Chapter 1. Overview

This guide contains the maximum verified scalability limits for Cisco Application Centric Infrastructure (Cisco ACI) parameters in the following releases:

- Cisco Application Policy Infrastructure Controller (Cisco APIC), Release 4.1(1)

- Cisco ACI Multi-Site, Release 2.1(1)

- Cisco Nexus 9000 Series ACI-Mode Switches, Release 14.1(1)

These values are based on a profile where each feature was scaled to the numbers specified in the tables. These numbers do not represent the theoretically possible Cisco ACI fabric scale.

- General Scalability Limits

- Multiple Fabric Options Scalability Limits

- Cisco ACI vPod Scalability Limits

- Cisco ACI Multi-Site Scalability Limits

- Fabric Topology, SPAN, Tenants, Contexts (VRFs), External EPGs, Bridge Domains, Endpoints, and Contracts Scalability Limits

- VMM Scalability Limits

- Layer 4 - Layer 7 Scalability Limits

- AD, TACACS, RBAC Scalability Limits

- Cisco Mini ACI Fabric and Virtual APICs Scalability Limits

- Cisco Cloud APIC Scalability Limits

- Cisco ACI and UCSM Scalability

- QoS Scalability Limits

General Scalability Limits

- L2 Fabric: In Legacy mode there is no routing, L3 context, nor contract enabled in the L2 fabric profile.  A tenant in this profile does not need to be mapped to one dedicated ACI tenant.  A tenant can be represented by a set of EPGs instead. To improve the load sharing among APIC controller nodes, you must distribute EPGs and BDs across different ACI tenants.

- L3 Fabric: The ACI L3 fabric solution provides a feature-rich highly scalable solution for public cloud and large enterprise. With this design, almost all supported features are deployed at the same time and are tested as a solution. The scalability numbers listed in this section are multi-dimensional scalability numbers. The fabric scalability numbers represent the overall number of objects created on the fabric. The per-leaf scale numbers are the objects created and presented on an individual leaf switch. The fabric level scalability numbers represent APIC cluster scalability and the tested upper limits. Some of the per-leaf scalability numbers are subject to hardware restrictions. The per-leaf scalability numbers are the maximum limits tested and supported by leaf switch hardware. This does not necessarily mean that every leaf switch in the fabric was tested with maximum scale numbers.

- Stretched Fabric: Stretched fabric allows multiple fabrics (up to 3) distributed in multiple locations to be connected as a single fabric with a single management domain. The scale for the entire stretched fabric remains the same as for a single site fabric. For example a L3 stretched fabric will support up to 200 leaf switches total which is the maximum number of leaf switches supported on a single site fabric. Parameters only relevant to stretched fabric are mentioned in the tables below.

- Multi-Pod: Multi-Pod enables provisioning a more fault-tolerant fabric comprised of multiple pods with isolated control plane protocols. Also, Multi-Pod provides more flexibility with regard to the full mesh cabling between leaf and spine switches. For example, if leaf switches are spread across different floors or different buildings, Multi-Pod enables provisioning multiple pods per floor or building and providing connectivity between pods through spine switches.

Multi-Pod uses a single APIC cluster for all the pods; all the pods act as a single fabric. Individual APIC controllers are placed across the pods but they are all part of a single APIC cluster.

- Multi-Site: Multi-Site is the architecture interconnecting and extending the policy domain across multiple APIC cluster domains. As such, Multi-Site could also be named as Multi-Fabric, since interconnects separate Availability Zones (Fabrics) and managed by an independent APIC controller cluster. An ACI Multi-Site Orchestrator is part of the architecture and is used to communicate with the different APIC domains to simplify the management of the architecture and the definition of inter-site policies.

Leaf Switches and Ports

The maximum number of leaf switches overall is 400 per fabric scale. The maximum number of physical ports is 19,200 per fabric. The maximum number of remote leaf switches is 40 per fabric, with total number of unique BDs deployed on all remote leaf switches in a POD not exceeding 1,000.

General Scalability Limits

Configurable Options

L2 Fabric

L3 Fabric

Large L3 Fabric

Number of APIC controllers

Note

* denotes preferred cluster size.

While the higher number of controllers is supported, the preferred size is based on the number of leaf switches in the environment.

3* or 4 node APIC cluster

3* or 4 node APIC cluster

5*, 6, or 7 node APIC cluster

Number of leaf switches

80

80 for 3-node cluster

200 for 4-node cluster

300 for 5- or 6-node cluster

400 for 7-node cluster

Number of spine switches

Maximum spines per pod: 6.

Total spines per fabric: 24.

Maximum spines per pod: 6.

Total spines per fabric: 24.

Maximum spines per pod: 6.

Total spines per fabric: 24.

Number of FEXs

20 FEXs per leaf switch

576 ports per leaf switch

650 FEXs per fabric

20 FEXs per leaf switch

576 ports per leaf switch

650 FEXs per fabric

20 FEXs per leaf switch

576 ports per leaf switch

650 FEXs per fabric

Number of tenants

1,000

1,000

3,000

Number of Layer 3 (L3) contexts (VRFs)

N/A

1,000

3,000

Number of contracts/filters

N/A

- 10,000 contracts

- 10,000 filters

- 10,000 contracts

- 10,000 filters

Number of endpoint groups (EPGs)

For a fabric with a single Tenant: 4,000

For a fabric with multiple Tenants: 500 per Tenant, up to 21,000 total across all Tenants

For a fabric with a single Tenant: 4,000

For a fabric with multiple Tenants: 500 per Tenant, up to 15,000 total across all Tenants

For a fabric with a single Tenant: 4,000

For a fabric with multiple Tenants: 500 per Tenant, up to 15,000 total across all Tenants

Number of Isolation enabled EPGs

400

400

400

Number of bridge domains (BDs)

21,000

15,000

15,000

Number of BGP + number of OSPF sessions + EIGRP (for external connection)

N/A

3,000

3,000

Number of Multicast routes

N/A

32,000

32,000

Number of Multicast routes per VRF

N/A

32,000

32,000

Number of static routes to a single SVI/VRF

N/A

5,000

5,000

Number of static routes on a single leaf switch

N/A

10,000

10,000

Number of vCenters

N/A

- 200 VDS

- 50 AVS

- 50 Cisco ACI Virtual Edge

- 200 VDS

- 50 AVS

- 50 Cisco ACI Virtual Edge

Number of Service Chains

N/A

1,000

1,000

Number of L4 - L7 devices

N/A

30 managed or 50 unmanaged physical HA pairs, 1,200 virtual HA pairs (1,200 maximum per fabric)

30 managed or 50 unmanaged physical HA pairs, 1,200 virtual HA pairs (1,200 maximum per fabric)

Number of ESXi hosts - VDS

N/A

3,200

3,200

Number of ESXi hosts - AVS

N/A

3,200 (Only 1 AVS instance per host)

3,200 (Only 1 AVS instance per host)

Number of ESXi hosts - AVE

N/A

3,200 (Only 1 AVE instance per host)

3,200 (Only 1 AVE instance per host)

Number of VMs

N/A

Depends upon server scale

Depends upon server scale

Number of configuration zones per fabric

30

30

30

Number of BFD sessions per leaf switch

256

Minimum BFD timer required to support this scale:

- minTx:50

- minRx:50

- multiplier:3

256

Minimum BFD timer required to support this scale:

- minTx:50

- minRx:50

- multiplier:3

256

Minimum BFD timer required to support this scale:

- minTx:50

- minRx:50

- multiplier:3

Multi-Pod

NOTE: * is preferred cluster size

- 3* or 4 node APIC cluster

- 6 pods

- 80 leaf switches overall

- 3* or 4 node APIC cluster

- 6 pods

- 80 for 3-node cluster

200 for 4-node cluster

- 5* or 6 node APIC cluster,6 pods, 200 leaf switches max per pod, 300 leaf switches max overall

- 7 node APIC cluster,12 pods, 200 leaf switches max per pod, 400 leaf switches max overall

L3 EVPN Services over Fabric WAN - GOLF (with and without OpFlex)

N/A

1,000 VRFs, 60,000 routes in a fabric

1,000 VRFs, 60,000 routes in a fabric

Layer 3 Multicast routes

N/A

32,000

32,000

Number of Routes in Overlay-1 VRF

1,000

1,000

1,000

Multiple Fabric Options Scalability Limits

Stretched Fabric

Configurable Options

Per Fabric Scale

Maximum number of fabrics that can be a stretched fabric

3

Maximum number of Route Reflectors

6

Multi-Pod

Configurable Options

Per Fabric Scale

Maximum number of Pods

12

Maximum number of leaf switches per Pod

200

Maximum number of leaf switches overall

400

Maximum number of Route Reflectors for L3Out

24

Number of External Route Reflectors between Pods

- For 1-3 Pods: Up to 3 external route reflectors

We recommend full mesh for external BGP peers instead of using external route reflectors when possible

- For 4 or more Pods: Up to 4 external route reflectors

We recommend using external route reflectors instead of full mesh

We recommend that the external route reflectors are distributed across Pods so that in case of any failure there are always at least two Pods with external route reflectors still reachable

Cisco ACI vPod Scalability Limits

Cisco ACI vPod Scalability Limits

Configurable Options

Scale

Number of vPods

6

Number of Cisco ACI Virtual Edge (AVE) instances per vPod

32

Number of Virtual Ethernet Ports (vEThs) per AVE in vPod

32

Number of EPGs per vPod

256

Number of EPGs across all vPods

864

Number of EPGs across all physical and virtual pods

15,000

Number of filters per ACI Virtual Edge

128

Number of contracts per ACI Virtual Edge

*The total number of filters used by all contracts must not exceed the filter limit above

36

Cisco ACI Multi-Site Scalability Limits

Stretched Vs. Non-Stretched

Stretched in Multi-Site means that the fabric has stretched objects such as EPGs, BDs, VRFs, or subnets across multiple sites or has cross-site contracts between EPGs.

Non-Stretched in Multi-Site means all objects such as EPG, contract, and BD are local to a site only and do not cross the local-site boundary.

The total number of stretched and non-stretched objects must not exceed the maximum verified scalability limit for that object, which are listed in their respective sections in this guide.

Note

For maximum scale Multi-Site configurations with many features enabled simultaneously, it is recommended that those configurations be tested in a lab before deployment.

Multi-Site General Scalability Limits

Configurable Options

Scale

Sites

12

Pods per site

12

Leaf switches per site

200

Multi-Site Object Scale

Configurable Options

Scale

Policy Objects per Schema

500

Templates per Schema

5

Application Profiles per Schema

200

Number of Schemas

80

Number of Templates

400

Multi-Site Orchestrator Users (nonparallel*)

*Multi-Site Orchestrator processes requests sequentially from multiple users even if they are deploying different schemas.

50

Multi-Site Scalability Limits for Stretched Objects

Configurable Options

Scale (Stretched)

Tenants

400

VRFs

1,000

BDs

4,000

Contracts

4,000

Endpoints

150,000 including:

- 100,000 - learned from other sites

- 50,000 - locally learned in site-local

EPGs

4,000

Isolated EPGs

400

Microsegment EPGs

400

IGMP Snooping

8,000

Layer-3 multicast routes

8,000

L3Out external EPGs

500

Subnets

8,000

Contract Preferred Group

(BD/EPG combinations)

250*

*EPGs must be added to the preferred group gradually

Number of L4-L7 logical devices

400

Number of graph instances

250

Number of device clusters per tenant

10

Number of interfaces per device cluster

Any

Number of graph instances per device cluster

125

Multi-Site VRF/BD VNID Translation Scale

Configurable Options

Scale

Fixed spines

21,000

Modular spines

42,000

Fabric Topology, SPAN, Tenants, Contexts (VRFs), External EPGs, Bridge Domains, Endpoints, and Contracts Scalability Limits

The following table shows the mapping of the "ALE/LSE Type" to the corresponding leaf switches. This information is helpful to determine which leaf switch is affected when we use the terms ALE v1, ALE v2, LSE, or LSE2 in remaining sections.

Note

In the following table, the N9K-C9336C-FX2 switch is listed as LSE for scalability limits purposes only; the switch supports LSE2 platform features. Consult specific feature documentation for the full list of supported devices.

ALE/LSE type

ACI-supported leaf switches

ALE v1

- N9K-C9396PX + N9K-M12PQ

- N9K-C93128TX + N9K-M12PQ

- N9K-C9396TX + N9K-M12PQ

ALE v2

- N9K-C9396TX + N9K-M6PQ

- N9K-C93128TX + N9K-M6PQ

- N9K-C9396PX + N9K-M6PQ

- N9K-C9372TX 64K

- N9K-C9332PQ

- N9K-C9372PX

LSE

N9K-C93108TC-EX + N9K-C93180YC-EX + N9K-C9336C-FX2

LSE2

N9K-C93108TC-FX + N9K-C93180YC-FX + N9K-C9348GC-FXP

Note

Unless explicitly called out, LSE represents both LSE and LSE2 and ALE represents both ALE v1 and ALE v2 in the rest of this document.

Fabric Topology

Configurable Options

Per Leaf Switch Scale

Per Fabric Scale

Number of PCs, vPCs

320 (with FEX HIF)

N/A

Number of encapsulations per access port, PC, vPC (non-FEX HIF)

3,000

N/A

Number of encapsulations per FEX HIF, PC, vPC

20

N/A

Number of member links per PC, vPC*

*vPC total ports = 32, 16 per leaf

16

N/A

Number of ports x VLANs (global scope and no FEX HIF)

64,000

168,000 (when using legacy BD mode)

N/A

Number of ports x VLANs (FEX HIFs and/or local scope)

For ALE v1 and v2: 9,000

For LSE and LSE2:

10,000

N/A

Number of static port bindings

For ALE v1 and v2: 30,000

For LSE and LSE2:

60,000

400,000

STP

All VLANs

N/A

Mis-Cabling Protocol (MCP)

256 VLANs per interface

2,000 logical ports (port x VLAN) per leaf

N/A

Maximum number of endpoints (EPs)

Default profile (Dual stack)—

- For ALE v1 and v2:

- MAC: 12,000

- IPv4: 12,000 or

- IPv6: 6,000 or

- IPv4: 4,000

IPv6: 4,000

Default Profile or High LPM Profile—

- For LSE or LSE2:

- MAC: 24,000

- IPv4: 24,000

- IPv6: 12,000

IPv4 Scale profile—

- For LSE and LSE2:

- MAC: 48,000

- IPv4: 48,000

- IPv6: Not supported

- For ALE v1 and v2: Not supported

High Dual Stack Scale profile—

- For LSE:

- MAC: 64,000

- IPv4: 64,000

- IPv6: 24,000

- For LSE2:

- MAC: 64,000

- IPv4: 64,000

- IPv6: 48,000

- For ALE v1 and v2: Not supported

16-slot and 8-slot modular spine switches:

Max. 450,000 Proxy Database Entries in the fabric, which can be translated into any one of the following:

- 450,000 MAC-only EPs (each EP with one MAC only)

- 225,000 IPv4 EPs (each EP with one MAC and one IPv4)

- 150,000 dual-stack EPs (each EP with one MAC, one IPv4, and one IPv6)

The formula to calculate in mixed mode is as follows:

#MAC + #IPv4 + #IPv6 <= 450,000

NOTE: Four fabric modules are required on all spines in the fabric to support above scale.

4-slot modular spine switches:

Max. 360,000 Proxy Database Entries in the fabric, which can be translated into any one of the following:

- 360,000 MAC-only EPs (each EP with one MAC only)

- 180,000 IPv4 EPs (each EP with one MAC and one IPv4)

- 120,000 dual-stack EPs (each EP with one MAC, one IPv4, and one IPv6)

The formula to calculate in mixed mode is as follows:

#MAC + #IPv4 + #IPv6 <= 360,000

NOTE: Four fabric modules are required on all spines in the fabric to support above scale.

Fixed spine switches:

Max. 180,000 Proxy Database Entries in the fabric, which can be translated into any one of the following:

- 180,000 MAC-only EPs (each EP with one MAC only)

- 90,000 IPv4 EPs (each EP with one MAC and one IPv4)

- 60,000 dual-stack EPs (each EP with one MAC, one IPv4, and one IPv6)

The formula to calculate in mixed mode is as follows:

#MAC + #IPv4 + #IPv6 <= 180,000

Number of Multicast Routes

Default (dual stack), IPv4, or High LPM scale profile: 8,000 with (S,G) scale not exceeding 4,000

High Dual stack Scale profile:

- LSE: 512

- LSE2: 32,000 with (S,G) scale not exceeding 16,000

32,000

Number of Multicast Routes per VRF

Default (dual stack), IPv4, or High LPM scale profile: 8,000 with (S,G) scale not exceeding 4,000

High Dual stack Scale profile:

- LSE: 512

- LSE2: 32,000 with (S,G) scale not exceeding 16,000

32,000

Number of IPs per MAC

4,096

4,096

Number of Host-Based Routing Advertisements

30,000 host routes per border leaf

N/A

SPAN

ALE-based leaf switches:

- 4 unidirectional or 2 bidirectional access/tenant sessions

- 4 unidirectional or 2 bidirectional fabric sessions

LSE-based leaf switches:

- 8 unidirectional or 4 bidirectional sessions (fabric, access, or tenant)

N/A

Number of ports per SPAN session

ALE-based leaf switches:

- All leaf access ports could be in one session.

- All leaf fabric ports could be in one session.

LSE/LSE2-based leaf switches:

- 30 – total number of unique ports (fabric + access) across all types of SPAN sessions

N/A

Number of SPAN sources in each direction

ALE-based leaf switches:

- 2* (V + FP + AP1 + AP2 + (V*AP1)) <= 460 (ingress direction)

- 2* (V + FP + AP1 + AP2 + (V*AP1)) <= 100 (egress direction)

LSE-based leaf switches:

- 2* (V + FP + AP1 + AP2 + (V*AP1) + AP3_v6) + AP3_v4 <= 480 (for each direction)

Where:

- V: Number of source VLANS in Tenant SPAN. Each source EPG may contain multiple VLANS.

- FP: Number of source ports in Fabric SPAN

- AP1: Number of source ports in Access SPAN without any filters

- AP2: Number of (VLAN, Port) pairs in Access SPAN with EPG/L3Out filters. Each EPG/L3Out may contain mutiple VLANs.

- V*AP1: When both "V" and "AP1" are configured, additional entries are created for each (V, AP1) pair.

- AP3_v6: Number of (IPv6 filter entry, Port) pairs in Access SPAN with Filter Group

- AP3_v4: Number of (IPv4 filter entry, Port) pairs in Access SPAN with Filter Group

N/A

Maximum number of L4 Port Ranges

16 (8 source and 8 destination )

First 16 port ranges consume a TCAM entry per range.

Each additional port range beyond the first 16 consumes a TCAM entry per port in the port range.

Filters with distinct source port range and destination port range count as 2 port ranges.

You cannot add more than 16 port ranges at once.

N/A

Common pervasive gateway

256 virtual IPs per Bridge Domain

N/A

Maximum number of Data Plane policers at the interface level

ALE:

- 64 ingress policers

- 64 egress policers

LSE and LSE2:

- 7 ingress policers

- 3 egress policers

N/A

Maximum number of Data Plane policers at EPG and interface level

128 ingress policers

N/A

Maximum number of interfaces with Per-Protocol Per-Interface (PPPI) CoPP

63

N/A

Maximum number of TCAM entries for Per-Protocol Per-Interface (PPPI) CoPP

256

One PPPI CoPP configuration may use more than one TCAM entry. The number of TCAM entries used for each configuration varies in each protocol and leaf platform. Use vsh_lc -c 'show system internal aclqos pppi copp tcam-usage' command to check on LSE/LSE2 platforms

N/A

Maximum number of SNMP trap receivers

10

10

IP SLA probes*

*With 1 second probe time and 3 seconds of timeout

100

200

First Hop Security (FHS)*

With any combination of BDs/EPGs/EPs within the supported limit

2,000 endpoints

1,000 bridge domains

N/A

Maximum number of Q-in-Q tunnels

(both QinQ core and edge combined)

1,980

N/A

Maximum number of TEP-to-TEP atomic counters

(tracked by 'dbgAcPathA' object)

N/A

1,600

Tenants

Configurable Options

Per Leaf Scale

Per Fabric Scale

Number of Contexts (VRFs) per tenant

ALE: 50

LSE: 128

ALE: 50

LSE: 128

Contexts

All numbers are applicable to dual stack unless explicitly called out.

Configurable Options

Per Leaf Scale

Per Fabric Scale

Maximum number of Contexts (VRFs)

ALE: 400

LSE and LSE2: 800

3,000

Maximum ECMP (equal cost multipath) for BGP best path

16

N/A

Maximum ECMP (equal cost multipath) for OSPF best path

64

N/A

Maximum ECMP (equal cost multipath) for Static Route best path

64

N/A

Number of isolated EPGs

400

400

Border Leafs per L3 Out

N/A

12

Maximum number of vzAny Provided Contracts

Shared services: Not supported

Non-shared services: 70 per Context (VRF)

N/A

Maximum number of vzAny Consumed Contracts

Shared services: 16 per Context (VRF)

Non-shared services: 70 per Context (VRF)

N/A

Number of Graphs Instances per device cluster

N/A

500

L3 Out per context (VRF)

N/A

400

Maximum number of BGP neighbors

400

3,000

Maximum number of OSPF neighbors

300

(Maximum number of VRFs with an l3out where OSPF is the only routing protocol enabled, cannot exceed 142)

N/A

Maximum number of EIGRP neighbors

16

N/A

Maximum number of IP Longest Prefix Matches (LPM) entries

Note

The total of (# of IPv4 prefixes) + 2*(# of IPv6 prefixes) must not exceed the scale listed for IPv4 alone

Default profile (Dual stack) -

- For ALE v1 and v2:

- IPv4: 10,000 or

- IPv6: 6,000 or

- IPv4: 4,000, IPv6: 4,000

- IPv6 wide prefixes (> /64): 1,000

- For LSE or LSE2:

- IPv4: 20,000 or

- IPv6: 10,000

- IPv6 wide prefixes (>= /84): 1,000

NOTE: For LSE2 and FX2 models there's no restriction on wide prefixes.

IPv4 Scale Profile –

- For LSE or LSE2:

- IPv4: 38,000

- IPv6: Not supported

- For ALE v1 and v2: Not supported

High Dual Stack Scale Profile –

- For LSE or LSE2:

- IPv4: 38,000 or

- IPv6: 19,000

- IPv6 wide prefixes (>= /84): 1,000

NOTE: For LSE2 and FX2 models there's no restriction on wide prefixes.

- For ALE v1 and v2: Not supported

N/A

Maximum number of IP Longest Prefix Matches (LPM) entries

(Continued)

Note

The total of (# of IPv4 prefixes) + 2*(# of IPv6 prefixes) must not exceed the scale listed for IPv4 alone

High LPM Scale profile –

- For LSE or LSE2:

- IPv4: 128,000 or

- IPv6: 64,000

- IPv6 wide prefixes (>= /84): 1,000

NOTE: For LSE2 and FX2 models there's no restriction on wide prefixes.

- For ALE v1 and v2: Not supported

N/A

Maximum number of Secondary addresses per logical interface

1

1

Maximum number of L3 interfaces per Context

- 1,000 SVIs

- 8 Routed interfaces

- 100 sub-interfaces with or without port-channel

N/A

Maximum number of L3 interfaces

- 1,000 SVIs

- 8 Routed interfaces

- 1,000 sub-interfaces with or without port-channel

N/A

Maximum number of ARP entries for L3 Outs

7,500

N/A

Shared L3 Out

- IPv4 Prefixes: 2,000 or

- IPv6 Prefixes: 1,000

- IPv4 Prefixes: 6,000 or

- IPv6 Prefixes: 3,000

Maximum number of L3 Outs

400

For LSE and LSE2: 800

2,400 (single-stack)

1,800 (dual-stack)

External EPGs

Configurable Options

Per Leaf Scale

Per Fabric Scale

Number of External EPGs

800

ALE: 2,400

LSE: 4,000

The listed scale is calculated as a product of (Number of external EPGs)*(Number of border leaf switches for the L3Out)

For example, the following combination adds up to a total of 2,000 external EPGs in the fabric (250 external EPGs * 2 border leaf switches * 4 L3Outs):

- 250 External EPGs in L3Out1 on leaf1 and leaf2

- 250 External EPGs in L3Out2 on leaf1 and leaf2.

- 250 External EPGs in L3Out3 on leaf3 and leaf4

- 250 External EPGs in L3Out4 on leaf3 and leaf4

Number of External EPGs per L3Out

250

600

The listed scale is calculated as a product of (Number of external EPGs per L3Out)*(Number of border leaf switches for the L3Out)

For examples, 150 external EPGs on L3Out1 that is deployed on leaf1, leaf2, leaf3, and leaf4 adds up to a total of 600

Maximum number of LPM Prefixes for External EPG Classification

Note

Maximum combined number of IPv4/IPv6 host and LPM prefixes for External EPG Classification must not exceed 64,000

ALE: 1,000 IPv4

LSE: refer to LPM scale section.

N/A

Maximum number of host prefixes for External EPG Classification

Note

Maximum combined number of IPv4/IPv6 host and LPM prefixes for External EPG Classification must not exceed 64,000

ALE: 1,000

LSE and LSE2:

- Default Profile:

- IPv4 (/32): 16,000

- IPv6 (/128): 12,000

Combined number of host prefixes and endpoints can't exceed 12,000.

- IPv4 Profile:

- IPv4 (/32): 16,000

Combined number of host prefixes, mcast routes, and endpoints can't exceed 56,000.

- IPv6 (/128): 0

- High Dual Stack Profile:

- IPv4 (/32): 64,000

Combined number of host prefixes, mcast routes, and endpoints can't exceed 64,000.

- IPv6 (/128): 24,000 (LSE)

Combined number of host prefixes and endpoints can't exceed 24,000.

- IPv6 (/128): 48,000 (LSE2 only)

Combined number of host prefixes and endpoints can't exceed 48,000.

- High LPM Profile:

- IPv4 (/32): 24,000

Combined number of host prefixes, mcast routes, and endpoints can't exceed 24,000.

- IPv6 (/128): 12,000

Combined number of host prefixes and endpoints can't exceed 12,000.

N/A

Bridge Domain

Configurable Options

Per Leaf Scale

Per Fabric Scale

Maximum number of BDs

1,980

Legacy mode: 3,500

On ALE leaf switches with multicast optimized mode: 50

15,000

Maximum number of BDs with Unicast Routing per Context (VRF)

ALE: 256

LSE: 1,000

1,750

Maximum number of subnets per BD

1,000, cannot be for all BDs.

1,000 per BD

Maximum number of EPGs per BD

3,960

4,000

Number of L2 Outs per BD

1

1

Number of BDs with Custom MAC Address

1,000

On ALE leaf switches with multicast optimized mode: 50

1,000

On ALE leaf switches with multicast optimized mode: 50

Maximum number of EPGs + L3 Outs per Multicast Group

128

128

Maximum number of BDs with L3 Multicast enabled

1,750

1,750

Maximum number of VRFs with L3 Multicast enabled

64

64

Maximum number of L3 Outs per BD

ALE: 4

LSE: 16

N/A

Number of static routes behind pervasive BD (EP reachability)

N/A

450

DHCP relay addresses per BD across all labels

16

N/A

Number of external EPGs per L2 out

1

1

Maximum number of PIM Neighbors

1,000

1,000

Maximum number of PIM Neighbors per VRF

64

64

Maximum number of L3Out physical interfaces with PIM enabled

32

N/A

Endpoint Groups (Under App Profiles)

Configurable Options

Per Leaf Scale

Per Fabric Scale

Maximum number of EPGs

Normally 3,960; if legacy mode 3,500

15,000

Maximum amount of encapsulations per EPG

1 Static leaf binding, plus 10 Dynamic VMM

N/A

Maximum Path encap binding per EPG

Equals to number of ports on the leaf

N/A

Maximum amount of encapsulations per EPG per port with static binding

One (path or leaf binding)

N/A

Maximum number of domains (physical, L2, L3)

100

N/A

Maximum number of VMM domains

N/A

- 200 VDS

- 50 AVS

- 50 Cisco ACI Virtual Edge

Maximum number of native encapsulations

- One per port, if a VLAN is used as a native VLAN.

- Total number of ports, if there is a different native VLAN per port.

Applicable to each leaf independently

Maximum number of 802.1p encapsulations

- 1, if path binding then equals the number of ports.

- If there is a different native VLAN per port, then it equals the number of ports.

Applicable to each leaf independently

Can encapsulation be tagged and untagged?

No

N/A

Maximum number of Static endpoints per EPG

Maximum endpoints

N/A

Maximum number of Subnets for inter-context access per tenant

4,000

N/A

Maximum number of Taboo Contracts per EPG

2

N/A

IP-based EPG (bare metal)

4,000

N/A

MAC-based EPG (bare metal)

4,000

N/A

Contracts

Cisco ACI supports two types of compression for policy CAM (content-addressable memory):

- Bidirectional compression ensures that bidirectional rules consume a single entry in the policy CAM and is supported starting with Cisco APIC release 3.2(1).

- Policy TCAM indirection compression enables multiple contracts to refer to the same filter rules and is supported starting with Cisco APIC release 4.0(1).

If you enable compression in release 4.0(1) or later, APIC will use either or both optimizations depending on the configuration. When enabling compression on -EX switches, APIC will apply bidirectional compression. The policy TCAM compression feature requires -FX leaf switches or newer.

Configurable Options

Per Leaf Scale

Per Fabric Scale

Security TCAM size

Default Scale profile

- For ALE v1: 4,000

- For ALE v2: 40,000

- For LSE and LSE2: 64,000

IPv4 Scale profile

- For LSE and LSE2: 64,000

- For ALE v1/v2: N/A

High Dual Stack Scale profile

- For LSE: 8,000

- For LSE2: 128,000

- For ALE v1/v2: N/A

High LPM Scale profile

- For LSE and LSE2: 8,000

- For ALE v1/v2: N/A

N/A

Software policy scale with Policy Table Compression enabled

(Number of actrlRule Managed Objects)

Dual stack profile:

- LSE (N9K-C9336C-FX2 only): 80,000

- LSE2 (N9K-C93180YC-FX only): 80,000

High Dual Stack profile:

- LSE2 (N9K-C93180YC-FX and N9K-C93600CD-GX only) : 140,000

N/A

Approximate TCAM calculator given contracts and their use by EPGs

Number of entries in a contract X Number of Consumer EPGs X Number of Provider EPGs X 2

N/A

Number of consumers (or providers) of a contract that has more than 1 provider (or consumer)

100

100

Number of consumers (or providers) of a contract that has a single provider (or consumer)

1,000

1,000

Scale guideline for the number of Consumers and Providers for the same contract

N/A

Number of consumer EPGs * number of provider EPGs * number of filters in the contract <= 50,000

FCoE NPV

Configurable Options

Per Leaf Scale

Per Fabric Scale

Maximum number of VSANs

32

N/A

Maximum number of VFCs configured on physical ports and FEX ports

151

N/A

Maximum number of VFCs on port-channel (PC), including SAN port-channel

7

N/A

Maximum number of VFCs on virtual port-channel (vPC) interfaces, including FEX HIF vPC

151

N/A

Maximum number of FDISC per port

255

N/A

Maximum number of FDISC per leaf

1,000

N/A

FC NPV

Configurable Options

Per Leaf Scale

Per Fabric Scale

Maximum number of FC NP Uplink interfaces

48

N/A

Maximum number of VSANs

32

N/A

Maximum number of FDISC per port

255

N/A

Maximum number of FDISC per leaf

1,000

N/A

Maximum number of SAN port-channel, including VFC port-channel

7

N/A

Maximum number of members in a SAN port-channel

16

N/A

VMM Scalability Limits

VMware

Configurable Options

Per Leaf Scale

Per Fabric Scale

Number of vCenters (VDS)

N/A

200 (Verified with a load of 10 events/minute for each vCenter)

Number of vCenters (AVS)

N/A

50

Number of vCenters (Cisco ACI Virtual Edge)

N/A

50

Datacenters in a vCenter

N/A

4

Total Number of VMM domain (vCenter, Datacenter) instances.

N/A

- 200 VDS

- 50 AVS

- 50 Cisco ACI Virtual Edge

Number of ESX hosts per AVS

240

N/A

Number of ESX hosts running Cisco ACI Virtual Edge

150

N/A

Number of EPGs per vCenter/vDS

N/A

5,000

Number of EPGs to VMware domains/vDS

N/A

5,000

Number of EPGs per vCenter/AVS

N/A

3,500

Number of EPGs to VMware domains/AVS

N/A

3,500

Number of EPGs per vCenter/Cisco ACI Virtual Edge

N/A

VLAN Mode: 1,300

VXLAN Mode: 2,000

Number of EPGs to VMware domains and Cisco ACI Virtual Edge

N/A

VLAN Mode: 1,300

VXLAN Mode: 2,000

Number of endpoints (EPs) per AVS

10,000

10,000

Number of endpoints per VDS

10,000

10,000

Number of endpoints per vCenter

10,000

10,000

Number of endpoints per Cisco ACI Virtual Edge

10,000

10,000

Support RBAC for AVS

N/A

Yes

Support RBAC for VDS

N/A

Yes

Support RBAC for Cisco ACI Virtual Edge

N/A

Yes

Number of Microsegment EPGs with vDS

400 (Tested with a total of 500 EPs attached to 1 vPC)

N/A

Number of Microsegment EPGs with AVS

1,000

N/A

Number of Microsegment EPGs with Cisco ACI Virtual Edge

1,000

N/A

Number of DFW flows per vEth with AVS

10,000

N/A

Number of DFW flows per vEth with Cisco ACI Virtual Edge

10,000

N/A

Number of DFW denied and permitted flows per ESX host with AVS

250,000

N/A

Number of DFW denied and permitted flows per ESX host with Cisco ACI Virtual Edge

250,000

N/A

Number of VMM domains per EPG with AVS

N/A

10

Number of VMM domains per EPG with Cisco ACI Virtual Edge

N/A

10

Number of VM Attribute Tags per vCenter

N/A

vCenter version 6.0: 500

vCenter version 6.5: 1,000

Microsoft SCVMM

Configurable Options

Per Leaf Scale (On-Demand Mode)

Per Leaf Scale (Pre-Provision Mode)

Per Fabric Scale

Number of controllers per SCVMM domain

N/A

N/A

5

Number of SCVMM domains

N/A

N/A

5

EPGs per Microsoft VMM domain

N/A

N/A

3,000

EPGs per all Microsoft VMM domains

N/A

N/A

9,000

EP/VNICs per HyperV host

N/A

N/A

100

EP/VNICs per SCVMM

3,000

10,000

10,000

Number of Hyper-V hosts

64

N/A

N/A

Number of logical switch per host

N/A

N/A

1

Number of uplinks per logical switch

N/A

N/A

4

Microsoft micro-segmentation

1,000

Not Supported

N/A

Microsoft Windows Azure Pack

Configurable Options

Per Leaf Scale

Per Fabric Scale

Number of Windows Azure Pack subscriptions

N/A

1,000

Number of plans per Windows Azure Pack instance

N/A

150

Number of users per plan

N/A

200

Number of subscriptions per user

N/A

3

VM networks per Windows Azure Pack user

N/A

100

VM networks per Windows Azure Pack instance

N/A

3,000

Number of tenant shared services/providers

N/A

40

Number of consumers of shared services

N/A

40

Number of VIPs (Citrix)

N/A

50

Number of VIPs (F5)

N/A

50

Layer 4 - Layer 7 Scalability Limits

Configurable Options

(L4-L7 Configurations)

Per Leaf Scale

Per Fabric Scale

Maximum number of L4-L7 logical device clusters

N/A

1,200

Maximum number of graph instances

N/A

1,000

Number of device clusters per tenant

N/A

30

Number of interfaces per device cluster

N/A

Any

Number of graph instances per device cluster

N/A

500

Deployment scenario for ASA (transparent or routed)

N/A

Yes

Deployment scenario for Citrix - One arm with SNAT/etc.

N/A

Yes

Deployment scenario for F5 - One arm with SNAT/etc.

N/A

Yes

AD, TACACS, RBAC Scalability Limits

Configurable Options

Per Leaf Scale

Per Fabric Scale

Number of ACS/AD/LDAP authorization domains

N/A

4 (16 maximum /server type)

Number of login domains

N/A

15

Number of security domains/APIC

N/A

15

Number of security domains in which the tenant resides

N/A

4

Number of priorities

N/A

4 (16 per domain)

Number of shell profiles that can be returned.

N/A

4 (32 domains total)

Number of users

N/A

8,000 local / 8,000 remote

Number of simultaneous logins

N/A

500 connections / NGNIX simultaneous REST logins

Cisco Mini ACI Fabric and Virtual APICs Scalability Limits

Property

Maximum Scale

Multicast Groups

200

BGP + OSPF Sessions

25

Number of Graphs Instances

20

Maximum number of L4-L7 logical device clusters

3 Physical or 10 Virtual

Number of Pods

1

GOLF VRF, Route Scale

N/A

Tenants

25

Endpoints

20,000

Bridge domains (BDs)

1,000

Endpoint groups (EPGs)

1,000

VRFs

25

Number of Leafs

4

Number of Spines

2

Contracts

2,000

Cisco Cloud APIC Scalability Limits

Configurable Options

Scale

Number of Tenants

20

Number of Application Profiles

500

Number of EPGs

500

Number of Cloud End Points

1,000

Number of VRFs

20

Cloud Context Profiles

40

Number of Contracts

1,000

Number of L4-L7 Service Graphs

200

Number of L4-L7 Services Devices (AWS ALB)

100

Cisco ACI and UCSM Scalability

The following table shows verified scalability numbers for Cisco Unified Computing System with Cisco ACI ExternalSwitch app.

Configurable Options

Scale

Number of UCSMs per APIC cluster

12

Number of VMM Domains per UCSM

4

Number of VLANs + PVLAN per UCSM

4,000

Number of vNIC Templates per UCSM

16

QoS Scalability Limits

The following table shows QoS scale limits. The same numbers apply for topologies with or without remote leafs as well as with COS preservation and MPOD policy enabled.

QoS Mode

QoS Scale

Custom QoS Policy with DSCP

7

Custom QoS Policy with DSCP and Dot1P

7

Custom QoS Policy with Dot1P

38

Custom QoS Policy via a Contract

38

Notices