Cisco Application Policy Infrastructure Controller, Release 1.2(1i), Release Notes

This document describes the features, caveats, and limitations for the Cisco Application Policy Infrastructure Controller (APIC) software. For more information on specific hardware features, see the Cisco NX-OS Release 11.2(1i) Release Notes for Cisco Nexus 9000 Series ACI-Mode Switches. Additional product documentation is listed in the “Related Documentation” section.

Release notes are sometimes updated with new information about restrictions and caveats. See the following website for the most recent version of this document:

http://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Table 1 shows the online change history for this document.

Table 1 Online History Change

Date

Description

December 7, 2015

Created the release notes for Release 1.2(1i).

December 9, 2015

Fixed incorrect URLs to the documentation on cisco.com.

In the Compatibility Information section, fixed an incorrect statement about Cisco Application Virtual Switch (AVS) in either VLAN or VXLAN mode support with Layer 4 to Layer

In the Resolved Caveats section, added bug CSCux40954.7.

December 10, 2015

In the Open Caveats section, added bug CSCux25207.

December 11, 2015

In the New Software Features section, removed the “VXLAN Support” row from the table. This feature is not included in this release.

December 15, 2015

Fixed some of the URLs to the documentation on cisco.com.

In the Compatibility Information section, added information about support for VMM Integration and VMware Distributed Virtual Switch (DVS) 6.x.

In the Open Caveats section, added bug CSCux52176.

January 13, 2016

In the New Software Features section, added “Configuration Rollback”.

January 21, 2016

In the Usage Guidelines section, added the guideline that begins with, “If you defined multiple login domains, you can choose the login domain that you want to use when logging in to an APIC.”

February 29, 2016

In the Installation Notes section, added mention that you should back up your configuration before installing or upgrading to this release.

In the Compatibility Information section, updated the supported ASA device package version to “1.2.4.8 or later”. Added a link to the cisco.com page that has the Cisco ACI Virtualization Guide. Added a link to the AVS Release Notes.

Contents

This document includes the following sections:

■        Introduction

■        Installation Notes

■        Upgrading the APIC Controller

■        Downgrading the APIC Controller

■        Compatibility Information

■        Usage Guidelines

■        Verified Scalability Limits

■        New and Changed Information

■        Caveats

■        Related Documentation

Introduction

The Cisco Application Centric Infrastructure (ACI) is an architecture that allows the application to define the networking requirements in a programmatic way. This architecture simplifies, optimizes, and accelerates the entire application deployment life cycle.

The Cisco Application Centric Infrastructure Fundamentals guide provides complete details about the ACI, including a glossary of terms that are used in the ACI.

Installation Notes

■        For installation instructions, see the Cisco ACI Fabric Hardware Installation Guide.

■        Back up your APIC configuration prior to installing or upgrading to this release. Single APIC clusters, which should not be run in production, can lose their configuration if database corruption occurs during the installation or upgrade.

■        For instructions on how to access the APIC for the first time, see the Cisco APIC Getting Started Guide.

■        For the Cisco APIC Python SDK documentation, including installation instructions, see the Cisco APIC Python SDK Documentation.

The SDK egg file needed for installation is included in the package:

—      acicobra-1.2_1i-py2.7.egg

Note: Installation of the SDK with SSL support on Unix/Linux and Mac OS X requires a compiler. For a Windows installation, you can install the compiled shared objects for the SDK dependencies using wheel packages.

Note: The model package depends on the SDK package; be sure to install the SDK package first.

■        Cisco ACI with Microsoft System Center Virtual Machine Manager (SCVMM) or Microsoft Windows Azure Pack only supports ASCII characters. Non-ASCII characters are not supported. Ensure that English is set in the System Locale settings for Windows, otherwise ACI with SCVMM and Windows Azure Pack will not install. In addition, if the System Locale is later modified to a non-English Locale after the installation, the integration components might fail when communicating with the APIC and the ACI fabric.

You can find all of the indicated documentation at the following URL:

http://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Upgrading the APIC Controller

Table 2 lists the supported APIC upgrades.

Table 2 Supported APIC Upgrades

From

To

Limitations

Recommended Procedure

1.0(4q)

1.2(1i)

None

1.     Upgrade APICs

2.     After APICs are upgraded successfully, upgrade the switches using two or more maintenance groups

1.1(1o)

1.2(1i)

None

1.     Upgrade APICs

2.     After APICs are upgraded successfully, upgrade the switches using two or more maintenance groups

1.1(2h)

1.2(1i)

None

1.     Upgrade APICs

2.     After APICs are upgraded successfully, upgrade the switches using two or more maintenance groups

1.1(3f)

1.2(1i)

None

1.     Upgrade APICs

2.     After APICs are upgraded successfully, upgrade the switches using two or more maintenance groups

1.1(4e)

1.2(1i)

Due to bug CSCux40954, which was resolved in this release, the Cisco APIC firmware process using the Upload button from the GUI does not work.  The upload appears to complete successfully, but the firmware is not updated in the repository. You must instead download the image using SCP or HTTP from a server to the APIC.

1.     Upgrade APICs

2.     After APICs are upgraded successfully, upgrade the switches using two or more maintenance groups

Downgrading the APIC Controller

Table 3 lists the supported APIC and switch downgrades.

Note: APIC Image downgrades will be blocked by default if the target image is not in a supported downgrade path.

Table 3 Supported APIC and Switch Downgrades

From

To

Limitations

Recommended Procedure

1.2(1x)

1.1(1o) and higher

None

1.     Downgrade APICs.

2.     After APICs are downgraded successfully, downgrade the switches using two or more maintenance groups.

1.2(1x)

1.0(4q) and lower

None

You must perform a stateless downgrade. See the procedure below.

The following procedure performs a stateless downgrade:

Note: You must plan for a Fabric outage, as this procedure rebuilds the Fabric.

1         Export the Fabric configuration.

2         Run the “eraseconfig” command on the APIC controllers. This will reboot the controllers. Ensure that the controllers have been rebooted before moving on to step 3.

3         Run the “setup-clean-config.sh” script on the switch nodes and reload all of the switches. Steps 2 and 3 clear the configuration on the Fabric, making this a stateless downgrade.

4         Rediscover the Fabric.

5         Downgrade the Fabric to the desired release.

6         Run the “eraseconfig setup” command on the APIC controllers. This step is required so that the script can run additional commands that might be required for the version that is being used. The “eraseconfig setup” command will reload the APICs.

7         Run the “setup-clean-config.sh” script on the switch nodes and reload them.

8         Complete the initial setup script on the APIC controllers.

9         Import the Fabric configuration using the import “merge” mode.

Compatibility Information

■        This release supports the hardware and software listed on the ACI Ecosystem Compatibility List document and the software listed as follows:

—      Cisco NX-OS Release 11.2(1i)

—      Cisco AVS, Release 5.2(1)SV3(1.10)

For more information about the supported AVS releases, see the AVS software compatibility information in the Cisco Application Virtual Switch Release Notes at the following URL:

http://www.cisco.com/c/en/us/support/switches/application-virtual-switch/products-release-notes-list.html

—      Cisco UCS Manager software release 2.2(1c) or later is required for the Cisco UCS Fabric Interconnect and other components, including the BIOS, CIMC, and the adapter

See the ACI Ecosystem Compatibility List document at the following URL:

http://www.cisco.com/c/en/us/solutions/data-center-virtualization/application-centric-infrastructure/solution-overview-listing.html

■        The breakout of 40G ports to 4x10G on the N9332PQ switch is not supported in ACI-Mode.

■        To connect the N2348UPQ to ACI leaf switches, the following options are available:

—      Directly connect the 40G FEX ports on the N2348UPQ to the 40G switch ports on the N9332PQ switch

—      Break out the 40G FEX ports on the N2348UPQ to 4x10G ports and connect to the N9396PX or N9372PX switches

■        Connecting the APIC (the controller cluster) to the ACI fabric requires a 10G interface on the ACI leaf. You cannot connect the APIC directly to the N9332PQ ACI Leaf.

■        This release supports the following firmware:

—      1.5(4e) CIMC HUU iso

—      2.0(3i) CIMC HUU iso (recommended)

■        Beginning with Cisco Application Virtual Switch (AVS) release 5.2(1)SV3(1.10), Layer 4 to Layer 7 service graphs are supported for Cisco AVS. Layer 4 to Layer 7 service graphs for Cisco AVS can be configured for virtual machines only and in VLAN mode only.

■        This release supports VMM Integration and VMware Distributed Virtual Switch (DVS) 6.x. For more information about guidelines for upgrading VMware DVS from 5.x to 6.x and VMM integration, see the Cisco ACI Virtualization Guide, Release 1.2(1x) at the following URL:

http://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

■        This release supports the partner packages specified in the L4-L7 Compatibility List Solution Overview document at the following URL:

http://www.cisco.com/c/en/us/solutions/data-center-virtualization/application-centric-infrastructure/solution-overview-listing.html

■        This release supports the Adaptive Security Appliance (ASA) device package version 1.2.4.8 or later.

■        If you are running a Cisco Adaptive Security Virtual Appliance (ASAv) version that is prior to version 9.3(2), you must configure SSL encryption as follows:

(config)# ssl encryption aes128-sha1

■        For information about APIC compatibility with UCS Director, see the appropriate Cisco UCS Director Compatibility Matrix document at the following URL:

http://www.cisco.com/c/en/us/support/servers-unified-computing/ucs-director/products-device-support-tables-list.html

Usage Guidelines

This section lists usage guidelines for the APIC software.

■        The APIC GUI supports the following browsers:

—      Chrome version 35 (at minimum) on Mac and Windows

—      Firefox version 42 (at minimum) on Mac, Linux, and Windows

—      Internet Explorer version 11 (at minimum)

—      Safari 7.0.3 (at minimum)

Note: Restart your browser after upgrading to release 1.2(1i).

Caution: A known issue exists with the Safari browser and unsigned certificates. Read the information presented here before accepting an unsigned certificate for use with WebSockets.

When you access the HTTPS site, the following message appears:

“Safari can’t verify the identity of the website APIC. The certificate for this website is invalid. You might be connecting to a website that is pretending to be an APIC, which could put your confidential information at risk. Would you like to connect to the website anyway?”

To ensure that WebSockets can connect, you must do the following:

1.     Click Show Certificate.

2.     Select Always Trust in the three drop-down lists that appear.

If you do not follow these steps above, WebSockets will not be able to connect.

■        The APIC GUI includes an online version of the Quick Start guide that includes video demonstrations.

■        The infrastructure IP address range must not overlap with other IP addresses used in the fabric for in-band and out-of-band networks.

■        The APIC does not provide IPAM services for tenant workloads.

■        To reach the APIC CLI from the GUI: select System > Controllers, highlight a controller, right-click and select "launch SSH". To get the list of commands, press the escape key twice.

■        In some of the 5-minute statistics data, the count of ten-second samples is 29 instead of 30.

■        For the following services, use a DNS-based host name with out-of-band management connectivity. IP addresses can be used with both in-band and out-of-band management connectivity.

—      Syslog server

—      Call Home SMTP server

—      Tech support export server

—      Configuration export server

—      Statistics export server

■        In-band management connectivity to the spine switches is possible from any host that is connected to the leaf switches of the Fabric, and leaf switches can be managed from any host that has IP connectivity to the fabric.

■        When configuring an atomic counter policy between two endpoints, and an IP is learned on one of the two endpoints, it is recommended to use an IP-based policy and not a client endpoint-based policy.

■        When configuring two Layer 3 external networks on the same node, the loopbacks need to be configured separately for both Layer 3 networks.

■        All endpoint groups (EPGs), including application EPGs and Layer 3 external EPGs, require a domain. Interface policy groups must also be associated with an Attach Entity Profile (AEP), and the AEP must be associated with domains. Based on the association of EPGs to domains and of the interface policy groups to domains, the ports and VLANs that the EPG uses are validated. This applies to all EPGs including bridged Layer 2 outside and routed Layer 3 outside EPGs. For more information, see the Cisco Fundamentals Guide and the KB: Creating Domains, Attach Entity Profiles, and VLANs to Deploy an EPG on a Specific Port article.

Note: In the 1.0(4x) and earlier releases, when creating static paths for application EPGs or layer 2/layer 3 outside EPGs, the physical domain was not required. In this release, it is required. Upgrading without the physical domain will raise a fault on the EPG stating “invalid path configuration.”

■        An EPG can only associate with a contract interface in its own tenant.

■        User passwords must meet the following criteria:

—      Minimum length is 8 characters

—      Maximum length is 64 characters

—      Fewer than three consecutive repeated characters

—      At least three of the following character types: lowercase, uppercase, digit, symbol

—      Cannot be easily guessed

—      Cannot be the username or the reverse of the username

—      Cannot be any variation of “cisco”, “isco”, or any permutation of these characters or variants obtained by changing the capitalization of letters therein

■        The power consumption statistics are not shown on leaf node slot 1.

■        For Layer 3 external networks created through the API or Advanced GUI and updated through the CLI, protocols need to be enabled globally on the external network through the API or Advanced GUI, and the node profile for all the participating nodes needs to be added through the API or Advanced GUI before doing any further updates through the CLI.

■        For Layer 3 external networks created through the CLI, you should not to update them through the API. These external networks are identified by names starting with “__ui_”.

■        The output from "show" commands issued in the NX-OS-style CLI are subject to change in future software releases. Cisco does not recommend using the output from the show commands for automation.

■        In this software version, the CLI is supported only for users with administrative login privileges.

■        If you defined multiple login domains, you can choose the login domain that you want to use when logging in to an APIC. By default, the domain drop-down list is empty, and if you do not choose a domain, the DefaultAuth domain is used for authentication. This can result in login failure if the username is not in the DefaultAuth login domain. As such, you must enter the credentials based on the chosen login domain.

Verified Scalability Limits

For the verified scalability limits, see the Verified Scalability Guide for this release:

http://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

New and Changed Information

This section lists the new and changed features in this release and includes the following topics:

■        New Software Features

■        New Hardware

■        Changes In Behavior

New Software Features

Table 4 lists the new software features in this release:

Table 4 New Software Features, Guidelines, and Restrictions

Feature

Description

Guidelines and Restrictions

Basic GUI and Advanced GUI for the APIC

The APIC GUI now has two operating modes: the Basic GUI and Advanced GUI.

The Basic GUI is simplified compared to the Advanced GUI, which provides for easier and faster configuration of ACI constructs. The Basic GUI has intelligence embedded that enables the APIC to create some of the ACI model constructs automatically for you, and the Basic GUI provides validations to ensure consistency in the configuration. This functionality reduces and prevents faults.

The Advanced GUI is equivalent to the GUI of the previous releases. You should use the Advanced GUI to manage any policy that you created prior to release 1.2.

For more information, see the Cisco APIC Getting Started Guide.

The performance for some Layer 3 configurations using the Basic GUI can be slow.

NX-OS-Style CLI for APIC

The APIC CLI is now similar to the NX-OS CLI. The NX-OS CLI has intelligence embedded that enables the APIC to create some of the ACI model constructs automatically for you, and the CLI provides validations to ensure consistency in the configuration. This functionality reduces and prevents faults.

For more information, see the Cisco APIC Getting Started Guide and Cisco APIC NX-OS Style Command-Line Interface Configuration Guide.

The performance for some CLI commands can be slow in a scale setup. For more information, see Verified Scalability Limits.

Class of Service Preservation

The ACI fabric enables preserving 802.1p class of service (CoS) within the fabric. Enable the fabric global QoS policy dot1p-preserve option to guarantee that the 802.1p value in packets which enter and transit the ACI fabric is preserved.

None

Common Pervasive Gateway

This feature enables you to configure multiple ACI fabrics with an IPv4 common gateway on a per bridge domain basis. Doing so enables moving one or more virtual machine (VM) or conventional hosts across the fabrics while the host retains its IP address. VM host moves across fabrics can be done automatically by the VM hypervisor. The ACI fabrics can be co-located, or provisioned across multiple sites. The Layer 2 connection between the ACI fabrics can be a local link, or can be across a routed WAN link.

None

Common Tenant

In the troubleshooting wizard, you can now configure a session with a bridge domain and context in the “Common” tenant.

None

Configuration Rollback

The Configuration Rollback feature allows a user to create snapshots in both a manual and scheduled manner. These snapshots can then be used to revert the configuration to a specific point in time.

None

Direct Server Return

The direct server return feature enables a server to respond directly to clients without having to go through the load balancer, which eliminates a bottleneck in the server-to-client path.

For more information, see the Cisco APIC Layer 4 to Layer 7 Services Deployment Guide.

None

Ingress Policy Enforcement for Layer 3 Out Scale

Starting with release 1.2(1), ingress-based policy enforcement enables defining policy enforcement for Layer 3 Out traffic with regard to egress and ingress directions. The default is ingress. During an upgrade to release 1.2(1) or higher, existing Layer 3 Out configurations are set to egress so that the behavior is consistent with the existing configuration; no special upgrade sequence needs to be planned. After the upgrade, an administrator changes the global property value to ingress. Once changed, the system reprograms the rules and prefix entries. Rules are removed from the egress leaf and installed on the ingress leaf, if not already present. If not already configured, an Actrl prefix entry is installed on the ingress leaf. Direct server return (DSR), and attribute-based EPGs require ingress-based policy enforcement. vzAny and taboo ignore ingress-based policy enforcement. Transit rules are applied at ingress.

In Ingress Policy enforcement mode, if a contract is defined between an L3InstP and an endpoint group, all of the prefixes of the L3InstP are installed in a non-border leaf where that endpoint group is present.

None

Local Policy Enforcement

This feature enforces a physical leaf’s policy on traffic that is across the fabric.

None

Maximum Prefix Limit

Tenant networking protocol policies for BGP l3extOut connections can be configured with a maximum prefix limit that enables monitoring and restricting the number of route prefixes received from a peer. Once the max prefix limit is exceeded, a log entry can be recorded, further prefixes can be rejected, the connection can be restarted if the count drops below the threshold in a fixed interval, or the connection is shut down. Only one option can be used at a time. The default setting is a limit of 20,000 prefixes, after which new prefixes are rejected. When the reject option is deployed, BGP accepts one more prefix beyond the configured limit and the APIC raises a fault.

Microsegmentation for Microsoft Virtualization

This feature supports virtual machine attribute-based endpoint groups for virtual endpoints that are attached to a VMM domain that has Microsoft SCVMM associated with it.

This feature is dependent the Microsoft System Center UR9 release and the appropriate APIC agent.

For more information, see the Cisco ACI Virtualization Guide.

None

Microsegmentation with IP-based Endpoint Groups

This feature supports IP-based endpoint groups for physical or virtual endpoints as they are admitted into the fabric. This policy is applied at the physical node level.

For more information, see the Cisco ACI Virtualization Guide.

You must use any of the following hardware to use this feature:

·         Nexus 9372PX-E

·         Nexus 9372TX-E

·         N9K-M6PQ-E

Role-Based Access Control Rule Enhancements

Layer 4 to Layer 7 policy configurations in a multi-tenant environment required administrator intervention to create certain objects that cannot be created by tenant administrators using the classic role-based access control (RBAC) domains and roles model definition. An Application Policy Infrastructure Controller (APIC) provides more granular RBAC privileges in the management information tree (MIT) such that you can grant tenant administrators the privileges that are required to create the objects. Tenant administrators can also create RBAC rules through self-service without administrator intervention to grant permissions for resources under their tenant subtree to other tenants and users in the system.

For more information, see the Cisco APIC Layer 4 to Layer 7 Services Deployment Guide.

None

Shared Layer 3 Out

A shared Layer 3 Out configuration provides routed connectivity to external networks as a shared service. An l3extInstP endpoint group (EPG) provides routed connectivity to external networks. It can be can be provisioned as a shared service in any tenant (user, common, infra, or mgmt.). Prior to release 1.2(1x), this configuration was only supported in the user and common tenants. An EPG in any tenant can use a shared services contract to connect with an l3extInstP EPG regardless of where in the fabric that l3extInstP EPG is provisioned. This simplifies the provisioning of routed connectivity to external networks; multiple tenants can share a single l3extInstP EPG for routed connectivity to external networks. Sharing an l3extInstP EPG is more efficient because it consumes only one session on the switch regardless of how many EPGs use the single shared l3extInstP EPG.

None

Simple Network Management Protocol support for APIC

The Simple Network Management Protocol (SNMP) is now supported for APIC.

None

Fabric Secure Mode

Fabric secure mode enhances physical fabric security by enforcing checks for leafs, spines, and APICs that join the fabric by requiring manual approval before they can join the fabric.

None

Static Route with Weights

The ACI fabric static route preference feature keeps static route preferences intact across leaf switches so that route selection happens based on this preference.

None

Unmanaged Mode

The unmanaged mode for services enables you to choose the APIC's behavior for allocating network resources and programming the fabric. When enabled, the unmanaged mode restricts the APIC to allocate only the network resources for a service appliance and to program only the fabric (leaf). The configuration of the device is left to be done externally by you.

For more information, see the Cisco APIC Layer 4 to Layer 7 Services Deployment Guide.

None

vRealize Integration

You can integrate ACI with VMWare's vRealize Orchestration (vRO), vRealize Automation (vRA), and vCenter.

For more information, see the Cisco ACI Virtualization Guide.

None

vSphere vMotion support across two vSphere Distributed Switches (vDSs)

vSphere vMotion support across two vCenters

vSphere vMotion capabilities have been enhanced in this release, enabling users to perform live migration of virtual machines across virtual switches, and vCenter Server systems.

For more information, see the VMware vSphere 6.0 Release Notes.

None

New Hardware Features

This release supports no new hardware features.

Changes in Behavior

This section lists changes in behavior in this release.

·         If an APIC REST query must return more than 100,000 objects, then an error is returned instead. The error message is “Unable to process the query, result dataset is too big” and the http error code is “400” (BAD_REQUEST). For queries that could return a large number of objects, the appropriate filters should be used. For example, filter for objects that are modified within a given time range, specified classes in the response subtree instead of the full subtree, or query from a subset of nodes instead of from all nodes. The limit of 100,000 objects can be increased to up to 500,000 by configuring the policy. However, increasing the limit might lead to slower response and the potential for memory exhaustion.

Caveats

This section contains lists of open and resolved caveats and known behaviors.

■        Open Caveats

■        Resolved Caveats

■        Known Behaviors

Open Caveats

Table 5 lists the open caveats in this release. Click the bug ID to access the Bug Search tool and see additional information about the bug.

Table 5 Open Caveats in Cisco APIC Release 1.2(1i)

Bug ID

Description

CSCuw61081

Live migration of a virtual machine initiated from SCVMM might fail if there is a compliance check failure on the virtual machine network.

CSCux39365

Port channel association to external connectivity using the CLI or Basic GUI might fail if the name is large.

CSCux43024

Configuring a VRF or context filter for SPAN-ing fabric ports by using the CLI does not succeed.

CSCuw61304

After a clean reboot and import of the configuration, a fault is raised for mgmt node connection groups.

CSCuw93034

Using the browser upload button to upload an image to the APIC from a local machine and canceling the upload midway, a stale image file remains in the /firmware/fwrepos/fwrepo.Uploads/ directory.

CSCux09127

If the Troubleshooting wizard is configured with the Layer 4 to Layer 7 service provider as the source and the Layer 4 to Layer 7 service consumer as the destination, it might not work.

CSCux25207

After upgrading TORs from the 1.1(4e) release to the 1.2(1i) release, when the maint-grp-1 set of the TORs are rebooted, there is traffic loss on the virtual machines.

CSCux40946

In some configuration sequences, the public subnets of some of the bridge domains might not be advertised to external networks, even though the protocols (BGP, OSPF, EIGRP) are configured with the 'default' route-map in the 'out' direction.

CSCux43480

External Layer 3 configuration for Layer 4 to Layer 7 route peering is unsupported through the CLI.

CSCux52176

Changing the management IP address of an unmanaged node (blade switch, Fabric interconnect) will result in blackhole of traffic.

Resolved Caveats

Table 6 lists the resolved caveats in this release. Click the bug ID to access the Bug Search tool and see additional information about the bug.

Table 6 Resolved Caveats in Cisco APIC Release 1.2(1i)

Bug ID

Description

CSCuw16683

A fault for prefix-entry-already-in-use is present when the fault is not expected.

CSCuw18244

A deployment query for an in-band endpoint group is not showing all in-band zones that are associated with the endpoint group.

CSCuw22254

An invalid path fault occurs when the same domain is attached to the selector domain and the domain is present on the override.

CSCuw23295

When running a troubleshooting wizard session, if a VMKernel endpoint that is attached to a virtual distributed switch is used for the source or destination, the troubleshooting wizard fails and the following error message returns: "Error processing data returned from server: TypeError: Cannot read property 'findParentRecord' of null".

CSCuw27075

In the "Show Usage" table of the GUI, spine nodes are shown for an endpoint group to IP atomic counter policies.

CSCuw27454

The deployment query for dhcpRelayP sometimes returns nodes where the policy was previously deployed.

CSCuw27507

In the "Show Usage" table of the GUI, diagnostics policies applicable to leaf nodes are shown to be deployed on spine nodes as well, and vice versa.

CSCuw35070

If there are two or more primary IP addresses configured and if one of the primary IP addresses that is in use is deleted, then the deleted IP address is still used as the primary IP address. None of the remaining primary addresses are used.

CSCuw52253

Pagination support for Layer 4 to Layer 7 parameter in case a huge list of parameters is to be configured.

CSCuw95500

Audit deduplication causes some objects to be deleted.

CSCux11026

The vmmmgr process crashes due to VMM reconfiguration.

CSCux40954

The Cisco APIC firmware process using the Upload button from the GUI does not work.  The upload appears to complete successfully, but the firmware is not updated in the repository.

Known Behaviors

Table 7 lists caveats that describe known behaviors in this release. Click the Bug ID to access the Bug Search Tool and see additional information about the bug.

Table 7 Known Behaviors in Cisco APIC Release 1.2(1i)

Bug ID

Description

CSCuo52668

The APIC does not validate duplicate IPs assigned to two device clusters. The communication to devices or the configuration of service devices might be affected.

CSCuo79243

In some of the 5-minute statistics data, the count of ten-second samples is 29 instead of 30.

CSCuo79250

The node ID policy can be replicated from an old appliance that is decommissioned when it joins a cluster.

CSCup47703

The DSCP value specified on an external endpoint group does not take effect on filter rules on the leaf switch.

CSCup79002

The hostname resolution of the syslog server fails on leaf and spine switches over in-band connectivity.

CSCup94070

After importing an exported configuration, graph instances are not created and Layer 4 to Layer 7 packages are missing in the system.

CSCuq21360

Following a FEX or switch reload, configured interface tags are no longer configured correctly.

CSCur39124

Switches could get downgraded to a 1.0(1x) version if the imported configuration consists of a firmware policy with a desired version set to 1.0(1x).

CSCur48950

Some reported client endpoints are not present on the APIC during an upgrade.

CSCur71082

The APIC is rebooted using the CIMC power reboot. On reboot, the system enters into fsck due to a corrupted disk.

CSCus15627

The Cisco APIC Service (ApicVMMService) shows as stopped in the Microsoft Service Manager (services.msc in control panel > admin tools > services) after valid domain credentials are entered during installation or configuration of the service.

CSCut51929

The traffic destined to a shared service provider endpoint group picks an incorrect class Id (PcTag) and gets dropped.

CSCuu09236

Traffic from an external Layer 3 network is allowed when configured as part of a vzAny (a collection of endpoint groups within a context) consumer.

CSCuu61998

The microsegment endpoint group is in the incorrect state after downgrading.

CSCuu64219

Downgrading the fabric starting with the leaf will cause faults such as policy-deployment-failed with fault code F1371.

CSCuu84328

In a NIC teaming topology that is connected to different leaves that are not in a Virtual Private Cloud (VPC), an endpoint group is deployed only on the leaf where IDEP is learned; the endpoint group is not deployed on the other leaves. If the interface to the first leaf goes down, traffic will be interrupted until the opflexODev timeout occurs. However, regardless of the timeout, traffic will continue to be interrupted if the hypervisor agent continues communicating with the leaf.

CSCuw09389

For direct server return operations, if the client is behind the Layer 3 out, the server-to-client response will not be forwarded through the fabric.

CSCuw34026

When you use the "Remove related objects of Graph Template” wizard in the APIC GUI, the APIC does not clean up objects that are in other tenants.

CSCuw81638

The OpenStack metadata feature cannot be used with ACI integration with the Juno release (or earlier) of OpenStack due to limitations with both OpenStack and Cisco’s ML2 driver.

Related Documentation

The Cisco Application Policy Infrastructure Controller (APIC) documentation can be accessed from the following website:

http://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2015 - 2016 Cisco Systems, Inc. All rights reserved.