Table of Contents

epld_rn_8x.fm

Cisco Nexus 7000 Series FPGA/EPLD Upgrade Release Notes, Release 8.x

First Published: December 22, 2016

Last Modified: May 30, 2024

Current Release: 8.2(1)

Table 1 shows the revision history changes for this document.

Table 1 Online History Change

Date

Description

May 30, 2024

Added PID in tables Supported Modules with the FPGA in Cisco NX-OS Releases 8.3(1) and Supported Modules with the FPGA in Cisco NX-OS Releases 8.0(1), 8.1(1), and 8.2(1).

July 5, 2018

Created for Cisco NX-OS Release 8.3(1).

September 27, 2017

Created for Cisco NX-OS Release 8.2(1).

May 3, 2017

Created for Cisco NX-OS Release 8.1(1).

December 22, 2016

Created for Cisco NX-OS Release 8.0(1).

This document includes the following sections:

- Introduction

- Deciding When to Upgrade EPLDs

- Switch Requirements

- EPLDs Available for Releases 8.x

- Determining Whether to Upgrade EPLD Images

- Downloading the EPLD Images

- Installation/Upgrade Guidelines

- Preparing the EPLD Images for Installation

- Manual Upgrading of EPLD Images

- Automatic Upgrading of EPLD Images

- Verifying the EPLD Upgrades and Downgrades

- Displaying the Available EPLD Versions

- Displaying the Status of EPLD Upgrades

- Limitations

- Related Documentation

- Obtaining Documentation and Submitting a Service Request

Introduction

The Cisco Nexus 7000 Series switches, which include the Cisco Nexus 70xx and 77xx switches, contain several programmable logical devices (PLDs) that provide hardware functionalities in all modules. Cisco provides electronic programmable logic device (EPLD) image upgrades to enhance hardware functionality or to resolve known issues. PLDs include electronic programmable logic devices (EPLDs), field programmable gate arrays (FPGAs), and complex programmable logic devices (CPLDs), but they do not include ASICs. In this document, the term EPLD is used for FPGA and CPLDs.

The advantage of having EPLDs for some module functions is that when you need to upgrade those functions, you just upgrade their software images instead of replacing their hardware.

Note EPLD image upgrades for an I/O module disrupt the traffic going through the module because the module must power down briefly during the upgrade. The system performs EPLD upgrades on one module at a time, so at any one time the upgrade disrupts only the traffic going through one module.

Cisco provides the latest EPLD images with each release. Typically, these images are the same as provided in earlier releases but occasionally some of these images are updated. To determine if there are any updated images, see Table 3. These EPLD image updates are not mandatory unless otherwise specified. The EPLD image upgrades are independent from the Cisco NX-OS In Service Software Upgrade (ISSU) process, which upgrades the system and kickstart images with no impact on the network environment.

When Cisco makes an EPLD image upgrade available, these release notes announce their availability, and you can download them from http://www.cisco.com.

The documentation set for this product strives to use bias-free language. For the purposes of this documentation set, bias-free is defined as language that does not imply discrimination based on age, disability, gender, racial identity, ethnic identity, sexual orientation, socioeconomic status, and intersectionality. Exceptions may be present in the documentation due to language that is hardcoded in the user interfaces of the product software, language used based on RFP documentation, or language that is used by a referenced third-party product.

Deciding When to Upgrade EPLDs

You do not always need to upgrade EPLD images but the following circumstances do require that you upgrade these images:

- If you are enabling software features that require EPLDs.

- If you are using M2 Series 100-Gbps Ethernet I/O modules that remain powered down after booting up the switch.

When new EPLD images are available, the upgrades are always recommended if your network environment allows for a maintenance period in which some level of traffic disruption is acceptable. If such a disruption is not acceptable at this time, then you might consider postponing the upgrade until a better time.

Note The EPLD upgrade operation is a disruptive operation. You should execute this operation only at a programmed maintenance time. The system/kickstart ISSU upgrade is a non disruptive upgrade.

Note Do not perform an EPLD upgrade during an ISSU system/kickstart upgrade.

Table 2 Conditions For Upgrading EPLD Images

Condition

Modules Recommended for Upgrades 1

Upgrading Supervisor 2 E from any Cisco Nexus N77xx device to Cisco Nexus N7702 device for For Release 7.2(0)D1(1).

Upgrading the Cisco NX-OS operating system from Release 4.x to Release 5.0 or later releases.

Update all supervisor, I/O, and fabric modules with the latest EPLD images.

1.We recommend (not mandatory) that you upgrade the EPLD images for the supervisor, I/O, and fabric modules.

Switch Requirements

The Cisco Nexus 7000 Series switch must be running the Cisco NX-OS operating system and include the following hardware:

- Supervisor modules—one or two, each with at least 140 MB of available bootflash or slot0 memory

- I/O modules—at least one

- Fabric modules—at least three (Cisco Nexus 7009, 7010, 7018, 7706, 7710, and 7718 only)

- Fan trays

– For the Cisco Nexus 7004, one fan tray

– For the Cisco Nexus 7009 chassis, one fan tray

– For the Cisco Nexus 7010 chassis, two system fan trays and two fabric fan trays

– For the Cisco Nexus 7018 chassis, two fan trays

– For the Cisco Nexus 7702 chassis, one fan tray

– For the Cisco Nexus 7706, 7710, and 7718 chassis, three fan trays

You must be able to access the switch through a console, SSH, or Telnet.

You must have administrator privileges to work with the Cisco Nexus 7000 Series switch.

EPLDs Available for Releases 8.x

Each EPLD image that you can download from https://www.cisco.com is a bundle of EPLD upgrades. To see the updated EPLD versions for each release, see Table 3.

Note Table 3 shows EPLD image numbers in X.00y format but the show commands might display these numbers in an older X.y format (without leading zeros) for earlier EPLD images.

Cisco NX-OS Release 8.3(1) includes the following EPLD images:

- n7700-s2-epld.8.3.1.img

- n7700-s3-epld.8.3.1.img

Note - There are no updates in Nexus 7000 Sup2 EPLD images. Hence n7000-s2-epld.8.3.1.img is not posted to https://www.cisco.com.

- If you decide to upgrade EPLD anyway, or it is determined necessary in your environment, then the following guidelines should be followed.

- For Cisco NX-OS Release 6.2(10) and later releases it is recommended to perform EPLD upgrade with the current image before upgrading to Cisco NX-OS Release 8.3(1).

- For releases prior to Cisco NX-OS Release 6.2(10), you need to first upgrade to Cisco NX-OS Release 6.2(10) or later releases and perform EPLD upgrade with the current image before upgrading to Cisco NX-OS Release 8.3(1).

- The above guidelines and limitations do not apply to the Nexus 7700 series switches, and their EPLD can be upgraded through the standard process if needed.

Please see CSCvk35999 for more details.

- n7000-s2-epld.8.2.1.img

- n7700-s2-epld.8.2.1.img

- n7000-s2-epld.8.1.1.img

- n7700-s2-epld.8.1.1.img

- n7000-s2-epld.8.0.1.img

- n7700-s2-epld.8.0.1.img

Table 3 Supported Modules with the FPGA in Cisco NX-OS Releases 8.3(1)

Module

FPGA Type

Version

Cisco Nexus 7000 Supervisor 2

PMFPGA

38.000

IOFPGA

1.013

Cisco Nexus 7000 Supervisor 2E

PMFPGA

38.000

IOFPGA

1.013

Cisco Nexus 7700 Supervisor 2E

PMFPGA

20.000

Fan-10 slot chassis (Cisco Nexus 7000 Series)

FAN

0.007

Fan-18 slot chassis (Cisco Nexus 7000 Series)

FAN

0.002

Fan-9 slot chassis (Cisco Nexus 7000 Series)

FAN

0.009

Fan-4 slot chassis (Cisco Nexus 7000 Series)

FAN

0.005

Fan-18 slot chassis (Cisco Nexus 7700 Series)

FAN

0.006

Fan-10 slot chassis (Cisco Nexus 7700 Series)

FAN

0.006

Fan-6 slot chassis (Cisco Nexus 7700 Series)

FAN

0.006

Fan-2 slot chassis (Cisco Nexus 7700 Series)

FAN

0.016

9 slot chassis (N7K:FAB2-7009)

PMFPGA

1.003

10 slot chassis (N7K:FAB2-7010)

PMFPGA

0.007

18 slot chassis (N7K:FAB2-7018)

PMFPGA

0.007

6 slot chassis (N77:FAB2-7706)

PMFPGA

1.002

10 slot chassis (N77:FAB2-7710)

PMFPGA

1.003

18 slot chassis (N77:FAB2-7718)

PMFPGA

1.002

6 slot chassis (N77:FAB3-7706)

PMFPGA

0.008

10 slot chassis (N77:FAB3-7710)

PMFPGA

0.007

Cisco Nexus 7000 M2-Series 24 Port 10 GbE with XL Option (N7K-M224XP-23L)

PMFPGA

1.006

IOFPGA

1.003

SFPFPGA

1.003

EARL (Forwarding Engine)

2.012

Cisco Nexus 7000 M2-Series 6 Port 40 GbE with XL Option (N7K-M206FQ-23L)

PMFPGA

1.006

IOFPGA

0.012

SFPFPGA

2.008

EARL (Forwarding Engine)

2.012

Cisco Nexus 7000 M2-Series 2 Port 100 GbE with XL Option (N7K-M202CF-22L)

PMFPGA

1.007

IOFPGA

0.009

SFPFPGA

0.004

EARL (Forwarding Engine)

2.012

Nexus 7000 Enhanced F2-Series 48 Port 1G/10G Ethernet Module (N7K-F248XP-25E)

PMFPGA

1.009

IOFPGA

0.016

Nexus 7700 F2e-Series 48-Port 1 and 10G Ethernet Module (N77-F248XP-23E)

PMFPGA

0.006

IOFPGA

0.005

Nexus 7000 F3-Series 48-Port Fiber 1 and 10G Ethernet Module (N7K-F348XP-25)

PMFPGA

1.000

IOFPGA

1.003

SFPFPGA

1.002

Nexus 7000 F3-Series 12-Port 40G Ethernet Module (N7K-F312FQ-25)

PMFPGA

2.003

IOFPGA

1.005

Nexus 7000 F3-Series 6-Port 100G Ethernet Module (N7K-F306CK-25)

PMFPGA

2.003

IOFPGA

1.004

Nexus 7700 F3-Series 48-Port Fiber 1 and 10G Ethernet Module (N77-F348XP-23)

PMFPGA

1.007

IOFPGA

0.031

SFPFPGA

1.003

Nexus 7700 F3-Series 24-Port 40G Ethernet Module (N77-F324FQ-25)

PMFPGA

1.005

IOFPGA

0.031

Nexus 7700 F3-Series 12-Port 100G Ethernet Module (N77-F312CK-26)

PMFPGA

1.008

IOFPGA

0.021

Cisco Nexus 7000 M3-Series 48-Port 1/10G Ethernet Module (N7K-M348XP-25L)

PMFPGA

1.001

IOFPGA

1.003

SFPFPGA

1.000

Cisco Nexus 7000 M3-Series 24-Port 40G Ethernet Module (N7K-M324FQ-25L)

PMFPGA

1.001

IOFPGA

1.002

SFPFPGA

1.000

Cisco Nexus 7700 M3-Series 48-Port 1/10G Ethernet Module (N77-M348XP-23L)

PMFPGA

1.002

IOFPGA

1.003

SFPFPGA

1.000

Nexus 7700 M3-Series 24-Port 40G Ethernet Module (N77-M324FQ-25L)

PMFPGA

1.002

IOFPGA

1.002

DBFPGA

1.000

Cisco Nexus 7700 M3-Series 12-Port 100G Ethernet Module (N77-M312CQ-26L)

PMFPGA

1.000

IOFPGA

1.002

DBFPGA

1.001

The following modules are supported in Cisco NX-OS Release 8.0(1), Cisco NX-OS Release 8.1(1) and in Cisco NX-OS Release 8.2(1):

Table 4 Supported Modules with the FPGA in Cisco NX-OS Releases 8.0(1), 8.1(1), and 8.2(1)

Module

FPGA Type

Version

Cisco Nexus 7000 Supervisor 2

PMFPGA

37.000

IOFPGA

1.013

Cisco Nexus 7000 Supervisor 2E

PMFPGA

36.000

IOFPGA

1.013

Cisco Nexus 7700 Supervisor 2E

PMFPGA

20.000

Fan-10 slot chassis (Cisco Nexus 7000 Series)

FAN

0.007

Fan-18 slot chassis (Cisco Nexus 7000 Series)

FAN

0.002

Fan-9 slot chassis (Cisco Nexus 7000 Series)

FAN

0.009

Fan-4 slot chassis (Cisco Nexus 7000 Series)

FAN

0.005

Fan-18 slot chassis (Cisco Nexus 7700 Series)

FAN

0.006

Fan-10 slot chassis (Cisco Nexus 7700 Series)

FAN

0.006

Fan-6 slot chassis (Cisco Nexus 7700 Series)

FAN

0.006

Fan-2 slot chassis (Cisco Nexus 7700 Series)

FAN

0.016

9 slot chassis (N7K:FAB2-7009)

PMFPGA

1.003

10 slot chassis (N7K:FAB2-7010)

PMFPGA

0.007

18 slot chassis (N7K:FAB2-7018)

PMFPGA

0.007

6 slot chassis (N77:FAB2-7706)

PMFPGA

1.002

10 slot chassis (N77:FAB2-7710)

PMFPGA

1.003

18 slot chassis (N77:FAB2-7718)

PMFPGA

1.002

6 slot chassis (N77:FAB3-7706)

PMFPGA

0.001

10 slot chassis (N77:FAB3-7710)

PMFPGA

0.001

18 slot chassis (N77:FAB3-7718)

PMFPGA

9.008

Cisco Nexus 7000 M2-Series 24 Port 10 GbE with XL Option (N7K-M224XP-23L)

PMFPGA

1.006

IOFPGA

1.003

SFPFPGA

1.003

EARL (Forwarding Engine)

2.012

Cisco Nexus 7000 M2-Series 6 Port 40 GbE with XL Option (N7K-M206FQ-23L)

PMFPGA

1.006

IOFPGA

0.012

SFPFPGA

2.008

EARL (Forwarding Engine)

2.012

Cisco Nexus 7000 M2-Series 2 Port 100 GbE with XL Option (N7K-M202CF-22L)

PMFPGA

1.007

IOFPGA

0.009

SFPFPGA

0.004

EARL (Forwarding Engine)

2.012

Nexus 7000 Enhanced F2-Series 48 Port 1G/10G Ethernet Module (N7K-F248XP-25E)

PMFPGA

1.009

IOFPGA

0.016

Nexus 7700 F2e-Series 48-Port 1 and 10G Ethernet Module (N77-F248XP-23E)

PMFPGA

0.006

IOFPGA

0.005

Nexus 7000 F3-Series 48-Port Fiber 1 and 10G Ethernet Module (N7K-F348XP-25)

PMFPGA

1.000

IOFPGA

1.003

SFPFPGA

1.002

Nexus 7000 F3-Series 12-Port 40G Ethernet Module (N7K-F312FQ-25)

PMFPGA

2.003

IOFPGA

1.005

Nexus 7000 F3-Series 6-Port 100G Ethernet Module (N7K-F306CK-25)

PMFPGA

2.003

IOFPGA

1.004

Nexus 7700 F3-Series 48-Port Fiber 1 and 10G Ethernet Module (N77-F348XP-23)

PMFPGA

1.007

IOFPGA

0.031

SFPFPGA

1.003

Nexus 7700 F3-Series 24-Port 40G Ethernet Module (N77-F324FQ-25)

PMFPGA

1.005

IOFPGA

0.031

Nexus 7700 F3-Series 12-Port 100G Ethernet Module (N77-F312CK-26)

PMFPGA

1.008

IOFPGA

0.021

Cisco Nexus 7000 M3-Series 48-Port 1/10G Ethernet Module (N7K-M348XP-25L)

PMFPGA

1.001

IOFPGA

1.003

SFPFPGA

1.000

Cisco Nexus 7000 M3-Series 24-Port 40G Ethernet Module (N7K-M324FQ-25L)

PMFPGA

1.001

IOFPGA

1.002

SFPFPGA

1.000

Cisco Nexus 7700 M3-Series 48-Port 1/10G Ethernet Module (N77-M348XP-23L)

PMFPGA

1.002

IOFPGA

1.003

SFPFPGA

1.000

Nexus 7700 M3-Series 24-Port 40G Ethernet Module (N77-M324FQ-25L)

PMFPGA

1.002

IOFPGA

1.002

DBFPGA

1.000

Cisco Nexus 7700 M3-Series 12-Port 100G Ethernet Module (N77-M312CQ-26L)

PMFPGA

1.000

IOFPGA

1.002

DBFPGA

1.001

Note To list the EPLDs running on your switch, use the show version module module_number epld command. If any of the versions that you list are older than what is listed in Table 3, we recommend that you update the EPLDs.

Determining Whether to Upgrade EPLD Images

Table 5 Displaying the EPLD Upgrade Status for the Switch and its Modules

Modules to Verify EPLD Status

Command

All modules on the switch

show install all impact epld bootflash:filename

I/O and supervisor modules

show install module slot_number impact epld bootflash:filename

Fabric modules

show install xbar-module slot_number impact epld bootflash:filename

Fan-tray modules

show install fan-module slot_number impact epld bootflash:filename

If there are different EPLD images to use depending on the version ID (VID) of a hardware module then you must determine the version number of the module by using the show sprom module number command as shown in Example 1.

Example 1 Determining the Version Number of a Supervisor or I/O Module

switch# show sprom module 8 1

DISPLAY linecard sprom contents of module 8:

Common block:

Block Signature : 0xabab

Block Version : 3

Block Length : 160

Block Checksum : 0x198b

EEPROM Size : 65535

Block Count : 3

...

H/W Version : 0.102

Mfg Bits : 0

Engineer Use : 0

snmpOID : 9.12.3.1.9.66.5.0

Power Consump : -600

RMA Code : 0-0-0-0

CLEI Code : COUIAY6CAA

VID : V01 <------Version ID

...

Downloading the EPLD Images

Before you can prepare the EPLD images for installation, you must download them to the FTP or management server.

To download the EPLD images, follow these steps:

Step 1 From a browser, go to the following URL and log in with your account:

https://www.cisco.com

The browser will display the Cisco website.

Step 2 If you are an existing user; click Log In to log into your account. If you are a new user, click Register and provide the required information before returning to the home page and log in with your new user name.

The home page opens.

Step 3 From the Products & Services tab, choose Switches.

The Switches page opens.

Step 4 Under the Data Center Switches option, click the Nexus 7000 menu.

The Cisco Nexus 7000 Series Switches page opens.

Step 5 In the Support area, click Download Software for this Product.

The Downloads page opens and lists the Data Center switches.

Step 6 Choose a Cisco Nexus 7000 Series switch from the list under Cisco Nexus 7000 Series Switches.

The Select a Software Type page opens.

Step 7 Click NX-OS EPLD Updates.

The Downloads page lists software releases that you can download.

Step 8 Choose Latest Releases > 8.0(1)(ED).

The Downloads page displays image information, including a link to the downloadable Tar file, to the right of the releases.

Step 9 Click the link for the Tar file.

The Downloads page displays a Download button and lists information for the Tar file.

Step 10 Click Download.

The Supporting Documents page opens to display the rules for downloading the software.

Step 11 Read the rules and click Agree.

A File Download dialog box opens to ask if you want to open or save the images file.

Step 12 Click Save.

The Save As dialog box appears.

Step 13 Indicate where to save the Tar file and click Save.

The Tar file saves to the location that you specified.

You are ready to prepare the EPLD images for Installation (see the Preparing the EPLD Images for Installation section).

Installation/Upgrade Guidelines

You can upgrade EPLDs using CLI commands on the Cisco Nexus 7000 Series switch. By default, EPLD images are not downgraded when you downgrade the NX-OS software release because each EPLD image works with older releases of the software.

Note By default, you cannot downgrade EPLD images when you downgrade the NX-OS software release because the EPLD images work with down level versions of the software. For this reason, we do not recommend downgrading EPLD images.

The allow-downgrade option is not supported and it is not available as a command in Cisco NX-OS Release 8.0(1).

Follow these guidelines when you upgrade or downgrade EPLDs:

– Before you upgrade any EPLD images, be sure that you have updated the Cisco NX-OS operating system to the level required for the images and be sure that you have one of the following EPLD image files:

Cisco NX-OS Release 8.3(1):

– n7700-s2-epld.8.3.1.img

– n7700-s3-epld.8.3.1.img

Note For EPLDs available for Cisco NX-OS Release 8.3(1), see EPLDs Available for Releases 8.x section.

- There are no updates in Nexus 7000 Sup2 EPLD images. Hence n7000-s2-epld.8.3.1.img is not posted to https://www.cisco.com.

- If you decide to upgrade EPLD anyway, or it is determined necessary in your environment, then the following guidelines should be followed.

- For Cisco NX-OS Release 6.2(10) and later releases it is recommended to perform EPLD upgrade with the current image before upgrading to Cisco NX-OS Release 8.3(1).

- For releases prior to Cisco NX-OS Release 6.2(10), you need to first upgrade to Cisco NX-OS Release 6.2(10) or later releases and perform EPLD upgrade with the current image before upgrading to Cisco NX-OS Release 8.3(1).

- The above guidelines and limitations do not apply to the Nexus 7700 series switches, and their EPLD can be upgraded through the standard process if needed.

Please see CSCvk35999 for more details.

– n7000-s2-epld.8.2.1.img

– n7700-s2-epld.8.2.1.img

Cisco NX-OS Release 8.1(1):

– n7000-s2-epld.8.1.1.img

– n7700-s2-epld.8.1.1.img

Cisco NX-OS Release 8.0(1):

– n7000-s2-epld.8.0.1.img

– n7700-s2-epld.8.0.1.img

- You can execute an upgrade from the active supervisor module only. This upgrade is for one or all of the modules as follows:

– You can upgrade a module individually.

– You can upgrade all modules sequentially.

– You can upgrade all modules in parallel.

- You can update the images for one or all modules whether the switch is online or offline as follows:

– If the modules are on line, only the EPLD images with version numbers that differ from the new EPLD images are upgraded.

– If the modules are offline, all of the EPLD images are upgraded.

- The install all epld <epld_image> parallel command is used to upgrade all EPLDs at the same time.

- On a system that has two supervisor modules, upgrade the EPLDs for the standby supervisor and then switch the active supervisor to the standby mode to upgrade its EPLDs (the supervisor switchover is not disruptive to traffic on Cisco Nexus 7000 Series switches). On a switch that has only one supervisor module, you can upgrade the active supervisor, but this will disrupt its operations during the upgrade.

- If you interrupt an upgrade, you must upgrade the module that is being upgraded again.

- The upgrade process disrupts traffic on the targeted module.

- Do not insert or remove any modules while an EPLD upgrade is in progress.

Preparing the EPLD Images for Installation

Before you can update the EPLD images for each of your switch modules, you must determine the Cisco NX-OS version that your switch is using, make sure that there is space for the new EPLD images, and download the images.

To prepare the EPLD images for installation, follow these steps:

Step 1 Log in to the switch through the console port, an SSH session, or a Telnet session.

Step 2 Verify that the switch is using the expected version of the Cisco NX-OS operating system. The kickstart and system lines indicate the Cisco NX-OS version. This step determines the versions of EPLD images that you must download.

switch# show version

...

Software

_ BIOS: version 8.1.1

_ kickstart: version 8.1(1)

_ system: version 8.1(1)

_ BIOS compile time: 02/28/2017

_ kickstart image file is: bootflash:///n7000-s2-kickstart.8.1.1.bin

_ kickstart compile time:_ 03/1/2017 12:00:00 [03/3/2017 10:51:03]

_ system image file is: bootflash:///n7700-s2-dk9.8.1.1.bin

_ system compile time: 03/1/2017 12:00:00 [03/03/2017 12:33:26]

...

switch#

Step 3 Verify that you have 140 MB of free space on the active or standby supervisor memory devices for the EPLD images that you will be downloading by using the dir bootflash: or dir slot0: commands.

By default, these commands display the used and free memory for the active supervisor. If your switch has an additional supervisor (a standby supervisor), use the show module command to find the module number for the other supervisor, use the attach module command to attach to the module number, and then use the dir bootflash: or dir slot0: command to determine the amount of used and free memory. See Example 2 to determine the amount of available bootflash memory, and see Example 3 to determine the amount of available slot0 memory.

Example 2 Determining the Amount of Available Bootflash Memory

switch# dir bootflash:

...

4096 Oct 05 01:19:53 2016 lost+found/

...

29479424 Dec 11 12:03:47 2016 n7000-s2-kickstart.8.1.1.gbin

29467136 Oct 15 10:35:18 2016 n7000-s2-kickstart.8.1.1.gbin

...

Usage for bootflash://sup-local 978673664 bytes used

860184576 bytes free

1838858240 bytes total switch# show module

Mod Ports Module-Type Model Status

--- ----- -------------------------------- ------------------ ------------

8 48 1/10 Gbps Ethernet Module N7K-M348XP-25L ok

9 24 1/10 Gbps Ethernet Module N7K-M324FQ-25L ok

switch# attach module 9

Attaching to module 9 ...

To exit type 'exit', to abort type '$.'

Cisco Nexus Operating System (NX-OS) Software TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2017, Cisco Systems, Inc. All rights reserved. The copyrights to certain works contained in this software are owned by other third parties and used and distributed under license. Certain components of this software are licensed under the GNU General Public License (GPL) version 2.0 or the GNU Lesser General Public License (LGPL) Version 2.1. A copy of each such license is available at http://www.opensource.org/licenses/gpl-2.0.php and http://www.opensource.org/licenses/lgpl-2.1.php

switch#

Example 3 Determining the Amount of Available Slot0 Memory

switch# dir slot0:

...

Usage for slot0://sup-local

4096 bytes used

2044850176 bytes free

2044854272 bytes total

switch# show module

Mod Ports Module-Type Model Status

--- ----- -------------------------------- ------------------ ------------

1 48 1/10 Gbps Ethernet Module N7K-M348XP-25L ok

7 24 1/10 Gbps Ethernet Module N7K-M324FQ-25L ok

...

switch(standby)# dir slot0://sup-standby/

...

Usage for slot0://sup-standby

1376256 bytes used

2073870336 bytes free

2075246592 bytes total

Step 4 If there is not at least 140 MB of memory free for the EPLD files, delete some unneeded files, such as earlier images, so there is enough free memory.

switch# delete bootflash:n7000-s2-kickstart.7.2.0.bin

Step 5 Copy the EPLD image file from the FTP or management server to the bootflash or slot0 memory in the active supervisor module. The following example shows how to copy from the FTP server to the bootflash memory:

switch# copy ftp://10.1.7.2/ n7000-s2-epld.8.1.1.img

bootflash:n7000-s2-epld.8.1.1.img

Step 6 Copy the EPLD image to the standby supervisor.

switch# copy bootflash: n7000-s2-epld.8.1.1.img

bootflash://sup-standby/ n7000-s2-epld.8.1.1.img

You are ready to upgrade the EPLD images (see the “Manual Upgrading of EPLD Images” section).

Manual Upgrading of EPLD Images

You can manually upgrade the EPLD images for either all of the modules installed in your switch or specific modules installed in your switch. When you request an upgrade, the Cisco NX-OS software lists the current and new versions for each EPLD image with the following results:

- If a module is installed and online, the software lists the installed and new versions for each EPLD. Where there is a difference in versions, the software indicates an upgrade or downgrade to occur when you confirm the process.

- If a module is installed and offline, the software cannot list its current EPLD versions so all EPLDs will be updated when you confirm the upgrade.

- If a module is not installed, the software displays an error message and does not upgrade the EPLDs.

If you need to know which modules can be updated and which upgrades are disruptive to switch operations, see the “Determining Whether to Upgrade EPLD Images” section.

To upgrade the EPLD images for a Cisco Nexus 7000 Series switch, you use one of the install commands listed in Table 6. These commands enable you to upgrade the EPLD images for all of the modules on the switch, multiple modules of one or two types, or single modules. When specifying a slot_number, use one number. When specifying slot_numbers, you can specify all for all slots, multiple slots separated by commas (x,y,z) or a range of slot numbers (x-y).

Note The EPLD upgrade operation is a disruptive operation. You should execute this operation only at a programmed maintenance time. The system/kickstart ISSU upgrade is a non disruptive upgrade.

Note Do not perform an EPLD upgrade during an ISSU system/kickstart upgrade.

Note For details on EPLD upgrade for M1 modules in releases prior to Cisco NX-OS Release 8.0(1), refer to Cisco Nexus 7000 Series FPGA/EPLD Upgrade Release Notes 7.x.

Modules Upgraded

Command

All installed modules with one module upgraded at a time

install all epld epld_image

All installed modules with the I/O modules upgraded in parallel

install all epld epld_image parallel

One or more I/O and supervisor modules with the I/O modules upgraded in parallel

install all epld epld_image parallel module {all | slot_numbers}

One or more I/O and supervisor modules with the I/O modules upgraded in parallel and one or more fan-tray modules

install all epld epld_image parallel module {all | slot_numbers} fan-module {all | slot_numbers}

One or more I/O and supervisor modules with the I/O modules upgraded in parallel and one or more fabric (xbar) modules

install all epld epld_image parallel module {all | slot_numbers} xbar-module {all | slot_numbers}

One or more fan-tray modules and one or more fabric (xbar) modules

install all epld epld_image parallel fan-module {all | slot_numbers} xbar-module {all | slot_numbers}

One I/O (F1, F2, M2, and M3 Series only) or supervisor module

install all epld epld_image parallel module slot number

One I/O (F3 Series)

install all epld epld_image parallel module {all | slot_numbers}

One fan module

install fan-module slot_number epld epld_image

One fabric module

install xbar-module slot_number epld epld_image

When you upgrade both supervisor modules in a switch, Cisco NX-OS upgrades the EPLD images for the standby supervisor module and then upgrades the active supervisor module. This action enables the upgrade of supervisor modules to be nondisruptive to switch operations.

Note When upgrading EPLD images for Supervisor 2 or Supervisor 2E modules in a dual-supervisor switch, the standby supervisor will reset twice towards the end of that upgrade but the upgrade continues to completion and the console displays the upgrade status.

When you upgrade supervisor module in a single-supervisor switch, the operation is disruptive to switch operations if the switch is active.

To start the installation of all new EPLD images for all modules in a switch, use the install all epld command as shown in Example 4 (switches with Supervisor 2 or Supervisor 2E modules).

Note When upgrading EPLD images for F3 Series I/O modules, you must upgrade them in parallel by including the parallel keyword with the install command. For example, if you are updating the images for the F3 Series I/O module in slot 2, you use the following command:

switch# install all epld epld_image parallel module 2

Note EPLD and software images for a chassis with Supervisor 2 and Supervisor 2E have “s2” in the image name.

Example 4 Installing EPLD Images in Parallel for Switches with Supervisor 2 or Supervisor 2E Modules

switch# install all epld bootflash:n7000-s2-epld.8.1.1.img parallel

To confirm the EPLD upgrades, see the Verifying the EPLD Upgrades and Downgrades section.

Automatic Upgrading of EPLD Images

You can enable, disable, and verify automatic upgrading of EPLD images for I/O modules installed in the Cisco Nexus 7000 series switches. Also, if the upgrade is canceled because it exceeds a maximum number of programmed attempts, you can reset the process to enable the upgrades.

Note You can set automatic upgrading of EPLD images for only I/O modules, not for other modules such as the supervisor modules, fabric modules, or fan trays.

This section includes the following topics:

- Enabling or Disabling Automatic Upgrades of EPLD Images

- Verifying Automatic Upgrades of EPLD Images

- Resetting Automatic Upgrades of EPLD Images

Enabling or Disabling Automatic Upgrades of EPLD Images

You can enable or disable automatic upgrades of EPLD images for I/O modules. When enabled, the switch checks the EPLD image versions on newly installed or powered up I/O modules to see if they are older than the images that were installed on the switch. If the images on the I/O modules are older, the switch automatically upgrades the images to the newer versions.

SUMMARY STEPS

1. configure terminal

2. system auto-upgrade epld

3. show running-config | inc epld

Note Alternatively, to prevent automatic upgrades of EPLD images for I/O modules, use the no system auto-upgrade epld command.

DETAILED STEPS

Command

Purpose

Step 1

configure terminal

Example :

switch# configure terminal

switch(config)#

Enters global configuration mode.

Step 2

system auto-upgrade epld

Example:

switch(config)# system auto-upgrade epld

Auto upgrade enabled

switch(config)#

Enables automatic updates.

no system auto-upgrade epld

Example :

switch(config)# no system auto-upgrade epld

Auto upgrade disabled

switch(config)#

Disables automatic updates.

Step 3

show running-config | inc epld

Example:

switch(config)# show running-config | inc epld

system auto-upgrade epld

switch(config)#

Verifies whether auto upgrades are part of the running configuration.

Verifying Automatic Upgrades of EPLD Images

To check on the automatic upgrade status while the upgrades occur or after the upgrades, use the commands listed in Table 7.

Command

Action

show system auto-upgrade epld status

Displays the status of the ongoing automatic upgrades.

show install auto-upgrade epld status

Displays the current and old EPLD versions after an upgrade.

Note During automatic upgrades of I/O modules, the status for VDC creation is pending until all of the installed I/O modules are upgraded and online.

Resetting Automatic Upgrades of EPLD Images

If the automatic upgrade function has stopped because it has exceeded the maximum number of allowed update attempts, you will see the following message:

switch# 2016 May 21 13:30:21 switch %$ VDC-1 %$_ %USER-2-SYSTEM_MSG: <<%EPLD_AUTO-2-AUTO_UPGRADE_CHECK>> Automatic EPLD upgrade check for module 15: Max retries reached. Use 'clear auto-upgrade epld flags all' to upgrade. - epld_auto

You can reset the automatic upgrade process in one of the following ways:

- Clearing the auto-upgrade epld flags for all of the I/O modules by using the clear auto-upgrade epld flags all command.

- Clearing the auto-upgrade epld flags for a specific I/O module by using the clear auto epld flags module_number command.

- Restarting the switch.

Verifying the EPLD Upgrades and Downgrades

Table 8 Commands Used to Display EPLD Information for Modules

Command

Modules Verified

show version module slot_number epld

I/O and supervisor modules

show version fan slot_number epld

Fan-tray modules

show version xbar slot_number epld

Fabric modules

This example shows how to verify the EPLD images for the Cisco Nexus 7018 supervisor module in slot 9:

switch# show version module 9 epld

This example shows how to verify the EPLD images for the fan-tray module in fan-tray module slot 2:

switch# show version fan 2 epld

This example shows how to verify the EPLD images for the fabric module in fabric module slot 4:

switch# show version xbar 4 epld

Displaying the Available EPLD Versions

To view the available EPLD versions in an EPLD image file, use the show version epld url command as shown in Example 5.

Example 5 Displaying the Available EPLD Versions

switch# show version epld bootflash: n7000-s2-epld.8.1.1.img

_

Retrieving EPLD versions... Please wait.

_

EPLD image file 8.0.1 built on Thu Dec 15 03:28:49 2016

_

Module Type______________________ Model____________ EPLD Device_______ Version

-----------------------------------------------------------------------------

Fan______________________________ N77-C7706-FAN____ Fan Controller (1)_ 0.005

Fan______________________________ N77-C7706-FAN____ Fan Controller (2)_ 0.005

_

1/10 Gbps Ethernet Module________ N77-F248XP-23E___ Power Manager______ 0.005

1/10 Gbps Ethernet Module________ N77-F248XP-23E___ IO_________________ 0.005

Fabric Module 2__________________ N77-C7706-FAB-2__ Power Manager______ 1.002

Supervisor Module 2______________ N77-SUP2E________ Power Manager SPI_ 19.000

10/40 Gbps Ethernet Module_______ N77-F324FQ-25____ Power Manager SPI__ 1.003

10/40 Gbps Ethernet Module_______ N77-F324FQ-25____ IO SPI_____________ 0.023

_

100 Gbps Ethernet Module_________ N77-F312CF-26____ Power Manager SPI__ 1.004

100 Gbps Ethernet Module_________ N77-F312CF-26____ IO SPI_____________ 0.017

_

1/10 Gbps Ethernet Module________ N77-F348XP-23____ Power Manager SPI__ 1.003

1/10 Gbps Ethernet Module________ N77-F348XP-23____ SFP SPI ____________1.001

1/10 Gbps Ethernet Module________ N77-F348XP-23____ IO SPI_____________ 0.024

switch#

Displaying the Status of EPLD Upgrades

To display the status of EPLD upgrades on the switch, use the show install epld status command as shown in Example 6.

Example 6 Displaying EPLD Upgrades

switch# show install epld status

1) Module 6 upgraded on Thu Dec 19 16:36:27 2016 (229507 us)

Status: EPLD Upgrade was Successful

EPLD Curr Ver Old Ver

------------------------------------------------------

Power Manager SPI 37.000 34.000

IO SPI 1.013 1.012

...

Limitations

When EPLDs are upgraded or downgraded, the following guidelines and observations apply:

- If you interrupt an upgrade, you must upgrade the module again.

- You can execute an upgrade or downgrade only from the active supervisor module. On switches with two supervisors, upgrade the standby supervisor and then switch the standby supervisor to active to place the previously active supervisor module in standby mode. Upgrade the EPLDs on the standby supervisor. On switches that have only one supervisor, you must upgrade or downgrade the EPLDs on the active supervisor, which will interfere with data traffic during the upgrade.

Related Documentation

Cisco Nexus 7000 Series documentation is available at the following URL: http://www.cisco.com/c/en/us/support/switches/nexus-7000-series-switches/tsd-products-support-series-home.html

Obtaining Documentation and Submitting a Service Request

For information on obtaining documentation, submitting a service request, and gathering additional information, see the monthly What’s New in Cisco Product Documentation, which also lists all new and revised Cisco technical documentation, at:

http://www.cisco.com/en/US/docs/general/whatsnew/whatsnew.html

Subscribe to the What’s New in Cisco Product Documentation as a Really Simple Syndication (RSS) feed and set content to be delivered directly to your desktop using a reader application. The RSS feeds are a free service. Cisco Content feeds are available in both the 1.0 and 2.0 version of the RSS format.

This document is to be used in conjunction with the documents listed in the “Related Documentation” section.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1721R)

Copyright © 2018-2024 Cisco Systems, Inc. All rights reserved.