Cisco Nexus 9000 ACI-Mode Switches Release Notes, Release 13.2(2)

The Cisco NX-OS software for the Cisco Nexus 9000 series switches is a data center, purpose-built operating system designed with performance, resiliency, scalability, manageability, and programmability at its foundation. It provides a robust and comprehensive feature set that meets the requirements of virtualization and automation in data centers.

Cisco NX-OS release 13.0 works only on Cisco Nexus 9000 Series switches in ACI Mode.

This document describes the features, bugs, and limitations for the Cisco NX-OS software. Use this document in combination with the Cisco Application Policy Infrastructure Controller, 3.2(2), Release Notes, which you can view at the following location:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Additional product documentation is listed in the "Related Documentation" section.

Release notes are sometimes updated with new information about restrictions and bugs. See the following website for the most recent version of the Cisco NX-OS Release 13.2(2) Release Notes for Cisco Nexus 9000 Series ACI-Mode Switches:

https://www.cisco.com/c/en/us/support/switches/nexus-9000-series-switches/products-release-notes-list.html

Table 1 shows the online change history for this document.

Table 1. Online History Change

Date

Description

July 6, 2021

In the Supported Hardware section, added the NXA-PAC-500W-PI and NXA-PAC-500W-PE PSUs.

June 24, 2021

Added open issue CSCvu07844.

January 22, 2021

In the Open Issues section, added bug CSCvt73069.

January 19, 2021

In the Known Behaviors section, changed the following sentence:

The Cisco Nexus 9508 ACI-mode switch supports warm (stateless) standby where the state is not synched between the active and the standby supervisor modules.

To:

The modular chassis Cisco ACI spine nodes, such as the Cisco Nexus 9508, support warm (stateless) standby where the state is not synched between the active and the standby supervisor modules.

March 13, 2020

13.2(2l): In the Resolved Bugs section, added bug CSCvr98827.

September 20, 2019

In the Usage Guidelines section, added the following bullet:

■        A 25G link that is using the IEEE-RS-FEC mode can communicate with a link that is using the CL16-RS-FEC mode. There will not be a FEC mismatch and the link will not be impacted.

September 11, 2019

In the Supported Hardware section, for the N9K-C9348GC-FXP, N9K-C93108TC-FX, and N9K-C93180YC-FX switches, added the following note:

Note: Incoming FCOE packets are redirected by the supervisor module. The data plane-forwarded packets are dropped and are counted as forward drops instead of as supervisor module drops.

August 14, 2019

13.2(2l): In the Open Bugs section, added bugs CSCvp92269 and CSCvq43058.

July 31, 2019

In the Compatibility Information section, added the following bullet:

■        On Cisco ACI platforms, 25G copper optics do not honor auto-negotiation, and therefore auto-negotiation on the peer device (ESX or standalone) must be disabled to bring up the links.

June 5, 2019

In the Supported Hardware section, for the N9K-C9364C switch, removed the following erroneous sentence:

The last 16 of the QSFP28 ports are colored green to indicate that they support wire-rate MACsec encryption.

February 6, 2019

13.2(2l): In the Known Behaviors section, added bug CSCvo22890.

January 30, 2019

13.2(2l): In the Open Bugs section, added bug CSCvn69340.

January 28, 2019

13.2(2l): In the Resolved Bugs section, removed bug CSCvi76161. This bug was resolved in the 12.2(4) release and was erroneously included in this document.

September 9, 2018

13.2(2l): In the Open Bugs section, added bug CSCvk73182.

July 28, 2018

13.2(2o): Release 13.2(2o) became available. Added the resolved bugs for this release.

July 25, 2018

13.2(2l): In the Supported Hardware section, clarified the support of multipod and Cisco ACI Multi-site for the Cisco N9K-9364C and N9K-9336PQ switches.

July 20, 2018

13.2(2l): In the Resolved Bugs section, added bugs CSCvk08653, CSCvk08752, CSCvj73778, CSCvj15521, and CSCvj91082

.

July 16, 2018

13.2(2l): In the Resolved Bugs section, added bugs CSCvj64124, CSCvj24638, and CSCvj77268.

July 10, 2018

13.2(2l): In the Resolved Bugs section, added bug CSCvj17665.

July 5, 2018

13.2(2l): Release 13.2(2l) became available.

Contents

This document includes the following sections:

■        Supported Hardware

■        Supported FEX Models

■        New and Changed Information

■        Installation Notes

■        Compatibility Information

■        Usage Guidelines

■        Bugs

■        Related Documentation

Supported Hardware

Table 2 lists the hardware that the Cisco Nexus 9000 Series ACI Mode switches support.

Table 2 Cisco Nexus 9000 Series Hardware

Hardware Type

Product ID

Description

Chassis

N9K-C9504

Cisco Nexus 9504 chassis with 4 I/O slots

Chassis

N9K-C9508

Cisco Nexus 9508 chassis with 8 I/O slots

Chassis component

N9K-C9508-FAN

Fan tray

Chassis component

N9k-PAC-3000W-B

Cisco Nexus 9500 3000W AC power supply, port side intake

Pluggable module (GEM)

N9K-M12PQ

12-port or 8-port

Pluggable module (GEM)

N9K-M6PQ

6-port

Pluggable module (GEM)

N9K-M6PQ-E

6-port, 40 Gigabit Ethernet expansion module

Spine switch

N9K-C9336PQ

Cisco Nexus 9336PQ switch, 36-port 40 Gigabit Ethernet QSFP

Note: The Cisco N9K-C9336PQ switch is supported for multipod.  The N9K-9336PQ switch is not supported for inter-site connectivity with Cisco ACI Multi-Site, but is supported for leaf switch-to-spine switch connectivity within a site.  The N9K-9336PQ switch is not supported when multipod and Cisco ACI Multi-Site are deployed together.

Spine switch

N9K-C9364C

Cisco Nexus 9364C switch is a 2-rack unit (RU), fixed-port switch designed for spine-leaf-APIC deployment in data centers. This switch supports 64 40/100-Gigabit QSFP28 ports and two 1/10-Gigabit SFP+ ports.

The following PSUs are supported for the N9K-C9364C:

■                    NXA-PAC-1200W-PE

■                    NXA-PAC-1200W-PI

■                    N9K-PUV-1200W

■                    NXA-PDC-930W-PE

■                    NXA-PDC-930W-PI

Note: You can deploy multipod or Cisco ACI Multi-Site separately (but not together) on the Cisco N9K-9364C switch starting in the 3.1 release.  You can deploy multipod and Cisco ACI Multi-Site together on the Cisco N9K-9364C switch starting in the 3.2 release.

A 930W-DC PSU (NXA-PDC-930W-PE or NXA-PDC-930W-PI) is supported in redundancy mode if 3.5W QSFP+ modules or passive QSFP cables are used and the system is used in 40C ambient temperature or less; for other optics or a higher ambient temperature, a 930W-DC PSU is supported only with 2 PSUs in non-redundancy mode.

1-Gigabit QSA is not supported on ports 1/49-64.

Spine switch

N9K-C9508-B1

Cisco Nexus 9508 chassis bundle with 1 supervisor module, 3 power supplies, 2 system controllers, 3 fan trays, and 3 fabric modules

Spine switch

N9K-C9508-B2

Cisco Nexus 9508 chassis bundle with 1 supervisor module, 3 power supplies, 2 system controllers, 3 fan trays, and 6 fabric modules

Spine switch

N9K-C9516

Cisco Nexus 9516 switch with 16 line card slots

Spine switch fan

N9K-C9300-FAN3

Port side intake fan

Spine switch fan

N9K-C9300-FAN3-B

Port side exhaust fan

Spine switch module

N9K-C9504-FM

Cisco Nexus 9504 fabric module supporting 40 Gigabit line cards

Spine switch module

N9K-C9504-FM-E

Cisco Nexus 9504 fabric module supporting 100 Gigabit line cards

Spine switch module

N9K-C9508-FM

Cisco Nexus 9508 fabric module supporting 40 Gigabit line cards

Spine switch module

N9K-C9508-FM-E

Cisco Nexus 9508 Fabric module supporting 100 Gigabit line cards

Spine switch module

N9K-C9508-FM-E2

Cisco Nexus 9508 Fabric module supporting 100 Gigabit line cards

Spine switch module

N9K-C9516-FM

Cisco Nexus 9516 Fabric module supporting 100 Gigabit line cards

Spine switch module

N9K-C9516-FM-E2

Cisco Nexus 9516 Fabric module supporting 100 Gigabit line cards

Spine switch module

N9K-X9732C-EX

Cisco Nexus 9500 32-port, 40/100 Gigabit Ethernet QSFP28 aggregation module

Note: The N9K-X9732C-EX line card cannot be used when a fabric module is installed in FM slot 25.

Spine switch module

N9K-X9736C-FX

Cisco Nexus 9500 36-port, 40/100 Gigabit Ethernet QSFP28 aggregation module

Note: 1-Gigabit QSA is not supported on ports 1/29-36. This line card supports the ability to add a fifth Fabric Module to the Cisco N9K-C9504 and N9K-C9508 switches. The fifth Fabric Module can only be inserted into slot 25.

Spine switch module

N9K-X9736PQ

Cisco Nexus 9500 36-port, 40 Gigabit Ethernet QSFP aggregation module

Switch module

N9K-SC-A

Cisco Nexus 9500 Series system controller

Switch module

N9K-SUP-A

Cisco Nexus 9500 Series supervisor module

Switch module

N9K-SUP-A+

Cisco Nexus 9500 Series supervisor module

Switch module

N9K-SUP-B

Cisco Nexus 9500 Series supervisor module

Switch module

N9K-SUP-B+

Cisco Nexus 9500 Series supervisor module

Leaf switch

N9K-C93108TC-EX

Cisco Nexus 9300 platform switch with 48 1/10GBASE-T (copper) front panel ports and 6 40/100-Gigabit QSFP28 spine facing ports.

Leaf switch

N9K-C93108TC-FX

Cisco Nexus 9300 platform switch with 48 1/10GBASE-T (copper) front panel ports and 6 fixed 40/100-Gigabit Ethernet QSFP28 spine-facing ports.

Note: Incoming FCOE packets are redirected by the supervisor module. The data plane-forwarded packets are dropped and are counted as forward drops instead of as supervisor module drops.

Leaf switch

N9K-C93120TX

Cisco Nexus 9300 platform switch with 96 1/10GBASE-T (copper) front panel ports and 6-port 40-Gigabit Ethernet QSFP spine-facing ports.

Leaf switch

N9K-C93128TX

Cisco Nexus 9300 platform switch with 96 1/10GBASE-T (copper) front panel ports and 6 or 8 40-Gigabit Ethernet QSFP spine-facing ports.

Leaf switch

N9K-C93180LC-EX

Cisco Nexus 9300 platform switch with 24 40-Gigabit front panel ports and 6 40/100-Gigabit QSFP28 spine-facing ports

The switch can be used either 24 40G ports or 12 100G ports. If 100G is connected the Port1, Port 2 will be HW disabled.

Note: This switch has the following limitations:

■        The top and bottom ports must use the same speed. If there is a speed mismatch, the top port takes precedence and bottom port will be error disabled. Both ports both must be used in either the 40 Gbps or 10 Gbps mode.

■        Ports 26 and 28 are hardware disabled.

■        This release supports 40 and 100 Gbps for the front panel ports. The uplink ports can be used at the 100 Gbps speed.

■        Port profiles and breakout ports are not supported on the same port.

Leaf switch

N9K-C93180YC-EX

Cisco Nexus 9300 platform switch with 48 1/10/25-Gigabit front panel ports and 6-port 40/100 Gigabit QSFP28 spine-facing ports

Leaf switch

N9K-C93180YC-FX

Cisco Nexus 9300 platform switch with 48 1/10/25-Gigabit Ethernet SFP28 front panel ports and 6 fixed 40/100-Gigabit Ethernet QSFP28 spine-facing ports. The SFP28 ports support 1-, 10-, and 25-Gigabit Ethernet connections and 8-, 16-, and 32-Gigabit Fibre Channel connections.

Note: Incoming FCOE packets are redirected by the supervisor module. The data plane-forwarded packets are dropped and are counted as forward drops instead of as supervisor module drops.

Leaf switch

N9K-C9332PQ

Cisco Nexus 9332PQ Top-of-rack (ToR) Layer 3 switch with 26 APIC-facing ports and 6 fixed-Gigabit spine facing ports.

Leaf switch

N9K-C9336C-FX2

Cisco Nexus C9336C-FX2 Top-of-rack (ToR) switch with 36 fixed 40/100-Gigabit Ethernet QSFP28 spine-facing ports.

Note: 1-Gigabit QSA is not supported on ports 1/1-6 and 1/33-36. The port profile feature does not support downlink conversion of ports 31 through 36.

Leaf switch

N9K-C9348GC-FXP

The Cisco Nexus 9348GC-FXP switch (N9K-C9348GC-FXP) is a 1-RU fixed-port, L2/L3 switch, designed for ACI deployments. This switch has 48 100/1000-Megabit 1GBASE-T downlink ports, 4 10-/25-Gigabit SFP28 downlink ports, and 2 40-/100-Gigabit QSFP28 uplink ports.

This switch supports the following PSUs:

■        NXA-PAC-350W-PI

■        NXA-PAC-350W-PE

■        NXA-PAC-1100W-PI

■        NXA-PAC-1100W-PE

Note: Incoming FCOE packets are redirected by the supervisor module. The data plane-forwarded packets are dropped and are counted as forward drops instead of as supervisor module drops.

When a Cisco N9K-C9348GC-FXP switch has only one PSU inserted and connected, the PSU status for the empty PSU slot will be displayed as "shut" instead of "absent" due to a hardware limitation.

The PSU SPROM is not readable when the PSU is not connected. The model displays as "UNKNOWN" and status of the module displays as "shutdown."

Leaf switch

N9K-C9372PX

Cisco Nexus 9372PX Top-of-rack (ToR) Layer 3 switch with 48 Port 1/10-Gigabit APIC-facing ports Ethernet SFP+ front panel ports and 6 40-Gbps Ethernet QSFP+ spine-facing ports

Note: Only the downlink ports 1-16 and 33-48 are capable of supporting SFP1-10G-ZR SFP+.

Leaf switch

N9K-C9372PX-E

Cisco Nexus 9372PX-E Top-of-rack (ToR) Layer 3 switch with 48 Port 1/10-Gigabit APIC-facing ports Ethernet SFP+ front panel ports and 6 40-Gbps Ethernet QSFP+ spine-facing ports

Note: Only the downlink ports 1-16 and 33-48 are capable of supporting SFP1-10G-ZR SFP+.

Leaf switch

N9K-C9372TX

Cisco Nexus 9372TX Top-of-rack (ToR) Layer 3 switch with 48 1/10GBASE-T (copper) front panel ports and 6 40-Gbps Ethernet QSFP spine-facing ports

Leaf switch

N9K-C9372TX-E

Cisco Nexus 9372TX-E Top-of-rack (ToR) Layer 3 switch with 48 10GBASE-T (copper) front panel ports and 6 40-Gbps Ethernet QSFP+ spine-facing ports

Leaf switch

N9K-C9396PX

Cisco Nexus 9300 platform switch with 48 1/10-Gigabit SFP+ front panel ports and 6 or 12 40-Gigabit Ethernet QSFP spine-facing ports

Leaf switch

N9K-C9396TX

Cisco Nexus 9300 platform switch with 48 1/10GBASE-T (copper) front panel ports and 6 or 12 40-Gigabit Ethernet QSFP spine-facing ports

Leaf switch fan

NXA-FAN-30CFM-B

Red port side intake fan

Leaf switch fan

NXA-FAN-30CFM-F

Blue port side exhaust fan

Leaf switch fan

NXA-FAN-65CFM-PE

Blue port side exhaust fan

Leaf switch fan

NXA-SFAN-65CFM-PE

Blue port side exhaust fan

Leaf switch fan

NXA-FAN-65CFM-PI

Burgundy port side intake fan

Leaf switch fan

NXA-SFAN-65CFM-PI

Burgundy port side intake fan

Leaf switch power supply unit

N9K-PAC-1200W

1200W AC Power supply, port side intake pluggable

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches

Leaf switch power supply unit

N9K-PAC-1200W-B

1200W AC Power supply, port side exhaust pluggable

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches

Leaf switch power supply unit

NXA-PAC-1100W-PE2

1100W AC power supply, port side exhaust pluggable

Leaf switch power supply unit

NXA-PAC-1100W-PI2

1100W AC power supply, port side intake pluggable

Leaf switch power supply unit

N9K-PAC-650W

650W AC Power supply, port side intake pluggable

Leaf switch power supply unit

N9K-PAC-650W-B

650W AC Power supply, port side exhaust pluggable

Leaf switch power supply unit

NXA-PDC-1100W-PE

1100W AC power supply, port side exhaust pluggable

Leaf switch power supply unit

NXA-PDC-1100W-PI

1100W AC power supply, port side intake pluggable

Leaf switch power supply unit

NXA-PHV-1100W-PE

1100W HVAC/HVDC power supply, port-side exhaust

Leaf switch power supply unit

NXA-PHV-1100W-PI

1100W HVAC/HVDC power supply, port-side intake

Leaf switch power supply unit

N9K-PUV-1200W

1200W HVAC/HVDC dual-direction airflow power supply

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches

Leaf switch power supply unit

N9K-PUV-3000W-B

3000W AC Power supply, port side exhaust pluggable

Leaf switch power supply unit

NXA-PAC-1200W-PE

1200W AC Power supply, port side exhaust pluggable, with higher fan speeds for NEBS compliance

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches.

Leaf switch power supply unit

NXA-PAC-1200W-PI

1200W AC Power supply, port side intake pluggable, with higher fan speeds for NEBS compliance

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches.

Leaf switch power supply unit

NXA-PAC-500W-PE

500W AC Power supply, port side exhaust pluggable

Leaf switch power supply unit

NXA-PAC-500W-PI

500W AC Power supply, port side intake pluggable

Leaf switch power supply unit

NXA-PDC-440W-PI

440W DC power supply, port side intake pluggable, with higher fan speeds for NEBS compliance

Note: This power supply is supported only by the Cisco Nexus 9348GC-FXP ACI-mode switch.

Leaf switch power supply unit

UCSC-PSU-930WDC V01

Port side exhaust DC power supply compatible with all ToR leaf switches

Leaf switch power supply unit

UCS-PSU-6332-DC

930W DC power supply, reversed airflow (port side exhaust)

Supported FEX Models

For tables of the FEX models that the Cisco Nexus 9000 Series ACI Mode switches support, see the following webpage:

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/nexus9000/hw/interoperability/fexmatrix/fextables.html

For more information on the FEX models, see the Cisco Nexus 2000 Series Fabric Extenders Data Sheet at the following location:

https://www.cisco.com/c/en/us/products/switches/nexus-2000-series-fabric-extenders/datasheet-listing.html

New and Changed Information

This section lists the new and changed features in this release.

■        New Hardware Features

■        New Software Features

New Hardware Features

The following hardware features are now available:

■        The Cisco N9K-X9736C-FX line card now supports the ability to add a fifth Fabric Module to the Cisco N9K-C9504 and N9K-C9508 switches. The fifth Fabric Module can only be inserted into slot 25.

New Software Features

For new software features, see the Cisco APIC 3.2(2) Release Notes at the following location:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Changes in Behavior

For the changes in behavior, see the Cisco ACI Releases Changes in Behavior document.

Installation Notes

The following procedure installs a Gigabit Ethernet module (GEM) in a top-of-rack switch:

1.     Clear the switch’s current configuration by using the setup-clean-config command.

2.     Power off the switch by disconnecting the power.

3.     Replace the current GEM card with the new GEM card.

4.     Power on the switch.

For other installation instructions, see the Cisco ACI Fabric Hardware Installation Guide at the following location:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Compatibility Information

■        For the supported optics per device, see the Cisco Optics-to-Device Compatibility Matrix.

■        This release supports the hardware and software listed on the ACI Ecosystem Compatibility List, and supports the Cisco AVS, Release 5.2(1)SV3(3.10).

■        Link level flow control is not supported on ACI-mode switches.

■        To connect the N2348UPQ to ACI leaf switches, the following options are available:

—      Directly connect the 40G FEX ports on the N2348UPQ to the 40G switch ports on the ACI leaf switches

—      Break out the 40G FEX ports on the N2348UPQ to 4x10G ports and connect to the 10G ports on all other ACI leaf switches

Note: A fabric uplink port cannot be used as a FEX fabric port.

■        To connect the APIC (the controller cluster) to the ACI fabric, it is required to have a 10G interface on the ACI leaf. You cannot connect the APIC directly to the N9332PQ ACI leaf switch.

■        We do not qualify third party optics in Cisco ACI. When using third party optics, the behavior across releases is not guaranteed, meaning that the optics might not work in some NX-OS releases. Use third party optics at your own risk. We recommend that you use Cisco SFPs, which have been fully tested in each release to ensure consistent behavior.

■        On Cisco ACI platforms, 25G copper optics do not honor auto-negotiation, and therefore auto-negotiation on the peer device (ESX or standalone) must be disabled to bring up the links.

■        The following table provides MACsec and CloudSec compatibility information for specific hardware:

Table 20  MACsec and CloudSec Support

Product ID

Hardware Type

MACsec Support

CloudSec Support

N9K-C93108TC-FX

Switch

Yes

No

N9K-C93180YC-FX

Switch

Yes

No

N9K-C93216TC-FX2

Switch

Yes

No

N9K-C9332C

Switch

Yes

Yes, only on the last 8 ports

N9K-C93360YC-FX2

Switch

Yes

No

N9K-C9336C-FX2

Switch

Yes

No

N9K-C9348GC-FXP

Switch

Yes, only with 10G+

No

N9K-C9364C

Switch

Yes

Yes, only on the last 16 ports

N9K-X9736C-FX

Line Card

Yes

Yes, only on the last 8 ports

The following additional MACsec and CloudSec compatibility restrictions apply:

■        MACsec is not supported with 1G speed on Cisco ACI leaf switch.

■        MACsec is supported only on the leaf switch ports where an L3Out is enabled. For example, MACsec between a Cisco ACI leaf switch and any computer host is not supported. Only switch-to-switch mode is supported.

■        When using copper ports, the copper cables must be connected directly the peer device (standalone N9k) in 10G mode.

■        A 10G copper SFP module on the peer is not supported.

■        CloudSec only works with spine switches in Cisco ACI and only works between sites managed by Cisco ACI Multi-Site.

■        For CloudSec to work properly, all of the spine switch links that participate in Cisco ACI Multi-Site must have MACsec/CloudSec support.

Usage Guidelines

■        The current list of protocols that are allowed (and cannot be blocked through contracts) include the following. Some of the protocols have SrcPort/DstPort distinction.

Note: See the APIC release notes for policy information: https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

—      UDP DestPort 161: SNMP. These cannot be blocked through contracts. Creating an SNMP ClientGroup with a list of Client-IP Addresses restricts SNMP access to only those configured Client-IP Addresses. If no Client-IP address is configured, SNMP packets are allowed from anywhere.

—      TCP SrcPort 179: BGP

—      TCP DstPort 179: BGP

—      OSPF

—      UDP DstPort 67: BOOTP/DHCP

—      UDP DstPort 68: BOOTP/DHCP

—      IGMP

—      PIM

—      UDP SrcPort 53: DNS replies

—      TCP SrcPort 25: SMTP replies

—      TCP DstPort 443: HTTPS

—      UDP SrcPort 123: NTP

—      UDP DstPort 123: NTP

■        The Cisco APIC GUI incorrectly reports more memory used than is actually used. To calculate the appropriate amount of memory used, run the "show system internal kernel meminfo | egrep "MemT|MemA"" command on the desired switch. Divide MemAvailable by MemTotal, multiply that number by 100, then subtract that number from 100.

—      Example: 10680000 / 24499856 = 0.436 x 100 = 43.6% Free, 100% - 43.6% = 56.4% Used

■        Leaf and spine switches from two different fabrics cannot be connected regardless of whether the links are administratively kept down.

■        Only one instance of OSPF (or any multi-instance process using the managed object hierarchy for configurations) can have the write access to operate the database. Due to this, the operational database is limited to the default OSPF process alone and the multipodInternal instance does not store any operational data. To debug an OSPF instance ospf-multipodInternal, use the command in VSH prompt. Do not use ibash because some ibash commands depend on Operational data stored in the database.

■        When you enable or disable Federal Information Processing Standards (FIPS) on a Cisco ACI fabric, you must reload each of the switches in the fabric for the change to take effect. The configured scale profile setting is lost when you issue the first reload after changing the FIPS configuration. The switch remains operational, but it uses the default port scale profile. This issue does not happen on subsequent reloads if the FIPS configuration has not changed.

FIPS is supported on Cisco NX-OS release 13.2(2) or later. If you must downgrade the firmware from a release that supports FIPS to a release that does not support FIPS, you must first disable FIPS on the Cisco ACI fabric and reload all of the switches in the fabric.

■        Link-level flow control is not supported on leaf switches that are running in ACI mode.

■        The dual rate BiDirectional (BiDi) transceiver QSFP-40/100-SRBD requires approximately 5 minutes for the link to come up after auto-negotiating the speed on both the local and remote end.

—      If both ends support the 40/100 combination, the link comes up quickly as 100G.

—      If one end is 40G and other end supports 40/100, then the link takes longer to negotiate to 40G.

■        You cannot use the breakout feature on a port that has a port profile configured on a Cisco N9K-C93180LC-EX switch. With a port profile on an access port, the port is converted to an uplink, and breakout is not supported on an uplink. With a port profile on a fabric port, the port is converted to a downlink. Breakout is currently supported only on ports 1 through 24.

■        On Cisco 93180LC-EX Switches, ports 25 and 27 are the native uplink ports. Using a port profile, if you convert ports 25 and 27 to downlink ports, ports 29, 30, 31, and 32 are still available as four native uplink ports. Because of the threshold on the number of ports (which is maximum of 12 ports) that can be converted, you can convert 8 more downlink ports to uplink ports.  For example, ports 1, 3, 5, 7, 9, 13, 15, 17 are converted to uplink ports and ports 29, 30, 31 and 32 are the 4 native uplink ports, which is the maximum uplink port limit on Cisco 93180LC-EX switches.

When the switch is in this state and if the port profile configuration is deleted on ports 25 and 27, ports 25 and 27 are converted back to uplink ports, but there are already 12 uplink ports on the switch in the example. To accommodate ports 25 and 27 as uplink ports, 2 random ports from the port range 1, 3, 5, 7, 9, 13, 15, 17 are denied the uplink conversion; the chosen ports cannot be controlled by the user. Therefore, it is mandatory to clear all the faults before reloading the leaf node to avoid any unexpected behavior regarding the port type. If a node is reloaded without clearing the port profile faults, especially when there is a fault related to limit-exceed, the ports might be in an unexpected mode.

■        When using a 25G Mellanox cable that is connected to a Mellanox NIC, you can set the ACI leaf switch port to run at a speed of 25G or 10G.

■        A 25G link that is using the IEEE-RS-FEC mode can communicate with a link that is using the CL16-RS-FEC mode. There will not be a FEC mismatch and the link will not be impacted.

Bugs

This section contains lists of open and resolved bugs and known behaviors.

■        Known Limitations

■        Open Bugs

■        Resolved Bugs

■        Known Behaviors

Known Limitations

The following list describes IpEpg (IpCkt) known limitations in this release:

■        An IP/MAC Ckt endpoint configuration is not supported in combination with static endpoint configurations.

■        An IP/MAC Ckt endpoint configuration is not supported with Layer 2-only bridge domains. Such a configuration will not be blocked, but the configuration will not take effect as there is no Layer 3 learning in these bridge domains.

■        An IP/MAC Ckt endpoint configuration is not supported with external and infra bridge domains because there is no Layer 3 learning in these bridge domains.

■        An IP/MAC Ckt endpoint configuration is not supported with a shared services provider configuration. The same or overlapping prefix cannot be used for a shared services provider and IP Ckt endpoint. However, this configuration can be applied in bridge domains having shared services consumer endpoint groups.

■        An IP/MAC Ckt endpoint configuration is not supported with dynamic endpoint groups. Only static endpoint groups are supported.

■        No fault will be raised if the IP/MAC Ckt endpoint prefix configured is outside of the bridge domain subnet range. This is because a user can configure bridge domain subnet and IP/MAC Ckt endpoint in any order and so this is not error condition. If the final configuration is such that a configured IP/MAC Ckt endpoint prefix is outside all bridge domain subnets, the configuration has no impact and is not an error condition.

■        Dynamic deployment of contracts based on instrImmedcy set to onDemand/lazy not supported; only immediate mode is supported.

The following list describes direct server return (DSR) known limitations in this release:

■        When a server and load balancer are on the same endpoint group, make sure that the Server does not generate ARP/GARP/ND request/response/solicits. This will lead to learning of LB virtual IP (VIP) towards the Server and defeat the purpose of DSR support

■        Load balancers and servers must be Layer 2 adjacent. Layer 3 direct server return is not supported. If a load balancer and servers are Layer 3 adjacent, then they have to be placed behind the Layer 3 out, which works without a specific direct server return virtual IP address configuration.

■        Direct server return is not supported for shared services. Direct server return endpoints cannot be spread around different virtual routing and forwarding (VRF) contexts.

■        Configurations for a virtual IP address can only be /32 or /128 prefix.

■        Client to virtual IP address (load balancer) traffic always will go through proxy-spine because fabric data-path learning of a virtual IP address does not occur.

■        GARP learning of a virtual IP address must be explicitly enabled. A load balancer can send GARP when it switches over from active-to-standby (MAC changes).

■        Learning through GARP will work only in ARP Flood Mode.

Open Bugs

This section lists the open bugs. Click the bug ID to access the Bug Search tool and see additional information about the bug. The "Exists In" column of the table specifies the 13.2(2) releases in which the bug exists. A bug might also exist in releases other than the 13.2(2) releases.

Table 3 Open Bugs in This Release

Bug ID

Description

Exists in

CSCvk73228

This is an enhancement to decode the binary logs offline directly from the techsupport.

13.2(2o) and later

CSCvp09949

Copy service traffic will fail to reach the TEP where the copy devices are connected. Traffic will not be seen on the spine switches.

13.2(2o) and later

CSCvq67792

Posting the IPv6 interface configuration (including BFD enable) by using the API in an L3Out results in SVIs using the secondary IP address as the BFD source IP address. This causes the BFD session to fail.

13.2(2o) and later

CSCvv33100

The IPS port is not down when an RX cable is removed on a Cisco ACI leaf switch 1G port.

An ACI switch with 1G fiber would signal a peer IOS device, such as a Catalyst 6000 series switch, with flow control auto/desired to turn on the flow control.

13.2(2o) and later

CSCve06334

MAC and IP endpoints are not learned on the local vPC pair.

13.2(2l) and later

CSCvf09313

In the 12.2(2i) release, the BPDU filter only prevents interfaces from sending BPDUs, but does not prevent interfaces from receiving BPDUs.

13.2(2l) and later

CSCvg85886

When an ARP request is generated from one endpoint to another endpoint in an isolated EPG, an ARP glean request is generated for the first endpoint.

13.2(2l) and later

CSCvg95192

Endpoint information is missing in the spine switches.

13.2(2l) and later

CSCvh11299

In COOP, the MAC IP address route has the wrong VNID, and endpoints are missing from the IP address DB of COOP.

13.2(2l) and later

CSCvh14815

BGP EVPN has the tenant endpoint information, while COOP does not have the endpoint.

13.2(2l) and later

CSCvh18100

If Cisco ACI Virtual Edge or AVS is operating in VxLAN non-switching mode behind a FEX, the traffic across the intra-EPG endpoints will fail when the bridge domain has ARP flooding enabled.

13.2(2l) and later

CSCvj03533

When IPv6 packets are received, mab is triggered. But, only the MAC address endpoint is learned, not the IP address endpoint.

13.2(2l) and later

CSCvj23046

In Cisco ACI Multi-Site plus multi-pod topologies, there could be multicast traffic loss for about 30 seconds on the remote-site. If only one LC has fabric links, there are other LCs with no fabric links and the LC with fabric links is reloaded.

13.2(2l) and later

CSCvj29908

Traffic gets dropped when a new TX SA is programmed after an old Rx SA is deleted on the peer and there are breakout ports in the link down state.

13.2(2l) and later

CSCvj50973

When the MTU settings for OSPF neighboring router interfaces do not match, the routers will be stuck in the Exstart/Exchange state. This behavior is expected. This bug is an enhancement to raise a fault to the APIC so that the routers' stuck state can be easily detected by the administrator.

13.2(2l) and later

CSCvk34581

When viewing a congested interface, you do not see any drops in the output of the "show interface" command. If you type "vsh_lc" to drop into the linecard shell, and then view the platform counters for the given port, you can see Buffer Drops on output.

13.2(2l) and later

CSCvk73182

An endpoint is unreachable from the leaf node because the static pervasive route (toward the remote bridge domain subnet) is missing.

13.2(2l) and later

CSCvm75395

A route map is deployed even when the route profile is configured incorrectly. When upgrading to a release that includes the fixed for this defect, the incorrectly deployed route map is removed from the leaf switch, which may affect traffic that was using the route map.

13.2(2l) and later

CSCvn69340

The BFD session does not get instantiated under some circumstances in one of the VPC legs for static routes.

13.2(2l) and later

CSCvo39715

When downgrading a Cisco ACI fabric, the OSPF neighbors go down after downgrading the Cisco APICs from a 3.2 or later release to a pre-3.2 release. After the upgrade, the switches are still running a 13.2 or later release.

13.2(2l) and later

CSCvp50075

A leaf switch experiences an unexpected reload due to a HAP reset.

13.2(2l) and later

CSCvp59361

A kernel panic seen in some random scenarios.

13.2(2l) and later

CSCvp63213

While ACI switches are still initializing after an upgrade, TACACS requests are seen coming from the switch IP address, with the remote IP address set to 127.0.0.1 for the admin user.

13.2(2l) and later

CSCvp91758

Fault F0449 gets raised and the ASIC vrm(5) status fails on the Cisco N9K-93108TC-EX or N9K-93180YC-EX switches.

13.2(2l) and later

CSCvp92269

Running a Qualys security scan results in the following message:

CWE - 693 Protection Mechanism Failure -

"HTTP Security Header Not Detected"

13.2(2l) and later

CSCvq25729

Traffic is dropped when it is destined to a pervasive route and when the endpoint is not learned. This issue can be also seen on a border leaf switch when "disable remote EP learning" is set.

13.2(2l) and later

CSCvq43058

A spine switch fabric module or line card is reloaded unexpectedly due to a kernel panic. The stack trace includes the following statement:

Kernel panic - not syncing: Out of memory: system-wide panic_on_oom is enabled

13.2(2l) and later

CSCvq54991

Spine switches will not export flows in the absence of the controller IP address or if the controller and collectors have a different subnet.

13.2(2l) and later

CSCvr79911

An LLDP/CDP MAC address entry gets stuck in the blade switch table on a leaf switch in a vPC. The entry can get stuck if the MAC address flaps and hits the move detection interval, which stops all learning for the address.  Use the following command to verify if a switch has a stale MAC address entry:

module-1# show system internal epmc bladeswitch_mac all

13.2(2l) and later

CSCvr98827

Some of the control plane packets are incorrectly classified as the user class and are reported as dropped in single chip spine switches. The statistics are incorrect because the packets are not actually dropped.

13.2(2l) and later

CSCvs18150

After a certain set of steps, it is observed that the deny-external-tag route-map used for transit routing loop prevention gets set back to the default tag 4294967295. Since routes arriving in Cisco ACI with this tag are denied from being installed in the routing table, if the VRF table that has the route-tag policy is providing transit for another VRF table in Cisco ACI (for instance and inside and outside vrf with a fw connecting them) and the non-transit VRF table has the default route-tag policy, routes from the non-transit VRF table would not be installed in the transit VRF table.

This bug is also particularly impactful in scenarios where transit routing is being used and OSPF or EIGRP is used on a vPC border leaf switch pair. vPC border leaf switches peer with each other, so if member A gets a transit route from BGP, redistributes into OSPF, and then advertises to member B (since they are peers)...without a loop prevention mechanism, member B would install the route through OSPF since it has a better admin distance and would then advertise back into BGP. This VRF tag is set on redistribution of BGP > OSPF and then as a table map in OSPF that blocks routes with the tag from getting installed in the routing table. When hitting this bug, the route-map used for redistributing into OSPF still sets the tag to the correct value. However, the table map no longer matches the correct tag. Rather, it matches the default tag. As a result, member A (could be B) would install the route through OSPF pointing to B. It would then redistribute it back into BGP with the med set to 1. The rest of the fabric (including member B) would install the BGP route pointing to member A since its med is better than the original route's med.

13.2(2l) and later

CSCvs76848

A switch SSD fails in less than two years and needs replacement. The /mnt/pss/ssd_log_amp.log file shows daily P/E cycles increasing by 10 or more each day, and fault "F3525: High SSD usage" is observed. Check the switch activity and contact Cisco Technical Support if the "High SSD usage" fault is raised on the switch.

13.2(2l) and later

CSCvt39689

Glean ARP (0xfff2, 239.255.255.240) flood is stopped on the transit leaf switch and is not delivered toward all the leaf switches in the fabric. Thus, silent host discovery does not work.

13.2(2l) and later

CSCvt52620

There is a stale pervasive route after a DHCP relay label is deleted.

13.2(2l) and later

CSCvt73069

A Cisco ACI fabric is not fully fit after a Cisco APIC firmware upgrade.

13.2(2l) and later

CSCvt82388

A switch SSD fails in less than two years and needs replacement. The /mnt/pss/ssd_log_amp.log file shows daily P/E cycles increasing by 10 or more each day, and fault "F3525: High SSD usage" is observed. ARP/ICMPv6 adjacency updates can also contribute to many SSD writes.

13.2(2l) and later

CSCvu01639

There are faults for failed contract rules and prefixes on switches prior to the -EX switches. Furthermore, traffic that is destined to an L3Out gets dropped because the compute leaf switches do not have the external prefix programmed in ns shim GST-TCAM. You might also see that leaf switches prior to the -EX switches do not have all contracts programmed correctly in the hardware.

13.2(2l) and later

CSCvu07844

When a Cisco N9K-C93180LC-EX, N9K-93180YC-EX, or N9K-C93108TC-EX leaf switch receives control, data, or BUM traffic from the front panel ports with the storm policer configured for BUM traffic, the storm policer will not get enforced. As such, the switch will let all such traffic through the system.

13.2(2l) and later

CSCvu61024

Zoning-rules are not programmed in the hardware after reloading a switch.

13.2(2l) and later

CSCvu72416

Triggered by a physical layer issue, such as fiber or a bad transceiver, a link flap may happen every now and then. However, it is uncommon to have continuous flaps when the node is left unattended over an extended period, such as having 688,000 flaps over a year. Each time after the fabric link flaps, one dbgRemotePort managed object is added to the policyElement database. After a long time flapping like this, unexpected memory allocation and access can be triggered for the Nexus OS process, such as policy_mgr or ethpm.

This defect is to enhance the object-store to reduce the impact for such scenarios.

13.2(2l) and later

CSCwa12763

External route import for a VRF instance fails on a leaf switch after removing a shared services contract between two EPGs.

13.2(2l) and later

CSCwb08081

A route profile that matches on community list and sets the local pref and community is not working post upgrade to 5.2.x release.

route-map imp-l3out-L3OUT_WAN-peer-2359297, permit, sequence 4201

Match clauses:

community  (community-list filter): peer16389-2359297-exc-ext-in-L3OUT_WAN_COMMUNITY-rgcom

Set clauses:

local-preference 200

community xxxxx:101 xxxxx:500 xxxxx:601 xxxxy:4 additive

The match clause works as expected, but the set clause is ignored.

13.2(2l) and later

CSCwd29346

An ACI switch's console may continuously output messages similar to:

svc_ifc_eventmg (*****) Ran 7911 msecs in last 7924 msecs

13.2(2l) and later

Resolved Bugs

This section lists the resolved bugs. Click the bug ID to access the Bug Search tool and see additional information about the bug. The "Fixed In" column of the table specifies whether the bug was resolved in the base release or a patch release.

Table 4 Resolved Bugs in This Release

Bug ID

Description

Fixed in

CSCvk20699

Fabric interfaces are missing for some GIPos causes BUM traffic loss within a pod.

13.2(2o)

CSCvk46762

Inter-pod multicast GIPo routes will be missing in MRIB, which causes inter-pod BUM traffic loss.

13.2(2o)

CSCvk49047

When SPAN is configured and a Cisco APIC is commissioned and decommissioned, the aclqos process might dump a core due to certain timing issues.

13.2(2o)

CSCuz12913

An ACI leaf switch sends ARP to a device (such as a router or host) that belongs to directly connected subnets for an L3Out. After ARP is resolved, devices in directly connected subnets on two different L3Outs can talk each other without any contracts.

13.2(2l)

CSCvi42764

When applying a route-map to an l3extInstP, the policy-element may crash, resulting in a hap-reset of the switch.  This continues until the corresponding route-map policy is removed.

13.2(2l)

CSCvi77422

Learning drops or traffic packet drops occur after EP loop detection, after repeatedly bringing the port channel down and up, or after downgrading from the 3.2(2) release to an earlier release.

13.2(2l)

CSCvi97670

Endpoints on an AVS host are intermittently or entirely unreachable.

When running the "vemcmd show opflex" command on the AVS host, both Opflex tunnels are up/active.

When running the "show endpoint ip X.X.X.X" command for the VTEP IP of the AVS host on the leaf switches where the AVS host connects, no entries are seen. Running the same command for the endpoint IP addresses results in no entries.

13.2(2l)

CSCvj05835

When an external route is being deleted but is still refereed by another processes temporarily, the "URIB-3-PTDEL_ERROR" message is repeated xx times in last yy sec" is unnecessarily generated.

13.2(2l)

CSCvj15521

A link down trap is generated when a leaf switch or spine switch link is brought up.

13.2(2l)

CSCvj17665

This is an enhancement to send an endpoint announce message to delete the endpoint after a bounce entry ages out.

13.2(2l)

CSCvj24638

When configuring NTP on a Cisco ACI leaf switch using the NX-OS 13.1(1i) release, the leaf switch must act as an NTP server.

13.2(2l)

CSCvj24984

In a LACP port channel, the hot standby link does not come up when the active link goes down.

13.2(2l)

CSCvj33707

CPU-bound traffic is not punted to the CPU when received by the switch on the spine-facing interfaces.  This has only affected ICMP to pervasive SVIs, but could potentially affect other control plane traffic that is received across the fabric.

13.2(2l)

CSCvj36088

On the Cisco ACI platform, a diagnostic test "ASIC Scratch" runs periodically to check the memory status of the ASIC. When the test fails, typically it's due to uncorrectable memory errors. A fault F2421 with "rule-asic-scratch" in Affected Object property is raised regardless of this defect.

When this fault F2421 with "rule-asic-scratch" is raised, the asic-scratch test shows F (Fail) in the "show diagnostic result module all" command on the leaf switch or spine switch CLI.

13.2(2l)

CSCvj43529

A Cisco ACI leaf switch will learn the EP MAC address from the LLDP multicast pack. The LLDP multicast pack's DMAC is 0180.c200.0003 or 0180.c200.0000.

13.2(2l)

CSCvj52097

This defect is to include the 'show service redir info' and 'show service copy info' commands in the Cisco ACI tech support output.

13.2(2l)

CSCvj52277

Ports with 100G QSFPs are in the not-connected state.

13.2(2l)

CSCvj55815

When running the following command on ACI Switches, you see diagnostic failures for ASIC scratch:

# show diagnostic result module all

13.2(2l)

CSCvj57416

VTEP tunnel creates are failing, resulting in traffic loss for EPs behind the VTEP.

13.2(2l)

CSCvj58567

When used for IPN connectivity, the fixed 10 Gb ports Eth1/65 and Eth1/66 cannot resolve ARP.

13.2(2l)

CSCvj64124

When fabric switches are configured as the NTP master for downstream clients, the NTP sync is not working when endpoints try to sync with a bridge domain SVI in the following configurations:

Single bridge domain, single EPG, and multiple EPGs deployed on same leaf switch.

Single bridge domain and multiple EPGs.

13.2(2l)

CSCvj71273

Port 8009 is open on out-of-band management ports.

Running an nmap scan of Cisco ACI leaf and spine switches reveals that port 8009 is open on the OOB interfaces. Opflex is used for communication between the Cisco APIC cluster and the nodes in the fabric.

13.2(2l)

CSCvj73539

In a multipod setup, when a leaf switch is reloaded, a traffic black hole is seen as the leaf switch in the remote pod continues to send traffic to the TEP of the reloaded leaf switc. This recovers after the leaf switch comes back up.

13.2(2l)

CSCvj73549

Traffic keeps flowing from site A to site B despite the fact that site B's ToR switch is down.

13.2(2l)

CSCvj73778

Links using QSFP-40/100-SRBD on both ends are negotiating to 40G instead of 100G.

13.2(2l)

CSCvj77268

A VM (NTP client) cannot sync the date/time with the NTP server (Cisco ACI leaf switch). When syncing, the following error displays:

An error occurred while Windows was synchronizing with X.X.X.X. The peer is unreachable.

13.2(2l)

CSCvj91082

A Cisco ACI leaf switch might stop learning endpoints after one of the following commands is performed:

module-1# clear platform internal hal counters l2entrydebug

module-1# clear platform internal hal counters l3entrydebug

13.2(2l)

CSCvk08653

The Cisco APIC GUI reports several faults for COOP, and IS-IS is down to a particular spine switch.  These faults do not recover.

13.2(2l)

CSCvk08752

All traffic for equal cost multipath (ECMP) route is hashed to a single next-hop.

13.2(2l)

Known Behaviors

This section lists bugs that describe known behaviors. Click the Bug ID to access the Bug Search Tool and see additional information about the bug. The "Exists In" column of the table specifies the 13.2(2) releases in which the known behavior exists. A bug might also exist in releases other than the 13.2(2) releases.

Table 5 Known Behaviors in This Release

Bug ID

Description

Exists in

CSCuo37016

When configuring the output span on a FEX Hif interface, all the layer 3 switched packets going out of that FEX Hif interface are not spanned. Only layer 2 switched packets going out of that FEX Hif are spanned.

13.2(2l) and later

CSCuo50533

When output span is enabled on a port where the filter is VLAN, multicast traffic in the VLAN that goes out of that port is not spanned.

13.2(2l) and later

CSCup65586

The show interface command shows the tunnel's Rx/Tx counters as 0.

13.2(2l) and later

CSCup82908

The show vpc brief command displays the wire-encap VLAN Ids and the show interface .. trunk command displays the internal/hardware VLAN IDs. Both VLAN IDs are allocated and used differently, so there is no correlation between them.

13.2(2l) and later

CSCup92534

Continuous "threshold exceeded" messages are generated from the fabric.

13.2(2l) and later

CSCuq39829

Switch rescue user ("admin") can log into fabric switches even when TACACS is selected as the default login realm.

13.2(2l) and later

CSCuq46369

An extra 4 bytes is added to the untagged packet with Egress local and remote SPAN.

13.2(2l) and later

CSCuq77095

When the command show ip ospf vrf <vrf_name> is run from bash on the border leaf, the checksum field in the output always shows a zero value.

13.2(2l) and later

CSCuq83910

When an IP address moves from one MAC behind one ToR to another MAC behind another ToR, even though the VM sends a GARP packet, in ARP unicast mode, this GARP packet is not flooded. As a result, any other host with the original MAC to IP binding sending an L2 packet will send to the original ToR where the IP was in the beginning (based on MAC lookup), and the packet will be sent out on the old port (location). Without flooding the GARP packet in the network, all hosts will not update the MAC-to-IP binding.

13.2(2l) and later

CSCuq92447

When modifying the L2Unknown Unicast parameter on a Bridge Domain (BD), interfaces on externally connected devices may bounce. Additionally, the endpoint cache for the BD is flushed and all endpoints will have to be re-learned.

13.2(2l) and later

CSCuq93389

If an endpoint has multiple IPs, the endpoint will not be aged until all IPs go silent. If one of the IP addresses is reassigned to another server/host, the fabric detects it as an IP address move and forwarding will work as expected.

13.2(2l) and later

CSCur01336

The power supply will not be detected after performing a PSU online insertion and removal (OIR).

13.2(2l) and later

CSCur81822

The access-port operational status is always "trunk".

13.2(2l) and later

CSCus18541

An MSTP topology change notification (TCN) on a flood domain (FD) VLAN may not flush endpoints learned as remote where the FD is not deployed.

13.2(2l) and later

CSCus29623

The transceiver type for some Cisco AOC (active optical) cables is displayed as ACU (active copper).

13.2(2l) and later

CSCus43167

Any TCAM that is full, or nearly full, will raise the usage threshold fault. Because the faults for all TCAMs on leaf switches are grouped together, the fault will appear even on those with low usage.

Workaround:  Review the leaf switch scale and reduce the TCAM usage. Contact TAC to isolate further which TCAM is full.

13.2(2l) and later

CSCus54135

The default route is not leaked by BGP when the scope is set to context. The scope should be set to Outside for default route leaking.

13.2(2l) and later

CSCus61748

If the TOR 1RU system is configured with the RED fan (the reverse airflow), the air will flow from front to back. The temperature sensor in the back will be defined as an inlet temperature sensor, and the temperature sensor in the front will be defined as an outlet temperature sensor.

If the TOR 1RU system is configured with the BLUE fan (normal airflow), the air will flow from back to front. The temperature sensor in the front will be defined as an inlet temperature sensor, and the temperature sensor in the back will be defined as outlet temperature sensor.

From the airflow perspective, the inlet sensor reading should always be less than the outlet sensor reading. However, in the TOR 1RU family, the front panel temperature sensor has some inaccurate readings due to the front panel utilization and configuration, which causes the inlet temperature sensor reading to be very close, equal, or even greater than the outlet temperature reading.

13.2(2l) and later

CSCut59020

If Backbone and NSSA areas are on the same leaf, and default route leak is enabled, Type-5 LSAs cannot be redistributed to the Backbone area.

13.2(2l) and later

CSCuu11347

Traffic from the orphan port to the vPC pair is not recorded against the tunnel stats.  Traffic from the vPC pair to the orphan port is recorded against the tunnel stats.

13.2(2l) and later

CSCuu11351

Traffic from the orphan port to the vPC pair is only updated on the destination node, so the traffic count shows as excess.

13.2(2l) and later

CSCuu66310

If a bridge domain "Multi Destination Flood" mode is configured as "Drop", the ISIS PDU from the tenant space will get dropped in the fabric.

13.2(2l) and later

CSCuv57302

Atomic counters on the border leaf do not increment for traffic from an endpoint group going to the Layer 3 out interface.

13.2(2l) and later

CSCuv57315

Atomic counters on the border leaf do not increment for traffic from the Layer 3 out interface to an internal remote endpoint group.

13.2(2l) and later

CSCuv57316

TEP counters from the border leaf to remote leaf nodes do not increment.

13.2(2l) and later

CSCuw09389

For direct server return operations, if the client is behind the Layer 3 out, the server-to-client response will not be forwarded through the fabric.

13.2(2l) and later

CSCux97329

With the common pervasive gateway, only the packet destination to the virtual MAC is being properly Layer 3 forwarded. The packet destination to the bridge domain custom MAC fails to be forwarded. This is causing issues with certain appliances that rely on the incoming packets’ source MAC to set the return packet destination MAC.

13.2(2l) and later

CSCuy00084

BCM does not have a stats option for yellow packets/bytes, and so BCM does not show in the switch or APIC GUI stats/observer.

13.2(2l) and later

CSCuy02543

Bidirectional Forwarding Detection (BFD) echo mode is not supported on IPv6 BFD sessions carrying link-local as the source and destination IP address. BFD echo mode also is not supported on IPv4 BFD sessions over multihop or VPC peer links.

13.2(2l) and later

CSCuy06749

Traffic is dropped between two isolated EPGs.

13.2(2l) and later

CSCuy22288

The iping command’s replies get dropped by the QOS ingress policer.

13.2(2l) and later

CSCuy25780

An overlapping or duplicate prefix/subnet could cause the valid prefixes not to be installed because of batching behavior on a switch. This can happen during an upgrade to the 1.2(2) release.

13.2(2l) and later

CSCuy47634

EPG statistics only count total bytes and packets. The breakdown of statistics into multicast/unicast/broadcast is not available on new hardware.

13.2(2l) and later

CSCuy56975

You must configure different router MACs for SVI on each border leaf if L3out is deployed over port-channels/ports with STP and OSPF/OSPFv3/eBGP protocols are used. There is no need to configure different router MACs if you use VPC.

13.2(2l) and later

CSCuy61018

The default minimum bandwidth is used if the BW parameter is set to "0", and so traffic will still flow.

13.2(2l) and later

CSCuy96912

The debounce timer is not supported on 25G links.

13.2(2l) and later

CSCuz13529

With the N9K-C93180YC-EX switch, drop packets, such as MTU or storm control drops, are not accounted for in the input rate calculation.

13.2(2l) and later

CSCuz13614

For traffic coming out of an L3out to an internal EPG, stats for the actrlRule will not increment.

13.2(2l) and later

CSCuz13810

When subnet check is enabled, a ToR does not learn IP addresses locally that are outside of the bridge domain subnets. However, the packet itself is not dropped and will be forwarded to the fabric. This will result in such IP addresses getting learned as remote endpoints on other ToRs.

13.2(2l) and later

CSCuz47058

SAN boot over a virtual Port Channel or traditional Port Channel does not work.

13.2(2l) and later

CSCuz65221

A policy-based redirect (PBR) policy to redirect IP traffic also redirects IPv6 neighbor solicitation and neighbor advertisement packets.

13.2(2l) and later

CSCva98767

The front port of the QSA and GLC-T 1G module has a 10 to 15-second delay as it comes up from the insertion process.

13.2(2l) and later

CSCvb36823

If you have only one spine switch that is part of the infra WAN and you reload that switch, there can be drops in traffic. You should deploy the infra WAN on more than one spine switch to avoid this issue.

13.2(2l) and later

CSCvb39965

Slow drain is not supported on FEX Host Interface (HIF) ports.

13.2(2l) and later

CSCvb49451

In the case of endpoints in two different TOR pairs across a spine switch that are trying to communicate, an endpoint does not get relearned after being deleted on the local TOR pair. However, the endpoint still has its entries on the remote TOR pair.

13.2(2l) and later

CSCvd11146

Bridge domain subnet routes advertised out of the Cisco ACI fabric through an OSPF L3Out can be relearned in another node belonging to another OSPF L3Out on a different area.

13.2(2l) and later

CSCvd63567

After upgrading a switch, Layer 2 multicast traffic flowing across PODs gets affected for some of the bridge domain Global IP Outsides.

13.2(2l) and later

CSCvo22890

There is intermittent packet loss for some flows through FX2 leaf switches when the no-drop class is enabled.

13.2(2l) and later

CSCvo39715

When downgrading a Cisco ACI fabric, the OSPF neighbors go down after downgrading the Cisco APICs from a 3.2 or later release to a pre-3.2 release. After the upgrade, the switches are still running a 13.2 or later release.

13.2(2l) and later

■        IPN should preserve the CoS and DSCP values of a packet that enters IPN from the ACI spine switches. If there is a default policy on these nodes that change the CoS value based on the DSCP value or by any other mechanism, you must apply a policy to prevent the CoS value from being changed. At the minimum, the remarked CoS value should not be 4, 5, 6 or 7. If CoS is changed in the IPN, you must configure a multipod QoS policy in the ACI for the multipod that translates queuing class information of the packet into the DSCP value in the outer header of the iVXLAN packet.

■        The following properties within a QoS class under "Global QoS Class policies," should not be changed from its default value and is only used for debugging purposes:

—      MTU (default – 9216 bytes)

—      Queue Control Method (default – Dynamic)

—      Queue Limit (default – 1522 bytes)

—      Minimum Buffers (default – 0)

■        The modular chassis Cisco ACI spine nodes, such as the Cisco Nexus 9508, support warm (stateless) standby where the state is not synched between the active and the standby supervisor modules. For an online insertion and removal (OIR) or reload of the active supervisor module, the standby supervisor module becomes active, but all modules in the switch are reset because the switchover is stateless. In the output of the show system redundancy status command, warm standby indicates stateless mode.

■        When a recommissioned APIC controller rejoins the cluster, GUI and CLI commands can time out while the cluster expands to include the recommissioned APIC controller.

■        If connectivity to the APIC cluster is lost while a switch is being decommissioned, the decommissioned switch may not complete a clean reboot. In this case, the fabric administrator should manually complete a clean reboot of the decommissioned switch.

■        Before expanding the APIC cluster with a recommissioned controller, remove any decommissioned switches from the fabric by powering down and disconnecting them. Doing so will ensure that the recommissioned APIC controller will not attempt to discover and recommission the switch.

IGMP Snooping Known Behaviors:

■        Multicast router functionality is not supported when IGMP queries are received with VxLAN encapsulation.

■        IGMP Querier election across multiple Endpoint Groups (EPGs) or Layer 2 outsides (External Bridged Network) in a given bridge domain is not supported. Only one EPG or Layer 2 outside for a given bridge domain should be extended to multiple multicast routers if any.

■        The rate of the number of IGMP reports sent to a leaf switch should be limited to 1000 reports per second.

■        Unknown IP multicast packets are flooded on ingress leaf switches and border leaf switches, unless "unknown multicast flooding" is set to "Optimized Flood" in a bridge domain. This knob can be set to "Optimized Flood" only for a maximum of 50 bridge domains per leaf.

If "Optimized Flood" is enabled for more than the supported number of bridge domains on a leaf, follow these configuration steps to recover:

—      Set "unknown multicast flooding" to "Flood" for all bridge domains mapped to a leaf.

—      Set "unknown multicast flooding" to "Optimized Flood" on needed bridge domains.

■        Traffic destined to Static Route EP VIPs sourced from N9000 switches (switches with names that end in -EX) might not function properly because proxy route is not programmed.

■        An iVXLAN header of 50 bytes is added for traffic ingressing into the fabric. A bandwidth allowance of (50/50 + ingress_packet_size) needs to be made to prevent oversubscription from happening. If the allowance is not made, oversubscription might happen resulting in buffer drops.

Related Documentation

The Cisco Application Policy Infrastructure Controller (APIC) documentation can be accessed from the following website:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2018-2024 Cisco Systems, Inc. All rights reserved.