DEFERRAL ADVISORY NOTICE for Cisco ACI
Author: Cisco Systems, Inc.
Date: 2017-07-11T00:00:00+00:00
Keywords: router; quick; mobile

Software Deferral Notice

Dear Cisco Customer,

A software issue has been identified with Cisco APIC releases 2.2(2i) and 2.3(1e) and Cisco NX-OS releases 12.2(2i) and 12.3(1e) that might affect your use of this software. As a result, these releases have been deferred. The deferred images are no longer available for download. You are urged to move to Cisco APIC Releases 2.2(2j) or 2.3(1f) and Cisco NX-OS releases 12.2(1f) or 12.3(1f), as appropriate. See the Software Affected/Solution table that follows for the list of affected images and solution images.

For additional information about what is included in this software, refer to the following documents:

■        Releases 2.2(2j) and 12.2(2j)

■        Cisco Application Policy Infrastructure Controller, Release 2.2(2j), Release Notes, available from the Cisco APIC documentation page

■        Cisco NX-OS Release 12.2(2f) Release Notes for Cisco Nexus 9000 Series ACI-Mode Switches, Release Notes, available from the Cisco Nexus 9000 Series Release Notes page

■        Releases 2.3(1f) and 12.3(1f)

■        Cisco Application Policy Infrastructure Controller, Release 2.3(1f), Release Notes, available from the Cisco APIC documentation page

■        Cisco NX-OS Release 12.3(1f) Release Notes for Cisco Nexus 9000 Series ACI-Mode Switches, Release Notes, available from the Cisco Nexus 9000 Series Release Notes page

Affected Software and Replacement Solution

Table of Affected Software and Replacement Solution

OS Type

Software Affected

Software Solution

Availability

(mm/dd/yyy)

Versions

Software

Versions

Software

Cisco ACI

2.2(2i),

Cisco APIC

2.2(2j)

Cisco APIC

4/27/2017

Cisco NX-OS

12.2(2i)

Cisco ACI-Mode Switch

12.2(2j)

Cisco ACI-Mode Switch

4/27/2017

Cisco ACI

2.3(1e),

Cisco APIC

2.3(1f)

Cisco APIC

7/9/2017

Cisco NX-OS

12.3(1e)

Cisco ACI-Mode Switch

12.3(1f)

Cisco ACI-Mode Switch

7/9/2017

Affected Platforms

All ACI-supported switches.

Reason for Deferral

DDTS No(s):  CSCve76599

IO FPGA failed for all fabric switches after policy upgrade.

Problem Description

IOFPGA upgrade error messages are seen on console during node bootup.

Cause

IOFPGA upgrade failed during switch image upgrade process.

Workaround

No workaround.

Disclaimer

In order to increase network availability, Cisco recommends that you upgrade affected images with the suggested replacement software images. Cisco will discontinue manufacturing shipment of affected images. Any pending order will be substituted by the replacement software images.

PLEASE BE AWARE THAT FAILURE TO UPGRADE THE AFFECTED SOFTWARE MAY RESULT IN NETWORK DOWNTIME.

The terms and conditions that governed your rights and obligations and those of Cisco, with respect to the deferred software will apply to the replacement software.

© 2017 Cisco Systems, Inc. All rights reserved.