Table of Contents

Messages and Recovery Procedures

AAA Messages

AAA-1

AAA-2

AAA-3

AAA-5

AAA-6

ACLMGR Messages

ACLMGR-2

ACLMGR-3

ACLMGR-4

ACLMGR-6

ACLQOS Messages

ACLQOS-SLOT#-0

ACLQOS-SLOT#-2

ACLQOS-SLOT#-3

ACLQOS-SLOT#-4

ACLQOS-SLOT#-5

ACLTCAM Messages

ACLTCAM-2

ACLTCAM-3

ACLTCAM-4

ACLTCAM-6

ACL Messages

ACL-2

ACL-3

ACL-4

ACL-5

ACL-6

AMM Messages

AMM-SLOT#-0

AMM-SLOT#-2

AMM-SLOT#-6

ASCII-CFG Messages

ASCII-CFG-2

ASCII-CFG-3

ASCII-CFG-6

ASSOC_MGR Messages

ASSOC_MGR-0

ASSOC_MGR-1

ASSOC_MGR-2

ASSOC_MGR-3

ASSOC_MGR-4

ASSOC_MGR-5

ASSOC_MGR-6

ASSOC_MGR-7

BIOS_DAEMON Messages

BIOS_DAEMON-2

BIOS_DAEMON-5

BIOS_DAEMON-SLOT#-2

BIOS_DAEMON-SLOT#-5

BOOTUP_TEST Messages

BOOTUP_TEST-2

BOOTVAR Messages

BOOTVAR-2

BOOTVAR-3

BOOTVAR-5

BOOTVAR-6

CALLHOME Messages

CALLHOME-2

CALLHOME-3

CALLHOME-6

CDP Messages

CDP-2

CDP-3

CDP-4

CDP-5

CDP-6

CFS Messages

CFS-2

CFS-3

CFS-4

CFS-6

CLK_MGR Messages

CLK_MGR-2

CLK_MGR-5

CLK_MGR-6

CLOUD Messages

CLOUD-2

CLOUD-3

CLOUD-6

CORE-DMON Messages

CORE-DMON-2

CORE-DMON-3

CTS Messages

CTS-2

CTS-3

CTS-4

CTS-5

CTS-6

DCEFIB Messages

DCEFIB-SLOT#-0

DCEFIB-SLOT#-2

DCEFIB-SLOT#-6

DEVICE_TEST Messages

DEVICE_TEST-2

DEVICE_TEST-3

DEVICE_TEST-4

DEVICE_TEST-5

DEVICE_TEST-6

DEV_LOG Messages

DEV_LOG-3

DEV_LOG-SLOT#-4

DFTM Messages

DFTM-SLOT#-2

DFTM-SLOT#-3

DHCLIENT Messages

DHCLIENT-2

DHCLIENT-4

DHCLIENT-5

DHCLIENT-6

DHCLIENT-7

DHCP_SNOOP Messages

DHCP_SNOOP-1

DHCP_SNOOP-2

DHCP_SNOOP-3

DHCP_SNOOP-4

DHCP_SNOOP-5

DHCP_SNOOP-6

DIAGCLIENT Messages

DIAGCLIENT-2

DIAGCLIENT-3

DIAGCLIENT-4

DIAGCLIENT-5

DIAGMGR Messages

DIAGMGR-2

DIAGMGR-3

DIAGMGR-4

DIAGMGR-5

DIAGMGR-6

DIAG_PORT_LB Messages

DIAG_PORT_LB-2

DIAG_PORT_LB-3

DIAG_PORT_LB-4

DIAG_PORT_LB-5

DOT1X Messages

DOT1X-2

DOT1X-3

DOT1X-4

DOT1X-5

DOT1X-6

DSTATS Messages

DSTATS-2

DSTATS-3

ELTMC Messages

ELTMC-SLOT#-2

ELTM Messages

ELTM-2

ELTM-3

ELTM-4

ELTM-5

ELTM-6

EOU Messages

EOU-2

EOU-5

EOU-6

EOU-7

EPLD_UPGRADE Messages

EPLD_UPGRADE-2

EPP Messages

EPP-5

ETH-PORT-SEC Messages

ETH-PORT-SEC-2

ETH-PORT-SEC-3

ETH-PORT-SEC-5

ETHPORT Messages

ETHPORT-2

ETHPORT-3

ETHPORT-4

ETHPORT-5

ETH_PORT_CHANNEL Messages

ETH_PORT_CHANNEL-1

ETH_PORT_CHANNEL-2

ETH_PORT_CHANNEL-3

ETH_PORT_CHANNEL-4

ETH_PORT_CHANNEL-5

ETH_PORT_CHANNEL-6

ETH_PORT_CHANNEL-7

EVMC Messages

EVMC-3

EVMC-4

EVMC-5

EVMC-6

EVMS Messages

EVMS-2

EVMS-4

EVMS-6

EXCEPTIONLOG Messages

EXCEPTIONLOG-SLOT#-2

FC-TUNNEL Messages

FC-TUNNEL-3

FC-TUNNEL-5

FEATURE-MGR Messages

FEATURE-MGR-2

FEATURE-MGR-3

FEATURE-MGR-6

FS-DAEMON Messages

FS-DAEMON-2

FS-DAEMON-6

FSCM Messages

FSCM-2

FSYNC_MGR Messages

FSYNC_MGR-2

FSYNC_MGR-3

FSYNC_MGR-4

FSYNC_MGR-5

FSYNC_MGR-6

GLBP Messages

GLBP-2

GLBP-3

GLBP-4

GLBP-5

HSRP_ENGINE Messages

HSRP_ENGINE-2

HSRP_ENGINE-3

HSRP_ENGINE-4

HSRP_ENGINE-5

HSRP_ENGINE-6

IMAGE_DNLD Messages

IMAGE_DNLD-SLOT#-2

IMAGE_DNLD-SLOT#-4

IMAGE_DNLD-SLOT#-5

IM Messages

IM-3

IM-5

INTERFACE_VLAN Messages

INTERFACE_VLAN-4

INTERFACE_VLAN-5

IPFIB Messages

IPFIB-2

IPQOSMGR Messages

IPQOSMGR-2

IPQOSMGR-3

IPQOSMGR-4

IPQOSMGR-5

IPQOSMGR-6

IPSEC Messages

IPSEC-2

IPSEC-3

IPSEC-5

IPV6 Messages

IPV6-2

IPV6-3

IPV6-4

IPV6-6

IP Messages

IP-1

IP-2

IP-3

IP-4

IP-6

ISNS Messages

ISNS-2

KIM Messages

KIM-2

L2FMC Messages

L2FMC-SLOT#-0

L2FMC-SLOT#-2

L2FMC-SLOT#-5

L2FMC-SLOT#-6

L2FM Messages

L2FM-0

L2FM-1

L2FM-2

L2FM-3

L2FM-4

L2FM-5

L2FM-6

L2MCAST Messages

L2MCAST-SLOT#-0

L2MCAST-SLOT#-2

L2MCAST-SLOT#-3

L2MCAST-SLOT#-6

L3VM Messages

L3VM-2

L3VM-5

LACP Messages

LACP-3

LACP-5

LC-SPAN Messages

LC-SPAN-3

LDAP Messages

LDAP-2

LDAP-3

LDAP-5

LDAP-6

LDP Messages

LDP-5

LICMGR Messages

LICMGR-0

LICMGR-1

LICMGR-2

LICMGR-3

LICMGR-4

LICMGR-6

M6RIB Messages

M6RIB-4

MCAST Messages

MCAST-2

MCAST-4

MCAST-5

MCECTEST Messages

MCECTEST-3

MCECTEST-5

MCECTEST-6

MCM Messages

MCM-2

MCM-5

MCM-6

MFDM Messages

MFDM-2

MODULE Messages

MODULE-2

MODULE-3

MODULE-4

MODULE-5

MODULE-6

MRIB Messages

MRIB-4

NBM Messages

NBM-0

NBM-1

NBM-2

NBM-4

NBM-5

NBM-6

NFM Messages

NFM-2

NFM-3

NFM-4

NFM-5

NFM-6

NFM-7

NFP Messages

NFP-SLOT#-2

NFP-SLOT#-5

NTP Messages

NTP-2

NTP-3

NTP-6

NTP-7

OTM Messages

OTM-2

OTM-3

OTM-5

OTM-6

PIM6 Messages

PIM6-4

PIM Messages

PIM-4

PIXM Messages

PIXM-2

PIXM-3

PIXM-4

PIXM-7

PLATFORM Messages

PLATFORM-0

PLATFORM-1

PLATFORM-2

PLATFORM-3

PLATFORM-4

PLATFORM-5

PLATFORM-6

PLATFORM-7

PLOG_SUP Messages

PLOG_SUP-4

PLOG Messages

PLOG-4

PONG Messages

PONG-5

PORT-CHANNEL Messages

PORT-CHANNEL-1

PORT-CHANNEL-2

PORT-CHANNEL-3

PORT-CHANNEL-4

PORT-CHANNEL-5

PORT-CHANNEL-6

PORT-CHANNEL-7

PORT-PROFILE Messages

PORT-PROFILE-2

PORT-PROFILE-3

PORT-PROFILE-6

PORT-RESOURCES Messages

PORT-RESOURCES-3

PORT-RESOURCES-5

PORT Messages

PORT-2

PORT-3

PORT-4

PORT-5

PRIVATE_VLAN Messages

PRIVATE_VLAN-2

PRIVATE_VLAN-3

PRIVATE_VLAN-5

PSS Messages

PSS-0

PSS-1

PSS-2

PSS-4

PSS-5

PTPLC Messages

PTPLC-3

PTP Messages

PTP-2

PTP-5

PTP-6

QOS Messages

QOS-2

QOS-3

QOS-4

QOS-6

QUACK_SMC Messages

QUACK_SMC-6

RADIUS Messages

RADIUS-2

RADIUS-3

RADIUS-4

RADIUS-5

RADIUS-6

RPM Messages

RPM-2

SAL Messages

SAL-5

SCHEDULER Messages

SCHEDULER-2

SCHEDULER-3

SCHEDULER-4

SCHEDULER-6

SECURITYD Messages

SECURITYD-2

SECURITYD-3

SECURITYD-6

SEGMENT-ROUTING Messages

SEGMENT-ROUTING-1

SEGMENT-ROUTING-2

SEGMENT-ROUTING-3

SEGMENT-ROUTING-5

SENSOR_USD Messages

SENSOR_USD-2

SENSOR_USD-3

SENSOR_USD-5

SESSION-MGR Messages

SESSION-MGR-2

SESSION-MGR-3

SESSION-MGR-4

SESSION-MGR-6

SKSD Messages

SKSD-2

SKSD-3

SKSD-4

SKSD-5

SKSD-6

SNMPD Messages

SNMPD-1

SNMPD-2

SNMPD-3

SNMPD-4

SNMPD-5

SNMPD-6

SNMPD-7

SPAN Messages

SPAN-2

SPAN-3

SPAN-5

SPAN-6

STP Messages

STP-2

STP-3

STP-4

STP-6

SYSMGR Messages

SYSMGR-0

SYSMGR-2

SYSMGR-3

SYSMGR-4

SYSMGR-5

SYSMGR-6

SYSMGR-7

TACACS Messages

TACACS-2

TACACS-3

TACACS-4

TACACS-5

TACACS-6

TBIRD_CMN_USD Messages

TBIRD_CMN_USD-6

TCAP Messages

TCAP-2

TCTRL_USD Messages

TCTRL_USD-2

TTYD Messages

TTYD-2

TTYD-3

TTYD-4

TTYD-6

U2RIB Messages

U2RIB-2

U2RIB-3

U2RIB-5

U2RIB-6

UDLD Messages

UDLD-3

UDLD-4

UDLD-5

UFDM Messages

UFDM-2

UFDM-3

UFDM-5

UFDM-6

VLAN_MGR Messages

VLAN_MGR-2

VLAN_MGR-3

VLAN_MGR-4

VLAN_MGR-5

VLAN_MGR-6

VNI Messages

VNI-2

VNI-3

VNI-6

VPC Messages

VPC-2

VPC-3

VPC-4

VPC-5

VPC-6

VRRP-CFG Messages

VRRP-CFG-2

VRRP-CFG-3

VRRP-CFG-5

VRRP-ENG Messages

VRRP-ENG-2

VRRP-ENG-3

VRRP-ENG-4

VRRP-ENG-5

VRRP-ENG-6

VSHD Messages

VSHD-1

VSHD-2

VSHD-3

VSHD-4

VSHD-5

VSHD-7

XMLMA Messages

XMLMA-2

XMLMA-3

XMLMA-5

XMLMA-6

XMLSA Messages

XMLSA-2

XMLSA-5

XMLSA-6

Messages and Recovery Procedures

This chapter lists the system messages by facility. Within each facility, the messages are listed by severity levels 0 to 7: 0 is the highest severity level, and 7 is the lowest severity level. Each message is followed by an explanation and a recommended action.

AAA Messages

This section contains the AAA messages.

AAA-1

Error Message  AAA-1-AAA_SESSION_LIMIT_REJECT: aaa request rejected as maximum aaa sessions are in progress

Explanation  Aaa request rejected as the limit for maximum concurrent aaa sessions is reached

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-2

Error Message  AAA-2-AAA_NVRAM_UPGRADE_FAILURE: upgrading of accounting log failed. [chars]

Explanation  Upgrading of accounting log failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  AAA-2-AAA_PROGRAM_EXIT: aaa daemon exiting: [chars]

Explanation  Aaa daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-3

Error Message  AAA-3-AAA_NVRAMFAILURE: nvram failure

Explanation  Nvram can not be read/written to. Hence accounting log can not be stored there

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  AAA-3-AAA_VRF_LENGTH_EXCEED: directed authentication, exceeding VRF length

Explanation  Invalid username for directed authentication request, exceeding VRF length

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-5

Error Message  AAA-5-AAA_PER_USER_BLOCK: [chars]

Explanation  User blocked for authentication failures

Recommended Action  No action is required.

Error Message  AAA-5-AAA_QUIET_TIMER_EXPIRED: SECURE_LOGIN: Quiet Mode OFF, Quiet Timer Expired.

Explanation  Quiet timer expired. Logins will be allowed

Recommended Action  No action is required.

Error Message  AAA-5-AAA_QUIET_TIMER_STOPPED: SECURE_LOGIN: Quiet Mode OFF, Quiet Timer Stopped.

Explanation  Quiet timer sopped.

Recommended Action  No action is required.

Error Message  AAA-5-AAA_QUIET_TIMER: [chars]

Explanation  Quiet timer started. All logins blocked due to too many authentication failures

Recommended Action  No action is required.

AAA-6

Error Message  AAA-6-AAA_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

ACLMGR Messages

This section contains the ACLMGR messages.

ACLMGR-2

Error Message  ACLMGR-2-ACLMGR_L2_REDIRECTED_PORTS: Redirected port(s) are supported on L2 interface type.

Explanation  Redirected port(s) are supported on L2 interface type.

Recommended Action  No action is required.

Error Message  ACLMGR-2-ACLMGR_NO_ERRDISABLED: [chars] event on interface [chars] (0x[hex]) allowed to succeed in spite of access-list failure

Explanation  Although an access-list operation failed during a port event, the port event still finished successfully because errdisable is disallowed

Recommended Action  No action is required.

Error Message  ACLMGR-2-EXITING: Exit reason: [chars]

Explanation  The ACLMGR service process has exited due to [char]. The process has probably been restarted automatically.

Recommended Action  No action is required.

Error Message  ACLMGR-2-INITFAIL: ACLMGR Service Init failed: [chars]

Explanation  ACLMGR Service initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  ACLMGR-2-MALLOC_ERROR: Size [dec] bytes

Explanation  The ACLMGR service could not allocate memory.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  ACLMGR-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The ACLMGR service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

ACLMGR-3

Error Message  ACLMGR-3-ACLMGR_ACL_CLIENT_TYPE_MISMATCH: Client[[chars]] trying to operate on ACL policy[[chars]] created by client [[chars]].

Explanation  Mismatch in ACL client. Trying to operate on ACL with different client.

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_ACL_OWNER_MISMATCH: The ACL [chars] deleted was in use by [chars]. Please check show running-config for more information.

Explanation  ACL that was in use by another feature was deleted

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_COMMIT_FAIL: Commit failed: [chars]

Explanation  The PPF commit failed

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_DB_LOCK_MSG: ACL database message, reason: [chars], session 0x[hex], type: [chars]

Explanation  ACL PPF database lock acquire/release related message.

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_GSYNC_ERROR: Error occured during global sync of ACL runtime database to standby, reason: [chars] , [chars]

Explanation  ACL snapshot to send the copy of runtime database to standby failed

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_PPF_ERROR: PPF error: [chars]

Explanation  The PPF generated error

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_PSS_CORRUPTED: [chars] PSS found corrupted

Explanation  The ACLMGR service has detected corruption in one of its persistent information database. The database would be recreated.

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_STAT_CONSOLIDATION_FAILURE: ACL statistic parsing or consolidation failed

Explanation  A statistic update failed during the parsing or consolidation step; statistics may have been lost

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_VACL_REDIRECTION_DISABLED_REMOVAL: VACL redirection to interface [chars] (0x[hex]) disabled: the port has been removed

Explanation  A VACL redirection to the port has been deactivated because the port has been removed

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_VERIFY_FAIL: Verify failed: [chars]

Explanation  The PPF Verify failed

Recommended Action  No action is required.

Error Message  ACLMGR-3-MTSERROR: [chars]

Explanation  ACLMGR Service encountered an MTS error. [chars] specifies the context where the error occured.

Recommended Action  No action is required.

ACLMGR-4

Error Message  ACLMGR-4-ACLMGR_PPF_WARNING: PPF warning: [chars]

Explanation  The PPF generated warning

Recommended Action  No action is required.

Error Message  ACLMGR-4-ACLMGR_VACL_REDIRECTION_DISABLED_PCM: VACL redirection to interface [chars] (0x[hex]) disabled: the port became a portchannel member

Explanation  A VACL redirection to the port has been temporarily deactivated because it is now a member in a port channel

Recommended Action  No action is required.

Error Message  ACLMGR-4-PSS_VERSION_MISMATCH: PSS [dec] Code [dec]

Explanation  There was a version mismatch between the ACLMGR service and one of its persistent storage databases. The persistent information has been translated to the new format.

Recommended Action  No action is required.

ACLMGR-6

Error Message  ACLMGR-6-ACLMGR_PPF_NOTIF: PPF notification: [chars]

Explanation  The PPF generated notification

Recommended Action  No action is required.

Error Message  ACLMGR-6-BECAME_ACTIVE: Became ACTIVE from standby mode

Explanation  The ACLMGR service on the standby supervisor became active and it is ready to serve client requests.

Recommended Action  No action is required.

Error Message  ACLMGR-6-BECAME_STDBY: Became STANDBY from active mode

Explanation  The ACLMGR service became standby from active mode.

Recommended Action  No action is required.

Error Message  ACLMGR-6-FAILED_TO_SEND_HEARTBEAT: Failed to send heartbeat to system manager: Reason=[chars]

Explanation  The ACLMGR service was unable to send heartbeat to the system manger

Recommended Action  No action is required.

Error Message  ACLMGR-6-SERVICE_UP: Initialized [chars]

Explanation  The ACLMGR service is up and ready The service was initialized in [char] mode.

Recommended Action  No action is required.

Error Message  ACLMGR-6-SRVEXIT: ACLMGR Service shutting down gracefully

Explanation  ACLMGR Service is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  ACLMGR-6-SWITCHOVER: Switching Over to other Sup.

Explanation  The ACLMGR service has successfully switched over to the standby supervisor card.

Recommended Action  No action is required.

ACLQOS Messages

This section contains the ACLQOS messages.

ACLQOS-SLOT#-0

Error Message  ACLQOS-SLOT#-0-ACLQOS_ACL_STATS_FULL: Configuring Stats associated entry failed. [chars]

Explanation  Failed to configure Entry with Stats. No free StatsID available for this TCAM region.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-0-ACLQOS_SPAN_EGRESS_RATE_LIMIT_MAX: Configuring span-egress rate limit failed. [chars]

Explanation  Failed to configure span-egress rate limit. No free entry available in ERACL TCAM region.

Recommended Action  No DDTS.

ACLQOS-SLOT#-2

Error Message  ACLQOS-SLOT#-2-ACLQOS_BUFFER_DRAIN_FAILURE: Failed to drain buffers while modifying network qos policy on unit:[dec] slice: [dec]!

Explanation  Failed to drain buffers while modifying network qos policy.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_BURST_DETECT_FPGA_INCOMPATIBLE: Current FPGA image doesn't support microburst detection feature. Please upgrade IOFPGA epld image to version [dec].

Explanation  Current FPGA image doesn't support microburst detection feature.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_BURST_DETECT_OVER_THRESHOLD: Interface [chars] queue [dec] queue-depth is over the configured burst threshold. Please check 'show queuing burst-detect detail' for more information.

Explanation  Queue depth went above configured burst threshold.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_FAILED: ACLQOS failure: [chars]

Explanation  ACLQOS operation failed in the aclqos client

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_INBAND_INTERFACE_FAILURE: Inband interface lif lookup failed ([chars])

Explanation  Inband interface lif lookup failed

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_MALLOC_FAILED: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_MCAST_NAT_TABLE_FULL: Unable to find free Nat table entry for programming multicast nat entries

Explanation  Unable to find free Nat table entry for programming multicast nat entries

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_MCAST_NAT_TCAM_FULL: Unable to find free tcam index for programming multicast nat entries

Explanation  Unable to find free tcam index for programming multicast nat entries

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_OOTR: Tcam resource exhausted: [chars]

Explanation  Tcam resources to program acls exhausted

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_QOS_NO_DROP_CLASSIFICATION_UNSUPPORTED: Only class-map with COS/DSCP match criteria can be used to identify no-drop traffic

Explanation  Only class-map with COS/DSCP match criteria can be used to identify no-drop traffic

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_QUEUE_LIMIT_IGNORED_ON_FEX: Queue-limit configuration is being allowed but will not be configured on any connected FEXes.

Explanation  Queue-limit configuration is not supported on FEX.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_QUEUE_LIMIT_MAX: Queue limit is restricted to max available buffers([dec] bytes) on unit [dec].

Explanation  Queue limit is restricted to the max available buffers on the unit.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_TCAM_CARVING_FAILURE: [chars] TCAM region carving crossed the allowed max limits. Please re-adjust the limits using "hardware access-list tcam region .." command and reload the linecard

Explanation  [chars] Tcam is excessively provisioned

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_TCAM_REGION_CREATION_FAILURE: TCAM region creation failed for instance: [dec], Group ID: [dec], reason: [chars]

Explanation  [chars] Tcam region is not properly configured

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_TCAM_TEMPLATE_FAILURE: TCAM template application has failed with reason: [chars]. Failing the module bring up

Explanation  [chars] Tcam template is not properly applied

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_UNEXPECTED_MCAST_FRAMES: [chars]

Explanation  Unexpected MCAST frames received

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_UNEXPECTED_PFC_FRAMES: [chars]

Explanation  Unexpected PFC frames received

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-PPF_FAILED: Database failure: [chars]

Explanation  Database operation failed in the aclqos client

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-PPF_SUBSCRIPTION_FAILED: PPF Subscription failure: [chars]

Explanation  PPF Subscription failed in the aclqos client

Recommended Action  No DDTS.

ACLQOS-SLOT#-3

Error Message  ACLQOS-SLOT#-3-ACLQOS_CC_INVALID: Invalid Congestion Control parameters: [chars]

Explanation  Invalid Congestion Control parameters

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-3-ACLQOS_HDL_FAILED: ACLQOS failure: [chars] failed for unit [dec] hw_inst:[dec] tid:[dec] with acl_hdl:0x%PRIx64 status:[dec]

Explanation  No action is required.

Recommended Action  Acl-pd

Error Message  ACLQOS-SLOT#-3-ACLQOS_MCAST_NAT_AND_VACL_NOT_SUPPORTED: Multicast service-reflect and VACL can't be supported on the same vlan interface

Explanation  Multicast service-reflect rules can't be applied to traffic ingressing on vlan interfaces with vlan filter (VACL) configured.

Recommended Action  No action is required.

Error Message  ACLQOS-SLOT#-3-ACLQOS_MCM_ERROR: MCM Message Inconsistent. Please collect MCM and ACLMgr Tech Support for all VDCs

Explanation  MCM Message Inconsistent

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-3-ACLQOS_PAUSE_INVALID: Invalid Pause parameters: [chars]

Explanation  Invalid Pause parameters

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-3-ACLQOS_QUEUING_ERROR: ACL/QoS queuing error: [chars]

Explanation  Internal error in ACL/QoS queuing config

Recommended Action  No DDTS.

ACLQOS-SLOT#-4

Error Message  ACLQOS-SLOT#-4-ACLQOS_3K_OVER_THRESHOLD: Inst [dec] Tcam [dec] Bank [dec]'s ([chars]) usage has crossed its threshold [dec]%, actual utilization reached [dec]%

Explanation  Tcam is almost full

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_ANALYTICS_L4OP_UNSUPPORTED: Analytics TCAM doesnt support port-expansion or LOU allocation. Please modify ACL policy and re-apply

Explanation  Analytics TCAM doesnt support port-expansion or LOU allocation. Please modify ACL policy and re-apply

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_ATOMIC_ERR: [chars]

Explanation  Tcam will be overused, please turn off atomic update

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_BC_OVER_THRESHOLD: Bank Chaining enabled: Inst [dec]'s usage has reached its threshold

Explanation  Tcam is almost full

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_FC_WARNING: Found stale FCoE entry in instance [dec]. VSAN: [dec], SID: 0x[hex], DID: 0x[hex], SI:[dec], SI_MASK:[dec], RW_VSAN: [dec], RW_VSAN_FLAG: [dec], RW_SID: 0x[hex], RW_SID_FLAG: [dec], RW_DID: 0x[hex]. RW_DID_FLAG: [dec] Cleaning it up.

Explanation  Found stale FCoE entry in instance [dec]. VSAN: [dec], SID: 0x[hex], DID: 0x[hex], SI:[dec], SI_MASK:[dec], RW_VSAN:[dec], RW_VSAN_FLAG: [dec], RW_SID: 0x[hex], RW_SID_FLAG:[dec], RW_DID: 0x[hex]. RW_DID_FLAG: [dec] Cleaning it up.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_MATCH_ALL_MERGE_UPDATE: Warning (match_all merging): [chars]

Explanation  Warning (match_all merging)

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_NX_OVER_THRESHOLD: Inst [dec] Tcam [dec]'s([chars]) usage has reached its threshold

Explanation  Tcam is almost full

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_OPENFLOW_DFLT_MISS_UNSUPP: Openflow default-miss action needs [chars] TCAM region to be configured in double-wide mode

Explanation  Openflow default-miss action specified without configuring TCAM in double-wide mode

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_OVER_THRESHOLD: Inst [dec] Tcam [dec] Bank [dec]'s ([chars]) usage has reached its threshold

Explanation  Tcam is almost full

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_QUEUING_COS2Q_INVALID: ACL/QoS invalid queuing policy because of cos map change: [chars] queue [chars], interface [chars]

Explanation  Attemped to configure an invalid queuing policy

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_QUEUING_INVALID: ACL/QoS invalid queuing policy: [chars]

Explanation  Attemped to configure an invalid queuing policy

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_TAP_AGG_REDIR_INVALID: Redirect action invalid without Tap aggregation enable, interface [chars]

Explanation  Redirect action specified without Tap aggregation enable

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_UNDER_THRESHOLD: Tcam [dec] Bank [dec]'s usage is below the threshold now

Explanation  Tcam's usage is below the threshold

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_WARNING: ACLQOS Warning: [chars]

Explanation  ACLQOS Warnings

Recommended Action  No DDTS.

ACLQOS-SLOT#-5

Error Message  ACLQOS-SLOT#-5-ACLQOS_CTP_DEFAULT_COPP: CTP Probe mechanism is currently using the default class-map. Please modify the COPP profile type or create a custom COPP profile and re-apply to enable use of monitoring class-map

Explanation  After ISSU, CTP probes may use default class-map, if the COPP profile is not modified.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-5-ACLQOS_DISRUPTIVE_IPv6_UPDATE: Disruptive update of IPv6 compression entries

Explanation  Disruptive IPv6 compression entries update

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-5-ACLQOS_MAC_SA_DA_OVERLAP_LOG: MAC [chars] overlap for address(mask) 0x[hex][hex](0x[hex][hex]) with 0x[hex][hex](0x[hex][hex]) for hardware instance [dec]

Explanation  MAC SA/DA overlaps with already configured value. Overlapping MAC SA/DA matching is not supported on this platform

Recommended Action  No action is required.

Error Message  ACLQOS-SLOT#-5-ACLQOS_NAT_PUNT_ACL_CMN_STATS: All NAT redirect access-list entries will share the same statistics counter

Explanation  Size of NAT TCAM region is more than the default size value, due to which, statistics cannot be allocated for every NAT access-list configured. All configured NAT access-list entries will share the same statistics counter

Recommended Action  No action is required.

Error Message  ACLQOS-SLOT#-5-ACLQOS_NON_ATOMIC: Non atomic ACL/QoS policy update done for [chars]

Explanation  Non atomic ACL/QoS policy update was done

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-5-ACLQOS_QOS_POLICER_DEFAULT_BURST: Using Default Policer Burst values for QOS policy

Explanation  Due to the limited number of QOS Policer Burst profiles supported by the platform, configured burst values are mapped to platform supported default Burst values.

Recommended Action  No action is required.

ACLTCAM Messages

This section contains the ACLTCAM messages.

ACLTCAM-2

Error Message  ACLTCAM-2-ACL_TCAM_ADJ_EXHAUSTED: ACLTCAM failed to program route for VSAN: [dec], SID: [chars] DID: [chars], error: [chars].

Explanation  ACLTCAM process experienced a failure while programming route for VSAN [dec] SID [chars] DID [chars] due to resource exhaustion. [chars] is the error code.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_ALMOST_FULL: TCAM close to FULL. [chars] TCAM Usage ([dec]/[dec]) exceeded [dec]% fwd-eng: [dec], [chars]

Explanation  [chars] TCAM usage [dec]/[dec] exceeded [dec] percent on fwd-engine [dec], [chars]

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_CONFIG_READ_FROM_DRIVER_FAILED: [chars] [dec], Error: 0x[hex].

Explanation  Unable to read configuration from forwarding engine ASIC driver. [chars] [dec], Error: 0x[hex].

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_CONFIG_WRITE_TO_DRIVER_FAILED: [chars] [dec], Error: 0x[hex].

Explanation  Unable to write configuration to forwarding engine ASIC driver. [chars] [dec], Error: 0x[hex].

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_ENTRY_DOUBLE_DEL: Deletion of unused shadow table entry at loc: 0x[hex].

Explanation  Deletion of unused shadow table entry at loc: [hex]

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_FLOW_STATS_READ_FAILED: Hardware flow stats read failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec], Error: [chars]).

Explanation  Hardware flow stats read failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec] Error: [chars]).

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_INCONSISTENT_DATABASE: Database found inconsistent.

Explanation  Database found inconsistent.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_INCONSISTENT_TCAM_CONTENTS: TCAM contents found inconsistent.

Explanation  TCAM contents are found inconsistent.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_INIT_FAILED: Initialization failed for forwarding engine ASIC: [dec], [chars] TCAM.

Explanation  Initialization failed for forwarding engine ASIC [dec], in [chars] TCAM.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_INIT_REGIONS_FAILED: Initialization failed for forwarding engine ASIC: [dec], [chars] TCAM, [chars] Region.

Explanation  Initialization of regions failed for forwarding engine ASIC [dec], in [chars] TCAM, for [chars] Region.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_MALLOC_FAILURE: Memory allocation failed for size [dec].

Explanation  Memory allocation is failed for size [dec] bytes.

Recommended Action  Restart the process.

Error Message  ACLTCAM-2-ACL_TCAM_MTS_FAILURE: MTS operation failed: [chars].

Explanation  MTS operation failed. [chars] is the reason.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_MTS_Q_FULL: MTS queue for SAP [dec] is full

Explanation  MTS queue for SAP [dec] is full

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_MTS_REGISTRATION_FAILED: MTS registration failed for opCode: [dec].

Explanation  MTS registration failed for opCode: [dec].

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_NO_ROUTE: ACLTCAM failed to get route for VSAN: [dec], Rewrite: [chars] DID: [chars] DID MASK: [chars], error: 0x[hex].

Explanation  ACLTCAM process experienced a failure while getting route for VSAN [dec] Rewrite [chars] DID [chars] DID Mask [chars]. [hex] is the error code.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_NO_TCAM_LEFT: ACLTCAM resource exhausted for interface : [chars]

Explanation  ACLTCAM hardware resource is completely used.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_PHY_TCAM_READ_FAILED: [chars] read from hardware TCAM failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec], Error: [chars]).

Explanation  [chars] read from hardware TCAM failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec] Error: [chars]).

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_PHY_TCAM_READ_INVALID: Invalid([chars], value: [dec]) TCAM entry read from hardware TCAM (FWD-Engine: [dec], [chars] TCAM, Address: [dec]), Ignoring this entry.

Explanation  Invalid([chars], value: [dec]) TCAM entry from hardware TCAM(FWD-Engine: [dec], [chars] TCAM, Address: [dec]) Ignoring this entry

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_PHY_TCAM_WRITE_FAILED: [chars] write to hardware TCAM failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec], Error: [chars]).

Explanation  [chars] write to hardware TCAM failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec] Error: [chars]).

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_PRIO_REGION_MISMATCH: Error! Trying to program an entry with prio [dec] ([hex]) in region [chars]. prio2regionmap provides region [chars] for prio [dec] ([hex])

Explanation  Error! Trying to program an entry with prio [dec] ([hex]) in region [chars]. prio2regionmap provides region [chars] for prio [dec] ([hex])

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_PSS_FAILURE: Failed to do PSS operation: [chars], reason: 0x[hex].

Explanation  Failed to do PSS operation [chars]. [hex] is the reason.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-PSS_OPEN_FAILED: PSS open failed - [hex].

Explanation  Persistent database handle could not obtained for ACLTCAM. [hex] is the error.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-RECONS_FAILED: Reconstruction of TCAM contents failed during upgrade - [hex].

Explanation  During non-disruptive upgrade, the ACLTCAM contents are not properly reconstructed. [hex] is the error.

Recommended Action  No action is required.

ACLTCAM-3

Error Message  ACLTCAM-3-ACL_TCAM_INV_TCAM_SYNC_ATTEMPT: Attempt to write invalid shadow entry: [dec] ([dec]/[dec]) to TCAM, fwd-engine: [dec] ([chars]), change-array: [dec]/[dec], region-id: [dec], MTS opcode: [dec], rr-token: [hex]

Explanation  Attempt to write invalid shadow entry: [dec] ([dec]/[dec]) to TCAM, fwd-engine: [dec] ([chars]), change-array: [dec]/[dec], region-id: [dec], MTS opcode: [dec], rr-token: [hex]

Recommended Action  No action is required.

Error Message  ACLTCAM-3-ACL_TCAM_MTS_Q_LEAK: Possible MTS buffer leak for SAP [dec]

Explanation  Possible MTS buffer leak for SAP [dec]

Recommended Action  No action is required.

Error Message  ACLTCAM-3-REGISTER_FAILED: Could not register to MTS opcode [chars] - error [hex].

Explanation  ACLTCAM process could not register to the notifications mentioned by [chars]. [hex] is the error.

Recommended Action  No action is required.

ACLTCAM-4

Error Message  ACLTCAM-4-ACL_TCAM_BELOW_THRESHOLD: [chars] TCAM usage ([dec]/[dec]) fell below [dec]% fwd-eng: [dec], [chars]

Explanation  [chars] TCAM usage [dec]/[dec] fell below [dec] percent on fwd-engine [dec], [chars]

Recommended Action  No action is required.

Error Message  ACLTCAM-4-ACL_TCAM_BEYOND_THRESHOLD: [chars] TCAM usage ([dec]/[dec]) exceeded [dec]% fwd-eng: [dec], [chars]

Explanation  [chars] TCAM usage [dec]/[dec] exceeded [dec] percent on fwd-engine [dec], [chars]

Recommended Action  No action is required.

Error Message  ACLTCAM-4-ACL_TCAM_FLOW_COUNTER_INVALIDATED: Flow counter for flow: vsan: [dec], sid: 0x[hex], did: 0x[hex] with statistics: frames = [dec] & bytes = [dec] was invalidated due to: [chars]

Explanation  ACLTCAM process invalidated the flow counter for flow VSAN [dec] SID [hex] DID [hex] with collected stats of [dec] frames and [dev] bytes was invalidated because of reason [[chars]].

Recommended Action  No action is required.

Error Message  ACLTCAM-4-ACL_TCAM_FLOW_COUNTER_VALIDATED: Flow counter for flow: vsan: [dec], sid: 0x[hex], did: 0x[hex] is now valid

Explanation  ACLTCAM process validated the flow counter for flow VSAN [dec] SID [hex] DID [hex].

Recommended Action  No action is required.

Error Message  ACLTCAM-4-ACL_TCAM_MTS_Q_HIGH: MTS queue for SAP [dec] is close to full

Explanation  MTS queue for SAP [dec] is close to full

Recommended Action  No action is required.

ACLTCAM-6

Error Message  ACLTCAM-6-ACL_TCAM_STATUS: Status: [chars].

Explanation  ACLTCAM status is reported as: [chars].

Recommended Action  No action is required.

ACL Messages

This section contains the ACL messages.

ACL-2

Error Message  ACL-2-ACL_HA_FAILURE: Failed to do high availability operation: [chars].

Explanation  Failed to do high availability operation. [chars] is the reason.

Recommended Action  No action is required.

Error Message  ACL-2-ACL_INIT_FAILED: Initialization failed for ACL: [chars], reason: 0x[hex].

Explanation  Initialization failed for ACL due to [chars], reason: [hex].

Recommended Action  No action is required.

Error Message  ACL-2-ACL_LINECARD_STATUS: Status from linecard: [dec], for module: [chars](ID: [dec]), status : [dec], error_id: 0x[hex], catastrophic: [chars], restart count: [dec].

Explanation  Status from linecard: [dec], for module: [chars](ID: [dec]), status : [dec], error_id: [hex], catastrophic: [chars], restart count: [dec].

Recommended Action  No action is required.

Error Message  ACL-2-ACL_MTS_FAILURE: Failed to do MTS operation: [chars].

Explanation  Failed to do MTS operation. [chars] is the reason.

Recommended Action  No action is required.

Error Message  ACL-2-ACL_MTS_Q_FULL: MTS queue for SAP [dec] is full

Explanation  MTS queue for SAP [dec] is full

Recommended Action  No action is required.

Error Message  ACL-2-ACL_MTS_REGISTRATION_FAILED: MTS options setting to [hex] failed for opCode: [dec].

Explanation  MTS options setting to [hex] failed for opCode: [dec].

Recommended Action  No action is required.

Error Message  ACL-2-ACL_PENDING_MSG_ARR_FULL: ACL Upgrade Pending Messages Array is Full with [dec] messages. Failing the MTS message with Opc: [dec], RR_TOKEN: 0x[hex]

Explanation  ACL Upgrade Pending Messages Array is Full with [dec] messages. Failing the MTS message with Opc: [dec], RR_TOKEN: [hex]

Recommended Action  No action is required.

Error Message  ACL-2-ACL_PSS_FAILURE: Failed to do PSS operation: [chars], reason: 0x[hex].

Explanation  Failed to do PSS operation [chars]. [hex] is the reason.

Recommended Action  No action is required.

Error Message  ACL-2-ACL_PSS_VER_FAIL: PSS file [chars] has version [dec].[dec].[dec], expected version [dec].[dec].[dec].

Explanation  There was a mismatch in the PSS version. [chars] indicates the PSS service, [dec].[dec].[dec] its current version number and [dec].[dec].[dec] the expected version.

Recommended Action  No action is required.

Error Message  ACL-2-ACL_RUNTIME_FAILURE: [chars] [dec], Error: 0x[hex]

Explanation  ACL runtime failure is reported as [chars] [dec], reason: [hex].

Recommended Action  No action is required.

Error Message  ACL-2-ACL_TCAM_FAILURE: Failed to do TCAM operation: [chars].

Explanation  Failed to do TCAM operation. [chars] is the reason.

Recommended Action  No action is required.

ACL-3

Error Message  ACL-3-ACL_MTS_Q_LEAK: Possible MTS buffer leak for SAP [dec]

Explanation  Possible MTS buffer leak for SAP [dec]

Recommended Action  No action is required.

ACL-4

Error Message  ACL-4-ACL_MTS_Q_HIGH: MTS queue for SAP [dec] is close to full

Explanation  MTS queue for SAP [dec] is close to full

Recommended Action  No action is required.

Error Message  ACL-4-ACL_WARNING: [chars] [dec]

Explanation  ACL warning messages is reported as [chars] [dec].

Recommended Action  No action is required.

ACL-5

Error Message  ACL-5-ACL_ADJ_SHARING_STATUS: Successfully completed "[chars]" on Generation 2 linecards.

Explanation  Successfully completed the command \[chars]\ on Generation 2 linecards.

Recommended Action  No action is required.

ACL-6

Error Message  ACL-6-ACL_DIAG_EVENT_STATUS: [chars] 0x[hex].

Explanation  ACL system health management event status is reported as [chars] [hex].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_E_PORT_EVENT_STATUS: [chars] [chars].

Explanation  ACL xEport event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_FCC_EVENT_STATUS: [chars] [chars].

Explanation  ACL FCC event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_LINECARD_EVENT_STATUS: [chars] [hex].

Explanation  ACL linecard event status is reported as [chars] [dec].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_MCAST_EVENT_STATUS: [chars] [chars].

Explanation  ACL multicast event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_NX_PORT_EVENT_STATUS: [chars] [chars].

Explanation  ACL Nx Port event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_PORT_MODE_EVENT_STATUS: [chars] [chars].

Explanation  ACL portmode event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_RUNTIME_STATUS: [chars] [dec]

Explanation  ACL runtime status is reported as [chars] [dec].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_SPAN_DEST_CONFIG_STATUS: [chars] [chars].

Explanation  ACL SPAN destination config event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_SPAN_SRC_CONFIG_STATUS: [chars] [chars].

Explanation  ACL SPAN source config event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_STATUS: ACL Status: [chars].

Explanation  ACL status is reported as [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_UPDATE_SSRAM_QOS_EVENT_STATUS: [chars] [chars].

Explanation  ACL update SSRAM for QoS event status is reported as [chars] [chars].

Recommended Action  No action is required.

AMM Messages

This section contains the AMM messages.

AMM-SLOT#-0

Error Message  AMM-SLOT#-0-CLI_INIT_FAILED: CLI library initialization failed!

Explanation  AMM failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  AMM-SLOT#-0-TIMER_INIT_FAILED: Timer subsystem initialization failed!

Explanation  AMM failed to initialize timer library. This is a fatal error.

Recommended Action  No action is required.

AMM-SLOT#-2

Error Message  AMM-SLOT#-2-AMM_MEM_ALLOC: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No action is required.

Error Message  AMM-SLOT#-2-AMM_RECOVERY_ERROR: Error in Recovery: [chars]

Explanation  AMM failed to recover after a re-start. This is a fatal error.

Recommended Action  No action is required.

AMM-SLOT#-6

Error Message  AMM-SLOT#-6-INITIALIZED: Internal state created [chars]

Explanation  AMM has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

ASCII-CFG Messages

This section contains the ASCII-CFG messages.

ASCII-CFG-2

Error Message  ASCII-CFG-2-ACFG_CONFIGURATION_APPLY_ERROR: Error encountered while Ascii configuration was being applied. Please use "show startup-config log" or "show startup-config mdp-log" to view details

Explanation  At least one command failed while Ascii configuration was being applied

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_CR_FEATURE_BFD_DISABLED: Operation failed because [chars]

Explanation  Feature bfd is required for command - ip route static bfd

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_LIB_INVOKE_ERR: Ascii config library invocation error: [chars]

Explanation  Error encountered while library function was being invoked to display Ascii configuration

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_OPER_FAIL: Operation failed because of [chars]

Explanation  Operation failed

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_ROLLBACK_FAILED: Rollback to checkpoint [chars] Failed, Going to undo the changes (atomic option)

Explanation  Rollback operation failed for atomic option

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_ROLLBACK_UNDO_FAILED: Undo failed for atomic Rollback, Please correct the error manually and retry rollback

Explanation  Undoing the rollback changes (for atomic behavior) Failed

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_SYSLOG_INIT_FAILED: Ascii config Syslog Init Error

Explanation  Error encountered while Initializing Syslog for Ascii Config

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-CONFIG_REPLAY_STATUS: [chars] Replay [chars].

Explanation  Bootstrap or Ascii Configuration Replay Status info.

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-CONF_CONTROL: [chars]

Explanation  Configuration restore control info.

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-CR_RESTORE_FAIL: [chars]

Explanation  Config restore failed during Configure replace

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-PSS_VER_FAIL: PSS file [chars] has version [dec].[dec].[dec], expected version [dec].[dec].[dec]

Explanation  There was a mismatch in the PSS version. [chars] indicates the PSS service, [dec].[dec].[dec] its current version number and [dec].[dec].[dec] the expected version

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  ASCII-CFG-2-SYSERR_ACFG_NO_STARTUP_CFG_FILE: [chars]

Explanation  Startup configuration file is empty

Recommended Action  No action is required.

ASCII-CFG-3

Error Message  ASCII-CFG-3-ACFG_MTSERROR: [chars]

Explanation  Ascii-cfg-server (rollback process) encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

ASCII-CFG-6

Error Message  ASCII-CFG-6-ACFG_CHECKPOINT_CLEAR_DATABASE: cleared all the configuration checkpoints

Explanation  Cleared all the configuration checkpoints

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_CHECKPOINT_CREATED: Created configuration checkpoint [chars]

Explanation  Created configuration checkpoint

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_CHECKPOINT_DELETED: Deleted configuration checkpoint [chars]

Explanation  Deleted configuration checkpoint

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_MAX_CHECKPOINTS: Maximum no of checpoints reached, Removing the oldest checkpoint

Explanation  Maximum no.of checkpoints reached, removing the oldest checkpoint

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_ROLLBACK_ATOMIC: Performing configuration rollback to checkpoint [chars] (with atomic option)

Explanation  Performing configuration rollback with atomic option

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_ROLLBACK_BEST: Performing configuration rollback to checkpoint [chars] (with best-effort option)

Explanation  Performing configuration rollback with best-effort option

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_ROLLBACK_FIRST_ERR: Performing configuration rollback to checkpoint [chars] (with stop-at-first failure option)

Explanation  Performing configuration rollback with stop-at-first-failure option

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-INFORMATION: [chars]

Explanation  An event happend that affects Acfg-Rollback. [chars] indicates the event

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-PSS_ERR: [chars]

Explanation  An error occurred during an Acfg PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

ASSOC_MGR Messages

This section contains the ASSOC_MGR messages.

ASSOC_MGR-0

Error Message  ASSOC_MGR-0-EMERGENCY_MSG: [chars]

Explanation  Association Manager Emergency Message

Recommended Action  Please file the bug for Association Manager Component thro' CDETS

ASSOC_MGR-1

Error Message  ASSOC_MGR-1-ALERT_MSG: [chars]

Explanation  Association Manager Alert Message

Recommended Action  Association Manager Internal Operation Alert

ASSOC_MGR-2

Error Message  ASSOC_MGR-2-CRITICAL_MSG: [chars]

Explanation  Association Manager Critical Message

Recommended Action  No action is required.

ASSOC_MGR-3

Error Message  ASSOC_MGR-3-ERROR_MSG: [chars]

Explanation  Association Manager Error Message

Recommended Action  No action is required.

ASSOC_MGR-4

Error Message  ASSOC_MGR-4-WARN_MSG: [chars]

Explanation  Association Manager Warning Message

Recommended Action  No action is required.

ASSOC_MGR-5

Error Message  ASSOC_MGR-5-NOTIF_MSG: [chars]

Explanation  Association Manager Notification Message

Recommended Action  No action is required.

ASSOC_MGR-6

Error Message  ASSOC_MGR-6-ASSOC_ACTIVATED: Association Activated for vlan id:[dec] <--> vsan id:[dec]

Explanation  Association Activated

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_CREATED: Association Created for vlan id:[dec] <--> vsan id:[dec]

Explanation  Association Created

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_DEACTIVATED: Association Deactivated for vlan id: [dec] <--> vsan id: [dec]

Explanation  Association Deactivated

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_DELETED: Association Deleted for vlan id: [dec] <--> vsan id: [dec]

Explanation  Association Deleted

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_MGR_STATEFULL_RESTART: Association Manager Statefull Restart

Explanation  Association Manager Stateful Restart

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_MGR_STATELESS_RESTART: Association Manager Stateless Restart

Explanation  Association Manager Stateless Restart

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_OPER_STATUS_CHG: Association status for vlan id: [dec] <--> vsan id: [dec] changed from [chars] to [chars]

Explanation  Association Operational State Change

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-INFO_MSG: [chars]

Explanation  ASSOC Manager Informational Message

Recommended Action  No action is required.

ASSOC_MGR-7

Error Message  ASSOC_MGR-7-DEBUG_MSG: [chars]

Explanation  Association Manager Debug Message

Recommended Action  No action is required.

BIOS_DAEMON Messages

This section contains the BIOS_DAEMON messages.

BIOS_DAEMON-2

Error Message  BIOS_DAEMON-2-BIOS_DAEMON_FLASH_WARNING: Flash chip not supported by running image. Skipping bios upgrade.

Explanation  BIOS CHIP NOT SUPPORTED

Recommended Action  No action is required.

Error Message  BIOS_DAEMON-2-BIOS_DAEMON_PRI_BOOT_FAIL: System booted from Alternate BIOS Flash

Explanation  Boot from Alternate

Recommended Action  SYSLOGDOC_NOACTION

Error Message  BIOS_DAEMON-2-BIOS_DAEMON_SUP_ERROR: BIOS Sector ([dec]) is write protected

Explanation  BIOS WRITE PROTECTED

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BIOS_DAEMON-5

Error Message  BIOS_DAEMON-5-BIOS_DAEMON_PRI_BOOT: System booted from Primary BIOS Flash

Explanation  Boot from Primary

Recommended Action  SYSLOGDOC_NOACTION

BIOS_DAEMON-SLOT#-2

Error Message  BIOS_DAEMON-SLOT#-2-BIOS_DAEMON_LC_ERROR: BIOS Sector ([dec]) is write protected

Explanation  BIOS WRITE PROTECTED

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  BIOS_DAEMON-SLOT#-2-BIOS_DAEMON_LC_PRI_BOOT_FAIL: System booted from Alternate BIOS Flash

Explanation  Boot from Alternate

Recommended Action  SYSLOGDOC_NOACTION

BIOS_DAEMON-SLOT#-5

Error Message  BIOS_DAEMON-SLOT#-5-BIOS_DAEMON_LC_PRI_BOOT: System booted from Primary BIOS Flash

Explanation  Boot from Primary

Recommended Action  SYSLOGDOC_NOACTION

BOOTUP_TEST Messages

This section contains the BOOTUP_TEST messages.

BOOTUP_TEST-2

Error Message  BOOTUP_TEST-2-EOBC_FAIL: Module [dec] has failed test [chars] on EOBC due to error [chars]

Explanation  Online diagnostics EOBC test has failed

Recommended Action  No action is required.

Error Message  BOOTUP_TEST-2-EOBC_SKIP: Module [dec] has failed test [chars] on EOBC due to error [chars]

Explanation  Online diagnostics ManagementPort test has failed

Recommended Action  No action is required.

Error Message  BOOTUP_TEST-2-MGMT_PORT_FAIL: Module [dec] has failed test [chars] on Management Port due to error [chars]

Explanation  Online diagnostics ManagementPort test has failed

Recommended Action  No action is required.

Error Message  BOOTUP_TEST-2-MGMT_PORT_SKIP: Module [dec] has skipped test [chars] on Management Port due to error [chars]

Explanation  Online diagnostics ManagementPort test is skipped

Recommended Action  No action is required.

BOOTVAR Messages

This section contains the BOOTVAR messages.

BOOTVAR-2

Error Message  BOOTVAR-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The service failed to allocate memory.

Recommended Action  Check if the system is low on memory, if so reset the switch.

Error Message  BOOTVAR-2-AUTOCOPY_FAILED: Autocopy of file [chars] to standby failed. [chars] (Error-id: 0x[hex])

Explanation  The image deemed to be copied to standby via the auto-copy feature failed.

Recommended Action  Check error id for specified reason.

Error Message  BOOTVAR-2-AUTOSYNC_FAILED: Image autosync failed. Reason: [chars] ([hex])

Explanation  Image synchronization failed.

Recommended Action  Check that there is enough space on the flash, as well as system high availability status.

Error Message  BOOTVAR-2-BOOT_NXOS_DOWNGRADE: Boot variable has been modified for a downgrade. Downgrade by manually setting boot variables is not supported as configuration may be lost after reboot.

Explanation  Downgrading by manually configuring the boot variables is not supported. This method may result in loss of configuration and disruption to traffic.

Recommended Action  Use the 'install all' CLI command to convert configuration between versions automatically during downgrades.

Error Message  BOOTVAR-2-BOOT_NXOS_UPGRADE: Boot variable has been modified for an upgrade. Upgrade by manually setting boot variables is not recommended as configuration may be lost after reboot.

Explanation  Upgrading by manually configuring the boot variables is not recommended. This method may result in loss of configuration and disruption to traffic.

Recommended Action  Use the 'install all' CLI command to convert configuration between versions automatically during upgrades.

Error Message  BOOTVAR-2-CONFIG_ERROR: Failed to update boot configuration

Explanation  An error has occurred during the update of the boot configuration files

Recommended Action  Check that there is enough space on the flash, show boot to check the configured image names, show loader internal configuration to compare them with the current bootloader configuration, if they are not coherent do write erase and retry to save the configuration.

Error Message  BOOTVAR-2-IMAGE_NOT_COMPATIBLE: Warning: image [chars] is not compatible with the current platform in SUP [dec]

Explanation  The input image name is not compatible with the current platform.

Recommended Action  Make sure a right image is specified before reboot.

BOOTVAR-3

Error Message  BOOTVAR-3-AUTOCOPY_FAILED_STANDBY_FULL: Autocopy of file [chars] to standby failed due to not enough disk space on standby

Explanation  There is not enough disk space on the standby for the file to be copied.

Recommended Action  Clear space on the standby disk.

Error Message  BOOTVAR-3-INIT_FAILED: Initialization failed: Component [chars]

Explanation  The service failed to start The failure occurs during initialization of the component [chars].

Recommended Action  Show processes to check the status of the other processes, pay attention to the specified component.

Error Message  BOOTVAR-3-LOAD_VERIFY_LIB_FAILED: Fetching library [chars] failed, reason=[chars]

Explanation  Failed to load bootvar specified verification library.

Recommended Action  No action is required.

Error Message  BOOTVAR-3-MODULE_LOCK_FAIL: Unable to get module lock, please don't reload

Explanation  Unable to acquire modlock to prevent user to reload during auto-sync.

Recommended Action  No action is required.

Error Message  BOOTVAR-3-NEIGHBOR_REJECT_AUTOCOPY: auto-copy failed - not supported by neighbor supervisor.

Explanation  Standby supervisor does not support auto-copy, thus failed.

Recommended Action  No action is required.

Error Message  BOOTVAR-3-VERIFY_FAILED: Image [chars] for bootvar [chars] verification failed, reason=[chars]

Explanation  The image set for this bootvar has failed the verification process, this is just a warning.

Recommended Action  Check reason to determine actions.

BOOTVAR-5

Error Message  BOOTVAR-5-AUTOCOPY_SUCCEED: auto-copy of file [chars] to standby supervisor succeed

Explanation  Auto copy of the file succeed, image integrity verified by standby.

Recommended Action  No action is required.

Error Message  BOOTVAR-5-AUTOCOPY_VERIFY_SEND_FAILED: Unable to ask standby to verify file [chars], error = [hex]

Explanation  Upon copied the image to standby, failed to send message to ask standby to verify integrity.

Recommended Action  Turn auto-copy off and back on.

Error Message  BOOTVAR-5-AUTOSYNC_DONE: Image autosync done

Explanation  The image synchronization done successfully.

Recommended Action  No action is required.

Error Message  BOOTVAR-5-AUTOSYNC_REBOOT: Rebooting standby after successful autosync

Explanation  Image autosync has been successful, resetting the standby supervisor to load the new image.

Recommended Action  Check that the standby sup reloads correctly.

Error Message  BOOTVAR-5-AUTOSYNC_START: Starting image autosync. Please wait until completion...

Explanation  The standby-sup has requested the sync of the current image.

Recommended Action  No action is required.

Error Message  BOOTVAR-5-IMAGE_NOTEXISTS_ACTIVE: Warning: image [chars] doesn't exist on active sup

Explanation  The input image name doesn't exist on the active supervisor.

Recommended Action  Check whether the input image name you entered exists and make sure that you have the image on the flash before reboot.

Error Message  BOOTVAR-5-IMAGE_NOTEXISTS: Warning: image [chars] doesn't exist on sup[dec]

Explanation  The input image name doesn't exist on the specified supervisor.

Recommended Action  Check whether the input image name you entered exists and make sure that you have the image on the flash before reboot.

Error Message  BOOTVAR-5-INVALID_NXOS_IMAGE: Warning: This is not a valid NXOS image

Explanation  This is not a valid NXOS image

Recommended Action  Check whether the input image name you entered is valid NXOS image

Error Message  BOOTVAR-5-NEIGHBOR_UPDATE_AUTOCOPY: auto-copy supported by neighbor supervisor, starting...

Explanation  Info log reporting standby's support of auto-copy. Auto-copy is being started.

Recommended Action  No action is required.

BOOTVAR-6

Error Message  BOOTVAR-6-ALREADY_IN_SYNC: Image already in sync

Explanation  No need to update the image on the standby-sup.

Recommended Action  No action is required.

Error Message  BOOTVAR-6-AUTOCOPY_DID_NOT_START: Autocopy of file [chars] to standby did not start. [chars] (Error-id: 0x[hex])

Explanation  Autocopy of the file did not start as the remote copy location does not exist

Recommended Action  No action is required.

Error Message  BOOTVAR-6-CONFIG_UPDATED: Boot configuration updated

Explanation  The boot-loader configuration files have been successfully updated.

Recommended Action  No action is required.

Error Message  BOOTVAR-6-STARTING: Boot configuration initialized

Explanation  The service has successfully started.

Recommended Action  No action is required.

CALLHOME Messages

This section contains the CALLHOME messages.

CALLHOME-2

Error Message  CALLHOME-2-EVENT: [chars]

Explanation  Callhome event [chars] occurred.

Recommended Action  If you have configured your email address to receive callhome notifications, please check your email for more details about this callhome event. If callhome was not enabled, please execute CLI commands relevant to the callhome event to get more information about the error

Error Message  CALLHOME-2-PROGRAM_EXIT: callhome process ending: [chars]

Explanation  Callhome process is exiting with reason [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CALLHOME-3

Error Message  CALLHOME-3-CALLHOME_CFS_MERGE_OPERATION_FAILED: [chars]

Explanation  [chars1]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CALLHOME-3-CALLHOME_CFS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CALLHOME-3-CALLHOME_MAX_ALERT_MSG: [chars]

Explanation  [chars]

Recommended Action  Please check the reason for the generation of the callhome messages and rectify the problem

Error Message  CALLHOME-3-EVENT_PROCESS_ERROR: error in processing callhome event [chars] reason:[chars]

Explanation  Error in processing callhome event [chars] reason:[chars]

Recommended Action  Please check your callhome configuration for proper configuration. Please check SMTP server address, email addresses for destination profiles and enable status of callhome. Use "show callhome" commands for displaying configuration.

Error Message  CALLHOME-3-MESSAGE_SIZE_EXCEED: message size for callhome alert:[chars] exceeds maximum limit for destination profile:[chars]

Explanation  Message size for callhome alert:[chars] exceeds maximum limit for destination profile:[chars]

Recommended Action  Please check the maximum message size for the destination profile under question. Increase it if possible to match the maximum limit allowed by your email destinations.

CALLHOME-6

Error Message  CALLHOME-6-NONCRIT_EVENT: [chars]

Explanation  Non-critical Callhome event [chars] occurred.

Recommended Action  If you have configured your email address to receive callhome notifications, please check your email for more details about this callhome event. If callhome was not enabled, please execute CLI commands relevant to the callhome event to get more information about the error

CDP Messages

This section contains the CDP messages.

CDP-2

Error Message  CDP-2-ALLOCFAIL: Heap Memory allocation failed: [chars]

Explanation  CDP Daemon is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  CDP-2-CDP_FEX_RX_PAYLOAD_TOO_BIG: CDP fex rx payload len is too big. opr [dec], if_index:0x[hex], from [dec]/[dec] payload_len:[dec]

Explanation  CDP PDU payload len is too big This is a warning message.

Recommended Action  No action is required.

Error Message  CDP-2-GENERROR: [chars]

Explanation  CDP Daemon encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  CDP-2-INITFAIL: CDP Daemon Initialization failed: [chars]

Explanation  CDP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  CDP-2-MCASTBINDFAIL: Failed to bind for CDP multicast address on interface 0x[hex] - [chars]

Explanation  An attempt to register for packets destined to the CDP multicast address failed. [dec] identifies the interface [char] identifies the reason.

Recommended Action  No action is required.

Error Message  CDP-2-MTSERROR: [chars]

Explanation  CDP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  CDP-2-PKTRECVFAIL: Failed to receive packet - [chars]

Explanation  Failed to receive packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  CDP-2-PKTSENDFAIL: Failed to send packet, interface 0x[hex] - [chars]

Explanation  Failed to send packet. [dec] identifies the interface [char] identifies the reason.

Recommended Action  No action is required.

Error Message  CDP-2-SOCKBINDFAIL: Failed to bind to raw socket, interface 0x[hex] - [chars]

Explanation  Failed to bind to raw socket. [dec] identifies the interface [char] identifies the reason.

Recommended Action  No action is required.

Error Message  CDP-2-SOCKOPENFAIL: Failed to open socket for receiving raw 802_2 packets - [chars]

Explanation  An attempt to open a socket for receiving raw 802_2 packets failed. [char] identifies the reason.

Recommended Action  No action is required.

CDP-3

Error Message  CDP-3-PSSERROR: [chars]

Explanation  CDP Daemon encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

CDP-4

Error Message  CDP-4-CDP_PDU_PAYLOAD_TOO_BIG: CDP PDU payload len is too big over [dec], if_index:0x[hex], payload_len:[dec](ext_hdr:[dec])

Explanation  CDP PDU payload len is too big This is a warning message.

Recommended Action  No action is required.

Error Message  CDP-4-DUPLEX_MISMATCH: Duplex mismatch discovered on [chars], with [chars]

Explanation  Duplex mismatch discovered from the received cdp packet This is a warning message.

Recommended Action  No action is required.

Error Message  CDP-4-NATIVE_VLAN_MISMATCH: Native VLAN mismatch discovered on [chars]([dec]), with [chars]([dec])

Explanation  Native VLAN mismatch discovered This is a warning message.

Recommended Action  No action is required.

CDP-5

Error Message  CDP-5-DISABLED: CDP is disabled

Explanation  CDP is disabled on the device.

Recommended Action  No action is required.

Error Message  CDP-5-ENABLED: CDP is enabled

Explanation  CDP is enabled on the device.

Recommended Action  No action is required.

Error Message  CDP-5-NEIGHBOR_ADDED: Device [chars] discovered of type [chars] with port [chars] on incoming port [chars] with ip addr [chars] and mgmt ip [chars]

Explanation  Discovered a neighbor device. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-5-NEIGHBOR_REMOVED: CDP Neighbor [chars] on port [chars] has been removed

Explanation  Deleted a neighbor device. This is an informational message.

Recommended Action  No action is required.

CDP-6

Error Message  CDP-6-CDPDUP: CDP Daemon Up.

Explanation  CDP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-CDPEXIT: CDP Daemon shutting down gracefully.

Explanation  CDP Daemon is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTDISABLE: CDP disabled on port [chars]

Explanation  CDP was disabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTDOWN: A CDP enabled port [chars] went down.

Explanation  A CDP enabled port became un-operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTENABLE: CDP enabled on port [chars]

Explanation  CDP was enabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTUP: A CDP enabled port [chars] came up.

Explanation  A CDP enabled port became operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

CFS Messages

This section contains the CFS messages.

CFS-2

Error Message  CFS-2-CFS_REJECT: CFS reject: [chars]: Switch WWN [chars], ip [chars], reason [chars]

Explanation  CFS reject: [chars] Switch WWN [chars], ip [chars], reason [chars]

Recommended Action  No action is required.

Error Message  CFS-2-EXITING: Exit reason: [chars]

Explanation  The CFS service process has exited due to [char]. The process has probably been restarted automatically.

Recommended Action  No action is required.

Error Message  CFS-2-GENERAL_ERROR: [chars]

Explanation  The CFS service has encountered an critical error. The description of error is [str.]

Recommended Action  No action is required.

Error Message  CFS-2-INITFAIL: CFS Service Init failed: [chars]

Explanation  CFS Service initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  CFS-2-LOCK_FAILED: lock failed for sap [dec] due to internal error.

Explanation  Lock failed due to Unrestricted uncoordinated count is out of sync for sap [dec]

Recommended Action  To recover from this state run command 'cfs internal decrement-unrestricted '

Error Message  CFS-2-MALLOC_ERROR: Size [dec] bytes

Explanation  The CFS service could not allocate memory.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CFS-2-MTS_REJECT: Verification failed reject MTS message SAP [dec]:RR-token 0x[hex]

Explanation  This MTS message could have been posted by the previous active running pre 3.x; MTS structure has changed since then hence ignore the MTS message, Source SAP [dec]; RR-token [hex]

Recommended Action  No action is required.

Error Message  CFS-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The CFS service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

Error Message  CFS-2-VDC_MGR_FAIL: Failed to get a valid switch mac from VDC Manager: [chars]

Explanation  VDC manager did not respond with a proper MAC address. It could have been because of a timeout in MTS received

Recommended Action  No action is required.

CFS-3

Error Message  CFS-3-ALLOCFAIL: Heap Memory allocation failed: [chars]

Explanation  CFS Service is out of dynamic memory. [chars] specifies the context where the failure occured

Recommended Action  No action is required.

Error Message  CFS-3-APP_MERGE_FAILED: Merge failed for app [chars], local switch wwn [chars], remote switch wwn [chars].Please check 'show cfs merge status name [chars]' for more information

Explanation  The CFS service has detected a merge failure.

Recommended Action  No action is required.

Error Message  CFS-3-CFS_PSS_CORRUPTED: [chars] PSS found corrupted

Explanation  The CFS service has detected corruption in one of its persistent information database. The database would be recreated.

Recommended Action  No action is required.

Error Message  CFS-3-DBERROR: [chars]

Explanation  CFS Service encountered a database error. [chars] specifies the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-FAILURE_RESPONSE: [chars] 0x[hex]

Explanation  CFS Service failed to get response [chars][hex] specify the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-FIPS_TEST_FAILED: FIPS compliance test failed

Explanation  FIPS compliance test failed

Recommended Action  No action is required.

Error Message  CFS-3-GENERROR: [chars]

Explanation  CFS Service encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  CFS-3-LICERR: [chars]

Explanation  CFS Service failed to get license.

Recommended Action  No action is required.

Error Message  CFS-3-MERGE_FAILED: Merge failed for app [chars], local switch wwn [chars],ip [chars], remote switch wwn [chars], ip [chars]

Explanation  The CFS service has detected a merge failure.

Recommended Action  No action is required.

Error Message  CFS-3-MTSERROR: [chars]

Explanation  CFS Service encountered an MTS error. [chars] specifies the context where the error occured.

Recommended Action  No action is required.

Error Message  CFS-3-PSSERROR: [chars]

Explanation  CFS Service encountered a PSS error. [chars] specifies the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-TIMEOUT_ERROR: [chars] 0x[hex]

Explanation  CFS Service encountered a timeout [chars][hex] specify the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-UNKNOWN_MSG: Recvd. from Node=[dec] SAP=[dec]

Explanation  The CFS service has received an unknown message from [dec]].[dec]. This information is for debugging only.

Recommended Action  No action is required.

CFS-4

Error Message  CFS-4-LICEXP: [chars]

Explanation  CFS Service license is going to expire. [chars] gives the expected time of expiry

Recommended Action  No action is required.

Error Message  CFS-4-PSS_VERSION_MISMATCH: PSS [dec] Code [dec]

Explanation  There was a version mismatch between the CFS service and one of its persistent storage databases. The persistent information has been translated to the new format.

Recommended Action  No action is required.

CFS-6

Error Message  CFS-6-BECAME_ACTIVE: Became ACTIVE from standby mode

Explanation  The CFS service on the standby supervisor became active and it is ready to serve client requests.

Recommended Action  No action is required.

Error Message  CFS-6-BECAME_STDBY: Became STANDBY from active mode

Explanation  The CFS service became standby from active mode.

Recommended Action  No action is required.

Error Message  CFS-6-EXCESSIVE_DELAY: [chars]

Explanation  Excessive time taken for a processing event. The description of the event is [str.]

Recommended Action  No action is required.

Error Message  CFS-6-FAILED_TO_SEND_HEARTBEAT: Failed to send heartbeat to system manager: Reason=[chars]

Explanation  The CFS service was unable to send heartbeat to the system manger

Recommended Action  No action is required.

Error Message  CFS-6-GENERAL_EVENT: [chars]

Explanation  The CFS service has generated an important event. The description of the event is [str.]

Recommended Action  No action is required.

Error Message  CFS-6-INVALID_CHECKSUM: Received packet from peer on if-index([hex]) with corrupted checksum

Explanation  This could be because of errors in the link

Recommended Action  No action is required.

Error Message  CFS-6-INVALID_IF_INDEX: Received packet on if-index([hex]) which is not recognized by CFS

Explanation  The if-index does not match with the if-index used in discovery or we might have already recieved an adjacency cleanup message for this if-index. Check if the if-index is that of the port-channel or a physical if-index

Recommended Action  No action is required.

Error Message  CFS-6-INVALID_PACKET: Received packet from peer on if-index([hex]) with invalid size

Explanation  This could be because of errors in the link

Recommended Action  No action is required.

Error Message  CFS-6-LOGICAL_DISTRIBUTION_INFO: vsan [dec], source wwn [chars], ip [chars] app-id [dec], session-id [dec], user [chars], [chars]

Explanation  Vsan [dec], source wwn [chars], ip [chars], app-id [dec], user [chars], event [chars]

Recommended Action  No action is required.

Error Message  CFS-6-PHY_DISTRIBUTION_INFO: source wwn [chars], ip [chars], app-id [dec], session-id [dec], user [chars], [chars]

Explanation  Source wwn [chars], ip [chars], app-id [dec], session-id [dec], user [chars], event [chars]

Recommended Action  No action is required.

Error Message  CFS-6-PSS_CREATED: [chars] PSS Created

Explanation  One of the persistent information database of CFS service has been recreated

Recommended Action  No action is required.

Error Message  CFS-6-PSS_DESTROYED: [chars] PSS Destroyed

Explanation  One of the persistent information databases of CFS Service has been intentionally destroyed and would be recreated.

Recommended Action  No action is required.

Error Message  CFS-6-REGION_CTX_REMOVED: Region info is deleted for [chars]

Explanation  [chars] is in logical scope. Regions are supported only physical scope applications

Recommended Action  No action is required.

Error Message  CFS-6-SERVICE_UP: Initialized [chars]

Explanation  The CFS service is up and ready to accept client requests The service was initialized in [char] mode.

Recommended Action  No action is required.

Error Message  CFS-6-SRVCREATED: CFS Service created

Explanation  CFS Service was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  CFS-6-SRVEXIT: CFS Service shutting down gracefully

Explanation  CFS Service is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  CFS-6-SWITCHOVER: Switching Over to other Sup.

Explanation  The CFS service has successfully switched over to the standby supervisor card.

Recommended Action  No action is required.

CLK_MGR Messages

This section contains the CLK_MGR messages.

CLK_MGR-2

Error Message  CLK_MGR-2-CLK_MGR_FC2_CRIT: CLK_MGR critical error: [chars]

Explanation  CLK_MGR fc2 clock synchronization critical error

Recommended Action  No action is required.

CLK_MGR-5

Error Message  CLK_MGR-5-CLK_MGR_CLI_CONFIG: CLK_MGR clock is synchronized by [chars] from VDC [dec]

Explanation  CLK_MGR clock is synchronized by [chars] from VDC

Recommended Action  No action is required.

CLK_MGR-6

Error Message  CLK_MGR-6-CLK_MGR_TSTAMP_CHKS_DISABLED: CLK_MGR timestamp checks disabled: [chars]

Explanation  CLK_MGR timestamp checks disabled

Recommended Action  No action is required.

Error Message  CLK_MGR-6-CLK_MGR_TSTAMP_CHKS_ENABLED: CLK_MGR timestamp checks enabled

Explanation  CLK_MGR timestamp checks enabled

Recommended Action  No action is required.

CLOUD Messages

This section contains the CLOUD messages.

CLOUD-2

Error Message  CLOUD-2-PROGRAM_EXIT: cloud-discovery process ending: [chars]

Explanation  Cloud-discovery process is exiting with reason [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CLOUD-3

Error Message  CLOUD-3-CLOUD_CFS_MERGE_OPERATION_FAILED: [chars]

Explanation  [chars1]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CLOUD-3-CLOUD_CFS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CLOUD-3-CLOUD_FEATURE_MANAGER_ERROR: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for error using feature manager and rectify the problem

Error Message  CLOUD-3-CLOUD_PSS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the pss operation and rectify the problem

CLOUD-6

Error Message  CLOUD-6-CLOUD_DISCOVERY_DONE: discovery over

Explanation  Cloud-discovery started

Recommended Action  Check cloud membership

Error Message  CLOUD-6-CLOUD_DISCOVERY_STARTED: [chars] discovery started

Explanation  Cloud-discovery started

Recommended Action  Check cloud-discovery status after sometime

CORE-DMON Messages

This section contains the CORE-DMON messages.

CORE-DMON-2

Error Message  CORE-DMON-2-MODULE_COREDUMP_DONE: kernel coredump completed on module:[dec]

Explanation  Kernel coredump finishing on a module

Recommended Action  No action is required.

Error Message  CORE-DMON-2-MODULE_COREDUMP_STARTED: kernel coredump started on module:[dec]

Explanation  Kernel coredump starting on a module

Recommended Action  No action is required.

CORE-DMON-3

Error Message  CORE-DMON-3-NO_SPACE: Failed to save core file [chars]. Try removing existing core files.

Explanation  Not enough space to save new core files

Recommended Action  No action is required.

CTS Messages

This section contains the CTS messages.

CTS-2

Error Message  CTS-2-CTS_AUTHENT_FAILURE: CTS Authentication failure on Port [chars] (CTS Failure Reason: [chars] [chars])

Explanation  Fibre-Channel Authentication failure on Port [chars].(Reason Code [chars] Detail [chars]). Please check password configurations and ensure appropriate security modes on this port as well as peer port

Recommended Action  No action is required.

Error Message  CTS-2-CTS_FIPS_BYPASS_TEST_FAILED: FIPS bypass test failed for interface: [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-CTS_KEY_EXPIRED: KEY expired on key chain [chars] interface [chars], session is going to be cleaned up

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-CTS_PRINT_CRIT: MACSec Error:Unable to configure MACSec on [chars]. It belongs to a Port channel

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-CTS_SAP_FAILED: SAP exchange failed on interface [chars]. (Reason: [chars])

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-CTS_SAP_REKEY_FAILED: SAP exchange failed on interface [chars]. (Reason: [chars])

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-DBG_INIT_FAILED: Debug Infrastructure Initialization failed ( [chars] )

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-FC2_E_INIT_FAILED: Fibre-Channel Initialization of an E_Port failed ( [chars] )

Explanation  CTS Manager has been unable to initialize with the FC-2 E-Port infrastructure.

Recommended Action  No action is required.

Error Message  CTS-2-FC2_F_INIT_FAILED: Fibre-Channel Initialization of an F_Port failed ( [chars] )

Explanation  CTS Manager has been unable to initialize with the FC-2 F-Port infrastructure.

Recommended Action  No action is required.

Error Message  CTS-2-FC2_UNKNOWN_FRM_RECD_CRIT: Received an unexpected/unknown FC-2 frame on [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-FSMU_INIT_FAILED: State Machine Infrastructure Initialization failed ( [chars] )

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-IPC_INIT_FAILED: IPC (Inter Process Communication) Initialization failed ( [chars] )

Explanation  CTS Manager has been unable to initialize with the IPC infrastructure.

Recommended Action  No action is required.

Error Message  CTS-2-LICENSE_UNAVAILABLE: !!!!!! WARNING: 'SECURITY_PKG' LICENSE NOT FOUND ON THE SYSTEM !!!!!! You have tried to enable a licensed feature [MACSEC] without installing the license.

Explanation  License violation alert!

Recommended Action  Please install the license file to continue using the feature.

Error Message  CTS-2-MEM_FAILED: Memory operations failed File: [chars] Line [dec] for size 0x[hex] bytes

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-POST_INIT_FAILED: Post-Initialization failed ( [chars] )

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-PSS_INIT_FAILED: PSS Infrastructure Initialization failed ( [chars] )

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-RBACL_ENFORCEMENT_FAILED: Failed to [chars] RBACL enforcement on [chars] [dec]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-RBACL_LC_INSERT_FAILED: RBACL programming failed for inserted module [dec]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-RBACL_TCAM_SPACE_NOT_ENOUGH: Not enough free space left on TCAM

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-RBACL_UNABLE_PARSE_ACE: Unable to parse RBACL ACE substring: [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-2-RBACL_UPDATE_FAILED: Failed to [chars] RBACL [chars]

Explanation  .

Recommended Action  No action is required.

CTS-3

Error Message  CTS-3-CTS_INVALID_KEY: MACSec: Primary or Fallback Keychain has an invalid key Interface [chars]

Explanation  No valid key found. Primary or Fallback session will be impacted. Please configure a valid key in keychain

Recommended Action  No action is required.

Error Message  CTS-3-CTS_UNSUPPORTED_CKN_CONFIG: MACSec Interface [chars]: Same CKN ([chars]) for Primary and Fallback PSK not supported

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-3-DOT1X_AUTHC_FAILED: DOT1X authentication failed on port: [chars]

Explanation  DOT1X authentication failed on the port

Recommended Action  No action is required.

CTS-4

Error Message  CTS-4-CTS_FALLBACK_MKPDU_ICV_FAILURE: MACSec: Fallback MKA PDU integrity check failed for Interface [chars]

Explanation  Fallback MKPDU ICV failure. Please match fallback keys on both ends

Recommended Action  No action is required.

Error Message  CTS-4-CTS_FALLBACK_MKPDU_VALIDATE_FAILURE: MACSec: Fallback MKA PDU validation errors for Interface [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-4-CTS_FALLBACK_NO_ACTIVE_KEY: MACSec: Fallback keychain does not have any active or valid fallback key Interface [chars]

Explanation  No active or valid Fallback key found. Fallback session mechanism will be impacted. Please configure a valid fallback key in fallback key chain

Recommended Action  No action is required.

Error Message  CTS-4-CTS_MKPDU_ICV_FAILURE: MACSec: MKA PDU integrity check failed for Interface [chars]

Explanation  MKPDU ICV failure. Please match Primary PSK on both ends

Recommended Action  No action is required.

Error Message  CTS-4-CTS_MKPDU_VALIDATE_FAILURE: MACSec: MKA PDU validation errors for Interface [chars]

Explanation  .

Recommended Action  No action is required.

CTS-5

Error Message  CTS-5-CTS_FALLBACK_MKPDU_ICV_SUCCESS: MACSec: FALLBACK MKPDU verified. Fallback keys match for Interface [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-5-CTS_FALLBACK_PEER_NOT_FOUND: MACSec: Unable to find Fallback key peer for Interface [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-5-CTS_FALLBACK_SESSION_SECURED: MACSec session SECURED on Fallback PSK: interface: [chars]

Explanation  Interface is MACSec secured with Fallback PSK.

Recommended Action  No action is required.

Error Message  CTS-5-CTS_IP_SGT_MAP_DELETE: IP-SGT mapping deleted for [chars] on [chars] [dec]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-5-CTS_IP_SGT_MAP_UPDATE: [chars] assigned SGT [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-5-CTS_MACSEC_SHUTDOWN: MACSec is [chars] on system

Explanation  Macsec is enabled/shutdown by user configuration. Macsec configuration is allowed in shutdown mode but won't take effect until enabled again.

Recommended Action  No action is required.

Error Message  CTS-5-CTS_MKPDU_ICV_SUCCESS: MACSec: MKPDU verified. Primary keys match for Interface [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-5-CTS_MKPDU_VALIDATE_MN_FAILURE: MACSec: MKA PDU validation failure due to wrong MN for Interface [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-5-CTS_NO_INCLUDE_SCI_INCOMPATIBLE_CIPHER: Interface [chars] configured with XPN-cipher but operating in non-XPN mode

Explanation  A device is forced to operate in non-XPN due to peer device pushing non-xpn cipher

Recommended Action  No action is required.

Error Message  CTS-5-CTS_SESSION_PENDING: MACSec session is in pending: interface: [chars]

Explanation  MACSec session on Interface is in pending state.

Recommended Action  No action is required.

Error Message  CTS-5-CTS_SESSION_SECURED: MACSec session SECURED: interface: [chars]

Explanation  Interface is MACSec secured.

Recommended Action  No action is required.

Error Message  CTS-5-CTS_SESSION_STOPPED: MKA Session was stopped and is not secured on Interface [chars] CKN [chars]

Explanation  MKA Session was stopped and is not secured

Recommended Action  No action is required.

Error Message  CTS-5-CTS_SESSION_UNSECURED: MACSec session is unsecured : interface: [chars]

Explanation  Interface is MACSec unsecured.

Recommended Action  No action is required.

CTS-6

Error Message  CTS-6-CTS_FIPS_BYPASS_TEST_PASSED: FIPS bypass test passed for interface: [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-CTS_KEY_CHAIN_ADDED: MACSec session key chain [chars] added

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-CTS_PRINT: MACSec print:[chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-CTS_SESSION_PORT_REINIT: MACSec session port reinited this may cause flap: Interface: [chars]

Explanation  Interface reinit happened due to a change in MACSec session state.

Recommended Action  No action is required.

Error Message  CTS-6-SXP_BIND_FAIL: CTS SXP socket bind failed for [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_CONFIG_MODE_MISMATCH: CTS SXP config mode mis-match with peer [chars] during [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_CONFIG_VER_MISMATCH: CTS SXP config version mis-match with peer [chars] during [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_CONN_PURGED: CTS SXP connection purged: vrf [dec], peer: [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_CONN_STATE_CHG_OFF: CTS SXP connection state for peer [chars] changed to off

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_DEFAULT_PASSWORD_RESET: CTS SXP default password reset

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_DEFAULT_PASSWORD_SET: CTS SXP default password set

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_DEFAULT_SRC_IP_RESET: CTS SXP default source IP address reset to [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_DEFAULT_SRC_IP_SET: CTS SXP default source IP address set to [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_INTERNAL_FAIL: CTS SXP internal failure

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_LISTEN_FAIL: CTS SXP socket listen failed

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_RX_UNKNOWN_MSG_TYPE: CTS SXP received unknown message type [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_RX_UNKNOWN_OPC_TYPE: CTS SXP received unknown opcode type [dec] for peer [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  CTS-6-SXP_STATE_CHANGE: CTS SXP [chars]

Explanation  .

Recommended Action  No action is required.

DCEFIB Messages

This section contains the DCEFIB messages.

DCEFIB-SLOT#-0

Error Message  DCEFIB-SLOT#-0-CLI_INIT_FAILED: CLI library initialization failed!

Explanation  L2mp unicast fib failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-0-TIMER_INIT_FAILED: Timer subsystem initialization failed!

Explanation  L2mp unicast fib failed to initialize timer library. This is a fatal error.

Recommended Action  No action is required.

DCEFIB-SLOT#-2

Error Message  DCEFIB-SLOT#-2-DCEFIB_MEM_ALLOC: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-2-DCEFIB_RECOVERY_ERROR: Error in Recovery: [chars]

Explanation  L2mp unicast fib failed to recover after a re-start. This is a fatal error.

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-2-U2FIB_ERR: [chars]

Explanation  L2mp unicast fib encountered an error:

Recommended Action  No action is required.

DCEFIB-SLOT#-6

Error Message  DCEFIB-SLOT#-6-INITIALIZED: Internal state created [chars]

Explanation  L2mp unicast fib has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-6-U2FIB_INFO: [chars]

Explanation  L2mp unicast fib notice:

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-6-VDC_CREATED: VDC [dec] created

Explanation  Request to create VDC [dec] in l2mp unicsat fib was successful.

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-6-VDC_REMOVED: VDC [dec] Removed

Explanation  L2mp unicast fib has successfully removed VDC [dec] from its databases.

Recommended Action  No action is required.

DEVICE_TEST Messages

This section contains the DEVICE_TEST messages.

DEVICE_TEST-2

Error Message  DEVICE_TEST-2-ACT2_FAIL: Module [dec] has failed test [chars] [dec] times on device ACT2 due to error [chars]

Explanation  Online diagnostics ACT2 test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-ASICMEM_FAIL: Module [dec] has failed test [chars] [dec] times on device ASIC Memory due to error [chars]

Explanation  Online diagnostics AsicMemoryTest test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-ASIC_REG_CHECK_FAIL: Module [dec] has failed test [chars] [dec] times on device [chars] [chars] [dec] [chars] due to error [chars]

Explanation  Online diagnostics ASICRegisterCheck test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-AUTHENTICATION_FAIL: Module [dec] ACT2-Instance-[dec]: The system integrity check has failed during the boot-up sequence. Please contact Cisco's Technical Assistance Center for more information

Explanation  Online diagnostics ACT2 Authentication failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-COMPACT_FLASH_FAIL: Module [dec] has failed test [chars] [dec] times on device BootFlash due to error [chars]

Explanation  Online diagnostics BootFlash test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-CP_FAIL: Module [dec] has failed test [chars] [dec] times on Crosspoint due to error [chars]

Explanation  Online diagnostics Crosspoint test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-CRYPTO_DEVICE_FAIL: Module [dec] has failed test [chars] [dec] times on Crypto device due to error [chars]

Explanation  Online diagnostics CryptoDevice test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-DATA_FPGA_FAIL: Module [dec] has failed test [chars] [dec] times on Data FPGA due to error [chars]

Explanation  Online diagnostics Data FPGA test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-EOBC_FAIL: Module [dec] has failed test [chars] on EOBC due to error [chars]

Explanation  Online diagnostics EOBC test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-FAN_MOD_FAIL: Module [dec] has failed test [chars] [dec] times on System Mgmt Bus for chassis [chars] instance [dec] due to error [chars] error number 0x[hex]

Explanation  Online diagnostics SystemMgmtBus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-MALLOC_FAILURE: Memory allocation failed

Explanation  Device Test process could not allocate memory

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-MGMT_PORT_SKIP: Module [dec] has skipped test [chars] on Management Port due to error [chars]

Explanation  Online diagnostics ManagementPort test is skipped

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-NVRAM_FAIL: Module [dec] has failed test [chars] [dec] times on device NVRAM due to error [chars]

Explanation  Online diagnostics NVRAM test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-NV_FILE_SYSTEM_FULL: System non-volatile storage usage is full at [dec]%. Please check [chars]. Free space available: [dec]K, total size: [dec]K

Explanation  Online diagnostics OBFL test has identified a filesystem capacity issue, please identify and remove unnecessary files

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-OBFL_FAIL: Module [dec] has failed test [chars] [dec] times on device OBFL due to error [chars]

Explanation  Online diagnostics OBFL test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-POWER_SUPPLY_FAIL: Module [dec] has failed test [chars] [dec] times on System Mgmt Bus for chassis [chars] instance [dec] due to error [chars] error number 0x[hex]

Explanation  Online diagnostics SystemMgmtBus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-PWR_MGMT_BUS_FAIL: Module [dec] has failed test [chars] [dec] times on device Power Mgmt Bus on slot [dec] due to error [chars] error number 0x[hex]

Explanation  Online diagnostics PwrMgmtBus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-RTC_FAIL: Module [dec] has failed test [chars] [dec] times on device RealTimeClock due to error [chars]

Explanation  Online diagnostics RealTimeClock test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-SPINE_CONTROL_BUS_FAIL: Module [dec] has failed test [chars] [dec] times on device Spine Control Bus on slot [dec] due to error [chars] error number 0x[hex]

Explanation  Online diagnostics SpineControlBus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-STANDBY_LOOPBACK_TEST_FAIL: Module [dec] has failed test [chars] [dec] times on [chars] [dec] due to error [chars]

Explanation  Online diagnostics StandbyFabricLoopback test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-TWOWIRE_STW_FAIL: Module [dec] has failed test [chars] [dec] times on Status Bus on slot [dec] due to error [chars]

Explanation  Online diagnostics Status bus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-USB_FAIL: Module [dec] has failed test [chars] [dec] times on device USB due to error [chars]

Explanation  Online diagnostics USB test has failed

Recommended Action  No action is required.

DEVICE_TEST-3

Error Message  DEVICE_TEST-3-INTERNAL_PORT_MONITOR_CRC_ERRORS_DETECTED: Module [dec] received CRC errors on internal interface [chars] since last run FCSErr=[dec] TotalFCSErr=[dec]

Explanation  Internal interface errors detected.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-INTERNAL_PORT_MONITOR_FAIL: Internal port failures were detected while running test.

Explanation  Internal link errors (CRC/FCS) have been detected.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-INTERNAL_PORT_MONITOR_INIT_FAIL: Failed to initialize port monitor test.

Explanation  Failed to initialize port monitor test.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-INTERNAL_PORT_MONITOR_INPUT_DISCARD_DETECTED: Module [dec] received in_discards on internal interface [chars] since last run RXErr=[dec] TotalRXErr=[dec]

Explanation  Internal interface errors detected.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-INTERNAL_PORT_MONITOR_TOTAL_PKT_INC_DETECTED: Testing only - Module [dec] received new packets on internal interface [chars] since last run delta_pkt_count=[dec] TotalPktCnt=[dec]

Explanation  Internal interface errors detected.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-INTERNAL_PORT_MONITOR_TX_ERRORS_DETECTED: Module [dec] received tx errors on internal interface [chars] since last run TXErr=[dec] TotalTXErr=[dec]

Explanation  Internal interface errors detected.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-MCE_1HR_FAIL: Module [dec] has exceeded MCE 1 hour correctable threshold of [dec] with [dec] correctable errors for address 0x%PRIx64 within 1 an hour.

Explanation  These memory errors are correctable and no functional impact to system behavior. However, excessive correctable memory errors can be an indication of possible hardware fault. Please collect \show tech gold\ and open a Support case for further investigation.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-MCE_24HR_FAIL: Module [dec] has exceeded MCE 24 hour correctable threshold of [dec] with [dec] correctable errors within 24 hours.

Explanation  These memory errors are correctable and no functional impact to system behavior. However, excessive correctable memory errors can be an indication of possible hardware fault. Please collect \show tech gold\ and open a Support case for further investigation.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-NV_FILE_SYSTEM_NEAR_FULL: System non-volatile storage usage is high at [dec]%. Please check [chars]. Free space available: [dec]K, total size: [dec]K

Explanation  Online diagnostics OBFL test has identified a filesystem capacity issue, please identify and remove unnecessary files

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_GET_DIAG_VQI_FAIL: Standby test get diag vqi failed due to error [hex]

Explanation  Device Test StandbyLoopback Test failed get vqi

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_GET_SPINE_FAIL: Standby test get spines failed due to error [hex]

Explanation  Device Test StandbyFabricLoopback Test get spine failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_INIT_FAIL: Init for standby test failed due to error [hex]

Explanation  Device Test StandbyFabricLoopback Test failed init process

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_MTS_FAIL: Mts Init for standby test failed due to error [hex]

Explanation  Device Test StandbyFabricLoopback Test failed mts init

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_SOCKET_FAIL: Standby test socket error [chars]: [hex]

Explanation  Device Test StandbyFabricLoopback Test Socket error

Recommended Action  No action is required.

DEVICE_TEST-4

Error Message  DEVICE_TEST-4-PRIMARY_BOOTROM_FAIL: Module [dec] has failed test [chars] [dec] times on device Primary BootROM due to error [chars]

Explanation  Online diagnostics PrimaryBootROM test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-4-SECONDARY_BOOTROM_FAIL: Module [dec] has failed test [chars] [dec] times on device Secondary BootROM due to error [chars]

Explanation  Online diagnostics SecondaryBootROM test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-4-THREAD_CREATE_FAIL: Thread creation failed

Explanation  Device Test process could not create threads

Recommended Action  No action is required.

Error Message  DEVICE_TEST-4-TIMER_CREATE_FAIL: Timer creation failed

Explanation  Device Test process could not create timer

Recommended Action  No action is required.

Error Message  DEVICE_TEST-4-TIMER_START_FAIL: Timer start failed

Explanation  Device Test process could not start timer

Recommended Action  No action is required.

DEVICE_TEST-5

Error Message  DEVICE_TEST-5-INTERNAL_PORT_MONITOR_END: Completed internal port monitoring test.

Explanation  Completed internal port monitoring test.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-5-INTERNAL_PORT_MONITOR_START: Starting internal port monitoring test.

Explanation  Starting internal port monitoring test.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-5-NOTICE_TEST: Memory allocation failed notice

Explanation  Device Test process could not allocate memory

Recommended Action  No action is required.

DEVICE_TEST-6

Error Message  DEVICE_TEST-6-INFO_TEST: Memory allocation failed info

Explanation  Device Test process could not allocate memory

Recommended Action  No action is required.

DEV_LOG Messages

This section contains the DEV_LOG messages.

DEV_LOG-3

Error Message  DEV_LOG-3-ERROR: [chars]

Explanation  Dev_log_lc encountered an error

Recommended Action  No action is required.

DEV_LOG-SLOT#-4

Error Message  DEV_LOG-SLOT#-4-DEV_LOG_LC_ERROR: [chars]

Explanation  Dev_log_lc encountered an error

Recommended Action  No action is required.

DFTM Messages

This section contains the DFTM messages.

DFTM-SLOT#-2

Error Message  DFTM-SLOT#-2-DFTM_INTF_NOT_FOUND: Interface [chars] not found in DFTM database [chars]

Explanation  DFTM database doesn't have the interface.

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-2-DFTM_INVALID_FTAG_NUM: DFTM received invalid number of FTags [dec] from M2RIB

Explanation  DFTM recvd invalid number of FTags from M2RIB.

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-2-DFTM_INVALID_INTF_NUM: DFTM has invalid number of interfaces [dec] in the DB

Explanation  DFTM has invalid number of interfaces in the DB.

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-2-DFTM_PC_NUM_MEMB_INVALID: DFTM received invalid number of PC members [dec] from ELTM

Explanation  DFTM recvd invalid number of PC members from ELTM.

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-2-DFTM_VLAN_NOT_FOUND: VLAN [dec] not found in DFTM database [chars]

Explanation  DFTM database doesn't have the VLAN.

Recommended Action  No action is required.

DFTM-SLOT#-3

Error Message  DFTM-SLOT#-3-DFTM_BDDB_PROG_FAILED: DFTM failed to program BDDB Entry

Explanation  DFTM failed to program BDDB Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_BDT_PROG_FAILED: DFTM failed to program BD Table Entry

Explanation  DFTM failed to program BD Table Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_IFIDX_INVALID_PORT_LAYER: Invalid Port Layer Received for interface: [chars]

Explanation  Invalid Port Layer Received for interface

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_IFIDX_INVALID_PORT_MODE: Invalid Port Mode Received for interface: [chars]

Explanation  Invalid Port Mode Received for interface

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_IFIDX_INVALID_PORT_TYPE: Invalid Port Type Received for interface: [chars]

Explanation  Invalid Port Type Received for interface

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_IFIDX_TYPE_ERROR: Failed to get type for interface: [chars]

Explanation  Failed to get type for the interface

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_INVALID_PRIM_SEC_VLAN_REQ: DFTM received prim-sec request for a non-exiting sec vlan [dec] on primary [dec]

Explanation  DFTM recvd prim-sec vlan mapping request for a non-existing sec vlan on prim vlan

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_L2L3CT_PROG_FAILED: DFTM failed to program L2L3 Consistency Table Entry

Explanation  DFTM failed to program L2L3 Consistency Table Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_MFT_PROG_FAILED: DFTM failed to program Multicast FTag Table Entry

Explanation  DFTM failed to program Multicast Ftag Table Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_SDT_PROG_FAILED: DFTM failed to program SGT DGT Table Entry

Explanation  DFTM failed to program SGT DGT Table Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_VTT_PROG_FAILED: DFTM failed to program VLAN Translation Table Entry for vlan [dec], xlt_vlan [dec] on fe [dec]

Explanation  DFTM failed to program VLAN Translation Table

Recommended Action  No action is required.

DHCLIENT Messages

This section contains the DHCLIENT messages.

DHCLIENT-2

Error Message  DHCLIENT-2-DHCLIENT_DISCOVER_RECVD_NAK: [chars] - Received DHCP NAK

Explanation  Received DHCP NAK

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_DISCOVER_START: [chars] - DHCLIENT DHCP Discover phase started

Explanation  DHCLIENT DHCP Discover phase started

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_FAILURE: [chars]

Explanation  DHCLIENT Failure

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_FLASH_FULL: DHCLIENT bootflash doesn't have enough space (85% FULL)

Explanation  DHCLIENT bootflash doesn't have enough space (85% FULL)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_INITED: [chars] - DHCLIENT process initialized

Explanation  DHCLIENT process initialized

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_DOWNLOADED: [chars] - Successfully downloaded DHCLIENT script file

Explanation  Successfully downloaded DHCLIENT script file

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_EXEC_SUCCESS: [chars] - DHCLIENT script execution success

Explanation  DHCLIENT script execution success

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_NOT_VALIDATED: [chars] - DHCLIENT script execution started(MD5 not validated)

Explanation  DHCLIENT script execution started(MD5 not validated)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_VALIDATED: [chars] - DHCLIENT script execution started(MD5 validated)

Explanation  DHCLIENT script execution started(MD5 validated)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_VALIDATION_FAIL: [chars] - DHCLIENT boot file validation failed

Explanation  DHCLIENT boot file validation failed.

Recommended Action  No action is required.

DHCLIENT-4

Error Message  DHCLIENT-4-DHCLIENT_WARNING: [chars]

Explanation  DHCLIENT Warning

Recommended Action  No action is required.

DHCLIENT-5

Error Message  DHCLIENT-5-DHCLIENT_DISABLED: [chars] - DHCLIENT Disabled

Explanation  DHCLIENT Service Disabled

Recommended Action  No action is required.

Error Message  DHCLIENT-5-DHCLIENT_ENABLED: [chars] - DHCLIENT Enabled

Explanation  DHCLIENT Service nabled

Recommended Action  No action is required.

DHCLIENT-6

Error Message  DHCLIENT-6-DHCLIENT_INFO: [chars]

Explanation  DHCLIENT Info

Recommended Action  No action is required.

DHCLIENT-7

Error Message  DHCLIENT-7-DHCLIENT_DEBUG: [chars]

Explanation  DHCLIENT Debug

Recommended Action  No action is required.

DHCP_SNOOP Messages

This section contains the DHCP_SNOOP messages.

DHCP_SNOOP-1

Error Message  DHCP_SNOOP-1-IPSG_WARN_MSG: Configuring IPSG on the interface will result in IPv6 traffic loss.

Explanation  Configuring IPSG on the interface will result in IPv6 traffic loss.

Recommended Action  No action is required.

DHCP_SNOOP-2

Error Message  DHCP_SNOOP-2-BD_LABEL_FAILURE: Unable to allocate BD label.

Explanation  Unable to allocate BD label.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-DHCP_SNOOP_PROGRAM_EXIT: [chars]

Explanation  DHCP snoop process did an abnormal exit

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-DHCP_SNOOP_Q_FULL: [chars]

Explanation  DHCP snoop process received QUEUE FULL Notification from MTS

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-DHCP_SNOOP_Q_HIGH: [chars]

Explanation  DHCP snoop process received QUEUE HIGH Notification from MTS

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-ERROR_DEFAULT_RAGUARD_CONF: Default raguard already configured, remove default raguard before attaching policy

Explanation  Default raguard already configured, remove default raguard before attaching policy

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-ERROR_FEX_IFACL_TCAM_NOT_CARVED: FEX-IPV6-IFACL TCAM not available, please carve before enabling feature

Explanation  FEX-IPV6-IFACL TCAM not available, please carve before enabling feature

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-ERROR_IFACL_TCAM_NOT_CARVED: IFACL TCAM not available, please carve before enabling feature

Explanation  IFACL TCAM not available, please carve before enabling feature

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-ERROR_SISF_FIRST_CONF: FHS feature requires a one time reload after ISSU to remap the TCAM allocation

Explanation  FHS feature requires a one time reload after ISSU to remap the TCAM allocation

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-ERROR_TAH_IFACL_TCAM_NOT_CARVED: IFACL TCAM not available,please carve before enabling feature.

Explanation  IFACL TCAM not available,please carve before enabling feature

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-HWPGMFAILURE: Hardware programming has failed: [chars]

Explanation  Hardware programming has failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-IFACL_LABEL_FAILURE: Unable to allocate IFACL label.

Explanation  Unable to allocate IFACL label.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-INITFAIL: DHCP Daemon Initialization failed: [chars]

Explanation  DHCP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-PSSERROR: [chars]

Explanation  DHCP Daemon encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-REGPARTREE: Unable to register par tree: [chars]

Explanation  Could not register par tree. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-TCAM_NOT_CONFIGURED: Ingress Redirect TCAM not available,please carve before enabling feature.

Explanation  Ingress Redirect TCAM not available,please carve before enabling feature

Recommended Action  No action is required.

DHCP_SNOOP-3

Error Message  DHCP_SNOOP-3-ALLOCFAIL: Heap Memory allocation failed: [chars]

Explanation  DHCP Daemon is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-ASSERTION_FAILED: [chars]:[dec]

Explanation  DHCP Snoop process has hit an assert condition at file [chars] line number [dec]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-DHCPDENIEDARP: ARP frame denied due to DHCP snooping binding on interface [chars] vlan [dec] sender mac [chars] sender ip [chars] target mac [chars] target ip [chars].

Explanation  [chars] identifies interface and [dec] identifies the vlan on which ARP packets have been denied. [chars] identifies sender mac and [chars] identifies the sender ip. [chars] identifies the target mac and [chars] identifies the target ip.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-DHCPRATELIMIT: Interface [chars] has been error disabled due to excessive ingress rate [dec] of DHCP packets.

Explanation  [chars] identifies the interface which has been error disabled due to excessive ingress rate [dec].

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-INVDHCPPKTS: Validation errors while processing DHCP packet received on interface [chars] vlan [dec] Reason:[chars]. Dropping the packet

Explanation  Validation errors DHCP packet receieved on the interface [chars] vlan [[dec]]. Reason:[chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-IPV6APIINIT_FAILED: [chars]

Explanation  DHCP Snoop process failed to do ipv6_api_init [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-IPV6REGISTER_FAILED: [chars]

Explanation  DHCP Snoop process failed to do ipv6_register [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-MTSERROR: [chars]

Explanation  DHCP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-PKTDROP: Packet dropped. Reason - [chars]

Explanation  Dropping the packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-PKTRECVFAIL: Failed to receive packet - [chars]

Explanation  Failed to receive packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-PKTSENDFAIL: Failed to send packet, - [chars]

Explanation  Failed to send packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-SETSOCKOPTFAIL: Failed to set socket option - [chars]

Explanation  Failed to set socket option [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-SOCKBINDFAIL: Failed to bind to raw socket - [chars]

Explanation  Failed to bind to socket. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-SOCKOPENFAIL: Failed to open socket for receiving DHCP packets - [chars]

Explanation  An attempt to open a socket for receiving DHCP packets failed. [char] identifies the reason.

Recommended Action  No action is required.

DHCP_SNOOP-4

Error Message  DHCP_SNOOP-4-ACL_DENY: [dec] Invalid ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] Invalid ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-DHCPREACHED2KLIMIT: dhcp snooping db reached 2k limit,Host (mac [chars] ip [chars] intf :[chars] vlan [dec]) is over and above 2k limit

Explanation  Host is above 2k limit

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-DHCPREMOTEEXPIRED: Lease already expired for remote host [chars] having IP address [chars] connected to interface [chars] in VLAN [dec] for lease [dec] secs. Cannot add remote host. Please check if system clock is in sync with NTP.

Explanation  The lease for remote host identified by [chars] with IP address [chars] connected to interface [chars] in VLAN [dec] with lease [dec] has already expired. Cannot add remote host.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-DHCP_SNOOPING_DENY: [dec] Invalid ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] Invalid ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-ERROR_DISABLED: Interface [chars] has moved to error disabled state due to excessive rate [dec] of ingress ARP packets

Explanation  Interface [chars] has moved to error disabled state due to excessive rate [dec] of ingress ARP packets

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-FHSCONFIGERR: DHCPv4 First Hop Security needs Dynamic Arp Inpection and IP Source Guard also to be enabled as well. On interface - [dec] in vlan - [dec], DAI is [chars] and IPSG is [chars].

Explanation  DHCPv4 First Hop Security needs all of the EVPN, DAI and IPSG to be enabled.

Recommended Action  Enable both DAI and IPSG.

Error Message  DHCP_SNOOP-4-FHSSTATICENTRY: Host ( mac [chars] ip [chars] on vlan [dec] ) moving to this VTEP has static dhcp binding configuration on remote vtep For this VTEP to become anchor for the binding entry, remove the static dhcp binding configuration for this host on the remote vtep and configure static binding on this VTEP.

Explanation  Static entry configuration should present on the box to make Anchor

Recommended Action  SYSLOGDOC_NO_ACTION

Error Message  DHCP_SNOOP-4-INVALID_ARP: [dec] Invalid ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] Invalid ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-SMARTRELAYMAXIPADDR: Smart relay is supported only on first [dec] IP addresses of the interface [chars].

Explanation  There are more than SMARTRELAYMAXIPADDR addresses configured on the interface. [dec] is the number of IP addresses with which smart relay supported [chars] identifies the interface. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-SMARTRELAYMAXLMT: Smart relay MAX limit [dec] reached. All subsequent DHCP packets will be relayed with primary address of inbound interface as relay agent address.

Explanation  Smart relay MAX limit reached. [dec] is the number of smart relay bindings This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-SUBNETBCASTRELAYMAXIPADDR: subnet-broadcast relay is supported only on first [dec] IP addresses of the interface [chars].

Explanation  There are more than SUBNETBCASTRELAYMAXIPADDR addresses configured on the interface. [dec] is the number of IP addresses with which subnet-broadcast relay supported [chars] identifies the interface. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-V6SMARTRELAYMAXLMT: V6 Smart relay MAX limit [dec] reached. All subsequent DHCPv6 packets will be relayed with 1st IPv6 address of inbound interface as relay agent address.

Explanation  Smart relay MAX limit reached. [dec] is the number of smart relay bindings This is an informational message.

Recommended Action  No action is required.

DHCP_SNOOP-5

Error Message  DHCP_SNOOP-5-ACL_PERMIT: [dec] ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPHOSTADD: A new Host is [chars] connected to interface [chars] in VLAN [dec] and is allocated IP address [chars] for [dec] secs.

Explanation  A Host identified by [chars] has been added. [chars] identifies the interface. [dec] identifies the VLAN. [chars] identifies IP address. [dec] identifies the lease time in secs. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPLEASEEXPIRE: Lease expired for host [chars] having IP address [chars] connected to interface [chars] in VLAN [dec] for lease [dec] secs.

Explanation  The lease for host identified by [chars] with IP address [chars] connected to interface [chars] in VLAN [dec] with lease [dec] has expired.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPV6IAPDADD: Route added for prefix [chars] delegated to host [chars] connected on interface [chars] for valid lifetime [dec] secs.

Explanation  A route for host identified by [chars] has been added. [chars] identifies the interface. [chars] identifies Prefix. [dec] identifies the lease time in secs. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPV6IAPDDEL: Route deleted for prefix [chars] delegated to host [chars] connected on interface [chars].

Explanation  A route for host identified by [chars] has been deleted. [chars] identifies the interface. [chars] identifies Prefix. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPV6IAPDEXPIRE: Route expired for prefix [chars] delegated to host [chars] connected on interface [chars].

Explanation  A route for host identified by [chars] has expired. [chars] identifies the interface. [chars] identifies Prefix. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPV6IAPDSYNCADD: Route added for prefix [chars] delegated to host [chars] connected on interface [chars] for valid lifetime [dec] secs.

Explanation  A route for host identified by [chars] has been added. [chars] identifies the interface. [chars] identifies Prefix. [dec] identifies the lease time in secs. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPV6IAPDSYNCDEL: Route deleted for prefix [chars] delegated to host [chars] connected on interface [chars].

Explanation  A route for host identified by [chars] has been deleted. [chars] identifies the interface. [chars] identifies Prefix. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPV6ROUTEADDFAIL: The route addition for host [chars] connected to interface [chars] assigned prefix [chars] for [dec] secs has failed.

Explanation  The route addition for host identified by [chars] has failed. [chars] identifies the interface. [chars] identifies Prefix. [dec] identifies prefix length [dec] identifies the lease time in secs. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPV6ROUTEDELFAIL: The route deletion for host [chars] connected to interface [chars] assigned prefix [chars] for [dec] secs has failed.

Explanation  The route deletion for host identified by [chars] has failed. [chars] identifies the interface. [chars] identifies Prefix. [dec] identifies prefix length [dec] identifies the lease time in secs. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCP_SNOOPING_PERMIT: [dec] ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-IPV6RELAYBINDCREATE: IPv6 Relay binding entry created for client MAC [chars] on Interface [chars]

Explanation  A new binding entry for client with MAC [chars] and interface [chars] has been created in the binding entry table. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-IPV6RELAYBINDDELETE: IPv6 Relay binding entry deleted for client MAC [chars] on Interface [chars]

Explanation  The binding entry for client with MAC [chars] and interface [chars] has been deleted from the binding entry table. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-RELAYSNOOPDAIENABLE: DHCP Snooping must be enabled for this CLI to work

Explanation  DHCP Relay DAI feature requires snooping enabled at the global and vlan level for binding DB creation. Use 'ip dhcp snooping' and 'ip dhcp snooping vlan This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-VLANDISABLE: DHCP Snooping disabled on vlan [dec]

Explanation  DHCP Snooping was disabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-VLANENABLE: DHCP Snooping enabled on vlan [dec]

Explanation  DHCP Snooping was enabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

DHCP_SNOOP-6

Error Message  DHCP_SNOOP-6-DAIVLANDISABLE: DAI disabled on vlan [dec]

Explanation  Dynamic ARP Inspection was disabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DAIVLANENABLE: DAI enabled on vlan [dec]

Explanation  Dynamic ARP Inspection was enabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPBINDSYNC: Binding entry with MAC [chars] interface [chars] VLAN [dec] IP address [chars] and lease time [dec] secs is synced.

Explanation  Binding entry identified by [chars] has been synced. [chars] identifies the interface. [dec] identifies the VLAN. [chars] identifies IP address. [dec] identifies the lease time in secs. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPEXIT: DHCP Daemon shutting down gracefully.

Explanation  DHCP Daemon is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPPERMITTEDARP: ARP frame permitted due to DHCP snooping binding on interface [chars] vlan [dec] sender mac [chars] sender ip [chars] target mac [chars] target ip [chars].

Explanation  [chars] identifies interface and [dec] identifies the vlan on which ARP packets have been permitted. [chars] identifies sender mac and [chars] identifies the sender ip. [chars] identifies the target mac and [chars] identifies the target ip.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPPKTFWD: Gracefully forwarding DHCP packet. Reason: [chars]

Explanation  Gracefully forwarding DHCP packet. reason [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPUP: DHCP Daemon Up.

Explanation  DHCP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INFO: [chars]

Explanation  An event during switchover. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INTFDISABLE: IP Src Guard disabled on intf [chars]

Explanation  IP Src Guard was disabled on a given intf. [chars] is the intf-ID string that identifies the intf. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INTFENABLE: IP Src Guard enabled on intf [chars]

Explanation  IP Src Guard was enabled on a given intf. [chars] is the intf-ID string that identifies the intf. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-NONDHCPPKTFWD: Non DHCP packet with src port:[dec] dst port:[dec] on intf:[chars] vlan:[dec]. Forwarding on [chars]

Explanation  Non DHCP packet arrived with UDP src/dst ports [dec], [dec] on interface [chars], vlan [dec]. Forwarding the packet on [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-OPT82INSTFAIL: [chars] [chars]

Explanation  Insertion of Option82 suboptions failed. [chars] tells the failure. [chars] explains the reason for failure. This is an informational message.

Recommended Action  No action is required.

DIAGCLIENT Messages

This section contains the DIAGCLIENT messages.

DIAGCLIENT-2

Error Message  DIAGCLIENT-2-DIAG_BOOTUP_COMPLETE: Module <[dec]> Bootup Test <[chars]> has reported <[chars]>

Explanation  Bootup Test completed

Recommended Action  Nothing to be done if the test reports SUCCESS otherwise copy the error message exactly as it appears on the console, gather the output of show tech-support, and contact your Cisco technical support representative with the gathered information

Error Message  DIAGCLIENT-2-DIAG_HM_FAIL: Module <[dec]> Health Monitoring Test <[chars]> has failed <[dec]> consecutived times due to error <[chars]> Please use 'show diagnostic result ' to see test results

Explanation  A Health Monitoring Test has reported failure

Recommended Action  Ensure the line card is firmly in the slot, reseat if necessary, and attempt to run the test again if the line card is not seated properly in the slot. If the line card was properly seated in the slot, copy the error message exactly as it appears on the console, gather the output of show tech-support, and contact your Cisco technical support representative with the gathered information.

Error Message  DIAGCLIENT-2-DIAG_TOC_CORRUPTION: Diagnostic TOC entry [dec] is invalid

Explanation  TOC entries may be corrupted

Recommended Action  No action is required.

Error Message  DIAGCLIENT-2-EEM_ACTION_HM_SHUTDOWN: Test <[chars]> has been disabled as a part of default EEM action

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-2-PER_PORT_SPINE_TEST_FAIL: Module <[dec]> Test <[chars]> has failed <[dec]> consecutived times on Ports <[chars]> faulty spine <[chars]> due to error <[chars]> Please use 'show diagnostic result ' to see test results

Explanation  Per Port Test has failed on the above all ports

Recommended Action  No action is required.

Error Message  DIAGCLIENT-2-PER_PORT_TEST_FAIL: Module <[dec]> Test <[chars]> has failed <[dec]> consecutived times on Ports <[chars]> due to error <[chars]> Please use 'show diagnostic result ' to see test results

Explanation  Per Port Test has failed on the above all ports

Recommended Action  No action is required.

Error Message  DIAGCLIENT-2-PSS_READ_FAILURE: Read from PSS failed on Module <[dec]>

Explanation  Read operation from PSS store failed

Recommended Action  No action is required.

Error Message  DIAGCLIENT-2-PSS_WRITE_FAILURE: Write to PSS failed on Module <[dec]>

Explanation  Write operation on PSS store failed

Recommended Action  No action is required.

DIAGCLIENT-3

Error Message  DIAGCLIENT-3-ONDEMAND_FAIL_EXCESS: Module <[dec]> Test <[chars]> has failed more than <[dec]> number of times

Explanation  Ondemand test has failed more than configured number of times

Recommended Action  Copy the error message exactly as it appears on the console, gather the output of show tech-support, and contact your Cisco technical support representative with the gathered information

DIAGCLIENT-4

Error Message  DIAGCLIENT-4-LC_OFFLINE_FOR_CURR_SLOT: Received LC offline event for the current slot:[dec]. Ignoring it

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-4-MTS_SEND_FAILURE: MTS send failed, mts_opc: [chars], dest slot: [dec], dest SAP: [dec], error-id: 0x[hex]

Explanation  MTS send reports failure

Recommended Action  No action is required.

DIAGCLIENT-5

Error Message  DIAGCLIENT-5-CALLOC_FAILURE: Memory allocation failed

Explanation  DiagClient process could not allocate memory

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-DIAG_ONDEMAND_TEST_FINISH: Module [dec]: Ondemand test [chars] finished

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-DIAG_ONDEMAND_TEST_START: Module [dec]: Ondemand test [chars] started

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-DIAG_ONDEMAND_TEST_STOP: Module [dec]: Ondemand test [chars] stopped

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-DIAG_SCHED_COMPLETE: Module <[dec]> Test <[chars]> has completed Scheduled Testing

Explanation  A scheduled Test was completed

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-ONDEMAND_FAIL: Module <[dec]> Test <[chars]> has failed in Test_Iteration <[chars]>

Explanation  The specified test has reported FAILURE in this Iteration

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-ONDEMAND_SUCCESS: Module <[dec]> Test <[chars]> has completed successfully in Test_Iteration <[chars]>

Explanation  The specified test has reported SUCCESS in this Iteration

Recommended Action  No action is required.

DIAGMGR Messages

This section contains the DIAGMGR messages.

DIAGMGR-2

Error Message  DIAGMGR-2-INTRVL_INCORRECT: Monitoring Interval is less than minimum of [dec] seconds required for Module <[dec]> test <[chars]>

Explanation  Health Monitoring cannot be enabled for the specified test because the interval for the test has been incorrectly set

Recommended Action  The system is working properly and no user action is required. If you want to specify a smaller testing interval, the error message text provides the lowest possible configurable interval for the specified monitoring interval

Error Message  DIAGMGR-2-MODULE_ERROR: Test-id(s) [dec] are invalid on Module [dec]

Explanation  Test id is invalid on this module

Recommended Action  No action is required.

Error Message  DIAGMGR-2-MTS_SEND_FAILURE: MTS send failed, mts_opc: [chars], dest slot: [dec], dest SAP: [dec], error-id: 0x[hex]

Explanation  MTS send reports failure

Recommended Action  No action is required.

Error Message  DIAGMGR-2-PSS_DELETE_FAILURE: Read from PSS failed on Module <[dec]>

Explanation  Read operation from PSS store failed

Recommended Action  No action is required.

Error Message  DIAGMGR-2-PSS_WRITE_FAILURE: Write to PSS failed on Module <[dec]>

Explanation  Write operation on PSS store failed

Recommended Action  No action is required.

Error Message  DIAGMGR-2-TEST_ERROR: Test-id [dec] are not Health Monitoring on Module [dec]

Explanation  Test id is not valid HM test

Recommended Action  No action is required.

DIAGMGR-3

Error Message  DIAGMGR-3-DIAG_MAJOR_DEFECT: Module <[dec]> Test <[chars]> detected a Major Error Please use 'show diagnostic result ' to see test results

Explanation  A major error was detected during diagnostic testing

Recommended Action  Re-seat the card and retry the test. If the same result occurs after reseating the card and retrying the test, copy the error message exactly as it appears on the screen and gather the output of show tech-support and any other relevant information. Contact your technical support representative with the gathered information.

Error Message  DIAGMGR-3-DIAG_MINOR_DEFECT: Module <[dec]> Test <[chars]> detected a Minor Error Please use 'show diagnostic result ' to see test results

Explanation  A minor error was detected during diagnostic testing

Recommended Action  Re-seat the card and retry the test. If the same result occurs after reseating the card and retrying the test, copy the error message exactly as it appears on the screen and gather the output of show tech-support and any other relevant information. Contact your technical support representative with the gathered information

Error Message  DIAGMGR-3-GET_CURR_SLOT_FAIL: Failed to get the current slot for the process. Error:[chars]

Explanation  The process initialization failed to get the current slot.

Recommended Action  This is an informational message stating that a process initialization failure.

DIAGMGR-4

Error Message  DIAGMGR-4-CURR_SLOT_OFFLINE: Recevied an LC offline event for the current slot:[dec]. Ignoring it

Explanation  The process received an offline event for the slot it is running. Ignoring it.

Recommended Action  This is an informational message stating that an unexpected event has been encountered.

Error Message  DIAGMGR-4-DISRPT_TST_START: Starting Test <[chars]> on Module <[dec]> is Disruptive

Explanation  Starting a Disruptive Test can disturb the system's normal functionality

Recommended Action  Reset target module

Error Message  DIAGMGR-4-FIXED_INTRVL_CHANGED: The users are not allowed to change monitoring interval of Test <[chars]>

Explanation  The specified health monitoring test interval is not user-configurable and therefore cannot be changed

Recommended Action  Nothing. The specific health monitoring interval is not user- configurable by design so nothing can be done to change the interval

Error Message  DIAGMGR-4-TEST_ACTIVE: Test-id [dec] Configuration will be effective when the SUP will be Active

Explanation  Test id Configuration will be effective when the SUP will be Active

Recommended Action  No action is required.

Error Message  DIAGMGR-4-TEST_STANDBY: Test-id [dec] Configuration will be effective when the SUP will be Standby

Explanation  Test id Configuration will be effective when the SUP will be Standby

Recommended Action  No action is required.

DIAGMGR-5

Error Message  DIAGMGR-5-BOOTUP_CONF: Diagnostic Bootup Level: <[chars]>

Explanation  Current Diagnostic BootUp Level being configure or changed

Recommended Action  No action is required.

Error Message  DIAGMGR-5-CALLOC_FAILURE: Memory allocation failure

Explanation  Memory allocation in a call to malloc/calloc has failed

Recommended Action  No action is required.

Error Message  DIAGMGR-5-CHANGE_ALWAYS_HM: Health Monitoring test <[chars]> in Module <[dec]> is a must run and cannot be modified

Explanation  The specified health monitoring test must be run and cannot be disabled

Recommended Action  Nothing. The specific health monitoring test cannot be disabled by design. The system is working properly.

Error Message  DIAGMGR-5-HM_START: Health monitoring test <[chars]> for Module <[dec]>

Explanation  Health Monitoring Test started

Recommended Action  No action is required.

Error Message  DIAGMGR-5-HM_STOP: Disabling health monitoring test <[chars]> for Module <[dec]>

Explanation  Health Monitoring Test has been stopped It can be enabled through the diagnostic monitor..... command

Recommended Action  No action is required.

Error Message  DIAGMGR-5-MODULE_MISSING: Diagnostic command issued on non-existing Module <[dec]>

Explanation  A line card could not be located in a slot where a diagnostic action was requested

Recommended Action  Ensure the targeted line card is properly seated in the specified slot. If the line card is properly seated, ensure the correct slot was indicated in the command-line interface. If the line card is well-seated and the correct slot was specified, copy the error message exactly as it appears on the screen as well as the output of show tech-support and paste the output into a separate file. Contact your technical support representative with the gathered information

Error Message  DIAGMGR-5-NONHM_AS_HM: The Test <[chars]> cannot be used as health monitoring test

Explanation  Non-HM test cannot be scheduled to run as a Health Monitoring test

Recommended Action  No action is required.

DIAGMGR-6

Error Message  DIAGMGR-6-BOOTUP_DIAG_OK: Module <[dec]>: Passed Online Diagnostics

Explanation  The diagnostic tests did not detect any error on the card.

Recommended Action  This is an informational message stating that the line card passed the diagnostic tests.

Error Message  DIAGMGR-6-BOOTUP_TEST_STARTED: Module <[dec]>: Running [chars] Diagnostics

Explanation  Starting bootup testing for above module

Recommended Action  No action is required.

DIAG_PORT_LB Messages

This section contains the DIAG_PORT_LB messages.

DIAG_PORT_LB-2

Error Message  DIAG_PORT_LB-2-BOOTUP_PORTLOOPBACK_TEST_FAIL: Module:[dec] Test:Bootup PortLoopback failed [dec] consecutive times. Faulty module:[chars] [chars] Error:[chars]

Explanation  Bootup PortLoopback test failed on the module consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-FIPS_RANDOM_ERROR: Random Number Generation Failure

Explanation  Random Number genration failed in FIPS module

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-FIPS_TEST_FAIL: Module:[dec] Test:MACSEC verification failed [dec] consecutive times. Faulty module:[chars] [chars] Error:[chars]

Explanation  MACSEC test failed on the module consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-L2ACLREDIRECT_LOOPBACK_TEST_FAIL: Module:[dec] Test:L2ACLRedirect Loopback failed [dec] consecutive times. Faulty module:[chars] [chars] Error:[chars]

Explanation  L2ACLRedirect Loopback test failed on the module consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-L2ACLREDIRECT_LOOPBACK_TEST_INTERMEDIATE_FAIL: Warning! Module:[dec] Test:L2ACLRedirect Loopback failed [dec] consecutive times. Upon reaching consecutive failure threshold corrective action would be taken.

Explanation  Warning! L2ACLRedirect Loopback test failed on the module consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-LCM_RESP_SEND_FAILURE: LC Inserted request response send to Module Manager failed . Error:[chars]

Explanation  Failed to send the response for LC insertion to Module Manager.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-LIF_GET_ERROR: [chars]([dec]) [chars] Error:[chars]

Explanation  Port Loopback test process failed to get Diagnostic LIF id

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-MALLOC_FAILURE: [chars]([dec]) Memory allocation failed.

Explanation  Port Loopback test process could not allocate memory

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-PORTLOOPBACK_TEST_FAIL: Module:[dec] Test:PortLoopback failed [dec] consecutive times. Faulty module:[chars] [chars] Error:[chars]

Explanation  PortLoopback test failed on the module consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-PROC_INIT_FAILURE: [chars]([dec]) [chars] Error:[chars]

Explanation  Port Loopback test process failed in process initialization

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-REWRITE_ENGINE_LOOPBACK_TEST_FAIL: Module:[dec] Test:RewriteEngine Loopback failed [dec] consecutive times. Faulty module:[chars] [chars] Error:[chars]

Explanation  Rewrite Engine Loopback test failed on the module consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-SNAKE_TEST_LOOPBACK_TEST_FAIL: Module:[dec] Test:SnakeLoopback failed [dec] consecutive times. Faulty module:[chars] affected ports:[chars] Error:[chars]

Explanation  Snake test failed on the module consecutively

Recommended Action  No action is required.

DIAG_PORT_LB-3

Error Message  DIAG_PORT_LB-3-DIAG_FWD_PATH_SETUP_FAILURE: [chars]. Module:[dec] Error:[chars].

Explanation  Forwarding path setup for port loopback tests failed

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-DIAG_PKT_SEND_FAILURE: [chars]([dec]) [chars]. Error:[chars]

Explanation  Port Loopback test process failed to send loopback packets.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-FSM_LIB_ERROR: [chars]([dec]) [chars]. Error:[chars]

Explanation  Port Loopback test process failed in MTS API.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-GET_DIAG_BD_FAIL: [chars]([dec]) Failed to get the BD for Diag VLAN:[dec]. Error:[chars].

Explanation  Failed to get the BD corresponding to the Diag VLAN

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-IFINDEX_LIB_FAILURE: [chars]([dec]) [chars] [chars]:[hex] [chars] [chars]

Explanation  Port Loopback test process failed in if_index library API

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-INVALID_TEST_REQUEST: [chars]([dec]) [chars]:%zd

Explanation  Port Loopback test process failed to get test request info.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-INVALID_TEST_RUN: [chars]([dec]) [chars]:[dec]

Explanation  Port Loopback test process failed to get the current test run information

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-PDB_LIB_API_ERROR: Failed to [chars]. Error:[dec].

Explanation  The port loopback test was not able to get chassis info

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-PIXM_LIB_ERROR: [chars]([dec]) Failed to convert [chars]:[hex] to [chars]. Error:[chars]

Explanation  Port Loopback test process failed to convert port ifindex <-> port index.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-PORT_CLIENT_LIB_ERROR: [chars]([dec]) [chars]. Error:[chars]

Explanation  Port Loopback test process failed in Port Client API.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-RESULT_ADD_FAILURE: [chars]([dec]) [chars]:[dec]

Explanation  Port Loopback test process failed to add the port test result

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-RESULT_SEND_FAILURE: [chars]([dec]) [chars]

Explanation  Port Loopback test process failed to send the test results

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-RW_ENGINE_LOOPBACK_TEST_SPINE_PATH_FAIL: Module:[dec] Test:RewriteEngine Loopback Spine path:[dec] failed [dec] consecutive times. Error:[chars]

Explanation  Rewrite Engine Loopback test failed on the spine path consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-SOCKET_ERROR: [chars]([dec]) [chars] Error:[chars]

Explanation  Port Loopback test process failed in socket operations

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-STATS_LIB_ERROR: [chars]([dec]) [chars]:[dec]

Explanation  Port Loopback test process failed in stats infra lib API.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-TEST_RES_SEND_FAIL: Failed to send [chars] test results back to Diagnostics Infrastucture. Error:[chars].

Explanation  The port loopback test was not able to send the test results

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-TIMER_LIB_ERROR: [chars]([dec]) [chars]

Explanation  Port Loopback test process timer handling failure.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-VLAN_ERROR: [chars]([dec]) [chars] Error:[chars]

Explanation  Port Loopback test process failed to get Diagnostic VLAN info

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-VQI_GET_FAIL: Failed to get the Diag VQi from XBM. Error:[chars]

Explanation  Rewrite Engine Loopback test failed to get the Diag VQi from XBAR Mgr

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-XBM_CFG_REQ_FAIL: Failed to conigure the XBAR mask while running the RewriteEngineLoopback test. Error:[chars]. Module:[dec] could have gone offline

Explanation  Rewrite Engine Loopback test failed to set the XBAR mask while running the test. The target module could have gone offline

Recommended Action  No action is required.

DIAG_PORT_LB-4

Error Message  DIAG_PORT_LB-4-MTS_LIB_ERROR: [chars]([dec]) [chars]. Warning:[chars]

Explanation  Port Loopback test process failed in MTS API.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-4-PORT_CFG_REQ_SEND: [chars]([dec]) Failed to send request to configure port ifindex:[dec] for port loopback test

Explanation  Failed to configure/restore the port to do/cleanup port loopback testing

Recommended Action  No action is required.

DIAG_PORT_LB-5

Error Message  DIAG_PORT_LB-5-DIAG_PORT_LB_DISABLED: DIAG_PORT_LB Disabled

Explanation  DIAG_PORT_LB Service Disabled

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-5-DIAG_PORT_LB_ENABLED: DIAG_PORT_LB Enabled

Explanation  DIAG_PORT_LB Service Enabled

Recommended Action  No action is required.

DOT1X Messages

This section contains the DOT1X messages.

DOT1X-2

Error Message  DOT1X-2-DOT1X_INIT: Dot1x unable to start

Explanation  The system failed to create the Dot1x process

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

DOT1X-3

Error Message  DOT1X-3-ACL_MGR_FAILURE: ACL Mgr returned with code [hex]

Explanation  ACL Mgr returned with code

Recommended Action  ACL Mgr returned with code

Error Message  DOT1X-3-DISABLE_DACL: Dynamic ACL not supported

Explanation  Dynamic ACL not supported

Recommended Action  Dynamic ACL not supported

Error Message  DOT1X-3-DOT1X_ENABLE_STATIC_MAC_FOUND: Static mac found on an interface [chars], dot1x enable failed in ethpm pre-cfg

Explanation  Dot1x is not supported on an interface which is configured with static mac entries

Recommended Action  Remove the static mac entry on the interface

Error Message  DOT1X-3-ERR_SPANDST: Dot1x can not be enabled on [chars]. It is configured as a SPAN Dest port.

Explanation  Dot1x and SPAN Dest ports are mutually exclusive features.

Recommended Action  Disable SPAN destination port configuration first before reconfiguring Dot1x on the port.

Error Message  DOT1X-3-EXCEEDED_ACE_COUNT: Client [chars] has exceeded ACEs in ACL AV-Pair from ISE. Maximum number of ACEs supported in AV Pair from ISE is 32.

Explanation  Client exceeded maximum ACEs in AV Pair from ISE

Recommended Action  Client exceeded maximum ACEs in AV Pair from ISE

Error Message  DOT1X-3-INVALID_ACL_CHANGE: Client [chars] has a change in ACL AV-Pair from ISE. Only 1 ACL supported per interface

Explanation  Dynamic change in ACL content from ISE not supported

Recommended Action  Dynamic change in ACL content from ISE not supported

Error Message  DOT1X-3-INVALID_DACL_DVLAN: Client [chars] has DVLAN and DACL configured. This is not supported

Explanation  Dacl and dvlan cannot be configured on same client

Recommended Action  Configure dacl or dvlan on a given client

Error Message  DOT1X-3-INVALID_DACL: Invalid DACL name [chars] for client [chars]

Explanation  Client received invalid DACL from ISE

Recommended Action  Only single DACL supported per box.

Error Message  DOT1X-3-INVALID_DVLAN: Dvlan client [chars] not allowed. Interace already has non-dvlan clients

Explanation  DVLAN Clients not allowed as the Interface contains non DVLAN clients

Recommended Action  Unsupported dvlan configuration

Error Message  DOT1X-3-INVALID_INPUT: Dot1x Interface parameter is Invalid on interface [chars].

Explanation  The Dot1x interface parameter is out of the specified range or is invalid.

Recommended Action  Refer to the CLI help documentation to determine the valid 802.1x parameters.

Error Message  DOT1X-3-INVALID_NON_DVLAN: Non-dvlan client [chars] not allowed. Interace already has dvlan clients

Explanation  Non-DVLAN Clients not allowed as the Interface contains active DVLAN clients

Recommended Action  Unsupported dvlan configuration

Error Message  DOT1X-3-MEM_UNAVAIL: Memory was not available to perform the 802.1X action.

Explanation  Insufficient system memory is available to perform the Dot1x Authentication.

Recommended Action  Reduce other system activity to ease memory demands. If conditions warrant, upgrade to a larger memory configuration.

Error Message  DOT1X-3-NONEXISTENT_DACL: DACL [chars] does not exist on switch

Explanation  DACL for blocklist clients is not found on switch

Recommended Action  Preconfigure DACL on switch

Error Message  DOT1X-3-NOT_DOT1X_CAPABLE: Dot1x is not supported on [chars] port [chars].

Explanation  Dot1x Authentication can only be enabled on physical Ethernet interfaces.

Recommended Action  Enable Dot1x Authentication on physical Ethernet interfaces only.

Error Message  DOT1X-3-SECURE_MAC_INSERT_FAILED: Mac address [chars] could not be secured on interface [chars]

Explanation  The interface specified in the error message could not secured supplicant mac. The port has been Error disabled.

Recommended Action  Mac address could not be added into mac address table. Enter the shutdown followed by no shutdown command to restart authentication on the port.

Error Message  DOT1X-3-SECURITY_VIOLATION: Security violation New MAC address [chars] is seen on interface [chars] in [chars] mode

Explanation  The port on the interface specified in the error message is configured in single host mode. Any new host that is detected on the interface is treated as a security violation. The port has been Error disabled.

Recommended Action  Ensure that the port is configured to use only one host. Enter the shutdown followed by no shutdown command to restart the port.

Error Message  DOT1X-3-SM_INIT: Internal error while initializing state machine [chars], state [chars]: [chars]

Explanation  An attempt was made to initialize an invalid state machine.

Recommended Action  Initialize dot1x state machine

DOT1X-4

Error Message  DOT1X-4-BADEVENT: Event [chars] is invalid for the current state [chars]: [chars] [chars]

Explanation  An attempt was made to post an event to a state machine that is invalid for the current state.

Recommended Action  Initialize dot1x state machine

Error Message  DOT1X-4-MAB_DISABLED_ON_PCM: Interface [chars] is a member of portchannel, MAB is not supported on this port

Explanation  MAB is not supported on portchannel member port

Recommended Action  To enable MAB make sure that port is not member of portchannel

Error Message  DOT1X-4-MAB_DISABLED: Interface [chars] is in Trunk mode, MAB is not supported on this port

Explanation  MAB is not supported on Trunk port

Recommended Action  To enable MAB make sure that port is not in trunk mode

Error Message  DOT1X-4-MULTIHOST_ON_PCM: Interface [chars] is a member of portchannel, dot1x host mode will be multi-host and changing it to other modes won't be supported

Explanation  Current Port is a member of portchannel, so dot1x host mode has to be in multi-host mode.

Recommended Action  To change host mode, ensure that port is not a member of portchannel

Error Message  DOT1X-4-MULTI_AUTH_NOT_SUPPORTED: dot1x host mode with MULTI-AUTH won't be supported on EOR or REDMOND

Explanation  Dot1x host mode multi-auth will not be supported on EOR and REDMOND

Recommended Action  Do not configure multi-auth host mode.

Error Message  DOT1X-4-PSEC_ON_PCM: Interface [chars] is a member port or portchannel interface with port security configration

Explanation  Dot1x is not supported on member ports or port channel with port security configuration

Recommended Action  Remove port security configuration on the member port or port channel interface

Error Message  DOT1X-4-STOPPED: Event [chars] ignored because the state machine is stopped: [chars] [chars]

Explanation  An attempted was made to post an event to a state machine that has already been stopped.

Recommended Action  An internal error has occurred with the state machine. The traceback should indicate the guilty party.

Error Message  DOT1X-4-TO_MULTIHOST: Interface [chars] is in trunk mode, dot1x host mode will be multi-host and changing it to other host mode won't be supported

Explanation  Current Port is in trunk mode, so dot1x host mode has to be in multi-host mode.

Recommended Action  To change host mode, ensure that port is not in trunk mode

DOT1X-5

Error Message  DOT1X-5-DOT1X_DISABLED: dot1x Disabled

Explanation  Dot1x Service Disabled

Recommended Action  No action is required.

Error Message  DOT1X-5-DOT1X_ENABLED: dot1x Enabled

Explanation  Dot1x Service Enabled

Recommended Action  No action is required.

Error Message  DOT1X-5-DOT1X_NOTIF: [chars]

Explanation  Dot1x Notification

Recommended Action  No action is required.

Error Message  DOT1X-5-INVALID_EAPOL: Invalid EAPOL packet formation for type [dec]: packet body length [dec] interface [chars] MTU [dec]

Explanation  802.1X received invalid EAPOL packet

Recommended Action  Verify source of EAPOL packets

Error Message  DOT1X-5-INVALID_MAC: Invalid MAC address(drop, zero, broadcast or multicast mac address) [chars] is trying to authenticate.

Explanation  Authentication using 802.1x is not allowed for zero, broadcast, and multicast source MAC addresses.

Recommended Action  Connect a Dot1x supported Host to the Dot1x enabled port.

Error Message  DOT1X-5-PAC_STATUS: PAC provisioning for the server [chars] through the vrf [chars] [chars]

Explanation  PAC provisioning status

Recommended Action  No action is required.

Error Message  DOT1X-5-SESSION_CREATION: Dot1x authentication session initiated in interface [chars] using authentication method [chars]

Explanation  Dot1x authentication session has been created after successful authentication of supplicant

Recommended Action  No action is required.

Error Message  DOT1X-5-SESSION_TERMINATION: Dot1x authentication session in interface [chars] using authentication method [chars] is terminated because of [chars] and port moved to [chars] state

Explanation  Dot1x authentication session has been terminated

Recommended Action  No action is required.

Error Message  DOT1X-5-STATUS: Dot1x interface [chars] status changed from [chars] to [chars]

Explanation  Dot1x authenticator has changed its internal state

Recommended Action  No action is required.

DOT1X-6

Error Message  DOT1X-6-NOT_DOT1X_CAPABLE_SAT_FABRIC: Dot1x is not supported on [chars] port [chars].

Explanation  Dot1x Authentication can only be enabled on physical Ethernet interfaces.

Recommended Action  Enable Dot1x Authentication on physical Ethernet interfaces only.

DSTATS Messages

This section contains the DSTATS messages.

DSTATS-2

Error Message  DSTATS-2-PSS_INIT_FAIL: pss initialization failed due to error: 0x[hex]

Explanation  Dstats process pss initialization failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

DSTATS-3

Error Message  DSTATS-3-PSS_CREATE_FAIL: pss create runtime database failed due to error: 0x[hex]

Explanation  Dstats process pss create runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_DELETE_FAIL: pss delete runtime entry key:0x[hex] failed due to error: 0x[hex]

Explanation  Dstats process pss delete runtime entry key [hex] failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_MAX_KEY_FAIL: pss set runtime max key failed due to error: 0x[hex]

Explanation  Dstats process pss set runtime max key failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_MAX_VALUE_FAIL: pss set runtime max value failed due to error: 0x[hex]

Explanation  Dstats process pss set runtime max value failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_OPEN_FAIL: pss open runtime database failed due to error: 0x[hex]

Explanation  Dstats process pss open runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_RELOAD_FAIL: pss reload runtime database failed due to error: 0x[hex]

Explanation  Dstats process pss reload runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_SNAPSHOT_DEBUG_FAIL: pss snapshot runtime debug to uri:[chars] failed due to error: 0x[hex]

Explanation  Dstats process pss snapshot of runtime debug to uri [string] failed due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_SNAPSHOT_FAIL: pss snapshot runtime to uri:[chars] failed due to error: 0x[hex]

Explanation  Dstats process pss snapshot of runtime to uri [string] failed due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_STORE_FAIL: pss store runtime entry key:0x[hex] val:0x[hex] failed due to error: 0x[hex]

Explanation  Dstats process pss store runtime entry key [hex] value [hex] failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

ELTMC Messages

This section contains the ELTMC messages.

ELTMC-SLOT#-2

Error Message  ELTMC-SLOT#-2-ELTMC_GENERIC_DEBUG: [chars]

Explanation  Logging some generic debugging info

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTERFACE_INTERNAL_ERROR: Internal error: [chars]:[chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTERNAL_ERROR: Internal error: [chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTF_NOT_FOUND: Interface [chars] not found in ELTM database [chars]

Explanation  ELTM database doesn't have the interface.

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTF_NOT_SUPP: Interface [chars] not supported by ELTM [chars]

Explanation  ELTM doesn't support the interface for the specified operation

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTF_TO_LTL: Failed to get LTL for interface [chars] return status [chars]

Explanation  ELTM Failed to get LTL for interface. Packets received on this interface might not be handled correctly by the forwarding engine

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTF_TO_SLOT: Failed to get slot for interface [chars] return status [chars]

Explanation  ELTM Failed to get Slot for interface. Port-channels and L2 Learning might be effected

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_L2_LIF_ALLOC_FAIL_INTF: Failed to allocate L2 LIF entries in forwarding engine for interfac [chars]

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. This will effect Layer 2 and Layer 3 forwarding for the interface

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_L2_LIF_ALLOC_FAIL_VDC: Failed to allocate L2 LIF entries in forwarding engine

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. This will effect Layer 2 and Layer 3 forwarding in this VDC

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_L2_LIF_REALLOC_FAIL_INTF: Failed to realloc L2 LIF entries in forwarding engine for interface [chars]

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. This will effect Layer 2 and Layer 3 forwarding for the interface. ISSU failed for certain interfaces

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_L3_INGRESS_LIF_ALLOC_FAIL_INTF: Failed to allocate L3 Ingress LIF entries in forwarding engine for interfac [chars]

Explanation  ELTM Failed to allocate L3 Ingress LIF entries in forwarding engine. This will effect Layer 3 forwarding for the interface

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_LDB_REALLOC_FAIL: Failed to realloc LDB in forwarding engine for interface [chars] for non-XL linecard

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. ISSU failed for this VDC. Shutdown the interfaces

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_LTL_ISSUE_EXT_COMP: Critical LTL clean-up issue (either ETHPM/PIXM) [chars]

Explanation  LTL didnt get cleaned-up either bcos of ETHPM not sending DELETE or PIXM issuing a duplicate LTL

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_NONXL_LDB_REALLOC_FAIL: Failed to realloc LDB in forwarding engine for certain interfaces for non-XL linecard

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. ISSU failed for this VDC. Shutdown the interfaces

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_RSVD_VLAN: Failed to get the reserved vlans. Failed with error [chars]

Explanation  ELTM Failed to get the reserved vlan's. This will effect multicast forwarding on SVI interfaces

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_VDC_LIF_REALLOC_FAIL: Failed to realloc LDB in forwarding engine for vdc [dec]. Reload VDC after config reduction

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. ISSU failed for this VDC. Remove the interfaces and then reload VDC

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_VLAN_INTERNAL_ERROR: Internal error: VLAN [dec]:[chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

ELTM Messages

This section contains the ELTM messages.

ELTM-2

Error Message  ELTM-2-INTERFACE_INTERNAL_ERROR: Internal error: [chars]:[chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  ELTM-2-INTERNAL_ERROR: Internal error: [chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  ELTM-2-INTF_NOT_FOUND: Interface [chars] not found in ELTM database [chars]

Explanation  ELTM database doesn't have the interface.

Recommended Action  No action is required.

Error Message  ELTM-2-INTF_NOT_SUPP: Interface [chars] not supported by ELTM [chars]

Explanation  ELTM doesn't support the interface for the specified operation

Recommended Action  No action is required.

Error Message  ELTM-2-INTF_TO_LTL: Failed to get LTL for interface [chars] return status [chars]

Explanation  ELTM Failed to get LTL for interface. Packets received on this interface might not be handled correctly by the forwarding engine

Recommended Action  No action is required.

Error Message  ELTM-2-QINQ_TRANSIT_ENABLE: ELTM Failed to set/reset qinq_transit_enable

Explanation  ELTM Failed to set/reset qinq_transit_enable

Recommended Action  No action is required.

ELTM-3

Error Message  ELTM-3-OTV_FEATURE_FAIL: Feature OTV failed : [chars]

Explanation  Error in ELTM while handling feature OTV request from OIM

Recommended Action  No action is required.

ELTM-4

Error Message  ELTM-4-ELTM_LIF_EXCEED_8K: Interface [chars] (LIF 0x[hex]) counter stats will not be available, no flex counters supported beyond 0x2000 BD Range

Explanation  ELTM LIF allocation for the Interface is beyond 0x2000, no flex counters supported

Recommended Action  No action is required.

ELTM-5

Error Message  ELTM-5-EXT_COMP_ERR: [chars] component error [chars]

Explanation  Recently applied Multicast config on the interface was unsuccessful, so reverting to the old state (before config)

Recommended Action  No action is required.

ELTM-6

Error Message  ELTM-6-ELTM_MTS_SEND_FAILED: Failed to send MTS message errno [hex] opcode [dec]

Explanation  Failed to send MTS message errno [hex] opcode [dec]

Recommended Action  No action is required.

Error Message  ELTM-6-SVI_LIF_NOT_PRESENT: [chars]:[chars], collect output of show tech-support eltm/vlan/interface-vlan

Explanation  Mismatch between SVI and vlan-mgr.

Recommended Action  No action is required.

EOU Messages

This section contains the EOU messages.

EOU-2

Error Message  EOU-2-PBACL_APPLICATION_FAILURE: [chars] of host [chars] to/from pbacl group [chars] failed. Error : [chars]

Explanation  Failure of host addition/deletion to/from pbacl group

Recommended Action  Please verify the addition/deletion of the host using the cli "show object-group". If it was a delete request that failed, manual deletion of the host from the group is recommended

EOU-5

Error Message  EOU-5-L2NAC_DISABLED: EOU Disabled

Explanation  Service EOU Disabled

Recommended Action  No action is required.

Error Message  EOU-5-L2NAC_ENABLED: EOU Enabled

Explanation  Service EOU enabled

Recommended Action  No action is required.

EOU-6

Error Message  EOU-6-AAA_DOWN: Default Policy ip: [chars]:retained

Explanation  Policy retained

Recommended Action  No action is required.

Error Message  EOU-6-AUTHTYPE: Authtype: ip: [chars] Authtype:[chars]

Explanation  Authentication type

Recommended Action  No action is required.

Error Message  EOU-6-BAD_PKT: Bad Packet: ip: [chars] Why: [chars]

Explanation  Bad Packet because of reason specified

Recommended Action  No action is required.

Error Message  EOU-6-CTA: CTA: ip: [chars] status(detected/not detected): [chars]

Explanation  CTA detected or not

Recommended Action  No action is required.

Error Message  EOU-6-IDENTITY_MATCH: Identity Match: ip: [chars] Policy: [chars]

Explanation  Identity Matched or not

Recommended Action  No action is required.

Error Message  EOU-6-PBACL_APPLICATION_STATUS: [chars] of host [chars] to/from pbacl group [chars] succeeded

Explanation  Status of host addition/deletion to pbacl group

Recommended Action  No action is required.

Error Message  EOU-6-POLICY: Policy on ip: [chars]: [chars]: [chars]

Explanation  Policy applied

Recommended Action  No action is required.

Error Message  EOU-6-POSTURE: Posture:ip: [chars] Status: [chars], Interface: [chars]

Explanation  Posture of host

Recommended Action  No action is required.

Error Message  EOU-6-SESSION: Session ip: [chars] Action:[chars] , Interface: [chars]

Explanation  Session detected

Recommended Action  No action is required.

Error Message  EOU-6-SOCKET: Service eou on port: [dec]

Explanation  Eou using above port

Recommended Action  No action is required.

Error Message  EOU-6-SQ_EAP_MSG: Status Query: ip: [chars] status: [chars]

Explanation  Status query state

Recommended Action  No action is required.

Error Message  EOU-6-UNKN_EVENT_ERR: Unknow Event Err: ip: [chars] Message: [chars]

Explanation  Error due to unknown event

Recommended Action  No action is required.

Error Message  EOU-6-VERSION_MISMATCH: Eou version mismatch ip: [chars] and version [dec]

Explanation  Eou version mismatch

Recommended Action  No action is required.

EOU-7

Error Message  EOU-7-EOU_DISABLED_INTF: eou disabled on interface [chars]

Explanation  Eou service disabled on interface

Recommended Action  No action is required.

Error Message  EOU-7-EOU_ENABLED_INTF: eou enabled on interface [chars]

Explanation  Eou service enabled on interface

Recommended Action  No action is required.

EPLD_UPGRADE Messages

This section contains the EPLD_UPGRADE messages.

EPLD_UPGRADE-2

Error Message  EPLD_UPGRADE-2-ACTIVE_SINGLE_SUP_UPGRADE: install all epld does not upgrade Active Supervisor module [dec].

Explanation  Install all epld does not upgrade Active Supervisor in a switch with a single supervisor.

Recommended Action  No action is required.

Error Message  EPLD_UPGRADE-2-ACTIVE_SUP_UPGRADE: install all epld does not upgrade Active Supervisor module [dec]. Please do a switchover and upgrade the EPLDs on module [dec].

Explanation  Install all epld did not upgrade Active Supervisor.

Recommended Action  No action is required.

EPP Messages

This section contains the EPP messages.

EPP-5

Error Message  EPP-5-EPP_FAILURE: Interface [chars] EPP Failure

Explanation  Trunk protocol failed

Recommended Action  'show epp internal event-history err' will indicate the errors encountered

Error Message  EPP-5-EPP_LOOPBACK: Interface [chars] is looped back to the same switch

Explanation  The interface is looped back to another interface on the same switch

Recommended Action  Check the connectivity of this interface and ensure that it is connected to another switch

Error Message  EPP-5-EPP_TRUNK_PROTOCOL_STATUS: epp trunk protocol is [chars] on switch

Explanation  Epp trunk protocol enabled/disabled on the switch

Recommended Action  No action is required.

ETH-PORT-SEC Messages

This section contains the ETH-PORT-SEC messages.

ETH-PORT-SEC-2

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_ADDR_SEEN: MAC address already secured on peer-switch. Please re-configure after VPC comes up, if this interface is supposed to be a VPC PO

Explanation  Mac already secured on peer

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_MISCONFIG: MAC Addresses present exceed the allowed number of MAC addresses on Port [chars]. Fix the inconsistency on this port.

Explanation  MAC Addresses present exceed the allowed number of MAC addresses.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_REGMAC_ADD_FAIL: Unable to add regmac [chars] for <[chars], vlan [dec]> since it is already registered for <[chars], vlan [dec]>

Explanation  Duplicate regmac detected

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_SECURITY_VIOLATION: Triggered violation [chars] on Port [chars]

Explanation  Violation action triggered on port due to security violation.

Recommended Action  No action is required.

ETH-PORT-SEC-3

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_CONFIG_MAC_FAILED: Failed to configure MACs

Explanation  Failed to configure MACs

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_INVALID_VLAN: Invalid VLAN configuration

Explanation  Invalid VLAN configuration

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_PKTSENDFAIL: Failed to send packet, - [chars]

Explanation  Failed to send packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_SECURITY_VIOLATION_ANOTHER_PORT: Host [chars] bound to Port [chars] in Vlan [dec] is trying to access Port [chars] in Vlan [dec]

Explanation  Moved the port to violation state due to a mac address seen on one port being seen on another

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_SECURITY_VIOLATION_MAX_MAC_VLAN: Port [chars] moved to [chars] state as host [chars] is trying to access the port in vlan [dec]

Explanation  Moved the port to violation state due to exceeding address count

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_UNABLE_TO_DISABLE: Unable to disable eth_port_sec [chars].

Explanation  Unable to disable eth_port_sec Service

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_UNABLE_TO_ENABLE: Unable to enable eth_port_sec [chars].

Explanation  Unable to enable eth_port_sec Service

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_VIOL_UPDATE_FAILED: Failed to update violation mode

Explanation  Failed to update violation mode

Recommended Action  No action is required.

ETH-PORT-SEC-5

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_AGE_TIME_EXPIRY: Age Time expired for host [chars] in VLAN [dec] in port [chars]

Explanation  Age time expired for host

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_DISABLED: eth_port_sec Disabled on if_index:[hex]

Explanation  Eth_port_sec Service Disabled

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_DYNAMIC_MAC_ADDRESS_CLEARED: Dynamic MAC addresses for port [chars] cleared

Explanation  Dynamic MAC address for port cleared

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_ENABLED: eth_port_sec Enabled on if_index:[hex]

Explanation  Eth_port_sec Service Enabled

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_HOST_ADDITION: A new Host [chars] learnt on Port [chars] in Vlan [dec]

Explanation  A new host is learnt on a port

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_HOST_DELETION: Host [chars] bound to secure port [chars] in Vlan [dec] has been removed

Explanation  A host has been removed

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_INITFAIL: Eth Port Security Initialization failed: [chars]

Explanation  Eth Port Security Initialization failed.[chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_MAX_LIMIT_EXCEED: Max Addr per port config cannot be accepted as it will violate the System Max limit. [chars]

Explanation  System wide Max Limit Exceeds

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_PORT_SEC_ENABLED_PARTIALLY: Port security enabled partially in configuration on this vpc port, port security is not enabled operationally since peer VPC port doesnt have port security enabled.

Explanation  Port security enabled partially in configuration

Recommended Action  No action is required.

ETHPORT Messages

This section contains the ETHPORT messages.

ETHPORT-2

Error Message  ETHPORT-2-IF_CRITICAL_FAILURE: (Debug syslog)Critical failure: [chars], [chars]

Explanation  There was a critical failure in the component.

Recommended Action  Please follow instructions on the syslog.

Error Message  ETHPORT-2-IF_DOWN_ERROR_DISABLED: Interface [chars] is down (Error disabled. Reason:[chars])

Explanation  The interface encountered an error while configuring it

Recommended Action  Collect more information about failed interface using command 'show port internal all interface [char]'. In most cases, you can recover using a 'shutdown' followed a 'no shutdown' on the interface or removing and re-inserting the fibre optic cable.

Error Message  ETHPORT-2-IF_DOWN_INCOMPATIBLE_TRANSCEIVER: Interface [chars] is down (Reason: [chars])

Explanation  Inserted transceiver is not compatible with transceivers of other ports in the same QUAD

Recommended Action  Replace transceiver that matches 'quad_speed' printed in 'show system internal ethpm info interface ethernet '

Error Message  ETHPORT-2-IF_ERROR_SHUT_LAN_NO_DCX: Shutting lan on interface [chars] that doesn't connect to a DCBX capable adaptor.

Explanation  Shutting lan on interface that doesn't connect to a DCBX capable adaptor.

Recommended Action  No action is required.

Error Message  ETHPORT-2-IF_SEQ_ERROR: Error ("[chars]") communicating with [chars] for opcode [chars] ([chars]) Follow PM FAQ #6 at: http://wikicentral.cisco.com/confluence/display/KGP/Port+Manager+FAQ

Explanation  Some component returned system error as a response to one of the port event sequence.

Recommended Action  None

Error Message  ETHPORT-2-SEQ_TIMEOUT: Component [chars] timed out on response to opcode [chars] ([chars])

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  None

Error Message  ETHPORT-2-SYSLOG_ETHPM_CRITICAL: Critical failure: [chars]

Explanation  There was a critical failure in the component.

Recommended Action  Please collect system tech-support

ETHPORT-3

Error Message  ETHPORT-3-IF_DOWN_CHANNEL_ERR_DISABLED: Interface [chars] is down (Channel error disabled)

Explanation  This interface belongs to a PortChannel and the PortChannel is error disabled

Recommended Action  Perform 'shut' and 'no shutdown' on the PortChannel interface that it belongs to

Error Message  ETHPORT-3-IF_ERROR_VLANS_REMOVED: VLANs [chars] on Interface [chars] are removed from suspended state.

Explanation  The VLANs on an interface are being removed from the suspended state

Recommended Action  No action is required.

Error Message  ETHPORT-3-IF_ERROR_VLANS_SUSPENDED: VLANs [chars] on Interface [chars] are being suspended. (Reason: [chars])

Explanation  The VLANs on an interface are being suspended due to some protocol action

Recommended Action  No action is required.

Error Message  ETHPORT-3-IF_SDP_TIMEOUT_SFP_MISMATCH: SDP timeout, possible incorrect SFP inserted on fabric uplink port on interface [chars].

Explanation  SDP timeout/SFP Mismatch.

Recommended Action  No action is required.

Error Message  ETHPORT-3-IF_SFP_ALARM: Interface [chars], [chars]

Explanation  There was an alarm on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-3-IF_SFP_ERROR: Interface [chars], [chars]

Explanation  There was an error on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-3-IF_UNSUPPORTED_TRANSCEIVER: Transceiver on interface [chars] is not supported

Explanation  The transceiver for the interface specified in the error message is not a Cisco supported module

Recommended Action  Replace the module with a compatible transceiver. If the transceiver was purchased from Cisco, please contact Cisco TAC to get the transceiver replaced

Error Message  ETHPORT-3-IF_XCVR_ALARM: Interface [chars], [chars]

Explanation  There was an alarm on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-3-IF_XCVR_ERROR: Interface [chars], [chars]

Explanation  There was an error on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

ETHPORT-4

Error Message  ETHPORT-4-IF_40G_NOT_ADMIN_DOWN: 40G member port [chars] is not in ADMIN DOWN state. Speed change is not allowed

Explanation  Speed change is not allowed. Admin state is not down on 40G member ports

Recommended Action  Please shut all member ports before speed change

Error Message  ETHPORT-4-IF_MAC_LEARN_DISABLE: Mac learning is [chars] on interface [chars]

Explanation  Interface mac learning enabled/disabled

Recommended Action  No action is required.

Error Message  ETHPORT-4-IF_NON_QUALIFIED_TRANSCEIVER: Non-qualified transceiver on interface [chars] was detected

Explanation  The transceiver for the interface specified has not been qualified on this platform for this software release

Recommended Action  Replace the module with a supported transceiver. Contact Cisco TAC to get platform transceiver qualification details

Error Message  ETHPORT-4-IF_SFP_WARNING: Interface [chars], [chars]

Explanation  There was an warning on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-4-IF_SPEED_AUTO_ADVERTISE_SINGLE_SPEED: Interface [chars] configured as speed auto but advertising only speed [chars] due to macsec

Explanation  The interface is configured for multiple speeds, but advertises only single speed due to macsec configuration.

Recommended Action  No action is required.

Error Message  ETHPORT-4-IF_XCVR_WARNING: Interface [chars], [chars]

Explanation  There was an warning on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-4-INVALID_MACADDR: Interface [chars] rejected IPv6-embedded mac [chars] config

Explanation  The IPv6 derived mac-address is an invalid one.

Recommended Action  No action is required.

ETHPORT-5

Error Message  ETHPORT-5-IF_ADMIN_UP: Interface [chars] is admin up [chars]

Explanation  Interface is admin up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_BANDWIDTH_CHANGE: Interface [chars],bandwidth changed to [chars] Kbit

Explanation  Bandwidth of the interface (port channel) has changed and this change is updated

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_ADMIN_DOWN: Interface [chars] is down (Administratively down)

Explanation  Interface has been configured to be administratively down

Recommended Action  Perform 'no shutdown'

Error Message  ETHPORT-5-IF_DOWN_AGGR_PORT_FLAPS: Interface [chars] is error disabled due to aggressive flaps

Explanation  Interface has been error disabled due to aggressive flapping

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_CFG_CHANGE: Interface [chars] is down(Config change)

Explanation  FCIP interface temporarily down due to reconfiguration

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_CHANNEL_ADMIN_DOWN: Interface [chars] is down (Channel admin down)

Explanation  This interface belongs to a PortChannel and the PortChannel is configured to be administratively down

Recommended Action  Perform 'no shutdown' on the PortChannel interface that it belongs to

Error Message  ETHPORT-5-IF_DOWN_CHANNEL_MEMBERSHIP_UPDATE_IN_PROGRESS: Interface [chars] is down (Channel membership update in progress)

Explanation  The interface belongs to a PortChannel and a configuration is being attempted on the interface while there is a configuration in progress on the PortChannel

Recommended Action  Retry the configuration again

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_ADDR_ASSIGN_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to domain id assignment failure)

Explanation  Isolated due to a failure while assigning a domain

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_INVALID_RCF_RECEIVED: Interface [chars] is down (Isolation due to invalid fabric reconfiguration)

Explanation  Invalid RCF received

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_MANAGER_DISABLED: Interface [chars] is down (Isolation due to domain manager disabled)

Explanation  Isolated due to domain manager being disabled

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_MAX_RETRANSMISSION_FAILURE: Interface [chars] is down (Isolation due to domain manager other side not responding)

Explanation  Remote end domain manager not responding

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_OTHER_SIDE_EPORT_ISOLATED: Interface [chars] is down (Isolation due to domain other side eport isolated)

Explanation  Isolating this interface due to the remote end being isolated

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_OVERLAP_ISOLATION: Interface [chars] is down (Isolation due to domain overlap)

Explanation  Isolated due to domain overlap

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_ELP_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ELP failure)

Explanation  ELP failed on the interface

Recommended Action  Check the output of 'show port internal info' in the 'ELP failure reason' field

Error Message  ETHPORT-5-IF_DOWN_EPP_FAILURE: Interface [chars] is down (Error Disabled - EPP Failure)

Explanation  Trunk protocol failed

Recommended Action  'show port internal event-history msgs' will indicate the trunk protocol exchanges to determine why it failed

Error Message  ETHPORT-5-IF_DOWN_ESC_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ESC failure)

Explanation  ESC failed on the interface

Recommended Action  Check the output of 'show port internal event-history' to determine the ESC protocol exchanges to determine how it failed

Error Message  ETHPORT-5-IF_DOWN_ETH_IF_DOWN: Interface [chars] is down(Tunnel port src interface down)

Explanation  Ethernet link to which the FCIP interface is bound is down

Recommended Action  Ensure that the ethernet cable is connected, the interface is administratively enabled

Error Message  ETHPORT-5-IF_DOWN_ETH_LINK_DOWN: Interface [chars] is down(Tunnel port src interface link down)

Explanation  Ethernet link to which the FCIP interface is bound is down

Recommended Action  Ensure that the ethernet cable is connected and the remote end is also active

Error Message  ETHPORT-5-IF_DOWN_FCOT_NOT_PRESENT: Interface [chars] is down (FCOT not present)

Explanation  The FCOT has been removed

Recommended Action  Insert an FCOT

Error Message  ETHPORT-5-IF_DOWN_FCOT_VENDOR_NOT_SUPPORTED: Interface [chars] is down (Error disabled - Fcot vendor not supported)

Explanation  Fcot inserted is not a supported one

Recommended Action  Please contact customer support for a list of authorized transceiver vendors

Error Message  ETHPORT-5-IF_DOWN_HW_FAILURE: Interface [chars] is down (Hardware Failure)

Explanation  The module's hardware has failed

Recommended Action  Collect more information about failed module using command 'show module internal all module'

Error Message  ETHPORT-5-IF_DOWN_INACTIVE: Interface [chars] is down (Inactive)

Explanation  The port VSAN has been suspended or deleted

Recommended Action  Assign a new active port VSAN to the interface

Error Message  ETHPORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_MODE: Interface [chars] is down (Error disabled - Incompatible admin port mode)

Explanation  The configured mode is not supported on this interface

Recommended Action  Perform a 'show port internal info' to determine the list of modes supported on this interface

Error Message  ETHPORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBBCREDIT: Interface [chars] is down (Error disabled - Incompatible admin port rxbbcredit)

Explanation  The configured receive B2B credit size is not supported

Recommended Action  Get the allowed receive B2B credit size from 'show port internal info'

Error Message  ETHPORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBUFSIZE: Interface [chars] is down (Error disabled - Incompatible admin port rxbufsize)

Explanation  The configured receive buffer size is not supported

Recommended Action  Get the allowed receive buffer size from 'show port internal info'

Error Message  ETHPORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_SPEED: Interface [chars] is down (Error disabled - Incompatible admin port speed)

Explanation  The configured speed is not supported on this interface

Recommended Action  Perform a 'show port internal info' to determine the range of speed supported on this interface

Error Message  ETHPORT-5-IF_DOWN_INITIALIZING: Interface [chars] is down (Initializing)

Explanation  The interface is in the process of coming up

Recommended Action  If the interface is stuck in this state for a while, check the output of 'show port internal event-history' to determine what it is waiting for

Error Message  ETHPORT-5-IF_DOWN_INTERFACE_REMOVED: Interface [chars] is down (Interface removed)

Explanation  Interface removed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface [chars] is down (Link failure)

Explanation  The physical link has gone down

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  ETHPORT-5-IF_DOWN_LOOPBACK_DIAG_FAILURE: Interface [chars] is down (Diag failure)

Explanation  Diag failed on the interface

Recommended Action  Collect more information about failed interface using command 'attach module' to connect to module

Error Message  ETHPORT-5-IF_DOWN_LOOPBACK_ISOLATION: Interface [chars] is down (Isolation due to port loopback to same switch)

Explanation  The interface is looped back to another interface on the same switch

Recommended Action  Check the connectivity of this interface and ensure that it is connected to another switch

Error Message  ETHPORT-5-IF_DOWN_MEDIA_TYPE: Interface [chars] is error disabled due to special xcvr in nearby port

Explanation  Interface has been error disabled due to special xcvr in nearby port

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface [chars] is down (module removed)

Explanation  Interface is down because the module was removed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_NONE: Interface [chars] is down ([chars])

Explanation  Interface is down with a possible reason.

Recommended Action  Collect more information about port using command 'show port internal info/event-history' to determine why it went down

Error Message  ETHPORT-5-IF_DOWN_NON_PARTICIPATING: Interface [chars] is down (Non participating)

Explanation  The loop port has been put into non participating mode

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_OFFLINE: Interface [chars] is down (Offline)

Explanation  The interface has been placed into the offline state

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_PARENT_ADMIN_DOWN: Interface [chars] is down (Parent interface down)

Explanation  Parent interface is down

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_PARENT_DOWN: Interface [chars] is down (Parent interface is down)

Explanation  The physical link on the parent interface has gone down

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_PEER_CLOSE: Interface [chars] is down(TCP conn. closed by peer)

Explanation  The FCIP peer connected to this interface closed the TCP connection

Recommended Action  This command will provide the peer IP address of this FCIP interface: show interface. Check to see why the peer closed the TCP connection

Error Message  ETHPORT-5-IF_DOWN_PEER_RESET: Interface [chars] is down(TCP conn. reset by peer)

Explanation  TCP connection to the FCIP peer got reset

Recommended Action  The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Check to see why the peer reset the TCP connection

Error Message  ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface [chars] is down (No operational members)

Explanation  This is a PortChannel interface and all its members are operationally down

Recommended Action  Enable at least one of the PortChannel's members

Error Message  ETHPORT-5-IF_DOWN_PORT_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to port vsan mismatch)

Explanation  Isolated due to a mismatch in the configured port VSAN of the local and remote ends

Recommended Action  Configure the port VSAN of the local and remote interfaces to be the same and perform a 'shutdown' and a 'no shutdown'

Error Message  ETHPORT-5-IF_DOWN_RCF_IN_PROGRESS: Interface [chars] is down (RCF in progress)

Explanation  There is an RCF in progress

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_SOFTWARE_FAILURE: Interface [chars] is down (Port software failure)

Explanation  The software servicing the data path on the port has failed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_SRC_MOD_NOT_ONLINE: Interface [chars] is down(Tunnel source module not online)

Explanation  Module that has the tunnel source port of this FCIP interface is not fully online

Recommended Action  The module that has the tunnel src port is coming online. Please use show mod to find module status

Error Message  ETHPORT-5-IF_DOWN_SRC_PORT_NOT_BOUND: Interface [chars] is down (Tunnel port src interface unbound)

Explanation  Tunnel port source interface unbound

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_SRC_PORT_REMOVED: Interface [chars] is down(Tunnel src port removed)

Explanation  Tunnel source port of this FCIP interface has been removed

Recommended Action  The src interface with ip address that matches the ip address of the bound entity is removed. This happens normally due to the module on which the src interface exists is removed

Error Message  ETHPORT-5-IF_DOWN_SUSPENDED_BY_MODE: Interface [chars] is down (Suspended due to incompatible mode)

Explanation  This interface belongs to a PortChannel and operational mode of the interface is different from that of the PortChannel

Recommended Action  Change the mode and the trunking mode of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  ETHPORT-5-IF_DOWN_SUSPENDED_BY_SPEED: Interface [chars] is down (Suspended due to incompatible speed)

Explanation  This interface belongs to a PortChannel and operational speedode of the interface is different from that of the PortChannel

Recommended Action  Change the speed of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  ETHPORT-5-IF_DOWN_SUSPENDED_BY_WWN: Interface [chars] is down (Suspended due to incompatible remote switch WWN)

Explanation  This interface belongs to a PortChannel and remote switch WWN of the interface is different from that of the PortChannel

Recommended Action  Ensure that this interface is connected to the same remote switch as all the other interfaces in the PortChannel

Error Message  ETHPORT-5-IF_DOWN_SUSPENDED: Interface [chars] is down (Suspended)

Explanation  This interface belongs to a PortChannel and has been suspended due to an error while bringing it up

Recommended Action  Perform a 'shutdown' and a 'no shutdown'. If this happens again obtain output of 'show port internal info/event-history' on the interface

Error Message  ETHPORT-5-IF_DOWN_TCP_KEEP_ALIVE_EXPIRED: Interface [chars] is down(TCP conn. closed - Keep alive expired)

Explanation  TCP session to the FCIP peer got closed due to loss of TCP keep alive

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  ETHPORT-5-IF_DOWN_TCP_MAX_RETRANSMIT: Interface [chars] is down(TCP conn. closed - retransmit failure)

Explanation  Interface is down due to maximum retransmission failure

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  ETHPORT-5-IF_DOWN_TCP_PERSIST_TIMER_EXPIRED: Interface [chars] is down(TCP conn. closed - Persist timer expired)

Explanation  TCP session to the FCIP peer closed because TCP persist timer expired

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  ETHPORT-5-IF_DOWN_UPGRADE_IN_PROGRESS: Interface [chars] is down (Linecard upgrade in progress)

Explanation  Upgrade of the linecard software is in progress

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_VRF_UNUSABLE: Interface [chars] is down (Vrf down)

Explanation  The vrf for which this interface is a member is removed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to vsan mismatch)

Explanation  This is a trunking interface and the VSANs configured do not match with the VSANs configured on the remote end

Recommended Action  Check the VSANs configured on the local end with the remote end

Error Message  ETHPORT-5-IF_DOWN_ZONE_MERGE_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to zone merge failure)

Explanation  Isolated due to a failure during zone merge

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_ZONE_REMOTE_NO_RESP_ISOLATION: Interface [chars] is down (Isolation due to remote zone server not responding)

Explanation  Isolated due to remote zone server not responding

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DUPLEX: Interface [chars], operational duplex mode changed to [chars]

Explanation  Operational duplex mode has changed when link came up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_ERRDIS_RECOVERY: Interface [chars] is being recovered from error disabled state (Last Reason:[chars])

Explanation  Interface is being recovered from error disabled state

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_HARDWARE: Interface [chars], hardware type changed to [chars]

Explanation  There was a change in the hardware characteristic of an interface, such as a transceiver module plugged in or removed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_L2MP_MODE: Interface [chars], l2mp-mode changed to [chars]

Explanation  The l2mp-mode on the port has changed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_PEER_LINK_DELAY_TIMER_OFF: The delay timer for peer-link [chars] has been turned off

Explanation  The bringup delay timer for the peer-link has been turned off as a result of which the peer-link bringup will be resumed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_PEER_LINK_DELAY_TIMER_ON: The delay timer for peer-link [chars] has been turned on

Explanation  The bringup delay timer for the peer-link is on as a result of which the peer-link bringup will be delayed with the delay indicated by the configured value of the timer. Execute \show vpc\ to find out how much time is remaining

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_RX_FLOW_CONTROL: Interface [chars], operational Receive Flow Control state changed to [chars]

Explanation  Operational receive flow control has changed when link came up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_TRUNK_DOWN: Interface [chars], vlan [chars] down

Explanation  Interface [chars] is trunking, VLANs [chars] are down

Recommended Action  The following commands will help determine why this VSAN is down on this interface: show interface, show port internal info interface VSAN, show port internal event-history interface vsan

Error Message  ETHPORT-5-IF_TRUNK_UP: Interface [chars], vlan [chars] up

Explanation  Interface [chars] is trunking, VLANs [chars] are up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_TX_FLOW_CONTROL: Interface [chars], operational Transmit Flow Control state changed to [chars]

Explanation  Operational transmit flow control has changed when link came up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_UP: Interface [chars] is up [chars]

Explanation  Interface is up in mode specified, if applicable

Recommended Action  No action is required.

Error Message  ETHPORT-5-SPEED: Interface [chars], operational speed changed to [chars]

Explanation  Operational speed has changed when link came up

Recommended Action  No action is required.

Error Message  ETHPORT-5-STORM_CONTROL_ABOVE_THRESHOLD: Traffic in port [chars] exceeds the configured threshold [chars]

Explanation  Traffic on specified port is beyond the configured storm-control threshold, and the excess traffic is being dropped

Recommended Action  Identify source of traffic storm

Error Message  ETHPORT-5-STORM_CONTROL_BELOW_THRESHOLD: Traffic in port [chars] has fallen below the configured threshold [chars]

Explanation  Traffic on specified port has returned to within configured storm-control threshold

Recommended Action  No action is required.

Error Message  ETHPORT-5-STORM_CONTROL_MULTI_ABOVE_THRESHOLD: Traffic in port [chars] exceeds the configured [chars]

Explanation  Traffic on specified port is beyond the configured storm-control threshold for a specific level, and the excess traffic is being dropped

Recommended Action  Identify source of traffic storm

Error Message  ETHPORT-5-STORM_CONTROL_MULTI_BELOW_THRESHOLD: Traffic in port [chars] has fallen below the configured [chars]

Explanation  Traffic on specified port has returned to within configured storm-control threshold

Recommended Action  No action is required.

Error Message  ETHPORT-5-SYSTEM_INTERFACE_SHUTDOWN: The physical interfaces are being brought down as VDC going into maintenance mode

Explanation  The physical interfaces are being brought down as VDC going into maintenance mode

Recommended Action  No action is required.

ETH_PORT_CHANNEL Messages

This section contains the ETH_PORT_CHANNEL messages.

ETH_PORT_CHANNEL-1

Error Message  ETH_PORT_CHANNEL-1-LC_CFG_FAILURE: configuring module [dec] failed [[chars]]

Explanation  Module configuration failed

Recommended Action  Module will be automatically reset

Error Message  ETH_PORT_CHANNEL-1-MALLOC_FAILED: cannot allocate memory (size [dec])

Explanation  No enough memory

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-1-MAP_PARAM_FAILURE: mapping parameter failed for [chars] [[chars]]

Explanation  Parameter mapping failed

Recommended Action  Specified service is misbehaving; check its status

Error Message  ETH_PORT_CHANNEL-1-MCAST_SEND_FAILURE: failed to send multicast [chars]: [chars]

Explanation  Failed to send a multicast message to all modules, usually because some module went down

Recommended Action  Run show port-channel consistency to check consistency

ETH_PORT_CHANNEL-2

Error Message  ETH_PORT_CHANNEL-2-RESET_MODULE: reset module [dec] for not responding or returning error

Explanation  A module is reset for not responding or returning error

Recommended Action  No action is required.

ETH_PORT_CHANNEL-3

Error Message  ETH_PORT_CHANNEL-3-ADD_REM_MEMBERS_FAILURE: [chars]

Explanation  Some service(s) failed to add or remove ports to port-channel

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-ALL_DROP_TIMEOUT: Some component(s) (sap:[chars]) timed out on dropping notif:[chars] (for:[chars]); collect

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-CLEAR_PORT_CLIENT_STATS_FAILURE: [chars]

Explanation  Failed to clear stats for port [chars] err: 0x[hex] ([chars])

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-COMPAT_CHECK_FAILURE: [chars] is not compatible

Explanation  Compatibility check failed when adding ports to port-channel

Recommended Action  Make sure the compatibility parameters are consistent while adding ports to port-channel, or use force option

Error Message  ETH_PORT_CHANNEL-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-3-MINLINK_REQ_NOT_MET_DUE_TO_BFD_CHANNEL_REINIT: [chars] does not meet min-link requirement based on BFD state. Reinit port-channel

Explanation  Port-channel does not meet min-link requirement based on BFD state

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-MSG_SEND_FAILURE: failed to send [chars] to sap [dec]: [chars]

Explanation  Failed to send a message

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-3-NUM_ACTIVE_PORTS_ERROR: Port-channel:[chars] active_nports [dec]; No member is active; Please collect

Explanation  Port-channel num active ports error

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PCM_HWCFG_FAIL_ERROR: Port-channel:[chars] mbr:[chars] SAP [dec] returned error [chars] for opc [chars]; please collect

Explanation  Port-channel hwcfg fail error

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PCM_INTERNAL_ERROR: Port-channel:[chars] mbr:[chars]; collect

Explanation  Port-channel internal error

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PCM_PORT_DEL_IN_PC_UP_ERROR: Port-channel:[chars] mbr:[chars]; please collect

Explanation  Port-channel port del in pc_up. Shut resp recvd before bundle member down

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PCM_PORT_DOWN_IN_PC_UP_ERROR: Port-channel:[chars] mbr:[chars]; please collect

Explanation  Port-channel port down in pc_up. No bundle member down

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PEER_COLLECT_ENABLE_NOT_RCVD: LACP neighbor for [chars] may not have enabled collect bit in LACP PDU in stipulated time.

Explanation  LACP peer may not have enabled collect bit in LACP PDU in stipulated time.

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PORT_CHANNEL_NOT_FOUND: [chars] is not found

Explanation  Cannot find port-channel in its database, which indicates an inconsistency with an external component

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-3-RESOURCE_ALLOC_FAILED_PORT_CHANNEL_DELETED: [chars] deleted

Explanation  Port-channel deleted from running config

Recommended Action  May need to re-configure the port-channel and its members

Error Message  ETH_PORT_CHANNEL-3-RSP_TIMEOUT: Component [chars] timed out on response to opcode:[chars] (for:[chars])

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_MBR_CHANGE_FAILURE: [chars]

Explanation  Some service failed shadow member change to port-channel

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_PC_CREATE_FAILURE: [chars]

Explanation  Some service failed shadow port-channel create

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_PC_DELETE_FAILURE: [chars]

Explanation  Some service failed shadow port-channel delete

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-TIMEOUT: timed out after [dec] seconds [type [chars], state [chars]]

Explanation  Some operation timed out

Recommended Action  Run show port-channel consistency to check all module connectivity and consistency

ETH_PORT_CHANNEL-4

Error Message  ETH_PORT_CHANNEL-4-PORT_CFG_DELETED: [chars] removed from [chars] (different module inserted)

Explanation  Port is removed from a port-channel because a different module was inserted to the same slot

Recommended Action  You lost some ports from port-channel, check if you want to add ports in the new module to the same port-channel.

Error Message  ETH_PORT_CHANNEL-4-PORT_CHANNEL_RANGE: The total number of port channels configured in the range exceeds maximum: [dec].

Explanation  The total number of port channels configured in the range exceeds maximum

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-4-PORT_CHANNEL_RESTORE: The total number of port channels restored: [dec] exceeds maximum: [dec]. This may corrupt TCAM entries. Please reduce port channel number to no greater than maximum.

Explanation  The total number of port channels restored exceeds maximum

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-4-PORT_INDIVIDUAL: port [chars] is operationally individual

Explanation  The port is operating as an individual link even though it is locally or remotely configured to be part of a port channel

Recommended Action  Check the configuration of the port locally and remotely to ensure that it can operate as part of a port channel

Error Message  ETH_PORT_CHANNEL-4-PORT_NOT_FOUND: port [chars] is not part of port-channel

Explanation  Cannot find the port in port-channel database, which indicates an inconsistency with an external component

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-4-RACE_WARN: [chars]

Explanation  Warning of possible race condition

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-4-UNEXPECTED_RESPONSE: unexpected response [chars] from [chars]

Explanation  Received an unexpected response and discarded

Recommended Action  No action is required.

ETH_PORT_CHANNEL-5

Error Message  ETH_PORT_CHANNEL-5-AUTO_CREATE_FAILURE: [chars] [chars]

Explanation  Auto create process on the port failed

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-CREATED: [chars] created

Explanation  A port-channel is created

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-DELETED: [chars] deleted

Explanation  A port-channel is deleted

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-FOP_CHANGED: [chars]: first operational port changed from [chars] to [chars]

Explanation  The first operational port in a port-channel is changed

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-IF_DOWN_SUSPENDED_BY_MODE: Interface [chars] is down (Suspended due to incompatible mode

Explanation  Compatibility check failed when adding ports to port-channel

Recommended Action  Make sure the compatibility parameters are consistent between the ports and the port-channel

Error Message  ETH_PORT_CHANNEL-5-IF_DOWN_SUSPENDED_BY_SPEED: Interface [chars] is down (Suspended due to incompatible speed

Explanation  Operational compatibility check failed on the port in a port-channel

Recommended Action  Make sure the compatibility parameters are consistent between the ports and the port-channel

Error Message  ETH_PORT_CHANNEL-5-MAX_CHANNEL_DISALLOWED: Module failed to come online because port channel interface greater than [dec] is present

Explanation  The port-channel number configured on the switch is larger than 128

Recommended Action  Delete the set of port channel interface which is greater than 128

Error Message  ETH_PORT_CHANNEL-5-PORT_ADDED: [chars] added to [chars]

Explanation  Ports are added to a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_CHANNEL_DELAYED_LACP: [chars]: port-channel is up with member [chars] in delayed-lacp mode

Explanation  Port-channel is up in delayed-lacp mode

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_CHANNEL_LACP_MODE: [chars]: [chars]

Explanation  Port-channel is coming up in lacp mode

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_DOWN: [chars]: [chars] is down

Explanation  Port goes down in a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_HOT_STANDBY_DOWN: [chars]: hot-standby port [chars] is down

Explanation  Port-channel hot-standby member goes down

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_HOT_STANDBY: [chars]: [chars] goes to hot-standby

Explanation  Port goes to hot-standby in a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_INDIVIDUAL_DOWN: individual port [chars] is down

Explanation  Port-channel member operating in individual mode goes down

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_REMOVED: [chars] removed from [chars]

Explanation  Ports are removed from a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_SUSPENDED: [chars]: [chars] is suspended

Explanation  Port is suspended in a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_UP: [chars]: [chars] is up

Explanation  Port comes up in a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_WAIT_BFD: [chars] waiting for BFD session to get established

Explanation  Port waiting for BFD session establishment

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-5-SUBGROUP_ID_CHANGE: Interface [chars] in port-channel[dec] subgroup-id changed from [dec] to [dec]

Explanation  The port's subgroup-id got changed

Recommended Action  No action is required.

ETH_PORT_CHANNEL-6

Error Message  ETH_PORT_CHANNEL-6-RESYNC: resyncing [chars] with all modules

Explanation  Resync modules with sup after an error or switchover

Recommended Action  No action is required.

ETH_PORT_CHANNEL-7

Error Message  ETH_PORT_CHANNEL-7-GSYNC_DONE: global synchronization is done

Explanation  Port-channel manager finished global synchronization

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-GSYNC_REQ: requesting global synchronization

Explanation  Port-channel manager requested a global synchronization from active sup

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_ACTIVE: started in active mode

Explanation  Port-channel manager started in active mode

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_DEFAULT: started with default configuration

Explanation  Port-channel manager started with default configuration

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_STANDBY: started in standby mode

Explanation  Port-channel manager started in standby mode

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_STATEFUL: started statefully

Explanation  Port-channel manager started with running configuration

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_STATELESS: started statelessly

Explanation  Port-channel manager started with startup configuration

Recommended Action  No action is required.

EVMC Messages

This section contains the EVMC messages.

EVMC-3

Error Message  EVMC-3-MTS_OPERATION_FAILED: [chars]([dec]): [chars]

Explanation  Internal IPC operation failed in Event Manager Client

Recommended Action  No action is required.

EVMC-4

Error Message  EVMC-4-ACTION_CFG_MONITOR_COLLECT: [chars]([dec]): Action configuration disallowed for Monitor Collect Policy

Explanation  Configuring Policy Action for Monitor Collect Policy isnot allowed and hence, has been rejected

Recommended Action  No action is required.

EVMC-5

Error Message  EVMC-5-AVL_CREATE_FAIL: [chars]([dec]): AVL Tree creation failure

Explanation  Event Manager could not initialize local policy store

Recommended Action  No action is required.

Error Message  EVMC-5-MALLOC_FAILURE: [chars]([dec]): Memory allocation failure

Explanation  Event Manager Client process could not allocate memory

Recommended Action  No action is required.

Error Message  EVMC-5-RT_PSS_OP_FAILURE: [chars]([dec]): Failed to [chars]. Error:[chars]

Explanation  Event Manager Client could not access HA store

Recommended Action  No action is required.

EVMC-6

Error Message  EVMC-6-MTS_AGE_LIMIT_EXCEEDED: Publisher registration mts took higher time to be processed than expected Age is: [dec]

Explanation  Publisher registration mts took higher time than expected

Recommended Action  No action is required.

EVMS Messages

This section contains the EVMS messages.

EVMS-2

Error Message  EVMS-2-EVMS_PSS_DELETE_FAILURE: Delete from PSS failed

Explanation  Delete from PSS failed

Recommended Action  No action is required.

Error Message  EVMS-2-EVMS_PSS_WRITE_FAILURE: Write to PSS failed

Explanation  Write to PSS failed

Recommended Action  No action is required.

Error Message  EVMS-2-EVMS_SHOW_POLICY_ALLOC_FAILURE: Insufficient memory: policy information shown will be incomplete

Explanation  Memory allocation failed. so complete requested information is not being shown

Recommended Action  No action is required.

EVMS-4

Error Message  EVMS-4-EVMS_APPLET_NO_ACTION_DEFAULT: WARNING: The default system policy actions are being skipped

Explanation  The default system policy actions are being skipped

Recommended Action  No action is required.

EVMS-6

Error Message  EVMS-6-EVMS_LOGGING_NO_SPACE: logflash full, so deleting first event archive file

Explanation  As the logflash is full, first of the present event archive files is deleted

Recommended Action  No action is required.

EXCEPTIONLOG Messages

This section contains the EXCEPTIONLOG messages.

EXCEPTIONLOG-SLOT#-2

Error Message  EXCEPTIONLOG-SLOT#-2-LC_EXP_MSG: Linecard exception: [chars] is the affected Port bit map. [dec] Additional information - [chars]

Explanation  LC Exception event.

Recommended Action  No action is required.

FC-TUNNEL Messages

This section contains the FC-TUNNEL messages.

FC-TUNNEL-3

Error Message  FC-TUNNEL-3-INTERNAL_ERROR: Internal error: [chars]

Explanation  FCMPLS tunnel process encountered a general error, one that does not fall in any of the categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-IPFC_ERROR: IPFC API, [chars], failed with error 0x[hex]

Explanation  FCMPLS tunnel invoked IPFC API and received the error code. [chars] describes the API and 0x[hex] specifies the error

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-MTS_ERROR: MTS message transmission failed with error [dec]

Explanation  FCMPLS tunnel process unsuccessfully tried to send a MTS message. MTS errro number is specified in [dec]

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-NS_ERROR: FCNS API, [chars], failed with error 0x[hex]

Explanation  FCMPLS tunnel invoked FCNS API and received the error code. [chars] describes the API and 0x[hex] specifies the error

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-PM_ERROR: Port Manager API, [chars], failed with error 0x[hex]

Explanation  FCMPLS tunnel invoked Port Manager API and received the error code. [chars] describes the API and 0x[hex] specifies the error

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-PSS_CFG_RESTORE_ERROR: Configuration restoration for [chars] failed with error 0x[hex]

Explanation  FCMPLS tunnel read the saved configuration and encountered an error while rebuilding the runtime configuration. [chars] describes the configuration which the process tried to restore and 0x[hex] is the system error code

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-PSS_ERROR: PSS operation [chars] returned error: 0x[hex]

Explanation  [chars] specifies the context where the failure occurred and 0x[hex] specifies the error

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-PSS_RTDB_RESTORE_ERROR: Runtime database restoration for [chars] failed with error 0x[hex]

Explanation  FCMPLS tunnel read the saved runtime database and encountered an error while rebuilding the runtime database. [chars] describes the runtime database which the process tried to restore and 0x[hex] is the system error code

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-RIB_ERROR: RIB API, [chars], failed with error 0x[hex]

Explanation  FCMPLS tunnel invoked RIB API and received the error code. [chars] describes the API and 0x[hex] specifies the error

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-RSVP_PROTO_ERROR: RSVP protocol error: [chars]

Explanation  RSVP-TE protocol error is encountered. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  FC-TUNNEL-3-UNEXPECTED_MTS_MSG: Unexpected MTS message, opcode [dec], is received

Explanation  FCMPLS tunnel process received unexpected MTS event. MTS opcode is specified in [dec]

Recommended Action  No action is required.

FC-TUNNEL-5

Error Message  FC-TUNNEL-5-MSG_INTERFACE_DOWN: Interface [chars] is down

Explanation  The logical fc tunnel interface is down. This may be due to a reconfiguration on the fc tunnel, or issues on the underlying physical interface

Recommended Action  If this is not due to a known reconfiguration, you should verify connectivity at the physical port level, and then on then on the fc tunnel interface. Furthermore, verify the physical ports along the fc tunnel path operate in the TE mode

Error Message  FC-TUNNEL-5-MSG_INTERFACE_UP: Interface [chars] is up

Explanation  The fc interface is up

Recommended Action  No action is required.

FEATURE-MGR Messages

This section contains the FEATURE-MGR messages.

FEATURE-MGR-2

Error Message  FEATURE-MGR-2-FM_AUTOCKPT_FAILED: AutoCheckpoint [chars] failed to be created for reason: [chars] (0x[hex])

Explanation  AutoCheckpoint creation with the given name failed

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-FM_FEATURE_LICENSE_ERROR: license [chars] checkout failure for [chars], error 0x[hex] ([chars])

Explanation  License operation was not successful, check license validity for the feature

Recommended Action  Please contact FM team

Error Message  FEATURE-MGR-2-FM_FEATURE_OP_GENERIC_ERROR: Service [chars] with uuid [dec] (0x[hex]) encountered error:0x[hex]([chars]).Disable dependent features or contact service owner for details.

Explanation  Operation was not successful

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FEATURE_OP_TIMEOUT_ERROR: feature [chars] operation failed on response timeout from service: [chars] with uuid (0x[hex])

Explanation  The error seen at FM and service communication

Recommended Action  Please contact service owner with given uuid and FM team

Error Message  FEATURE-MGR-2-FM_FSET_ADD_CONFCHECK_ERROR: failed to add confcheck 0x[hex] ([chars]) at installing feature-set [chars]

Explanation  Failed to add confcheck at enabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_CFG_ALLOW_ERROR: Potential vdc_mgr issue: the allow request failed 0x[hex] ([chars])

Explanation  Vdc_mgr failed to response the allow request

Recommended Action  Please contact FM/vdc_mgr team

Error Message  FEATURE-MGR-2-FM_FSET_CKPT_ERROR: Checkpoint issue: failed on checkpoint with error 0x[hex] ([chars]) at feature-set [chars]

Explanation  Checkpoint did not respond

Recommended Action  Please contact FM/vdc_mgr and rollback team

Error Message  FEATURE-MGR-2-FM_FSET_DISABLE_ERROR: Potential sysmgr issue: disable feature-set [chars] on sup failed with error 0x[hex] ([chars])

Explanation  Some issues while disabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_DISABLE_FEATURES_ERROR: features failed to disable at feature-set [chars] with error 0x[hex] ([chars])

Explanation  Failed to disable feature at disabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_DISABLE_FEATURES_TIMEOUT: Potential [chars] issue: feature [chars] did not complete its disabling

Explanation  Failed to disable feature at disabling feature-set

Recommended Action  Please contact FM/sysmgr team and the feature owner

Error Message  FEATURE-MGR-2-FM_FSET_INSTALL_ERROR: install feature-set [chars] returns error 0X[hex] ([chars])

Explanation  Some issues during install feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_LCS_DISABLE_ERROR: Potential sysmgr issue: disable feature-set [chars] failed on module [dec] with error 0x[hex] ([chars])

Explanation  Some issues on the lc while disabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_LCS_ENABLE_ERROR: enabling feature-set [chars] on module [dec] returns error 0X[hex] ([chars])

Explanation  Somes issue on the lc while enabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_PRESEQ_REJECT: pre-sequence rejected by feature-set due to a service with sap [dec]: [chars]

Explanation  The message seen when an application rejects feature-set disable request

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_SUP_ENABLE_ERROR: enabling feature-set [chars] on sup returns error 0X[hex] ([chars])

Explanation  Some issues during enabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_UNGRACEFUL_DISABLE_ERROR: Potential sysmgr issue: ungraceful disable feature-set [chars] failed with error 0x[hex] ([chars])

Explanation  Some issues while ungraceful disable feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_UNGRACEFUL_UNINSTALL_ERROR: Potential sysmgr issue: ungraceful uninstall feature-set [chars] failed with error 0x[hex] ([chars])

Explanation  Some issues while ungraceful uninstall feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_UNINSTALL_ERROR: Potential sysmgr issue: uninstall feature-set [chars] failed with error 0x[hex] ([chars])

Explanation  Some issues while uninstall feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_MPLS_NVE_DEPENDENCY: Feature MPLS Static and NV Overlay can't be configured together

Explanation  Feature MPLS Static and NV Overlay can't be configured togethe

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-FM_MPLS_SR_VPC_DEPENDENCY: Feature MPLS SEGMENT ROUTING and VPC can't be configured together

Explanation  Feature MPLS SEGMENT ROUTING and VPC can't be configured together

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-FM_MPLS_VPC_DEPENDENCY: Feature MPLS Static and VPC can't be configured together

Explanation  Feature MPLS Static and VPC can't be configured together

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-MODULE_FM_DONE: feature manager completed

Explanation  Feature manager completed

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-MODULE_FM_STARTED: feature manager started

Explanation  Feature manager started

Recommended Action  No action is required.

FEATURE-MGR-3

Error Message  FEATURE-MGR-3-FM_FSET_INSTALL_CONFLICT_ERROR: feature-set [chars] cannot be installed; feature-set [chars] is in installed/enabled state; uninstall this feature-set and try

Explanation  Conflict feature set is in installed/enabled state

Recommended Action  No action is required.

FEATURE-MGR-6

Error Message  FEATURE-MGR-6-FM_AUTOCKPT_IN_PROGRESS: AutoCheckpoint [chars]'s creation in progress...

Explanation  AutoCheckpoint creation has been requested and it should be in progress

Recommended Action  No action is required.

Error Message  FEATURE-MGR-6-FM_AUTOCKPT_SUCCEEDED: AutoCheckpoint [chars] created successfully

Explanation  AutoCheckpoint with the given name has been created successfully

Recommended Action  No action is required.

Error Message  FEATURE-MGR-6-FM_FCOE_AUTOINSTALL_ON_NOT_ISOLA: auto-install feature-set fcoe on non-isola

Explanation  Auto-install feature-set fcoe could be done on isola only

Recommended Action  Please contact FM team

Error Message  FEATURE-MGR-6-FM_FSET_ENABLED_AT_UNINSTALL: Uninstall aborted because feature set is still enabled in vdc [dec]

Explanation  Feature set is in enabled state

Recommended Action  No action is required.

Error Message  FEATURE-MGR-6-FM_FSET_VMM_OP_ERROR: [chars]

Explanation  The error seen at FM and VMM interaction

Recommended Action  Please contact FM/VMM team

FS-DAEMON Messages

This section contains the FS-DAEMON messages.

FS-DAEMON-2

Error Message  FS-DAEMON-2-FSD_ENOSPC_BOOTFLASH: Due to insufficient space, [chars] image could not be copied to standby bootflash. [chars] image is not present on standby. Please copy \'[chars]\' manually.

Explanation  Move system images from RAM to bootflash to free up some memory

Recommended Action  Please remove some unnecessary files on bootflash using \'delete\' CLI command and copy images from active supervisor or from remote location

FS-DAEMON-6

Error Message  FS-DAEMON-6-FSD_ENOSPC_LOGFLASH: System logflash usage has reached [dec]%. You may delete some old files on logflash to free up space

Explanation  System logflash space is almost full

Recommended Action  Use 'clear core archived' or 'delete' CLI to free up space on logflash

Error Message  FS-DAEMON-6-FSD_ENOSPC_ROOT: System root usage has reached [dec]%. You may delete some old files from root or /var/log to free up space

Explanation  System root space is almost full

Recommended Action  Use 'clear core archived' or 'delete' CLI to free up space on root dir or /var/log

Error Message  FS-DAEMON-6-FSD_ENOSPC_TMP: System temporary directory usage has reached [dec]%.

Explanation  System /tmp space usage.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FS-DAEMON-6-FSD_REEXPORT_NFS: Re-exported NFS mounts

Explanation  Exported NFS mounts are not visible in kernel and had to be reexported

Recommended Action  Please use 'show system internal flash' to make sure there are no Stale NFS handles

FSCM Messages

This section contains the FSCM messages.

FSCM-2

Error Message  FSCM-2-FABRIC_START_CFG_MGR_PROGRAM_EXIT: Fabric Start Cfg Mgr daemon exiting: [chars]

Explanation  FABRIC_START_CFG_MGR daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FSYNC_MGR Messages

This section contains the FSYNC_MGR messages.

FSYNC_MGR-2

Error Message  FSYNC_MGR-2-FSYNC_LICENSE_EXPIRED_HONOR: License expired for feature frequency-synchronization. Feature will run in honor mode. Please install DCN-SYNCE-XF license.

Explanation  License has expired, FSYNC_MGR will work in honor mode.

Recommended Action  No action is required.

Error Message  FSYNC_MGR-2-FSYNC_LICENSE_MISSING_HONOR: Feature frequency-synchronization license missing: Feature will work in honor mode. Please install DCN-SYNCE-XF license.

Explanation  License missing, FSYNC_MGR will work in honor mode.

Recommended Action  No action is required.

Error Message  FSYNC_MGR-2-FSYNC_SELECTION_CHANGE: New selection for selection point [chars]: [dec] inputs selected[chars]

Explanation  A new set of inputs has been selected at the specified selection point, to drive the output of the selection point.

Recommended Action  No action is required.

Error Message  FSYNC_MGR-2-FSYNC_SEQ_TIMEOUT: [chars]

Explanation  Event Sequence Timeout

Recommended Action  No action is required.

FSYNC_MGR-3

Error Message  FSYNC_MGR-3-FSYNC_ESMC_RECV_TIMER: Failed to re-arm the ESMC SSM recv timer: [dec]

Explanation  An error occurred when attempting to re-arm the ESMC SSM recv timer. No further SSMs will be sent from interfaces on the card on which this message was seen.

Recommended Action  No action is required.

Error Message  FSYNC_MGR-3-FSYNC_ESMC_SEND_TIMER: Failed to re-arm the ESMC SSM send timer: [dec]

Explanation  An error occurred when attempting to re-arm the ESMC SSM send timer. No further SSMs will be sent from interfaces on the card on which this message was seen.

Recommended Action  No action is required.

FSYNC_MGR-4

Error Message  FSYNC_MGR-4-FSYNC_ESMC_REVC_TIMEDOUT: ESMC receive timed out for [chars]

Explanation  ESMC Recv timer expired

Recommended Action  No action is required.

Error Message  FSYNC_MGR-4-FSYNC_INPUT_PROGRAMMING_FAILED: Failed to program the inputs for selection point [chars]: [chars]

Explanation  The Frequency Synchronization manager that generated the message failed to program the inputs for the specified selection point into the platform. Any changes to the inputs (for example, if an input is no longer available or if it's QL has changed) will not take effect.

Recommended Action  No action is required.

Error Message  FSYNC_MGR-4-FSYNC_QLT_TIMER: Failed to set the loopback timer for all clock-interfaces: [dec]

Explanation  Timer init failed

Recommended Action  No action is required.

Error Message  FSYNC_MGR-4-FSYNC_SELECTION_ERROR: Failed to handle selection update for selection point [chars]: [chars]

Explanation  The Frequency Synchronization manager that generated the message encountered an error during handling of an update to the inputs selected at the specified selection point. The message contains more details of the error. The change to which inputs are selected, or to the QL or priority of the selected input, may not take effect.

Recommended Action  No action is required.

FSYNC_MGR-5

Error Message  FSYNC_MGR-5-FSYNC_ESMC_QL_CHANGE: ESMC QL changed on [chars] to [chars]

Explanation  ESMC QL change

Recommended Action  No action is required.

Error Message  FSYNC_MGR-5-FSYNC_MGR_DISABLED: FSYNC_MGR disabled

Explanation  FSYNC_MGR Service Disabled

Recommended Action  No action is required.

Error Message  FSYNC_MGR-5-FSYNC_MGR_ENABLED: FSYNC_MGR enabled

Explanation  FSYNC_MGR Service Enabled

Recommended Action  No action is required.

Error Message  FSYNC_MGR-5-FSYNC_SEQ_ERROR: [chars]

Explanation  Some step in an event sequence has failed

Recommended Action  No action is required.

FSYNC_MGR-6

Error Message  FSYNC_MGR-6-FSYNC_INIT_FAILED: Failed to initialize: [chars][chars]

Explanation  An error was encountered while the specified process was initializing

Recommended Action  No action is required.

Error Message  FSYNC_MGR-6-FSYNC_SELECTION_FALLBACK: Selection point [chars] is no longer externally synchronized: [chars]

Explanation  There is no longer a line or external source available for the specified selection point, so it has fallen back to the internal oscillator if available, or otherwise disabled the outputs.

Recommended Action  No action is required.

GLBP Messages

This section contains the GLBP messages.

GLBP-2

Error Message  GLBP-2-GLBP_URIB_INIT_ERROR: [chars]

Explanation  Unicast routing initialization failed and the GLBP process terminated

Recommended Action  Please check syslog messages for URIB failures and rectify the problem

GLBP-3

Error Message  GLBP-3-GLBP_ARP_ADD_FAILED: Interface [chars] grp [dec]: failed to add [chars]/[chars] in arp table

Explanation  The system was unable to add the GLBP vIP into the arp table

Recommended Action  Please check syslog messages for ARP failures and rectify the problem

Error Message  GLBP-3-GLBP_ARP_DEL_FAILED: Interface [chars] grp [dec]: failed to delete [chars]/[chars] in arp table

Explanation  The system was unable to delete the GLBP vIP from the arp table

Recommended Action  Please check syslog messages for ARP failures and rectify the problem

Error Message  GLBP-3-GLBP_FEATURE_MANAGER_ERROR: [chars]: [chars]

Explanation  There was a problem in GLBP interaction with feature manager.

Recommended Action  Please check the reason for error using feature manager and rectify the problem

Error Message  GLBP-3-GLBP_IP_JOIN_GROUP_FAILED: [chars]: failed to join glbp multicast address group

Explanation  The system was unable to peform a join to start receiving GLBP protocol packets.

Recommended Action  Please check syslog messages for IP failures and rectify the problem

Error Message  GLBP-3-GLBP_IP_LEAVE_GROUP_FAILED: [chars]: failed to leave glbp multicast address group

Explanation  The system was unable to peform a leave to stop receiving GLBP protocol packets.

Recommended Action  Please check syslog messages for IP failures and rectify the problem

Error Message  GLBP-3-GLBP_MAC_ADD_FAILED: Interface [chars] grp [dec]: fwd [dec] failed to add [chars] in mac table (error [hex])

Explanation  The system was unable to add the GLBP mac address into the mac addresss table

Recommended Action  Please check syslog messages for L2FM failures and rectify the problem

Error Message  GLBP-3-GLBP_MAC_DEL_FAILED: Interface [chars] grp [dec]: fwd [dec] failed to delete [chars] in mac table (error [hex])

Explanation  The system was unable to delete the GLBP mac address from the mac addresss table

Recommended Action  Please check syslog messages for L2FM failures and rectify the problem

Error Message  GLBP-3-GLBP_ROUTE_ADD_FAILED: Interface [chars] grp [dec]: failed to add [chars] in routing table

Explanation  The system was unable to add the GLBP vIP address into the unicast routing table

Recommended Action  Please check syslog messages for URIB failures and rectify the problem

Error Message  GLBP-3-GLBP_ROUTE_DEL_FAILED: Interface [chars] grp [dec]: failed to delete [chars] in routing table

Explanation  The system was unable to delete the GLBP vIP address from the unicast routing table

Recommended Action  Please check syslog messages for URIB failures and rectify the problem

GLBP-4

Error Message  GLBP-4-BADAUTH: Interface [chars] grp [dec]: Bad authentication received from [chars]

Explanation  Two routers participating in a Gateway Load Balancing Protocol group have a valid authentication string that does not match.

Recommended Action  Use the glbp authentication interface command to repair the Gateway Load Balancing Protocol authentication discrepancy between the local system and the one whose IP address is reported

Error Message  GLBP-4-BADVIP1: Interface [chars] grp [dec]: address [chars] is in the wrong subnet for this interface

Explanation  The Gateway Load Balancing Protocol virtual IP address is not within the subnet configured on this interface.

Recommended Action  Configure the virtual IP address of Gateway Load Balancing Protocol to be within the subnet configured on this interface.

Error Message  GLBP-4-BADVIP2: Interface [chars] grp [dec]: address [chars] in the wrong subnet for this interface is not learned

Explanation  The Gateway Load Balancing Protocol virtual IP address contained in the hello message cannot be learned. It is not within the subnet configured on this interface.

Recommended Action  Check the configuration on all Gateway Load Balancing Protocol routers.

Error Message  GLBP-4-BADVIP3: Interface [chars] grp [dec]: address [chars] is the broadcast address for this interface

Explanation  The Gateway Load Balancing Protocol virtual IP address is a broadcast address for this interface.

Recommended Action  Configure the virtual IP address of Gateway Load Balancing Protocol to be a non broadcast address.

Error Message  GLBP-4-DIFFVIP1: Interface [chars] grp [dec]: active router virtual IP address [chars] is different from the locally configured virtual IP address [chars]

Explanation  The Gateway Load Balancing Protocol virtual IP address contained in the Hello message from the Active router is different to that configured locally.

Recommended Action  Check the configuration on all Gateway Load Balancing Protocol routers

Error Message  GLBP-4-DUPADDR: Interface [chars] grp [dec]: Duplicate address on [chars]

Explanation  The IP address in a Gateway Load Balancing Protocol message received on the interface is the same as the IP address of its own router. This condition may be caused by a misconfiguration or because of a malfunctioning switch.

Recommended Action  Check the configurations on all the Gateway Load Balancing Protocol routers, and ensure that any switches are functioning properly

Error Message  GLBP-4-DUPVIP1: Interface [chars] grp [dec]: address [chars] already assigned to interface [chars] grp [dec]

Explanation  The Gateway Load Balancing Protocol virtual IP address contained in the hello message cannot be learned. It is already assigned to a different Gateway Load Balancing Protocol group.

Recommended Action  Check the configuration on all Gateway Load Balancing Protocol routers

Error Message  GLBP-4-DUPVIP2: Interface [chars] grp [dec]: address [chars] already assigned to this interface

Explanation  The Gateway Load Balancing Protocol virtual IP address contained in the hello message cannot be learned. It is already assigned to this interface.

Recommended Action  Check the configuration on all Gateway Load Balancing Protocol routers.

Error Message  GLBP-4-DUPVIP3: Interface [chars] grp [dec]: address [chars] already assigned to another interface [chars]

Explanation  The Gateway Load Balancing Protocol virtual IP address contained in the hello message cannot be learned. It is already assigned to, or overlaps with, an address on another interface or application.

Recommended Action  Check the configuration on all Gateway Load Balancing Protocol routers.

Error Message  GLBP-4-GLBP_ARP_RESP_FAILED: Interface [chars] grp [dec]: failed to send arp response [chars]/[chars]

Explanation  The system was unable to send the arp response for vIP

Recommended Action  Please check syslog messages for ARP failures and rectify the problem

GLBP-5

Error Message  GLBP-5-ACTIVE_CHANGE: Interface [chars] grp [dec]: Active gateway is [chars]

Explanation  The Gateway Load Balancing Protocol has changed active gateway.

Recommended Action  No action is required

Error Message  GLBP-5-FWDSTATECHANGE: Interface [chars] grp [dec]: fwd [dec] state changed from [chars] to [chars]

Explanation  The Gateway Load Balancing Protocol forwarder has changed state.

Recommended Action  No action is required

Error Message  GLBP-5-FWD_CREATE: Interface [chars] grp [dec]: fwd [dec] created

Explanation  The Gateway Load Balancing Protocol forwarder has been created.

Recommended Action  No action is required

Error Message  GLBP-5-FWD_DELETE: Interface [chars] grp [dec]: fwd [dec] deleted

Explanation  The Gateway Load Balancing Protocol forwarder has been removed.

Recommended Action  No action is required

Error Message  GLBP-5-FWD_OWNER: Interface [chars] grp [dec]: fwd [dec] owner mac is [chars]

Explanation  The Gateway Load Balancing Protocol forwarder has changed the owner MAC address.

Recommended Action  No action is required

Error Message  GLBP-5-FWD_VMAC: Interface [chars] grp [dec]: fwd [dec] virtual mac is [chars]

Explanation  The Gateway Load Balancing Protocol forwarder has changed the virtual MAC address.

Recommended Action  No action is required

Error Message  GLBP-5-FWD_WEIGHTING: Interface [chars] grp [dec]: fwd [dec] weighting is [dec]

Explanation  The Gateway Load Balancing Protocol forwarder has changed the weighting.

Recommended Action  No action is required

Error Message  GLBP-5-GRPSTATECHANGE: Interface [chars] grp [dec]: state changed from [chars] to [chars]

Explanation  The Gateway Load Balancing Protocol gateway has changed state.

Recommended Action  No action is required

Error Message  GLBP-5-MEMBER_ADD: Interface [chars] grp [dec]: member [chars] [chars] added

Explanation  The Gateway Load Balancing Protocol gateway has added a member.

Recommended Action  No action is required

Error Message  GLBP-5-MEMBER_REMOVE: Interface [chars] grp [dec]: member [chars] [chars] removed

Explanation  The Gateway Load Balancing Protocol gateway has removed a member.

Recommended Action  No action is required

Error Message  GLBP-5-PRIORITY: Interface [chars] grp [dec]: [chars] gateway priority changed to [dec]

Explanation  The Gateway Load Balancing Protocol gateway has changed priority.

Recommended Action  No action is required

Error Message  GLBP-5-STANDBY_CHANGE: Interface [chars] grp [dec]: Standby gateway is [chars]

Explanation  The Gateway Load Balancing Protocol has changed standby gateway.

Recommended Action  No action is required

Error Message  GLBP-5-TIMER: Interface [chars] grp [dec]: [chars] timer changed to [chars]

Explanation  The Gateway Load Balancing Protocol gateway has learnt timers.

Recommended Action  No action is required

Error Message  GLBP-5-VIPLEARN: Interface [chars] grp [dec]: learnt virtual ip address [chars]

Explanation  The Gateway Load Balancing Protocol gateway has learnt virtual IP address.

Recommended Action  No action is required

Error Message  GLBP-5-VIPUNLEARN: Interface [chars] grp [dec]: unlearnt virtual ip address [chars]

Explanation  The Gateway Load Balancing Protocol gateway has unlearnt virtual IP address.

Recommended Action  No action is required

Error Message  GLBP-5-WEIGHTING: Interface [chars] grp [dec]: weighting changed to [dec]

Explanation  The Gateway Load Balancing Protocol gateway has changed the weighting.

Recommended Action  No action is required

HSRP_ENGINE Messages

This section contains the HSRP_ENGINE messages.

HSRP_ENGINE-2

Error Message  HSRP_ENGINE-2-VRF_SHUTDOWN: VRF [chars] has been shut down however HSRP interfaces have VRF [chars] membership. HSRP Groups will fail to apply the configuration on subsequent ascii reload with VRF [chars] in shutdown state.

Explanation  The VRF has been shut down, and HSRP groups are present in that vrf. Upon reloading the device and applying ascii config, the configuration will not be applied. For the configuration to go through, VRF needs to be moved out of shutdown state or User removes the VRF membership for the HSRP interface . Also any subsequent addition or modification to the HSRP configuration under the shutdown vrf will fail. This is not applicable for the other forms of reloads or system switchover.

Recommended Action  User need to removes the VRF membership of the shutdown vrf from the HSRP interfaces before reloading the device. Otherwise after reload the HSRP configuration will perform the retry after reload.

HSRP_ENGINE-3

Error Message  HSRP_ENGINE-3-BFD_GLOBAL_SESSION_REMOVAL_ERROR: Failed to remove all the HSRP-BFD sessions(0x[hex] 0x[hex]), Refer logs

Explanation  Refer logs for more details

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BFD_IF_SESSION_REMOVAL_ERROR: Failed to remove few HSRP-BFD sessions(0x[hex] 0x[hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BFD_SESSION_ADD_ERROR: Failed to add few HSRP-BFD sessions(0x[hex] 0x[hex]), Refer logs

Explanation  TRefer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BFD_SESSION_CREATION_ERROR: Failed to create BFD session information(0x[hex] 0x[hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BFD_SESSION_REMOVAL_ERROR: Failed to remove few HSRP-BFD sessions(0x[hex] 0x[hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BUNDLE_ASID_REG_FAIL: Switch-id:[dec] DRAP registration failed for bundle:[dec].

Explanation  DRAP registration failure

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BUNDLE_LPSS_FAIL: LPSS [chars] for bundle:[dec] failed.

Explanation  Libanycast ADD/DEL is failing

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BUNDLE_VLAN_DOWN: Vlan [dec] DOWN for Bundle [dec], Traffic for group [dec] will be lost on this node.

Explanation  If any of the Vlan for the bundle goes down, then bundle remains UP untill the last Vlan of the bundle also goes down, this results into traffic loss for Vlans which are down but bundle is UP.

Recommended Action  User can shut the bundle on this node, so that all traffic coming to this node can be switched to other anycast nodes

Error Message  HSRP_ENGINE-3-ERROR_IN_ADD_VIP_TO_U6RIB: Failed to Add VIP [chars] to U6RIB (errno 0x[hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-ERROR_IN_DEL_VIP_FROM_U6RIB: Failed to delete VIP [chars] from U6RIB (errno 0x[hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-MASTER_CFG_UNNUMBERED: Interface [chars] has been moved as Unnumbered, for Master Hsrp Ipv4 grp [dec] traffic will be dropped

Explanation  MASTER HSRP group configs are not supported on an unnumbered interface

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-NOSOCKET: Unable to open socket

Explanation  The system was unable to initialize an IP connection for the Hot Standby protocol.

Recommended Action  Make sure that there is at least one interface configured to run IP.

Error Message  HSRP_ENGINE-3-VIP_ADD_FAILED1: Falied to retain Address on interface [chars] Grp [dec] address [chars] is already assigned to, or overlaps with, an address on interface [chars] address removed.

Explanation  The HSRP virtual IP address cannot be reapplied as as it is already assigned to, or overlaps with, an address on another interface or application.

Recommended Action  Verify that the reported IP address is not present on the device/vdc in the same vrf. If its not present, collect show tech-support netstack detail and show tech-support hsrp.

Error Message  HSRP_ENGINE-3-VIP_ADD_FAILED2: Falied to retain Address on interface [chars] Grp [dec] address [chars] is already assigned to, or overlaps with, an address on another interface or application address removed.

Explanation  The HSRP virtual IP address cannot be reapplied as as it is already assigned to, or overlaps with, an address on another interface or application.

Recommended Action  Verify that the reported IP address is not present on the device/vdc in the same vrf. If its not present, collect show tech-support netstack detail and show tech-support hsrp.

HSRP_ENGINE-4

Error Message  HSRP_ENGINE-4-BADAUTH2: Bad authentication from [chars]

Explanation  Two routers participating in HSRP disagree on the valid authentication string.

Recommended Action  Use the HSRP authentication command to repair the HSRP authentication discrepancy between the local system and the one whose IP address is reported.

Error Message  HSRP_ENGINE-4-BADAUTH: Bad authentication from [chars], group [dec], remote state [chars]

Explanation  Two routers participating in HSRP disagree on the valid authentication string.

Recommended Action  Use the HSRP authentication command to repair the HSRP authentication discrepancy between the local system and the one whose IP address is reported.

Error Message  HSRP_ENGINE-4-BUNDLE_GROUP_NOTEXIST: Group [dec] not found on Intf [chars] for Bundle [dec], Traffic for this group will be lost on this node.

Explanation  If any of the groups for the bundle are missing due to misconfig and the bundle is UP, this results into traffic loss for groups which are not configured.

Recommended Action  User need to configure the missing groups for the bundle on this node

Error Message  HSRP_ENGINE-4-DIFFVIP1: [chars] Grp [dec] active routers virtual IP address [chars] is different to the locally configured address [chars]

Explanation  The HSRP virtual IP address contained in the Hello message from the Active router is different to that configured locally.

Recommended Action  Check the configuration on all HSRP routers.

Error Message  HSRP_ENGINE-4-DUPADDR: Duplicate address [ipaddr] on [chars], sourced by [ipaddr]

Explanation  The IP address in an HSRP message received on the interface is the same as the router's own IP address. This may be because of misconfiugration, or because of a malfunctioning switch

Recommended Action  Check the configurations on all the HSRP routers, and make sure that any switches you have are functioning properly.

Error Message  HSRP_ENGINE-4-DUPVIP1: [chars] Grp [dec] address [chars] is already assigned to a HSRP group on this interface

Explanation  The HSRP virtual IP address contained in the Hello message cannot be learnt as it is already assigned to a different HSRP group.

Recommended Action  Check the configuration on all HSRP routers.

Error Message  HSRP_ENGINE-4-DUPVIP2: [chars] Grp [dec] address [chars] is already assigned on this interface

Explanation  The HSRP virtual IP address contained in the Hello message cannot be learnt as it is already assigned to this interface.

Recommended Action  Check the configuration on all HSRP routers.

Error Message  HSRP_ENGINE-4-DUPVIP3: [chars] Grp [dec] address [chars] is already assigned to, or overlaps with, an address on another interface or application

Explanation  The HSRP virtual IP address contained in the Hello message cannot be learnt as it is already assigned to, or overlaps with, an address on another interface or application.

Recommended Action  Check the configuration on all HSRP routers.

HSRP_ENGINE-5

Error Message  HSRP_ENGINE-5-ACTIVEROUTERPRIORITY: Interface [chars] [chars] Grp [dec] Active router priority changed to [dec]

Explanation  The priority of the Active router for the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-ACTIVE_CHANGE: Interface [chars] [chars] Grp [dec] Active router is [chars]

Explanation  The Active router for the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-AUTOCONFIG_VIPLEARN: Interface [chars] grp [dec] learnt autoconfig virtual ip address [chars]

Explanation  The local router has generate virtual ip address

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-BUNDLE_DOWN_REASON: Cannot bringup bundle <[dec]:[chars]>, Reason: [chars]

Explanation  Display the reason why bundle is down

Recommended Action  Address the reason why the bundle is down

Error Message  HSRP_ENGINE-5-BUNDLE_STATE_CHANGE: Bundle State change from: [chars] To: [chars].

Explanation  Bundle State change

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-GRPSTATECHANGE: Interface [chars] [chars] Grp [dec] state changed from [chars] to [chars] reason [chars]

Explanation  The HSRP router has changed state

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-MACADDRESS_CHANGE: Interface [chars] [chars] Grp [dec] mac-address changed to [chars]

Explanation  The mac address of the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-MASTER_NAME_CHNGD: Master Name conflict for grp [dec], using default

Explanation  Name conflict between two master, later will fallback to default

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-PRIORITY: Interface [chars] [chars] Grp [dec] priority changed to [dec]

Explanation  The current priority of the HSRP group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-STANDBYROUTERPRIORITYCHANGE: Interface [chars] [chars] Grp [dec] Standby router priority changed to [dec]

Explanation  The priority of the Standby router for the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-STANDBY_CHANGE: Interface [chars] [chars] Grp [dec] Standby router is [chars]

Explanation  The Standby router for the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-TIMER: Interface [chars] [chars] Grp [dec] [chars] timer changed to [dec] [chars]

Explanation  The hello/hold timer value for the HSRP group has changed

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-VIPLEARN: Interface [chars] [chars] Grp [dec] learnt virtual ip address [chars]

Explanation  The local router has learnt virtual ip address from the incoming HSRP packet.

Recommended Action  No action is required.

HSRP_ENGINE-6

Error Message  HSRP_ENGINE-6-STATECHANGE2: [chars] [chars] Grp [dec] state moving from [chars]

Explanation  The router has changed state

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-6-STATECHANGE: [chars] [chars] Grp [dec] state move to [chars]

Explanation  The router has changed state

Recommended Action  No action is required.

IMAGE_DNLD Messages

This section contains the IMAGE_DNLD messages.

IMAGE_DNLD-SLOT#-2

Error Message  IMAGE_DNLD-SLOT#-2-ADDON_IMG_DNLD_FAILED: Module image download process failed. [chars]

Explanation  Addon image download to module failed. This module is not operational until an addon image has been successfully installed.

Recommended Action  Verify the location and version of your module image. Use the install module cli command to download a new module image.

Error Message  IMAGE_DNLD-SLOT#-2-IMG_DNLD_COMPLETE: Module image download process. [chars]

Explanation  Image download completed. Module image is being installed.

Recommended Action  No action is required.

Error Message  IMAGE_DNLD-SLOT#-2-IMG_DNLD_FAILED: Module image download process. [chars]

Explanation  Image download failed. Module may be inoperable.

Recommended Action  Use show module cli command to verify the state of this module. Retry image download with install module cli command.

Error Message  IMAGE_DNLD-SLOT#-2-IMG_DNLD_FILE_SYSTEM_CHECK_ERROR: File System check failed: [chars]

Explanation  File system consistency check failed

Recommended Action  File-system repair is needed using fsck

Error Message  IMAGE_DNLD-SLOT#-2-IMG_DNLD_STARTED: Module image download process. [chars]

Explanation  Image download started. Module image downloads are non-disruptive to module operation.

Recommended Action  No action is required.

IMAGE_DNLD-SLOT#-4

Error Message  IMAGE_DNLD-SLOT#-4-IMG_DNLD_FILE_SYSTEM_RECREATION: [chars]. Partition was erased and successfully recreated.

Explanation  File system checking and recreation if necessary for \/images\.

Recommended Action  No action is required.

IMAGE_DNLD-SLOT#-5

Error Message  IMAGE_DNLD-SLOT#-5-ADDON_IMG_DNLD_COMPLETE: Addon module image download process completed. [chars]

Explanation  Addon image download to module has completed.The module should now be installing this new image.

Recommended Action  This message is informational only.

Error Message  IMAGE_DNLD-SLOT#-5-ADDON_IMG_DNLD_STARTED: Addon module image download process started. [chars]

Explanation  Addon image download to module has started. This is a disruptive download and this module will be inoperable until this download process is complete.

Recommended Action  This message is informational only.

Error Message  IMAGE_DNLD-SLOT#-5-ADDON_IMG_DNLD_SUCCESSFUL: Addon module image download and install process successful. [chars]

Explanation  Addon image download and install to module is successful.

Recommended Action  Use the show module cli command to verify the module's operational status.

IM Messages

This section contains the IM messages.

IM-3

Error Message  IM-3-IM_IF_FEATURE_BIND_FAILURE: Interface feature bind failed [chars]

Explanation  Interface feature bind failed, so applications in that feature set may not behave correctly.

Recommended Action  No action is required.

Error Message  IM-3-IM_LC_OFFLINE_ERROR: LC Offline could not be sent to vdc:[dec]

Explanation  LC Offline was not relayed to some vdc, so applications may not behave correctly.

Recommended Action  No action is required.

Error Message  IM-3-IM_RESP_ERROR: Component [chars] opcode:[chars] in vdc:[dec] returned error:[chars]

Explanation  Some component returned an error.

Recommended Action  No action is required.

Error Message  IM-3-IM_SEQ_ERROR: Error ([chars]) while communicating with component [chars] opcode:[chars] (for:[chars])

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  No action is required.

IM-5

Error Message  IM-5-IM_DEMUX_ERROR: [chars]

Explanation  Demux function returned error

Recommended Action  No action is required.

Error Message  IM-5-IM_INTERNAL_ERROR: [chars]

Explanation  Internal error occurred

Recommended Action  No action is required.

Error Message  IM-5-IM_MGMT_INTF_STATE: [chars] [chars]

Explanation  Management interface state changed.

Recommended Action  No action is required.

Error Message  IM-5-IM_UNKNOWN_INTERFACE: [chars]

Explanation  Interface is not supported or not found

Recommended Action  No action is required.

INTERFACE_VLAN Messages

This section contains the INTERFACE_VLAN messages.

INTERFACE_VLAN-4

Error Message  INTERFACE_VLAN-4-SVI_IF_CONFIG_DELETED_NOTIF_DELAYED_DROPPED: Interface VLAN Delete Notification Not Processed on Time by SAP [dec] ([chars])

Explanation  This SAP took long time in processing Interface VLAN delete notification and caused timeout

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-4-SVI_IF_CONFIG_REMOVED_NOTIF_DELAYED_DROPPED: Interface VLAN Remove Notification Not Processed on Time by SAP [dec] ([chars])

Explanation  This SAP took long time in processing Interface VLAN remove notification and caused timeout

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-4-SVI_VLAN_DOES_NOT_EXIST: Vlan [dec] does not exist

Explanation  Vlan not created before assignment

Recommended Action  Interface-vlan

Error Message  INTERFACE_VLAN-4-SVI_WARN_SVI_UP_IN_NON_ROUTABLE_VDC: Interface VLAN [dec] is being kept up in non-routable VDC. Reason: management configuration enabled. Please disable all the routing protocols

Explanation  Keeping Interface VLAN up in non-routable VDC may cause potenital traffic blackhole

Recommended Action  No action is required.

INTERFACE_VLAN-5

Error Message  INTERFACE_VLAN-5-IF_DOWN_ADMIN_DOWN: Interface [chars] is down(Administratively Down)

Explanation  Interface has been configured to be administratively down

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-IF_DOWN_ERROR_DISABLED: Interface [chars] is down. Reason [dec]

Explanation  The interface encountered an error while configuring it

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-IF_DOWN_INACTIVE: Interface [chars] is down (Inactive)

Explanation  Interface VLAN has been suspended or deleted

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_DISABLED: SVI Disabled

Explanation  SVI Service Disabled

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_ENABLED: SVI Enabled

Explanation  SVI Service Enabled

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_GET_MAC_FAILED: Failed to acquire MAC address for SVI 0x[hex]

Explanation  SVI failed to acquire MAC address

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_INIT: SVI intialization failed with error 0x[hex]

Explanation  SVI initialziation error

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_IOD_RELEASE_ERROR_RESPONSE: IM failed to release SVI IOD error 0x[hex]

Explanation  IM failed to release SVI IOD

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_MTS_SEND_FAILURE: MTS send failure for opcode [dec], error 0x[hex]

Explanation  SVI encountered an error in with MTS message

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_MTS_TIME_OUT: MTS send timed out for rrtoken 0x[hex], vlans [chars]

Explanation  SVI did not recieve response for mts message

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_RSRVD_VLAN_FAILED: Failed to get list of reserved vlans 0x[hex]

Explanation  SVI failed to get the list reserved vlans

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_SDB_UPDATE_FAILED: sdb update failed with ret_val [dec]

Explanation  SDB updated failed for SVI

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_SEC_VLAN_FAILED: Failed to get list of secondary vlans 0x[hex]

Explanation  SVI failed to get the list of secondary vlans

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-UPDOWN: Line Protocol on Interface [chars], changed state to [chars]

Explanation  Line protocol status changed for an interface

Recommended Action  No action is required.

IPFIB Messages

This section contains the IPFIB messages.

IPFIB-2

Error Message  IPFIB-2-FIB_HW_ECMP_ADJ_CREATE_FAILURE: ECMP hardware programming failed.

Explanation  Programming of ECMP adjacency in hardware failed. Programming only one next-hop.

Recommended Action  No action is required.

Error Message  IPFIB-2-FIB_HW_ECMP_AUTO_RECOVERY_COMPLETE: ECMP auto recovery completed. [dec] v4 and [dec] v6 routes recovered.

Explanation  ECMP auto recovery process completed.

Recommended Action  No action is required.

Error Message  IPFIB-2-FIB_HW_ECMP_AUTO_RECOVERY_PARTIAL_COMPLETE: ECMP auto recovery partially completed. [dec] v4 and [dec] v6 routes recovered.

Explanation  ECMP auto recovery process completed. Routes were recovered partially

Recommended Action  No action is required.

Error Message  IPFIB-2-FIB_HW_ECMP_AUTO_RECOVERY_START: ECMP auto recovery start.

Explanation  ECMP auto recovery process started.

Recommended Action  No action is required.

Error Message  IPFIB-2-FIB_WEIGHTED_ROUTES_NOT_SUPPORTED: Weighted Routes are not supported in Resilient Mode. Disable using CLI:"no hardware profile ecmp resilient"

Explanation  Weighted Routes are not supported in Resilient Mode.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TAHOE_TCAM_SIZE_BELOW_FULL: Tcam resource is available in IPSG tcam region[[dec]/[dec]].

Explanation  Can add new TCAM entries. tcam resource is available.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TAHOE_TCAM_SIZE_BELOW_THRESHOLD: IPSG tcam region's usage has been below its threshold [dec]% [[dec]/[dec]].

Explanation  Less than 90 percent of entries are used in TCAM IPSG region

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TAHOE_TCAM_SIZE_FULL: No resource available in IPSG tcam region[[dec]/[dec]].IPSG tcam is full.

Explanation  Cannot add new TCAM entries. All entries are used.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TAHOE_TCAM_SIZE_OVER_THRESHOLD: IPSG tcam region's usage has reached its threshold [dec]% [[dec]/[dec]].

Explanation  More than 90 percent of entries are used in TCAM IPSG region

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_BELOW_FULL: Tcam resource is available in IPSG tcam region[[dec]/[dec]] on instance [dec] of Slot [dec].

Explanation  Can add new TCAM entries. tcam resource is available.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_BELOW_THRESHOLD: IPSG tcam region's usage has been below its threshold [dec]% [[dec]/[dec]] on instance [dec] of Slot [dec]

Explanation  Less than 90 percet of entries are used in TCAM IPSG region

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_FULL: No resource available in IPSG tcam region[[dec]/[dec]] on instance [dec] of Slot [dec].IPSG tcam is full.

Explanation  Cannot add new TCAM entries. All entries are used.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_OVER_THRESHOLD: IPSG tcam region's usage has reached its threshold [dec]% [[dec]/[dec]] on instance [dec] of Slot [dec]

Explanation  More than 90 percet of entries are used in TCAM IPSG region

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_ZERO: IPSG tcam region is not configured. Please configure IPSG TCAM region and retry

Explanation  Cannot add TCAM entries. IPSG TCAM region is not configured.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IP_FIRST_HOP_TCAM_SIZE_FULL: No resource available in First Hop tcam region. First Hop for [chars]/[dec] can't be created.

Explanation  Cannot add new TCAM entries. All entries are used.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IP_LAST_HOP_TCAM_SIZE_FULL: No resource available in Last Hop tcam region. Last Hop for group [chars] can't be created.

Explanation  Cannot add new TCAM entries. All entries are used.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-LFIB_MAX_LABEL_STACK_LIMIT_REACHED: Max Label count exceeded, truncating the label stack

Explanation  Max limit for number of labels in the stack exceeded hence pruning extra labels.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_BIDIR_GENERIC_ERROR: Unexpected confition verified. [chars] . Please collect mifib logs

Explanation  Generic bidir error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_BIDIR_NOT_SUPPORTED: BiDir is not yet supported. Ignoring multicast route ([chars]/[dec]).

Explanation  BiDir is not yet supported.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_EGR_NAT_INVALID_INTF: Service Intf [chars] not available, Impacted translation flow: [chars]

Explanation  Service interface is invalid in case of egress NAT

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_EGR_NAT_TCAM_SIZE_FULL: Mcast-NAT TCAM exhausted for egress multicast routes. Please increase mcast-nat TCAM size if possible (allowed-max 2048) or reduce the number of egress NAT rules. [chars]

Explanation  Num of maximum NAT ACL TCAM for egress mcast routes exceeded

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_EGR_NAT_TCAM_SIZE_THRESHOLD: Warning: Mcast-NAT TCAM usage is about to reach the maximum. Adding egress NAT rules further could lead to TCAM exhaustion.

Explanation  Num of maximum NAT ACL TCAM for egress mcast routes is close to exhaustion

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_MAX_BIDIR_GRP_RANGE_REACHED: Num of BiDir group ranges installed [dec] has reached maximum Bidir group range limit. Please correct the Bidir config to be within limit

Explanation  Num of maximum Bidir group ranges supported exceeded

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_MAX_BIDIR_ROUTES_REACHED_EXPAND: Num of BiDir routes installed exceeded max allowed [dec] while expanding ([chars]/[dec]). Please correct the Bidir config to be within limit

Explanation  Num of maximum Bidir routes supported exceeded

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_MAX_BIDIR_ROUTES_REACHED: Num of BiDir routes installed exceeded max allowed [dec] . Please correct the Bidir config to be within limit

Explanation  Num of maximum Bidir routes supported exceeded

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_NAT_REDIRECT_IDX_EXCEEDED: Mcast-NAT redirect indexes for egress NAT rules exhausted. Please limit the total number of unique static-oif interfaces for egress NAT rules to 96

Explanation  Mcast-NAT redirect indexes for egress NAT rules exhausted

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_NAT_TCAM_NOT_CARVED: Mcast-NAT TCAM region has not been carved. Please use 'hardware access-list tcam region mcast-nat ' command to configure NAT TCAM

Explanation  NAT ACL TCAM not carved for ingress and egress mcast NAT routes

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_NAT_TCAM_SIZE_FULL: Mcast-NAT TCAM exhausted for ingress/egress multicast routes. Please increase mcast-nat TCAM size if possible (allowed-max 2048) or reduce the number of NAT rules.

Explanation  Num of maximum NAT ACL TCAM for ingress and egress mcast routes exceeded

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_NON_SSM_TO_SSM_CONV: Converting Routes from Non-SSM to SSM. Please run "clear ip mroute *".

Explanation  Converting Routes from Non-SSM to SSM. Clear all routes

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_SSM_TO_BIDIR_CONV: Converting Routes from SSM to Bidir. Please run "clear ip mroute *".

Explanation  Converting Routes from SSM to Bidir. Clear all routes

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_UNSUPPORTED_BIDIR_GROUP_AS_DROP_RT: Incorrect bidir group range learnt/configured on the system([chars]/[dec]). 224/4 cannot be configured as bidir grp range. Please change your config accordingly for forwarding to work properly

Explanation  Received drop route as bidir group range

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_UNSUPPORTED_BIDIR_GROUP_RANGE: Incorrect bidir group range learnt/configured on the system([chars]/[dec]). The shortest supported mask for bidir group ranges on this platform is /[dec]. Please change your config accordingly for forwarding to work properly

Explanation  Received bidir group range with mask too short

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_UNSUPPORTED_VMCT_IR_MCAST_MIXED_MODE: This platform does not support Ingress Replication and Multicast mixed mode with Virtual-peerlink. Please un-configure either IR or Multicast underlay

Explanation  IR or Multicast underlay traffic to VPCs will not work correctly

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-PROACTIVE_CC_NULL_NH: Received Null CC NH info from U6RIB for route [chars]/[dec]

Explanation  Received Null CC NH info from U6RIB for route

Recommended Action  Collect U6RIB and UFIB Show Tech support

Error Message  IPFIB-SLOT#-2-TAH_MFIB_GET_BD_MCINFO_FAILED: Get interface property failed for Egress nat Service interface [chars]

Explanation  Get bd mcinfo failed for Enat Service interface.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_MCINFO_TILE_DEPTH_EMPTY: MCINFO TILE DEPTH is empty

Explanation  MCINFO TILE DEPTH is empty.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_GRP_CREATE: Multicast IPv4 (*,G) create failed for [chars]

Explanation  Multicast group creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_GRP_UPDATE: Multicast IPv4 (*,G) update failed for [chars]

Explanation  Multicast group update failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_INVALID_ARGUMENT: Multicast IPv4 invalid argument for (*,[chars])

Explanation  Multicast invalid argument

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCAST_DA_TCAM_FULL: Multicast DA TCAM resource exhaustion ([chars])

Explanation  Multicast DA TCAM FULL

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCAST_SA_TCAM_FULL: Multicast SA TCAM resource exhaustion ([chars])

Explanation  Multicast SA TCAM FULL

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCINFO_L2PTR: Multicast IPv4 get mcinfo l2ptr failed for ([chars],[chars])

Explanation  Multicast mcinfo l2ptr error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCINFO_LOC: Multicast IPv4 mcinfo get location failed for ([chars],[chars])

Explanation  Multicast mcinfo get loc error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCINFO_WRITE: Multicast IPv4 mcinfo programming failed for ([chars],[chars])

Explanation  Multicast mcinfo creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_SG_CREATE: Multicast IPv4 (S,G) create failed for ([chars],[chars])

Explanation  Multicast (S,G) creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_SG_PGM: Multicast IPv4 (S,G) programming failed for ([chars],[chars])

Explanation  Multicast (S,G) programming failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_SG_UPDATE: Multicast IPv4 (S,G) update failed for ([chars],[chars])

Explanation  Multicast (S,G) update failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_SRC_CREATE: Multicast IPv4 source create failed for [chars]/[dec]

Explanation  Multicast S/32 creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_TABLE_FULL: Multicast S/32 or G/32 create failed for ([chars],[chars]) due to hash collision

Explanation  Insert failed due to hash collision

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_TCAM_INVALID_INDEX: Multicast IPv4 invalid tcam index for (*,[chars])

Explanation  Multicast invalid tcam index

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_GRP_CREATE: Multicast IPv6 (*,G) create failed for [chars]

Explanation  Multicast group creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_GRP_UPDATE: Multicast IP64 (*,G) update failed for [chars]

Explanation  Multicast group update failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_INVALID_ARGUMENT: Multicast IPv6 invalid argument for (*,[chars])

Explanation  Multicast invalid argument

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_MCINFO_L2PTR: Multicast IPv6 get mcinfo l2ptr failed for ([chars],[chars])

Explanation  Multicast mcinfo l2ptr error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_MCINFO_LOC: Multicast IPv6 mcinfo get location failed for ([chars],[chars])

Explanation  Multicast mcinfo get loc error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_MCINFO_WRITE: Multicast IPv6 mcinfo programming failed for ([chars],[chars])

Explanation  Multicast mcinfo creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_SG_CREATE: Multicast IPv6 (S,G) create failed for ([chars],[chars])

Explanation  Multicast (S,G) creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_SG_PGM: Multicast IPv6 (S,G) programming failed for ([chars],[chars])

Explanation  Multicast (S,G) programming failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_SG_UPDATE: Multicast IPv6 (S,G) update failed for ([chars],[chars])

Explanation  Multicast (S,G) update failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_SRC_CREATE: Multicast IPv6 source create failed for [chars]/[dec]

Explanation  Multicast S/128 creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_TABLE_FULL: Multicast S/128 or G/128 create failed for ([chars],[chars]) due to hash collision

Explanation  Insert failed due to hash collision

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_TCAM_INVALID_INDEX: Multicast IPv6 invalid tcam index for (*,[chars])

Explanation  Multicast invalid tcam index

Recommended Action  No action is required.

IPQOSMGR Messages

This section contains the IPQOSMGR messages.

IPQOSMGR-2

Error Message  IPQOSMGR-2-QOSMGR_DCBXP_PFC_CMP_FAIL_MSG: [chars] - qos config [chars] not compatible with the peer

Explanation  Port_id [chars] has qos config [chars] which is incompatible with the peer.

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_FCOE_POLICY_NOT_REMOVED: Policy [chars] is attached to interfaces. Hence not removed.

Explanation  Policy is not removed as service policy referenced it

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_HA_FAILURE: Failed to do high availability operation: [chars].

Explanation  Failed to do high availability operation. [chars] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_INIT_FAILED: Initialization failed for QoS Manager: [chars], reason: 0x[hex].

Explanation  Initialization failed for QoS Manager due to [chars], reason: [hex].

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_LLFC_APPLY_FAILURE_BUFFER_FULL: Unable to apply flow-control configuraiton on interface: [chars] due to \'[chars]\'. Please manually remove the configuration

Explanation  Failed to apply flow-control configuration on Port_id [chars] due to error [chars]

Recommended Action  Manually delete flow-control configuration on the port to keep the config accurate

Error Message  IPQOSMGR-2-QOSMGR_LLFC_APPLY_FAILURE: Unable to apply flow-control configuraiton on interface: [chars] due to \'[chars]\'.

Explanation  Failed to apply flow-control configuration on Port_id [chars] due to error [chars]

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_MTS_FAILURE: Failed to do MTS operation: [chars].

Explanation  Failed to do MTS operation. [chars] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_MTS_REGISTRATION_FAILED: MTS options setting to [hex] failed for opCode: [dec].

Explanation  MTS options setting to [hex] failed for opCode: [dec].

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_NETWORK_QOS_POLICY_CHANGE: Policy [chars] is now active

Explanation  [chars] is the new active network-qos policy

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_PSS_FAILURE: Failed to do PSS operation: [chars], reason: 0x[hex].

Explanation  Failed to do PSS operation [chars]. [hex] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_PSS_VER_FAIL: PSS file [chars] has version [dec].[dec].[dec], expected version [dec].[dec].[dec].

Explanation  There was a mismatch in the PSS version. [chars] indicates the PSS service, [dec].[dec].[dec] its current version number and [dec].[dec].[dec] the expected version.

Recommended Action  No action is required.

IPQOSMGR-3

Error Message  IPQOSMGR-3-QOSMGR_CONFIG_ERROR: Configuration error: [chars].

Explanation  Configuration error. [chars] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-3-QOSMGR_NVDC_PFF_ERROR: PPF verify/commit failed in vdc [dec] error: 0x[hex] for global qos command

Explanation  For global qos command, PPF verify/commit failed in vdc [dec] with reason [hex].

Recommended Action  No action is required.

Error Message  IPQOSMGR-3-QOSMGR_PPF_ERROR: PPF library error: [chars].

Explanation  PPF library errors. [chars] is the reason.

Recommended Action  No action is required.

IPQOSMGR-4

Error Message  IPQOSMGR-4-QOSMGR_ING_QUEUING_DCBX_WARNING: Input direction queuing config is being allowed for FCoE/DCBX exchange but will not be applied.

Explanation  Input direction Queuing config is unsupported on N9K but config is being allowed for DCBX compatibility with peer.

Recommended Action  No action is required.

Error Message  IPQOSMGR-4-QOSMGR_LC_ERROR_MSG: Linecard [dec] returned an error: [chars]

Explanation  Linecard [dec] returned an error message which is reported as [chars].

Recommended Action  No action is required.

Error Message  IPQOSMGR-4-QOSMGR_POLICIES_PRESENT_ON_DELETED_VLANS: Some VLANs (id: [chars]) which are getting deleted now are still having qos service-policy attached. These policies will be effective only when the VLANs get created again.

Explanation  VLAN(s) [chars] is(are) getting deleted now. This is an informationsl message to notify that qos service-policies are present when the vlan is deleted. If the service-policies are not needed, please detach them from the vlans

Recommended Action  No action is required.

Error Message  IPQOSMGR-4-QOSMGR_PPF_WARNING: PPF library warning: [chars].

Explanation  PPF library warning. [chars] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-4-QOSMGR_WARNING_MSG: [chars] [dec]

Explanation  QOSMGR warning messages is reported as [chars] [dec].

Recommended Action  No action is required.

IPQOSMGR-5

Error Message  IPQOSMGR-5-QOSMGR_FCOE_COS_CHANGE: FCoE CoS value changed from [dec] to [dec]

Explanation  FCoE CoS value changed

Recommended Action  No action is required.

Error Message  IPQOSMGR-5-QOSMGR_LC_STAT_SESSION_ERROR_MSG: Linecard [dec] returned the following error for [chars] session: [chars].

Explanation  Linecard [dec] returned an error message for session of type [chars] which is reported as [chars]. This message may be seen during linecard reload if there is an active session going on.

Recommended Action  No action is required.

IPQOSMGR-6

Error Message  IPQOSMGR-6-QOSMGR_DCBXP_CMP_FAIL_MSG: [chars] - qos config [chars] not compatible with the peer

Explanation  Dcbxp warning: Port_id [chars] has qos config [chars] which is incompatible with the peer.

Recommended Action  No action is required.

Error Message  IPQOSMGR-6-QOSMGR_INFO: QOSMGR Info: [chars].

Explanation  QOSMGR info is reported as [chars].

Recommended Action  No action is required.

Error Message  IPQOSMGR-6-QOSMGR_STATUS: QOSMGR Status: [chars].

Explanation  QOSMGR status is reported as [chars].

Recommended Action  No action is required.

IPSEC Messages

This section contains the IPSEC messages.

IPSEC-2

Error Message  IPSEC-2-IPSEC_INIT: IPSec initialization of [chars] [chars]

Explanation  IPSec initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPSEC-2-IPSEC_SPD_OVERFLOW_DUE_TO_ACL: SPD Overflow on interface due to IP ACL [chars] bound to crypto map [chars] [dec]

Explanation  Modifying IP ACL caused Security Policy Database on the interface to overflow, IP ACL filter not applied to security policy database

Recommended Action  Undo IP ACL change

IPSEC-3

Error Message  IPSEC-3-14_2_MODULE_PACKETS_DROPPED: [chars]: packets were dropped in the module

Explanation  Packets dropped in the 14/2 module. Please collect drop statistics using \show ipsec internal crypto-acc interface gigabit stats\

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPSEC-3-IPSEC_FIPS_TEST_FAILED: IPSEC FIPS compliance test failed

Explanation  IPSEC FIPS compliance test failed

Recommended Action  No action is required.

Error Message  IPSEC-3-IPSEC_MSG_SEND_FAILURE: failed to send [chars] to sap [dec]: [chars]

Explanation  Failed to send a message

Recommended Action  No action is required.

IPSEC-5

Error Message  IPSEC-5-IPSEC_CMS_IF_ACL_UPDATED: IP ACL [chars] updated while Crypto map [chars] [dec] bound to interface(s)

Explanation  IP ACL updated while it is mapped to a crypto map that is bound to interface(s)

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_DISABLED_LIC_EXPIRED: IPSec Disabled due to License Expiry

Explanation  IPSec Disabled due to License Expiry

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_DISABLED: IPSec Disabled

Explanation  IPSec Disabled

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_ENABLED: IPSec Enabled

Explanation  IPSec Enabled

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_SA_CREATED: [chars]: IPSec SA created: local_ip: [chars], peer_ip: [chars], [chars] SPI: [dec] (0x[hex])

Explanation  IPSec SA created

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_SA_DELETED: [chars]: IPSec SA deleted: local_ip: [chars], peer_ip: [chars], [chars] SPI: [dec] (0x[hex]), reason: [chars]

Explanation  IPSec SA deleted

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_SA_REKEYED: [chars]: IPSec SA rekeyed: local_ip: [chars], peer_ip: [chars], [chars] SPI: [dec] (0x[hex])

Explanation  IPSec SA rekeyed

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_TUNNEL_CREATED: [chars]: IPSec tunnel created: local_ip: [chars], peer_ip: [chars], id: [dec], protocol: [chars], traffic:: local: [chars]/[chars], port: [chars], remote: [chars]/[chars], ports: [chars]

Explanation  IPSec tunnel created

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_TUNNEL_DELETED: [chars]: IPSec tunnel deleted: local_ip: [chars], peer_ip: [chars], id: [dec], protocol: [chars], traffic:: local: [chars]/[chars], ports: [chars] remote: [chars]/[chars], ports: [chars]

Explanation  IPSec tunnel deleted

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_TUNNEL_REKEYED: [chars]: IPSec tunnel rekeyed: local_ip: [chars], peer_ip: [chars], id: [dec], protocol: [chars] traffic:: local: [chars]/[chars], ports: [chars] remote: [chars]/[chars], ports: [chars]

Explanation  IPSec tunnel rekeyed

Recommended Action  No action is required.

IPV6 Messages

This section contains the IPV6 messages.

IPV6-2

Error Message  IPV6-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The IP Configuration Manager failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

IPV6-3

Error Message  IPV6-3-FILE_WRITE_FAILED: Writing to file [chars] failed - error: [chars]

Explanation  Writing to a file failed probably due to no space.

Recommended Action  Ipv6

Error Message  IPV6-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

IPV6-4

Error Message  IPV6-4-DAD_FAILED_EVENT: Duplicate address detection failed for [chars] on [chars]

Explanation  Duplicate address detection for IP address failed.

Recommended Action  Ipv6

IPV6-6

Error Message  IPV6-6-CONFIG_EVENT: IP Configuration Msg: [chars]

Explanation  Configuration message that needs to be logged.

Recommended Action  No action is required.

Error Message  IPV6-6-INTERFACE_DELETED: The interface [chars] has been deleted

Explanation  The specified interface has been deleted. The service will delete all the configuration on that interface.

Recommended Action  No action is required.

Error Message  IPV6-6-INTERFACE_EVENT: IP address [chars] [chars] on interface [chars]

Explanation  The IP address [chars] has been successfully [chars] on the interface [chars].

Recommended Action  No action is required.

Error Message  IPV6-6-ROUTE_NOT_ACTIVE: The [chars] is not active

Explanation  The specified route is successfully configured but currently is not active.

Recommended Action  Check that the route is correct and the outgoing interface is operationally up.

Error Message  IPV6-6-STARTING: IP configuration Manager started

Explanation  The IP Configuration Manager service has successfully started.

Recommended Action  No action is required.

IP Messages

This section contains the IP messages.

IP-1

Error Message  IP-1-DHCP_CLIENT_FAILED: dhcp-client failed to get the ip address

Explanation  Dhcp-client failed to get the ip from server, probably due to server lease unavailability or cable disconnectivity .

Recommended Action  Ip

IP-2

Error Message  IP-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The IP Configuration Manager failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

IP-3

Error Message  IP-3-FILE_WRITE_FAILED: Writing to file [chars] failed - error: [chars]

Explanation  Writing to a file failed probably due to no space.

Recommended Action  Ip

Error Message  IP-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

IP-4

Error Message  IP-4-DAD_FAILED_EVENT: Duplicate address detected for [chars] on [chars]

Explanation  Duplicate address detected for IP address.

Recommended Action  Ip

IP-6

Error Message  IP-6-CONFIG_EVENT: IP Configuration Msg: [chars]

Explanation  Configuration message that needs to be logged.

Recommended Action  No action is required.

Error Message  IP-6-DHCP_CLIENT_SUCCESS: dhcp_client got ip address:[chars],netmask:[chars] for mgmt interface,got from server:[chars]

Explanation  Dhcp-client is able to get the ip address from server,

Recommended Action  No action is required.

Error Message  IP-6-INTERFACE_DELETED: The interface [chars] has been deleted

Explanation  The specified interface has been deleted. The service will delete all the configuration on that interface.

Recommended Action  No action is required.

Error Message  IP-6-INTERFACE_EVENT: IP address [chars] [chars] on interface [chars]

Explanation  The IP address [chars] has been successfully [chars] on the interface [chars].

Recommended Action  No action is required.

Error Message  IP-6-ROUTE_NOT_ACTIVE: The [chars] is not active

Explanation  The specified route is successfully configured but currently is not active.

Recommended Action  Check that the route is correct and the outgoing interface is operationally up.

Error Message  IP-6-STARTING: IP configuration Manager started

Explanation  The IP Configuration Manager service has successfully started.

Recommended Action  No action is required.

ISNS Messages

This section contains the ISNS messages.

ISNS-2

Error Message  ISNS-2-ISNS_CFS_OPERATION_FAILED: iSNS CFS [chars] failed

Explanation  ISNS CFS operation failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  ISNS-2-ISNS_INIT: iSNS initialization of [chars] [chars]

Explanation  ISNS initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

KIM Messages

This section contains the KIM messages.

KIM-2

Error Message  KIM-2-CC_RUN_STATUS: [chars]: [chars]

Explanation  A consistency-checker run has finished. The status of the run is provided by this syslog.

Recommended Action  No action is required.

Error Message  KIM-2-KIM_BIND_MOUNT_FAILED: Bind mount of /proc/self/ns/net from pid [dec] for namespace [chars] failed with errno [dec] ([chars])

Explanation  NS bind mount failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_GET_LNX_IFINDEX_FAILED: Failed to get linux ifindex for interface [chars] (ifindex [dec]). err: [dec] errno: [dec] (sock: [dec])

Explanation  Get of linux ifindex failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_GET_RSVD_VLAN_FAILED: Failed to get the reserved vlan range

Explanation  Get of reserved vlan range failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_MOUNT_BIND_FAILED: mount --bind of [chars] failed with errno: [dec] ([chars])

Explanation  Mount bind failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_MOUNT_SHARED_FAILED: mount --make-shared of [chars] failed with errno: [dec] ([chars])

Explanation  Mount shared failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_NS_CREATE_FAILED: Failed to create a new network namespace "[chars]". errno: [dec] ([chars])

Explanation  Namespace creation failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_NS_FILE_NOT_PRESENT: Namespace file [chars] doesn't exist. access returned errno: [dec] ([chars])

Explanation  NS file not present

Recommended Action  No action is required.

Error Message  KIM-2-KIM_NS_OPEN_FAILED: Open of [chars] failed with errno: [dec] ([chars])

Explanation  NS file open failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_UNLINK_NETNS_FAILED: Unlink of namespace file [chars] from pid [dec] failed with errno: [dec] ([chars])

Explanation  NS unlink failed

Recommended Action  No action is required.

L2FMC Messages

This section contains the L2FMC messages.

L2FMC-SLOT#-0

Error Message  L2FMC-SLOT#-0-L2FMC_CLI_INIT_FAILED: CLI library initialization failed!

Explanation  L2FMC failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  L2FMC-SLOT#-0-L2FMC_TIMER_INIT_FAILED: Timer subsystem initialization failed!

Explanation  L2FMC failed to initialize timer library. This is a fatal error.

Recommended Action  No action is required.

L2FMC-SLOT#-2

Error Message  L2FMC-SLOT#-2-L2FMC_MEM_ALLOC: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No action is required.

Error Message  L2FMC-SLOT#-2-L2FMC_VLAN_NOT_FOUND: VLAN [dec] not found in L2FMC database!

Explanation  L2FMC failed to find VLAN [dec] in its database. L2 MAC learning & aging on VLAN [dec] may be affected.

Recommended Action  No action is required.

L2FMC-SLOT#-5

Error Message  L2FMC-SLOT#-5-L2FMC_GLBL_AGE_CONFIG_FAIL: Global age value configuration to [dec] seconds failed!

Explanation  L2FMC failed to configure global default age to [dec] seconds.

Recommended Action  No action is required.

Error Message  L2FMC-SLOT#-5-L2FMC_VLAN_AGE_CONFIG_FAIL: VLAN Age configuration to [dec] seconds failed!

Explanation  L2FMC failed to configure age for VLAN [dec] to [dec] seconds.

Recommended Action  No action is required.

L2FMC-SLOT#-6

Error Message  L2FMC-SLOT#-6-L2FMC_GLBL_AGE_CONFIGURED: Global age value configured to [dec] seconds.

Explanation  L2FMC has successfully configured global default age to [dec] seconds.

Recommended Action  No action is required.

Error Message  L2FMC-SLOT#-6-L2FMC_INITIALIZED: Internal state created [chars]

Explanation  L2FMC has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

Error Message  L2FMC-SLOT#-6-L2FMC_VDC_CREATED: VDC [dec] created

Explanation  Request to create VDC [dec] in L2FMC was successful.

Recommended Action  No action is required.

Error Message  L2FMC-SLOT#-6-L2FMC_VDC_REMOVED: VDC [dec] Removed

Explanation  L2FMC has successfully removed VDC [dec] from its databases.

Recommended Action  No action is required.

Error Message  L2FMC-SLOT#-6-L2FMC_VDC_VLAN_CREATED: VLAN [dec] created

Explanation  L2FMC has added VLAN [dec].

Recommended Action  No action is required.

Error Message  L2FMC-SLOT#-6-L2FMC_VDC_VLAN_REMOVED: VLAN [dec] removed from VDC [dec]

Explanation  L2FMC has successfully removed VLAN [dec] from VDC [dec].

Recommended Action  No action is required.

Error Message  L2FMC-SLOT#-6-L2FMC_VLAN_AGE_CONFIGURED: Age configured for VLAN [dec] to [dec] seconds.

Explanation  L2FMC has successfully configured age for VLAN [dec] to [dec] seconds.

Recommended Action  No action is required.

L2FM Messages

This section contains the L2FM messages.

L2FM-0

Error Message  L2FM-0-L2FM_CLI_INITIALIZATION_FAILED: CLI library initialization failed!

Explanation  Failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  L2FM-0-L2FM_VDC_GWMAC_GET_FAILED: Failed to get gwmac for VDC

Explanation  Failed to get gwmac for VDC.

Recommended Action  No action is required.

Error Message  L2FM-0-L2FM_WRITE_TO_PSS_FAILED_IN_PREVIOUS_INCARNATION: PSS Write Failed in pervious incarnation. Stateful restart not possible

Explanation  PSS Write Failed in pervious incarnation. Stateful restart not possible

Recommended Action  No action is required.

L2FM-1

Error Message  L2FM-1-L2FM_CRDCFG_ERROR: Card config has returned error [hex] for slot [dec]

Explanation  L2fm queried Card config for slot info and it has returned error. The slot may not have been added correctly

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_LINE_FULL_CONDITION_STRING: Error: [hex] Failed to insert MAC due to line full condition [chars]

Explanation  Unable to insert the MAC as hardware lines are full

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_LINE_FULL_CONDITION: Error: [hex] Failed to insert MAC in slot [dec] due to line full condition

Explanation  Unable to insert the MAC as hardware lines are full

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_MAX_NUM_CONFIGURABLE_MACS_EXCEEDED: Error: Configurable MACs exceeded [dec] so cannot program.[chars][chars]

Explanation  Cannot program more than 16 user configured MACs

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_ORIB_SENDS_INCORRECT_IFIDX: Incorrect ifidx received from Orib. Please check mac [chars] vlan [dec]

Explanation  L2fm has received a mac insert/delete from Orib with incorrect ifidx. Please check otv mac entries

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_OWNER_NOT_FOUND: Error : fe owner not found for mac entry [chars] in age notif sent from slot = [dec], fe = [dec]

Explanation  L2fm has received an age notification from the linecard but does not have the mac owner in its database

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_SDB_NOT_FLUSHED: Error : [dec] mac entries have not flushed from l2fm sdb

Explanation  Due to an internal error l2fm has not written mac entries to its sdb

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_SMAC_DUP_FOUND: Duplicate static mac found in secondary vlan. P-VLAN:[dec] S-VLAN:[dec] MAC:[chars]

Explanation  Duplicate static mac found in secondary vlan. P-VLAN:[dec] S-VLAN:[dec] MAC:[chars]

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_WRITE_TO_PSS_FAILED: Failed to write to PSS err [chars]

Explanation  Failed to write to PSS err [chars]

Recommended Action  No action is required.

L2FM-2

Error Message  L2FM-2-CONSISTENCY_CHECK_L2: CC_L2: Consistency Check: [chars]

Explanation  Status of show consistency-checker l2 command

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_AGING_TIME_SET_FAILED: Failed to set age time [dec] for vlan [dec]

Explanation  Failed to set age time [dec] for vlan [dec].

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_CFS_OUT_OF_ORDER: Error: Received Message for STATIC MAC INSERT/DELETE as Out Of Order from vpc peer due to congestion. Please check mac programming for Router macs.Flap interface-vlans if necessary to correct the programming

Explanation  Messages over peer-link could be received out of order due to congestion

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_FAILED_DENY_MAC_ACL: Failed to install deny mac acl for IfIndex:[hex], rv:[hex]

Explanation  Failed to install deny mac acl for IfIndex:[hex], rv:[hex].

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_FAILED_PERMIT_ACL: Failed to install permit acl for IfIndex:[hex], MAC:[chars], rv:[hex]

Explanation  Failed to install permit acl for IfIndex:[hex], MAC:[chars], rv:[hex].

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_FAILED_PERMIT_NS_ACL: Failed to install permit ns acl for IfIndex:[hex], rv:[hex]

Explanation  Failed to install permit ns acl for IfIndex:[hex], rv:[hex].

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_GLBL_AGING_TIME_SET_FAILED: Failed to set global age time [dec]

Explanation  Failed to set global age time [dec]

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_GUARD_VPC_PEER_GW_DEPRECATE: \'mac address-table guard-vpc-peergw-mac\' CLI has been deprecated. Please bringup SVIs on both vPC switches to statically program peer\'s MAC address

Explanation  CLI has been deprecated from 7.0(3)I7(7) and 9.3(4) releases

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_HASH_ENTRY_REMOVAL_FAILED: Hash entry ([hex]) removal failed, vlan [dec], mac [chars], hash index [dec]

Explanation  Hash entry removal failed. Please collect show tech-support l2fm and console logs

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_INVALID_PORT_NUM: Invalid port num [dec], max_ports [dec]

Explanation  Invalid port num. Please check the card config for this card and collect show tech-support l2fm

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_INVALID_SLOT_NUM: Invalid slot num [dec], max_slots [dec]

Explanation  Invalid slot num. Please check the card config for this card and collect show tech-support l2fm

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_CONF_INTFLIM_REACHED: L2 HW table reached its configured capacity - no further new MAC addresses can be installed. Disabling Mac Learn on Interface [chars]

Explanation  L2 HW table reached its conf capacity - no further new MACs addresses can be programmed on [string] - Macs will Flood

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_CONF_SYSLIM_REACHED_DROP: L2 HW table reached its configured capacity - no further MAC addresses can be installed. Disabling Mac Learn on SYSTEM with Drop Action

Explanation  L2 HW table reached its conf capacity - no further MAC addresses can be programmed - Macs will Drop

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_CONF_SYSLIM_REACHED: L2 HW table reached its configured capacity - no further MAC addresses can be installed. Disabling Mac Learn on SYSTEM

Explanation  L2 HW table reached its conf capacity - no further MAC addresses can be programmed - Macs will Flood

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_CONF_VLANLIM_REACHED_DROP: L2 HW table reached its configured capacity - no further MAC addresses can be installed. Disabling Mac Learn on VLAN [dec] with Drop Action

Explanation  L2 HW table reached its conf capacity - no further MAC addresses can be programmed - Macs will Drop

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_CONF_VLANLIM_REACHED: L2 HW table reached its configured capacity - no further MAC addresses can be installed. Disabling Mac Learn on VLAN [dec]

Explanation  L2 HW table reached its conf capacity - no further MAC addresses can be programmed on VLAN [dec] - Macs will Flood

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_FLAP_DISABLE_LEARN_N3K: Loops detected in the network for mac [chars] among ports [chars] and [chars] vlan [dec] - Disabling dynamic learning notifications for a period between 120 and 240 seconds on vlan [dec]

Explanation  System detected loops in the network - administration intervention may be required to avoid this problem in future

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_FLAP_DISABLE_LEARN: Disabling learning in vlan [dec] for [dec]s due to too many mac moves

Explanation  MAC(s) in vlan [dec] have moved too many times. Disabling learning for given number of seconds.

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_FLAP_RE_ENABLE_LEARN_N3K: Re-enabling dynamic learning on vlan [dec]

Explanation  Re enabling learning on all interfaces after disable period expired

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_FLAP_RE_ENABLE_LEARN: Re-enabling learning in vlan [dec]

Explanation  Re-enabling learning in vlan [dec] after hold timer.

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_INSERT_FAILURE_REDUCED: Re-enabling Mac Learn

Explanation  Re-enabling Mac Learn, more space available after hw insert failure

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_INSERT_FAILURE_RE_ENABLE: Re-enabling Mac Learn after [dec] seconds

Explanation  Re-enabling Mac Learn, [dec] seconds after hw insert failure

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_INSERT_FAILURE: L2 HW table insert failure - no further MAC addresses can be installed. Disabling Mac Learn

Explanation  L2 HW table insert failure - no further MAC addresses could be programmed - Disabling Mac Learn until there is sufficient capacity

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_LIMIT_REACHED: L2 HW table reached its capacity - no further MAC addresses can be installed. Disabling Mac Learn

Explanation  L2 HW table reached its capacity - no further MAC addresses could be programmed - Disabling Mac Learn until there is sufficient capacity

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_LIMIT_REDUCED: Re-enabling Mac Learn

Explanation  Re-enabling Mac Learn as there is sufficient L2 HW capacity

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_LIMIT_REACHED: Unicast station table dynamic capacity reached (supported limit [dec])

Explanation  System station table reached its capacity - no further MAC addresses could be programmed - administration intervention may be required to avoid this problem in future

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_MOVE_PORT_DOWN: Loops detected in the network for mac [chars] among ports [chars] and [chars] vlan [dec] - Port [chars] Disabled on loop detection

Explanation  System detected loops in the network - administration intervention may be required to avoid this problem in future

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  L2FM-2-L2FM_MAC_WITHIN_CONF_SYSLIM_ENABLE: L2 HW table is within 90% configured capacity - Re-enabling SYSTEM flooding

Explanation  L2 HW table is within conf capacity - Re-enabling Mac flood

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_WITHIN_CONF_VLANLIM_ENABLE: L2 HW table is within 90% configured capacity - Re-enabling VLAN [dec] flooding

Explanation  L2 HW table is within conf capacity - Re-enabling Mac flood

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MTS_BUILDUP_DEFAULT_PARAMETERS: MTS buildup in L2FM. Resetting mac move policy to default parameters

Explanation  MTS buildup in L2FM. Resetting mac move policy to default parameters

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MTS_BUILDUP: MTS buildup in L2FM

Explanation  MTS buildup in L2FM

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_PEER_ID_INVALID: Invalid peer id, source [chars]

Explanation  Peer id is zero, which is invalid. Please collect show tech-support nve as well

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_PPF_FAILED: L2FM Policy failure: [chars]

Explanation  Policy operation failed in l2fm

Recommended Action  No DDTS.

Error Message  L2FM-2-L2FM_SMAC_INS_FAILED_HW_VMAC: ERROR: Virtual MAC address usage has hit the hardware limit. No new Virtual MAC addresses can be added! Each interface can have only one virtual MAC address

Explanation  Failed to insert virtual mac

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_SMAC_INS_FAILED_VMAC: Virtual MAC address usage has hit the maximum limit of [dec]. No new Virtual MAC addresses can be added! VLAN:[dec] MAC:[chars] Interface:[chars] Slot:[dec]

Explanation  Failed to insert static mac for VLAN:[dec] MAC:[chars] Intf:[chars] Slot:[dec]

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_SMAC_INS_FAILED: Static mac insert failed!VLAN:[dec] MAC:[chars] IfIndex:[hex] Slot:[dec]

Explanation  Failed to insert static mac for VLAN:[dec] MAC:[chars] IfIndex:[hex] Slot:[dec]

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_UPDATE_LOST_HINTS: mac [hex]:[hex]:[hex]:[hex]:[hex]:[hex] updated by slot [dec] fe_index [dec], from [hex] to [hex], with [hex] new hints and loosing [hex] old_hints. stack trace: [chars]

Explanation  An update from MTM looks inconsistent with the previous state

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_VPC_FAST_CONVERGENCE_NOTIFICATION: vpc fast-convergence is not supported in this release

Explanation  Vpc fast-convergence is not supported in this release. It will be supported in future releases.

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_VXLAN_MAC_MOVE_PORT_DOWN: Loops detected in the network for mac [chars] between NVE and [chars] on vlan [dec] - Port [chars] Disabled on loop detection

Explanation  System detected loops in the network - administration intervention may be required to avoid this problem in future

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

L2FM-3

Error Message  L2FM-3-L2FM_DOT1X_MAC_MOVE_DENY_CONFIGURED: Dot1x mac-move changed to deny from allow, please configure the same on peer switch as well(if in VPC topology)

Explanation  Please configure Dot1x mac move deny on peer vpc

Recommended Action  No action is required.

Error Message  L2FM-3-L2FM_GET_VLAN_SEGMENT_ID_FAILED: Error: Get vlan_segment_id failed for vlan [dec], rc [chars], segment_id [dec]

Explanation  Failed to get the vlan_segment_id. Please collect show tech-support vlan as well

Recommended Action  No action is required.

Error Message  L2FM-3-L2FM_NL_NOT_SUPPORT_ON_VXLAN_EXT_SNOOP_VLAN: VxLAN extended snooping VLAN [dec] and IF 0x[hex] MAC learning is not supported

Explanation  VxLAN extended snooping VLAN MAC learning is not supported - IF DAI is not enabled or IPSG is not enabled on interface

Recommended Action  Check for the given vlan DAI is enabled and for interface IPSG is enabled

Error Message  L2FM-3-L2FM_PEER_ID_CREATE_REQUEST_FAILED: Error: Peer id create request failed for [chars], rc [chars], segment_id [dec]

Explanation  Peer id create request failed. Please collect show tech-support nve as well

Recommended Action  No action is required.

Error Message  L2FM-3-L2FM_PEER_ID_DELETE_REQUEST_FAILED: Error: Peer id delete request failed for [chars], rc [chars], segment_id [dec]

Explanation  Peer id delete request failed. Please collect show tech-support nve as well

Recommended Action  No action is required.

Error Message  L2FM-3-L2FM_STATIC_MAC_CONFLICT: Conflict with an existing Static Mac [chars] in vlan [dec] on [chars]

Explanation  Mac [string] in vlan [dec] is configured on interface [string]

Recommended Action  No action is required.

L2FM-4

Error Message  L2FM-4-L2FM_CLI_CLEAR_MAC_WARNING: Clearing the mac address table may black-hole traffic on the l2 segments

Explanation  There is a limitation where there is no mac-lookup after re-write which prevents any l2 flooding of routed traffic when the arp is valid and the mac is not in the bridge table

Recommended Action  No action is required.

Error Message  L2FM-4-L2FM_MAC_LEARN_DISABLE: Global mac learn is disabled

Explanation  Global mac learn disable is being configured

Recommended Action  No action is required.

Error Message  L2FM-4-L2FM_MAC_LEARN_ENABLE: Global mac learn is enabled

Explanation  Global mac learn disable is removed

Recommended Action  No action is required.

Error Message  L2FM-4-L2FM_MAC_MOVE2: Mac [chars] in vlan [dec] has moved from [chars] to [chars]

Explanation  Mac [string] in vlan [dec] has moved between [string] and [string]

Recommended Action  No action is required.

Error Message  L2FM-4-L2FM_MAC_MOVE: Mac [chars] in vlan [dec] has moved from [chars] to [chars]

Explanation  Mac [string] in vlan [dec] has moved from [string] to [string]

Recommended Action  No action is required.

Error Message  L2FM-4-L2FM_MAC_PEER_SYNC_DB_FORCE_FLUSH: Force flush for stale vpc binding! Mac [chars] in vlan [dec] has moved from [chars]

Explanation  Mac [string] in vlan [dec] has moved from [string]

Recommended Action  No action is required.

Error Message  L2FM-4-L2FM_MAC_PEER_SYNC_DB_STALE_RVTEP_ENTRY: Stale RVTEP binding for Mac [chars] in vlan [dec] from [chars]

Explanation  Mac [string] in vlan [dec] was moved from [string]

Recommended Action  No action is required.

L2FM-5

Error Message  L2FM-5-L2FM_EXCESSIVE_DELAY: L2FM - Excessive Delay in handling opcode: [dec](rr:0x[hex]) ssap: [chars] - [dec] ms

Explanation  Excessive Delay in handling opcode

Recommended Action  No action is required.

Error Message  L2FM-5-L2FM_MAC_CONF_REMOVED_INTF: The Mac Limit configuration is removed for Interface [chars]

Explanation  Since the Interface was removed - The Mac Limit configured on the Interface [string] is also removed

Recommended Action  No action is required.

Error Message  L2FM-5-L2FM_MAC_CONF_REMOVED_VLAN: The Mac Limit configuration is removed for VLAN [dec]

Explanation  Since the Vlan was removed - The Mac Limit configured on the VLAN [dec] is also removed

Recommended Action  No action is required.

Error Message  L2FM-5-L2FM_MAX_NUM_MACS_EXCEEDED: Warn: Number of mac entries approaching 75% HW limit. Please run l2 consistency-checker to check inconsistencies

Explanation  Number of mac entries approaching HW limit.

Recommended Action  No action is required.

Error Message  L2FM-5-L2FM_PERMIT_STATIC_MAC_FAIL: Note: Is \'switchport mac-address static-only\' applied on parent interface?

Explanation  Static mac cannot be installed when \'switchport mac-address static-only\' is applied on interface

Recommended Action  No action is required.

Error Message  L2FM-5-L2FM_VLAN_MODE_CHANGE_TO_NON_CONV: Vlan [dec] has been internally changed to non conversational mode on SVI CREATE

Explanation  Change vlan learning mode to non conversational mode on SVI CREATE

Recommended Action  No action is required.

Error Message  L2FM-5-L2FM_VLAN_MODE_REVERTED_BACK: Vlan [dec] has been internally changed to user configured learning mode on SVI DELETE. Mac entries installed non-optimally due to SVI up will get removed from all FEs once ages out

Explanation  Change vlan learning mode to user configured value on SVI DELETE

Recommended Action  No action is required.

L2FM-6

Error Message  L2FM-6-L2FM_DYN_MAC_INS_FAILED: Dynamic mac insertion failure!fail_cnt: [dec] Slot:[dec]

Explanation  Failed to insert dynamic macs fail_cnt:[dec] for Slot:[Slot]

Recommended Action  No action is required.

Error Message  L2FM-6-L2FM_MAC_TABLE_THRESHOLD_NOTIFICATION: Station table reached [dec]% of the total capacity (num entries [dec], total limit [dec])

Explanation  Station table capacity utilization message as per configured threshold values

Recommended Action  No action is required.

Error Message  L2FM-6-L2FM_MTS_SEND_FAILED: Failed to send MTS message errno [hex] opcode [dec]

Explanation  Failed to send MTS message errno [hex] opcode [dec]

Recommended Action  No action is required.

L2MCAST Messages

This section contains the L2MCAST messages.

L2MCAST-SLOT#-0

Error Message  L2MCAST-SLOT#-0-L2MCAST_CLI_INIT_FAILED: CLI library initialization failed!

Explanation  L2MCAST failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-0-L2MCAST_TIMER_INIT_FAILED: Timer subsystem initialization failed!

Explanation  L2MCAST failed to initialize timer library. This is a fatal error.

Recommended Action  No action is required.

L2MCAST-SLOT#-2

Error Message  L2MCAST-SLOT#-2-L2MCAST_MAC_FULL_LC: Failed to insert entry in MAC table for FE [dec] swidx [dec] (0x[hex]) with err ([chars]). To avoid possible multicast traffic loss, disable OMF. Use the configuration CLI: "no ip igmp snooping optimise-multicast-flood"

Explanation  Failed to program the MAC table. MAC table line full for this entry

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-2-L2MCAST_VLAN_NOT_FOUND: VLAN [dec] not found in L2MCAST database!

Explanation  L2MCAST failed to find VLAN [dec] in its database. L2 MAC learning & aging on VLAN [dec] may be affected.

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-2-L2MCAST: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No action is required.

L2MCAST-SLOT#-3

Error Message  L2MCAST-SLOT#-3-L2MCAST_HW_INSTALL_FAIL: Hw install failed for vlan [dec] ([dec], [chars], [chars]) entry!

Explanation  L2MCAST failed to insert bd, g, s entry in hardware. Igmp snooping may not be effective on vlan for that group and source

Recommended Action  No action is required.

L2MCAST-SLOT#-6

Error Message  L2MCAST-SLOT#-6-L2MCAST_INITIALIZED: Internal state created [chars]

Explanation  L2MCAST has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-6-L2MCAST_VDC_CREATED: VDC [dec] created

Explanation  Request to create VDC [dec] in L2MCAST was successful.

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-6-L2MCAST_VDC_REMOVED: VDC [dec] Removed

Explanation  L2MCAST has successfully removed VDC [dec] from its databases.

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-6-L2MCAST_VDC_VLAN_CREATED: VLAN [dec] created

Explanation  L2MCAST has added VLAN [dec].

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-6-L2MCAST_VDC_VLAN_REMOVED: VLAN [dec] removed from VDC [dec]

Explanation  L2MCAST has successfully removed VLAN [dec] from VDC [dec].

Recommended Action  No action is required.

L3VM Messages

This section contains the L3VM messages.

L3VM-2

Error Message  L3VM-2-L3VM_NS_CREATE_FAILED: Failed to create a new network namespace "[chars]". errno: [dec] ([chars])

Explanation  Namespace creation failed

Recommended Action  No action is required.

Error Message  L3VM-2-L3VM_NS_CREATE_GENERIC_ERROR: [chars] "[chars]". errno: [dec] ([chars])

Explanation  Namespace creation generic failure

Recommended Action  No action is required.

Error Message  L3VM-2-L3VM_VRF_LIMIT_REACHED: Maximum VRF count reached. Cannot create VRF [chars]. Please delete some unused VRFs before proceeding.

Explanation  VRF limit failed

Recommended Action  No action is required.

L3VM-5

Error Message  L3VM-5-FP_TPG_CREATE: Fabricpath topology [dec] created

Explanation  FP-Topology created

Recommended Action  No action is required.

Error Message  L3VM-5-FP_TPG_DELETE: Fabricpath topology [dec] deleted

Explanation  FP-Topology deleted

Recommended Action  No action is required.

Error Message  L3VM-5-FP_TPG_INTF_DOWN: Interface [chars] down in fabricpath topology [dec] [chars]

Explanation  Interface in a FP-Topology went down

Recommended Action  No action is required.

Error Message  L3VM-5-FP_TPG_INTF_UP: Interface [chars] up in fabricpath topology [dec]

Explanation  Interface in a FP-Topology is up

Recommended Action  No action is required.

LACP Messages

This section contains the LACP messages.

LACP-3

Error Message  LACP-3-ALLOCFAIL: Failed to allocate memory in [chars][[dec]] for size [dec]

Explanation  LACP is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  LACP-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

Error Message  LACP-3-ISTACKREGISTER: Failed to register istack - [chars]

Explanation  Failed to register istack. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  LACP-3-LACP_INTERNAL_ERROR: LACP internal error: [chars]

Explanation  Internal error is encountered

Recommended Action  No action is required.

Error Message  LACP-3-LACP_SUSPEND_HALF_DUPLEX_PORT: Port [chars] is in half duplex mode. suspend port

Explanation  LACP is not supported in half duplex mode. Suspend port

Recommended Action  No action is required.

Error Message  LACP-3-LACP_SUSPEND_MINLINK: LACP port [chars] of port-channel [chars] is suspended as min-link requirement not met.

Explanation  LACP suspend ports due to min-link

Recommended Action  No action is required.

Error Message  LACP-3-LACP_UPGRADE_READY_FAILED: Upgrade ready failed.

Explanation  Upgrade ready event failed because atleast one port channel member is in intermediate state.

Recommended Action  No action is required.

Error Message  LACP-3-PACKET_TRANSMIT_ERR: [chars]: Could not send LACP packet err=[dec]

Explanation  There was an error in sending LACP packet

Recommended Action  No action is required.

Error Message  LACP-3-SYN_COLL_DIS_EN: [chars] [[chars]]: SYNC, COLLECT and DISTRIBUTE flags enabled too early by partner

Explanation  Potential interop issue. Partner system seems to have enabled sync as well collecting or distributing flags too early even before actor has selected an aggregator

Recommended Action  No action is required.

Error Message  LACP-3-SYSTEM_MAC_ERR: [chars]: Could not get system mac[[chars]]

Explanation  There was an error in acquiring system mac from VDC Mgr

Recommended Action  No action is required.

LACP-5

Error Message  LACP-5-LACP_DISABLED: LACP Disabled

Explanation  LACP Service Disabled

Recommended Action  No action is required.

Error Message  LACP-5-LACP_DOES_NOT_MEET_MINLINK_REQ: LACP port-channel [chars] is brought down as min-link requirement not met.

Explanation  LACP port-channel down as min-link requirement not met

Recommended Action  No action is required.

Error Message  LACP-5-LACP_ENABLED: LACP Enabled

Explanation  LACP Service Enabled

Recommended Action  No action is required.

Error Message  LACP-5-LACP_MEETS_MINLINK_REQ: LACP port-channel [chars] meets min-link requirement. Reint port-channel

Explanation  LACP port-channel meets min-link requirement

Recommended Action  No action is required.

Error Message  LACP-5-LACP_RATE_FAST_NOT_RECOMENDED: 'lacp rate fast' not recomended if 'vpc peer-link' configured.

Explanation  Can cause traffic outage

Recommended Action  No action is required.

Error Message  LACP-5-LACP_REMOTE_NOTIFY_SUCCESS: Remote notify event.

Explanation  Remote notify event was successful.

Recommended Action  No action is required.

Error Message  LACP-5-LACP_REMOTE_PDU_SEND: Pre/Post ISSU hello sent.

Explanation  Remote notify event was successful.

Recommended Action  No action is required.

Error Message  LACP-5-LACP_SUSPEND_INDIVIDUAL: LACP port [chars] of port-channel [chars] not receiving any LACP BPDUs suspending (individual) port

Explanation  LACP suspend individual ports

Recommended Action  No action is required.

Error Message  LACP-5-LACP_SWITCHOVER_NOTIFY: LACP switchover start [dec]

Explanation  LACP switchover notify

Recommended Action  No action is required.

Error Message  LACP-5-LACP_UPGRADE_READY_SUCCESS: Upgrade ready successful.

Explanation  Upgrade ready event is successful as all port channel members are in steady state.

Recommended Action  No action is required.

Error Message  LACP-5-PORT_PRIORITY_CHANGED: [chars]: LACP port priority changed from [dec] to [dec]

Explanation  LACP port priority has been changed

Recommended Action  No action is required.

Error Message  LACP-5-SYSTEM_PRIORITY_CHANGED: LACP system priority changed from 0x[hex] to 0x[hex]

Explanation  LACP system priority has been changed

Recommended Action  No action is required.

LC-SPAN Messages

This section contains the LC-SPAN messages.

LC-SPAN-3

Error Message  LC-SPAN-3-ERROR: [chars]

Explanation  Lc_span_mgr encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LDAP Messages

This section contains the LDAP messages.

LDAP-2

Error Message  LDAP-2-LDAP_PROGRAM_EXIT: LDAP daemon exiting: [chars]

Explanation  LDAP daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LDAP-3

Error Message  LDAP-3-LDAP_ERROR_MESSAGE: [chars]

Explanation  LDAP Error Message

Recommended Action  No action is required.

LDAP-5

Error Message  LDAP-5-LDAP_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Ldap server monitor status change

Recommended Action  No action is required.

Error Message  LDAP-5-LDAP_SERVER_STATUS: [chars] server [chars] with port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Ldap server status change

Recommended Action  No action is required.

LDAP-6

Error Message  LDAP-6-LDAP_MESSAGE: [chars]

Explanation  LDAP Message

Recommended Action  No action is required.

LDP Messages

This section contains the LDP messages.

LDP-5

Error Message  LDP-5-LDP_DISABLED: LDP Disabled

Explanation  MPLS_LDP Service Disabled

Recommended Action  No action is required.

Error Message  LDP-5-LDP_ENABLED: LDP Enabled

Explanation  MPLS_LDP Service nabled

Recommended Action  No action is required.

LICMGR Messages

This section contains the LICMGR messages.

LICMGR-0

Error Message  LICMGR-0-LOG_LIC_GRACE_EXPIRED: Grace period expired for feature [chars].

Explanation  Unlicensed feature [chars] has exceeded it's grace time period. Applications using will be shut down immediately.

Recommended Action  Please install the license file to continue using the feature.

LICMGR-1

Error Message  LICMGR-1-LOG_LIC_LICENSE_EXPIRED: License expired for feature [chars]. Feature will run in honor mode.

Explanation  The named feature has exceeded it's time period. Applications using the license will run in honor mode. after exceeded time period.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-1-LOG_LIC_LICENSE_EXPIRY_WARNING_ALERT: License for feature [chars] will expire in [dec] day(s).

Explanation  Feature [chars] has very limited time for expiry. Feature will expire in [dec] day(s).

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-1-LOG_LIC_NO_LIC_ALERT: No license(s) present for feature [chars]. Application(s) running in grace-period and will be shut down in [dec] days.

Explanation  Feature [chars] has not been licensed. The feature will work for a grace period of [dec] days after which application(s) using the feature will be shut down.

Recommended Action  Please install the license file to continue using the feature.

LICMGR-2

Error Message  LICMGR-2-LOG_LICAPP_EXPIRY_WARNING: Application [chars] subscription license [chars] expiry in [dec] days.

Explanation  Application [chars1] will exceed it's subscription time period in [dec] days and will be shut down after a grace period unless a permanent license for feature [chars2] is installed.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LICAPP_NOPORT_LIC: !!!!!! WARNING: '[chars]' LICENSE NOT FOUND ON THE SYSTEM !!!!!!. You have tried to enable a licensed port without installing the '[chars]' license, which has not been found on the system.

Explanation  Application [chars1] has not been licensed.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LICAPP_NO_LIC: Application [chars] running without [chars] license, shut down in [dec] days.

Explanation  Application [chars1] has not been licensed. The application will work for a grace period of [dec] days after which it will be shut down unless a license file for feature [chars2] is installed.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LIC_EXIT: License manager exiting: [chars]

Explanation  License manager exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-2-LOG_LIC_INVALID_SERVER_LINE: License file [chars] contains invalid "SERVER" line. Contact TAC

Explanation  Invalid SERVER line in license file.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-2-LOG_LIC_MISSING_WARNING: A feature that requires [chars] license is not installed. System supports honor based licensing so feature will continue to be fully functional. Use 'show license usage ' to find features using missing license.

Explanation  Open environment platform requires a license to run NXOS. Please get a license and install it. Features will be running in honor mode.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LIC_NO_LIC: No license(s) present for feature [chars]. Application(s) shut down in [dec] days.

Explanation  Feature [chars] has not been licensed. The feature will work for a grace period of [dec] days after which application(s) using the feature will be shut down.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LIC_NO_OE_LICENSE: Missing license to run NXOS on open environment platform, will be shut down in [dec] days.

Explanation  Open environment platform requires a license to run NXOS. Please get a license and instal it. Features will not be able to function properly, the box will shut down after few days unless licensed.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LIC_NVRAM_DISABLED: Licensing NVRAM is not available. Grace period will be disabled: [chars]

Explanation  The Supervisor NVRAM block may have a hardware problem and may need to be replaced

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-2-LOG_LIC_USAGE_NO_ACK: A Usage report acknowledgement has not been received in the period specified by the policy.

Explanation  Once usage reports are transferred from the product to the CSLU they will be then sent to the CSSM and an ACK returned. The CSLU will send the ACK back to the product instance. If the ACK is not received in the needed amount of time this syslog will be displayed.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LIC_VENDOR_DOWN: License file contains invalid "SERVER" line. Vendor daemon down

Explanation  Vendor daemon is down

Recommended Action  Licensing

LICMGR-3

Error Message  LICMGR-3-LOG_LIC_FILE_MISSING: License file(s) missing for feature [chars].

Explanation  One or more license files for feature [chars] are missing and must be reinstalled.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-3-LOG_LIC_INVALID_HOSTID: Invalid license hostid VDH=[chars] for feature [chars].

Explanation  Feature [chars2] has a license with an invalid license hostid VDH=[chars1]. This can occur if a supervisor card with licensed features for one switch is installed on another switch.

Recommended Action  No action is required.

Error Message  LICMGR-3-LOG_LIC_MESSAGE_ERROR: could not handle message: [chars] of type [dec] from addr [dec]:[dec].

Explanation  Could not handle a IPC message [chars] of type [dec1] sent by a component running on node [dec2] with sap [dec3].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-3-LOG_LIC_SERVER_DOWN: License Server Down [dec]

Explanation  A connection to the license server was lost.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-3-LOG_LIC_SPROM_LIC: Feature [chars] issued [dec] licenses without a valid license file.

Explanation  Feature [chars] has been licensed [dec] times without a valid license file. This means one or more license files are missing for feature [chars] and must be reinstalled.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-3-LOG_LIC_TOO_MANY_LIC: Only [dec] licenses are supported for [chars] feature, where as [dec] licenses are installed.

Explanation  More licenses are installed than allowed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LICMGR-4

Error Message  LICMGR-4-LOG_LIC_LICENSE_EXPIRY_WARNING: License for feature [chars] will expire in [dec] day(s).

Explanation  Feature [chars] will exceed period in [dec] day(s).

Recommended Action  Please install the license file to continue using the feature.

LICMGR-6

Error Message  LICMGR-6-LOG_CHECKPOINT_CREATED: auto checkpoint [chars] created during license expiry.

Explanation  When a license expires, auto checkpoint is created to prevent configuration loss.

Recommended Action  Rollback can be done to the created checkpoint when a new license is installed.

Error Message  LICMGR-6-LOG_LIC_FEATURE_CLEARED: Cleared [dec] license(s) for feature [chars].

Explanation  Uninstalled [dec] license(s) for feature [chars].

Recommended Action  Use the 'show license usage' command to verify this license feature removal.

Error Message  LICMGR-6-LOG_LIC_FEATURE_INSTALLED: Installed [dec] license(s) for feature [chars].

Explanation  Installed [dec] license(s) for feature [chars].

Recommended Action  Use the 'show license usage' command to verify this license feature installation.

Error Message  LICMGR-6-LOG_LIC_LICENSE_CLEARED_ALL: Cleared all licenses.

Explanation  Cleared all license files.

Recommended Action  No action is required.

Error Message  LICMGR-6-LOG_LIC_LICENSE_CLEARED: Cleared license file [chars].

Explanation  Uninstalled the named license file.

Recommended Action  Use the 'show license' command to verify this license removal.

Error Message  LICMGR-6-LOG_LIC_LICENSE_INSTALLED: Installed license file [chars].

Explanation  Installed the named license file.

Recommended Action  Use the 'show license' command to verify this license installation.

M6RIB Messages

This section contains the M6RIB messages.

M6RIB-4

Error Message  M6RIB-4-NBM_TOKEN_ALLOCATION_FAILED: No tokens available for new group [chars]

Explanation  No tokens available for new group [chars]

Recommended Action  No action is required.

MCAST Messages

This section contains the MCAST messages.

MCAST-2

Error Message  MCAST-2-SHUTDOWN: Process shutting down: [chars]

Explanation  Mcast is shutting down

Recommended Action  The action depends on the situation. The multicast process can shut down gracefully because of a system restart (in which case no action needs to take place) or because of a failure. The message associated with the syslog should be self explanatory to understand the reason for the shutdown. If the process is able to restart properly, there is no immediate harm for the system stability and the suggested action is to report the syslog event together with an explanation of the operations most recently performed on the system.

MCAST-4

Error Message  MCAST-4-ERROR: [chars]

Explanation  Mcast encountered a generic error

Recommended Action  No action is required.

MCAST-5

Error Message  MCAST-5-BAD_MSG: Received bad message: [chars]

Explanation  Mcast has received a malformed/unrecognized message

Recommended Action  No action is required.

Error Message  MCAST-5-START: Process has been started

Explanation  Mcast has been started

Recommended Action  No action is required.

MCECTEST Messages

This section contains the MCECTEST messages.

MCECTEST-3

Error Message  MCECTEST-3-ASSERTION_FAILED: [chars]

Explanation  MCECTEST has hit an assert condition at file [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-INIT_FAIL: [chars]

Explanation  MCECTEST Initialization failed. due to [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-INTERNAL_ERR: [chars]

Explanation  MCECTEST encountered an internal error due to [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-MTS_ERR: [chars]

Explanation  MCECTEST encountered an MTS error due to [chars]

Recommended Action  No action is required.

MCECTEST-5

Error Message  MCECTEST-5-MCECTEST_DISABLED: MCECTEST Disabled

Explanation  MCECTEST Service Disabled

Recommended Action  No action is required.

Error Message  MCECTEST-5-MCECTEST_ENABLED: MCECTEST Enabled

Explanation  MCECTEST Service enabled

Recommended Action  No action is required.

MCECTEST-6

Error Message  MCECTEST-6-INTERNAL_INFO: [chars]

Explanation  MCECTEST got an internal info [chars]

Recommended Action  No action is required.

MCM Messages

This section contains the MCM messages.

MCM-2

Error Message  MCM-2-MCM_CRITICAL_ERROR: Internal Critical Error

Explanation  Some critical error

Recommended Action  No action is required.

Error Message  MCM-2-MCM_REPLICATION_DISABLED: Proxy layer-3 modules are not available for replication. Proxy layer-3 multicast replication is disabled.

Explanation  Replication is disabled

Recommended Action  No action is required.

Error Message  MCM-2-MCM_REQ_RESP_ERROR: Error (0x[hex]: [chars]) while communicating with component :[chars], opcode: [chars] (for: [chars])

Explanation  Error in request-response handshake

Recommended Action  No action is required.

Error Message  MCM-2-MCM_ROUTING_DISABLED: Proxy layer-3 modules are not available for routing. Proxy layer-3 forwarding is disabled.

Explanation  Routing is disabled

Recommended Action  No action is required.

MCM-5

Error Message  MCM-5-MCM_SDB_UPDATE_FAILED: sdb update failed with ret_val [dec]

Explanation  SDB updated failed for MCM

Recommended Action  No action is required.

MCM-6

Error Message  MCM-6-MCM_REPLICATION_ENABLED: Proxy layer-3 modules are UP and available for replication. Proxy layer-3 multicast replication is enabled.

Explanation  Replication is enabled

Recommended Action  No action is required.

Error Message  MCM-6-MCM_ROUTING_ENABLED: Proxy layer-3 modules are UP and available for routing. Proxy layer-3 forwarding is enabled.

Explanation  Routing is enabled

Recommended Action  No action is required.

MFDM Messages

This section contains the MFDM messages.

MFDM-2

Error Message  MFDM-2-DI_REUSE: LTL node exists with DI 0x[hex] oiflist_index 0x[hex] type [dec] and same DI returned for oiflist_index 0x[hex] type [dec] Please collect show tech-support forwarding multicast and show tech-support pixm.

Explanation  PIXM returned duplicate DI.

Recommended Action  No action is required.

Error Message  MFDM-2-DOWNLOAD_TIMEOUT: Download of L2/L3 route databases timed out : download_in_progress_slots 0x[hex] for database [chars] [chars] [chars]

Explanation  Download of L2/L3 route databases timed out. Download triggered by VMM insert request.

Recommended Action  No action is required.

Error Message  MFDM-2-INTERNAL_ERROR: MFDM-[chars] Internal error : show system internal mfdm errors for more information

Explanation  MFDM PD hit a internal error. show system internal mfdm errors for futher analysis.

Recommended Action  No action is required.

Error Message  MFDM-2-MAX_OIFS_LIMIT_REACHED: A route or more in your system has more than [dec] oifs that is the max currently supported. This may lead to inconsistencies between MRIB and MFIB since the route will not be updated in HW. Plese reduce the scale

Explanation  Received route with too many OIFs

Recommended Action  No action is required.

Error Message  MFDM-2-MFDM_NVE_DSG_VP_LIMIT_REACHED: All available NVE DSG VPs ([dec]) are used. Failed to allocate VP for group [chars], oif [chars]. Please reduce the VxLAN multicast group scale

Explanation  There are too many OIFs for VXLAN DSG entries

Recommended Action  No action is required.

Error Message  MFDM-2-MFDM_NVE_INIT_FAILED: INIT with NVE is Failed. Need reload

Explanation  MFDM not register with vxlan

Recommended Action  No action is required.

Error Message  MFDM-2-MFDM_PIM_BIDIR_NOT_SUPPORTED: Current release does support PIM BIDIR route ([chars], [chars]) df_ordinal ([dec])

Explanation  Current release does support PIM BIDIR route

Recommended Action  No action is required.

Error Message  MFDM-2-REF_OUTOFSYNC: In Decrement ltl_node ref_count: [dec] is less than count: [dec] passed in for DI: 0x[hex], oiflist_index: 0x[hex], type: [dec]. Possible PI/PD refcount out-of-sync. Please collect show tech-support forwarding multicast and show tech-support pixm.

Explanation  MFDM PI/PD refcount out-of-sync

Recommended Action  No action is required.

MODULE Messages

This section contains the MODULE messages.

MODULE-2

Error Message  MODULE-2-LCM_PRE_UPGRADE_GENERAL_FAIL: Pre upgrade message fails seq [dec]

Explanation  Pre upgrade message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPGRADE_DONE_GENERAL_FAIL: Upgrade done message fails SAP [chars]

Explanation  Upgrade ready message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPGRADE_OVER_FAIL: Upgrade over message returned [dec] 0x[hex] for SAP [chars]

Explanation  Upgrade done message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPGRADE_READY_FAIL: Upgrade ready message returned [dec] 0x[hex] for SAP [chars]

Explanation  Upgrade ready message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPGRADE_READY_GENERAL_FAIL: Upgrade ready message fails SAP [chars]

Explanation  Upgrade ready message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPG_DBG_LOG: Sending upgrade [chars] request to service [chars] for slot [dec].

Explanation  LCM sent upgrade request for the sap mentioned.

Recommended Action  No action is required.

Error Message  MODULE-2-MOD_DIAG_FAIL: Module [dec] (Serial number: [chars]) reported failure [chars] due to [chars] in device [chars] (device error 0x[hex])

Explanation  The module in slot [decimal digit] reported a failure in the runtime diagnostic. Module manager is going to power cycle the module.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_DNLD_FAIL: Image download failed for module [dec] (Serial number: [chars])

Explanation  Module [decimal digit] failed to download a new image from the supervisor.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_FAILURE: Re-initializing module [dec] (Serial number: [chars]) failed. Received lc_failed from sap [chars] failure reason 0x[hex]

Explanation  Module [decimal digit] reported a failure during the initialization phase and will be rebooted.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all module '.

Error Message  MODULE-2-MOD_FAIL: Initialization of module [dec] (Serial number: [chars]) failed

Explanation  Module [decimal digit] reported a failure during the initialization phase and will be powered down.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all module '.

Error Message  MODULE-2-MOD_MAJORSWFAIL: Module [dec] (Serial number: [chars]) reported a critical failure in service [chars]

Explanation  A critical failure in service [string] happened at module [decimal digit] is going to reset the module [decimal digit].

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_MINORSWFAIL: Module [dec] (Serial number: [chars]) reported a failure in service [chars]

Explanation  A non-critical failure in service [string] happened at module [decimal digit] is not going to reset the module [decimal digit].

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_NOT_ALIVE: Module [dec] not responding... resetting (Serial number: [chars])

Explanation  Module [decimal digit] is not replying to the hello message: module manager is then going to reset the module.

Recommended Action  No action is required.

Error Message  MODULE-2-MOD_REGFAILED: Registration failed for module [dec]

Explanation  Module [decimal digit] sent the registration message notifying a failure.

Recommended Action  Collect module internal information by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_SOMEPORTS_FAILED: Module [dec] (Serial number: [chars]) reported failure on ports [chars] ([chars]) due to [chars] in device [chars] (device error 0x[hex])

Explanation  Module [decimal digit] reported a failure in the runtime diagnostic due to failure in some of the ports.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_UNKNOWN: Module type [[dec]] in slot [dec] is not supported

Explanation  The software card id of module [decimal digit] is not supported by the supervisor.

Recommended Action  Collect information about the module by issuing the commands 'show module internal all module [decimal digit]'

Error Message  MODULE-2-XBAR_DIAG_FAIL: Xbar [dec] (Serial number: [chars]) reported failure [chars] due to [chars] in device [chars] (device error 0x[hex])

Explanation  The xbar in slot [decimal digit] reported a failure in the runtime diagnostic. Module manager is going to power cycle the module.

Recommended Action  Collect information about the module by issuing the command 'show module internal all xbar [decimal digit]'.

Error Message  MODULE-2-XBAR_FAILURE: Re-initializing xbar [dec] (Serial number: [chars]) failed. Received lc_failed from sap [chars] failure reason 0x[hex]

Explanation  Xbar [decimal digit] reported a failure during the initialization phase and will be rebooted.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all xbar '.

Error Message  MODULE-2-XBAR_FAIL: Initialization of xbar [dec] (Serial number: [chars]) failed

Explanation  Xbar [decimal digit] reported a failure during the initialization phase and will be powered down.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all xbar '.

Error Message  MODULE-2-XBAR_SOMEPORTS_FAILED: Xbar [dec] (Serial number: [chars]) reported failure on ports [chars] ([chars]) due to [chars] in device [chars] (error 0x[hex])

Explanation  Xbar [decimal digit] reported a failure in the runtime diagnostic due to failure in some of the ports.

Recommended Action  Collect information about the module by issuing the command 'show module internal all xbar [decimal digit]'.

Error Message  MODULE-2-XBAR_UNKNOWN: Xbar type [[dec]] in slot [dec] is not supported

Explanation  The software card id of xbar [decimal digit] is not supported by the supervisor.

Recommended Action  Collect information about the module by issuing the commands 'show module internal all xbar [decimal digit]'

MODULE-3

Error Message  MODULE-3-LCM_SEQ_ERROR: Error ([chars]) for slot:[dec] while communicating with component [chars] opcode:[chars] (for:[dec])

Explanation  LCM encountered an error while executing a sequence for a module.

Recommended Action  No action is required.

Error Message  MODULE-3-LCM_SYSLOG_ERR: [chars]

Explanation  LCM encountered an error while processing a message for module.

Recommended Action  No action is required.

Error Message  MODULE-3-MOD_SRG_NOT_COMPATIBLE: Module [dec] (Serial number: [chars]) firmware is not compatible with supervisor, downloading new image

Explanation  The software version of module [decimal digit] is not supported by the supervisor.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

MODULE-4

Error Message  MODULE-4-MOD_WARNING: Module [dec] (Serial number: [chars]) reported warning [chars] due to [chars] in device [chars] (device error 0x[hex])

Explanation  Module [decimal digit] reported a warning in the runtime diagnostic due to failure in some of the ports.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-4-XBAR_WARNING: Xbar [dec] (Serial number: [chars]) reported warning [chars] due to [chars] in device [chars] (device error 0x[hex])

Explanation  Xbar [decimal digit] reported a warning in the runtime diagnostic due to failure in some of the ports.

Recommended Action  Collect information about the module by issuing the command 'show module internal all xbar [decimal digit]'.

MODULE-5

Error Message  MODULE-5-ACTIVE_SUP_OK: Supervisor [dec] is active (Serial number: [chars])

Explanation  Module [decimal digit] is ready to be configured and be able to switch traffic.

Recommended Action  No action is required.

Error Message  MODULE-5-LCM_MODULE_UPGRADE_END: Upgrade of module [dec] ended

Explanation  Upgrade of the module has ended.

Recommended Action  No action is required.

Error Message  MODULE-5-LCM_MODULE_UPGRADE_START: Upgrade of module [dec] started

Explanation  Upgrade of the module has been started by installer

Recommended Action  No action is required.

Error Message  MODULE-5-MOD_OK: Module [dec] is online (Serial number: [chars])

Explanation  Module [decimal digit] is ready to be configured and be able to switch traffic.

Recommended Action  No action is required.

Error Message  MODULE-5-MOD_REINIT: Re-initializing module [dec] (Serial number: [chars])

Explanation  Module [decimal digit] reported a failure during the initialization phase and will be rebooted.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all module '.

Error Message  MODULE-5-MOD_RESTART: Module [dec] is restarting after image download

Explanation  Module [decimal digit] completed image download and is restarting.

Recommended Action  No action is required.

Error Message  MODULE-5-MOD_STARTUP_CFG_MISMATCH: The startup configuration cannot be applied to a different module type for module [dec] (Serial number: [chars]). [chars] module is replacing [chars].

Explanation  The startup configuration for module [decimal digit] contains information about a different type of module instead of containing information about the current one.

Recommended Action  No action is required.

Error Message  MODULE-5-STANDBY_SUP_OK: Supervisor [dec] is standby

Explanation  Module [decimal digit] is ready to be configured and be able to switch traffic.

Recommended Action  No action is required.

Error Message  MODULE-5-XBAR_OK: Xbar [dec] is online (Serial number: [chars])

Explanation  Xbar [decimal digit] is ready to be configured and be able to switch traffic.

Recommended Action  No action is required.

Error Message  MODULE-5-XBAR_REINIT: Re-initializing xbar [dec] (Serial number: [chars])

Explanation  Xbar [decimal digit] reported a failure during the initialization phase and will be rebooted.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all xbar '.

MODULE-6

Error Message  MODULE-6-MOD_PURGE_CONFIG: Purging the configuration for module [dec]

Explanation  Notification is being sent to remove the module configurations.

Recommended Action  No action is required.

Error Message  MODULE-6-MOD_REG_OK: Registration succeeded for module [dec]

Explanation  Module [decimal digit] sent a successful registration message.

Recommended Action  No action is required.

MRIB Messages

This section contains the MRIB messages.

MRIB-4

Error Message  MRIB-4-NBM_TOKEN_ALLOCATION_FAILED: No tokens available for new group [chars]

Explanation  No tokens available for new group [chars]

Recommended Action  No action is required.

NBM Messages

This section contains the NBM messages.

NBM-0

Error Message  NBM-0-NBM_CLI_INITIALIZATION_FAILED: CLI library initialization failed!

Explanation  Failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

NBM-1

Error Message  NBM-1-NBM_LOG_ERR: NBM error: [chars]

Explanation  NBM Error which needs attention

Recommended Action  No action is required.

Error Message  NBM-1-NBM_WRITE_TO_PSS_FAILED: Failed to write to PSS err [chars]

Explanation  Failed to write to PSS err [chars]

Recommended Action  No action is required.

NBM-2

Error Message  NBM-2-NBM_FLOWS_ACTIVE: Flows are active. Tokens are not recalculated for iod [dec]

Explanation  Tokens recalculation is not allowed when flows are active

Recommended Action  No action is required.

Error Message  NBM-2-NBM_FLOW_ADDITION_FAILED: Flow addition failed with status 0x[hex] for Source [chars] Group [chars] Context [chars] RPF I/f [chars] (index 0x[hex]) LID [dec] at Slot [dec] Unit [dec] Slice [dec]

Explanation  Flow addition failed for this specific NBM flow

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NBM-2-NBM_FLOW_DELETION_FAILED: Flow deletion failed with status 0x[hex] for Source [chars] Group [chars] Context [chars] RPF I/f [chars] (index 0x[hex]) LID [dec] at Slot [dec] Unit [dec] Slice [dec]

Explanation  Flow deletion failed for this specific NBM flow

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NBM-2-NBM_TCAM_NOT_CARVED: NBM TCAM region is not carved. Please carve NBM TCAM region using 'hardware access-list tcam region' CLI.

Explanation  NBM TCAM region carving is needed to stitch the NBM Flows

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NBM-4

Error Message  NBM-4-NBM_FLOW_LIMIT_REACHED: Maximum Flow limit ([dec]) reached. Not able to add flow S: [chars], G: [chars], C: [chars], RPF:[chars] bw [dec] kbps

Explanation  Maximum Flow limit reached. New flow could not be added

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NBM-4-NBM_FLOW_OIF_LIMIT_REACHED: Maximum OIF limit ([dec]) reached for flow with S: [chars], G: [chars], C: [chars]. New OIF could not be added.

Explanation  Maximum OIF limit reached for a flow. New OIF could not be added

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NBM-4-NBM_INTERFACE_SIZE_THRESHOLD: Maximum interface limit ([dec]) reached with [chars]

Explanation  Interface has reached maximum PMN limit

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NBM-4-NBM_LOG_WARN: NBM Warning: [chars]

Explanation  NBM Warning message which needs attention

Recommended Action  No action is required.

Error Message  NBM-4-NBM_NAT_REF_COUNT_MISMATCH: User([chars]) Post S: [chars], Post G: [chars] pre trans nat count([dec]) is not consistent with actual count ([dec]) for oif: [dec]([chars])

Explanation  Contact TAC

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NBM-4-NBM_POLICER_SIZE_THRESHOLD: Maximum policer limit ([dec]) reached for slot [dec], unit [dec] (of 0-[dec]), slice [dec] (of 0-[dec]). To add more flows on this, disable policer for new groups

Explanation  To add more flows on this, disable policer for new groups

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NBM-4-NBM_PROFILE_SIZE_THRESHOLD: Maximum Profile ID limit ([dec]) reached for slot [dec], unit [dec] (of 0-[dec]) slice [dec] (of 0-[dec])

Explanation  To add more flows on this, disable policer for new groups

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NBM-4-NBM_SHM_MEMLEAK_DETECTED: PMN [chars] table memleak detected

Explanation  Contact TAC

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NBM-5

Error Message  NBM-5-NBM_PASSIVE_MODE_UNEXPECTED_FLOW: Unexpected multicast flow in NBM Passive mode. Source: [chars], Group: [chars], Context [chars], Ingress interface [chars]

Explanation  Flows other than NBM static flow shouldn't be installed in NBM passive mode

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NBM-6

Error Message  NBM-6-NBM_MTS_SEND_FAILED: Failed to send MTS message errno [hex] opcode [dec]

Explanation  Failed to send MTS message errno [hex] opcode [dec]

Recommended Action  No action is required.

NFM Messages

This section contains the NFM messages.

NFM-2

Error Message  NFM-2-COMMIT_FAIL: Commit failed: client 0x[hex], [chars]

Explanation  The DDB commit failed

Recommended Action  No action is required.

Error Message  NFM-2-DDB_FAILURE: DDB failure: [chars]

Explanation  A DDB generated failure

Recommended Action  No action is required.

Error Message  NFM-2-EXITING: Exit reason: [chars]

Explanation  The NFM service process has exited due to [char]. The process has probably been restarted automatically.

Recommended Action  No action is required.

Error Message  NFM-2-INIT_FAIL: NFM Service Init failed: [chars] error [hex]

Explanation  NFM Service initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  NFM-2-MALLOC_ERROR: Function [chars]: Size [dec] bytes

Explanation  The NFM service could not allocate memory.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFM-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The NFM service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

Error Message  NFM-2-VERIFY_FAIL: Verify failed - Client 0x[hex], Reason: [chars], Interface: [chars]

Explanation  The DDB Verify failed

Recommended Action  No action is required.

NFM-3

Error Message  NFM-3-DDB_ERROR: DDB error: [chars]

Explanation  The DDB generated error

Recommended Action  No action is required.

Error Message  NFM-3-FEATURE_MANAGER_ERROR: [chars]: An error occurred processing a Feature Manager msg - error [chars]

Explanation  An error occurred while processing a message from FEATURE Manager

Recommended Action  No action is required.

Error Message  NFM-3-HANDLE_IN_USE: [chars]: name: [chars]

Explanation  The NFM service encountered a handle that was in use while reading a persistent storage database.

Recommended Action  No action is required.

Error Message  NFM-3-INVALID_HANDLE: [chars]: handle =0x[hex]

Explanation  The NFM service encountered an invalid handle in a persistent storage database.

Recommended Action  No action is required.

Error Message  NFM-3-MONITOR_NOT_FOUND: Monitor with handle 0x[hex] from source 0x[hex]

Explanation  An Export Msg from a Linecard contained an invalid Monitor handle

Recommended Action  No action is required.

Error Message  NFM-3-MTS_ERROR: NFM encountered the following MTS error: [chars]

Explanation  NFM Service encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  NFM-3-NFM_CONFIG_ERROR: [chars]

Explanation  L2 Netflow config is applied on Port-channel with F1 Line Cards only - error

Recommended Action  No action is required.

Error Message  NFM-3-NFM_DDB_ERROR: DDB error: [chars]

Explanation  The DDB generated error

Recommended Action  No action is required.

Error Message  NFM-3-PSS_CORRUPTED: [chars] PSS found corrupted

Explanation  The NFM service has detected corruption in one of its persistent information database. The database would be recreated.

Recommended Action  No action is required.

Error Message  NFM-3-RTP_FLOW_ERROR_DETECTED: Flow SIP: [chars] DIP: [chars] Interface: [chars] Vrf: [chars] loss detected

Explanation  Loss detected in RTP flow

Recommended Action  No action is required.

Error Message  NFM-3-RTP_FLOW_ERROR_STOP: Flow SIP: [chars] DIP: [chars] Interface: [chars] Vrf: [chars] loss no longer detected

Explanation  Loss no longer detected in RTP flow

Recommended Action  No action is required.

Error Message  NFM-3-VLAN_PARSE_ERROR: [chars]: An error occurred processing a VLAN Mgr Parse msg 0x[hex]

Explanation  An error occurred while processing a message from VLAN Manager

Recommended Action  No action is required.

NFM-4

Error Message  NFM-4-DDB_WARNING: DDB warning: [chars]

Explanation  The DDB generated warning

Recommended Action  No action is required.

Error Message  NFM-4-LICENSE_EXPIRED: The License has expired.

Explanation  The NFM service requires a License to run and exits when the License expires.

Recommended Action  No action is required.

Error Message  NFM-4-NFM_DDB_WARNING: DDB warning: [chars]

Explanation  The DDB generated warning

Recommended Action  No action is required.

Error Message  NFM-4-PSS_VERSION_MISMATCH: PSS [dec] Code [dec]

Explanation  There was a version mismatch between the NFM service and one of its persistent storage databases. The persistent information has been translated to the new format.

Recommended Action  No action is required.

NFM-5

Error Message  NFM-5-FEATURE_DISABLED: Feature '[chars]' is Disabled.

Explanation  NetFlow/Analytics Feature is Disabled.

Recommended Action  No action is required.

Error Message  NFM-5-FEATURE_ENABLED: Feature '[chars]' is Enabled.

Explanation  NetFlow/Analytics Feature is Enabled.

Recommended Action  No action is required.

NFM-6

Error Message  NFM-6-BECAME_ACTIVE: Became ACTIVE from standby mode

Explanation  The NFM service on the standby supervisor became active and it is ready to serve client requests.

Recommended Action  No action is required.

Error Message  NFM-6-BECAME_STDBY: Became STANDBY from active mode

Explanation  The NFM service became standby from active mode.

Recommended Action  No action is required.

Error Message  NFM-6-DDB_NOTIF: DDB notification: [chars]

Explanation  The DDB generated notification

Recommended Action  No action is required.

Error Message  NFM-6-FAILED_TO_SEND_HEARTBEAT: Failed to send heartbeat to system manager: Reason=[chars]

Explanation  The NFM service was unable to send heartbeat to the system manger

Recommended Action  No action is required.

Error Message  NFM-6-NFM_DDB_NOTIF: DDB notification: [chars]

Explanation  The DDB generated notification

Recommended Action  No action is required.

Error Message  NFM-6-SERVICE_UP: Initialized [chars]

Explanation  The NFM service is up and ready The service was initialized in [char] mode.

Recommended Action  No action is required.

Error Message  NFM-6-SRV_EXIT: NFM Service shutting down gracefully

Explanation  NFM Service is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  NFM-6-SWITCH_OVER: Switching Over to other Sup.

Explanation  The NFM service has successfully switched over to the standby supervisor card.

Recommended Action  No action is required.

NFM-7

Error Message  NFM-7-DEBUG: [chars]

Explanation  Debug information is being sent to syslog

Recommended Action  No action is required.

NFP Messages

This section contains the NFP messages.

NFP-SLOT#-2

Error Message  NFP-SLOT#-2-FTEC_DDB_ERR: [chars]([dec]): fte ddb error.[chars] [hex]

Explanation  Fte ddb error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-FTEC_ERR: [chars]([dec]): fte error.[chars] [hex]

Explanation  Fte error occured

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_ACL_ERR: [chars]([dec]): acl error. [chars]

Explanation  Acl error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_DDB_ERR: [chars]([dec]): ddb error.[chars] [hex]

Explanation  Ddb error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_ERR: [chars]([dec]): nfp error. [chars]

Explanation  Nfp error occured

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_FIB_ERR: [chars]([dec]): fib error. [chars]

Explanation  Fib error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_NDE_ERR: [chars]([dec]): nde error. [chars]

Explanation  Nde error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_NFM_ERR: [chars]([dec]): nfm error. [chars]

Explanation  Nfm error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_QOS_ERR: [chars]([dec]): qos error. [chars]

Explanation  Qos error

Recommended Action  No DDTS.

NFP-SLOT#-5

Error Message  NFP-SLOT#-5-NF_INFO: [chars]

Explanation  Info

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NTP Messages

This section contains the NTP messages.

NTP-2

Error Message  NTP-2-NTP_SYSLOG_CRIT_ERR: : [chars]

Explanation  NTP syslog Critial Error : [chars].

Recommended Action  No action is required.

Error Message  NTP-2-NTP_SYSLOG_INIT_FAIL: : [chars] [chars]

Explanation  NTP Initialization Failed: [chars] [chars].

Recommended Action  No action is required.

Error Message  NTP-2-NTP_SYSLOG_NO_RESP_FROM_LC: from LC[dec] for [chars]

Explanation  NTP did not receive response from the linecard for the request sent.

Recommended Action  No action is required.

NTP-3

Error Message  NTP-3-NTP_SYSLOG_ALLOC_FAIL: : [chars]

Explanation  NTP syslog allocation failed : [chars].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_ERR_EXT: : [chars] [chars]

Explanation  NTP syslog Error Exit : [chars] [dec].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_ERR: : [chars]

Explanation  NTP syslog Error : [chars].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_MTS_ERR: : [chars]

Explanation  NTP MTS Error : [chars].

Recommended Action  No action is required.

NTP-6

Error Message  NTP-6-NTP_SYSLOG_CREATED: : [chars]; Slot No: [dec]

Explanation  NTP syslog created : [chars] [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_EXIT: : [chars]

Explanation  NTP syslog Exit : [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_LOGGING: : [chars]

Explanation  NTP logging : [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_WARN: : [chars]

Explanation  NTP syslog Warning : [chars].

Recommended Action  No action is required.

NTP-7

Error Message  NTP-7-NTP_SYSLOG_DEBUG: : [chars]

Explanation  NTP debug : [chars].

Recommended Action  No action is required.

OTM Messages

This section contains the OTM messages.

OTM-2

Error Message  OTM-2-OTM_EEM_FAIL: OTM failed to register with EEM

Explanation  OTM process failed to register with eem, exiting now

Recommended Action  No action is required.

OTM-3

Error Message  OTM-3-OTM_ERROR: [chars] [chars]

Explanation  [chars1][chars2]

Recommended Action  No action is required.

OTM-5

Error Message  OTM-5-OTM_OBJECT_STATUS: Status of tracking object [dec] changed to [chars]

Explanation  Status of tracking object [dec] changed to [chars]

Recommended Action  No action is required.

Error Message  OTM-5-OTM_OBJ_ADD: : Tracking object [dec] configured, status of the object [chars]

Explanation  Tracking Object [dec] configured, status of the object [chars]

Recommended Action  No action is required.

OTM-6

Error Message  OTM-6-OTM_EXITED: OTM process exited

Explanation  OTM process is terminated

Recommended Action  No action is required.

Error Message  OTM-6-OTM_OBJ_REM: : Tracking object [dec] removed

Explanation  Tracking Object [dec] removed

Recommended Action  No action is required.

Error Message  OTM-6-OTM_STARTED: OTM process started

Explanation  OTM process is up and running

Recommended Action  No action is required.

Error Message  OTM-6-OTM_TRACK_START: Client started tracking object [dec]

Explanation  Client has started tracking object [dec]

Recommended Action  No action is required.

Error Message  OTM-6-OTM_TRACK_STOP: Client stopped tracking object [dec]

Explanation  Client has stopped tracking object [dec]

Recommended Action  No action is required.

PIM6 Messages

This section contains the PIM6 messages.

PIM6-4

Error Message  PIM6-4-NBM_TOKEN_ALLOCATION_FAILED: No tokens available for new group [chars]

Explanation  No tokens available for new group [chars]

Recommended Action  No action is required.

PIM Messages

This section contains the PIM messages.

PIM-4

Error Message  PIM-4-NBM_TOKEN_ALLOCATION_FAILED: No tokens available for new group [chars]

Explanation  No tokens available for new group [chars]

Recommended Action  No action is required.

PIXM Messages

This section contains the PIXM messages.

PIXM-2

Error Message  PIXM-2-PIXM_SYSLOG_MESSAGE_TYPE_CRIT: [chars]

Explanation  PIXM has encountered a critical error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-3

Error Message  PIXM-3-PIXM_SYSLOG_MESSAGE_TYPE_ERR: [chars]

Explanation  PIXM has encountered a error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-4

Error Message  PIXM-4-PIXM_SYSLOG_MESSAGE_TYPE_WARNING: [chars]

Explanation  PIXM has encountered a warning-level error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-7

Error Message  PIXM-7-PIXM_SYSLOG_MESSAGE_TYPE_DEBUG: [chars]

Explanation  This is a debug output from PIXM

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PLATFORM Messages

This section contains the PLATFORM messages.

PLATFORM-0

Error Message  PLATFORM-0-CHASSIS_CLKSWITCH: Hardware clock switched to redundant clock-[dec]

Explanation  Clock module on chassis deteted a failure and switched to redundant clock module.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-0-CHASSIS_CLKSWRESET: Switch reset due to clock switch

Explanation  Chassis clock source has failed and system will be reset. System will automatically start using redundant clock module.

Recommended Action  Please refer to the platform document on clock modules.

Error Message  PLATFORM-0-CHASSIS_CLKSW_MODULE_RESET: Modules reset due to clock switch

Explanation  Chassis clock source has switched and all Vegas line cards will be reset. System will automatically continue using redundant clock module.

Recommended Action  Please refer to the platform document on clock modules.

Error Message  PLATFORM-0-FAIL_REMOVED: Fan module removed. Fan[dec] has been absent for [dec] seconds

Explanation  Fan module is removed. This could lead to temperature alarms.

Recommended Action  Replace the fan module ASAP.

Error Message  PLATFORM-0-MOD_TEMPWARMALRM: [chars] reported Warm temperature alarm. Sensor=[dec] Temperature=[dec] WarmThreshold=[dec]

Explanation  Module in slot [decimal digit] exceeded warm temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-0-PFM_EMERGENCY: [chars]

Explanation  Platform Emergency

Recommended Action  No action is required.

Error Message  PLATFORM-0-SUP_SPROM_ERROR: Unable to read SPROM for Sup in slot [dec]

Explanation  The supervisor in slot [decimal digit] was not able to read its SPROM.

Recommended Action  No action is required.

Error Message  PLATFORM-0-SUP_WRONGSLOTNUM: Supervisor powered up in WRONG SLOT:[dec] (Serial number [chars])

Explanation  The supervisor is comming up in wrong slot [decimal digit].

Recommended Action  No action is required.

Error Message  PLATFORM-0-SYS_LC_DRIVER_LOAD_FAILED: Failed to load linecard module drivers

Explanation  Failed to load drivers.

Recommended Action  Image is possibly corrupt. Try to load a different image.

Error Message  PLATFORM-0-SYS_NO_SHUTDOWN_FAN_DIR_MISMATCH: PS/Fan-Tray Fan dir mismatch is detected - System auto shutdown is disabled. Rectify mismatch to avoid system malfunction.

Explanation  Mismatch in direction between fan and ps module. System will not shutdown

Recommended Action  Please perform a 'show env fan' to collect more information.

Error Message  PLATFORM-0-SYS_RESET: [chars] System shutdown in [dec] seconds

Explanation  System shutdown in [decimal digit] seconds.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-0-SYS_SHUTDOWN_FAN_DIR_MISMATCH: PS/Fan-Tray Fan dir mismatch is detected - System will shutdown in [dec] minutes if mismatch is not rectified

Explanation  System shutdown in [decimal digit] seconds due to mismatch in direction between fan and ps module.

Recommended Action  Please perform a 'show env fan' to collect more information.

Error Message  PLATFORM-0-SYS_SHUTDOWN_FAN_REMOVAL: System shutdown in [dec] seconds due to fan removal

Explanation  System shutdown in [decimal digit] seconds due to removal of fan module.

Recommended Action  Please perform a 'show env fan' to collect more information.

Error Message  PLATFORM-0-SYS_SHUTDOWN_MDS9124_FAN_FAIL: System shutdown in [dec] seconds due to less than 4 fans operating.

Explanation  System shutdown in [decimal digit] seconds due to less than 4 fans operating.

Recommended Action  Please perform a 'show env fan' to collect more information.

Error Message  PLATFORM-0-SYS_SHUTDOWN: System shutdown in [dec] seconds due to major temperature alarm

Explanation  System shutdown in [decimal digit] seconds due to temperature exceeding major threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-0-SYS_SUP_DRIVER_LOAD_FAILED: Failed to load supervisor module drivers

Explanation  Failed to load drivers.

Recommended Action  Image is possibly corrupt. Try to load a different image

Error Message  PLATFORM-0-XBAR_CARD_CLK_FAIL: Xbar card in slot:[dec] (Serial number [chars]) encountered clock failure

Explanation  The xbar in slot [decimal digit] encountered clock failure.

Recommended Action  No action is required.

Error Message  PLATFORM-0-XBAR_CARD_INCOMPAT_CHASSIS: Xbar card in slot:[dec] (Part number [chars]) Incompatible with backplane chassis Part Num:[chars]

Explanation  The xbar in slot [decimal digit] is incompatible with backplane chassis.

Recommended Action  No action is required.

Error Message  PLATFORM-0-XBAR_WRONGSLOTNUM: Xbar powered up in WRONG SLOT:[dec] (Serial number [chars])

Explanation  The xbar in slot [decimal digit] powered up in wrong slot.

Recommended Action  No action is required.

PLATFORM-1

Error Message  PLATFORM-1-FABRIC_SWITCH_FAN_FAIL: Less than 4 required fans operating.

Explanation  Fan module has failed leaving less than 4 total fans operating. Fan needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-FAN_FAIL: Fan module Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-PFM_ALERT: [chars]

Explanation  Platform Alert

Recommended Action  No action is required.

Error Message  PLATFORM-1-PS_SINGLE_INPUT: Both power inputs are connected for Power supplies, remove single-input configuration for optimal power usage

Explanation  Current power supply redundancy mode may not be optimal

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-XBAR_PWRDENY: Xbar [dec] can not be powered up due to insufficient power (Serial number [chars])

Explanation  Available power in power supplies is not sufficient to power up the xbar

Recommended Action  You can verify available power and current usage using command 'show env power'. Please refer to power supply document on how to increase power supply capacity.

PLATFORM-2

Error Message  PLATFORM-2-9134_FAN_FAIL: Fan module [dec] Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-9134_FAN_OK: Fan module [dec] ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-ACTIVE_SUP_LESS_MEMORY: Active Sup and Standby Sup are different model. Replace Sup in slot [dec] with same memory config for continued redundancy post switchover

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

Error Message  PLATFORM-2-BJ_CHANGE: Detected backup ioslice change to module [dec] instance [dec]

Explanation  Backup ioslice changed.

Recommended Action  No action is required.

Error Message  PLATFORM-2-BOOTFLASH_LIFETIME_MAJOR: Bootflash lifetime usage crossed 95%. Collect 'show hardware internal bootflash log' and consult with product support team.

Explanation  Bootflash lifetime usage crossed 95%. Collect 'show hardware internal bootflash log' and consult with product support team.

Recommended Action  Collect show system internal bootflash log and consult with product support team

Error Message  PLATFORM-2-CASA_FAN_FAIL: Fan module [dec] Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-CASA_FAN_OK: Fan module [dec] ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-CHASSIS_CLKMODFAULTY: Chassis clock module [dec] faulty

Explanation  Clock module on chassis is faulty or has been removed.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-CHASSIS_CLKMODOK: Chassis clock module [dec] ok

Explanation  Clock module on chassis is functioning properly.

Recommended Action  No action is required.

Error Message  PLATFORM-2-CHASSIS_CLKSRC: Current chassis clock source is clock-[dec]

Explanation  The current chassis clock source is [decimal digit].

Recommended Action  No action is required.

Error Message  PLATFORM-2-DJBJ_DISTRIBUTE: Distribute Mode

Explanation  Ioslice distribute mode.

Recommended Action  No action is required.

Error Message  PLATFORM-2-DJ_CHANGE: Detected designated ioslice change to module [dec] instance [dec]

Explanation  Designated ioslice changed.

Recommended Action  No action is required.

Error Message  PLATFORM-2-FANLET_FAN_FAIL: Failed Fanlets for Fan [dec] ([chars] fan) : [chars]

Explanation  The specified fanlets have failed. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-FANMOD_FAN_FAIL: Fan module [dec] ([chars] fan) Failed/Removed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-FANMOD_FAN_OK: Fan module [dec] ([chars] fan) ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FAN_OK: Fan module ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FAN_REMOVED: Fan module [dec] (Serial number [chars]) [chars] removed

Explanation  Fan module is removed

Recommended Action  No action is required.

Error Message  PLATFORM-2-INSUFFICIENT_MAC: Ran out of Mac address to program management port on all the non-default VDCs

Explanation  Could not program the mac address for the management port of all the VDCs

Recommended Action  No action is required.

Error Message  PLATFORM-2-INVALID_SUPERVISOR_MODULE_COMBINATION: This combination of supervisor and fabric/linecard modules is not supported. Please update your chassis with a supported hardware configuration.

Explanation  This combination of supervisor and linecard modules is not supported. Please update your chassis with a supported hardware configuration.

Recommended Action  Check your hardware configuration and install supported modules

Error Message  PLATFORM-2-MEMORY_ALERT_RECOVERED: Memory Status Alert : [chars]

Explanation  Memory alert event received

Recommended Action  None

Error Message  PLATFORM-2-MEMORY_ALERT: Memory Status Alert : [chars]. Usage [chars]% of Available Memory

Explanation  Memory alert event received

Recommended Action  None

Error Message  PLATFORM-2-MODULE_EJECTOR_POLICY_DISABLED: Ejector based shutdown disabled for Module [dec] [chars]. Please close all the ejectors to enable ejector based shutdown

Explanation  Ejector based shutdown has been disabled

Recommended Action  Close all the ejectors to enable ejector based shutdown

Error Message  PLATFORM-2-MODULE_EJECTOR_POLICY_ENABLED: All Ejectors closed for module [dec]. Ejector based shutdown enabled

Explanation  Ejector based shutdown has been enabled

Recommended Action  None

Error Message  PLATFORM-2-MOD_ALL_PARTIAL_LC_PWRDN_FABRIC_MODE: Partially connected line-card modules powered down due to configured fabric mode

Explanation  Partially line-card modules in switch are powered down because of configured fabric mode

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' , 'show system fabric-mode' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one partially connected fabric module has to be online for partially connected line-card modules to function

Error Message  PLATFORM-2-MOD_ALL_PARTIAL_LC_PWRDN_NOFM: Partially connected line-card modules powered down due to no connectivity with existing fabric modules

Explanation  Partially line-card modules in switch are powered down because of no connectivity to exisiting fabric modules

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one partially connected fabric module has to be online for partially connected line-card modules to function

Error Message  PLATFORM-2-MOD_ALL_PWRDN_NOFM: All line-card modules powered down due to non-availability of fabric modules

Explanation  All line-card modules in switch are powered down because all fabric modules are offline

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one fabric module has to be online for line-card modules to function

Error Message  PLATFORM-2-MOD_ALL_PWRDN_NOSC: All fabric, line-card modules powered down due to non-availability of system controller modules

Explanation  All fabric, line-card modules in switch are powered down because all system controller modules are offline

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one system-controller module has to be online for fabric, line-card modules to function

Error Message  PLATFORM-2-MOD_ALL_PWRDN_NOXBAR: All modules powered down due to non-availability of xbar modules

Explanation  All modules in switch are powered down because all xbar modules are offline

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one xbar module has to be for modules to function

Error Message  PLATFORM-2-MOD_DETECT: Module [dec] detected (Serial number [chars]) Module-Type [chars] Model [chars]

Explanation  A new module in slot [decimal digit] is detected.

Recommended Action  No action is required.

Error Message  PLATFORM-2-MOD_INSERTED: Module [dec] inserted ([chars]), [dec] VNICs mapped

Explanation  A new module in slot [decimal digit] is virtually inserted.

Recommended Action  No action is required.

Error Message  PLATFORM-2-MOD_INSERTION_FAILED: Failed to insert module [dec] ([chars] - [chars])

Explanation  Failed to virtually insert a new module in slot [decimal digit].

Recommended Action  The exact reason for the failure should be in the syslog output.

Error Message  PLATFORM-2-MOD_PRESENT: Detected the presence of Module [dec]

Explanation  A new module in slot [decimal digit] is inserted.

Recommended Action  No action is required.

Error Message  PLATFORM-2-MOD_PWRDENY: Module [dec] can not be powered up due to insufficient power (Serial number [chars])

Explanation  Available power in power supplies is not sufficient to power up the module

Recommended Action  You can verify available power and current usage using command 'show env power'. Please refer to power supply document on how to increase power supply capacity.

Error Message  PLATFORM-2-MOD_PWRDN: Module [dec] powered down (Serial number [chars])

Explanation  The module in slot [decimal digit] is powered down.

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors.

Error Message  PLATFORM-2-MOD_PWRFAIL_EJECTORS_OPEN: All ejectors open, Module [dec] will not be powered up (Serial number [chars])

Explanation  The module can not be powered up because all the ejectors are open

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-2-MOD_PWRFAIL: Module [dec] failed to power up (Serial number [chars])

Explanation  The module in slot [decimal digit] failed to power up

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and to collect more information.

Error Message  PLATFORM-2-MOD_PWRIDPROMFAIL: Module [dec] failed to power up due to IDPROM read error

Explanation  The module can not be powered up due to IDPROM read error

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom module [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-2-MOD_PWRIDPROM_SW_CARD_ID_UNKNOWN: Module [dec] failed to power up. (Unknown card. Could not get software-card-id)

Explanation  The module can not be powered up due to missing SWID in core-plugin for this CARDID

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom module [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-2-MOD_PWRUP_FM: Modules powered up due to fabric-module availability

Explanation  Modules powered up because atleast one fabric module is online

Recommended Action  No action needed

Error Message  PLATFORM-2-MOD_PWRUP_PARTIAL_FM: Partially connected line-card modules powered up due to available connectivity with fabric-modules

Explanation  Partially connected line-card modules powered up because atleast one fabric module is online

Recommended Action  No action needed

Error Message  PLATFORM-2-MOD_PWRUP_SC: Modules powered up due to system-controller module availability

Explanation  Modules powered up because atleast one system-controller module is online

Recommended Action  No action needed

Error Message  PLATFORM-2-MOD_PWRUP_XBAR: Modules powered up due to xbar availability

Explanation  Modules powered up because atleast one xbar module is online

Recommended Action  No action needed

Error Message  PLATFORM-2-MOD_PWRUP: Module [dec] powered up (Serial number [chars])

Explanation  The module in slot [decimal digit] is powered up.

Recommended Action  No action is required.

Error Message  PLATFORM-2-MOD_REMOVE: Module [dec] removed (Serial number [chars])

Explanation  The module in slot [decimal digit] has been removed.

Recommended Action  No action is required.

Error Message  PLATFORM-2-MOD_TEMPMAJALRM: [chars] reported Major temperature alarm. Sensor=[dec] Temperature=[dec] MajThreshold=[dec]

Explanation  Module in slot [decimal digit] exceeded major temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPMAJOR2WARM: [chars] recovered from minor temperature alarm. Warm alarm pending. Sensor=[dec] Temperature=[dec] MajTheshold=[dec] WarmThreshold=[dec]

Explanation  Module in slot [decimal digit] warm temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPMAJOR_OK: [chars] recovered from major temperature alarm. Sensor=[dec] Temperature=[dec] MajThreshold=[dec]

Explanation  Module in slot [decimal digit] major temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPMINALRM: [chars] reported minor temperature alarm. Sensor=[dec] Temperature=[dec] MinThreshold=[dec]

Explanation  Module in slot [decimal digit] has exceeded minor temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPMINOR2WARM: [chars] recovered from minor temperature alarm. Warm alarm pending. Sensor=[dec] Temperature=[dec] MinTheshold=[dec] WarmThreshold=[dec]

Explanation  Module in slot [decimal digit] warm temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPOK: [chars] recovered from minor temperature alarm. Sensor=[dec] Temperature=[dec] MinThreshold=[dec]

Explanation  Module in slot [decimal digit] minor temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPRECOVER: [chars] recovered from major temperature alarm. Minor temperature alarm pending. Sensor=[dec] Temperature=[dec] MajThreshold=[dec] MinThresh=[dec]

Explanation  Module in slot [decimal digit] recovered from major temperature threshold. Minor threshold still exceeded.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPSHUTDOWN: [chars] powered down due to major temperature alarm for Sensor [dec].

Explanation  Module in slot [decimal digit] shutdown due to temperature exceeding major threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPSKIPSHUTDOWN: [chars] reported Major temperature alarm. Sensor [dec] is XCVR sensor, skip shutdown

Explanation  Module in slot [decimal digit] exceeded major temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPWARM_OK: [chars] recovered from warm temperature alarm. Sensor=[dec] Temperature=[dec] WarmThreshold=[dec]

Explanation  Module in slot [decimal digit] warm temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-PFM_CRITICAL: [chars]

Explanation  Platform Critical

Recommended Action  No action is required.

Error Message  PLATFORM-2-PFM_FATW_BUS_SWITCH_FAIL: Backplane two wire [chars] bus connection fault detected but failed to perform bus switchover(BUS_A to BUS_B)

Explanation  Could not access some modules using BUS_A, but can access using BUS_B

Recommended Action  Please perform a 'show platform internal err'

Error Message  PLATFORM-2-PFM_FATW_BUS_SWITCH: Backplane two wire [chars] bus connection or device fault caused bus switchover(BUS_A to BUS_B)

Explanation  Could not access some modules using BUS_A, but can access using BUS_B

Recommended Action  Please perform a 'show platform internal err'

Error Message  PLATFORM-2-PFM_IMG_CMPT_FAIL: Image version is not supported in this chassis.

Explanation  This image version is not supported in this chassis.

Recommended Action  Sup-platform

Error Message  PLATFORM-2-PFM_LC_BOOT_DEV_ABSENT: No bootflash found in Module [dec]

Explanation  No bootflash found.

Recommended Action  Try to put in a bootflash in the module and try again.

Error Message  PLATFORM-2-PFM_LC_BOOT_DEV_FAIL: Bootflash access error in Module [dec]

Explanation  Bad bootflash/corrupted filesystem.

Recommended Action  Try to put in a known good bootflash in the module and try again.

Error Message  PLATFORM-2-PFM_LC_MOD_POWERED_DOWN: Module [dec] Powered Down. Module is not supported in this chassis. (Chassis Incompatible card)

Explanation  Module Powered Down, because Module is not supported in this chassis. (Chassis Incompatible card)

Recommended Action  Please perform a 'show module' to see the Power Down reason.

Error Message  PLATFORM-2-PFM_LC_NETBOOT_FAIL: Netboot for Module [dec] failed

Explanation  Netboot failed.

Recommended Action  Try to replace the BIOS in the module.

Error Message  PLATFORM-2-PFM_LC_REGISTRATION_FAIL: Could not register with Module [dec]

Explanation  Module registration failed.

Recommended Action  Try to replace the module.

Error Message  PLATFORM-2-PFM_LC_STATUS: Module [dec] powered up with [dec] status

Explanation  Status for the module that failed registration.

Recommended Action  Try to replace the module.

Error Message  PLATFORM-2-PFM_LOW_MEMORY_CONDITION: Module [dec] is running low on memory. [dec] percent used

Explanation  Supervisor is running low on memory

Recommended Action  Switchover

Error Message  PLATFORM-2-PFM_MODULE_POWER_OFF_TRIGGER: Power-off [chars] due to [chars] policy trigger

Explanation  Policy trigger initiated a module poweroff

Recommended Action  None

Error Message  PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of [chars] from Command Line Interface

Explanation  User initiated a module power-off from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PFM_MODULE_POWER_ON: Manual power-on of [chars] from Command Line Interface

Explanation  User initiated a module power-on from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PFM_MODULE_RESET: Manual restart of Module [dec] from Command Line Interface

Explanation  User initiated a module reload from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PFM_NETBOOT_DISABLE: Netboot for supervisor module in slot [dec] is disabled due to incompatible platform

Explanation  Standby supervisor failed to powerup.

Recommended Action  Try to replace the standby supervisor.

Error Message  PLATFORM-2-PFM_POE_DISABLING: The only 1900W power supply is shutdown, No Power delivered on POE ports.

Explanation  No 1900W power supply to support POE

Recommended Action  No action is required.

Error Message  PLATFORM-2-PFM_PREP_DEEP_SLEEP: Supervisor module in slot [dec] preparing to enter deep sleep mode

Explanation  Deep sleep mode initiated by the Connectivity Management Processor (CMP) for this supervisor

Recommended Action  No action is required.

Error Message  PLATFORM-2-PFM_PWR_MGMT_EPLD_VER_MISMATCH: Module [dec] Pwr Mgmt Epld (Version-[dec]) needs to be upgraded

Explanation  Using a wrong version of Epld version can result in unexplainable behaviour

Recommended Action  Upgrade Power Managment EPLD

Error Message  PLATFORM-2-PFM_STDBY_POWERUP_FAIL: standby supervisor failed to powerup

Explanation  Standby supervisor failed to powerup.

Recommended Action  Try to replace the standby supervisor.

Error Message  PLATFORM-2-PFM_SYSTEM_RESET_TIMER: Manual system restart with [dec] seconds delay from Command Line Interface

Explanation  User initiated a system reload with delay from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PFM_SYSTEM_RESET_TRIGGER: System restart due to [chars] policy trigger

Explanation  Policy/trigger initiated a system reload

Recommended Action  None

Error Message  PLATFORM-2-PFM_SYSTEM_RESET: Manual system restart from Command Line Interface

Explanation  User initiated a system reload from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PFM_SYSTEM_SHUTDOWN_TRIGGER: System shutdown due to [chars] policy trigger

Explanation  Policy/trigger initiated a system shutdown

Recommended Action  None

Error Message  PLATFORM-2-PFM_SYS_RESET_IMG_CMPT_FAIL: *********ERROR:System reset due to unsupported image version********

Explanation  System reset is triggered because of unsupported image version in this chassis.

Recommended Action  Sup-platform

Error Message  PLATFORM-2-PFM_XBAR_RESET: Manual restart of Xbar [dec] from Command Line Interface

Explanation  User initiated a xbar reload from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PLUGIN_ABSENT: Module in slot[dec] (sw_card_id=[dec]) has missing plugin

Explanation  Plugin not loaded, The LC cannot be poweredup

Recommended Action  Load the associated plugin

Error Message  PLATFORM-2-PS_ABSENT: Power supply [dec] is absent/shutdown, ps-redundancy might be affected

Explanation  Power Supply is absent.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_CAPACITY_CHANGE: Power supply PS[dec] changed its capacity. possibly due to On/Off or power cable removal/insertion (Serial number [chars])

Explanation  Detected power supply capacity change.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_CAPACITY_DIFFER: Detected power supplies with differing capacity. It is recommended to have same capacity for both powersupplies otherwise it may cause service disruptions

Explanation  Detected a power supply that has differing capacity than an the otherpower supply.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_DETECT: Power supply [dec] detected but shutdown (Serial number [chars])

Explanation  Power Supply is detected but shutdown.

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_FAIL: Power supply [dec] failed or shut down (Serial number [chars])

Explanation  Power Supply has failed or has been shutdown

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information. Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-PS_FANFAIL: Fan in Power supply [dec] failed

Explanation  Fan module in the Power Supply has failed

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_FANOK: Fan in Power supply [dec] ok

Explanation  Fan module in the Power Supply is ok.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_MISMATCH: Detected power supply [chars]. This reduces the redundant power available to the system and can cause service disruptions (Serial number [chars])

Explanation  Detected a new power supply that has reduced capacity than an existing power supply.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_OK: Power supply [dec] ok (Serial number [chars])

Explanation  Power Supply is ok.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_PWR_INPUT_MISSING: Power supply [dec] present but all AC/DC inputs are not connected, power redundancy might be affected

Explanation  Power Supply is present but not at full capacity.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_RED_MODE_CHG: Power supply operational redundancy mode changed to [chars]

Explanation  Power supply redundancy mode changed notification

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_RED_MODE_RESTORED: Power redundancy operational mode changed to configured mode

Explanation  Power Supply redundancy mode changes.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_REMOVE_LAST: Unexpected removal of last power supply [dec]. (Serial number [chars])

Explanation  Unexpected removal the only power supply in the system.

Recommended Action  Power supply unit may be faulty. Contact CISCO to replace the unit.

Error Message  PLATFORM-2-PS_REMOVE: Power supply [dec] removed (Serial number [chars])

Explanation  Power Supply is removed.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_UNKNOWN: Detected an unknown power supply [dec] for CISCO Multilayer Switch (Serial number [chars])

Explanation  Unable to determine power supply type. Default power supply types will be assumed.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-PS_UNSUPPORTED: Detected an unsupported power supply [dec] [chars] for CISCO Multilayer Switch (Serial number [chars])

Explanation  This power supply is not supported for the CISCO Multilayer Switches.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-SUP_UNSUPPORTED: Unsupported card detected in supervisor slot [dec] powered down

Explanation  The module in slot [decimal digit] has been powered down.

Recommended Action  No action is required.

Error Message  PLATFORM-2-SYS_IDPROMBAD_RECOVER_FAIL: Chassis IDPROM [dec] data re-initialization Un-successful. Data is invalid

Explanation  Chassis IDPROM [decimal digit] re-initialization was unsuccessful. Data is invalid.

Recommended Action  Please perform a 'show sprom module [decimal digit] 1' to read module IDPROM contents and collect more information.

Error Message  PLATFORM-2-SYS_IDPROMBAD_RECOVER_PASS: Chassis IDPROM [dec] data re-initialized successfully

Explanation  Chassis IDPROM [decimal digit] invalid data was succesfully re-initialized to valid.

Recommended Action  Please perform a 'show sprom module [decimal digit] 1' to read module IDPROM contents and verify the information.

Error Message  PLATFORM-2-SYS_IDPROMBAD: Chassis IDPROM [dec] data invalid

Explanation  Chassis IDPROM [decimal digit] contains invalid data.

Recommended Action  Please perform a 'show sprom module [decimal digit] 1' to read module IDPROM contents and collect more information.

Error Message  PLATFORM-2-XBAR_DETECT: Xbar [dec] detected (Serial number [chars])

Explanation  A new xbar in slot [decimal digit] is detected.

Recommended Action  No action is required.

Error Message  PLATFORM-2-XBAR_EJECTOR_POLICY_DISABLED: Ejector based shutdown disabled for Xbar [dec][chars]. Please close all the ejectors to enable ejector based shutdown

Explanation  Ejector based shutdown has been disabled

Recommended Action  Close all the ejectors to enable ejector based shutdown

Error Message  PLATFORM-2-XBAR_EJECTOR_POLICY_ENABLED: All Ejectors closed for Xbar [dec]. Ejector based shutdown enabled

Explanation  Ejector based shutdown has been enabled

Recommended Action  None

Error Message  PLATFORM-2-XBAR_PWRFAIL_EJECTORS_OPEN: All ejectors open, Xbar [dec] will not be powered up (Serial number [chars])

Explanation  The xbar can not be powered up because all the ejectors are open

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-2-XBAR_REMOVE: Xbar [dec] removed (Serial number [chars])

Explanation  The xbar in slot [decimal digit] has been removed.

Recommended Action  No action is required.

PLATFORM-3

Error Message  PLATFORM-3-BOOTFLASH_LIFETIME_MINOR: Bootflash lifetime usage crossed 80%. Collect 'show hardware internal bootflash log' and consult with product support team.

Explanation  Bootflash lifetime usage crossed 80%. Collect 'show hardware internal bootflash log' and consult with product support team.

Recommended Action  Collect show system internal bootflash log and consult with product support team

Error Message  PLATFORM-3-EJECTOR_STAT_CHANGED: Ejectors' status in slot [dec] has changed, [chars] Ejector is [chars], [chars] Ejector is [chars]

Explanation  Ejector status has changed

Recommended Action  None

Error Message  PLATFORM-3-MOD_BRINGUP_MULTI_LIMIT: Giving up after multiple attempts were made to bring up the Module [dec], (Serial number [chars])

Explanation  The module can not be powered up even after three attempts

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-3-MOD_PWRFAIL_MULTI: Module [dec] failed to power up multiple times (Serial number [chars])

Explanation  The module can not be powered up even after three attempts

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-3-PFM_ERROR: [chars]

Explanation  Platform Error

Recommended Action  No action is required.

Error Message  PLATFORM-3-SINGLE_EJECTOR_STAT_CHANGED: Ejectors' status in slot [dec] has changed, Ejector is [chars]

Explanation  Ejector status has changed

Recommended Action  None

Error Message  PLATFORM-3-XBAR_BRINGUP_MULTI_LIMIT: Giving up after multiple attempts were made to bring up the Xbar [dec], (Serial number [chars])

Explanation  The module can not be powered up even after three attempts

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contXBA ents to collect more information.

Error Message  PLATFORM-3-XBAR_PWRFAIL_MULTI: Xbar [dec] failed to power up multiple times (Serial number [chars])

Explanation  The xbar can not be powered up even after three attempts

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-3-XBAR_PWRFAIL: Xbar [dec] failed to power up (Serial number [chars])

Explanation  The xbar in slot [decimal digit] failed to power up

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and to collect more information.

Error Message  PLATFORM-3-XBAR_PWRIDPROMFAIL: Xbar [dec] failed to power up due to IDPROM read error

Explanation  The xbar can not be powered up due to IDPROM read error

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-3-XBAR_PWRIDPROM_SW_CARD_ID_UNKNOWN: Xbar [dec] failed to power up. (Unknown card. Could not get software-card-id)

Explanation  The xbar can not be powered up due to missing SWID in core-plugin for this CARDID

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

PLATFORM-4

Error Message  PLATFORM-4-MOD_TEMPACCESSFAIL: [chars] temperature sensor [dec] access failed

Explanation  Module in slot [decimal digit] unable to access temperature sensor.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-4-MOD_TEMPFAIL: [chars] temperature sensor [dec] failed (or inaccessible) - collect show tech gold and show tech module

Explanation  Module in slot [decimal digit] contains a faulty temperature sensor.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-4-PFM_FAN_FLTR_STATUS: Fan Filter status: [chars]

Explanation  Fan Filter status: Present/Absent

Recommended Action  Please perform a 'show platform internal info.

Error Message  PLATFORM-4-PFM_PS_RED_MODE_CHG: Power redundancy configured mode changed to [chars]

Explanation  Power redundancy mode changed

Recommended Action  Please perform a 'show platform internal info.

Error Message  PLATFORM-4-PFM_WARNING: [chars]

Explanation  Platform Warning

Recommended Action  No action is required.

PLATFORM-5

Error Message  PLATFORM-5-FAN_DETECT: Fan module [dec] (Serial number [chars]) [chars] detected

Explanation  Fan module is detected

Recommended Action  No action is required.

Error Message  PLATFORM-5-FAN_STATUS: Fan module [dec] (Serial number [chars]) [chars] current-status is [chars]

Explanation  Fan module changed status

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_FAN_DETECT: Fex [dec] Fan Module [dec] detected

Explanation  Fex Fan module is detected

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_FAN_REMOVE: Fex [dec] Fan Module [dec] removed

Explanation  Fex Fan module is removed

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_PS_FOUND: Fex [dec] Power Supply [dec] found (Serial number [chars])

Explanation  Fex power supply is found

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_PS_REMOVE: Fex [dec] Power Supply [dec] removed (Serial number [chars])

Explanation  Fex power supply is removed

Recommended Action  No action is required.

Error Message  PLATFORM-5-MOD_STATUS: [chars] current-status is [chars]

Explanation  Module in slot [decimal digit] changed status.

Recommended Action  No action is required.

Error Message  PLATFORM-5-PFM_NOTICE: [chars]

Explanation  Platform Notice

Recommended Action  No action is required.

Error Message  PLATFORM-5-POE_DISABLING: The only 1100W power supply is shutdown, Disabling POE.

Explanation  No 1100W power supply to support POE

Recommended Action  No action is required.

Error Message  PLATFORM-5-PS_FOUND: Power supply [dec] found (Serial number [chars])

Explanation  Power Supply is detected.

Recommended Action  No action is required.

Error Message  PLATFORM-5-PS_STATUS: PowerSupply [dec] current-status is [chars] [chars]

Explanation  Module in slot [decimal digit] changed status.

Recommended Action  No action is required.

Error Message  PLATFORM-5-XBAR_PWRDN: Xbar [dec] powered down (Serial number [chars])

Explanation  The xbar in slot [decimal digit] is powered down.

Recommended Action  Please perform a 'show module xbar', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors.

Error Message  PLATFORM-5-XBAR_PWRUP: Xbar [dec] powered up (Serial number [chars])

Explanation  The xbar in slot [decimal digit] is powered up.

Recommended Action  No action is required.

PLATFORM-6

Error Message  PLATFORM-6-PFM_FAN_SPEED: [chars]

Explanation  Fan Speed: For Zones

Recommended Action  Please perform a 'show platform internal info.

Error Message  PLATFORM-6-PFM_INFO: [chars]

Explanation  Platform Info

Recommended Action  No action is required.

PLATFORM-7

Error Message  PLATFORM-7-PFM_CLOCK_UPD_FAIL: Clock update failed due to context-switch delay of [dec] msec

Explanation  System shutdown in [decimal digit] seconds.

Recommended Action  Please perform a 'show env temperature' to collect more information.

PLOG_SUP Messages

This section contains the PLOG_SUP messages.

PLOG_SUP-4

Error Message  PLOG_SUP-4-PLOG_SUP_EXIT: Persistent Logger encountered an error [dec].

Explanation  Persistent Logger encountered an error

Recommended Action  No action is required.

PLOG Messages

This section contains the PLOG messages.

PLOG-4

Error Message  PLOG-4-PLOG_LC_EXIT: Persistent Logger encountered an error [dec]

Explanation  Persistent Logger encountered an error

Recommended Action  No action is required.

PONG Messages

This section contains the PONG messages.

PONG-5

Error Message  PONG-5-PONG_DISABLED: Pong Manager disabled

Explanation  Pong Service Enabled

Recommended Action  No action is required.

Error Message  PONG-5-PONG_ENABLED: Pong Manager enabled

Explanation  Pong Service Enabled

Recommended Action  No action is required.

Error Message  PONG-5-PONG_INJECTED: Pong packet injected

Explanation  Pong packet injected

Recommended Action  No action is required.

PORT-CHANNEL Messages

This section contains the PORT-CHANNEL messages.

PORT-CHANNEL-1

Error Message  PORT-CHANNEL-1-LC_CFG_FAILURE: configuring module [dec] failed [[chars]]

Explanation  Module configuration failed

Recommended Action  Module will be automatically reset

Error Message  PORT-CHANNEL-1-MALLOC_FAILED: cannot allocate memory (size [dec])

Explanation  No enough memory

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-1-MAP_PARAM_FAILURE: mapping parameter failed for [chars] [[chars]]

Explanation  Parameter mapping failed

Recommended Action  Specified service is misbehaving; check its status

Error Message  PORT-CHANNEL-1-MCAST_SEND_FAILURE: failed to send multicast [chars]: [chars]

Explanation  Failed to send a multicast message to all modules, usually because some module went down

Recommended Action  Run show port-channel consistency to check consistency

Error Message  PORT-CHANNEL-1-PC_BUNDLE_ID_NOT_CORRECT: [chars] : PC Bundle ([dec]) not equal to expected value ([dec]). Flapping the port-channel

Explanation  Bundle of pc is not equal to port-channel id minus one, flap of the port-channel is performed

Recommended Action  Flap of the port-channel was done since bundle was not equal to expected value. Check is PC traffic is restored fine.

PORT-CHANNEL-2

Error Message  PORT-CHANNEL-2-AUTO_CREATE_DISABLED: [chars] has been deprecated; [chars] [chars]

Explanation  Auto create port-channel is deprecated and disabled

Recommended Action  Convert the auto created channel to presistent by doing port-channel persistent

Error Message  PORT-CHANNEL-2-RESET_MODULE: reset module [dec] for not responding or returning error

Explanation  A module is reset for not responding or returning error

Recommended Action  No action is required.

PORT-CHANNEL-3

Error Message  PORT-CHANNEL-3-COMPAT_CHECK_FAILURE: [chars] is not compatible

Explanation  Compatibility check failed when adding ports to port-channel

Recommended Action  Make sure the compatibility parameters are consistent while adding ports to port-channel, or use force option

Error Message  PORT-CHANNEL-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-LC_CFG_TIMEOUT_ENTRY_PORT_ERR_DISABLE: Failed to send LC config due to timeout, Port [chars] Err disabled

Explanation  Failed to send a lc_config message

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-LC_CFG_UCAST_FAILED_PORT_ERR_DISABLE: Failed to send LC config unicast msg, Port [chars] Err disabled

Explanation  Failed to send a lc_config unicast message

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-LC_CFG_UCAST_SEND_FAILURE: Failed to send LC config Unicast msg to slot [dec] node 0x[hex] sap [dec]: [chars]. Resetting LineCard

Explanation  Failed to send a lc_config unicast message

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-MSG_SEND_FAILURE: failed to send [chars] to sap [dec]: [chars]

Explanation  Failed to send a message

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-PORT_CHANNEL_NOT_FOUND: [chars] is not found

Explanation  Cannot find port-channel in its database, which indicates an inconsistency with an external component

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-TIMEOUT: timed out after [dec] seconds [type [chars], state [chars]]

Explanation  Some operation timed out

Recommended Action  Run show port-channel consistency to check all module connectivity and consistency

PORT-CHANNEL-4

Error Message  PORT-CHANNEL-4-PORT_CFG_DELETED: [chars] removed from [chars]

Explanation  Port is removed from a port-channel because different module was inserted or module config purged

Recommended Action  You lost some ports from port-channel, check if you want to add ports in the new module to the same port-channel.

Error Message  PORT-CHANNEL-4-PORT_INDIVIDUAL: port [chars] is operationally individual

Explanation  The port is operating as an individual link even though it is locally or remotely configured to be part of a port channel

Recommended Action  Check the configuration of the port locally and remotely to ensure that it can operate as part of a port channel

Error Message  PORT-CHANNEL-4-PORT_NOT_FOUND: port [chars] is not part of port-channel

Explanation  Cannot find the port in port-channel database, which indicates an inconsistency with an external component

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-4-RACE_WARN: [chars]

Explanation  Warning of possible race condition

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-4-UNEXPECTED_RESPONSE: unexpected response [chars] from [chars]

Explanation  Received an unexpected response and discarded

Recommended Action  No action is required.

PORT-CHANNEL-5

Error Message  PORT-CHANNEL-5-AUTO_CREATE_FAILURE: [chars] [chars]

Explanation  Auto create process on the port failed

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-CREATED: [chars] created

Explanation  A port-channel is created

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-DELETED: [chars] deleted

Explanation  A port-channel is deleted

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-FOP_CHANGED: [chars]: first operational port changed from [chars] to [chars]

Explanation  The first operational port in a port-channel is changed

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-MAX_CHANNEL_DISALLOWED: Module failed to come online because port channel interface greater than [dec] is present

Explanation  The port-channel number configured on the switch is larger than 128

Recommended Action  Delete the set of port channel interface which is greater than 128

Error Message  PORT-CHANNEL-5-PORT_ADDED: [chars] added to [chars]

Explanation  Ports are added to a port-channel

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_DOWN: [chars]: [chars] is down

Explanation  Port goes down in a port-channel

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_REMOVED: [chars] removed from [chars]

Explanation  Ports are removed from a port-channel

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_UP: [chars]: [chars] is up

Explanation  Port comes up in a port-channel

Recommended Action  No action is required.

PORT-CHANNEL-6

Error Message  PORT-CHANNEL-6-RESYNC: resyncing [chars] with all modules

Explanation  Resync modules with sup after an error or switchover

Recommended Action  No action is required.

PORT-CHANNEL-7

Error Message  PORT-CHANNEL-7-GSYNC_DONE: global synchronization is done

Explanation  Port-channel manager finished global synchronization

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-GSYNC_REQ: requesting global synchronization

Explanation  Port-channel manager requested a global synchronization from active sup

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_ACTIVE: started in active mode

Explanation  Port-channel manager started in active mode

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_DEFAULT: started with default configuration

Explanation  Port-channel manager started with default configuration

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_STANDBY: started in standby mode

Explanation  Port-channel manager started in standby mode

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_STATEFUL: started statefully

Explanation  Port-channel manager started with running configuration

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_STATELESS: started statelessly

Explanation  Port-channel manager started with startup configuration

Recommended Action  No action is required.

PORT-PROFILE Messages

This section contains the PORT-PROFILE messages.

PORT-PROFILE-2

Error Message  PORT-PROFILE-2-IF_REFRESH_FAILED: Interface Database Refresh failed for [chars]

Explanation  Interface Database Refresh failed

Recommended Action  No action is required.

Error Message  PORT-PROFILE-2-INTERFACE_CMD_FAILURE: Inherit of port-profile [chars] on [chars] has failed with reason: [chars]

Explanation  Executing specific cmd on interface failed

Recommended Action  No action is required.

Error Message  PORT-PROFILE-2-INTERFACE_QUARANTINED: Interface [chars] has been quarantined due to [chars]

Explanation  Interface has been quarantined

Recommended Action  No action is required.

PORT-PROFILE-3

Error Message  PORT-PROFILE-3-ASSERTION_FAILED: Failed in File:[chars] Line:[dec]

Explanation  PPM Process assertion failed in File:[chars], at line:[dec]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-CREATE_IF_FAILED: Running-config collection Failed for intf range [chars]

Explanation  Running-config collection failed for :[chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-IF_APPLY_FAILED: Config Apply Failed

Explanation  Config Apply Failed

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-INTERFACE_NO_SHUTDOWN_FAILED: Interface no shutdown failed for [chars] after profile re-inherit

Explanation  Interface could not be unshut after profile re-inherit

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-INTERFACE_SHUTDOWN_FAILED: Interface shutdown failed for [chars] after failure to apply commands

Explanation  Interface could not be shutdown after failure to apply commands

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PPM_ALLOC_FAILED: Failed in File:[chars] Line:[dec] for type [dec] size [dec]

Explanation  SDM process could not allocate heap memory in File:[chars], at line:[dec], for memory-type:[dec] of Size:[dec]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_CREATE_FAILED: Port-profile [chars] creattion failed with error "[chars]"

Explanation  Port-profile:[chars] creation failed with [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_DEINHERIT_FAILED: Port-profile [chars] de-inherit failed with error "[chars]" on [chars]

Explanation  Port-profile:[chars] de-inherit failed with [:chars] on [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_DELETE_FAILED: Port-profile [chars] is deletion failed with error "[chars]"

Explanation  Port-profile:[chars] deletion failed with [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_DISABLE_FAILED: Port-profile [chars] disable failed with error "[chars]"

Explanation  Port-profile:[chars] disable failed with [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_ENABLE_FAILED: Port-profile [chars] enable failed with error "[chars]"

Explanation  Port-profile:[chars] enable failed with [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_INHERIT_FAILED: Port-profile [chars] inherit failed with error "[chars]" on [chars]

Explanation  Port-profile:[chars] inherit failed with [:chars] on [:chars]

Recommended Action  No action is required.

PORT-PROFILE-6

Error Message  PORT-PROFILE-6-KEY_STRING_EMPTY: A command '[chars]' with no command name defined in the definition file can cause PPM to handle it incorrectly

Explanation  Parsing null key as part of 'show running-config' is not correct

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_CREATED: Port-profile [chars] is created successfully

Explanation  Port-profile:[chars] is created

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_DEINHERITED: Port-profile [chars] is de-inherited successfully on [chars]

Explanation  Port-profile:[chars] is de-inherited on [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_DELETED: Port-profile [chars] is deleted successfully

Explanation  Port-profile:[chars] is deleted

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_DISABLED: Port-profile [chars] is disabled successfully

Explanation  Port-profile:[chars] is disabled

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_ENABLED: Port-profile [chars] is enabled successfully

Explanation  Port-profile:[chars] is enabled

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_INHERITED: Port-profile [chars] is inherited successfully on [chars]

Explanation  Port-profile:[chars] is inherited on [:chars]

Recommended Action  No action is required.

PORT-RESOURCES Messages

This section contains the PORT-RESOURCES messages.

PORT-RESOURCES-3

Error Message  PORT-RESOURCES-3-PRM_MSG_SEND_FAILURE: failed to send [chars] to sap [dec]: [chars]

Explanation  Failed to send a message

Recommended Action  No action is required.

PORT-RESOURCES-5

Error Message  PORT-RESOURCES-5-INVALID_PORT_ACTIV_PKG_LICENSE_FILE_INSTALLED: Invalid on demand port activation license file is installed for module [dec] (number of port licenses = [dec])

Explanation  Interfaces may not acquire port activation licenes during installation

Recommended Action  Install a valid port activation license file

PORT Messages

This section contains the PORT messages.

PORT-2

Error Message  PORT-2-IF_DOWN_ERROR_DISABLED: Interface [chars] is down (Error disabled) [chars] [chars]

Explanation  The interface encountered an error while configuring it. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Collect more information about failed interface using command 'show port internal all interface [char]'. In most cases, you can recover using following commands 'config terminal', 'interface [char]', 'shutdown', 'no shutdown' on the interface or removing and re-inserting the fibre optic cable

Error Message  PORT-2-IF_DOWN_LINK_FAILURE_CRIT: Interface [chars] is down (Link failure)

Explanation  The physical link has gone down

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

PORT-3

Error Message  PORT-3-IF_SFP_ALARM: Interface [chars], [chars] [chars] [chars]

Explanation  There was an alarm on the transceiver module. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  PORT-3-IF_TRANSCEIVER_READ_ERROR: Transceiver read error for interface [chars] [chars] [chars]

Explanation  Transceiver eeprom read failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Remove and insert the SFP back again. If the problem persists check if the transceiver is supported using the command: show interface transceiver. Please contact customer support to resolve the condition

Error Message  PORT-3-IF_UNSUPPORTED_TRANSCEIVER: Transceiver for interface [chars] is not supported

Explanation  Transceiver is not from an authorized vendor

Recommended Action  This command will determine the transceiver being used: show interface transceiver. Please contact customer support for a list of authorized transceiver vendors

PORT-4

Error Message  PORT-4-IF_NON_QUALIFIED_TRANSCEIVER: Non-qualified transceiver on interface [chars] was detected

Explanation  The transceiver for the interface specified has not been qualified on this platform for this software release

Recommended Action  Replace the module with a supported transceiver. Contact Cisco TAC to get platform transceiver qualification details

Error Message  PORT-4-IF_SFP_CLK_RATE_ERROR: SFP clock rate error for interface [chars] [chars] [chars]

Explanation  SFP clock rate mismatch/failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Remove the SFP and insert a new one with a different frequency type. If the problem persists check if the transceiver is supported using the command: show interface transceiver. Please contact customer support to resolve the condition

Error Message  PORT-4-IF_SFP_WARNING: Interface [chars], [chars] [chars] [chars]

Explanation  There was an warning on the transceiver module. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  PORT-4-IF_TRUSTSEC_VIOLATION: Interface [chars] encountered port security violation [chars] [chars]

Explanation  The port has detected port security violation. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check port security configs on interface

PORT-5

Error Message  PORT-5-EC_DISABLED_AS_LICENSE_NOT_PRESENT: Extended credit feature has been disabled as Enterprise Package license could not be checked out

Explanation  The Enterprise Package license is not available, so the extened credit feature has been disabled even though it was present in startup config

Recommended Action  Install the Enterprise Package license and re-enable the extended credit feature

Error Message  PORT-5-IF_BRINGUP_ALLOWED_FCOT_CHECKSUM_ERR: Interface [chars] is allowed to come up even with SFP checksum error [chars] [chars]

Explanation  SFP checksum on this interface failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Try to replace the SFP on this interface

Error Message  PORT-5-IF_BRINGUP_FAILED_ALL_ZERO_PEER_WWN_RCVD: Interface [chars], is not allowed to come up (received as all zeros wwn from peer [chars] [chars]

Explanation  Check peer interface configuration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_BRINGUP_NOT_ALLOWED_PORT_CONFIG_FAILURE: Interface [chars] is not allowed to be operational due to port config failure for reason: [chars] (0x[hex]) [chars] [chars]

Explanation  Check interface configuration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Try to change the configuration on the interface with the current available hardware capability

Error Message  PORT-5-IF_DOWN_8G_ARBFF_FILL_PATTERN_RCVD: Interface [chars] is down (Error disabled - ARBFF fill-pattern rcvd ) [chars] [chars]

Explanation  The port has received ARBFF fill-pattern in 8G speed. Only IDLE fill-pattern is supported.

Recommended Action  Configure switchport fill-pattern IDLE for 8G speed on peer, and if it does not support then try different speed

Error Message  PORT-5-IF_DOWN_ADMIN_DOWN: Interface [chars] is down (Administratively down) [chars] [chars]

Explanation  Interface has been configured to be administratively down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform the following commands to bring up the interface: 'config terminal', 'interface [char]', 'no shutdown'

Error Message  PORT-5-IF_DOWN_BIT_ERR_RT_THRES_EXCEEDED: Interface [chars] is down (Error disabled - bit error rate too high) [chars] [chars]

Explanation  The port has detected too high bit error rate in frames received from attached device. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the attached device; replace it if needed

Error Message  PORT-5-IF_DOWN_BUNDLE_MISCFG: Interface [chars] is down (Isolation due to channel mis-configuration on local or remote switch) [chars] [chars]

Explanation  One port across a link is part of a PortChannel while the other is not. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  While adding or deleting a member port from a PortChannel, both ports across the link should be added/deleted. No operation should be performed on either ports until they are both added/deleted.

Error Message  PORT-5-IF_DOWN_CFG_CHANGE: Interface [chars] is down(Config change) [chars] [chars]

Explanation  FCIP interface temporarily down due to reconfiguration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_CHANNEL_ADMIN_DOWN: Interface [chars] is down (Channel admin down) [chars] [chars]

Explanation  This interface belongs to a PortChannel and the PortChannel is configured to be administratively down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform the following commands on the PortChannel interface to which it belongs to bring the interface up: 'config terminal', 'interface [char]', 'shutdown', 'no shutdown'

Error Message  PORT-5-IF_DOWN_CHANNEL_MEMBERSHIP_UPDATE_IN_PROGRESS: Interface [chars] is down (Channel membership update in progress) [chars] [chars]

Explanation  The interface belongs to a PortChannel and a configuration is being attempted on the interface while there is a configuration in progress on the PortChannel. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Retry the configuration again

Error Message  PORT-5-IF_DOWN_DENIED_DUE_TO_PORT_BINDING: Interface [chars] is down(Suspended due to port binding) [chars] [chars]

Explanation  The F port is suspended due to being denied by port binding. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the port binding database to allow the host port to log in.

Error Message  PORT-5-IF_DOWN_DOMAIN_ADDR_ASSIGN_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to domain id assignment failure) [chars] [chars]

Explanation  Isolated due to a failure while assigning a domain. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_ID_MISMATCH_ISOLATION: Interface [chars] is isolated (configured fcdomain ID is different from runtime config) [chars] [chars]

Explanation  The runtime fcdomain ID does not equal the static configured fcdomain ID. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the fcdomain ID configuration matches the runtime config.

Error Message  PORT-5-IF_DOWN_DOMAIN_INVALID_RCF_RECEIVED: Interface [chars] is down (Isolation due to invalid fabric reconfiguration) [chars] [chars]

Explanation  Invalid RCF received. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_MANAGER_DISABLED: Interface [chars] is down (Isolation due to domain manager disabled) [chars] [chars]

Explanation  Isolated due to domain manager being disabled. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_MAX_RETRANSMISSION_FAILURE: Interface [chars] is down (Isolation due to domain manager other side not responding) [chars] [chars]

Explanation  Remote end domain manager not responding. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_NOT_ALLOWED_ISOLATION: Interface [chars] is isolated (domain not allowed) [chars] [chars]

Explanation  There aren't enough allowed domains to merge the VSANs across the link. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that all assigned domain id's are in the configured allowed domains on both sides of the link.

Error Message  PORT-5-IF_DOWN_DOMAIN_OTHER_SIDE_EPORT_ISOLATED: Interface [chars] is down (Isolation due to domain other side eport isolated) [chars] [chars]

Explanation  Isolating this interface due to the remote end being isolated. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_OVERLAP_ISOLATION: Interface [chars] is down (Isolation due to domain overlap) [chars] [chars]

Explanation  Isolated due to domain overlap. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DPVM_VSAN_NOT_FOUND: Interface [chars] is down (dynamic vsan not present) [chars] [chars]

Explanation  The specified dynamic vsan is not configured on this switch. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the dynamic vsan.

Error Message  PORT-5-IF_DOWN_DPVM_VSAN_SUSPENDED: Interface [chars] is down (dynamic vsan in suspended state) [chars] [chars]

Explanation  The specified dynamic vsan is in suspended state. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Un-suspend the dynamic vsan.

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_CLASSF_PARAM_ERR: Interface [chars] is down (Isolation due to ELP failure: class F param error) [chars] [chars]

Explanation  ELP failed on the interface due to class F param error. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_CLASSN_PARAM_ERR: Interface [chars] is down (Isolation due to ELP failure: class N param error) [chars] [chars]

Explanation  ELP failed on the interface due to class N param error. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_INVALID_PAYLOAD_SIZE: Interface [chars] is down (Isolation due to ELP failure: invalid payload size)

Explanation  ELP failed on the interface due to invalid payload size

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_INVALID_PORT_NAME: Interface [chars] is down (Isolation due to ELP failure: invalid port name) [chars] [chars]

Explanation  ELP failed on the interface due to invalid port name. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_INVALID_SWITCH_NAME: Interface [chars] is down (Isolation due to ELP failure: invalid switch name) [chars] [chars]

Explanation  ELP failed on the interface due to invalid switch name. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_INVALID_TX_BBCREDIT: Interface [chars] is down (Isolation due to ELP failure: loopback detected) [chars] [chars]

Explanation  ELP failed on the interface due to loopback connection detected. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Connect to a port on another switch and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_LOOPBACK_DETECTED: Interface [chars] is down (Isolation due to ELP failure: invalid transmit B2B credit) [chars] [chars]

Explanation  ELP failed on the interface due to invalid transmit B2B credit. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_RATOV_EDTOV_MISMATCH: Interface [chars] is down (Isolation due to ELP failure: R_A_TOV or E_D_TOV mismatch) [chars] [chars]

Explanation  ELP failed on the interface due to R_A_TOV or E_D_TOV mismatch. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure R_A_TOV and E_D_TOV values correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_REVISION_MISMATCH: Interface [chars] is down (Isolation due to ELP failure: revision mismatch) [chars] [chars]

Explanation  ELP failed on the interface due to revision mismatch. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_UNKNOWN_FLOW_CTL_CODE: Interface [chars] is down (Isolation due to ELP failure: invalid flow control code) [chars] [chars]

Explanation  ELP failed on the interface due to invalid flow control code. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_UNKNOWN_FLOW_CTL_PARAM: Interface [chars] is down (Isolation due to ELP failure: invalid flow control param) [chars] [chars]

Explanation  ELP failed on the interface due to invalid flow control param. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ELP failure) [chars] [chars]

Explanation  ELP failed on the interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the output of 'show port internal info' in the 'ELP failure reason' field

Error Message  PORT-5-IF_DOWN_EPP_FAILURE: Interface [chars] is down (Error Disabled - EPP Failure) [chars] [chars]

Explanation  Trunk protocol failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  'show port internal event-history msgs' will indicate the trunk protocol exchanges to determine why it failed

Error Message  PORT-5-IF_DOWN_ESC_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ESC failure) [chars] [chars]

Explanation  ESC failed on the interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the output of 'show port internal event-history' to determine the ESC protocol exchanges to determine how it failed

Error Message  PORT-5-IF_DOWN_ETH_IF_DOWN: Interface [chars] is down(Tunnel port src interface down) [chars] [chars]

Explanation  Ethernet link to which the FCIP interface is bound is down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the ethernet cable is connected, the interface is administratively enabled

Error Message  PORT-5-IF_DOWN_ETH_LINK_DOWN: Interface [chars] is down(Tunnel port src interface link down) [chars] [chars]

Explanation  Ethernet link to which the FCIP interface is bound is down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the ethernet cable is connected and the remote end is also active

Error Message  PORT-5-IF_DOWN_FABRIC_BIND_FAILURE: Interface [chars] is down(Isolation due to fabric bind failure) [chars] [chars]

Explanation  Fabric binding failed on this port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the fabric binding database to ensure that the remote port is allowed to connect to this port

Error Message  PORT-5-IF_DOWN_FCOT_NOT_PRESENT: Interface [chars] is down (FCOT not present) [chars] [chars]

Explanation  The FCOT has been removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Insert an FCOT

Error Message  PORT-5-IF_DOWN_FCOT_REMOVED: Interface [chars] is down (FCOT has been removed) [chars] [chars]

Explanation  The FCOT has been removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Insert an FCOT

Error Message  PORT-5-IF_DOWN_FCOT_VENDOR_NOT_SUPPORTED: Interface [chars] is down (Error disabled - FCOT vendor not supported) [chars] [chars]

Explanation  FCOT inserted is not a supported one. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please contact customer support for a list of authorized transceiver vendors

Error Message  PORT-5-IF_DOWN_FCSP_AUTHENT_FAILURE: Interface [chars] is down (FC-SP authentication failure) [chars] [chars]

Explanation  The port failed FC-SP authentication with its peer. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the FC-SP configuration.

Error Message  PORT-5-IF_DOWN_FICON_BEING_ENABLED: Interface [chars] is down(FICON being enabled) [chars] [chars]

Explanation  FICON is being enabled on the port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please wait. This might take a while

Error Message  PORT-5-IF_DOWN_FICON_NOT_ENABLED: Interface [chars] is down(Error disabled - FICON not enabled) [chars] [chars]

Explanation  FICON not enabled on port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please enable FICON on port

Error Message  PORT-5-IF_DOWN_FICON_VSAN_DOWN: Interface [chars] is down(FICON vsan down) [chars] [chars]

Explanation  FICON is being enabled on the port VSAN of this port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This is an intermediary state, whereby the port VSAN of the port is being enabled to be a FICON VSAN.

Error Message  PORT-5-IF_DOWN_HW_FAILURE: Interface [chars] is down (Hardware Failure) [chars] [chars]

Explanation  The module's hardware has failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Collect more information about failed module using command 'show module internal all module'

Error Message  PORT-5-IF_DOWN_INACTIVE: Interface [chars] is down (Inactive) [chars] [chars]

Explanation  The port VSAN has been suspended or deleted. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Assign a new active port VSAN to the interface

Error Message  PORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_MODE: Interface [chars] is down (Error disabled - Incompatible admin port mode) [chars] [chars]

Explanation  The configured mode is not supported on this interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform a 'show port internal info' to determine the list of modes supported on this interface

Error Message  PORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBBCREDIT: Interface [chars] is down (Error disabled - Incompatible admin port rxbbcredit) [chars] [chars]

Explanation  The configured receive B2B credit size is not supported. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Get the allowed receive B2B credit size from 'show port internal info'

Error Message  PORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBUFSIZE: Interface [chars] is down (Error disabled - Incompatible admin port rxbufsize) [chars] [chars]

Explanation  The configured receive buffer size is not supported. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Get the allowed receive buffer size from 'show port internal info'

Error Message  PORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_SPEED: Interface [chars] is down (Error disabled - Incompatible admin port speed) [chars] [chars]

Explanation  The configured speed is not supported on this interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform a 'show port internal info' to determine the range of speed supported on this interface

Error Message  PORT-5-IF_DOWN_INITIALIZING: Interface [chars] is down (Initializing) [chars] [chars]

Explanation  The interface is in the process of coming up. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  If the interface is stuck in this state for a while, check the output of 'show port internal event-history' to determine what it is waiting for

Error Message  PORT-5-IF_DOWN_INTERFACE_REMOVED: Interface [chars] is down (Interface removed) [chars] [chars]

Explanation  Interface removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_INVALID_ATTACHMENT: Interface [chars] is down(Invalid attachment) [chars] [chars]

Explanation  The peer port does not have the compatible security attributes. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please ensure that the peer port has compatible security attributes as the local port.

Error Message  PORT-5-IF_DOWN_INVALID_CONFIG: Interface [chars] is down(Error disabled - Possible PortChannel misconfiguration) [chars] [chars]

Explanation  The local and peer port have a PortChannel membership misconfiguration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that both the local and peer ports are either both members of the same PortChannel or are not both part of PortChannel

Error Message  PORT-5-IF_DOWN_INVALID_FABRIC_BINDING: Interface [chars] is down(Invalid fabric binding exchange) [chars] [chars]

Explanation  Fabric binding failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check fabric binding database

Error Message  PORT-5-IF_DOWN_LINK_FAILURE: Interface [chars] is down (Link failure [chars]) [chars] [chars]

Explanation  The physical link has gone down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  PORT-5-IF_DOWN_LOCALLY_DISRUPTIVE_RECONFIGURATION: Interface [chars] is down (fcdomain applied a locally disruptive reconfiguration) [chars] [chars]

Explanation  Fcdomain applied a locally disruptive reconfiguration (local domain became invalid. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_LOOPBACK_DIAG_FAILURE: Interface [chars] is down (Diag failure) [chars] [chars]

Explanation  Diag failed on the interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Collect more information about failed interface using command 'attach module' to connect to module

Error Message  PORT-5-IF_DOWN_LOOPBACK_ISOLATION: Interface [chars] is down (Isolation due to port loopback to same switch) [chars] [chars]

Explanation  The interface is looped back to another interface on the same switch. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the connectivity of this interface and ensure that it is connected to another switch

Error Message  PORT-5-IF_DOWN_MODULE_REMOVED: Interface [chars] is down (module removed) [chars] [chars]

Explanation  Interface is down because the module was removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_NONE: Interface [chars] is down (None) [chars] [chars]

Explanation  There is no apparent reason the interface is down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Collect more information about port using command 'show port internal all interface [char]' to determine why it went down

Error Message  PORT-5-IF_DOWN_NON_PARTICIPATING: Interface [chars] is down (Non participating) [chars] [chars]

Explanation  The loop port has been put into non participating mode. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_NOS_RCVD: Interface [chars] is down (NOS received) [chars] [chars]

Explanation  The physical link has gone down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  PORT-5-IF_DOWN_NO_TRUNK_OPER_VSANS_ISOLATION: Interface [chars] is down(Isolation due to no common vsans with peer on trunk) [chars] [chars]

Explanation  The trunk port is isolated as there are no common VSANs to be brought up with the peer port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check that there are common VSANs configured and allowed to come up between the ports.

Error Message  PORT-5-IF_DOWN_OFFLINE: Interface [chars] is down (Offline) [chars] [chars]

Explanation  The interface has been placed into the offline state. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_OHMS_EXTERNAL_LB_TEST: Interface [chars] is down(Loopback test) [chars] [chars]

Explanation  Loopback tests. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please wait. This might take a while

Error Message  PORT-5-IF_DOWN_OLS_RCVD: Interface [chars] is down (OLS received) [chars] [chars]

Explanation  The physical link has gone down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  PORT-5-IF_DOWN_PARENT_ADMIN_DOWN: Interface [chars] is down (Parent interface down) [chars] [chars]

Explanation  Parent interface is down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_PEER_CLOSE: Interface [chars] is down(TCP conn. closed by peer) [chars] [chars]

Explanation  The FCIP peer connected to this interface closed the TCP connection. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This command will provide the peer IP address of this FCIP interface: show interface. Check to see why the peer closed the TCP connection

Error Message  PORT-5-IF_DOWN_PEER_OUI_NOT_PRESENT: Interface [chars] is down (Error disabled - peer OUI 0x[hex] not in the local list of compatible OUIs) [chars] [chars]

Explanation  The named interface has been error disabled since the peer OUI is not present in the local list of compatible OUIs.

Recommended Action  If the peer is a Cisco device then add the OUI to the local OUI list with the 'wwn oui ' configuration command. Then reset the interface to restart link negotiation. Newer OUIs are added to later versions of NX-OS where the configuration may be nondisruptively removed.

Error Message  PORT-5-IF_DOWN_PEER_RESET: Interface [chars] is down(TCP conn. reset by peer) [chars] [chars]

Explanation  TCP connection to the FCIP peer got reset. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Check to see why the peer reset the TCP connection

Error Message  PORT-5-IF_DOWN_PORT_ACT_LICENSE_NOT_AVAILABLE: Interface [chars] is allowed to come up BUT port activation license not available [chars] [chars]

Explanation  Assign a port activation license to this port after installing additional port activation licenses as needed. [cmd: conf t; interface fc / ; port-license acquire;]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_PORT_BIND_FAILURE: Interface [chars] is down(Isolation due to port bind failure) [chars] [chars]

Explanation  Port binding failed on this port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the port binding database to ensure that the remote port is allowed to connect to this port

Error Message  PORT-5-IF_DOWN_PORT_BLOCKED: Interface [chars] is down(Port blocked due to FICON) [chars] [chars]

Explanation  The port has been blocked by FICON configuration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please unblock the port in FICON configuration.

Error Message  PORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface [chars] is down (No operational members) [chars] [chars]

Explanation  This is a PortChannel interface and all its members are operationally down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Enable at least one of the PortChannel's members

Error Message  PORT-5-IF_DOWN_PORT_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to port VSAN mismatch) [chars] [chars]

Explanation  Isolated due to a mismatch in the configured port VSAN of the local and remote ends. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the port VSAN of the local and remote interfaces to be the same and perform a 'shutdown' and a 'no shutdown'

Error Message  PORT-5-IF_DOWN_RCF_IN_PROGRESS: Interface [chars] is down (RCF in progress) [chars] [chars]

Explanation  There is an RCF in progress. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_SOFTWARE_FAILURE: Interface [chars] is down (Port software failure) [chars] [chars]

Explanation  The software servicing the data path on the port has failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_SRC_MOD_NOT_ONLINE: Interface [chars] is down(Tunnel source module not online) [chars] [chars]

Explanation  Module that has the tunnel source port of this FCIP interface is not fully online. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  The module that has the tunnel src port is coming online. Please use show mod to find module status

Error Message  PORT-5-IF_DOWN_SRC_PORT_NOT_BOUND: Interface [chars] is down (Tunnel port src interface unbound) [chars] [chars]

Explanation  Tunnel port source interface unbound. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_SRC_PORT_REMOVED: Interface [chars] is down(Tunnel src port removed) [chars] [chars]

Explanation  Tunnel source port of this FCIP interface has been removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  The src interface with ip address that matches the ip address of the bound entity is removed. This happens normally due to the module on which the src interface exists is removed

Error Message  PORT-5-IF_DOWN_SUSPENDED_BY_MODE: Interface [chars] is down (Suspended due to incompatible mode) [chars] [chars]

Explanation  This interface belongs to a PortChannel and operational mode of the interface is different from that of the PortChannel. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Change the mode and the trunking mode of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  PORT-5-IF_DOWN_SUSPENDED_BY_SPEED: Interface [chars] is down (Suspended due to incompatible speed) [chars] [chars]

Explanation  This interface belongs to a PortChannel and operational speedode of the interface is different from that of the PortChannel. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Change the speed of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  PORT-5-IF_DOWN_SUSPENDED_BY_WWN: Interface [chars] is down (Suspended due to incompatible remote switch WWN) [chars] [chars]

Explanation  This interface belongs to a PortChannel and remote switch WWN of the interface is different from that of the PortChannel. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that this interface is connected to the same remote switch as all the other interfaces in the PortChannel

Error Message  PORT-5-IF_DOWN_SUSPENDED: Interface [chars] is down (Suspended) [chars] [chars]

Explanation  This interface belongs to a PortChannel and has been suspended to to an error while bringing it up. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  In most cases, you can recover using following commands 'config terminal', 'interface [char]', 'shutdown', 'no shutdown' on the interface. If this happens again obtain output of 'show port internal all interface [char]' on the interface

Error Message  PORT-5-IF_DOWN_TCP_KEEP_ALIVE_EXPIRED: Interface [chars] is down(TCP conn. closed - Keep alive expired) [chars] [chars]

Explanation  TCP session to the FCIP peer got closed due to loss of TCP keep alive. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  PORT-5-IF_DOWN_TCP_MAX_RETRANSMIT: Interface [chars] is down(TCP conn. closed - retransmit failure) [chars] [chars]

Explanation  Interface is down due to maximum retransmission failure. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  PORT-5-IF_DOWN_TCP_PERSIST_TIMER_EXPIRED: Interface [chars] is down(TCP conn. closed - Persist timer expired) [chars] [chars]

Explanation  TCP session to the FCIP peer closed because TCP persist timer expired. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  PORT-5-IF_DOWN_TOO_MANY_INTR: Interface [chars] is down (Error disabled - too many interrupts) [chars] [chars]

Explanation  The port has received too many interrupts in the hardware. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the attached device; replace it if needed

Error Message  PORT-5-IF_DOWN_TOO_MANY_INVALID_FLOGIS: Interface [chars] is down(Suspended due to too many invalid flogis [chars] [chars]

Explanation  The port is suspended due to receiving a large number of invalid FLOGI's. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the HBA and perform a shut, followed by no shut on the port.

Error Message  PORT-5-IF_DOWN_UPGRADE_IN_PROGRESS: Interface [chars] is down (Linecard upgrade in progress) [chars] [chars]

Explanation  Upgrade of the linecard software is in progress. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_VIRTUAL_IVR_DOMAIN_OVERLAP_ISOLATION: Interface [chars] is down (Isolation due to virtual IVR domain overlap) [chars] [chars]

Explanation  Isolated due to virtual IVR domain overlap. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to vsan mismatch) [chars] [chars]

Explanation  This is a trunking interface and the VSANs configured do not match with the VSANs configured on the remote end. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the VSANs configured on the local end with the remote end

Error Message  PORT-5-IF_DOWN_ZONE_MERGE_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to zone merge failure) [chars] [chars]

Explanation  Isolated due to a failure during zone merge. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_ZONE_REMOTE_NO_RESP_ISOLATION: Interface [chars] is down (Isolation due to remote zone server not responding) [chars] [chars]

Explanation  Isolated due to remote zone server not responding. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_PORT_GUARD_DOWN: Interface [chars] is down ([chars]) [chars] [chars]

Explanation  The interface is down due to port guard configuration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform a shut followed by no shut to bring up the interface

Error Message  PORT-5-IF_PORT_QUIESCE_FAILED: Interface [chars] port quiesce failed due to failure reason: [chars] (0x[hex])

Explanation  There may be few packet drops due to this failure

Recommended Action  No action is required.

Error Message  PORT-5-IF_PSS_DUPLICATE_KEY: Duplicate key found for Interface [chars]

Explanation  Duplicate pss key detected

Recommended Action  No action is required.

Error Message  PORT-5-IF_TRUNK_DOWN: Interface [chars], vsan [chars] is down ([chars]) [chars] [chars]

Explanation  Interface [chars] is trunking, VSAN [chars] is down with reason in (). [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  The following commands will help determine why this VSAN is down on this interface: show interface, show port internal info interface VSAN, show port internal event-history interface VSAN

Error Message  PORT-5-IF_TRUNK_UP: Interface [chars], vsan [chars] is up [chars] [chars]

Explanation  Interface [chars] is trunking, VSAN [chars] is up. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_UP_PORT_ACT_LICENSE_NOT_ACQUIRED: Interface [chars] is allowed to come UP though port activation license is not acquired [chars] [chars]. Acquire port-license for the port

Explanation  Assign a port activation license to this port after installing additional port activation licenses as needed. [cmd: conf t; interface fc / ; port-license acquire;]

Recommended Action  No action is required.

Error Message  PORT-5-IF_UP: Interface [chars] is up [chars] [chars] [chars]

Explanation  Interface is up in mode specified, if applicable. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-MODULE_BRINGUP_NOT_ALLOWED: Not allowing module [dec] to come up for reason: [chars] (0x[hex])

Explanation  Module is not allowed to be operational due to the current system state

Recommended Action  Use command "show module recovery-steps" and follow the steps described

Error Message  PORT-5-MODULE_INDEX_RESTORE_ERROR: Error in restoring indices for module [dec]: reason [chars] (0x[hex])

Explanation  Restore of module index may fail due to overlap of indices

Recommended Action  No action is required.

Error Message  PORT-5-MODULE_UNLIMITED_OSM_SEQ_FAILED: Enable/Disable of unlimited oversubscription failed for module [dec]

Explanation  Interfaces of the module may be in indeterminate state

Recommended Action  Reload the module

PRIVATE_VLAN Messages

This section contains the PRIVATE_VLAN messages.

PRIVATE_VLAN-2

Error Message  PRIVATE_VLAN-2-PVLAN_ASSOC_DOWN_FAILED: Failed to bring down the association between [dec] & [dec]

Explanation  Association bringdown failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ASSOC_UP_FAILED: Failed to bring up the association between [dec] & [dec]

Explanation  Association bringup failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ELTM_MTS_SEND_FAILED: MTS send failed while communicating with ELTM.

Explanation  ELTM MTS send failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ELTM_TIMED_OUT: ELTM timed out while configuring hardware.

Explanation  ELTM timed out

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ETHPM_TIMED_OUT: ETHPM timed out while configuring/unconfiguring hardware

Explanation  ETHPM timed out

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_ASSOCIATE_PRIMARY_WITH_SECONDARY_VLAN: Failed to bring up the association between [dec] & [dec]

Explanation  Association between primary and secondary vlan failed due to an error returned by vlan manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_COMMUNICATE_REMOVE_VLAN_ASSOCIATION_TO_ELTM: Failed to bring down the association between [dec] & [dec]

Explanation  Fail to remove association between primary and secondary vlan due to an error returned by eltm manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_COMMUNICATE_VLAN_ASSOCIATION_TO_ELTM: Failed to bring up the association between [dec] & [dec]

Explanation  Failed to associate primary and secondary vlan due to an error returned by eltm manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_REMOVE_ASSOCIATION_BETWEEN_PRIMARY_AND_SECONDARY_VLAN: Failed to bring down the association between [dec] & [dec]

Explanation  Removing association between primary and secondary vlan failed due to an error returned by vlan manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_HW_ERROR: Error 0x[hex] occurred for ifindex 0x[hex] while programming hardware: [chars]

Explanation  Hardware Configuration Error

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_PIXM_MTS_SEND_FAILED: MTS send failed while communicating with PIXM

Explanation  PIXM MTS send failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_PIXM_TIMED_OUT: PIXM timed out while configuring hardware.

Explanation  PIXM timed out

Recommended Action  No action is required.

PRIVATE_VLAN-3

Error Message  PRIVATE_VLAN-3-PVLAN_ASSOC_SDB_UPDATE_FAILED: Failed to update SDB while [chars] association for vlan [dec]

Explanation  SDB Update failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_IN_USE: PVLAN [dec] in use by interface [chars], please do "no switchport access vlan" or "no switchport private-vlan host-association"

Explanation  PVLAN in use

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_NOT_PRIMARY_VLAN: VLAN [dec] is not a primary vlan. Invalid operation.

Explanation  We cant remove association from secondary vlan

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_SEC_VLAN_NOT_EXIST: VLAN [dec] is not associated with primary VLAN [dec]

Explanation  This secondary vlan is not associated with primary vlan

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_VLANMGR_FAILURE: Cannot restore association operational state. Failed to communicate with VLAN manager

Explanation  Restoring association operational status failed

Recommended Action  No action is required.

PRIVATE_VLAN-5

Error Message  PRIVATE_VLAN-5-PVLAN_DISABLED: PVLAN Disabled

Explanation  PVLAN Service Disabled

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_DISABLE_FAILED: Disabling of private-vlan failed. Either shutdown these ports or remove the ports that are in switchport mode private-vlan: [chars]

Explanation  Disabling of private-vlan failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_ENABLED: PVLAN Enabled

Explanation  PVLAN Service Enabled

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_VTP_DISABLE_FAILED: Either remove all private-vlans from VTP domain or change VTP to transparent mode

Explanation  Disabling of private-vlan failed

Recommended Action  No action is required.

PSS Messages

This section contains the PSS messages.

PSS-0

Error Message  PSS-0-PSS_NO_MORE_PAGES: [chars]: needs more working pages

Explanation  Service needs more working page buffers

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PSS-0-PSS_NO_MORE_RSM_PAGES: [chars]: needs more rsm pages

Explanation  Service needs more rsm page buffers

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PSS-0-PSS_READ_DATA_FAILURE: [chars]: failed to read data to [chars] block [dec]: [chars]

Explanation  PSS cannot read data

Recommended Action  No action is required.

Error Message  PSS-0-PSS_SYNC_DATA_FAILURE: [chars]: failed to sync data to [chars]: [chars]

Explanation  PSS cannot sync data due to filesystem or disk error

Recommended Action  No action is required.

Error Message  PSS-0-PSS_SYNC_LOG_FAILURE: [chars]: failed to sync log: [chars]

Explanation  PSS cannot sync log due to filesystem or disk error

Recommended Action  No action is required.

Error Message  PSS-0-PSS_UNKNOWN_LOG: [chars]: unknown log type 0x[hex] at offset [dec]

Explanation  Unknown logging entry found

Recommended Action  No action is required.

Error Message  PSS-0-PSS_WRITE_DATA_FAILURE: [chars]: failed to write data to [chars] block [dec]: [chars]

Explanation  PSS cannot write data due to filesystem or disk error

Recommended Action  No action is required.

Error Message  PSS-0-PSS_WRITE_FAILURE: [chars]: failed to write data: [chars]

Explanation  PSS cannot write data due to filesystem or disk error

Recommended Action  No action is required.

Error Message  PSS-0-PSS_WRITE_LOG_FAILURE: [chars]: failed to write log: [chars]

Explanation  PSS cannot write log due to filesystem or disk error

Recommended Action  No action is required.

PSS-1

Error Message  PSS-1-PSS_INVALID_MAGIC: [chars]: database [chars] has invalid magic number 0x[hex]

Explanation  PSS found a corrupted database with invalid magic number

Recommended Action  No action is required.

Error Message  PSS-1-PSS_META_READ_ERROR: [chars]: cannot read meta page from [chars]: [chars]

Explanation  PSS cannot read meta page of a database

Recommended Action  No action is required.

Error Message  PSS-1-PSS_STAT_ERROR: [chars]: cannot stat [chars]: [chars]

Explanation  PSS cannot do fstat on a database

Recommended Action  No action is required.

Error Message  PSS-1-PSS_VERSION_MISMATCH: [chars]: found version mismatch in [chars]

Explanation  PSS found a database whose format it cannot interpret due to version mismatch

Recommended Action  The image upgrade was not done properly; write erase should cure it as a last step

PSS-2

Error Message  PSS-2-PSS_ERROR: [chars]

Explanation  PSS error log

Recommended Action  No action is required.

Error Message  PSS-2-PSS_INFRACONVERT: [chars]

Explanation  Error in libinfraconvert during pss conversion

Recommended Action  No action is required.

Error Message  PSS-2-PSS_INVALID_SIZE: [chars]: database [chars] ([chars]) has invalid size [dec] (block size [dec])

Explanation  PSS found a database with invalid size - probably due to a crash

Recommended Action  No action is required.

Error Message  PSS-2-PSS_MISSING_FILE: [chars]: database [chars] missing [chars] file

Explanation  PSS database is incomplete; probably due to a crash

Recommended Action  No action is required.

Error Message  PSS-2-PSS_RECOVERY_FAILED: [chars]: failed to recover [chars]

Explanation  PSS recovery failed

Recommended Action  No action is required.

PSS-4

Error Message  PSS-4-PSS_CLEANUP: [chars]: cleaning up [chars]

Explanation  PSS removed a leftover or corrupted file

Recommended Action  No action is required.

Error Message  PSS-4-PSS_RECOVERY_ENDED: [chars]: recovered [chars] successfully

Explanation  PSS recovery finished

Recommended Action  No action is required.

Error Message  PSS-4-PSS_RECOVERY_STARTED: [chars]: recovering [chars]: [dec] valid transactional records

Explanation  PSS started recovery of previous aborted transaction

Recommended Action  No action is required.

PSS-5

Error Message  PSS-5-PSS_CONVERT_FORMAT: [chars]: converting pss format: [chars]

Explanation  PSS format is being converted

Recommended Action  No action is required.

Error Message  PSS-5-PSS_CONVERT_LAYOUT: [chars]: converting pss layout: [chars] (params [dec]/[dec]/[dec] -> [dec]/[dec]/[dec])

Explanation  PSS layout is being converted

Recommended Action  No action is required.

Error Message  PSS-5-PSS_SHRINK: [chars]: shrinking pss: [chars]

Explanation  PSS is being shrunk to remove free space

Recommended Action  No action is required.

Error Message  PSS-5-SDB_CLOSED_AT_COMMIT: [chars]: sdb [chars] is closed: token [dec] is not committed

Explanation  Publisher received SDB commit but sdb was already closed

Recommended Action  No action is required.

PTPLC Messages

This section contains the PTPLC messages.

PTPLC-3

Error Message  PTPLC-3-PTPLC_PORT_CFG_FAILED: Configuration failed on port [hex], [chars]: [hex], [chars]

Explanation  PTP interface configuration error

Recommended Action  No action is required.

Error Message  PTPLC-3-PTPLC_PTP_INTF_CONFIG_ERROR: Failed to configure PTP/PONG on port [dec]: [hex], [chars]

Explanation  PTP interface configuration error

Recommended Action  No action is required.

PTP Messages

This section contains the PTP messages.

PTP-2

Error Message  PTP-2-PTP_BAD_CORRECTION_DETECTED: PTP correction % PRId64 exceeds the threshold. Discarding the correction value. MasterTimestamp % PRIu64 (sec) [dec](nsec), SlaveTimestamp % PRIu64 (sec) [dec](nsec)

Explanation  PTP bad correction detected

Recommended Action  No action is required.

Error Message  PTP-2-PTP_ClOCKID_CHANGE: Clock id has changed from [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] to [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]

Explanation  PTP clock-id changed

Recommended Action  No action is required.

Error Message  PTP-2-PTP_GM_CHANGE_TOLOCAL: Grandmaster clock has changed to local clock [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] for the PTP protocol

Explanation  PTP GM changed to local Clock ID

Recommended Action  No action is required.

Error Message  PTP-2-PTP_GM_CHANGE: Grandmaster clock has changed from [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] to [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] for the PTP protocol

Explanation  PTP GM changed

Recommended Action  No action is required.

Error Message  PTP-2-PTP_GM_CLOCK_CLASS_CHANGE: Grandmaster clock class has changed from [dec] to [dec]

Explanation  PTP GM clock class changed

Recommended Action  No action is required.

Error Message  PTP-2-PTP_HIGH_CORR: Slave port [chars] High correction % PRId64 (nsec)

Explanation  PTP clock high correction

Recommended Action  No action is required.

Error Message  PTP-2-PTP_HIGH_MEAN_PATH_DELAY: PTP mean-path-delay % PRIu64 exceeds the threshold. Discarding the value.

Explanation  PTP high mean-path-delay detected

Recommended Action  No action is required.

Error Message  PTP-2-PTP_INTF_DISABLED: PTP on interface [chars] is now DISABLED

Explanation  PTP is disabled on the interface

Recommended Action  No action is required.

Error Message  PTP-2-PTP_MTC_ACL_ERROR: Internal ptp acl-redirect error, Disable this using 'no ptp acl-redirect'

Explanation  PTP acl-redirect error

Recommended Action  No action is required.

Error Message  PTP-2-PTP_NO_SEND_FOLLOWUP: NOT sending FOLLOW_UP on interface:[chars]

Explanation  PTP not sending followup on interface

Recommended Action  No action is required.

Error Message  PTP-2-PTP_NO_SUPPORT_100G: PTP is NOT supported on 100G interface,remove ptp config on this intf for better time-sync

Explanation  PTP not supported on 100G intf

Recommended Action  No action is required.

Error Message  PTP-2-PTP_NO_SUPPORT_ON_SOME_PORT_SPEED: PTP is NOT supported on [dec]M interface.

Explanation  PTP not supported on 10/100M intf

Recommended Action  No action is required.

Error Message  PTP-2-PTP_OFFLOAD_STATUS: PTP offload [chars]

Explanation  PTP offload status

Recommended Action  No action is required.

Error Message  PTP-2-PTP_STATE_CHANGE: PTP state of interface [chars] is changing from '[chars]' to '[chars]'

Explanation  PTP Port state change

Recommended Action  No action is required.

Error Message  PTP-2-PTP_TIMESYNC_LOST: Loss of synchronization with master clock

Explanation  PTP lost synchronization with master clock

Recommended Action  No action is required.

PTP-5

Error Message  PTP-5-PTP_ASCAPABLE_CHANGE: PTP Neighbor of [chars] changed to IEEE 802.1AS capable

Explanation  802.1 AS capability of neighbor at interface changed to yes

Recommended Action  No action is required.

Error Message  PTP-5-PTP_ASNOTCAPABLE_CHANGE: PTP Neighbor of [chars] changed to IEEE 802.1AS not capable, [chars] % PRId64

Explanation  802.1 AS capability of neighbor at interface changed to no

Recommended Action  No action is required.

Error Message  PTP-5-PTP_DISABLED: PTP disabled

Explanation  PTP Service Enabled

Recommended Action  No action is required.

Error Message  PTP-5-PTP_DOMAIN_CHANGE: PTP domain changed to [dec]

Explanation  PTP domain changed

Recommended Action  No action is required.

Error Message  PTP-5-PTP_ENABLED: PTP enabled

Explanation  PTP Service Enabled

Recommended Action  No action is required.

Error Message  PTP-5-PTP_ENCAP_CHANGE: PTP encapsulation is changed to '[chars]'

Explanation  PTP encapsulation is changed

Recommended Action  No action is required.

Error Message  PTP-5-PTP_INCORRECT_PACKET_ON_SLAVE: Incorrect delay response packet received on slave interface [chars] by [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]. Source Port Identity is [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]. Requesting Port Identity is [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]

Explanation  Incorrect delay response packet

Recommended Action  No action is required.

Error Message  PTP-5-PTP_MODE_CHANGE: PTP mode is changed to '[chars]'

Explanation  PTP mode is changed

Recommended Action  No action is required.

Error Message  PTP-5-PTP_PROP_DELAY_THRESH_CHANGE: PTP propagation-delay threshold is changed to [dec] for '[chars]'

Explanation  PTP propagation-delay threshold is changed

Recommended Action  No action is required.

PTP-6

Error Message  PTP-6-PTP_ANNOUNCE_INTERVAL_CHANGE_OLD: PTP announce interval for [chars] changed to [dec]

Explanation  PTP announce interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_ANNOUNCE_INTERVAL_CHANGE: PTP announce interval for [chars] changed to [dec][chars]

Explanation  PTP announce interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_ANNOUNCE_TIMEOUT_CHANGE_OLD: PTP announce timeout interval for [chars] changed to [dec]

Explanation  PTP announce timeout interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_ANNOUNCE_TIMEOUT_CHANGE: PTP announce timeout interval for [chars] changed to [dec][chars]

Explanation  PTP announce timeout interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_DELAY_REQ_INTERVAL_CHANGE_OLD: PTP delay-req interval for [chars] changed to [dec]

Explanation  PTP delay-req interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_DELAY_REQ_INTERVAL_CHANGE: PTP delay-req interval for [chars] changed to [dec][chars]

Explanation  PTP delay-req interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_PRIORITY1_CHANGE: PTP priority1 changed to [dec]

Explanation  PTP priority1 changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_PRIORITY2_CHANGE: PTP priority2 changed to [dec]

Explanation  PTP priority2 changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_SYNC_INTERVAL_CHANGE_OLD: PTP sync interval for [chars] changed to [dec]

Explanation  PTP sync interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_SYNC_INTERVAL_CHANGE: PTP sync interval for [chars] changed to [dec][chars]

Explanation  PTP sync interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_TIMESYNC_REG_CHANGE: PTP time-sync register changed

Explanation  PTP time-sync reg change

Recommended Action  No action is required.

Error Message  PTP-6-PTP_VLAN_CHANGE: PTP vlan for [chars] changed to [dec]

Explanation  PTP vlan for [chars] changed

Recommended Action  No action is required.

QOS Messages

This section contains the QOS messages.

QOS-2

Error Message  QOS-2-EXITING: Exit reason: [chars]

Explanation  The QOS Manager process has exited due to [char]. The process has probably been restarted automatically.

Recommended Action  No action is required.

Error Message  QOS-2-GENERAL_ERROR: [chars]

Explanation  The QOS Manager has encountered an critical error. The description of error is [str.].

Recommended Action  No action is required.

Error Message  QOS-2-INITFAIL: QoS Manager Initialization failed: [chars]

Explanation  QoS Manager initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  QOS-2-MALLOC_ERROR: Size [dec] bytes

Explanation  The QOS Manager could not allocate memory.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  QOS-2-PSS_ERROR: [chars]: PSS returned value=[dec]

Explanation  The QOS Manager encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

Error Message  QOS-2-STDOUT_ROTATE_FAILURE: Failed to rotate stdout file: [chars]

Explanation  The QOS Manager has failed to rotate its current stdout file with filename [str.]. The file size could grow beyond its maximum limit.

Recommended Action  No action is required.

QOS-3

Error Message  QOS-3-ALLOCFAIL: Heap Memory allocation failed: [chars]

Explanation  QoS Manager is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-DBERROR: [chars]

Explanation  QoS Manager encountered a database error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-E_PORT_ACL_FAILURE: Failed to [chars] QOS ACL for interface [chars] (ACL return code=0x[hex])

Explanation  The QOS Manager has failed to program or erase QoS related ACL when an E-Port came up or went down for interface [str.]. The error code returned by ACL module is [int.].

Recommended Action  No action is required.

Error Message  QOS-3-FAILURE_RESPONSE: [chars] 0x[hex]

Explanation  QoS Manager failed to get response [chars][hex] specify the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-GENERROR: [chars]

Explanation  QoS Manager encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  QOS-3-LICERR: [chars]

Explanation  QoS Manager failed to get license.

Recommended Action  No action is required.

Error Message  QOS-3-MTSERROR: [chars]

Explanation  QoS Manager encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  QOS-3-PSSERROR: [chars]

Explanation  QoS Manager encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-QOS_PSS_CORRUPTED: [chars] PSS found corrupted

Explanation  The QOS Manager has detected corruption in one of its persistent information database. The database would be recreated.

Recommended Action  No action is required.

Error Message  QOS-3-TIMEOUT_ERROR: [chars] 0x[hex]

Explanation  QoS Manager encountered a timeout [chars][hex] specify the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-UNKNOWN_MSG: Received from Node=[dec] SAP=[dec]

Explanation  The QOS Manager has received an unknown message from [dec]].[dec]. This information is for debugging only.

Recommended Action  No action is required.

QOS-4

Error Message  QOS-4-LICEXP: [chars]

Explanation  QoS Manager license is going to expire. [chars] gives the expected time of expiry.

Recommended Action  No action is required.

Error Message  QOS-4-PSS_VERSION_MISMATCH: PSS [dec] Code [dec]

Explanation  There was a version mismatch between the QOS Manager and one of its persistent storage databases. The persistent information has been translated to the new format.

Recommended Action  No action is required.

QOS-6

Error Message  QOS-6-BECAME_ACTIVE: Became ACTIVE from standby mode.

Explanation  The QOS Manager on the standby supervisor became active and it is ready to serve client requests.

Recommended Action  No action is required.

Error Message  QOS-6-BECAME_STDBY: Became STANDBY from active mode.

Explanation  The QOS Manager became standby from active mode.

Recommended Action  No action is required.

Error Message  QOS-6-DISABLED_UP_MARKING: [chars]

Explanation  The QoS Manager has disabled marking of time-critical control traffic as high-priority traffic. Priority of such traffic is now not altered by QoS Manager.

Recommended Action  No action is required.

Error Message  QOS-6-ENABLED_UP_MARKING: [chars]

Explanation  The QoS Manager has enabled marking of time-critical control traffic as high-priority traffic.

Recommended Action  No action is required.

Error Message  QOS-6-EXCESSIVE_DELAY: [chars]

Explanation  Excessive time taken for a processing event. The description of the event is [str.].

Recommended Action  No action is required.

Error Message  QOS-6-E_PORT_ACL_SUCCESS: Successfully [chars] QOS ACL for interface [chars]

Explanation  The QOS Manager has successfully programmed or erased QoS related ACL when an E-Port came up or went down for interface [str.].

Recommended Action  No action is required.

Error Message  QOS-6-FAILED_TO_SEND_HEARTBEAT: Failed to send heartbeat to system manager: Reason=[chars]

Explanation  The QOS Manager was unable to send heartbeat to the system manager.

Recommended Action  No action is required.

Error Message  QOS-6-GENERAL_EVENT: [chars]

Explanation  The QOS Manager has generated an important event. The description of the event is [str.].

Recommended Action  No action is required.

Error Message  QOS-6-MGRCREATED: QoS Manager created

Explanation  QoS Manager was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  QOS-6-MGREXIT: QoS Manager shutting down gracefully

Explanation  QoS Manager is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  QOS-6-PSS_CREATED: [chars] PSS Created

Explanation  One of the persistent information database of QOS Manager has been recreated.

Recommended Action  No action is required.

Error Message  QOS-6-PSS_DESTROYED: [chars] PSS Destroyed

Explanation  One of the persistent information databases of QoS Manager has been intentionally destroyed and would be recreated.

Recommended Action  No action is required.

Error Message  QOS-6-SERVICE_UP: Initialized [chars]

Explanation  The QOS Manager is up and ready to accept client requests The service was initialized in [char] mode.

Recommended Action  No action is required.

Error Message  QOS-6-SWITCHOVER: Switching Over to other Supervisor.

Explanation  The QOS Manager has successfully switched over to the standby supervisor card.

Recommended Action  No action is required.

Error Message  QOS-6-UNKNOWNMTS: QoS Manager received an unexpected message

Explanation  QoS Manager received an unexpected message.

Recommended Action  No action is required.

QUACK_SMC Messages

This section contains the QUACK_SMC messages.

QUACK_SMC-6

Error Message  QUACK_SMC-6-QUACK_LIB_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

RADIUS Messages

This section contains the RADIUS messages.

RADIUS-2

Error Message  RADIUS-2-RADIUS_NO_AUTHEN_INFO: ASCII authentication not supported

Explanation  ASCII authentication not supported.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RADIUS-2-RADIUS_PROGRAM_EXIT: RADIUS daemon exiting: [chars]

Explanation  RADIUS daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RADIUS-3

Error Message  RADIUS-3-RADIUS_ERROR_MESSAGE: [chars]

Explanation  RADIUS Error Message

Recommended Action  No action is required.

RADIUS-4

Error Message  RADIUS-4-RADIUS_WARNING: [chars]

Explanation  RADIUS Warning

Recommended Action  No action is required.

RADIUS-5

Error Message  RADIUS-5-RADIUS_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Radius server monitor status change

Recommended Action  No action is required.

Error Message  RADIUS-5-RADIUS_NOTIFICATION: [chars]

Explanation  RADIUS Notification

Recommended Action  No action is required.

Error Message  RADIUS-5-RADIUS_SERVER_STATUS: [chars] server [chars] with auth-port [dec] and acct-port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Radius server status change

Recommended Action  No action is required.

RADIUS-6

Error Message  RADIUS-6-RADIUS_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  RADIUS-6-RADIUS_MESSAGE: [chars]

Explanation  RADIUS Message

Recommended Action  No action is required.

RPM Messages

This section contains the RPM messages.

RPM-2

Error Message  RPM-2-PPF_SES_VERIFY_DETAIL: PPF session verify failed on interface [chars]

Explanation  RPM encountered an error while pushing PBR policy changes to PBR clients during PPF Verify

Recommended Action  ACTION_REPORT_CS

Error Message  RPM-2-RPM_SYSLOG_LIC_ALERT: If you have enabled this feature in error, please disable the feature. If you have not purchased the license, please contact your Cisco account team to order the license. It is in violation of Cisco's Terms of Use to use this feature without purchasing the license

Explanation  License violation alert

Recommended Action  Please install the license file to continue using the feature.

Error Message  RPM-2-RPM_SYSLOG_LIC_HONOUR_BASED: System supports honor based license.Feature will be enabled and fully functional. License usage for feature will appear after license install and a reload.

Explanation  Honour based licensing

Recommended Action  Please install the license file to continue using the feature.

Error Message  RPM-2-RPM_SYSLOG_LIC_NOT_FOUND: !!!!!! WARNING: '[chars]' LICENSE NOT FOUND ON THE SYSTEM !!!!!!. You have tried to enable a licensed feature [[chars]] without installing the '[chars]' license, which has not been found on the system.

Explanation  License not found on the system

Recommended Action  Please install the license file to continue using the feature.

SAL Messages

This section contains the SAL messages.

SAL-5

Error Message  SAL-5-SAL_DISABLED: SAL Disabled

Explanation  SAL Service Disabled

Recommended Action  No action is required.

Error Message  SAL-5-SAL_ENABLED: SAL Enabled

Explanation  SAL Service nabled

Recommended Action  No action is required.

SCHEDULER Messages

This section contains the SCHEDULER messages.

SCHEDULER-2

Error Message  SCHEDULER-2-SCH_SYSLOG_MALLOC_ERR: Out of memory: [chars]

Explanation  Process memory exhausted. Possible memory leak.

Recommended Action  Contact TAC

Error Message  SCHEDULER-2-SCH_SYSLOG_MTS_ERR: MTS error: [chars]

Explanation  MTS operation failure

Recommended Action  Contact TAC

Error Message  SCHEDULER-2-SCH_SYSLOG_PSS_SNAPSHOT_ERR: Source URI:[chars] Destination URI:[chars] errcode:[dec]

Explanation  Error while performing snapshot I/O to PSS

Recommended Action  Contact TAC

Error Message  SCHEDULER-2-SCH_SYSLOG_SDWRAP_ERR: Debug infrastructure initialization failed: [chars]

Explanation  Debug infrastructure failed to initialize

Recommended Action  Contact TAC

SCHEDULER-3

Error Message  SCHEDULER-3-SCH_ERR: [chars]

Explanation  Scheduler error

Recommended Action  No action is required.

Error Message  SCHEDULER-3-SCH_SYSLOG_FILE_ERR: [chars] Error:[chars]

Explanation  File handling error

Recommended Action  No action is required.

Error Message  SCHEDULER-3-SCH_SYSLOG_PSS_ERR: Purpose:[chars] URI:[chars] Error:[dec]

Explanation  Error while performing I/O to PSS

Recommended Action  Contact TAC

Error Message  SCHEDULER-3-SCH_SYSLOG_USER_ERR: Description: Failed to execute job for user id [chars] Error:[dec]

Explanation  Error while attempting to execute job for user. Possibly, the user is removed from the system.

Recommended Action  Ensure the user exists. Make sure he is not a remotely authenticated user.

SCHEDULER-4

Error Message  SCHEDULER-4-SCH_WARN: [chars]

Explanation  Scheduler warning

Recommended Action  No action is required.

SCHEDULER-6

Error Message  SCHEDULER-6-SCH_MSG: [chars]

Explanation  Scheduler Message

Recommended Action  No action is required.

SECURITYD Messages

This section contains the SECURITYD messages.

SECURITYD-2

Error Message  SECURITYD-2-CONSENT_TOKEN_ERROR_MESSAGE: CT_ERROR : [chars]

Explanation  Consent-token error message

Recommended Action  No action is required.

Error Message  SECURITYD-2-FEATURE_ENABLE_DISABLE: User [chars] has [chars] the feature [chars]

Explanation  User has enabled or disabled the feature

Recommended Action  No action is required.

Error Message  SECURITYD-2-FEATURE_NXAPI_ENABLE: Feature nxapi is being enabled [chars]

Explanation  Feature nxapi has been enabled with https and the http port is disabled

Recommended Action  To enable http access to the device, please configure 'nxapi http port '

Error Message  SECURITYD-2-FIPS_BYPASS_SELF_TEST_STATUS: FIPS Bypass self-test status : [chars]

Explanation  Status of FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_CRNG_SELF_TEST_STATUS: FIPS CRNG self-test status : [chars]

Explanation  Status of FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_CRYPTO_SELF_TEST_STATUS: FIPS [chars] Crypto self-test status : [chars]

Explanation  Status of FIPS [chars] self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_IMAGE_INTEGRITY_SELF_TEST_STATUS: FIPS Image Integrity self-test status : [chars]

Explanation  Status of FIPS [chars] self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_ERROR_MSG: [chars]

Explanation  Fips post Error Message

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_MAINTENANCE: FIPS Test failed. Moving to maintenance mode

Explanation  FIPS Test failed. Moving to maintenance mode

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_TEST_FAILED: FIPS crypto-test failure : [dec]

Explanation  FIPS crytpo-test failed [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POWERUP_SELF_TESTS_STATUS: FIPS power-up self-test status: [chars]

Explanation  Status FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POWERUP_SELF_TEST_STATUS: FIPS [chars] power-up self-test status : [chars]

Explanation  Status of FIPS [chars] power-up self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_SELF_TEST_FAILED: FIPS self-test failure : [chars] : [chars]

Explanation  FIPS self-test failed [chars] for service [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-INVALID_ADMIN_PASSWD: User admin has NULL password. Copy r s aborted

Explanation  User admin has NULL password. Copy r s aborted

Recommended Action  No action is required.

Error Message  SECURITYD-2-PROGRAM_EXIT: security/accounting daemon exiting: [chars]

Explanation  Security/accounting daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

SECURITYD-3

Error Message  SECURITYD-3-NVRAMFAILURE: nvram failure

Explanation  Nvram can not be read/written to. Hence accounting log can not be stored there

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SECURITYD-3-USERPASSPHRASE_TIMEVALUE_FAIL: Update timevalue for user: [chars] [FAIL]

Explanation  Update timevalue for [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

SECURITYD-6

Error Message  SECURITYD-6-ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  SECURITYD-6-CHANGE_PASSWD: changing passwd for [chars]

Explanation  Changing passwd for [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-DELETE_STALE_USER_ACCOUNT: deleting expired user account:[chars]

Explanation  Deleting expired user account of [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_MODE_SET_FAILED: Error when setting FIPS mode : [chars]

Explanation  FIPS mode failed [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_MODE_SET: FIPS mode is [chars] for service [chars]

Explanation  FIPS mode is changed [chars] [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_POST_INFO_MSG: [chars]

Explanation  Fips post Information Message

Recommended Action  No action is required.

SEGMENT-ROUTING Messages

This section contains the SEGMENT-ROUTING messages.

SEGMENT-ROUTING-1

Error Message  SEGMENT-ROUTING-1-INIT: [chars] failed

Explanation  SR process initialization failed.

Recommended Action  Restart OSPF process

Error Message  SEGMENT-ROUTING-1-SRGB_CLEANUP: [chars] failed

Explanation  SRGB cleanup from PIB failed.

Recommended Action  Restart client processes

SEGMENT-ROUTING-2

Error Message  SEGMENT-ROUTING-2-SRGB_INVALID_RANGE: Segment routing global block [dec] - [dec] not supported, reverting to global block [dec] - [dec]

Explanation  Segment routing global block is not supported, default range will be used

Recommended Action  Configure segment routing global block within supported range

SEGMENT-ROUTING-3

Error Message  SEGMENT-ROUTING-3-INT_ERR: Internal Error [chars]

Explanation  Internal Error happened

Recommended Action  No action is required.

Error Message  SEGMENT-ROUTING-3-MTS_BIND: Error returned from mts_bind(), errno: [chars]

Explanation  SRAPP called a MTS API which returned an error.

Recommended Action  No action is required.

Error Message  SEGMENT-ROUTING-3-PFX_CONF_ERR: Configuration for Prefix/sid: [chars]/[dec]([chars]) invalid

Explanation  Config Error happened

Recommended Action  No action is required.

SEGMENT-ROUTING-5

Error Message  SEGMENT-ROUTING-5-STATE_CHANGE: Segment-routing [chars]

Explanation  SR state change

Recommended Action  No action is required.

SENSOR_USD Messages

This section contains the SENSOR_USD messages.

SENSOR_USD-2

Error Message  SENSOR_USD-2-SNSM_SYSLOG_INIT_FAILED: Sensor Mgr Initialization failed. Component [chars]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-2-SNSM_SYSLOG_SHUTDOWN: Sensor Mgr process shutting down: [chars]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-2-SNSM_SYSYLOG_ALLOC_MEMORY: Sensor Mgr Memory allocation failed

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

SENSOR_USD-3

Error Message  SENSOR_USD-3-MSG_SNSM_SYS_MEM_ALOC_FAILURE: Sensor Mgr Error in allocing mem: [dec], Error code = [dec]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_API_CALL_FAILURE: Sensor Mgr Error in [chars] call errno=[dec]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYSLOG_BAD_MTS_MSG: Sensor Mgr Received bad MTS message: [dec]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYSLOG_MTS_PROCESS_ERROR: Sensor Mgr Error in processing MTS message: [dec], Error code = 0x[hex]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYS_DEQUE_PENDING_QUE_FAILURE: Sensor Mgr Error in Dequing pend Que: [hex], Error code = 0x[hex]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYS_ENQUE_PENDING_QUE_FAILED: Sensor Mgr Error in queuing to pending queue: [hex], Error code = 0x[hex]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYS_MTS_RECV_FAILURE: Sensor Mgr Error in receving MTS mesg

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

SENSOR_USD-5

Error Message  SENSOR_USD-5-SNSM_SYSLOG_STARTING: Sensor Mgr process started

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

SESSION-MGR Messages

This section contains the SESSION-MGR messages.

SESSION-MGR-2

Error Message  SESSION-MGR-2-DB_UNLOCK_FAILED: Failed to unlock the database for session:[chars]

Explanation  Session-Manager failed to unlock the database for session: [chars]

Recommended Action  No action is required.

SESSION-MGR-3

Error Message  SESSION-MGR-3-CSM_CFS_SEND_FAILED: CFS send failed. Error: '[chars]' '(0x[hex])'

Explanation  CFS send status

Recommended Action  No action is required.

Error Message  SESSION-MGR-3-CSM_SP_DEL_FAILED: Switch-profile delete failed: '[chars]'

Explanation  Switch-profile deletion

Recommended Action  No action is required.

Error Message  SESSION-MGR-3-CSM_SP_PEER_TIMEOUT: Peer timed-out in sending next request

Explanation  Peer timeout

Recommended Action  No action is required.

Error Message  SESSION-MGR-3-SSN_ALLOC_FAILED: Failed in File:[chars] Line:[dec] for type [dec] size [dec]

Explanation  Session-mgr process could not allocate heap memory in File:[chars], at line:[dec], for memory-type:[dec] of Size:[dec]

Recommended Action  No action is required.

SESSION-MGR-4

Error Message  SESSION-MGR-4-CSM_COMMIT_FAILED: Commit failed for switch-profile '[chars]' Session Type: '[chars]'

Explanation  Commit failed for the switch-profile

Recommended Action  Please identify the cause of the error and fix it

Error Message  SESSION-MGR-4-CSM_CREATE_CHECKPOINT_FAILED: Create-checkpoint failed: Name:'[chars]', retval: '0x[hex]'

Explanation  Create-checkpoint status

Recommended Action  No action is required.

Error Message  SESSION-MGR-4-CSM_DELETE_PROFILE_FAILED: Switch-profile deletion failed switch-profile '[chars]' Session type:'[chars]'

Explanation  Switch-profile deletion failed for the switch-profile

Recommended Action  Please identify the cause of the error and fix it

Error Message  SESSION-MGR-4-CSM_DEL_CHECKPOINT_FAILED: Del-checkpoint failed: Name:'[chars]'

Explanation  Del-checkpoint status

Recommended Action  No action is required.

Error Message  SESSION-MGR-4-CSM_FILE_BASED_ROLLBACK_FAILED: File-based rollback failed: Switch profile:'[chars]'

Explanation  File-based rollback status

Recommended Action  No action is required.

Error Message  SESSION-MGR-4-CSM_PEER_INFO_NOT_FOUND: Peer [chars] is not yet configured in the switch-profile '[chars]'

Explanation  This peer is not yet configured in the switch-profile

Recommended Action  Please configure the peer in the switch-profile

Error Message  SESSION-MGR-4-CSM_ROLLBACK_FAILED: Rollback failed: Switch profile:'[chars]'

Explanation  Rollback status

Recommended Action  No action is required.

Error Message  SESSION-MGR-4-CSM_VERIFY_FAILED: Verification failed for switch-profile '[chars]' Session type: '[chars]'

Explanation  Verification failed for the switch-profile

Recommended Action  Please identify the cause of the error and fix it

Error Message  SESSION-MGR-4-ISSU_FAILED: [chars] :0x[hex]

Explanation  Session manager failed ISSU because of:[string] and error: [hex]

Recommended Action  No action is required.

SESSION-MGR-6

Error Message  SESSION-MGR-6-CSM_CREATE_CHECKPOINT_SUCCESS: Create-checkpoint success: Name:'[chars]', checkpoint_id: '[dec]'

Explanation  Create-checkpoint status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_DEL_CHECKPOINT_SUCCESS: Delete-checkpoint successful: Name:'[chars]'

Explanation  Del-checkpoint status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_FILE_BASED_ROLLBACK_SUCCESS: File-based rollback successful: Switch profile:'[chars]'

Explanation  File-based rollback status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_LOCAL_SESSION_COMPLETE: [chars]: Name '[chars]' Type:'[chars]' Subtype:'[chars]' Local status:'[chars]'

Explanation  Completed local session info

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_ROLLBACK_SUCCESS: Rollback successful: Switch profile:'[chars]'

Explanation  Rollback status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SESSION_COMPLETE: [chars]: Name '[chars]' Type:'[chars]' Subtype:'[chars]' Local status:'[chars]' Peer:'[chars]' Peer status:'[chars]'

Explanation  Completed session info

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SESSION_INIT: Initiating a session. [chars]: Profile name:'[chars]' Type:'[chars]' Subtype:'[chars]' Peer [chars]

Explanation  Iniitating a session

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_DELETE_IN_PROGRESS: Switch-profile delete in progress: switch-profile: '[chars]'

Explanation  Switch-profile delete status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_DEL_SUCCESS: Switch-profile delete succeeded: '[chars]'

Explanation  Switch-profile deletion

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_LOCAL_DELETE: [chars]: Name '[chars]' Type:'[chars]' Subtype:'[chars]' Peer:'[chars]'

Explanation  Received switch-profile delete local-config

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_PEER_ADD: Received peer-add for peer-ip: '[chars]'

Explanation  Peer addition

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_PEER_DEL: Received peer-delete for peer-wwn: '[chars]'

Explanation  Peer deletion

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_REMOTE_PEER_DELETE: Peer has been unconfigured on remote switch: Peer-ip: '[chars]'

Explanation  Received peer delete from remote switch

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_UNKNOWN_SESSION_TYPE: Attempt to initiate unknown session. Profile name:'[chars]' Type:'[dec]' Subtype:'[dec]' Peer:'[chars]'

Explanation  Iniitating a session

Recommended Action  No action is required.

SKSD Messages

This section contains the SKSD messages.

SKSD-2

Error Message  SKSD-2-SKSD_CRYPT_SERVICE_CRIT: Encryption-Service: [chars]

Explanation  Encryption Service critical errors.

Recommended Action  No action is required.

SKSD-3

Error Message  SKSD-3-SKSD_CRYPT_SERVICE_ERR: Encryption-Service: [chars]

Explanation  Encryption Service errors.

Recommended Action  No action is required.

Error Message  SKSD-3-SKSD_FIPS_MODE_INIT_ERROR: Could not initialize FIPS mode : [chars]

Explanation  FIPS mode initialization error

Recommended Action  No action is required.

Error Message  SKSD-3-SKSD_FIPS_MODE_SELFTEST: FIPS POST for [chars] [chars]

Explanation  FIPS Selftest Result

Recommended Action  No action is required.

SKSD-4

Error Message  SKSD-4-SKSD_CRYPT_SERVICE_WARN: Encryption-Service: [chars]

Explanation  Encryption Service warnings.

Recommended Action  No action is required.

SKSD-5

Error Message  SKSD-5-SKSD_CRYPT_SERVICE_NOTICE: Encryption Service: [chars]

Explanation  Encryption Service updates.

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_EXIT: Keystore Application Exiting: [chars]

Explanation  Keystore Program exiting

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_FUNC: Keystore Operation: [chars]

Explanation  Keystore Event upon a receiving a request

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW_INIT: Hardware Keystore Init done

Explanation  Hardware Keystore Init completed

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW_RESET: Hardware Reset :[chars]

Explanation  Hardware Reset

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW: Smartcard :[chars]

Explanation  Smartcard Presence

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_INIT: Keystore Application Init: [chars]

Explanation  Keystore Program Init

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_KEY_ADD: Key added

Explanation  Key added to keystore

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_KEY_DELETE: Key deleted

Explanation  Key deleted from keystore

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_MKEY_INSTALL: Installing a Master Key on the smartcard(s)

Explanation  Installing a new Master Key on the smartcard(s)

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_SUP_STATE: Supervisor card new state: [dec]

Explanation  Supervisor state change

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_SW_INIT: Software Keystore Init done

Explanation  Software Keystore Init completed

Recommended Action  No action is required.

SKSD-6

Error Message  SKSD-6-SKSD_CRYPT_SERVICE_INFO: Encryption Service: [chars]

Explanation  Encryption Service informational updates.

Recommended Action  No action is required.

SNMPD Messages

This section contains the SNMPD messages.

SNMPD-1

Error Message  SNMPD-1-ALERT: SNMP log alert : [chars]

Explanation  SNMP log alert message.

Recommended Action  No action is required.

SNMPD-2

Error Message  SNMPD-2-CRITICAL: SNMP log critical : [chars]

Explanation  SNMP log critical message.

Recommended Action  No action is required.

SNMPD-3

Error Message  SNMPD-3-ERROR: SNMP log error : [chars]

Explanation  SNMP log error message.

Recommended Action  No action is required.

SNMPD-4

Error Message  SNMPD-4-WARNING: SNMP log warning : [chars]

Explanation  SNMP log warning message.

Recommended Action  No action is required.

SNMPD-5

Error Message  SNMPD-5-NOTIFICATION: SNMP log notification : [chars]

Explanation  SNMP log notification message.

Recommended Action  No action is required.

SNMPD-6

Error Message  SNMPD-6-INFO: SNMP log informational : [chars]

Explanation  SNMP log info message.

Recommended Action  No action is required.

SNMPD-7

Error Message  SNMPD-7-DEBUG: SNMP log debugging : [chars]

Explanation  SNMP log debug message.

Recommended Action  No action is required.

SPAN Messages

This section contains the SPAN messages.

SPAN-2

Error Message  SPAN-2-MEM_FULL: Memory allocation failed

Explanation  Memory allocation failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

SPAN-3

Error Message  SPAN-3-IPC_FAIL: IPC Error

Explanation  Internal IPC error

Recommended Action  No action is required.

Error Message  SPAN-3-SYSINFO_TIMEOUT: Span timed out waiting for response from port manager for sys info

Explanation  Span request for critical system information from port manager timed out. So, span on the new active is exiting and system manager will restart Span.

Recommended Action  No action is required.

SPAN-5

Error Message  SPAN-5-ATL_VSAN_DEFAULT_ALL: Default to all VSANs for SPAN egress session

Explanation  Generation 2 fabric switches support only one VSAN filter for egress SPAN session. If no or more than one VSANs are specified, SPAN will default to use all VSANs for the egress SPAN session

Recommended Action  No action is required.

Error Message  SPAN-5-SPAN_CFG_REJECT_SRC_VSAN_FILTER_NOT_SUPPORTED: Source interface [[chars]] in dir [[chars]] removed from session [[dec]].

Explanation  Interface level VSAN filters is not supported

Recommended Action  No action is required.

Error Message  SPAN-5-SPAN_CFG_REJECT_VSAN_SRC_PRESENT: Source VSAN [[dec]] removed from session [[dec]].

Explanation  Source VSANs are removed from the session as mixing of interface and VSANs is not supported.

Recommended Action  No action is required.

Error Message  SPAN-5-SPAN_PSS_CORRUPTION: Span is starting stateless due to PSS corruption

Explanation  Due to unrecoverable PSS corruption error, SPAN starts stateless without any configuration

Recommended Action  No action is required.

Error Message  SPAN-5-SPAN_PVLAN_SRC: Private vlan source is not supported in monitor session.

Explanation  Private vlan source not supported in span/erspan sessions.

Recommended Action  No action is required.

Error Message  SPAN-5-STATELESS_RESTART_ON_ACTIVE: Span is restarting as Span on active sup was restarted stateless.

Explanation  Due to unrecoverable error, Span on active supervisor was restarted stateless. So, the standby Span restarts to get in sync with the stateless Span on active.

Recommended Action  No action is required.

Error Message  SPAN-5-STATELESS_RESTART: Span is restarting stateless.

Explanation  Due to unrecoverable error, Span is starting stateless. The currently active sessions will not be preserved. The user will have to reenter all the configuration.

Recommended Action  No action is required.

SPAN-6

Error Message  SPAN-6-SESSION_DOWN: Session [dec] is inactive ([chars])

Explanation  Session [dec] is inactive now. Traffic for this session is no longer spanned

Recommended Action  Check the reason for session inactive using command 'show span session' and take corresponding action.

Error Message  SPAN-6-SESSION_UP: Session [dec] is active, destination SD port [chars]

Explanation  Session [dec] is active now. You can monitor Spanned traffic at the destination SD port

Recommended Action  No action is required.

Error Message  SPAN-6-STATELESS_SWITCHOVER: Span is starting stateless after switchover.

Explanation  Active sessions are not preserved across switchover. Span is starting stateless and the configuration will be reapplied to get back the active configuration.

Recommended Action  No action is required.

STP Messages

This section contains the STP messages.

STP-2

Error Message  STP-2-BLOCK_BPDUGUARD: Received BPDU on port [chars] with BPDU Guard enabled. Disabling port.

Explanation  A BPDU was received in the interface specified in the error message that has the spanning tree BPDU Guard feature enabled. As a result, the interface was administratively shut down.

Recommended Action  Either remove the device sending BPDUs or disable the BPDU Guard feature. The BPDU Guard feature can be locally configured on the interface or globally configured on all ports that have portfast enabled. After the conflict has been resolved, re-enable the interface by entering the no shutdown command in interface configuration mode.

Error Message  STP-2-BLOCK_DETECTED_PVST_PEER: Blocking port [chars] [PVST peer detected].

Explanation  The listed interface received SSTP BPDU indicating that peer is running PVST and will be held in spanning tree blocking state until the interface stops receiving SSTP BPDUs

Recommended Action  Either enable PVST simulation configuration for the interface or make sure the port peer is not PVST switch

Error Message  STP-2-BLOCK_PVID_LOCAL: Blocking [chars] on [chars]. Inconsistent local vlan.

Explanation  The spanning tree port associate with the listed spanning tree instance and interface will be held in spanning tree blocking state until the Port VLAN ID (PVID) inconsistency is resolved. The listed spanning tree instance is that of the native VLAN id of the listed interface.

Recommended Action  Verify that the configuration of the native VLAN id is consistent on the interfaces on each end of the 802.1Q trunk connection. Once corrected, spanning tree will automatically unblock the interfaces as appropriate.

Error Message  STP-2-BLOCK_PVID_PEER: Blocking [chars] on [chars]. Inconsistent peer vlan.

Explanation  The spanning tree port associate with the listed spanning tree instance and interface will be held in spanning tree blocking state until the port VLAN Id (PVID) inconsistency is resolved. The listed spanning tree instance is that of the native VLAN id of interface on the peer switch to which the listed interface is connected.

Recommended Action  Verify that the configuration of the native VLAN id is consistent on the interfaces on each end of the 802.1Q trunk connection. Once corrected, spanning tree will automatically unblock the interfaces as appropriate.

Error Message  STP-2-BRIDGE_ASSURANCE_BLOCK: Bridge Assurance blocking port [chars] [chars].

Explanation  BPDUs were not received from a neighboring switch on the interface that has spanning tree Bridge Assurance configured. As a result, the interface was moved to the spanning tree Blocking state

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-BRIDGE_ASSURANCE_UNBLOCK: Bridge Assurance unblocking port [chars] [chars].

Explanation  The interface listed in the message has been restored to normal spanning tree state after receiving BPDUs from the neighboring L2 switch/bridge

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-BRIDGE_ASSURANCE_WARNING: Bridge Assurance MUST be enabled at the remotely connected interface

Explanation  Bridge Assurance MUST be enabled at the remotely connected interface

Recommended Action  Enable it on Peer-link.

Error Message  STP-2-DISPUTE_CLEARED: Dispute resolved for port [chars] on [chars].

Explanation  The listed interface has stopped receiving Inferior BPDUs with designated role and state as learning and/or forwarding. The Dispute has been resolved and if the port is still designated, it will be taken out of the blocking state as and when appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-DISPUTE_DETECTED: Dispute detected on port [chars] in [chars] from Bridge ID [chars] source MAC [chars] PVID [dec]

Explanation  The spanning tree has detected a Dispute on this interface. The BPDU received from the peer is Inferior with designated role and state as learning and/or forwarding. Since this condition could be caused by an unidirectional link failure, the interface is put into blocking state and marked as disputed in order to prevent possible loops from being created

Recommended Action  Issue the show spanning-tree inconsistentports command to review the list of interfaces with Dispute. Dispute is caused if the peer in not receiving the Superior BPDUs sent by this interface. That is why the peer continues to send its own Inferior BPDUs. Determine why devices connected to the listed ports are not receiving BPDUs. One reason could be a failure in the cable: if the link has a failure that makes it unidirectional (you can not transmit but you can receive) it should be replaced with a proper cable.

Error Message  STP-2-IPC_PROCESSING_ERR: Error in processing IPC message : Opcode = [dec], Error code = [hex]

Explanation  STP encountered an error in processing an MTS message. The error and message are specified in the error message

Recommended Action  No action is required.

Error Message  STP-2-L2GW_BACKBONE_BLOCK: L2 Gateway Backbone port inconsistency blocking port [chars] on [chars].

Explanation  A BPDU was received on the listed interface which advertises a superior spanning tree root bridge to that currently in use. The interface is put into blocking state and marked as L2 Gateway Backbone port inconsistent in order to prevent a suboptimal spanning tree topology to form.

Recommended Action  Issue the show spanning-tree inconsistentports command to review the list of interfaces with L2 Gateway Backbone port inconsistencies. Determine why devices connected to the listed ports are sending BPDUs with a superior root bridge and take action to prevent further occurances. Once the bogus BPDUs have been stopped, the interfaces will automatically recover and resume normal operation.

Error Message  STP-2-L2GW_BACKBONE_UNBLOCK: L2 Gateway Backbone port inconsistency cleared unblocking port [chars] on [chars].

Explanation  The listed interface is no longer receiving BPDUs advertizing a superior root bridge. The L2 Gateway Backbone port inconsistency is cleared for the interface and then it is taken out of the blocking state if appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-LOOPGUARD_BLOCK: Loop guard blocking port [chars] on [chars].

Explanation  The spanning tree message age timer has expired because and no BPDUs were received from the designated bridge. Since this condition could be caused by an unidirectional link failure, the interface is put into blocking state and marked as loop guard inconsistent in order to prevent possible loops from being created

Recommended Action  Issue the show spanning-tree inconsistentports command to review the list of interfaces with loop guard inconsistencies. Determine why devices connected to the listed ports are not sending BPDUs. One reason could be that they do not run the spanning tree protocol; in this case you should disable loopguard in the inconsistent interface/s or start the spanning tree protocol on the other side of the link/s.depending on the context. Another reason could be a failure in the cable: if the link has a failure that makes it unidirectional (you can transmit but you can not receive) it should be replaced with a proper cable.

Error Message  STP-2-LOOPGUARD_CONFIG_CHANGE: Loop guard [chars] on port [chars].

Explanation  The spanning tree loopguard configuration for the listed interface has been changed. If enabled, the interface will be put into blocking state and marked as loopguard inconsistent when the message age timer expires because no BPDU were received from the designated bridge. This feature is mainly used to detect unidirectional links

Recommended Action  Verify that this is the desired configuration for the listed interface. Correct it if this is not the desired configuration otherwise no further action is required.

Error Message  STP-2-LOOPGUARD_UNBLOCK: Loop guard unblocking port [chars] on [chars].

Explanation  The listed interface has received a BPDU and therefore if the inconsistency was due to an unidirectional link failure, now the problem is not there anymore. The loop guard inconsistency is cleared for the interface which is taken out of the blocking state if appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-PEER_IN_UPGRADE: Peer is going through Upgrade. Can't bring up NON Edge port 0x[hex] in STP

Explanation  Peer is going through Upgrade. Can't bring up NON Edge port in STP

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-PVSTSIM_FAIL: Blocking [chars] port [chars]: Inconsistent [chars] PVST BPDU received on VLAN [dec], claiming root [chars]

Explanation  When a MST switch is connected to a PVST+ switch, the CIST (MST00) information on the port of the MST switch must be consistently better than all the PVST+ messages if the port is designated or consistently worse than all the PVST+ messages if the port is root. If this constraint is not respected, the port on the MST switch is blocked in order to prevent a potential bridging loop

Recommended Action  When STP is converging after a new switch, or switch port is added to the topology, this condition may happen transiently. The port unblocks automatically in such cases. If the port remains blocked, identify the root bridge as reported in the message, and configure a worse or better priority for the VLAN spanning tree consistent with the CIST role on the port of the MST switch. There could be more inconsistencies than the message indicates, and the port will not recover until all such inconsistencies are cleared. If you cannot determine which other VLANs have inconsistencies, disable and reenable the port. This message will appear again and specify another VLAN with inconsistencies to be fixed. Repeat this process until all inconsistencies on all VLANs are cleared.

Error Message  STP-2-PVSTSIM_OK: PVST Simulation inconsistency cleared on port [chars].

Explanation  The listed interface is no longer receiving PVST BPDUs advertising an information inconsistent with the CIST port information. The PVST Simulation Inconsistency is cleared and the interface returns to normal operation

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-RANDNUM_FAIL: [chars]

Explanation  There was a critical error during random number generation. [chars] indicates details of the error

Recommended Action  No action is required.

Error Message  STP-2-RECV_BAD_TLV: Received SSTP BPDU with bad TLV on [chars] [chars].

Explanation  The list interface received a SSTP BPDU that was missing the VLAN id tag. The BPDU is discarded.

Recommended Action  No action is required.

Error Message  STP-2-RECV_PVID_ERR: Received BPDU with inconsistent peer vlan id [dec] on [chars] [chars].

Explanation  The listed interface received a SSTP BPDU that is tagged with a VLAN id that does not match the VLAN id on which the BPDU was received. This occurs when the native VLAN is not consistently configured on both ends of a 802.1Q trunk.

Recommended Action  Verify that the configuration of the native VLAN id is consistent on the interfaces on each end of the 802.1Q trunk connection. Once corrected, spanning tree will automatically unblock the interfaces as appropriate.

Error Message  STP-2-ROOTGUARD_BLOCK: Root guard blocking port [chars] on [chars].

Explanation  A BPDU was received on the listed interface which advertizes a superior spanning tree root bridge to that currently in use. The interface is put into blocking state and marked as root guard inconsistent in order to prevent a suboptimal spanning tree topology to form.

Recommended Action  Issue the show spanning-tree inconsistentports command to review the list of interfaces with root guard inconsistencies. Determine why devices connected to the listed ports are sending BPDUs with a superior root bridge and take action to prevent further occurances. Once the bogus BPDUs have been stopped, the interfaces will automatically recover and resume normal operation. Make sure that it is appropriate to have root guard enabled on the interface.

Error Message  STP-2-ROOTGUARD_CONFIG_CHANGE: Root guard [chars] on port [chars].

Explanation  The spanning tree root guard configuration for the listed interface has been changed. If enabled, any BPDU received on ths interface which advertizes a superior spanning tree root bridge to that already in use will cause the interface to be put into blocking state and marked as root guard inconsistent.

Recommended Action  Verify that this is the desired configuration for the listed interface. Correct it if this is not the desired configuration otherwise no further action is required.

Error Message  STP-2-ROOTGUARD_UNBLOCK: Root guard unblocking port [chars] on [chars].

Explanation  The listed interface is no longer receiving BPDUs advertizing a superior root bridge. The root guard inconsistency is cleared for the interface and then it is taken out of the blocking state if appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-SET_PORT_STATE_FAIL: Port state change req to PIXM failed, status = 0x[hex] [[chars]] vdc [dec], tree id [dec], num ports [dec], ports [chars] state [chars], opcode [chars], msg id ([dec]), rr_token 0x[hex]

Explanation  The port set port state has failed. check port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-SET_PORT_STATE_TIMEOUT: Port state change req to PIXM timedout after [dec] sec. vdc [dec], tree id [dec], num ports [dec], ports [chars] state [chars], opcode [chars], msg id ([dec]), rr_token 0x[hex]

Explanation  The port set port state has timedout. check port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-STP_INIT: STP initialization of [chars] [chars]

Explanation  STP initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STP-2-STP_ISSU_LC_RESET: STP resetting LC[dec] to prevent Loops during ISSU caused by a topology change in the network. Peer on [chars] [chars] could not be Disputed

Explanation  This can happen as a result of a topology change in the network while the Linecard was undergoing ISSU. Since STP cannot change the port state to blocking on the Linecard undergoing ISSU, it will first try to prevent the Loop by causing a Dispute on the peer ports forcing them into blocking state. But if the peer does not support Dispute mechanism, and STP detects a potential Loop, it will reset the Linecard to prevent the Loop

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-STP_MODE_CHANGE_FAIL: STP Mode Change to [chars] failed

Explanation  STP mode change failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STP-2-STP_MODE_CONFIG_FAIL: STP Mode config failed, PVRST mode is not supported when there are more than [dec] user VLANs configured

Explanation  STP mode config failed

Recommended Action  Please remove extra VLANs if you need to change to PVRST mode!

Error Message  STP-2-STP_MST_INSTANCE_CONFIG_FAIL: STP MST instance config change failed for [dec]

Explanation  STP MST instance config change failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STP-2-STP_NETWORK_PORT_CONFIGURED: Spanning-tree port type network is configured on [chars] port not supported on vpc ports.

Explanation  Spanning-tree port type network config is not supported on vpc ports.

Recommended Action  Verify this interface has followed recomended config guide.

Error Message  STP-2-STP_VPC_PEER_ISSU_DISRUPTIVE: Possible traffic disruption due to ISSU on VPC peer. [chars]

Explanation  This is due to some non VPC ports in Desg FWD state on the device or BA timers enabled. It can be prevented by changing the root for those non vPC port vlans, disabling Bridge Assurance timers on non vPC ports

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-UNBLOCK_CONSIST_PORT: Unblocking port [chars] on [chars]. Port consistency restored.

Explanation  The Port VLAN ID and/or Port Type inconsistencies have been resolved and spanning tree will now unblock the listed interface of the listed spanning tree instance as appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-UNBLOCK_DETECTED_PVST_PEER: Unblocking port [chars] [PVST peer detected].

Explanation  The listed interface has stopped receiving SSTP BPDUs and so will be restored to normal spanning tree state

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-VLAN_PORT_LIMIT_EXCEEDED: The number of vlan-port instances exceeded [[chars] mode] recommended limit of [dec]

Explanation  The total number of individual VLAN ports, in the spanning tree mode specified in the error message, has exceeded the limit specified in the error message. VLANs can be counted more than once; if VLAN 1 is carried on 10 interfaces, it will count as 10 VLAN ports. Note that bundling is ignored for purposes of this count; if 8 interfaces on the same module are in one bundle, and the port channel is carrying VLAN 1, it will count as 1 VLAN ports.

Recommended Action  Reduce the number of trunks and VLANs configured in the switch. Keep the VLAN port count below the recommended limit specified in the configuration documentation. Enter the show interface trunk command to see the total number of trunks and VLANs.

Error Message  STP-2-VPC_HITLESS_FAILURE: VPC Hitless Role Change Failure. Reason: [chars].

Explanation  VPC Hitless Role Change has failed.

Recommended Action  Flap of VPC Peer-link.

Error Message  STP-2-VPC_PEERSWITCH_CONFIG_DISABLED: vPC peer-switch configuration is disabled. Please make sure to change spanning tree "bridge" priority as per the recommended guidelines.

Explanation  The vPC peer-switch configuration has been changed. If enabled, please make sure to configure spanning tree \bridge\ priority as per the recommended guidelines. If disabled, please make sure to change spanning tree bridge priority as per the recommended guidelines.

Recommended Action  Verify that this is the desired configuration and follow the vPC peer-switch recommended guidelines.

Error Message  STP-2-VPC_PEERSWITCH_CONFIG_ENABLED: vPC peer-switch configuration is enabled. Please make sure to configure spanning tree "bridge" priority as per recommended guidelines to make vPC peer-switch operational.

Explanation  The vPC peer-switch configuration has been changed. If enabled, please make sure to configure spanning tree \bridge\ priority as per the recommended guidelines. If disabled, please make sure to change spanning tree bridge priority as per the recommended guidelines.

Recommended Action  Verify that this is the desired configuration and follow the vPC peer-switch recommended guidelines.

Error Message  STP-2-VPC_PEER_LINK_INCONSIST_BLOCK: vPC peer-link detected [chars] blocking [chars] [chars].

Explanation  VPC Peer-link detected the STP inconsistency mentioned in the message. This will impact the STP topology for vPCs and can cause frame duplications. As a result, the interface was moved to the spanning tree Blocking state

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-VPC_PEER_LINK_INCONSIST_ERRDISABLE: vPC Peer-link detected [chars]. Disabling [chars].

Explanation  VPC Peer-link detected the STP inconsistency mentioned in the message. This will impact the STP topology for vPCs and can cause frame duplications. As a result, the vPC Peer-link was administatively shut down.

Recommended Action  Please resolve the inconsistency reported in this message on the vPC Peer link. After the conflict has been resolved, re-enable the interface by entering the no shutdown command in interface configuration mode.

Error Message  STP-2-VPC_PEER_LINK_INCONSIST_UNBLOCK: vPC peer-link inconsistency cleared unblocking [chars] [chars].

Explanation  VPC Peer-link inconsistency is cleared and the vPC interface listed in the message has been restored to normal spanning tree state.

Recommended Action  LOG_STD_NO_ACTION

STP-3

Error Message  STP-3-BLOCK_PORT_TYPE: Blocking [chars] on [chars]. Inconsistent port type.

Explanation  The listed interface is being held in spanning tree blocking state until the port type inconsistency is resolved.

Recommended Action  Verify that the configuration and operational state of the listed interface and that of the interface to which it is connected have the same mode (access vs trunk). If mode is trunk, verify the same encapsulation (ISL, 802.1Q). Once these parameters are consistent, spanning tree will automatically unblock the interfaces as appropriate.

Error Message  STP-3-PORT_SELF_LOOPED: Received BPDU src mac same as that of port. Port self loopback detected. Port [chars] being disabled

Explanation  The source MAC address contained in a BPDU received on the listed interface matches the MAC address assigned to that interface This indicates the possibility that a port is looped back to itself, possibly due to a diagnostic cable being plugged in. The interface will be administratively shutdown.

Recommended Action  Check the interface configuration and any cable plugged into the interface. Once problem resolved, re-enable interface by doing a no shutdown in the interface configuration. Copy the error message as it is printed and also copy the output of a show interface for the interace listed in the error message.

Error Message  STP-3-RECV_1Q_NON_TRUNK: Received 802.1Q BPDU on non trunk [chars] [chars].

Explanation  A SSTP BPDU was received on the listed interface that was not operationally a trunk.

Recommended Action  Verify that the configuration and operational state of the listed interface and that of the interface to which it is connected have the same mode (access vs trunk). If mode is trunk, verify the same encapsulation (none, ISL, 802.1Q). Once these parameters are consistent, spanning tree will automatically unblock the interfaces as appropriate.

STP-4

Error Message  STP-4-FORWARDTIME_CONFIG_CHANGE: Forward Delay time change to [dec] seconds for instance [chars] is not recommended as it can cause STP data loops during High Availability Dual-Supervisor Switchover and In-Service Software Upgrade

Explanation  It is stongly recommended to avoid changing forward delay time value to less than the default value of 15 seconds since it can cause STP data loops during High Availability Dual-Supervisor Switchover and also during In-Service Software Upgrade. Please read the release notes.

Recommended Action  Please change the forward delay time to be greater than or equal to the default value of 15 seconds

Error Message  STP-4-HELLOTIME_CONFIG_CHANGE: Hello time change to [dec] seconds for instance [chars] is not recommended as it can trigger STP Topology Changes during High Availability Dual-Supervisor Switchover and In-Service Software Upgrade

Explanation  It is stongly recommended to avoid changing Hello time value to less than the default value of 2 seconds since it can trigger STP Topology change during High Availability Dual-Supervisor Switchover and also during In-Service Software Upgrade. Please read the release notes.

Recommended Action  Please change the hello time to be greater than or equal to the default value of 2 seconds.

Error Message  STP-4-MAC_ADDR_FLUSH_REQ_TIMEOUT: MAC Address Flush req to L2FM timedout after [dec] sec. vdc [dec], tree id [dec], num ports [dec], ports [chars], opcode [chars], msg id ([dec]), rr_token 0x[hex]

Explanation  The MAC Address Flush Request to L2FM has timedout. check port

Recommended Action  LOG_STD_NO_ACTION

STP-6

Error Message  STP-6-FIRST_BPDU_TX: First BPDU transmitted

Explanation  First BPDU transmitted.

Recommended Action  No action is required.

Error Message  STP-6-MST_DIGEST: MST digest changed to [chars], pre-std digest changed to [chars]

Explanation  MST Region configuration has changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-MST_PORT_BOUNDARY: Port [chars] [chars] as MST Boundary port

Explanation  MST Boundary port status of the specified port is changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-MST_PORT_PRE_STANDARD: Port [chars] [chars] as MST Pre-standard port.

Explanation  MST pre-standard status of the specified port is changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_ADDED: Interface [chars], added to [chars] with role [chars], state [chars], cost [dec], priority [dec], link-type [chars]

Explanation  This spanning tree port has been added

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_COST: Port [chars] instance [chars] cost changed to [dec]

Explanation  The spanning tree port cost has changed for the specified port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_DELETED: Interface [chars], removed from [chars]

Explanation  This spanning tree port has been deleted

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_LINK_TYPE: Port [chars] instance [chars] link changed to [chars]

Explanation  The spanning tree port link type has changed for the specified port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_PRIORITY: Port [chars] instance [chars] priority changed to [dec]

Explanation  The spanning tree port priority has changed for the specified port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_RANGE_ADDED: Interface [chars] added to [chars] with cost [dec], priority [dec], link-type [chars]

Explanation  This spanning tree port has been added

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_RANGE_DELETED: Interface [chars] removed from [chars]

Explanation  This range spanning tree logical ports has been deleted

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_RANGE_ROLE: new_role=[chars] interface=[chars] [chars]

Explanation  The role of the range of spanning tree logical ports has changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_RANGE_STATE: new_state=[chars] interface=[chars] [chars]

Explanation  The range of Spanning-Tree logical ports have changed state.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_ROLE: Port [chars] instance [chars] role changed to [chars]

Explanation  The spanning tree port role has changed for the specified port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_STATE: Port [chars] instance [chars] moving from [chars] to [chars]

Explanation  The Spanning-Tree port has changed state.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PRESTD_NEIGH: This switch has received a pre-standard MST BPDU on port [chars]: Invoking pre-standard MST BPDU transmission on this port.

Explanation  The switch has received a pre-standard MST BPDU on a port. The switch will automatically adjust its mode of operation on this port and will start sending pre-standard BPDUs.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-ROOT: Root bridge for [chars] changed to [chars]

Explanation  The spanning tree root bridge has changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-SERVICE_UP: Initialized [chars]

Explanation  STP line 2.

Recommended Action  No action is required.

Error Message  STP-6-STATE_CREATED: Internal state created [chars]

Explanation  STP has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

SYSMGR Messages

This section contains the SYSMGR messages.

SYSMGR-0

Error Message  SYSMGR-0-ACTIVE_SUP_LESS_MEMORY: Active Sup and Standby Sup are different model. Replace Sup in slot [dec] with same memory config for continued redundancy post switchover

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

Error Message  SYSMGR-0-STANDBY_SUP_LESS_MEMORY: Active Sup and Standby Sup are different model. Replace Sup in slot [dec] with same memory config for continued redundancy post switchover

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

SYSMGR-2

Error Message  SYSMGR-2-ACTIVE_LOWER_MEM_THAN_STANDBY: Active supervisor in slot [dec] is running with less memory than standby supervisor in slot [dec].

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

Error Message  SYSMGR-2-BOOTSCOPE_HANDSHAKE: Service "[chars]" is in the boot scope, but tried a regular handshake. Discarding request.

Explanation  A service is trying to take actions that belong to a different class of services.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CFGCTRL_SBY_SAVE_FAILED: The cfgctrl process has failed to save the config on the standby supervisor. reason: [chars]

Explanation  Configuration control has failed to save the configuration on the standy supervisor.

Recommended Action  Please see the reason string

Error Message  SYSMGR-2-CFGERASE_ABORTED: Write erase aborted.

Explanation  Write erase has failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGSNAPSHOT_ABORTED_DIR: Unable to open the configuration directory. Aborting configuration snapshot.

Explanation  The destination location for the snapshot-config could not be found.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGSNAPSHOT_ABORTED_INIT: Unable to initialize the configuration directory (error-id 0x[hex]). Aborting configuration snapshot.

Explanation  An attempt to copy the startup-config to snapshot-config has failed because the old data could not be removed.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGSNAPSHOT_ABORTED: Configuration snapshot aborted.

Explanation  An attempt to save a snapshot of the startup-config has failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGSYNC_FAILURE: Syncing of the configuration to the standby failed.

Explanation  Syncing of the configuration to the standby failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_CONFELEMENT_RETRIES: Copy R S failed as config-failure retries are ongoing. Type "show nxapi retries" for checking the ongoing retries.

Explanation  Copy R S failed as config-failure retries are ongoing.

Recommended Action  Please verify the syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_DIR: Unable to open the configuration directory. Aborting configuration copy.

Explanation  The destination location for the startup-config could not be found.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_INIT: Unable to initialize the configuration directory (error-id 0x[hex]). Aborting configuration copy.

Explanation  An attempt to copy the running-config to startup-config has failed because the old data could not be removed.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_LABEL: Unable to label the new configuration (error-id 0x[hex]). Aborting configuration copy.

Explanation  An attempt to copy the running-config to startup-config has failed because the new startup-config could not be stamped.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_LOCK: Unable to lock the configuration (error-id 0x[hex]). Aborting configuration copy.

Explanation  An attempt to copy the running-config to startup-config has failed because the system could not lock the required configuration items.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_LOG: Unable to open a log file for the new configuration: [chars] (error-id 0x[hex]). Aborting configuration copy.

Explanation  An attempt to copy the running-config to startup-config has failed because a log file could not be created.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGWRITE_ABORTED: Configuration copy aborted.

Explanation  A configuration copy has failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGWRITE_TIMEOUT_ABORT: Configuration copy aborted by timeout.

Explanation  A service failed to store its configuration in the timeout period. The operation has been aborted.

Recommended Action  No action is required.

Error Message  SYSMGR-2-CFGWRITE_USER_ABORT: Configuration copy aborted by the user.

Explanation  The user typed CTRL+C while the configuration was being saved, and the operation has been aborted.

Recommended Action  No action is required.

Error Message  SYSMGR-2-CONVERT_FUNC_FAILED: Conversion function failed for service "[chars]" (error-id 0x[hex]).

Explanation  This message indicates that the conversion function failed for this service.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CONVERT_FUNC_NOTFOUND: Conversion function not found for service "[chars]".

Explanation  This message indicates that the system could not find appropriate conversion function for this service.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CONVERT_LIB_NOTFOUND: Conversion library not found for service "[chars]".

Explanation  This message indicates that the system could not find conversion library for this service.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CONVERT_STARTUP_ABORTED: Conversion of startup-config failed.

Explanation  This message indicates that the conversion of startup configuration was aborted.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CONVERT_ZIPPING_FAILED: Failed to zip the converted startup configuration.

Explanation  This message indicates that conversion of the startup configuration failed when system was trying to zip the converted configuration.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CORE_SAVE_FAILED: [chars]: PID [dec] with message [chars].

Explanation  A core file could not be saved.

Recommended Action  No action is required.

Error Message  SYSMGR-2-CREATE_DONEFILE_FAILED: Creating /var/run/sysmgr.initdone failed with return value: ([dec]).

Explanation  The initialization of the system could not complete.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-DELETE_BINARY_STARTUP_FAILED: Deletion of binary startup config failed during boot (error-id 0x[hex]).

Explanation  This message indicates that the deletion of the binary startup configuration failed during boot.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-FEATURE_SET_NOT_DISABLED_SRVS: vdc [dec]: feature-set 0x[hex]: Following services did not cleanup: [chars]

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-2-FEATURE_SET_SRVTIMEOUT: vdc [dec]: feature-set 0x[hex] [chars]: Following services did not respond in time: [chars]

Explanation  The services did not handshake with sysmgr in time

Recommended Action  No action is required.

Error Message  SYSMGR-2-FEATURE_SET_UNGRACEFUL_DISABLE_FAILED_SRVS: vdc [dec]: feature-set 0x[hex]: Following services did not exit even after SIGKILL: [chars]

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-2-FORMAT_FAILURE_SUP_RESET: Failure to format a partition successfully causing sup to reset.

Explanation  The partition used to store non-volatile pss files could not be formatted successfully. The supervisor will be reset.

Recommended Action  If the problem persists, please contact customer support.

Error Message  SYSMGR-2-GSYNC_ABORT: Global sync aborted by signal.

Explanation  The initial synchronization of the services has been aborted. The synchronization will be attempted again later.

Recommended Action  Use the command 'reload module ' to reset the standby supervisor if you want to try again.

Error Message  SYSMGR-2-GSYNC_GET_TIMEOUT: Request for global sync for UUID 0x[hex] not completed in specified time.

Explanation  Service failed to complete global sync in specified time. The standby will no longer act as a HA standby.

Recommended Action  If the problem persists, please contact customer support.

Error Message  SYSMGR-2-GSYNC_READY_SRVFAILED: Service "[chars]" on standby supervisor failed to restore its snapshot (error-id 0x[hex]).

Explanation  The initial synchronization of service [chars] has failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-GSYNC_SNAPSHOT_SRVFAILED: Service "[chars]" on active supervisor failed to store its snapshot (error-id 0x[hex]).

Explanation  The initial synchronization of service [chars] has failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-HANDSHAKE_FAILED: Handshake with service "[chars]" in vdc [dec] failed since send failed: [chars] (error-id 0x[hex]).

Explanation  Handshake with a service failed since system manager could not send handshake response to it.

Recommended Action  No action is required.

Error Message  SYSMGR-2-HAP_FAILURE_SUP_RESET: Service "[chars]" in vdc [dec] has had a hap failure

Explanation  One of the services failed HA policy. This module would reset if hap-reset is enabled. Service will not restart if module is not reset

Recommended Action  No action is required.

Error Message  SYSMGR-2-HASWITCHOVER_PRE_START: This supervisor is becoming active (pre-start phase).

Explanation  A cold switchover has started (pre-start phase).

Recommended Action  When the other supervisor is back online, use the command 'show system reset-reason' to know what caused the switchover.

Error Message  SYSMGR-2-HASWITCHOVER_START: Supervisor [dec] is becoming active.

Explanation  A cold switchover has started.

Recommended Action  When the other supervisor is back online, use the command 'show system reset-reason' to know what caused the switchover.

Error Message  SYSMGR-2-HEARTBEAT_FAILED: Sysmgr heartbeat failed at [dec]. [chars]. [chars] ([dec])

Explanation  System manager had failure while trying to heartbeat with KLM

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-INBAND_START_FAILED: Failure while bringing up inband after ISSU reboot, errno: [dec].

Explanation  Sysmgr tried to bring up inband after ISSU reboot, but the call returned error.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-INVALID_HANDSHAKE: Invalid secret ([dec]) received from service "[chars]". Expected [dec].

Explanation  A service can't be started.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-INVALID_SYSMGRCONF: [chars]: invalid configuration file "[chars]": [chars] (error-id 0x[hex]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-INVALID_VERSIONMSG: The remote System Manager ([chars]) declares itself in the same state as this System Manager ([chars]).

Explanation  The redundancy state negotiation between the two supervisors failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-ISSU_FAILED: The ISSU has failed: [chars] (error-id 0x[hex])

Explanation  The ISSU has failed and the switch need to be rebooted.

Recommended Action  No action is required.

Error Message  SYSMGR-2-LAST_CORE_BASIC_TRACE: [chars]: PID [dec] with message [chars].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-2-MSG_SEND_FAILURE_STANDBY_RESET: Failure in sending message to standby causing standby to reset.

Explanation  We will be resetting the standby since mts on the active is unable to send a message to standby.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-MTS_FLUSH_SYNC_QUEUE_FAILURE: flush mts sync queue failed with [chars] (errno [dec])

Explanation  Calling mts_flush_sync_queue to guarante no outstanding messages. the failure might affect HA

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-NON_VOLATILE_DB_FULL: System non-volatile storage usage is unexpectedly high at [dec]%.

Explanation  System non-volatile storage space is almost full.

Recommended Action  Please run the command 'clear processes log pid ' to delete log file for specific instance that show up via the command 'show processes log all'. To clear out all log files, use the command 'clear processes log all'

Error Message  SYSMGR-2-NON_VOLATILE_DB_INODE_FULL: System non-volatile inode storage usage is unexpectedly high at [dec]%.

Explanation  System non-volatile inode storage space is almost full.

Recommended Action  Please run the command 'clear processes log pid ' to delete log file for specific instance that show up via the command 'show processes log all'. To clear out all log files, use the command 'clear processes log all'

Error Message  SYSMGR-2-ONBOARD_FAILURE_LOGGING_FULL: Onboard failure logging usage is unexpectedly high at [dec]%.

Explanation  Onboard failure logging space is almost full.

Recommended Action  Please run the command 'clear logging onboard'. If this message continues to persist, please contact TAC.

Error Message  SYSMGR-2-PARSEERR_DEPENDCYCLE: Dependency cycle found among [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDCONFIG: [chars]: duplicated definition for service config. Previous definition in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDDEPEND: [chars]: duplicated dependency from "[chars]" for service "[chars]". Previous use in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDNAME: [chars]: short name "[chars]" used by service "[chars]" is also used by service "[chars]" in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDOPTION: [chars]: duplicated definition for option [chars]->[chars] (service "[chars]"). Previous definition in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDSERVICE: [chars]: duplicated definition for service "[chars]". Previous definition in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDVERDB: [chars]: duplicated definition for service version_db. Previous definition in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUP_UGRPENTRY: [chars]: service "[chars]" duplicated in the current upgrade group. Previous use in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_FT_SET_ID_PARSEERR: [chars]: ft_set_id ([dec]) out of bound for "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INCONSISTENTOPT: [chars]: option "[chars]=[chars]" not consistent with "[chars]=[chars]" for service "[chars]"

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDCOMPCONDDEPEND: [chars] (in dependency list of compulsory conditional service "[chars]"): optional conditional service "[chars]" not allowed.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDCONDDEPEND: [chars] (in dependency list of ASAP service "[chars]"): conditional service "[chars]" not allowed.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDDEPEND: [chars] (in dependency list of service "[chars]"): service "[chars]" not defined for scope "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDEXEC: [chars]: invalid executable "[chars]" for service "[chars]": [chars] ([dec]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDHANDSHAKEDEPEND: [chars] (in handshake dependency list of service "[chars]"): service "[chars]" is MTS unaware or not defined for scope "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDIDENT: [chars]: [chars] "[chars]" not found for service "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDOPTION: [chars]: option [chars]->[chars] cannot be set to "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDSTDBYDEPEND: [chars]: service "[chars]" cannot be dependent on service "[chars]" due to the standby mode wait for that service.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDVDCDEPEND: [chars] (in dependency list of service "[chars]"): service "[chars]" is a [chars] service.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_CLEANUP_ARGUMENTS: [chars]: cleanup_arguments = "[chars]": only conditional services that are scripts can specify cleanup arguments

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_COND_SRV_MODE: [chars]: service "[chars]" not defined for scope "control" or not mts aware.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_DIR: [chars]: "[chars]" is not a valid [chars]: [chars] ([dec]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_GLOBAL_SYNC: [chars]: mts unaware service may not request for a global sync.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_HB: [chars]: "[dec]" is not a valid heartbeat timeout.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_MAX_INSTANCE: [chars]: [dec] is not a valid max_instance.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_SHELLTREE: [chars]: invalid shell parser tree "[chars]" for service "[chars]": [chars] ([dec]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_STANDBY_MODE_GLOBAL_SYNC: [chars]: service with standby mode wait cannot request for a global sync.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_STANDBY_MODE: [chars]: standby_mode should be run.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_STARTUP_MODE_DEPENDENCY: [chars]: Invalid dependency. Service "[chars]"'s startup mode ('[chars]') does not match dependent service "[chars]"'s startup mode ('[chars]').

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  No action is required.

Error Message  SYSMGR-2-PARSEERR_INVALID_TRANSL: [chars]: invalid translator "[chars]" for service "[chars]": [chars] ([dec]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_UGRPENTRY: [chars]: service "[chars]" is not defined.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_MISSINGOPTION: [chars]: option [chars]->[chars] missing from service definition for service "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_MTSUNAWARE_HANDSHAKEDEPEND: [chars]: service "[chars]" is MTS unaware and cannot have handshake dependencies.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_NORESTART: [chars]: option [chars]->[chars] cannot be set without setting option [chars]->[chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_NOTCONFIG: [chars]: [chars] implemented only for service config.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REPARSE_CANNOT_ADD_SRV: Service "[chars]" cannot be added

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REPARSE_CANNOT_DELETE_SRV: Service "[chars]" cannot be removed

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REPARSE_CANNOT_MODIFY_PARAM: Cannot modify parameter [chars] for the service "[chars]", old value = [chars], new value = [chars]

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REPARSE_CANNOT_MODIFY_SRV: Configuration for service "[chars]" cannot be modified, param modified = [chars], old_value = [chars], new_value = [chars]

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REP_UGRPENTRY: [chars]: service "[chars]" is used in more than one upgrade group. First use in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_TOOMANYDEPENDS_MULTIPLE_INST: [chars]: too many multiple instance dependencies ([dec]) for service "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_TOOMANYDEPENDS: [chars]: too many dependencies ([dec]) for service "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_UGRPDUPLICATEDNAME: [chars]: upgrade group name "[chars]" already used in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_UGRPNAMEREDEFINED: [chars]: the upgrade group is already called "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARTIAL_CFGWRITE_ABORTED: Partial configuration copy aborted.

Explanation  A partial configuration copy has failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again. If problem persists, please run the command 'copy running-config startup-config' and try again.

Error Message  SYSMGR-2-PATCH_REPO_STORE_FAILED: Not enough space to store patch repo in standby bootflash

Explanation  Failed to store patch repo in standby bootflash

Recommended Action  Please free up few 100s mb in standby bootflash to store patch repo OIR bootflash and insert bootflash with needed space and then reload standby from active

Error Message  SYSMGR-2-PATCH_REPO_STORE_SYNC_FAILED: Feature RPMs out of sync, reloading standby

Explanation  Failed to sync rpm repo during HA

Recommended Action  Feature Rpm causing rpmstore inconsistency Cleanup .rpmstore from active if standby continously reloads

Error Message  SYSMGR-2-PLUGIN_BOOTUP_FAILURE: The bootup of the supervisor has failed due to plugin load: [chars] (error-id 0x[hex])

Explanation  The bootup of the supervisor has failed due to plugin load.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PSS2FILE_CONVERT_FAILED: Conversion of file [chars] failed.

Explanation  Conversion of internal data format failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PSS2_VOLATILE_DB_FULL: Volatile database usage in kernel is unexpectedly high at [dec]%.

Explanation  System volatile database in kernel space is almost full.

Recommended Action  Please run the command 'system system internal pss kernel memstats'. If this message continues to persist, please contact TAC.

Error Message  SYSMGR-2-REDSTATE_GETFAILED: Failed to request redundancy state: [chars] (error-id 0x[hex]).

Explanation  The local supervisor is unable to get the redundancy state.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-REDSTATE_SETFAILED: Failed to set redundancy state: ret_val ([dec]).

Explanation  The local supervisor is unable to get the redundancy state.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-REDUNDANCY_CHANNEL_FAILURE: Remote sup will be rebooted since its coming up as active when local sup is still active.

Explanation  Remote sup is becoming active although local sup is still active. As a result, local sup will cause the remote sup to reset itself.

Recommended Action  If the problem persists, please contact customer support.

Error Message  SYSMGR-2-REDUNDANCY_HEARTBEAT_FAILURE: Heartbeat between active and standby on the redundancy channel not working for last [dec] minutes.

Explanation  This supervisor is not receiving heartbeat on the redundancy channel from the other supervisor. This can result in problems during switchover and switchover may even fail.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-REMOTE_VER_FAIL: Remote version extraction failed.

Explanation  Remote version extraction failed. Standby may not be in ha standby state.

Recommended Action  Reload Standby with image in bootflash.

Error Message  SYSMGR-2-RESTART_SYSTEM_LOG: We will be restarting system soon for vdc [dec].

Explanation  We will be restarting system since we were trying to do a hot switchover before all the state could have been transferred to this supervisor. So we will be doing a cold switchover now.

Recommended Action  No action is required.

Error Message  SYSMGR-2-RESTORE_RUNTIME_DB_FAILED: Restoring of runtime database for fabric switch upgrade failed during boot (error-id 0x[hex]).

Explanation  This message indicates that the runtime database could not be restored during boot for the fabric switch upgrade.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SAVE_RUNTIME_DB_FAILED: Saving of runtime database for fabric switch upgrade failed (error-id 0x[hex]).

Explanation  This message indicates that the runtime database could not be saved for the fabric switch upgrade.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SBY_RELOAD_CFGCTRL: The cfgctrl process on sby has failed [dec] times, reloading sby sup to recover

Explanation  Configuration control has failed multipe times, the standby supervisor will be automatically reloaded so that it can be recovered.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SERVICE_CRASHED: Service "[chars]" (PID [dec]) hasn't caught signal [dec][chars]

Explanation  A service has terminated its execution abnormally. The service might be restarted, depending on the HA policies implemented for the service.

Recommended Action  Please use the command 'show process' to verify that the service has been restarted.

Error Message  SYSMGR-2-SHUTDOWN_FAILURE: Unable to set signal handler for graceful shutdown: [chars] (error-id 0x[hex]).

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-2-SHUTDOWN_REJECT: The System Manager is busy saving the configuration. Please try again later.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-2-SHUTDOWN_SYSTEM_LOG: vdc [dec] will shut down soon.

Explanation  We are shutting down system the vdc

Recommended Action  No action is required.

Error Message  SYSMGR-2-SIGKILL_FAILURE: Service "[chars]" failure to respond to SIGKILL causing supervisor to reset. Last heartbeat [dec] secs ago.

Explanation  We will be resetting the supervisor since service failed to respond to SIGKILL sent to it by System Manager.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SOCKET_ERROR: Failed to open socket connection, errno: [dec].

Explanation  Call to open socket connection failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SRV_CLEAR_MEMORY_ALERT: service "[chars]" clear memory alert ([dec]%)

Explanation  Clean Memory Alert Event received

Recommended Action  No action is required.

Error Message  SYSMGR-2-SRV_MAJOR_MEMORY_ALERT: service "[chars]" major memory alert ([dec]%)

Explanation  Major Memory Alert Event received

Recommended Action  No action is required.

Error Message  SYSMGR-2-SRV_MINOR_MEMORY_ALERT: service "[chars]" minor memory alert ([dec]%)

Explanation  Minor Memory Alert Event received

Recommended Action  No action is required.

Error Message  SYSMGR-2-SRV_SPAWN_FAILED: Spawning of service "[chars]" in vdc [dec] failed : [chars] (error-id 0x[hex]).

Explanation  Failed to spawn a service

Recommended Action  No action is required.

Error Message  SYSMGR-2-STANDBY_BOOT_FAILED: Standby supervisor failed to boot up.

Explanation  This message is printed if the standby supervisor doesn't complete its boot procedure (i.e. it doesn't reach the login prompt on the local console) 3 to 6 minutes after the loader has been loaded by the BIOS. This message is usually caused by boot variables not properly set for the standby supervisor. This message can also be caused by a user intentionally interrupting the boot procedure at the loader prompt (by means of pressing ESC).

Recommended Action  Connect to the local console of the standby supervisor. If the supervisor is at the loader prompt, try to use the 'boot' command to continue the boot procedure. Otherwise, issue a 'reload' command for the standby supervisor from a vsh session on the active supervisor, specifying the 'force-dnld' option. Once the standby is online, fix the problem by setting the boot variables appropriately.

Error Message  SYSMGR-2-STARTUP_CONVERSION_FAILED: Startup config conversion failed during boot (error-id 0x[hex]).

Explanation  This message indicates that the conversion of startup configuration failed during boot.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-START_SCRIPT_FAILED: Start script (/isan/etc/rc.sysmgr start) failed with return value: ([dec]).

Explanation  The initialization of the system could not complete.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SUBPROC_SPAWN_FAILED: Spawning of sub-process "[chars]" in vdc [dec] failed : [chars] (error-id 0x[hex]).

Explanation  Failed to spawn a sub-process

Recommended Action  No action is required.

Error Message  SYSMGR-2-SUP_POWERDOWN: Supervisor in slot [dec] is running with less memory than active supervisor in slot [dec]

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_OVER: Switchover completed.

Explanation  The switchover is completed.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_SRVCRASHED: Service "[chars]" (PID [dec]) crashed during switchover - hasn't caught signal [dec] . Core will not be collected.

Explanation  The switchover failed because a service crashed during switchover.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_SRVFAILED: Service "[chars]" failed in performing its switchover actions (error-id 0x[hex]).

Explanation  The switchover failed because a service could not transition to the active state.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_SRVTERMINATED: Service "[chars]" (PID [dec]) terminated during switchover with error code [dec] .

Explanation  The switchover failed because a service terminated during switchover.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_THRESHOLD_EXCEEDED: Switchover threshold exceeded ([dec] switchovers happened within [dec] seconds). Powering down all linecards.

Explanation  Switchover threshold exceeded

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_TIMEOUT: Service "[chars]" (vdc [dec]) did not respond to switchover message in [dec] seconds

Explanation  The switchover timeout because a service failed to response

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SYNC_FAILURE_MSG_PAYLOAD: vdc [dec]: [chars]

Explanation  Dump out the msg to know what causes sync failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SYNC_FAILURE_STANDBY_RESET: Failure in syncing messages to standby for vdc [dec] causing standby to reset.

Explanation  We will be resetting the standby since mts on the active is unable to sync messages to standby.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SYSMGR_AUTOCOLLECT_TECH_SUPPORT_LOG: This supervisor will temporarily remain online in order to collect show tech-support. This behavior is configurable via 'system [no] auto-collect tech-support'. Collected information in /bootflash/hap_reset_show_tech.gz.

Explanation  Supervisor is automatically collecting logs

Recommended Action  No action is required.

Error Message  SYSMGR-2-SYSMGR_MALLOC_FAIL: [chars]: malloc ([dec] bytes) for [chars] failed [chars]([dec])

Explanation  Malloc failed

Recommended Action  No action is required.

Error Message  SYSMGR-2-TMP_DIR_FULL: System temporary directory usage is unexpectedly high at [dec]%.

Explanation  System /tmp space is almost full.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-TMP_DIR_RETURN_TO_NORMAL: System temporary directory usage returned to normal at [dec]%.

Explanation  System /tmp space has returned to normal usage.

Recommended Action  No action is required.

Error Message  SYSMGR-2-VDC_CREATE_DELETE_SRVCRASHED: Global vdc-aware service "[chars]" (PID [dec]) crashed during vdc create/delete on standby - hasn't caught signal [dec] .

Explanation  The creation/deletion of vdc on standby failed because a global vdc-aware service crashed on standby.

Recommended Action  No action is required.

Error Message  SYSMGR-2-VDC_CREATE_DELETE_SRVTERMINATED: Global vdc-aware service "[chars]" (PID [dec]) terminated during vdc create/delete on standby with error code [dec] .

Explanation  The creation/deletion of vdc on standby failed because a global vdc-aware service terminated on standby.

Recommended Action  No action is required.

Error Message  SYSMGR-2-VDC_DELETE_FAILURE: The vdc delete has failed: [chars] (error-id 0x[hex])

Explanation  The vdc delete has failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-VDC_NOT_CLEANEDUP_SRVS: vdc [dec]: [chars]

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-2-VOLATILE_DB_FULL: System volatile database usage is unexpectedly high at [dec]%.

Explanation  System volatile database space is almost full.

Recommended Action  Please run the command 'system pss shrink'. If this message continues to persist, please contact TAC.

Error Message  SYSMGR-2-WARMSWITCHOVER_START: This supervisor is becoming active.

Explanation  A cold switchover has started.

Recommended Action  When the other supervisor is back online, use the command 'show system reset-reason' to know what caused the switchover.

Error Message  SYSMGR-2-WDT_KGDB: System watchdog kgdb has been [chars] for slot [dec].

Explanation  System watchdog kgdb has been [chars]. If the command has been enabled, the system will go into kgdb if there is a watchdog timeout.

Recommended Action  No action is required.

SYSMGR-3

Error Message  SYSMGR-3-BASIC_TRACE: [chars]: PID [dec] has the following message [chars].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-3-CAPABILITY_REDUN_CHANGE: Redundancy mode changed to [chars] due to configuration change.

Explanation  Some configuration changes have occurred causing administrative redundancy mode to change.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGCTRL_ABORT: signal to abort cfgctrl as super changes to the unstable state

Explanation  When super state changes to unstable, cfgctrl should be terminated

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGERASE_FAILED: Configuration erase failed (error-id 0x[hex]).

Explanation  The requested configuration erase has failed. [dec] is the error-ID representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGSNAPSHOT_FAILED: Configuration snapshot failed (error-id 0x[hex]).

Explanation  The requested configuration snapshot has failed. [dec] is the error-id representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGWRITE_FAILED: Configuration copy failed (error-id 0x[hex]).

Explanation  The requested configuration copy has failed. [dec] is the error-id representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGWRITE_REJECT: Discarding request for configuration [chars]: configuration action already in progress.

Explanation  Another instance of the command 'copy running-config startup-config' is in progress.

Recommended Action  Please wait for the other instance to complete.

Error Message  SYSMGR-3-CFGWRITE_SRVCRASHED: Service "[chars]" crashed with signal ([dec]) while configuration was being saved

Explanation  A required service has crashed while configuration was being saved. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_SRVFAILED: Service "[chars]" failed to store its configuration (error-id 0x[hex]).

Explanation  A required service has failed to store its own configuration into the startup-config. The overall configuration copy is considered failed.

Recommended Action  Use the 'show process' command to verify that the system is running properly and the service [chars] is behaving correctly. Then try again.

Error Message  SYSMGR-3-CFGWRITE_SRVTERMINATED: Service "[chars]" terminated with error code ([dec]) while configuration was being saved

Explanation  A required service has terminated while configuration was being saved. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_SRVTIMEOUT: Service "[chars]" failed to store its configuration in the timeout period

Explanation  A required service has failed to send a response after receving a request to store its configuration into the startup-config. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_VDCSRVCRASHED: Service "[chars]" in vdc [dec] crashed with signal ([dec]) while configuration was being saved

Explanation  A required service has crashed while configuration was being saved. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_VDCSRVFAILED: Service "[chars]" in vdc [dec] failed to store its configuration (error-id 0x[hex]).

Explanation  A required service has failed to store its own configuration into the startup-config. The overall configuration copy is considered failed.

Recommended Action  Use the 'show process' command to verify that the system is running properly and the service [chars] is behaving correctly. Then try again.

Error Message  SYSMGR-3-CFGWRITE_VDCSRVTERMINATED: Service "[chars]" in vdc [dec] terminated with error code ([dec]) while configuration was being saved

Explanation  A required service has terminated while configuration was being saved. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_VDCSRVTIMEOUT: Service "[chars]" in vdc [dec] failed to store its configuration in the timeout period

Explanation  A required service has failed to send a response after receving a request to store its configuration into the startup-config. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-COPY_CORES_FAILED: Copying cores failed ([dec]).

Explanation  Copying cores to the destination failed because of an error specified in the log.

Recommended Action  No action is required.

Error Message  SYSMGR-3-COREDUMP_TIMEOUT: Failed to store the core in the specified time. Resetting ....

Explanation  Failed to store the core in the specified time. Resetting ...

Recommended Action  No action is required.

Error Message  SYSMGR-3-CORE_CLIENT_INIT_FAILED: Core client will not be started due to some internal error.

Explanation  Core client will not be started due to some internal error.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CORE_OP_FAILED: Core operation failed: [chars]

Explanation  Mainly use to display failure on core operation in general

Recommended Action  No action is required.

Error Message  SYSMGR-3-CORE_SERVER_INIT_FAILED: Core server will not be started due to some internal error.

Explanation  Core server will not be started due to some internal error.

Recommended Action  No action is required.

Error Message  SYSMGR-3-DAEMONIZE_FAILED: Unable to daemonize service "[chars]": [chars] ([dec]).

Explanation  A service could not be spawned.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-DISCARD_BINCFG_CONVERT_FAILURE: Binary configuration is being discarded for the reasons: < [chars] >

Explanation  Binary configuration is being discarded due to conversion failure

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-3-DISCARD_BINCFG_VERCMP_FAILURE: Binary configuration is being discarded due to version compare failure

Explanation  Binary configuration is being dicarded since the version compare failed to decode the versions

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-3-FAILED_PFM_HANDSHAKE: PFM-handshake from service "[chars]" failed (error-id 0x[hex]).

Explanation  The Platform Manager handshake has failed. The system can't proceed with the initialization.

Recommended Action  No action is required.

Error Message  SYSMGR-3-GSYNC_TIMEOUT_FAILED: Failed to set timeout for global sync for an application ([dec]).

Explanation  Failed to set timeout for global sync for an application. This can result in global sync to be stuck forever if application never completes global sync.

Recommended Action  No action is required.

Error Message  SYSMGR-3-HEARTBEAT_FAILURE: Service "[chars]" sent SIGABRT for not setting heartbeat for last [dec] periods. Last heartbeat [dec] secs ago.

Explanation  A service is not setting proper heartbeats to System Manager So it will kill this service and if this service has restartability set to TRUE, the service will restart.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-INVALID_BOOT_HANDSHAKE: Boot-scope-handshake received from service "[chars]", that is in scope [dec] (not the boot scope).

Explanation  A service is trying to take actions that belong to a different class of services.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-INVALID_PFM_HANDSHAKE: PFM-handshake received from service "[chars]", that is in scope [dec] (not the boot scope).

Explanation  A service is trying to take actions that belong to the Platform Manager service.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-INVALID_TRANSITION: Transition from state [chars] to state [chars] is not allowed.

Explanation  Unexpected transition in the System Manager state machine.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-INVALID_UUID: Service "[chars]" is configured with UUID 0x[hex], but uses UUID 0x[hex].

Explanation  The identity of a service is inconsistent in the image file

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-ISSU_BEGIN_FAILED: ISSU cannot proceed (error-id 0x[hex]).

Explanation  This message indicates that some service has blocked the ISSU.

Recommended Action  No action is required.

Error Message  SYSMGR-3-KILLALLSRVS_FAILURE: Sysmgr rtdb controller timed out while terminating all serivces.

Explanation  One or more services did not terminate during upgrade/downgrade.

Recommended Action  Please collect show tech ha to find the service that did not terminate.

Error Message  SYSMGR-3-LC_IMAGE_UPGRADE_FAILURE: Linecard image upgrade request failed(error-id 0x[hex]).

Explanation  Linecard image upgrade request failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-LC_RESET: Resetting linecard

Explanation  Linecard is being reset

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-LC_SAVE_STATES_FAILURE: Save states request for the linecard failed(error-id 0x[hex]).

Explanation  Save state request for the linecard failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-LC_STOP_ASYNC_FAILURE: Stop async notification request failed(error-id 0x[hex]).

Explanation  Stop async notification request for the linecard failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-LC_UPG_ERROR: LC ERROR: [chars]

Explanation  Linecard upgrade error message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-LOGFLASH_DEBUG_FULL: System core file storage usage is unexpectedly high at [dec]%.

Explanation  Logflash core file storage spave is almost full.

Recommended Action  Please run command 'run bash sudo df -k /logflash' and clean up the directory.

Error Message  SYSMGR-3-MISSING_OPTIONAL_CAPABILITY: Incomplete support for the current running-config on standby supervisor.

Explanation  Loose config incompatibilities exist between active and standby sup. Operational redundancy mode is still set to HA.

Recommended Action  No action is required.

Error Message  SYSMGR-3-MODULE_LOCK_FAILED: Failed to lock the local module to avoid reset (error-id 0x[hex]).

Explanation  Locking the local module has failed. Reloading the local module can now result in switchover to fail.

Recommended Action  No action is required.

Error Message  SYSMGR-3-ND_UPGD_RECOVERY_SRVFAILED: Service "[chars]" in vdc [dec] failed in non-disruptive upgrade recovery (error-id 0x[hex]).

Explanation  The non-disruptive upgrade failed because a service could not recover its state.

Recommended Action  No action is required.

Error Message  SYSMGR-3-OPERATIONAL_MODE_WARM: Operational redundancy mode set to warm (error-id 0x[hex]).

Explanation  Operational redundancy mode will be set to warm. [dec] is the error-ID representing the reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-PARTIAL_CFGWRITE_FAILED: Partial configuration copy failed (error-id 0x[hex]).

Explanation  The requested configuration copy has failed. [dec] is the error-ID representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-PARTIAL_CFGWRITE_VER_MISMATCH: Startup-config version not same as current software version.

Explanation  Startup-config version not same as current software version.

Recommended Action  Please do a copy running startup, and try again.

Error Message  SYSMGR-3-RTDBCTRL_BUILD_UPG_TBL_FAILED: Failed to prepare upgrade version table during pre-upgrade

Explanation  A required sequence in the preupgrade sequence has failed. The version table could not be built correctly

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-RTDBCTRL_SRVFAILURE: Service "[chars]" responded with a failure

Explanation  A service responded with a failure to the request

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-RTDBCTRL_SRVTIMEOUT: Service "[chars]" failed to respond back to System Manager in the specified timeout period

Explanation  A required service has failed to send a response after receiving a request for the fabric switch upgrade.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-RTDBCTRL_SRV_RECV_FAILED: Failed to receive response from Service "[chars]"

Explanation  A required service has failed to send a response after receiving a request for the fabric switch upgrade.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-RTDBCTRL_SRV_SEND_FAILED: Failed to send upgrade request to Service "[chars]"

Explanation  Failed to send upgrade request to a required service

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-SERVICE_BACKTRACE: [chars]

Explanation  Service crashed

Recommended Action  No actions required.

Error Message  SYSMGR-3-SERVICE_TERMINATED: Service "[chars]" (PID [dec]) has finished with error code [chars] ([dec]).

Explanation  A service has terminated its execution normally. Depending on the value of [dec2] and the HA policies implemented for the service, the service might be restarted automatically.

Recommended Action  No action is required.

Error Message  SYSMGR-3-SHUTDOWN_OVER: The System Manager is shutting down now.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-3-SHUTDOWN_START: The System Manager has started the shutdown procedure.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-3-STANDBY_UNSTABLE_FTSET_OPERATION: Restarting standby since it is not in hot standby state while feature-set operation was in progress in vdc [dec].

Explanation  Standby unstable during feature-set operation

Recommended Action  No action is required.

Error Message  SYSMGR-3-STANDBY_VDC_RESTART_FAILURE: vdc [dec] on standby failed to restart. error: [chars] (0x[hex])

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-3-SYSMGR_CRASHED: Sysmgr (PID [dec]) [chars]

Explanation  Sysmgr has terminated abnormally.

Recommended Action  Please use the command 'show process' to verify that sysmgr has been restarted.

Error Message  SYSMGR-3-SYSMGR_SDB_ERR: [chars]: SDB [chars] failed [chars]([dec])

Explanation  SDB failed

Recommended Action  No action is required.

Error Message  SYSMGR-3-TFTP_CORES_FAILED: TFTPing cores failed ([chars]).

Explanation  TFTPing cores to the destination failed because of an error specified in the log.

Recommended Action  No action is required.

Error Message  SYSMGR-3-UNACCEPTABLE_WAIT: Service "[chars]", no response from System Manager after [dec] seconds. Terminating.

Explanation  A spawned service couldn't handshake with the System Manager and it's about to be terminated.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-UNLINK_RELINK_CONF_FILES_FAILED: [chars] of conf files failed. plugin_id [dec]

Explanation  Unlink and/or Relink of configuration files failed.

Recommended Action  No action is required.

Error Message  SYSMGR-3-URIFS_APPLY_FAILED: Applying URI filesystem database failed (error-id 0x[hex]).

Explanation  The application of URI filesystem database has failed. [dec] is the error-ID representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-VAR_SYSMGR_FTP_FULL: System partition is unexpectedly high at [dec]%.

Explanation  System partition is almost full.

Recommended Action  Please run command 'run bash sudo df -k /var/sysmgr/ftp' and clean up the directory.

Error Message  SYSMGR-3-VAR_SYSMGR_FULL: System core file storage usage is unexpectedly high at [dec]%. This may cause corruption of core files

Explanation  System core file storage space is almost full.

Recommended Action  Please copy cores off the supervisor and run 'clear cores' to free some space

SYSMGR-4

Error Message  SYSMGR-4-BASIC_TRACE_WARNING: [chars]: PID [dec] with message [chars].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-4-CFGWRITE_PARTIALFORCED: Some services are missing; partial configuration write forced.

Explanation  The system is not fully operational, but a configuration copy has been forced. The services that are not running won't save their configuration, and the next time they will restart with a default configuration.

Recommended Action  Use the 'show process' command to find out which required services are not running.

Error Message  SYSMGR-4-DISCARD_BINCFG_DOWNGRADE_VERSIONID: Binary configuration is being discarded, because the configuration was generatred previously by an image with higher version identfier

Explanation  Binary configuration is being discarded, because the configuration was generatred previously by an image with higher version identfier

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-4-DISCARD_BINCFG_HIGH_TRAINSTAMP: Binary configuration is being discarded, because the configuration was generatred previously by an image having higher trainstamp

Explanation  Binary configuration is being discarded, because the configuration was generatred previously by an image having higher trainstamp

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-4-DISCARD_BINCFG_SRG_INCOMPATIBLE: Binary configuration is being discarded due to incompatibility with running version

Explanation  Binary configuration is being dicarded due to incompatibility with running version

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-4-INVALID_GSYNC_GET: Service "[chars]" vdc [dec] requesting gsync without setting proper flag in its conf file.

Explanation  Service is requesting global sync without setting proper flag in its conf file.

Recommended Action  No action is required.

Error Message  SYSMGR-4-ON_DEMAND_STOP_UID_KNOWN: On-demand service "[chars]" stopped by uid ([dec]).

Explanation  The service start type is specified as type on-demand in its configuration file and a service requested to abort it.

Recommended Action  No action is required.

Error Message  SYSMGR-4-ON_DEMAND_STOP: On-demand service "[chars]" stopped.

Explanation  The service start type is specified as type on-demand in its configuration file and an external request requested to abort it.

Recommended Action  No action is required.

Error Message  SYSMGR-4-PARSEWARN_INVALID_CFGFILE: [chars]: unable to find "[chars]": [chars] ([dec]).

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-4-PARSEWARN_RESTART_CNT_TOO_BIG: Service "[chars]": [chars] restart count of [dec] too big, needs to be set to [dec].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-4-PARSEWARN_VALUE_TOO_SMALL: [chars]: [chars] is too small, replaced with [dec].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-4-READCONF_REJECT: Discarding configuration update request: [chars].

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-4-READCONF_STARTED: Configuration update started (PID [dec]).

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-4-RESTORE_RSRVD_VLAN_TO_DEFAULT: Write erase procedure does not restore the default reserved VLAN range to [dec]-[dec]. Please run 'no system vlan reserve' to restore to defaults

Explanation  Default reserved vlan range

Recommended Action  No action is required.

Error Message  SYSMGR-4-SRVSCOPE_DELAYED: Waiting for redundancy state; termination delayed for scope [chars].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_CORE_TRUNCATED: Core seems to be truncated on generation. [dec] / [dec] KB. PID: [dec]

Explanation  Core likely truncated

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_PATCH_START_SERVICE: vdc [dec]: Service [chars] has restarted with pid [dec] as part of patch operation

Explanation  Service started for patching

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_PATCH_STOP_SERVICE: vdc [dec]: Service [chars] with pid [dec] has exited as part of patch operation

Explanation  Service exited for patching

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_PLUGIN_FAILURE: Received failure response 0x[hex] from Plugin Manager

Explanation  Failure response from plugin mgr

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_VDC_CORE_DELETION: Cores in VDC [dec] will be deleted as part of VDC deletion

Explanation  VDC cores deleted

Recommended Action  No action is required.

Error Message  SYSMGR-4-UGRP_ALL_COMPLETED: Upgrade completed for all the groups.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

SYSMGR-5

Error Message  SYSMGR-5-CFGERASE_DONE: Configuration erase successful.

Explanation  The requested configuration erase has completed successfully.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGERASE_STARTED: Configuration erase started (PID [dec]).

Explanation  The requested configuration erase has started. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGINIT_STARTED: Initialization of the startup configuration started (PID [dec]).

Explanation  The requested initialization of the startup configuration has started. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGSNAPSHOT_DONE: Configuration snapshot successful.

Explanation  The requested configuration snapshot has completed successfully.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGSNAPSHOT_STARTED: Configuration snapshot started (PID [dec]).

Explanation  The requested configuration snapshot has started. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGWRITE_DONE: Configuration copy successful.

Explanation  The requested configuration copy has completed successfully.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGWRITE_STARTED: Configuration copy started (PID [dec]).

Explanation  On the active supervisor, this message indicates that the system has started to service a 'copy running-config startup-config' requested by the user. On the standby supervisor, this message indicates that the system is synchronizing the startup-config from the active supervisor. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CONVERT_STARTUP_STARTED: Configuration conversion started (PID [dec]).

Explanation  This message indicates that the system has started conversion of startup configuration. This happens either on system boot or during the course of an upgrade.

Recommended Action  No action is required.

Error Message  SYSMGR-5-DELETE_BINARY_STARTUP_STARTED: Deletion of binary startup configuration started (PID [dec]).

Explanation  This message indicates that the system will be deleting the binary startup configuration, due to an error in the conversion of the startup conversion.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-5-FSM_STATE_TRANS: System Manager NESTED state transition from [chars] to [chars].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-5-IMPROPER_CLEANUP: Service "[chars]" exited without replying to switchover request.

Explanation  A conditional service exited without replying to switchover request. This message is for logging purposes only and does not affect the functionality of the system

Recommended Action  No action is required.

Error Message  SYSMGR-5-ISSU_ABORT: Notifying services of aborted ISSU (PID [dec]).

Explanation  This message indicates that the ISSU has been aborted and the services have been asked to rollback any changes.

Recommended Action  No action is required.

Error Message  SYSMGR-5-ISSU_BEGIN_STARTED: Notifying services of ISSU (PID [dec]).

Explanation  This message indicates that the system has started notifying services for the ISSU. Services can block the upgrade at this point.

Recommended Action  No action is required.

Error Message  SYSMGR-5-LC_UPGRADE_REBOOT: Rebooting linecard as a part of upgrade

Explanation  Linecard is being rebooted as a part of upgrade

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-5-LC_UPGRADE_START: Starting linecard upgrade

Explanation  Linecard upgrade is starting

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-5-MODULE_ONLINE: System Manager has received notification of local module becoming online.

Explanation  System Manager has received notification of local module becoming online.

Recommended Action  No action is required.

Error Message  SYSMGR-5-PARTIAL_CFGWRITE_ASCII_CONFIG: Startup-config version not present.

Explanation  Startup-config version not present.

Recommended Action  Startup-config version is not present. Ascii configuration will be applied.

Error Message  SYSMGR-5-PARTIAL_CFGWRITE_DONE: Partial configuration copy successful.

Explanation  The requested configuration copy has completed successfully.

Recommended Action  No action is required.

Error Message  SYSMGR-5-PARTIAL_CFGWRITE_STARTED: Partial configuration copy started by UUID 0x[hex] (PID [dec]).

Explanation  This message is printed only on active supervisor, and indicates that service with mentioned UUID has requested a partial write mem. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-RECOVERY_FAILED: Stateful recovery failed, system manager will now start stateless.

Explanation  Stateful recovery failed, system manager will now restart system and start stateless.

Recommended Action  No action is required.

Error Message  SYSMGR-5-RUNTIME_DB_RESTORE_STARTED: Runtime database controller started (PID [dec]).

Explanation  This message indicates that the system has started the restoration of the runtime database. This happens during the non-disruptive fabric switch upgrade.

Recommended Action  No action is required.

Error Message  SYSMGR-5-RUNTIME_DB_RESTORE_SUCCESS: Runtime database successfully restored.

Explanation  This message indicates that the runtime database has been successfully restored for the non-disruptive fabric switch upgrade.

Recommended Action  No action is required.

Error Message  SYSMGR-5-RUNTIME_DB_SAVE_STARTED: Runtime database save has started (PID [dec]).

Explanation  This message indicates that the system has started the saving of the runtime database. This happens during the non-disruptive fabric switch upgrade.

Recommended Action  No action is required.

Error Message  SYSMGR-5-SERVICE_DELETED: Service "[chars]" has been removed from the System Manager database.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-5-STATEFUL_STATE: System Manager is in state [chars] after stateful restart.

Explanation  System Manager has been restarted stateful after an error that resulted in System Manager exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-5-SUBPROC_KILLED: "[chars]" (PID [dec]) hasn't caught signal [dec][chars]

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-5-SUBPROC_TERMINATED: "[chars]" (PID [dec]) has finished with error code [chars] ([dec]).

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-5-UGRP_COMPLETED: Upgrade completed for group [dec].

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

SYSMGR-6

Error Message  SYSMGR-6-ALL_SCOPES_STARTED: System services have completely started at this time.

Explanation  System services have completely started at this time.

Recommended Action  No action is required.

Error Message  SYSMGR-6-HANDSHAKE_DONE: Handshake with service "[chars]" successfully performed.

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-6-HANDSHAKE_VERIFYING_DONE: Handshake verification done from service "[chars]".

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-LC_UPG_DEBUG: LC NON-CRITICAL DEBUG: [chars]

Explanation  Linecard upgrade debug message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-6-RLIMIT_INFO: rlimit of service "[chars]"([dec]) = [dec]

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-SRVSCOPE_COMPLETED: Completed execution for scope [chars].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-6-SRVSCOPE_STARTED: Started execution for scope [chars].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-6-SRVSTATE_CHANGED: State for service "[chars]" changed from [chars] to [chars] in vdc [dec].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-6-SRV_ENQUEUED_FOR_START: Conditional service "[chars]" started by sap "[dec]" has been enqueued for start.

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-STATE_CHANGED: System Manager state changed from [chars] to [chars] for vdc [dec].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-SUPERSTATE_CHANGED: System Manager super state changed from [chars] to [chars] for vdc [dec].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-UNEXPECTED_GSYNC_RESTART_STANDBY: Sending a message to restart system on standby on vdc [dec].

Explanation  Activity occurred on active supervisor that is incompatible with state of standby. System will be restarted on standby.

Recommended Action  No action is required.

SYSMGR-7

Error Message  SYSMGR-7-CFGWRITE_UNEXPECTEDRSP: Discarding unexpected response from service "[chars]".

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-7-DUPLICATED_PFM_HANDSHAKE: PFM-handshake received from service "[chars]", but information already available.

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-LIBCDB_FAILURE: Conversion for service "[chars]" failed in libcdb.

Explanation  This message indicates that either the system could not find conversion tarball or there is no conversion library needed for this service.

Recommended Action  No action is required.

Error Message  SYSMGR-7-LIBVDB_FAILURE: Conversion for service "[chars]" failed in libvdb.

Explanation  This message indicates that the system could not find package information for this service in the version database.

Recommended Action  No action is required.

Error Message  SYSMGR-7-ND_UPGD_RECOVERY_SRVSUCCEEDED: Service "[chars]" recovered its state during non-disruptive upgrade.

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-7-NO_STARTUP_CONFIG: No startup-config to convert.

Explanation  This message indicates that the system tried to convert startup configuration but it found no configuration to convert.

Recommended Action  No action is required.

Error Message  SYSMGR-7-PSSCC_SNAPSHOT_ELAPSED_TIME: PSS Consistency Checker snapshot took [dec].[dec] seconds.

Explanation  This is the time used to generate the PSS Consistency Checker snapshot.

Recommended Action  No action is required.

Error Message  SYSMGR-7-SERVICE_STARTED: Service "[chars]" in vdc [dec] started with PID([dec]).

Explanation  The System Manager is starting a service. This message is for debugging purposes only.

Recommended Action  No action is required.

Error Message  SYSMGR-7-SERVICE_SUCCESS_EXIT: Service "[chars]" (PID [dec]) has successfully exited with exit code [chars] ([dec]).

Explanation  A service has successfully exited its execution.

Recommended Action  No action is required.

Error Message  SYSMGR-7-SUBPROC_SUCCESS_EXIT: "[chars]" (PID [dec]) has successfully exited with exit code [chars] ([dec]).

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-SWITCHOVER_SRVSUCCEDED: Service "[chars]" completed its switchover actions.

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNEXPECTEDMSG: Opcode [dec] not expected at this time from service "[chars]" ([chars]).

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNKNOWNADDR: Opcode [dec] received from unknown source [chars]. Discarding.

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNKNOWNMSG: Unknown opcode [dec] received from [chars].

Explanation  The System Manager has received an unrecognized message with the specified opcode. [chars] is the source of the message. This message is for debugging purposes only.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNKNOWNPID: Opcode [dec] received from [chars] with unknown PID [dec]. Discarding.

Explanation  The System Manager has received a message from an unknown process. [chars] is the source of the message. This message is for debugging purposes only.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNKNOWNUUID: Opcode [dec] received from [chars] with unknown UUID [dec]. Discarding.

Explanation  The System Manager has received an unrecognized message from the specified UUID. [chars] is the source of the message. This message is for debugging purposes only.

Recommended Action  No action is required.

TACACS Messages

This section contains the TACACS messages.

TACACS-2

Error Message  TACACS-2-TACACS_PROGRAM_EXIT: TACACS+ daemon exiting: [chars]

Explanation  TACACS+ daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

TACACS-3

Error Message  TACACS-3-TACACS_ERROR_MESSAGE: [chars]

Explanation  TACACS+ Error Message

Recommended Action  No action is required.

TACACS-4

Error Message  TACACS-4-TACACS_WARNING: [chars]

Explanation  TACACS+ warning

Recommended Action  No action is required.

TACACS-5

Error Message  TACACS-5-TACACS_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Tacacs+ server monitor status change

Recommended Action  No action is required.

Error Message  TACACS-5-TACACS_NOTIFICATION: [chars]

Explanation  TACACS+ notification

Recommended Action  No action is required.

Error Message  TACACS-5-TACACS_SERVER_STATUS: [chars] server [chars] with auth-port [dec] and acct-port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Tacacs+ server status change

Recommended Action  No action is required.

TACACS-6

Error Message  TACACS-6-TACACS_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  TACACS-6-TACACS_MESSAGE: [chars]

Explanation  TACACS+ Message

Recommended Action  No action is required.

TBIRD_CMN_USD Messages

This section contains the TBIRD_CMN_USD messages.

TBIRD_CMN_USD-6

Error Message  TBIRD_CMN_USD-6-TBIRD_CMN_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

TCAP Messages

This section contains the TCAP messages.

TCAP-2

Error Message  TCAP-2-MEM_FULL: Memory allocation failed.

Explanation  TCAP process has failed to allocate memory.

Recommended Action  Please perform a 'show tcap event-history' to collect more information.

Error Message  TCAP-2-PROC_DN: Process is shutting down: [chars]

Explanation  TCAP process is exiting.

Recommended Action  Please perform a 'show tcap event-history' to collect more information.

Error Message  TCAP-2-PROC_INITFAIL: Process initialization failed due to [chars].

Explanation  TCAP process has failed initialization.

Recommended Action  Please perform a 'show tcap event-history' to collect more information.

TCTRL_USD Messages

This section contains the TCTRL_USD messages.

TCTRL_USD-2

Error Message  TCTRL_USD-2-MIFPGA_SYNCE_INCOMPATIBLE: MIFPGA version is incompatible for synce feature, please upgrade to latest one for this feature to work properly

Explanation  Tctrl log message

Recommended Action  No action is required.

Error Message  TCTRL_USD-2-TCTRL_USD_FW_UPGRADE_WARM_BOOT: DPLL chip needs firmware upgrade to version 0x[hex] !! TO OPERATE SYNCE FEATURE CORRECTLY, A RELOAD IS NEEDED FOR FIRMWARE UPGRADE!!

Explanation  Tctrl log message

Recommended Action  No action is required.

TTYD Messages

This section contains the TTYD messages.

TTYD-2

Error Message  TTYD-2-TTYD_ERROR: TTYD Error [chars]

Explanation  Critical TTY daemon error.

Recommended Action  No action is required.

Error Message  TTYD-2-TTYD_MTS: TTYD Message queue [dec] [chars]

Explanation  TTY daemon message error.

Recommended Action  No action is required.

Error Message  TTYD-2-TTYD_SDWRAP: TTYD Debug Facility error [dec] [chars]

Explanation  TTY daemon Debug Facility failed.

Recommended Action  No action is required.

TTYD-3

Error Message  TTYD-3-TTYD_MISC_ERROR: Error [chars] with error [chars]([hex])

Explanation  TTY daemon errors.

Recommended Action  No action is required.

TTYD-4

Error Message  TTYD-4-TTYD_WARN: TTYD Warning [chars]

Explanation  TTY daemon warning.

Recommended Action  No action is required.

TTYD-6

Error Message  TTYD-6-TTYD_MISC: TTYD [chars]

Explanation  The tty daemon miscellaneous message.

Recommended Action  No action is required.

Error Message  TTYD-6-TTYD_PSS: TTYD Store error:[hex] [chars]

Explanation  Failed to store configuration for TTY service.

Recommended Action  No action is required.

U2RIB Messages

This section contains the U2RIB messages.

U2RIB-2

Error Message  U2RIB-2-IPC_PROCESSING_ERR: Error in processing IPC message : Opcode = [dec], Error code = 0x[hex]

Explanation  U2RIB encountered an error in processing an MTS message. The error and message are specified in the error message

Recommended Action  No action is required.

Error Message  U2RIB-2-U2RIB_INIT: U2RIB initialization of [chars] [chars]

Explanation  U2RIB initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

U2RIB-3

Error Message  U2RIB-3-U2RIB_LBL_SELECT_ERROR: Error in predicting the load-balance selection, error code = 0x[hex], [chars]

Explanation  Error in processing or communicating with hardware

Recommended Action  No action is required.

Error Message  U2RIB-3-U2RIB_LD_BLNCE_ERROR: Error in config. lb parameters using the DCEFIB Library, error code = 0x[hex], [chars]

Explanation  Error while communicating with the dcefib library

Recommended Action  No action is required.

U2RIB-5

Error Message  U2RIB-5-U2RIB_DISABLED: U2RIB Disabled

Explanation  U2RIB Service Disabled

Recommended Action  No action is required.

Error Message  U2RIB-5-U2RIB_ENABLED: U2RIB Enabled

Explanation  U2RIB Service enabled

Recommended Action  No action is required.

U2RIB-6

Error Message  U2RIB-6-STATE_CREATED: Internal state created [chars]

Explanation  U2RIB has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

UDLD Messages

This section contains the UDLD messages.

UDLD-3

Error Message  UDLD-3-IDB_ERROR: UDLD error handling [chars] interface: [chars]

Explanation  A softare error occurred in UDLD processing associated with a specific interface.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-3-MSG_SEND_FAILURE: failed to send [chars] to sap [dec]: [chars]

Explanation  Failed to send a message

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-3-UDLD_INTERNAL_ERROR: UDLD internal error: [chars]

Explanation  A softare sanity check failed in the course of UDLD processing.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-3-UDLD_INTERNAL_IF_ERROR: UDLD internal error, interface [chars]: [chars]

Explanation  A softare sanity check failed in the course of UDLD processing.

Recommended Action  LOG_STD_SH_TECH_ACTION

UDLD-4

Error Message  UDLD-4-UDLD_GWRAP_COUNT: UDLD gwrap count is [dec], please log a 'show tech udld' for detail info.

Explanation  UDLD gwrap count reached high level, show tech udld is needed to debug it.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-4-UDLD_NEIGHBOR_MISMATCH: UDLD neighbor mismatch detected, exp: [chars], rec [chars]. Please collect debug info using: http://wikicentral.cisco.com/confluence/display/KGP/UDLD+debug

Explanation  An interface will be disabled because UDLD protocol detected a nieghbor mismatch condition on the interface indicated. Cause is likely due to bad interface hardware or cable misconfiguration. User should investigate.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-4-UDLD_PORT_DISABLED: Interface [chars], link error detected: [chars]. Please collect debug info using: http://wikicentral.cisco.com/confluence/display/KGP/UDLD+debug

Explanation  An interface was disabled because UDLD protocol detected the cause on the interface indicated. Cause is likely due to bad interface hardware or cable misconfiguration. User should investigate.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-4-UDLD_PORT_RESET: UDLD reset interface [chars]

Explanation  A port which had been disabled for UDLD has been reset.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-4-UDLD_SFP_TYPE_CHANGED: User changed SFP type on [chars] from [chars] to [chars], default udld port configuration was applied, 'copy running-config startup-config' recommended

Explanation  SFP type was changed on this interface, all user modified configuration will be reverted back to the default config.

Recommended Action  No action is required.

UDLD-5

Error Message  UDLD-5-UDLD_AGGRESSIVE: UDLD Aggressive

Explanation  UDLD Service Aggressive

Recommended Action  No action is required.

Error Message  UDLD-5-UDLD_DISABLED: UDLD Disabled

Explanation  UDLD Service Disabled

Recommended Action  No action is required.

Error Message  UDLD-5-UDLD_ENABLED: UDLD Enabled

Explanation  UDLD Service Enabled

Recommended Action  No action is required.

UFDM Messages

This section contains the UFDM messages.

UFDM-2

Error Message  UFDM-2-FIB_ROUTE_UPDATE_ERR: Route update error from slot [dec] FIB

Explanation  FIB returned route update error. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action  No action is required.

Error Message  UFDM-2-INTERNAL_ERROR: Internal error: [chars], collect output of show tech-support fowarding l3 unicast... command

Explanation  UFDM hit a internal error. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action  No action is required.

Error Message  UFDM-2-PROACTIVE_CC_CODE_HIT: Error: Proactive CC code hit in ufdm

Explanation  Proactive_cc feature is not enabled The respective code should not get hit

Recommended Action  No action is required.

Error Message  UFDM-2-TCAM_INGRESS_ARP_ETHER_NOT_CONFIGURED: Warning: TCAM region for Ingress ARP-Ether is not configured.

Explanation  Warning: TCAM region for Ingress ARP-Ether is not configured. VXLAN L3 gateway requires this tcam region. Please configure it.

Recommended Action  No action is required.

Error Message  UFDM-2-VXLAN_L3_CONFIG_REACHED_SCALE_LIMIT: VxLAN L3 config reached scale limit Total VXLAN L3 interfaces [dec] (Max Supported [dec])

Explanation  VxLAN L3 config reached scale limit

Recommended Action  No action is required.

UFDM-3

Error Message  UFDM-3-FIB_IPv4_ADJ_CONSISTENCY_CHECKER_FAIL: FIB IPv4 adjacency consistency checker FAILED on slot [chars]

Explanation  FIB Ipv4 adjacency consistency checker Failed. Adjacency database is inconsistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv4_ADJ_CONSISTENCY_CHECKER_PASS: FIB IPv4 adjacency consistency checker PASSED on slot [chars]

Explanation  FIB Ipv4 adjacency consistency checker passed. Adjacency database is consistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv4_CONSISTENCY_CHECKER_TIMEDOUT: FIB IPv4 consistency checker timedout on slot [chars]

Explanation  FIB Ipv4 route/adjacency consistency checker couldnot complete

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv4_ROUTE_CONSISTENCY_CHECKER_FAIL: FIB IPv4 consistency checker FAILED on slot [chars]

Explanation  FIB Ipv4 route consistency checker Failed. Route database is consistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv4_ROUTE_CONSISTENCY_CHECKER_PASS: FIB IPv4 route consistency checker PASSED on slot [chars]

Explanation  FIB Ipv4 route consistency checker Passed. Route database is consistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_ADJ_CONSISTENCY_CHECKER_FAIL: FIB IPv6 consistency checker FAILED on slot [chars]

Explanation  FIB Ipv6 adjacency consistency checker failed. Adjacency database is inconsistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_ADJ_CONSISTENCY_CHECKER_PASS: FIB IPv6 consistency checker PASSED on slot [chars]

Explanation  FIB Ipv6 adjacency consistency checker passed. Adjacency database is consistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_CONSISTENCY_CHECKER_TIMEDOUT: FIB IPv6 consistency checker timed out on slot [chars]

Explanation  FIB Ipv6 route/adjacency consistency checker couldnt complete

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_ROUTE_CONSISTENCY_CHECKER_FAIL: FIB IPv6 route consistency checker FAILED on slot [chars]

Explanation  FIB Ipv6 route consistency checker failed. Route database is inconsistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_ROUTE_CONSISTENCY_CHECKER_PASS: FIB IPv6 route consistency checker PASSED on slot [chars]

Explanation  FIB Ipv6 route consistency checker didnot detect. Route software database is consistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-PROACTIVE_CC_INCONSISTENCY_FOUND: Inconsistencies found in Proactive CC session

Explanation  Inconistencies found in the forwarding table while proactive CC was running

Recommended Action  Run: show forwarding proactive-cc inconsistencies \n show forwarding proactive-cc inconsistencies all

Error Message  UFDM-3-UFDM_PRO_CC_SESSION_TIMEDOUT: Proactive CC session timedout. Aborting session. CC state [chars] Type [dec]

Explanation  Proactive CC end session not received. session timedout Client might be stuck. Restarting the session

Recommended Action  No action is required.

UFDM-5

Error Message  UFDM-5-DNLD_TIMEDOUT: Download timer expired: [chars]

Explanation  UFDM download timer expired. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action  No action is required.

UFDM-6

Error Message  UFDM-6-FIB_IPv4_CONSISTENCY_CHECKER_START: FIB IPv4 consistency checker started on slot [chars]

Explanation  FIB Ipv4 route/adjacency consistency checker has been started

Recommended Action  No action is required.

Error Message  UFDM-6-FIB_IPv4_CONSISTENCY_CHECKER_STOP: FIB IPv4 consistency checker stopped on slot [chars]

Explanation  FIB Ipv4 route/adjacency consistency checker has been stopped

Recommended Action  No action is required.

Error Message  UFDM-6-FIB_IPv6_CONSISTENCY_CHECKER_START: FIB IPv6 consistency checker started on slot [chars]

Explanation  FIB Ipv6 route/adjacency consistency checker has been started

Recommended Action  No action is required.

Error Message  UFDM-6-FIB_IPv6_CONSISTENCY_CHECKER_STOP: FIB IPv6 consistency checker stopped on slot [chars]

Explanation  FIB Ipv6 route/adjacency consistency checker has been stopped

Recommended Action  No action is required.

VLAN_MGR Messages

This section contains the VLAN_MGR messages.

VLAN_MGR-2

Error Message  VLAN_MGR-2-CRITICAL_MSG: [chars]

Explanation  VLAN Manager Critical Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-FABRIC_DYNAMIC_CORE_VLAN_RANGE_REMOVED: Fabric dynamic and core VLAN ranges removed. Please delete VLANs [chars] in the ranges

Explanation  VLAN Manager Core VLAN Range Removal Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-VLAN_DELETE_FAILED_RSN_BD_EXIST: VTP request to delete VLAN(s) [chars] could not be processed. Bridge Domains exist for VLANs [chars]

Explanation  VLAN delete failed since Bridge Domains Exist

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-VLAN_MGR_SENDING_STP_WITH_MODE_CHANGE_1: Vlan_mgr: sending stp with mode change - 1

Explanation  VLAN Manager is sending STP with mode change - 1

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-VLAN_MGR_VLAN_NOT_PRESENT: Dynamic VLAN [dec] is not configured, please check vlan global configuration!

Explanation  VLAN Manager failed to bring up Dynamic VLAN Message

Recommended Action  No action is required.

VLAN_MGR-3

Error Message  VLAN_MGR-3-ERROR_MSG: [chars]

Explanation  VLAN manager error

Recommended Action  No action is required.

Error Message  VLAN_MGR-3-VLAN_MGR_DVLAN_FAILED_UP: Dynamic VLAN [dec] failed to be up! err:0x[hex]:[chars]

Explanation  VLAN Manager failed to bring up Dynamic VLAN Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-3-VLAN_MGR_VLAN_NOT_ACTIVE: Dynamic VLAN [dec] is not active, please check configuration!

Explanation  VLAN Manager failed to bring up Dynamic VLAN Message

Recommended Action  No action is required.

VLAN_MGR-4

Error Message  VLAN_MGR-4-WARN_MSG: [chars]

Explanation  VLAN manager warning

Recommended Action  No action is required.

VLAN_MGR-5

Error Message  VLAN_MGR-5-NOTIF_MSG: [chars]

Explanation  VLAN Manager Notification Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-5-RESERVED_VLAN_RANGE_CHANGED: New Reserved VLAN Range Configured From VLAN [dec] to VLAN [dec]

Explanation  VLAN Manager Reserved VLAN Reconfiguration Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-5-VLAN_MGR_DVLAN_TEARDOWN: Dynamic VLAN [dec] is teared down by dot1x for interface 0x[hex] !

Explanation  VLAN Manager has Dynamic VLAN torn down Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-5-VLAN_MGR_DVLAN_UP: Dynamic VLAN [dec] is up for interface 0x[hex] !

Explanation  VLAN Manager has Dynamic VLAN up Message

Recommended Action  No action is required.

VLAN_MGR-6

Error Message  VLAN_MGR-6-INFO_MSG: [chars]

Explanation  VLAN manager info

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_CREATED: VLAN [dec], created

Explanation  VLAN created

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_MGR_STATEFULL_RESTART: VLAN Manager statefull restart

Explanation  VLAN Manager statefull restart

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_MGR_STATELESS_RESTART: VLAN Manager stateless restart

Explanation  VLAN Manager stateless restart

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_OPER_STATUS_CHG: VLAN [dec], status changed to [chars]

Explanation  VLAN operational state change

Recommended Action  No action is required.

VNI Messages

This section contains the VNI messages.

VNI-2

Error Message  VNI-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The service failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

VNI-3

Error Message  VNI-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

VNI-6

Error Message  VNI-6-INTERFACE_EVENT: VSAN interface [chars] [chars]

Explanation  The specified VSAN Interface has been successfully [chars].

Recommended Action  No action is required.

Error Message  VNI-6-STARTING: Virtual Network Interface Manager started

Explanation  The service has successfully started.

Recommended Action  No action is required.

Error Message  VNI-6-VSAN_DELETED: VSAN [dec] has been deleted

Explanation  The specified VSAN has been deleted. The service will delete all the configuration on that VSAN.

Recommended Action  No action is required.

VPC Messages

This section contains the VPC messages.

VPC-2

Error Message  VPC-2-L3_VPC_UNEQUAL_WEIGHT: Layer3 peer-router is enabled. Please make sure both vPC peers have the same L3 routing configuration

Explanation  Unequal weight routing is not supported when layer3 peer-router is enabled

Recommended Action  No action is required.

Error Message  VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain [dec], VPC peer keep-alive receive has failed

Explanation  Peer keep-alive receive failed

Recommended Action  No action is required.

Error Message  VPC-2-PEER_KEEP_ALIVE_SEND_FAIL: In domain [dec], VPC peer keep-alive send has failed

Explanation  Peer keep-alive send failed

Recommended Action  No action is required.

Error Message  VPC-2-PEER_VPC_RESP_TIMEDOUT: Failed to receive response from peer for vPC: [dec]

Explanation  VPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-2-TRACK_INTFS_DOWN: In domain [dec], vPC tracked interfaces down, suspending all vPCs and keep-alive

Explanation  VPC tracked object down

Recommended Action  No action is required.

Error Message  VPC-2-VPCCONFIG_ON_FPC: A green start is a must after ISSU for VPC config on FPC(0x[hex]) for AA-FEX bringup. Please ignore if you already reloaded the switch after upgrading to version >= 7.0.3(I5)2

Explanation  Green start (post ISSU) is a must to ensure programming correctness before configuring AA-FEXes

Recommended Action  No action is required.

Error Message  VPC-2-VPCM_FEATURE_ENABLE_FAILED: Enabling of vPCM Service failed. Please disable feature Flexlink first.

Explanation  Enabling of vPCM Service failed

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ADD_L3_BKUP_VLAN_TO_PEER_GW_EXCLUDE_LIST: Exclude L3 backup routing VLAN from vpc peer-gateway config.

Explanation  Triggered when peer-link is F1 and peer-gateway is configured without exclude-vlan list.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_CORE_PORT_FPATH_BUP_FAILED: Failed to bring up vPC+ peer link port [chars] in Fabric Path Port Mode - vPC+ Fabric Path switch ID not configured

Explanation  VPC+ Failed to bringup peer-link - switch-ID not configured

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_FAILED_LID_ALLOC: Failed to negotiate common LID between vPC peers.

Explanation  Failed to find common lid.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_FAILED_PEERLINK_DOWN: vPC+ operations failed. Bringing down peer-link.

Explanation  Triggered in mcecm_em_es_failed. Bring down peer-link.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_PEER_LINK_OPERATION_FAILED: Peer-link operation failed due to SAP [dec].

Explanation  Triggered in mcecm_cfg_es_failed when peer-link bringup fails.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_GRACEFUL_SUSP_ALL_VPC: Operational graceful type-1 check state changed, reinitiating all vPCs

Explanation  Graceful state change,reinit vPCs

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ISSU_END: Peer vPC switch ISSU end, unlocking configuration

Explanation  Peer vPC switch issu end

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ISSU_START: Peer vPC switch ISSU start, locking configuration

Explanation  Peer vPC switch issu start

Recommended Action  No action is required.

Error Message  VPC-2-VPC_LC_FAIL: LC [dec] does not support required hardware for vPC; run 'show vdc membership status' for port status

Explanation  Lc insertion failed

Recommended Action  No action is required.

Error Message  VPC-2-VPC_NON_DEF_LID: vPC+ negotiated non-default local id. Flapping orphan edge ports recommended.

Explanation  Triggered in mcecm_em_es_failed. Bring down peer-link.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_PEER_LINK_FPATH_BUP_FAILED: Failed to bring up vPC+ peer link port [chars] - port [chars] is not configured as a Fabric Path port

Explanation  VPC+ Failed to bringup Peer-link - not in Fabric Path mode

Recommended Action  No action is required.

Error Message  VPC-2-VPC_PSS_ERROR: [chars], 0x([hex]) present in VPC DB but not is IM DB

Explanation  Triggered when vpc DB and IM SDB are inconsistent

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_CLEANUP_FAILURE_NEED_REINIT_MCT: vPC role change cleanup has encountered a failure. Please reinit peer-link to recover. Error: [chars]

Explanation  VPC RC failure, need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_FAILURE_NEED_REINIT_MCT: vPC role change has encountered a failure, can not clean up. Please reinit peer-link to recover. Error: [chars]

Explanation  VPC RC failure, need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_MCT_CMPT_FAIL: Can't perform role change since there are type-1 check failures on peer-link at peer side.

Explanation  VPC RC failure, due to cmpt failed on peer-link at peer side

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_PEER_CMPT_FAIL: Can't perform role change since there are vpc legs with type-1 check failure at peer side.

Explanation  VPC RC failure, due to cmpt failed vpcs at peer side

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_UNFINISHED_RC: Can't perform role change since there is another unfinished role change request on either local or peer side. Please wait until it is finished.

Explanation  VPC RC failure, due to an unfinished RC

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ROLE_CHANGE_NOTIFICATION: VPC role is changed from [chars] to [chars]

Explanation  VPC role is changed

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SHUTDOWN: vPC shutdown status is [chars]

Explanation  VPC shutdown status change

Recommended Action  No action is required.

Error Message  VPC-2-VPC_STATE_CHANGE_ON_PEER_ISSU: VPC [dec] state transition happened during peer ISSU, please shut and no shut the VPC PO on both the Switches

Explanation  VPC state change during peer on ISSU, check the HW programming on both the switches

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SUSP_ALL_VPC: Peer-link going down, suspending all vPCs on secondary. If vfc is bound to vPC, then only ethernet vlans of that VPC shall be down.

Explanation  Peer link down suspend vPCs

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SVI_EXCLUDE: vPC [dec] has up vlans [chars] which are excluded from suspension on dual-active

Explanation  VPC track object deconfigured

Recommended Action  No action is required.

VPC-3

Error Message  VPC-3-FEX_AA_NO_SUPPPORT: FEX AA not supported

Explanation  FEX AA not supported

Recommended Action  No action is required.

Error Message  VPC-3-GLOBAL_CONSISTENCY_FAILED: In domain [dec], global configuration is not consistent ([chars])

Explanation  Global compat-check failed

Recommended Action  No action is required.

Error Message  VPC-3-INTF_CONSISTENCY_FAILED: In domain [dec], VPC [dec] configuration is not consistent ([chars])

Explanation  MCEC compat-check failed

Recommended Action  No action is required.

Error Message  VPC-3-PEER_UNREACHABLE: Remote Switch Unreachable

Explanation  Peer unreachable

Recommended Action  No action is required.

Error Message  VPC-3-PEER_VPC_BRINGUP_FAILED: Peer vPC [dec] bringup failed ([chars])

Explanation  Peer vPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_ASSERTION_FAILED: [chars]

Explanation  VPCM has hit an assert condition at file [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_INIT_FAIL: vPC Manager Initialization Failed ([chars])

Explanation  VPCM Initialization failed. due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_INTERNAL_ERR: [chars]

Explanation  VPCM encountered an internal error due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_MTS_ERR: [chars]

Explanation  VPCM encountered an MTS error due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPC_BRINGUP_FAILED: vPC [dec] bringup failed ([chars])

Explanation  VPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPC_PEER_LINK_BRINGUP_FAILED: vPC peer-link bringup failed ([chars])

Explanation  VPC Peer-link bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPC_PEER_LINK_DOWN: VPC Peer-link is down

Explanation  VPC Peer link is down

Recommended Action  No action is required.

Error Message  VPC-3-VPC_RC_FAILURE_NO_NEED_REINIT_MCT: vPC role change has encountered a failure, will clean up, error: [chars]

Explanation  VPC RC failure, no need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-3-VPC_ROLE_CHANGE_FAILURE: vPC role change failed, error: [chars]:0x[hex]

Explanation  VPC Role Change failure

Recommended Action  No action is required.

VPC-4

Error Message  VPC-4-PEER_VPC_DELETED: Peer vPC [dec] deleted

Explanation  Peer vPC configuration deleted

Recommended Action  No action is required.

Error Message  VPC-4-VPC_CFGD_EXISTING: vPC [dec] might be used already, please check vpc configuration!

Explanation  VPC configuration duplication

Recommended Action  No action is required.

Error Message  VPC-4-VPC_CONSISTENCY_NEW_VLAN_FAIL: Global Consistency check for vPC failed for new vlans

Explanation  Global Consistency check for vPC failed for new vlans

Recommended Action  No action is required.

Error Message  VPC-4-VPC_DELETED: vPC [dec] is deleted

Explanation  VPC configuration deleted

Recommended Action  No action is required.

Error Message  VPC-4-VPC_DISABLE_IP_REDIRECTS: peer-gateway enabled. Disabling IP redirects on all interface-vlans of this vPC domain for correct operation of this feature.

Explanation  Peer-gateway enabled, hence IP redirects on SVIs are disabled

Recommended Action  No action is required.

Error Message  VPC-4-VPC_LC_UPG_OVER_DELIVERY_FAIL: Failed to deliver LC upgrade to vPC peer

Explanation  Failed to deliver LC upgrade to peer

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PEER_LINK_DELETED: vPC Peer-link deleted. This will bringdown all vPC interfaces

Explanation  VPC Peer-link configuration removed

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PEER_ROLE_CHANGE: In domain [dec], VPC peer role status has changed to [chars]

Explanation  VPC Peer role status changed to (Primary/Secondary

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PER_VLAN_CONSISTENCY_FAILED: Global consistency check for vPC failed for few vlans

Explanation  Global Consistency check for vPC failed for few vlans

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PER_VLAN_NO_SUPPORT: ISSD/ISSU to an image that does not support "per-vlan type-1 check" will not bring down/up any vlan (i.e. nothing will happen) until next compat-check.

Explanation  Triggered when ISSU/ISSD to an image which does not support per-vlan compat-check

Recommended Action  No action is required.

Error Message  VPC-4-VPC_REINITIALIZED: Reinitializing vpcs assuming peer dead

Explanation  Initializing vpcs assuming peer dead

Recommended Action  No action is required.

Error Message  VPC-4-VPC_ROLE_CHANGE: In domain [dec], VPC role status has changed to [chars]

Explanation  VPC role status changed to (Primary/Secondary

Recommended Action  No action is required.

VPC-5

Error Message  VPC-5-GLOBAL_CONSISTENCY_SUCCESS: In domain [dec], global configuration is consistent

Explanation  Global compat-check passed

Recommended Action  No action is required.

Error Message  VPC-5-INTF_CONSISTENCY_SUCCESS: In domain [dec], vPC [dec] configuration is consistent

Explanation  VPC configuration is consistent

Recommended Action  No action is required.

Error Message  VPC-5-ORPHANPORT_RESUME: Orphan-port [chars] is removed from suspended

Explanation  Orphan-port is removed from suspended due to peer-link up or VPC role selection

Recommended Action  No action is required.

Error Message  VPC-5-ORPHANPORT_SUSPEND: Orphan-port [chars] is suspended

Explanation  Orphan-port is suspended due to peer-link down or no VPC role selection

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_RECV_INT_LATEST: In domain [dec], VPC peer-keepalive received on interface [chars]

Explanation  VPC peer-keepalive receive interface changed

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_RECV_SUCCESS: In domain [dec], vPC peer keep-alive receive is successful

Explanation  Peer keep-alive receive successful

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_SEND_INT_LATEST: In domain [dec], VPC peer-keepalive sent on interface [chars]

Explanation  VPC peer-keepalive send interface changed

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_SEND_SUCCESS: In domain [dec], vPC peer keep-alive send is successful

Explanation  Peer keep-alive send successful

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_STATUS: In domain [dec], peer keep-alive status changed to [chars]

Explanation  Peer keep-alive (oob) status is changed to

Recommended Action  No action is required.

Error Message  VPC-5-ROLE_PRIORITY_CFGD: In domain [dec], vPC role priority changed to [dec]

Explanation  Role priority configured

Recommended Action  No action is required.

Error Message  VPC-5-SYSTEM_MAC_CFGD: In domain [dec], vPC system-mac changed to [chars]

Explanation  System mac configured

Recommended Action  No action is required.

Error Message  VPC-5-SYSTEM_PRIO_CFGD: In domain [dec], vPC system priority changed to [dec]

Explanation  System priority changed

Recommended Action  No action is required.

Error Message  VPC-5-VPCM_DISABLED: vPC Manager disabled

Explanation  VPCM Service Disabled

Recommended Action  No action is required.

Error Message  VPC-5-VPCM_ENABLED: vPC Manager enabled

Explanation  VPCM Service Enabled

Recommended Action  No action is required.

Error Message  VPC-5-VPC_AUTO_RECOVERY_TIMER_EXPIRED: vPC auto-recovery timer expired

Explanation  VPC auto-recovery timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_AUTO_RECOVERY_TIMER_STARTED: vPC auto-recovery timer started

Explanation  VPC auto-recovery timer started

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DELAY_SVI_BUP_TIMER_EXPIRED: vPC restore, delay interface-vlan bringup timer expired, reinitiating interface-vlans

Explanation  VPC delay interface-vlan restore timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DELAY_SVI_BUP_TIMER_START: vPC restore, delay interface-vlan bringup timer started

Explanation  VPC delay interface-vlan restore timer start

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DOWN: vPC [dec] is down ([chars])

Explanation  VPC is down (reason)

Recommended Action  No action is required.

Error Message  VPC-5-VPC_OPERATIONAL_L3_ROUTING: VPC operational layer 3 peer-router is [chars]

Explanation  VPC operational layer 3 peer-router enabled or disabled

Recommended Action  No action is required.

Error Message  VPC-5-VPC_PEER_LINK_UP: vPC Peer-link is up

Explanation  VPC Peer-link is up

Recommended Action  No action is required.

Error Message  VPC-5-VPC_RESTORE_TIMER_EXPIRED: vPC restore timer expired, reinitiating vPCs

Explanation  VPC restore timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_RESTORE_TIMER_START: vPC restore timer started to reinit vPCs

Explanation  VPC restore timer start

Recommended Action  No action is required.

Error Message  VPC-5-VPC_ROLE_PREMPT: In domain [dec], vPC role pre-emption triggered

Explanation  VPC preemption triggered

Recommended Action  No action is required.

Error Message  VPC-5-VPC_SCALE_LIMIT: No port-channel limit configuration is [chars]

Explanation  No port-channel limit configuration is changed

Recommended Action  No action is required.

Error Message  VPC-5-VPC_UP: vPC [dec] is up

Explanation  MCEC is UP

Recommended Action  No action is required.

VPC-6

Error Message  VPC-6-PEER_LOCK_FAILED: Locking failed on peer switch - Aborting upgrade!!

Explanation  Locking failed on peer switch

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_CFGD_VLANS_CHANGED: Peer vPC [dec] configured vlans changed

Explanation  Remote MCEC configured vlans Changed

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_CFGD: peer vPC [dec] is configured

Explanation  VPC is configured

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_DOWN: Peer vPC [dec] is down ([chars])

Explanation  Peer vPC is down

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_UP: Peer vPC [dec] is up

Explanation  Peer vPC is up

Recommended Action  No action is required.

Error Message  VPC-6-STATS_CLEARED: vPC Statistics Cleared

Explanation  VPC statistics cleared

Recommended Action  No action is required.

Error Message  VPC-6-TRACK_OBJ_CONFIGURED: In domain [dec], track object configured [dec]

Explanation  VPC track object configured

Recommended Action  No action is required.

Error Message  VPC-6-TRACK_OBJ_DELETED: In domain [dec], track object deleted

Explanation  VPC track object deconfigured

Recommended Action  No action is required.

Error Message  VPC-6-TYPE1_PARAM_CHANGED: TYPE-1 parameters changed: [chars]

Explanation  Type-1 Parameters Changed

Recommended Action  No action is required.

Error Message  VPC-6-VPCM_INTERNAL_INFO: [chars]

Explanation  VPCM got an internal info [chars]

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ALLOWED_VLAN_CHANGED: vPC [dec] operational vlans changed

Explanation  Operational vlans changed on vPC

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CFGD: vPC [dec] is configured

Explanation  VPC is configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CONSISTENCY_CHECK_BYPASS: Bypassing consistency check for vPC: [dec]

Explanation  Bypassing consistency check for vpcs

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CONSISTENCY_NEW_VLAN_PASS: Global Consistency check for vPC passed for new vlans

Explanation  Global Consistency check for vPC passed for new vlans

Recommended Action  No action is required.

Error Message  VPC-6-VPC_DOMAIN_ID_CFGD: vPC domain-id configured to [dec]

Explanation  VPC domain-id configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_EGRESS_DF_STATE_CHANGED: Egress designated forwarder state changed from [chars] to [chars] for vPC [dec].

Explanation  DF state changed for some vPC.

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_ID_CFGD: Fabricpath switch ID [dec] configured

Explanation  Fabricpath switch ID configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_ID_REMOVED: Fabricpath switch ID [dec] removed

Explanation  Fabricpath switch ID removed

Recommended Action  No action is required.

Error Message  VPC-6-VPC_LOCAL_L3_ROUTING: VPC local layer 3 peer is [chars]

Explanation  VPC local layer 3 peer enabled or disabled

Recommended Action  No action is required.

Error Message  VPC-6-VPC_PEER_LINK_CFGD: vPC peer-link is configured

Explanation  VPC Peer-link is configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_PER_VLAN_CONSISTENCY_PASSED: Global Consistency check for vPC passed for all vlans

Explanation  Global Consistency check for vPC passed for all vlans

Recommended Action  No action is required.

VRRP-CFG Messages

This section contains the VRRP-CFG messages.

VRRP-CFG-2

Error Message  VRRP-CFG-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The service failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

Error Message  VRRP-CFG-2-VSH_REGISTER_FAIL: VSH registration failed returning [dec]

Explanation  VRRP's parse tree registration with VSH failed

Recommended Action  No action is required.

VRRP-CFG-3

Error Message  VRRP-CFG-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

Error Message  VRRP-CFG-3-VRRP_FEATURE_MANAGER_ERROR: Error in feature manager operation

Explanation  The feature manager operation did not go through fine

Recommended Action  Please check the reason for error using feature manager and rectify the problem

VRRP-CFG-5

Error Message  VRRP-CFG-5-STARTING: VRRP Manager service started

Explanation  The service successfully started.

Recommended Action  No action is required.

VRRP-ENG Messages

This section contains the VRRP-ENG messages.

VRRP-ENG-2

Error Message  VRRP-ENG-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The service failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

Error Message  VRRP-ENG-2-VR_FAILURE: Error in VR[chars] [dec] interface [chars]. Going to init state

Explanation  The VR [dec] on the interface [chars] is in init state for an internal error.

Recommended Action  Show interface to check the status of the interface, show configuration, status and statistics of the specified virtual router, enable the vrrp debug and shut/ no shut the specified virtual router.

VRRP-ENG-3

Error Message  VRRP-ENG-3-ARP_INIT_ERROR: Failed to init ARP, ret 0x[hex], errno [dec]

Explanation  VRRP-ARP interaction failed.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-BFD_IF_SESSION_REMOVAL_ERROR: Failed to remove interface level VRRP-BFD sessions (0x[hex] 0x[hex]), Refer logs

Explanation  Plz refer internal error history for more details.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-BFD_SESSION_ADD_ERROR: Failed to add a few VRRP-BFD sessions(0x[hex] 0x[hex]), Refer logs

Explanation  Plz refer internal error history for more details.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-BFD_SESSION_CREATION_ERROR: Failed to create BFD session information(0x[hex] 0x[hex]), Refer logs

Explanation  Plz refer internal error history for more details.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-BFD_SESSION_REMOVAL_ERROR: Failed to remove a few VRRP-BFD sessions(0x[hex] 0x[hex]), Refer logs

Explanation  Plz refer internal error history for more details.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

Error Message  VRRP-ENG-3-IP_INIT_ERROR: Failed to init IP, ret 0x[hex], errno [dec]

Explanation  VRRP-IP interaction failed.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-L3VM_INIT_ERROR: Failed to init L3VM, ret 0x[hex], errno [dec]

Explanation  VRRP-L3VM interaction failed.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-URIB_INIT_ERROR: Failed to init URIB, ret 0x[hex], errno [dec]

Explanation  VRRP-URIB interaction failed.

Recommended Action  No action is required.

VRRP-ENG-4

Error Message  VRRP-ENG-4-BAD_ADV: VR[chars] ID [dec] on interface [chars] bad advertisement received: reason [chars]

Explanation  The virtual router specified has received an invalid advertisement.

Recommended Action  Check that all VRRP nodes have the same configuration.

VRRP-ENG-5

Error Message  VRRP-ENG-5-INTERFACE_DOWN: Cannot start the VR[chars] [dec] since the interface [chars] is down

Explanation  The specified VR is enabled but can't change state from init. The specified interface is down or doesn't have a primary IP address configured.

Recommended Action  No action is required.

Error Message  VRRP-ENG-5-INTERFACE_STATE_CHANGE: Interface [chars] state changed to [chars]

Explanation  The interface specified has changed state This could have triggered a VRRP status change.

Recommended Action  No action is required.

Error Message  VRRP-ENG-5-INVALID_CONFIG: Cannot start the VR[chars] [dec] on the interface [chars]. Invalid IP configuration. Reason: [chars]

Explanation  The specified VR on interface [chars] is enabled but the IP configuration is not valid because of [chars].

Recommended Action  Show interface to check that the IP address of the interface is configured and it is in the same subnet of the virtual router address.

Error Message  VRRP-ENG-5-STARTING: VRRP Engine service started

Explanation  The service successfully started.

Recommended Action  No action is required.

Error Message  VRRP-ENG-5-VR_STATE_CHANGE: VR[chars] ID [dec] on interface [chars] state changed to [chars], event [chars]

Explanation  The status of the specified virtual router has changed to [chars].

Recommended Action  No action is required.

VRRP-ENG-6

Error Message  VRRP-ENG-6-VSHA_RESULT: VR ID [dec] on interface [chars] state change request result [chars]

Explanation  The result of the request for status change on the virtual router (with VSHA extension) specified is [chars].

Recommended Action  No action is required.

VSHD Messages

This section contains the VSHD messages.

VSHD-1

Error Message  VSHD-1-FILE_OPEN_FAILED: Failed to open [chars] : [chars]

Explanation  Could not update the non MDP command to startup config

Recommended Action  Execute the command again. If issue persists, check the file system based on the error

Error Message  VSHD-1-FILE_SYNC_FAILED: Cannot sync ([chars]) '[chars]' to standby

Explanation  Syncing non MDP configuration file to standby failed. If switchover is performed, startup config may not be proper

Recommended Action  Execute the command again. If issue persists collect show tech ha, show tech ascii

Error Message  VSHD-1-MTS_BIND_FAILED: mts_bind to dynamic sap failed [dec]:[chars]

Explanation  Could not sync non MDP configuration file to standby due to MTS failure. If switchover is performed, startup config may not be proper

Recommended Action  Execute the command again followed by copy r s

VSHD-2

Error Message  VSHD-2-VSHD_CC_DME: [chars]

Explanation  Consistency checker between DME DB and running DB

Recommended Action  Please collect show tech dme, show tech dmecc and accounting log if consistency checker fails

Error Message  VSHD-2-VSHD_INVALID_HA_OPERATOR_OID: Unknown ha operator: [dec]

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-2-VSHD_INVALID_ROLE_OPCODE_OID: Invalid role op code [chars]

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-2-VSHD_INVALID_ROLE_SYNC_OID: Invalid role sync msg received

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-2-VSHD_INVALID_SUBTYPE_RANGE_OID: the name, the lower or the upper value of the subtype are not correct

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-2-VSHD_ROLE_DATABASE_TOO_LARGE: Role database too large. Unable to add RBAC entry

Explanation  There are too many rules and policies configured causing the entire role database too exceed 120KB

Recommended Action  Please delete some rules, policies, or roles and try to better optimize the RBAC database

Error Message  VSHD-2-VSHD_SYSLOG_EOL_ERR: EOL function [chars] from library [chars] exited due to Signal [dec]

Explanation  Error in CLI EOL function

Recommended Action  No action is required.

Error Message  VSHD-2-VSHD_SYSLOG_PSS_SNAPSHOT_ERR: Source URI:[chars] Destination URI:[chars] errcode:[dec]

Explanation  PSS snapshot error

Recommended Action  No action is required.

Error Message  VSHD-2-VSHD_SYSLOG_SDWRAP_ERR: Description:[chars] errcode:[dec]

Explanation  Debug infrastructure error

Recommended Action  No action is required.

VSHD-3

Error Message  VSHD-3-VSHD_ROLE_DISTRIBUTE_FAILURE: Role distribution operation ([chars]) failed with error id 0x[hex]

Explanation  This is probably occurring due to unstable fabric

Recommended Action  Please retry operation when fabric is stable

Error Message  VSHD-3-VSHD_SYSLOG_FILE_ERR: Purpose:[chars] Filename:[chars] errcode:[dec]

Explanation  File handling error

Recommended Action  No action is required.

Error Message  VSHD-3-VSHD_SYSLOG_MTS_ERR: message [chars]

Explanation  MTS message handling error

Recommended Action  No action is required.

Error Message  VSHD-3-VSHD_SYSLOG_PARSE_TREE_ERR: [chars]

Explanation  Error while updating parse tree in shell

Recommended Action  No action is required.

Error Message  VSHD-3-VSHD_SYSLOG_PSS_ERR: Purpose:[chars] URI:[chars] errcode:[dec]

Explanation  PSS handling error

Recommended Action  No action is required.

VSHD-4

Error Message  VSHD-4-VSHD_LICENSE_EXPIRY_WARNING: License [chars] expires on [chars]. Vsan policy will be set to default (deny) for all roles when license expires

Explanation  Vsan policy would be set default (deny) for all roles when license expires

Recommended Action  Please install the license file to continue using the feature.

Error Message  VSHD-4-VSHD_MTS_ERROR_OID: [chars]

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-4-VSHD_PORT_CHANNEL_CREATE: [chars]

Explanation  This is probably occurring when trying to create more port channels than allowed

Recommended Action  Please collect show tech, accounting logs and debugs

Error Message  VSHD-4-VSHD_ROLE_DATABASE_OUT_OF_SYNC: Role configuration database found to be different between the switches during merge

Explanation  Role configuration database is recommended to be identical among all switches in the fabric.

Recommended Action  Edit the configuration on one of the switches to obtain the desired role configuration database and then commit it

Error Message  VSHD-4-VSHD_ROLE_DATABASE_VERSION_NOT_UNDERSTOOD: This switch does not understand the version of role configuration database received during merge

Explanation  This is probably occurring due to different versions of system image on switches in the fabric

Recommended Action  Please make sure all switches are running the same version of the system image

Error Message  VSHD-4-VSHD_ROLE_RULE_ACCESS_SCOPE_EXTRA_OID: Too many oid elements. Please enter up to 32.

Explanation  This is probably occurring due to the value given for snmp oid field is more than 32 elements

Recommended Action  Please make sure the oid element should not exceed 32

Error Message  VSHD-4-VSHD_ROLE_RULE_ACCESS_SCOPE_INVALID_OID: Rule access scope OID value is Invalid

Explanation  This is probably occurring due to the value given for snmp oid field is neither digit nor dot

Recommended Action  Please make sure the oid value should only contains digit and dot

VSHD-5

Error Message  VSHD-5-VSHD_CLI_COMMIT_ID: Configuration committed by user '[chars]' using Commit ID : [chars]

Explanation  Dual stage commit from cli

Recommended Action  No action is required.

Error Message  VSHD-5-VSHD_CLI_TERM_LOCK: [chars] by [chars] on [chars]

Explanation  Terminal lock/unlock executed

Recommended Action  No action is required.

Error Message  VSHD-5-VSHD_RLBK_COMMIT_ID: Configuration committed by rollback using Commit ID : [chars]

Explanation  Dual stage commit from rollback

Recommended Action  No action is required.

Error Message  VSHD-5-VSHD_SYSLOG_CMD_EXEC: User:[chars] executed the command:[chars]

Explanation  CLI command was executed

Recommended Action  No action is required.

Error Message  VSHD-5-VSHD_SYSLOG_CONFIG_CHANGE: VDC="[chars]", VTY="[chars]", user="[chars]", CMD="[chars]"

Explanation  Configuration change notification

Recommended Action  No action is required.

Error Message  VSHD-5-VSHD_SYSLOG_CONFIG_I: Configured from vty by [chars] on [chars]

Explanation  CLI Configuration mode was exited

Recommended Action  No action is required.

Error Message  VSHD-5-VSHD_SYSLOG_ROLE_CREATED: New cli role [chars] created

Explanation  New cli role created

Recommended Action  No action is required.

VSHD-7

Error Message  VSHD-7-VSHD_SYSLOG_PARSE_TREE_UPDATE: Parse tree [chars]

Explanation  Parse tree updated in shell

Recommended Action  No action is required.

XMLMA Messages

This section contains the XMLMA messages.

XMLMA-2

Error Message  XMLMA-2-HEARTBEAT_FAIL: XML master agent failed to send heart beat: [chars]

Explanation  XML master agent has failed sending heartbeat.

Recommended Action  No action is required.

Error Message  XMLMA-2-INITFAIL: XML master agent initialization fails: [chars]

Explanation  XML master agent has failed initialization.

Recommended Action  No action is required.

Error Message  XMLMA-2-MTSERROR: XML master agent mts operation failed: [chars]

Explanation  XML master agent mts operation failed.

Recommended Action  No action is required.

Error Message  XMLMA-2-PSSFAILURE: XML master agent pss operation failed: [chars]

Explanation  XML master agent pss operation failed.

Recommended Action  No action is required.

Error Message  XMLMA-2-XMLMACRIT: XML master agent: [chars]

Explanation  XML master agent critical log.

Recommended Action  No action is required.

XMLMA-3

Error Message  XMLMA-3-XMLMAERR: XML master agent: [chars]

Explanation  XML master agent error log.

Recommended Action  No action is required.

XMLMA-5

Error Message  XMLMA-5-STARTING: XML master agent started [chars]

Explanation  XML master agent has been started.

Recommended Action  No action is required.

XMLMA-6

Error Message  XMLMA-6-XMLMAEXIT: XML master agent exiting...: [chars]

Explanation  XML master agent is exiting.

Recommended Action  No action is required.

Error Message  XMLMA-6-XMLMALOG: XML master agent operation log: [chars]

Explanation  XML master agent operation log.

Recommended Action  No action is required.

XMLSA Messages

This section contains the XMLSA messages.

XMLSA-2

Error Message  XMLSA-2-CANDIDATE_WRITE_FAIL: Netconf session id:[dec],candidate config has no space left

Explanation  No space left in candidate configuration of the netconf session.

Recommended Action  Please send the commit or discard request for the outstanding config.

Error Message  XMLSA-2-HEARTBEAT_FAIL: XML sub agent failed sending heart beat: [chars]

Explanation  XML sub agent failed sending heartbeat.

Recommended Action  No action is required.

Error Message  XMLSA-2-INITFAIL: XML sub agent initialization fails: [chars]

Explanation  XML agent has failed initialization.

Recommended Action  No action is required.

Error Message  XMLSA-2-USER_INACTIVE: XML sub agent timeed out: [chars]

Explanation  XML sub agent timedout due to inactivity.

Recommended Action  No action is required.

Error Message  XMLSA-2-VSH_ERR: XML sub agent vsh cmd error...: [chars]

Explanation  XML sub agent vsh cmd error.

Recommended Action  No action is required.

XMLSA-5

Error Message  XMLSA-5-RPC_ERROR: Netconf session id:[dec], operation:[chars], status:FAILED, reason:[chars]

Explanation  Netconf operation has failed.

Recommended Action  No action is required.

Error Message  XMLSA-5-RPC_OK: Netconf session id:[dec], operation:[chars], status:SUCCESS

Explanation  Netconf operation is successful.

Recommended Action  No action is required.

Error Message  XMLSA-5-STARTING: XML sub agent started: [chars]

Explanation  XML sub agent has been started.

Recommended Action  No action is required.

XMLSA-6

Error Message  XMLSA-6-XMLSAEXIT: XML sub agent exiting...: [chars]

Explanation  XML sub agent is exiting.

Recommended Action  No action is required.

Error Message  XMLSA-6-XMLSALOG: XML sub agent log: [chars]

Explanation  XML sub agent log.

Recommended Action  No action is required.