.

IOA_LC-5

Error Message  IOA_LC-5-IOA_DISABLED: IOA Disabled

Explanation  IOA Service Disabled

Recommended Action  No action is required.

Error Message  IOA_LC-5-IOA_ENABLED: IOA Enabled

Explanation  IOA Service nabled

Recommended Action  No action is required.

IPSEC Messages

This section contains the IPSEC messages.

IPSEC-5

Error Message  IPSEC-5-IPSEC_DISABLED: IPSec Disabled

Explanation  IPSec Disabled

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_ENABLED: IPSec Enabled

Explanation  IPSec Enabled

Recommended Action  No action is required.

ISCM Messages

This section contains the ISCM messages.

ISCM-2

Error Message  ISCM-2-ITD_BUCKET_COUNT_EXCEEDS_LIMIT: Cannot perform the action -ITD failaction reassign/ configure- Service=[chars], from node=[dec], to node=[dec]: total number of buckets exceed limit of [dec] per node

Explanation  Number of buckets assigned to a node cannot exceed 32.

Recommended Action  Fix node failure to recoved bucket reassignment

ISCM-4

Error Message  ISCM-4-NOT_ENOUGH_TRACKS: not enough tracks for service [chars] device-group [chars]

Explanation  Not enough tracks available for ITD

Recommended Action  Free tracks, then re-enable the service

LACP Messages

This section contains the LACP messages.

LACP-3

Error Message  LACP-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

LACP-5

Error Message  LACP-5-LACP_DISABLED: LACP Disabled

Explanation  LACP Service Disabled

Recommended Action  No action is required.

Error Message  LACP-5-LACP_ENABLED: LACP Enabled

Explanation  LACP Service Enabled

Recommended Action  No action is required.

LC-SPAN Messages

This section contains the LC-SPAN messages.

LC-SPAN-3

Error Message  LC-SPAN-3-ERROR: [chars]

Explanation  Lc_span_mgr encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LDAP Messages

This section contains the LDAP messages.

LDAP-3

Error Message  LDAP-3-LDAP_ERROR_MESSAGE: [chars]

Explanation  LDAP Error Message

Recommended Action  No action is required.

LDAP-5

Error Message  LDAP-5-LDAP_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Ldap server monitor status change

Recommended Action  No action is required.

Error Message  LDAP-5-LDAP_SERVER_STATUS: [chars] server [chars] with port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Ldap server status change

Recommended Action  No action is required.

LDAP-6

Error Message  LDAP-6-LDAP_MESSAGE: [chars]

Explanation  LDAP Message

Recommended Action  No action is required.

LDP Messages

This section contains the LDP messages.

LDP-5

Error Message  LDP-5-LDP_DISABLED: LDP Disabled

Explanation  MPLS_LDP Service Disabled

Recommended Action  No action is required.

Error Message  LDP-5-LDP_ENABLED: LDP Enabled

Explanation  MPLS_LDP Service nabled

Recommended Action  No action is required.

LICMGR Messages

This section contains the LICMGR messages.

LICMGR-3

Error Message  LICMGR-3-LOG_LIC_SERVER_DOWN: License Server Down [dec]

Explanation  A connection to the license server was lost.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LICMGR-6

Error Message  LICMGR-6-LOG_LIC_FEATURE_CLEARED: Cleared [dec] license(s) for feature [chars].

Explanation  Uninstalled [dec] license(s) for feature [chars].

Recommended Action  Use the 'show license usage' command to verify this license feature removal.

Error Message  LICMGR-6-LOG_LIC_FEATURE_INSTALLED: Installed [dec] license(s) for feature [chars].

Explanation  Installed [dec] license(s) for feature [chars].

Recommended Action  Use the 'show license usage' command to verify this license feature installation.

Error Message  LICMGR-6-LOG_LIC_LICENSE_CLEARED: Cleared license file [chars].

Explanation  Uninstalled the named license file.

Recommended Action  Use the 'show license' command to verify this license removal.

Error Message  LICMGR-6-LOG_LIC_LICENSE_INSTALLED: Installed license file [chars].

Explanation  Installed the named license file.

Recommended Action  Use the 'show license' command to verify this license installation.

LLDP Messages

This section contains the LLDP messages.

LLDP-5

Error Message  LLDP-5-LLDP_DISABLED: LLDP Disabled

Explanation  LLDP Service Disabled

Recommended Action  No action is required.

Error Message  LLDP-5-LLDP_ENABLED: LLDP Enabled

Explanation  LLDP Service Enabled

Recommended Action  No action is required.

MCAST Messages

This section contains the MCAST messages.

MCAST-2

Error Message  MCAST-2-SHUTDOWN: Process shutting down: [chars]

Explanation  Mcast is shutting down

Recommended Action  The action depends on the situation. The multicast process can shut down gracefully because of a system restart (in which case no action needs to take place) or because of a failure. The message associated with the syslog should be self explanatory to understand the reason for the shutdown. If the process is able to restart properly, there is no immediate harm for the system stability and the suggested action is to report the syslog event together with an explanation of the operations most recently performed on the system.

MCAST-4

Error Message  MCAST-4-ERROR: [chars]

Explanation  Mcast encountered a generic error

Recommended Action  No action is required.

MCAST-5

Error Message  MCAST-5-START: Process has been started

Explanation  Mcast has been started

Recommended Action  No action is required.

MCECTEST Messages

This section contains the MCECTEST messages.

MCECTEST-3

Error Message  MCECTEST-3-ASSERTION_FAILED: [chars]

Explanation  MCECTEST has hit an assert condition at file [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-INIT_FAIL: [chars]

Explanation  MCECTEST Initialization failed. due to [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-INTERNAL_ERR: [chars]

Explanation  MCECTEST encountered an internal error due to [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-MTS_ERR: [chars]

Explanation  MCECTEST encountered an MTS error due to [chars]

Recommended Action  No action is required.

MCECTEST-5

Error Message  MCECTEST-5-MCECTEST_DISABLED: MCECTEST Disabled

Explanation  MCECTEST Service Disabled

Recommended Action  No action is required.

Error Message  MCECTEST-5-MCECTEST_ENABLED: MCECTEST Enabled

Explanation  MCECTEST Service enabled

Recommended Action  No action is required.

MCECTEST-6

Error Message  MCECTEST-6-INTERNAL_INFO: [chars]

Explanation  MCECTEST got an internal info [chars]

Recommended Action  No action is required.

MCM Messages

This section contains the MCM messages.

MCM-2

Error Message  MCM-2-MCM_CRITICAL_ERROR: Internal Critical Error

Explanation  Some critical error

Recommended Action  No action is required.

MCM-5

Error Message  MCM-5-MCM_SDB_UPDATE_FAILED: sdb update failed with ret_val [dec]

Explanation  SDB updated failed for MCM

Recommended Action  No action is required.

NAT Messages

This section contains the NAT messages.

NAT-2

Error Message  NAT-2-HW_PROG_FAILED: Hardware programming for NAT failed:[chars]([dec])

Explanation  NAT software encountered an error while programming the hardware to do NAT translation

Recommended Action  No action is required.

NAT-3

Error Message  NAT-3-HW_PROG_ERROR: ITD NAT [chars], not enough free tcam space.

Explanation  NAT software identified an error while attempting to programming the tcam for ITD.

Recommended Action  No action is required.

NAT-4

Error Message  NAT-4-HW_PROG_WARNING: ITD NAT [chars], not enough free tcam space.

Explanation  NAT software identified there might be an error while attempting to programming the tcam for ITD.

Recommended Action  No action is required.

NAT-5

Error Message  NAT-5-NAT_LOG_DISABLED: [chars] license not installed or expired

Explanation  NAT needs license to run

Recommended Action  No action is required.

Error Message  NAT-5-NAT_LOG_ENABLED: [chars] license installed

Explanation  NAT needs license to run

Recommended Action  No action is required.

NFP Messages

This section contains the NFP messages.

NFP-SLOT#-2

Error Message  NFP-SLOT#-2-FTEC_DDB_ERR: [chars]([dec]): fte ddb error.[chars] [hex]

Explanation  Fte ddb error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-FTEC_ERR: [chars]([dec]): fte error.[chars] [hex]

Explanation  Fte error occured

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_ACL_ERR: [chars]([dec]): acl error. [chars]

Explanation  Acl error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_DDB_ERR: [chars]([dec]): ddb error.[chars] [hex]

Explanation  Ddb error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_ERR: [chars]([dec]): nfp error. [chars]

Explanation  Nfp error occured

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_FIB_ERR: [chars]([dec]): fib error. [chars]

Explanation  Fib error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_NDE_ERR: [chars]([dec]): nde error. [chars]

Explanation  Nde error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_NFM_ERR: [chars]([dec]): nfm error. [chars]

Explanation  Nfm error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_QOS_ERR: [chars]([dec]): qos error. [chars]

Explanation  Qos error

Recommended Action  No DDTS.

NFP-SLOT#-5

Error Message  NFP-SLOT#-5-NF_INFO: [chars]

Explanation  Info

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NPV Messages

This section contains the NPV messages.

NPV-3

Error Message  NPV-3-ACL_UPDATE_FAILED: [chars]

Explanation  ACL update request initiated by the NPV process has failed

Recommended Action  No action is required.

Error Message  NPV-3-CLEAR_FAILED: [chars]

Explanation  An error occurred while clearing the lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-COMMIT_FAILED: [chars]

Explanation  An error occurred while committing configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-COMMIT_PARTIALLY_FAILED: [chars]

Explanation  An error occurred while committing configuration. Configuration could not be committed on some switches. The reason for the failure : [chars]. Configuration can be inconsistent in the fabric.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-COMMIT_REJECTED: [chars]

Explanation  Commit request received from remote switch is rejected. The reason for the failure: [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-FC2_SEND_FAILED: [chars]

Explanation  NPV process could send an FC2 message.

Recommended Action  No action is required.

Error Message  NPV-3-F_RJT_SENT: [chars]

Explanation  NPV process sent an F_RJT frame.

Recommended Action  No action is required.

Error Message  NPV-3-INTERNAL_ERROR: Internal error: [chars]

Explanation  NPV process encountered a general error, one that does not fall in any of the categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  NPV-3-LCP_PROGRAMMING_FAILED: [chars]

Explanation  LCP programming request initiated by the NPV process has failed

Recommended Action  No action is required.

Error Message  NPV-3-LOCK_FAILED: [chars]

Explanation  An error occurred while acquiring the lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-LS_RJT_RCVD: [chars]

Explanation  NPV process received an LS_RJT frame.

Recommended Action  No action is required.

Error Message  NPV-3-LS_RJT_SENT: [chars]

Explanation  NPV process sent an LS_RJT frame.

Recommended Action  No action is required.

Error Message  NPV-3-MALLOC_FAILED: [chars]

Explanation  NPV process could not allocate memory

Recommended Action  No action is required.

Error Message  NPV-3-MERGE_ACTIVATION_FAILED: [chars]

Explanation  An error occurred while activating merged configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-MERGE_FAILED: [chars]

Explanation  An error occurred while merging configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-MTS_SEND_FAILED: [chars]

Explanation  NPV process could not send an MTS message.

Recommended Action  No action is required.

Error Message  NPV-3-NPIV_DISABLE_FAILED: [chars]

Explanation  NPIV feature could not be disabled.

Recommended Action  No action is required.

Error Message  NPV-3-NPIV_NOT_SUPPORTED: [chars]

Explanation  Nexus 9000 platform supports FCOE-NPV only. So, NPIV feature has no meaning in this platform

Recommended Action  No action is required.

Error Message  NPV-3-NPV_UPLINK_UNSTABLE: [chars]

Explanation  Atleast one of the external interface is unstable. Loadbalancing across uplink requires stable links

Recommended Action  No action is required.

Error Message  NPV-3-PORT_BRINGUP_FAILED: [chars]

Explanation  NPV process has failed to bringup the port

Recommended Action  No action is required.

Error Message  NPV-3-PORT_REINIT_FAILED: [chars]

Explanation  Port reinit request initiated by the NPV process has failed

Recommended Action  No action is required.

Error Message  NPV-3-UNLOCK_FAILED: [chars]

Explanation  An error occurred while releasing the lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NPV-5

Error Message  NPV-5-FRAME_DISCARDED: [chars]

Explanation  NPV process discarded an FC2 frame.

Recommended Action  No action is required.

Error Message  NPV-5-UNEXPECTED_EVENT: [chars]

Explanation  NPV process has received an unexpected event in the current state.

Recommended Action  No action is required.

NPV-6

Error Message  NPV-6-ABTS_SENT: [chars]

Explanation  NPV process sent an ABTS frame.

Recommended Action  No action is required.

Error Message  NPV-6-ELS_CMD_SENT_TO_CORE: [chars]

Explanation  NPV process sent an ELS frame to the core switch.

Recommended Action  No action is required.

Error Message  NPV-6-ELS_CMD_SENT_TO_SRV: [chars]

Explanation  NPV process sent an ELS frame to the server.

Recommended Action  No action is required.

Error Message  NPV-6-EXT_IF_SELECTED: [chars]

Explanation  NPV process has selected an external interface to forward either all frames received on a server interface or frames received from a specific port WWN.

Recommended Action  No action is required.

Error Message  NPV-6-FABRIC_PROXY_LOGO_SENT: [chars]

Explanation  NPV process sent a LOGO frame to the device as the corresponding external interface went down.

Recommended Action  No action is required.

Error Message  NPV-6-FDISC_RCVD: [chars]

Explanation  NPV process received an FDISC frame.

Recommended Action  No action is required.

Error Message  NPV-6-FDISC_SENT: [chars]

Explanation  NPV process sent an FDISC frame to the core switch.

Recommended Action  No action is required.

Error Message  NPV-6-FLOGI_RCVD: [chars]

Explanation  NPV process received an FLOGI frame.

Recommended Action  No action is required.

Error Message  NPV-6-INTERNAL_FLOGI_SENT: [chars]

Explanation  NPV process sent an internal FLOGI frame to the core switch on an external interface.

Recommended Action  No action is required.

Error Message  NPV-6-LOGO_RCVD: [chars]

Explanation  NPV process received a LOGO frame.

Recommended Action  No action is required.

Error Message  NPV-6-LOGO_SENT: [chars]

Explanation  NPV process sent a LOGO frame.

Recommended Action  No action is required.

Error Message  NPV-6-LS_ACC_RCVD: [chars]

Explanation  NPV process received an LS_ACC frame.

Recommended Action  No action is required.

Error Message  NPV-6-LS_ACC_SENT: [chars]

Explanation  NPV process sent an LS_ACC frame.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_NOTIF_RCVD: [chars]

Explanation  NPV process received an MTS notification.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_NOTIF_SENT: [chars]

Explanation  NPV process sent an MTS notification.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_REQ_RCVD: [chars]

Explanation  NPV process received an MTS request.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_REQ_SENT: [chars]

Explanation  NPV process sent an MTS request.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_RESP_RCVD: [chars]

Explanation  NPV process received an MTS response.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_RESP_SENT: [chars]

Explanation  NPV process sent an MTS response.

Recommended Action  No action is required.

Error Message  NPV-6-NPIV_DISABLED: [chars]

Explanation  NPIV feature has been disabled.

Recommended Action  No action is required.

Error Message  NPV-6-NPIV_ENABLED: [chars]

Explanation  NPIV feature has been enabled.

Recommended Action  No action is required.

Error Message  NPV-6-NPV_ENABLE_DISABLE_IN_PROGRESS: [chars]

Explanation  NPV feature enable/disable is in progress. This syslog is printed at the beginning of various significant phases.

Recommended Action  No action is required.

Error Message  NPV-6-SERVER_PROXY_LOGO_SENT: [chars]

Explanation  NPV process sent a LOGO frame to the core switch as the server interface went down.

Recommended Action  No action is required.

NPV-7

Error Message  NPV-7-CFS_REQ_RCVD: [chars]

Explanation  CFS request is received. The WWN of the switch originated this request and the rr-token of the request are provided in the syslog message.

Recommended Action  No action is required.

Error Message  NPV-7-CFS_RESP_SENT: [chars]

Explanation  CFS response is sent. The rr-token of the corresponding request and the status are provided in the syslog message

Recommended Action  No action is required.

NTP Messages

This section contains the NTP messages.

NTP-2

Error Message  NTP-2-NTP_SYSLOG_CRIT_ERR: : [chars]

Explanation  NTP syslog Critial Error : [chars].

Recommended Action  No action is required.

Error Message  NTP-2-NTP_SYSLOG_INIT_FAIL: : [chars] [chars]

Explanation  NTP Initialization Failed: [chars] [chars].

Recommended Action  No action is required.

Error Message  NTP-2-NTP_SYSLOG_NO_RESP_FROM_LC: from LC[dec] for [chars]

Explanation  NTP did not receive response from the linecard for the request sent.

Recommended Action  No action is required.

NTP-3

Error Message  NTP-3-NTP_SYSLOG_ALLOC_FAIL: : [chars]

Explanation  NTP syslog allocation failed : [chars].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_ERR_EXT: : [chars] [chars]

Explanation  NTP syslog Error Exit : [chars] [dec].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_ERR: : [chars]

Explanation  NTP syslog Error : [chars].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_MTS_ERR: : [chars]

Explanation  NTP MTS Error : [chars].

Recommended Action  No action is required.

NTP-6

Error Message  NTP-6-NTP_SYSLOG_CREATED: : [chars]; Slot No: [dec]

Explanation  NTP syslog created : [chars] [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_EXIT: : [chars]

Explanation  NTP syslog Exit : [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_LOGGING: : [chars]

Explanation  NTP logging : [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_WARN: : [chars]

Explanation  NTP syslog Warning : [chars].

Recommended Action  No action is required.

OTM Messages

This section contains the OTM messages.

OTM-2

Error Message  OTM-2-OTM_EEM_FAIL: OTM failed to register with EEM

Explanation  OTM process failed to register with eem, exiting now

Recommended Action  No action is required.

OTM-3

Error Message  OTM-3-OTM_ERROR: [chars] [chars]

Explanation  [chars1][chars2]

Recommended Action  No action is required.

OTM-5

Error Message  OTM-5-OTM_OBJ_ADD: : Tracking object [dec] configured, status of the object [chars]

Explanation  Tracking Object [dec] configured, status of the object [chars]

Recommended Action  No action is required.

OTM-6

Error Message  OTM-6-OTM_EXITED: OTM process exited

Explanation  OTM process is terminated

Recommended Action  No action is required.

Error Message  OTM-6-OTM_OBJ_REM: : Tracking object [dec] removed

Explanation  Tracking Object [dec] removed

Recommended Action  No action is required.

Error Message  OTM-6-OTM_STARTED: OTM process started

Explanation  OTM process is up and running

Recommended Action  No action is required.

Error Message  OTM-6-OTM_TRACK_START: Client started tracking object [dec]

Explanation  Client has started tracking object [dec]

Recommended Action  No action is required.

Error Message  OTM-6-OTM_TRACK_STOP: Client stopped tracking object [dec]

Explanation  Client has stopped tracking object [dec]

Recommended Action  No action is required.

PATCH-INSTALLER Messages

This section contains the PATCH-INSTALLER messages.

PATCH-INSTALLER-3

Error Message  PATCH-INSTALLER-3-PATCH_INSTALLER_OP_FAILED: Package Install operation: [chars] , operation ID: [dec], failed with error: [dec] ([chars]) at: [chars]

Explanation  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Recommended Action  Patch_installer

PIXM Messages

This section contains the PIXM messages.

PIXM-2

Error Message  PIXM-2-PIXM_SYSLOG_MESSAGE_TYPE_CRIT: [chars]

Explanation  PIXM has encountered a critical error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-3

Error Message  PIXM-3-PIXM_SYSLOG_MESSAGE_TYPE_ERR: [chars]

Explanation  PIXM has encountered a error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-4

Error Message  PIXM-4-PIXM_SYSLOG_MESSAGE_TYPE_WARNING: [chars]

Explanation  PIXM has encountered a warning-level error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-7

Error Message  PIXM-7-PIXM_SYSLOG_MESSAGE_TYPE_DEBUG: [chars]

Explanation  This is a debug output from PIXM

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PLATFORM Messages

This section contains the PLATFORM messages.

PLATFORM-0

Error Message  PLATFORM-0-FAIL_REMOVED: Fan module removed. Fan[dec] has been absent for [dec] seconds

Explanation  Fan module is removed. This could lead to temperature alarms.

Recommended Action  Replace the fan module ASAP.

Error Message  PLATFORM-0-PFM_EMERGENCY: [chars]

Explanation  Platform Emergency

Recommended Action  No action is required.

Error Message  PLATFORM-0-SYS_RESET: [chars] System shutdown in [dec] seconds

Explanation  System shutdown in [decimal digit] seconds.

Recommended Action  Please perform a 'show env temperature' to collect more information.

PLATFORM-1

Error Message  PLATFORM-1-FABRIC_SWITCH_FAN_FAIL: Less than 4 required fans operating.

Explanation  Fan module has failed leaving less than 4 total fans operating. Fan needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-FAN_FAIL: Fan module Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-PFM_ALERT: [chars]

Explanation  Platform Alert

Recommended Action  No action is required.

Error Message  PLATFORM-1-PS_SINGLE_INPUT: Both power inputs are connected for Power supplies, remove single-input configuration for optimal power usage

Explanation  Current power supply redundancy mode may not be optimal

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

PLATFORM-2

Error Message  PLATFORM-2-9134_FAN_FAIL: Fan module [dec] Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-9134_FAN_OK: Fan module [dec] ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-CASA_FAN_FAIL: Fan module [dec] Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-CASA_FAN_OK: Fan module [dec] ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FANLET_FAN_FAIL: Failed Fanlets for Fan [dec] ([chars] fan) : [chars]

Explanation  The specified fanlets have failed. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-FANMOD_FAN_FAIL: Fan module [dec] ([chars] fan) Failed/Removed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-FANMOD_FAN_OK: Fan module [dec] ([chars] fan) ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FAN_OK: Fan module ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FAN_REMOVED: Fan module [dec] (Serial number [chars]) [chars] removed

Explanation  Fan module is removed

Recommended Action  No action is required.

Error Message  PLATFORM-2-PFM_CRITICAL: [chars]

Explanation  Platform Critical

Recommended Action  No action is required.

Error Message  PLATFORM-2-PFM_PREP_DEEP_SLEEP: Supervisor module in slot [dec] preparing to enter deep sleep mode

Explanation  Deep sleep mode initiated by the Connectivity Management Processor (CMP) for this supervisor

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_CAPACITY_CHANGE: Power supply PS[dec] changed its capacity. possibly due to On/Off or power cable removal/insertion (Serial number [chars])

Explanation  Detected power supply capacity change.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_CAPACITY_DIFFER: Detected power supplies with differing capacity. It is recommended to have same capacity for both powersupplies otherwise it may cause service disruptions

Explanation  Detected a power supply that has differing capacity than an the otherpower supply.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_FAIL: Power supply [dec] failed or shut down (Serial number [chars])

Explanation  Power Supply has failed or has been shutdown

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information. Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-PS_FANFAIL: Fan in Power supply [dec] failed

Explanation  Fan module in the Power Supply has failed

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_FANOK: Fan in Power supply [dec] ok

Explanation  Fan module in the Power Supply is ok.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_MISMATCH: Detected power supply [chars]. This reduces the redundant power available to the system and can cause service disruptions (Serial number [chars])

Explanation  Detected a new power supply that has reduced capacity than an existing power supply.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_OK: Power supply [dec] ok (Serial number [chars])

Explanation  Power Supply is ok.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_RED_MODE_CHG: Power supply operational redundancy mode changed to [chars]

Explanation  Power supply redundancy mode changed notification

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_REMOVE_LAST: Unexpected removal of last power supply [dec]. (Serial number [chars])

Explanation  Unexpected removal the only power supply in the system.

Recommended Action  Power supply unit may be faulty. Contact CISCO to replace the unit.

Error Message  PLATFORM-2-PS_UNKNOWN: Detected an unknown power supply [dec] for CISCO Multilayer Switch (Serial number [chars])

Explanation  Unable to determine power supply type. Default power supply types will be assumed.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-PS_UNSUPPORTED: Detected an unsupported power supply [dec] [chars] for CISCO Multilayer Switch (Serial number [chars])

Explanation  This power supply is not supported for the CISCO Multilayer Switches.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

PLATFORM-3

Error Message  PLATFORM-3-PFM_ERROR: [chars]

Explanation  Platform Error

Recommended Action  No action is required.

PLATFORM-4

Error Message  PLATFORM-4-PFM_WARNING: [chars]

Explanation  Platform Warning

Recommended Action  No action is required.

PLATFORM-5

Error Message  PLATFORM-5-FAN_DETECT: Fan module [dec] (Serial number [chars]) [chars] detected

Explanation  Fan module is detected

Recommended Action  No action is required.

Error Message  PLATFORM-5-FAN_STATUS: Fan module [dec] (Serial number [chars]) [chars] current-status is [chars]

Explanation  Fan module changed status

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_FAN_DETECT: Fex [dec] Fan Module [dec] detected

Explanation  Fex Fan module is detected

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_FAN_REMOVE: Fex [dec] Fan Module [dec] removed

Explanation  Fex Fan module is removed

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_PS_FOUND: Fex [dec] Power Supply [dec] found (Serial number [chars])

Explanation  Fex power supply is found

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_PS_REMOVE: Fex [dec] Power Supply [dec] removed (Serial number [chars])

Explanation  Fex power supply is removed

Recommended Action  No action is required.

Error Message  PLATFORM-5-PFM_NOTICE: [chars]

Explanation  Platform Notice

Recommended Action  No action is required.

PLATFORM-6

Error Message  PLATFORM-6-PFM_INFO: [chars]

Explanation  Platform Info

Recommended Action  No action is required.

PLATFORM-7

Error Message  PLATFORM-7-PFM_CLOCK_UPD_FAIL: Clock update failed due to context-switch delay of [dec] msec

Explanation  System shutdown in [decimal digit] seconds.

Recommended Action  Please perform a 'show env temperature' to collect more information.

PLOG_SUP Messages

This section contains the PLOG_SUP messages.

PLOG_SUP-4

Error Message  PLOG_SUP-4-PLOG_SUP_EXIT: Persistent Logger encountered an error [dec].

Explanation  Persistent Logger encountered an error

Recommended Action  No action is required.

PLOG Messages

This section contains the PLOG messages.

PLOG-4

Error Message  PLOG-4-PLOG_LC_EXIT: Persistent Logger encountered an error [dec]

Explanation  Persistent Logger encountered an error

Recommended Action  No action is required.

POAP Messages

This section contains the POAP messages.

POAP-2

Error Message  POAP-2-POAP_AUTOCOPY_TIMEOUT: [chars] - Standby autocopy timed out

Explanation  POAP timed out waiting for standby image autocopy.

Recommended Action  No action is required.

Error Message  POAP-2-POAP_AUTOCOPY_WAIT: [chars] - Standby image copy in progress

Explanation  POAP is waiting for standby image autoopy.

Recommended Action  No action is required.

Error Message  POAP-2-POAP_DHCP_DISCOVER_START: [chars] - POAP DHCP Discover phase started

Explanation  POAP DHCP Discover phase started

Recommended Action  No action is required.

Error Message  POAP-2-POAP_FAILURE_READ_MODINFO: [chars] - Failure to read module info

Explanation  POAP failure to read module info

Recommended Action  No action is required.

Error Message  POAP-2-POAP_FAILURE: [chars] - [chars]

Explanation  POAP failure

Recommended Action  No action is required.

Error Message  POAP-2-POAP_INFO: [chars] - [chars]

Explanation  POAP Info

Recommended Action  No action is required.

Error Message  POAP-2-POAP_INITED: [chars] - POAP process initialized

Explanation  POAP process initialized

Recommended Action  No action is required.

Error Message  POAP-2-POAP_RELOAD_DEVICE: [chars] - Reload device

Explanation  POAP reload device.

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_DOWNLOADED: [chars] - Successfully downloaded POAP script file

Explanation  Successfully downloaded POAP script file

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_STARTED_MD5_NOT_VALIDATED: [chars] - POAP script execution started(MD5 not validated)

Explanation  POAP script execution started(MD5 not validated)

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_STARTED_MD5_VALIDATED: [chars] - POAP script execution started(MD5 validated)

Explanation  POAP script execution started(MD5 validated)

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_STARTED_MD5_VALIDATION_FAIL: [chars] - POAP boot file validation failed

Explanation  POAP boot file validation failed.

Recommended Action  No action is required.

POAP-5

Error Message  POAP-5-POAP_DISABLED: [chars] - POAP Disabled

Explanation  POAP Service Disabled

Recommended Action  No action is required.

Error Message  POAP-5-POAP_ENABLED: [chars] - POAP Enabled

Explanation  POAP Service nabled

Recommended Action  No action is required.

PONG Messages

This section contains the PONG messages.

PONG-5

Error Message  PONG-5-PONG_DISABLED: Pong Manager disabled

Explanation  Pong Service Enabled

Recommended Action  No action is required.

Error Message  PONG-5-PONG_ENABLED: Pong Manager enabled

Explanation  Pong Service Enabled

Recommended Action  No action is required.

Error Message  PONG-5-PONG_INJECTED: Pong packet injected

Explanation  Pong packet injected

Recommended Action  No action is required.

PORT-CHANNEL Messages

This section contains the PORT-CHANNEL messages.

PORT-CHANNEL-3

Error Message  PORT-CHANNEL-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

PORT-CHANNEL-4

Error Message  PORT-CHANNEL-4-PORT_CFG_DELETED: [chars] removed from [chars]

Explanation  Port is removed from a port-channel because different module was inserted or module config purged

Recommended Action  You lost some ports from port-channel, check if you want to add ports in the new module to the same port-channel.

Error Message  PORT-CHANNEL-4-RACE_WARN: [chars]

Explanation  Warning of possible race condition

Recommended Action  No action is required.

PORT-CHANNEL-5

Error Message  PORT-CHANNEL-5-CREATED: [chars] created

Explanation  A port-channel is created

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-DELETED: [chars] deleted

Explanation  A port-channel is deleted

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_ADDED: [chars] added to [chars]

Explanation  Ports are added to a port-channel

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_REMOVED: [chars] removed from [chars]

Explanation  Ports are removed from a port-channel

Recommended Action  No action is required.

PORT Messages

This section contains the PORT messages.

PORT-3

Error Message  PORT-3-IF_SFP_ALARM: Interface [chars], [chars] [chars] [chars]

Explanation  There was an alarm on the transceiver module. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please do show interface transceiver details to obtain more information

PORT-4

Error Message  PORT-4-IF_SFP_WARNING: Interface [chars], [chars] [chars] [chars]

Explanation  There was an warning on the transceiver module. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please do show interface transceiver details to obtain more information

PRIVATE_VLAN Messages

This section contains the PRIVATE_VLAN messages.

PRIVATE_VLAN-2

Error Message  PRIVATE_VLAN-2-PVLAN_ASSOC_DOWN_FAILED: Failed to bring down the association between [dec] & [dec]

Explanation  Association bringdown failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ASSOC_UP_FAILED: Failed to bring up the association between [dec] & [dec]

Explanation  Association bringup failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ELTM_MTS_SEND_FAILED: MTS send failed while communicating with ELTM.

Explanation  ELTM MTS send failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ELTM_TIMED_OUT: ELTM timed out while configuring hardware.

Explanation  ELTM timed out

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ETHPM_TIMED_OUT: ETHPM timed out while configuring/unconfiguring hardware

Explanation  ETHPM timed out

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_ASSOCIATE_PRIMARY_WITH_SECONDARY_VLAN: Failed to bring up the association between [dec] & [dec]

Explanation  Association between primary and secondary vlan failed due to an error returned by vlan manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_COMMUNICATE_REMOVE_VLAN_ASSOCIATION_TO_ELTM: Failed to bring down the association between [dec] & [dec]

Explanation  Fail to remove association between primary and secondary vlan due to an error returned by eltm manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_COMMUNICATE_VLAN_ASSOCIATION_TO_ELTM: Failed to bring up the association between [dec] & [dec]

Explanation  Failed to associate primary and secondary vlan due to an error returned by eltm manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_REMOVE_ASSOCIATION_BETWEEN_PRIMARY_AND_SECONDARY_VLAN: Failed to bring down the association between [dec] & [dec]

Explanation  Removing association between primary and secondary vlan failed due to an error returned by vlan manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_HW_ERROR: Error [hex] occurred for ifindex [hex] while programming hardware: [chars]

Explanation  Hardware Configuration Error

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_PIXM_MTS_SEND_FAILED: MTS send failed while communicating with PIXM

Explanation  PIXM MTS send failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_PIXM_TIMED_OUT: PIXM timed out while configuring hardware.

Explanation  PIXM timed out

Recommended Action  No action is required.

PRIVATE_VLAN-3

Error Message  PRIVATE_VLAN-3-PVLAN_ASSOC_SDB_UPDATE_FAILED: Failed to update SDB while [chars] association for vlan [dec]

Explanation  SDB Update failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_IN_USE: PVLAN [dec] in use by interface [chars], please do "no switchport access vlan" or "no switchport private-vlan host-association"

Explanation  PVLAN in use

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_NOT_PRIMARY_VLAN: VLAN [dec] is not a primary vlan. Invalid operation.

Explanation  We cant remove association from secondary vlan

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_SEC_VLAN_NOT_EXIST: VLAN [dec] is not associated with primary VLAN [dec]

Explanation  This secondary vlan is not associated with primary vlan

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_VLANMGR_FAILURE: Cannot restore association operational state. Failed to communicate with VLAN manager

Explanation  Restoring association operational status failed

Recommended Action  No action is required.

PRIVATE_VLAN-5

Error Message  PRIVATE_VLAN-5-PVLAN_DISABLED: PVLAN Disabled

Explanation  PVLAN Service Disabled

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_DISABLE_FAILED: Disabling of private-vlan failed. Either shutdown these ports or remove the ports that are in switchport mode private-vlan: [chars]

Explanation  Disabling of private-vlan failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_ENABLED: PVLAN Enabled

Explanation  PVLAN Service Enabled

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_VTP_DISABLE_FAILED: Either remove all private-vlans from VTP domain or change VTP to transparent mode

Explanation  Disabling of private-vlan failed

Recommended Action  No action is required.

PSS Messages

This section contains the PSS messages.

PSS-2

Error Message  PSS-2-PSS_ERROR: [chars]

Explanation  PSS error log

Recommended Action  No action is required.

Error Message  PSS-2-PSS_INFRACONVERT: [chars]

Explanation  Error in libinfraconvert during pss conversion

Recommended Action  No action is required.

PSS-4

Error Message  PSS-4-PSS_CLEANUP: [chars]: cleaning up [chars]

Explanation  PSS removed a leftover or corrupted file

Recommended Action  No action is required.

PSS-5

Error Message  PSS-5-PSS_CONVERT_FORMAT: [chars]: converting pss format: [chars]

Explanation  PSS format is being converted

Recommended Action  No action is required.

Error Message  PSS-5-PSS_CONVERT_LAYOUT: [chars]: converting pss layout: [chars] (params [dec]/[dec]/[dec] -> [dec]/[dec]/[dec])

Explanation  PSS layout is being converted

Recommended Action  No action is required.

Error Message  PSS-5-PSS_SHRINK: [chars]: shrinking pss: [chars]

Explanation  PSS is being shrunk to remove free space

Recommended Action  No action is required.

Error Message  PSS-5-SDB_CLOSED_AT_COMMIT: [chars]: sdb [chars] is closed: token [dec] is not committed

Explanation  Publisher received SDB commit but sdb was already closed

Recommended Action  No action is required.

PTPLC Messages

This section contains the PTPLC messages.

PTPLC-3

Error Message  PTPLC-3-PTPLC_PORT_CFG_FAILED: Configuration failed on port [hex], [chars]: [hex], [chars]

Explanation  PTP interface configuration error

Recommended Action  No action is required.

Error Message  PTPLC-3-PTPLC_PTP_INTF_CONFIG_ERROR: Failed to configure PTP/PONG on port [dec]: [hex], [chars]

Explanation  PTP interface configuration error

Recommended Action  No action is required.

PTP Messages

This section contains the PTP messages.

PTP-2

Error Message  PTP-2-PTP_BAD_CORRECTION_DETECTED: PTP correction %lld exceeds the threshold. Discarding the correction value. MasterTimestamp %llu(sec) [dec](nsec), SlaveTimestamp %llu(sec) [dec](nsec)

Explanation  PTP bad correction detected

Recommended Action  No action is required.

Error Message  PTP-2-PTP_ClOCKID_CHANGE: Clock id has changed from [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] to [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]

Explanation  PTP clock-id changed

Recommended Action  No action is required.

Error Message  PTP-2-PTP_GM_CHANGE_TOLOCAL: Grandmaster clock has changed to local clock [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] for the PTP protocol

Explanation  PTP GM changed to local Clock ID

Recommended Action  No action is required.

Error Message  PTP-2-PTP_GM_CHANGE: Grandmaster clock has changed from [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] to [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] for the PTP protocol

Explanation  PTP GM changed

Recommended Action  No action is required.

Error Message  PTP-2-PTP_HIGH_CORR: Slave port [chars] High correction %lld(nsec)

Explanation  PTP clock high correction

Recommended Action  No action is required.

Error Message  PTP-2-PTP_HIGH_MEAN_PATH_DELAY: PTP mean-path-delay %llu exceeds the threshold. Discarding the value.

Explanation  PTP high mean-path-delay detected

Recommended Action  No action is required.

Error Message  PTP-2-PTP_INCORRECT_PACKET_ON_SLAVE: Incorrect delay response packet received on slave interface [chars] by [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]. Source Port Identity is [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]. Requesting Port Identity is [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]

Explanation  Incorrect delay response packet

Recommended Action  No action is required.

Error Message  PTP-2-PTP_INTF_DISABLED: PTP on interface [chars] is now DISABLED

Explanation  PTP is disabled on the interface

Recommended Action  No action is required.

Error Message  PTP-2-PTP_NO_SEND_FOLLOWUP: NOT sending FOLLOW_UP on interface:[chars]

Explanation  PTP not sending followup on interface

Recommended Action  No action is required.

Error Message  PTP-2-PTP_NO_SUPPORT_100G: PTP is NOT supported on 100G interface,remove ptp config on this intf for better time-sync

Explanation  PTP not supported on 100G intf

Recommended Action  No action is required.

Error Message  PTP-2-PTP_OFFLOAD_STATUS: PTP offload [chars]

Explanation  PTP offload status

Recommended Action  No action is required.

Error Message  PTP-2-PTP_STATE_CHANGE: PTP state of interface [chars] is changing from '[chars]' to '[chars]'

Explanation  PTP Port state change

Recommended Action  No action is required.

Error Message  PTP-2-PTP_TIMESYNC_LOST: Loss of synchronization with master clock

Explanation  PTP lost synchronization with master clock

Recommended Action  No action is required.

PTP-5

Error Message  PTP-5-PTP_ASCAPABLE_CHANGE: PTP Neighbor of [chars] changed to IEEE 802.1AS capable

Explanation  802.1 AS capability of neighbor at interface changed to yes

Recommended Action  No action is required.

Error Message  PTP-5-PTP_ASNOTCAPABLE_CHANGE: PTP Neighbor of [chars] changed to IEEE 802.1AS not capable, [chars] %lld

Explanation  802.1 AS capability of neighbor at interface changed to no

Recommended Action  No action is required.

Error Message  PTP-5-PTP_DISABLED: PTP disabled

Explanation  PTP Service Enabled

Recommended Action  No action is required.

Error Message  PTP-5-PTP_DOMAIN_CHANGE: PTP domain changed to [dec]

Explanation  PTP domain changed

Recommended Action  No action is required.

Error Message  PTP-5-PTP_ENABLED: PTP enabled

Explanation  PTP Service Enabled

Recommended Action  No action is required.

Error Message  PTP-5-PTP_ENCAP_CHANGE: PTP encapsulation is changed to '[chars]'

Explanation  PTP encapsulation is changed

Recommended Action  No action is required.

Error Message  PTP-5-PTP_MODE_CHANGE: PTP mode is changed to '[chars]'

Explanation  PTP mode is changed

Recommended Action  No action is required.

Error Message  PTP-5-PTP_PROP_DELAY_THRESH_CHANGE: PTP propagation-delay threshold is changed to [dec] for '[chars]'

Explanation  PTP propagation-delay threshold is changed

Recommended Action  No action is required.

PTP-6

Error Message  PTP-6-PTP_ANNOUNCE_INTERVAL_CHANGE: PTP announce interval for [chars] changed to [dec]

Explanation  PTP announce interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_ANNOUNCE_TIMEOUT_CHANGE: PTP announce timeout interval for [chars] changed to [dec]

Explanation  PTP announce timeout interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_DELAY_REQ_INTERVAL_CHANGE: PTP delay-req interval for [chars] changed to [dec]

Explanation  PTP delay-req interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_PRIORITY1_CHANGE: PTP priority1 changed to [dec]

Explanation  PTP priority1 changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_PRIORITY2_CHANGE: PTP priority2 changed to [dec]

Explanation  PTP priority2 changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_SYNC_INTERVAL_CHANGE: PTP sync interval for [chars] changed to [dec]

Explanation  PTP sync interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_TIMESYNC_REG_CHANGE: PTP time-sync register changed

Explanation  PTP time-sync reg change

Recommended Action  No action is required.

Error Message  PTP-6-PTP_VLAN_CHANGE: PTP vlan for [chars] changed to [dec]

Explanation  PTP vlan for [chars] changed

Recommended Action  No action is required.

QOS Messages

This section contains the QOS messages.

QOS-2

Error Message  QOS-2-GENERAL_ERROR: [chars]

Explanation  The QOS Manager has encountered an critical error. The description of error is [str.].

Recommended Action  No action is required.

Error Message  QOS-2-PSS_ERROR: [chars]: PSS returned value=[dec]

Explanation  The QOS Manager encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

QOS-3

Error Message  QOS-3-DBERROR: [chars]

Explanation  QoS Manager encountered a database error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-FAILURE_RESPONSE: [chars] [hex]

Explanation  QoS Manager failed to get response [chars][hex] specify the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-GENERROR: [chars]

Explanation  QoS Manager encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  QOS-3-LICERR: [chars]

Explanation  QoS Manager failed to get license.

Recommended Action  No action is required.

Error Message  QOS-3-MTSERROR: [chars]

Explanation  QoS Manager encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  QOS-3-PSSERROR: [chars]

Explanation  QoS Manager encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-TIMEOUT_ERROR: [chars] [hex]

Explanation  QoS Manager encountered a timeout [chars][hex] specify the context where the failure occurred.

Recommended Action  No action is required.

QOS-4

Error Message  QOS-4-LICEXP: [chars]

Explanation  QoS Manager license is going to expire. [chars] gives the expected time of expiry.

Recommended Action  No action is required.

QOS-6

Error Message  QOS-6-DISABLED_UP_MARKING: [chars]

Explanation  The QoS Manager has disabled marking of time-critical control traffic as high-priority traffic. Priority of such traffic is now not altered by QoS Manager.

Recommended Action  No action is required.

Error Message  QOS-6-ENABLED_UP_MARKING: [chars]

Explanation  The QoS Manager has enabled marking of time-critical control traffic as high-priority traffic.

Recommended Action  No action is required.

Error Message  QOS-6-MGRCREATED: QoS Manager created

Explanation  QoS Manager was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

QUACK_SMC Messages

This section contains the QUACK_SMC messages.

QUACK_SMC-6

Error Message  QUACK_SMC-6-QUACK_LIB_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

RADIUS Messages

This section contains the RADIUS messages.

RADIUS-3

Error Message  RADIUS-3-RADIUS_ERROR_MESSAGE: [chars]

Explanation  RADIUS Error Message

Recommended Action  No action is required.

RADIUS-4

Error Message  RADIUS-4-RADIUS_WARNING: [chars]

Explanation  RADIUS Warning

Recommended Action  No action is required.

RADIUS-5

Error Message  RADIUS-5-RADIUS_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Radius server monitor status change

Recommended Action  No action is required.

Error Message  RADIUS-5-RADIUS_NOTIFICATION: [chars]

Explanation  RADIUS Notification

Recommended Action  No action is required.

Error Message  RADIUS-5-RADIUS_SERVER_STATUS: [chars] server [chars] with auth-port [dec] and acct-port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Radius server status change

Recommended Action  No action is required.

RADIUS-6

Error Message  RADIUS-6-RADIUS_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  RADIUS-6-RADIUS_MESSAGE: [chars]

Explanation  RADIUS Message

Recommended Action  No action is required.

RES_MGR Messages

This section contains the RES_MGR messages.

RES_MGR-2

Error Message  RES_MGR-2-RES_MGR_CRIT: RES_MGR Critical: [chars]

Explanation  RES_MGR generic critical condition

Recommended Action  No action is required.

RES_MGR-5

Error Message  RES_MGR-5-RES_MGR_DISABLED: RES_MGR Disabled

Explanation  RES_MGR Service Disabled

Recommended Action  No action is required.

Error Message  RES_MGR-5-RES_MGR_ENABLED: RES_MGR Enabled

Explanation  RES_MGR Service Enabled

Recommended Action  No action is required.

SAL Messages

This section contains the SAL messages.

SAL-5

Error Message  SAL-5-SAL_DISABLED: SAL Disabled

Explanation  SAL Service Disabled

Recommended Action  No action is required.

Error Message  SAL-5-SAL_ENABLED: SAL Enabled

Explanation  SAL Service nabled

Recommended Action  No action is required.

SCHEDULER Messages

This section contains the SCHEDULER messages.

SCHEDULER-3

Error Message  SCHEDULER-3-SCH_ERR: [chars]

Explanation  Scheduler error

Recommended Action  No action is required.

SCHEDULER-4

Error Message  SCHEDULER-4-SCH_WARN: [chars]

Explanation  Scheduler warning

Recommended Action  No action is required.

SCHEDULER-6

Error Message  SCHEDULER-6-SCH_MSG: [chars]

Explanation  Scheduler Message

Recommended Action  No action is required.

SECURITYD Messages

This section contains the SECURITYD messages.

SECURITYD-2

Error Message  SECURITYD-2-FEATURE_ENABLE_DISABLE: User [chars] has [chars] the feature [chars]

Explanation  User has enabled or disabled the feature

Recommended Action  No action is required.

Error Message  SECURITYD-2-FEATURE_NXAPI_ENABLE: Feature nxapi is being enabled [chars]

Explanation  Feature nxapi has been enabled with https and the http port is disabled

Recommended Action  To enable http access to the device, please configure 'nxapi http port '

Error Message  SECURITYD-2-FIPS_BYPASS_SELF_TEST_STATUS: FIPS Bypass self-test status : [chars]

Explanation  Status of FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_CRNG_SELF_TEST_STATUS: FIPS CRNG self-test status : [chars]

Explanation  Status of FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_CRYPTO_SELF_TEST_STATUS: FIPS [chars] Crypto self-test status : [chars]

Explanation  Status of FIPS [chars] self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_ERROR_MSG: [chars]

Explanation  Fips post Error Message

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_MAINTENANCE: FIPS Test failed. Moving to maintenance mode

Explanation  FIPS Test failed. Moving to maintenance mode

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_TEST_FAILED: FIPS crypto-test failure : [dec]

Explanation  FIPS crytpo-test failed [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POWERUP_SELF_TESTS_STATUS: FIPS power-up self-test status: [chars]

Explanation  Status FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POWERUP_SELF_TEST_STATUS: FIPS [chars] power-up self-test status : [chars]

Explanation  Status of FIPS [chars] power-up self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_SELF_TEST_FAILED: FIPS self-test failure : [chars] : [chars]

Explanation  FIPS self-test failed [chars] for service [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-INVALID_ADMIN_PASSWD: User admin has NULL password. Copy r s aborted

Explanation  User admin has NULL password. Copy r s aborted

Recommended Action  No action is required.

SECURITYD-3

Error Message  SECURITYD-3-NVRAMFAILURE: nvram failure

Explanation  Nvram can not be read/written to. Hence accounting log can not be stored there

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SECURITYD-3-USERPASSPHRASE_TIMEVALUE_FAIL: Update timevalue for user: [chars] [FAIL]

Explanation  Update timevalue for [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

SECURITYD-6

Error Message  SECURITYD-6-ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  SECURITYD-6-CHANGE_PASSWD: changing passwd for [chars]

Explanation  Changing passwd for [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-DELETE_STALE_USER_ACCOUNT: deleting expired user account:[chars]

Explanation  Deleting expired user account of [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_MODE_SET_FAILED: Error when setting FIPS mode : [chars]

Explanation  FIPS mode failed [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_MODE_SET: FIPS mode is [chars] for service [chars]

Explanation  FIPS mode is changed [chars] [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_POST_INFO_MSG: [chars]

Explanation  Fips post Information Message

Recommended Action  No action is required.

SKSD Messages

This section contains the SKSD messages.

SKSD-2

Error Message  SKSD-2-SKSD_CRYPT_SERVICE_CRIT: Encryption-Service: [chars]

Explanation  Encryption Service critical errors.

Recommended Action  No action is required.

SKSD-3

Error Message  SKSD-3-SKSD_CRYPT_SERVICE_ERR: Encryption-Service: [chars]

Explanation  Encryption Service errors.

Recommended Action  No action is required.

Error Message  SKSD-3-SKSD_FIPS_MODE_INIT_ERROR: Could not initialize FIPS mode : [chars]

Explanation  FIPS mode initialization error

Recommended Action  No action is required.

Error Message  SKSD-3-SKSD_FIPS_MODE_SELFTEST: FIPS POST for [chars] [chars]

Explanation  FIPS Selftest Result

Recommended Action  No action is required.

SKSD-4

Error Message  SKSD-4-SKSD_CRYPT_SERVICE_WARN: Encryption-Service: [chars]

Explanation  Encryption Service warnings.

Recommended Action  No action is required.

SKSD-5

Error Message  SKSD-5-SKSD_CRYPT_SERVICE_NOTICE: Encryption Service: [chars]

Explanation  Encryption Service updates.

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_EXIT: Keystore Application Exiting: [chars]

Explanation  Keystore Program exiting

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_FUNC: Keystore Operation: [chars]

Explanation  Keystore Event upon a receiving a request

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW_INIT: Hardware Keystore Init done

Explanation  Hardware Keystore Init completed

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW_RESET: Hardware Reset :[chars]

Explanation  Hardware Reset

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW: Smartcard :[chars]

Explanation  Smartcard Presence

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_INIT: Keystore Application Init: [chars]

Explanation  Keystore Program Init

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_KEY_ADD: Key added

Explanation  Key added to keystore

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_KEY_DELETE: Key deleted

Explanation  Key deleted from keystore

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_SUP_STATE: Supervisor card new state: [dec]

Explanation  Supervisor state change

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_SW_INIT: Software Keystore Init done

Explanation  Software Keystore Init completed

Recommended Action  No action is required.

SKSD-6

Error Message  SKSD-6-SKSD_CRYPT_SERVICE_INFO: Encryption Service: [chars]

Explanation  Encryption Service informational updates.

Recommended Action  No action is required.

SNMPD Messages

This section contains the SNMPD messages.

SNMPD-1

Error Message  SNMPD-1-ALERT: SNMP log alert : [chars]

Explanation  SNMP log alert message.

Recommended Action  No action is required.

SNMPD-2

Error Message  SNMPD-2-CRITICAL: SNMP log critical : [chars]

Explanation  SNMP log critical message.

Recommended Action  No action is required.

SNMPD-3

Error Message  SNMPD-3-ERROR: SNMP log error : [chars]

Explanation  SNMP log error message.

Recommended Action  No action is required.

SNMPD-4

Error Message  SNMPD-4-WARNING: SNMP log warning : [chars]

Explanation  SNMP log warning message.

Recommended Action  No action is required.

SNMPD-5

Error Message  SNMPD-5-NOTIFICATION: SNMP log notification : [chars]

Explanation  SNMP log notification message.

Recommended Action  No action is required.

SNMPD-6

Error Message  SNMPD-6-INFO: SNMP log informational : [chars]

Explanation  SNMP log info message.

Recommended Action  No action is required.

SNMPD-7

Error Message  SNMPD-7-DEBUG: SNMP log debugging : [chars]

Explanation  SNMP log debug message.

Recommended Action  No action is required.

STP Messages

This section contains the STP messages.

STP-2

Error Message  STP-2-RANDNUM_FAIL: [chars]

Explanation  There was a critical error during random number generation. [chars] indicates details of the error

Recommended Action  No action is required.

TACACS Messages

This section contains the TACACS messages.

TACACS-3

Error Message  TACACS-3-TACACS_ERROR_MESSAGE: [chars]

Explanation  TACACS+ Error Message

Recommended Action  No action is required.

TACACS-4

Error Message  TACACS-4-TACACS_WARNING: [chars]

Explanation  TACACS+ warning

Recommended Action  No action is required.

TACACS-5

Error Message  TACACS-5-TACACS_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Tacacs+ server monitor status change

Recommended Action  No action is required.

Error Message  TACACS-5-TACACS_NOTIFICATION: [chars]

Explanation  TACACS+ notification

Recommended Action  No action is required.

Error Message  TACACS-5-TACACS_SERVER_STATUS: [chars] server [chars] with auth-port [dec] and acct-port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Tacacs+ server status change

Recommended Action  No action is required.

TACACS-6

Error Message  TACACS-6-TACACS_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  TACACS-6-TACACS_MESSAGE: [chars]

Explanation  TACACS+ Message

Recommended Action  No action is required.

TAHUSD

Error Message  BUFFER_THRESHOLD_EXCEEDED

Explanation  The buffer has hit the 90% threshold

Recommended Action Please check the reason for oversubscription.

TBIRD_CMN_USD Messages

This section contains the TBIRD_CMN_USD messages.

TBIRD_CMN_USD-6

Error Message  TBIRD_CMN_USD-6-TBIRD_CMN_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

TELEMETRY Messages

This section contains the TELEMETRY messages.

TELEMETRY-1

Error Message  TELEMETRY-1-ALERT: [chars]

Explanation  Alert message

Recommended Action  ACTION_NONE

TELEMETRY-2

Error Message  TELEMETRY-2-CRITICAL: [chars]

Explanation  Critical message

Recommended Action  ACTION_NONE

TELEMETRY-3

Error Message  TELEMETRY-3-ERROR: [chars]

Explanation  Error message

Recommended Action  ACTION_NONE

TELEMETRY-4

Error Message  TELEMETRY-4-DISABLE_DONE: [chars]

Explanation  Telemetry is now disabled. You can re-enable the feature if needed.

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-4-DISABLING_FEATURE: [chars]

Explanation  Telemetry is being disabled. Please wait until process terminates.

Recommended Action  Don't re-enable telemetry until the process exits.

Error Message  TELEMETRY-4-INITERR: TM initialized [chars] failed

Explanation  Initialization failures condition

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-4-TRANSPORT_RECONFIGURE: [chars]

Explanation  A configuration change requires reconfiguring destination groups to take effect.

Recommended Action  Reconfigure telemetry destination groups.

Error Message  TELEMETRY-4-TRANSPORT_SEND_ERROR: [chars] send to [chars] failed. ([chars])

Explanation  Telemetry transport send failure.

Recommended Action  Make sure receiver is up and running.

Error Message  TELEMETRY-4-WARNING: [chars]

Explanation  Warning message

Recommended Action  ACTION_NONE

TELEMETRY-5

Error Message  TELEMETRY-5-NOTICE: [chars]

Explanation  Normal bug significant condition

Recommended Action  ACTION_NONE

TELEMETRY-6

Error Message  TELEMETRY-6-INFO: [chars]

Explanation  Informational message

Recommended Action  ACTION_NONE

TELEMETRY-7

Error Message  TELEMETRY-7-DEBUG: [chars]

Explanation  Debug message

Recommended Action  ACTION_NONE

TUNNEL Messages

This section contains the TUNNEL messages.

TUNNEL-2

Error Message  TUNNEL-2-FEATURE_ENABLE_FAILED: failed to enable feature tunnel, reason [chars] ([hex])

Explanation  Failed to enable feature tunnel, reason [char] ([int])

Recommended Action  Check the failure reason and take appropriate action to fix the failure. if unable to fix, please capture "show tech-support tunnel"

Error Message  TUNNEL-2-TUNNEL_INTF_STATE_UPDATE: Interface [chars] is down reason ([chars])

Explanation  Interface [char] is down reason [char]

Recommended Action  No action is required.

Error Message  TUNNEL-2-UNSUPPORTED_TUNNEL_TYPE: Failed to create interface [chars] due to unsupported-tunnel type

Explanation  Current tunnel type is not supported in this release

Recommended Action  No action is required.

TUNNEL-3

Error Message  TUNNEL-3-HW_PROGRAMMING_FAILED: for [chars], reason [chars]

Explanation  Hardware programming failed for tunnel [num] interface

Recommended Action  Try 'shutdown' and 'no shutdown' under tunnel interface submode after sometime. if still tunnel interface doesn't come up capture show tech-support tunnel to identify the issue

TUNNEL-5

Error Message  TUNNEL-5-IF_CLEAR_COUNTER: Interface [chars] counters is cleared

Explanation  Interface [char] counters is cleared

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_CREATED: Interface [chars] is created

Explanation  Interface [char] is created

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_CREATE_FAILED: Interface [chars] creation failed due to [[hex]] [chars]

Explanation  Interface [char] is creation failed due to [int] [char]

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_DELETED: Interface [chars] is deleted

Explanation  Interface [char] is deleted

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_STATE_UPDATE: Interface [chars] is [chars] reason [chars]

Explanation  Interface [char] is [char] reason [char]

Recommended Action  No action is required.

Error Message  TUNNEL-5-PPF_SESSION_FAILED: session id %llx type [chars] for [chars] failed error [hex] [chars]

Explanation  Session id [int] type [char] for [char] failed error [int] [char]

Recommended Action  No action is required.

Error Message  TUNNEL-5-TM_DISABLED: Tunnel Disabled

Explanation  Tunnel Service Disabled

Recommended Action  No action is required.

Error Message  TUNNEL-5-TM_ENABLED: Tunnel Enabled

Explanation  Tunnel Service Enabled

Recommended Action  No action is required.

TUNNEL-7

Error Message  TUNNEL-7-TM_INFO: [chars]

Explanation  Tunnel Service info

Recommended Action  No action is required.

U2RIB Messages

This section contains the U2RIB messages.

U2RIB-5

Error Message  U2RIB-5-U2RIB_DISABLED: U2RIB Disabled

Explanation  U2RIB Service Disabled

Recommended Action  No action is required.

Error Message  U2RIB-5-U2RIB_ENABLED: U2RIB Enabled

Explanation  U2RIB Service enabled

Recommended Action  No action is required.

UDLD Messages

This section contains the UDLD messages.

UDLD-5

Error Message  UDLD-5-UDLD_AGGRESSIVE: UDLD Aggressive

Explanation  UDLD Service Aggressive

Recommended Action  No action is required.

Error Message  UDLD-5-UDLD_DISABLED: UDLD Disabled

Explanation  UDLD Service Disabled

Recommended Action  No action is required.

Error Message  UDLD-5-UDLD_ENABLED: UDLD Enabled

Explanation  UDLD Service Enabled

Recommended Action  No action is required.

UFDM Messages

This section contains the UFDM messages.

UFDM-5

Error Message  UFDM-5-DNLD_TIMEDOUT: Download timer expired: [chars]

Explanation  UFDM download timer expired. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action  No action is required.

VLAN_MGR Messages

This section contains the VLAN_MGR messages.

VLAN_MGR-2

Error Message  VLAN_MGR-2-CRITICAL_MSG: [chars]

Explanation  VLAN Manager Critical Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-FABRIC_DYNAMIC_CORE_VLAN_RANGE_REMOVED: Fabric dynamic and core VLAN ranges removed. Please delete VLANs [chars] in the ranges

Explanation  VLAN Manager Core VLAN Range Removal Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-VLAN_DELETE_FAILED_RSN_BD_EXIST: VTP request to delete VLAN(s) [chars] could not be processed. Bridge Domains exist for VLANs [chars]

Explanation  VLAN delete failed since Bridge Domains Exist

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-VLAN_MGR_VLAN_NOT_PRESENT: Dynamic VLAN [dec] is not configured, please check vlan global configuration!

Explanation  VLAN Manager failed to bring up Dynamic VLAN Message

Recommended Action  No action is required.

VLAN_MGR-3

Error Message  VLAN_MGR-3-ERROR_MSG: [chars]

Explanation  VLAN manager error

Recommended Action  No action is required.

Error Message  VLAN_MGR-3-VLAN_MGR_DVLAN_FAILED_UP: Dynamic VLAN [dec] failed to be up! err:[hex]:[chars]

Explanation  VLAN Manager failed to bring up Dynamic VLAN Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-3-VLAN_MGR_VLAN_NOT_ACTIVE: Dynamic VLAN [dec] is not active, please check configuration!

Explanation  VLAN Manager failed to bring up Dynamic VLAN Message

Recommended Action  No action is required.

VLAN_MGR-4

Error Message  VLAN_MGR-4-WARN_MSG: [chars]

Explanation  VLAN manager warning

Recommended Action  No action is required.

VLAN_MGR-5

Error Message  VLAN_MGR-5-NOTIF_MSG: [chars]

Explanation  VLAN Manager Notification Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-5-RESERVED_VLAN_RANGE_CHANGED: New Reserved VLAN Range Configured From VLAN [dec] to VLAN [dec]

Explanation  VLAN Manager Reserved VLAN Reconfiguration Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-5-VLAN_MGR_DVLAN_TEARDOWN: Dynamic VLAN [dec] is teared down by dot1x for interface [hex] !

Explanation  VLAN Manager has Dynamic VLAN torn down Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-5-VLAN_MGR_DVLAN_UP: Dynamic VLAN [dec] is up for interface [hex] !

Explanation  VLAN Manager has Dynamic VLAN up Message

Recommended Action  No action is required.

VLAN_MGR-6

Error Message  VLAN_MGR-6-INFO_MSG: [chars]

Explanation  VLAN manager info

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_CREATED: VLAN [dec], created

Explanation  VLAN created

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_MGR_STATEFULL_RESTART: VLAN Manager statefull restart

Explanation  VLAN Manager statefull restart

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_MGR_STATELESS_RESTART: VLAN Manager stateless restart

Explanation  VLAN Manager stateless restart

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_OPER_STATUS_CHG: VLAN [dec], status changed to [chars]

Explanation  VLAN operational state change

Recommended Action  No action is required.

VMTRACKER Messages

This section contains the VMTRACKER messages.

VMTRACKER-2

Error Message  VMTRACKER-2-VMTRACKER_CONNECTION_ISSUE: Problem with connection: [chars]

Explanation  Connection problem

Recommended Action  Problem with connection. Try "no connect"; "connect"

Error Message  VMTRACKER-2-VMTRACKER_HMM_REGISTRATION_FAIL: [chars]

Explanation  HMM Registration error

Recommended Action  No action is required.

Error Message  VMTRACKER-2-VMTRACKER_TRUNK_MODE_WARN: Interface [chars] is used by VMTracker. Changing it back to TRUNK mode.

Explanation  Port trunk mode warning message

Recommended Action  Do not change port mode when it is used by VMTracker. To change the mode, disable VMTracker on the interface first.

VMTRACKER-3

Error Message  VMTRACKER-3-VMTRACKER_SOAP_ERR: Soap Err:[chars]

Explanation  Soap Call failure message

Recommended Action  No action is required.

VMTRACKER-4

Error Message  VMTRACKER-4-VMTRACKER_HMM_TRIGGER_FAIL: auto-config trigger failure, vlan [dec] [chars]

Explanation  HMM Request error

Recommended Action  No action is required.

Error Message  VMTRACKER-4-VMTRACKER_SOAP_WARN: Soap Warn:[chars]

Explanation  Soap Call warning message

Recommended Action  No action is required.

VMTRACKER-5

Error Message  VMTRACKER-5-VMTRACKER_CONFIG_VLAN: [chars]

Explanation  Vlan configuration message

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_CREATE_VLAN: Vlan Created: [chars]

Explanation  Vlan addition message

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_DISABLED: Service Disabled

Explanation  Service Disabled

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_ENABLED: Service Enabled

Explanation  Service enabled

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_MESSAGE: [chars]

Explanation  Generic message

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_REMOVE_VLAN: Vlan Removed: [chars]

Explanation  Vlan deletion message

Recommended Action  No action is required.

VPC Messages

This section contains the VPC messages.

VPC-2

Error Message  VPC-2-L3_VPC_UNEQUAL_WEIGHT: Layer3 peer-router is enabled. Please make sure both vPC peers have the same L3 routing configuration

Explanation  Unequal weight routing is not supported when layer3 peer-router is enabled

Recommended Action  No action is required.

Error Message  VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain [dec], VPC peer keep-alive receive has failed

Explanation  Peer keep-alive receive failed

Recommended Action  No action is required.

Error Message  VPC-2-PEER_KEEP_ALIVE_SEND_FAIL: In domain [dec], VPC peer keep-alive send has failed

Explanation  Peer keep-alive send failed

Recommended Action  No action is required.

Error Message  VPC-2-PEER_VPC_RESP_TIMEDOUT: Failed to receive response from peer for vPC: [dec]

Explanation  VPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-2-TRACK_INTFS_DOWN: In domain [dec], vPC tracked interfaces down, suspending all vPCs and keep-alive

Explanation  VPC tracked object down

Recommended Action  No action is required.

Error Message  VPC-2-VPCCONFIG_ON_FPC: A green start is a must after ISSU for VPC config on FPC([hex]) for AA-FEX bringup. Please ignore if you already reloaded the switch after upgrading to version >= 7.0.3(I5)2

Explanation  Green start (post ISSU) is a must to ensure programming correctness before configuring AA-FEXes

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ADD_L3_BKUP_VLAN_TO_PEER_GW_EXCLUDE_LIST: Exclude L3 backup routing VLAN from vpc peer-gateway config.

Explanation  Triggered when peer-link is F1 and peer-gateway is configured without exclude-vlan list.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_CORE_PORT_FPATH_BUP_FAILED: Failed to bring up vPC+ peer link port [chars] in Fabric Path Port Mode - vPC+ Fabric Path switch ID not configured

Explanation  VPC+ Failed to bringup peer-link - switch-ID not configured

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_FAILED_LID_ALLOC: Failed to negotiate common LID between vPC peers.

Explanation  Failed to find common lid.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_FAILED_PEERLINK_DOWN: vPC+ operations failed. Bringing down peer-link.

Explanation  Triggered in mcecm_em_es_failed. Bring down peer-link.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_PEER_LINK_OPERATION_FAILED: Peer-link operation failed due to SAP [dec].

Explanation  Triggered in mcecm_cfg_es_failed when peer-link bringup fails.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_GRACEFUL_SUSP_ALL_VPC: Operational graceful type-1 check state changed, reinitiating all vPCs

Explanation  Graceful state change,reinit vPCs

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ISSU_END: Peer vPC switch ISSU end, unlocking configuration

Explanation  Peer vPC switch issu end

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ISSU_START: Peer vPC switch ISSU start, locking configuration

Explanation  Peer vPC switch issu start

Recommended Action  No action is required.

Error Message  VPC-2-VPC_LC_FAIL: LC [dec] does not support required hardware for vPC; run 'show vdc membership status' for port status

Explanation  Lc insertion failed

Recommended Action  No action is required.

Error Message  VPC-2-VPC_NON_DEF_LID: vPC+ negotiated non-default local id. Flapping orphan edge ports recommended.

Explanation  Triggered in mcecm_em_es_failed. Bring down peer-link.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_PEER_LINK_FPATH_BUP_FAILED: Failed to bring up vPC+ peer link port [chars] - port [chars] is not configured as a Fabric Path port

Explanation  VPC+ Failed to bringup Peer-link - not in Fabric Path mode

Recommended Action  No action is required.

Error Message  VPC-2-VPC_PSS_ERROR: [chars], 0x([hex]) present in VPC DB but not is IM DB

Explanation  Triggered when vpc DB and IM SDB are inconsistent

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_CLEANUP_FAILURE_NEED_REINIT_MCT: vPC role change cleanup has encountered a failure. Please reinit peer-link to recover. Error: [chars]

Explanation  VPC RC failure, need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_FAILURE_NEED_REINIT_MCT: vPC role change has encountered a failure, can not clean up. Please reinit peer-link to recover. Error: [chars]

Explanation  VPC RC failure, need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_MCT_CMPT_FAIL: Can't perform role change since there are type-1 check failures on peer-link at peer side.

Explanation  VPC RC failure, due to cmpt failed on peer-link at peer side

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_PEER_CMPT_FAIL: Can't perform role change since there are vpc legs with type-1 check failure at peer side.

Explanation  VPC RC failure, due to cmpt failed vpcs at peer side

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_UNFINISHED_RC: Can't perform role change since there is another unfinished role change request on either local or peer side. Please wait until it is finished.

Explanation  VPC RC failure, due to an unfinished RC

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ROLE_CHANGE_NOTIFICATION: VPC role is changed from [chars] to [chars]

Explanation  VPC role is changed

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SHUTDOWN: vPC shutdown status is [chars]

Explanation  VPC shutdown status change

Recommended Action  No action is required.

Error Message  VPC-2-VPC_STATE_CHANGE_ON_PEER_ISSU: VPC [dec] state transition happened during peer ISSU, please shut and no shut the VPC PO on both the Switches

Explanation  VPC state change during peer on ISSU, check the HW programming on both the switches

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SUSP_ALL_VPC: Peer-link going down, suspending all vPCs on secondary. If vfc is bound to vPC, then only ethernet vlans of that VPC shall be down.

Explanation  Peer link down suspend vPCs

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SVI_EXCLUDE: vPC [dec] has up vlans [chars] which are excluded from suspension on dual-active

Explanation  VPC track object deconfigured

Recommended Action  No action is required.

VPC-3

Error Message  VPC-3-FEX_AA_NO_SUPPPORT: FEX AA not supported

Explanation  FEX AA not supported

Recommended Action  No action is required.

Error Message  VPC-3-GLOBAL_CONSISTENCY_FAILED: In domain [dec], global configuration is not consistent ([chars])

Explanation  Global compat-check failed

Recommended Action  No action is required.

Error Message  VPC-3-INTF_CONSISTENCY_FAILED: In domain [dec], VPC [dec] configuration is not consistent ([chars])

Explanation  MCEC compat-check failed

Recommended Action  No action is required.

Error Message  VPC-3-PEER_UNREACHABLE: Remote Switch Unreachable

Explanation  Peer unreachable

Recommended Action  No action is required.

Error Message  VPC-3-PEER_VPC_BRINGUP_FAILED: Peer vPC [dec] bringup failed ([chars])

Explanation  Peer vPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_ASSERTION_FAILED: [chars]

Explanation  VPCM has hit an assert condition at file [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_INIT_FAIL: vPC Manager Initialization Failed ([chars])

Explanation  VPCM Initialization failed. due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_INTERNAL_ERR: [chars]

Explanation  VPCM encountered an internal error due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_MTS_ERR: [chars]

Explanation  VPCM encountered an MTS error due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPC_BRINGUP_FAILED: vPC [dec] bringup failed ([chars])

Explanation  VPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPC_PEER_LINK_BRINGUP_FAILED: vPC peer-link bringup failed ([chars])

Explanation  VPC Peer-link bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPC_PEER_LINK_DOWN: VPC Peer-link is down

Explanation  VPC Peer link is down

Recommended Action  No action is required.

Error Message  VPC-3-VPC_RC_FAILURE_NO_NEED_REINIT_MCT: vPC role change has encountered a failure, will clean up, error: [chars]

Explanation  VPC RC failure, no need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-3-VPC_ROLE_CHANGE_FAILURE: vPC role change failed, error: [chars]:[hex]

Explanation  VPC Role Change failure

Recommended Action  No action is required.

VPC-4

Error Message  VPC-4-PEER_VPC_DELETED: Peer vPC [dec] deleted

Explanation  Peer vPC configuration deleted

Recommended Action  No action is required.

Error Message  VPC-4-VPC_CFGD_EXISTING: vPC [dec] might be used already, please check vpc configuration!

Explanation  VPC configuration duplication

Recommended Action  No action is required.

Error Message  VPC-4-VPC_CONSISTENCY_NEW_VLAN_FAIL: Global Consistency check for vPC failed for new vlans

Explanation  Global Consistency check for vPC failed for new vlans

Recommended Action  No action is required.

Error Message  VPC-4-VPC_DELETED: vPC [dec] is deleted

Explanation  VPC configuration deleted

Recommended Action  No action is required.

Error Message  VPC-4-VPC_DISABLE_IP_REDIRECTS: peer-gateway enabled. Disabling IP redirects on all interface-vlans of this vPC domain for correct operation of this feature.

Explanation  Peer-gateway enabled, hence IP redirects on SVIs are disabled

Recommended Action  No action is required.

Error Message  VPC-4-VPC_LC_UPG_OVER_DELIVERY_FAIL: Failed to deliver LC upgrade to vPC peer

Explanation  Failed to deliver LC upgrade to peer

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PEER_LINK_DELETED: vPC Peer-link deleted. This will bringdown all vPC interfaces

Explanation  VPC Peer-link configuration removed

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PEER_ROLE_CHANGE: In domain [dec], VPC peer role status has changed to [chars]

Explanation  VPC Peer role status changed to (Primary/Secondary

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PER_VLAN_CONSISTENCY_FAILED: Global consistency check for vPC failed for few vlans

Explanation  Global Consistency check for vPC failed for few vlans

Recommended Action  No action is required.

Error Message  VPC-4-VPC_REINITIALIZED: Reinitializing vpcs assuming peer dead

Explanation  Initializing vpcs assuming peer dead

Recommended Action  No action is required.

Error Message  VPC-4-VPC_ROLE_CHANGE: In domain [dec], VPC role status has changed to [chars]

Explanation  VPC role status changed to (Primary/Secondary

Recommended Action  No action is required.

VPC-5

Error Message  VPC-5-GLOBAL_CONSISTENCY_SUCCESS: In domain [dec], global configuration is consistent

Explanation  Global compat-check passed

Recommended Action  No action is required.

Error Message  VPC-5-INTF_CONSISTENCY_SUCCESS: In domain [dec], vPC [dec] configuration is consistent

Explanation  VPC configuration is consistent

Recommended Action  No action is required.

Error Message  VPC-5-ORPHANPORT_RESUME: Orphan-port [chars] is removed from suspended

Explanation  Orphan-port is removed from suspended due to peer-link up or VPC role selection

Recommended Action  No action is required.

Error Message  VPC-5-ORPHANPORT_SUSPEND: Orphan-port [chars] is suspended

Explanation  Orphan-port is suspended due to peer-link down or no VPC role selection

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_RECV_INT_LATEST: In domain [dec], VPC peer-keepalive received on interface [chars]

Explanation  VPC peer-keepalive receive interface changed

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_RECV_SUCCESS: In domain [dec], vPC peer keep-alive receive is successful

Explanation  Peer keep-alive receive successful

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_SEND_INT_LATEST: In domain [dec], VPC peer-keepalive sent on interface [chars]

Explanation  VPC peer-keepalive send interface changed

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_SEND_SUCCESS: In domain [dec], vPC peer keep-alive send is successful

Explanation  Peer keep-alive send successful

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_STATUS: In domain [dec], peer keep-alive status changed to [chars]

Explanation  Peer keep-alive (oob) status is changed to

Recommended Action  Peer-not-alive

Error Message  VPC-5-ROLE_PRIORITY_CFGD: In domain [dec], vPC role priority changed to [dec]

Explanation  Role priority configured

Recommended Action  No action is required.

Error Message  VPC-5-SYSTEM_MAC_CFGD: In domain [dec], vPC system-mac changed to [chars]

Explanation  System mac configured

Recommended Action  No action is required.

Error Message  VPC-5-SYSTEM_PRIO_CFGD: In domain [dec], vPC system priority changed to [dec]

Explanation  System priority changed

Recommended Action  No action is required.

Error Message  VPC-5-VPCM_DISABLED: vPC Manager disabled

Explanation  VPCM Service Disabled

Recommended Action  No action is required.

Error Message  VPC-5-VPCM_ENABLED: vPC Manager enabled

Explanation  VPCM Service Enabled

Recommended Action  No action is required.

Error Message  VPC-5-VPC_AUTO_RECOVERY_TIMER_EXPIRED: vPC auto-recovery timer expired

Explanation  VPC auto-recovery timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_AUTO_RECOVERY_TIMER_STARTED: vPC auto-recovery timer started

Explanation  VPC auto-recovery timer started

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DELAY_SVI_BUP_TIMER_EXPIRED: vPC restore, delay interface-vlan bringup timer expired, reinitiating interface-vlans

Explanation  VPC delay interface-vlan restore timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DELAY_SVI_BUP_TIMER_START: vPC restore, delay interface-vlan bringup timer started

Explanation  VPC delay interface-vlan restore timer start

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DOWN: vPC [dec] is down ([chars])

Explanation  VPC is down (reason)

Recommended Action  No action is required.

Error Message  VPC-5-VPC_OPERATIONAL_L3_ROUTING: VPC operational layer 3 peer-router is [chars]

Explanation  VPC operational layer 3 peer-router enabled or disabled

Recommended Action  No action is required.

Error Message  VPC-5-VPC_PEER_LINK_UP: vPC Peer-link is up

Explanation  VPC Peer-link is up

Recommended Action  No action is required.

Error Message  VPC-5-VPC_RESTORE_TIMER_EXPIRED: vPC restore timer expired, reinitiating vPCs

Explanation  VPC restore timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_RESTORE_TIMER_START: vPC restore timer started to reinit vPCs

Explanation  VPC restore timer start

Recommended Action  No action is required.

Error Message  VPC-5-VPC_ROLE_PREMPT: In domain [dec], vPC role pre-emption triggered

Explanation  VPC preemption triggered

Recommended Action  No action is required.

Error Message  VPC-5-VPC_SCALE_LIMIT: No port-channel limit configuration is [chars]

Explanation  No port-channel limit configuration is changed

Recommended Action  No action is required.

Error Message  VPC-5-VPC_UP: vPC [dec] is up

Explanation  MCEC is UP

Recommended Action  No action is required.

VPC-6

Error Message  VPC-6-PEER_LOCK_FAILED: Locking failed on peer switch - Aborting upgrade!!

Explanation  Locking failed on peer switch

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_CFGD_VLANS_CHANGED: Peer vPC [dec] configured vlans changed

Explanation  Remote MCEC configured vlans Changed

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_CFGD: peer vPC [dec] is configured

Explanation  VPC is configured

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_DOWN: Peer vPC [dec] is down ([chars])

Explanation  Peer vPC is down

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_UP: Peer vPC [dec] is up

Explanation  Peer vPC is up

Recommended Action  No action is required.

Error Message  VPC-6-STATS_CLEARED: vPC Statistics Cleared

Explanation  VPC statistics cleared

Recommended Action  No action is required.

Error Message  VPC-6-TRACK_OBJ_CONFIGURED: In domain [dec], track object configured [dec]

Explanation  VPC track object configured

Recommended Action  No action is required.

Error Message  VPC-6-TRACK_OBJ_DELETED: In domain [dec], track object deleted

Explanation  VPC track object deconfigured

Recommended Action  No action is required.

Error Message  VPC-6-TYPE1_PARAM_CHANGED: TYPE-1 parameters changed: [chars]

Explanation  Type-1 Parameters Changed

Recommended Action  No action is required.

Error Message  VPC-6-VPCM_INTERNAL_INFO: [chars]

Explanation  VPCM got an internal info [chars]

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ALLOWED_VLAN_CHANGED: vPC [dec] operational vlans changed

Explanation  Operational vlans changed on vPC

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CFGD: vPC [dec] is configured

Explanation  VPC is configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CONSISTENCY_CHECK_BYPASS: Bypassing consistency check for vPC: [dec]

Explanation  Bypassing consistency check for vpcs

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CONSISTENCY_NEW_VLAN_PASS: Global Consistency check for vPC passed for new vlans

Explanation  Global Consistency check for vPC passed for new vlans

Recommended Action  No action is required.

Error Message  VPC-6-VPC_DOMAIN_ID_CFGD: vPC domain-id configured to [dec]

Explanation  VPC domain-id configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_EGRESS_DF_STATE_CHANGED: Egress designated forwarder state changed from [chars] to [chars] for vPC [dec].

Explanation  DF state changed for some vPC.

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_ID_CFGD: Fabricpath switch ID [dec] configured

Explanation  Fabricpath switch ID configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_ID_REMOVED: Fabricpath switch ID [dec] removed

Explanation  Fabricpath switch ID removed

Recommended Action  No action is required.

Error Message  VPC-6-VPC_PEER_LINK_CFGD: vPC peer-link is configured

Explanation  VPC Peer-link is configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_PER_VLAN_CONSISTENCY_PASSED: Global Consistency check for vPC passed for all vlans

Explanation  Global Consistency check for vPC passed for all vlans

Recommended Action  No action is required.

VSHD Messages

This section contains the VSHD messages.

VSHD-5

Error Message  VSHD-5-VSHD_SYSLOG_CMD_EXEC: User:[chars] executed the command:[chars]

Explanation  CLI command was executed

Recommended Action  No action is required.

XMLSA Messages

This section contains the XMLSA messages.

XMLSA-2

Error Message  XMLSA-2-CANDIDATE_WRITE_FAIL: Netconf session id:[dec],candidate config has no space left

Explanation  No space left in candidate configuration of the netconf session.

Recommended Action  Please send the commit or discard request for the outstanding config.

Error Message  XMLSA-2-VSH_ERR: XML sub agent vsh cmd error...: [chars]

Explanation  XML sub agent vsh cmd error.

Recommended Action  No action is required.

XMLSA-5

Error Message  XMLSA-5-RPC_ERROR: Netconf session id:[dec], operation:[chars], status:FAILED, reason:[chars]

Explanation  Netconf operation has failed.

Recommended Action  No action is required.

Error Message  XMLSA-5-RPC_OK: Netconf session id:[dec], operation:[chars], status:SUCCESS

Explanation  Netconf operation is successful.

Recommended Action  No action is required.