Chapter 1. Using the CLI

About the ACI Switch CLI

Bash Conventions and Extensions

Chapter 2. C Commands

clear counters

Chapter 3. D Commands

debug reset interface

Chapter 4. I Commands

iping

iping6

itraceroute

itraceroute6

itraceroute vrf

itraceroute vrf vxlan

Chapter 5. R Commands

reload

reload fex

reload module

Chapter 6. S Commands

setinservice

show aaa

show aaa user default-role

show bgp ipv4 unicast vrf

show bgp sessions vrf

show bgp vpnv4 unicast vrf

show cdp all

show cdp entry

show cdp global

show cdp interface

show cdp neighbors

show cdp traffic interface

show clock

show copp policy

show cores

show diagnostic content module

show diagnostic result module

show diagnostic status module

show endpoint

show environment

show environment fex

show fex

show hardware

show hostname

show interface

show interface brief

show interface capabilities

show interface counters

show interface counters brief

show interface counters detailed

show interface counters errors

show interface counters snmp

show interface debounce

show interface description

show interface fex-fabric

show interface flowcontrol

show interface mac-address

show interface snmp-ifindex

show interface status

show interface switchport

show interface transceiver

show interface trunk

show inventory

show ip adjacency vrf

show ip arp

show ip bgp neighbors vrf

show ip bgp nexthop-database vrf

show ip dhcp client

show ip dhcp global statistics

show ip dhcp relay

show ip igmp snooping

show ip igmp snooping explicit-tracking

show ip igmp snooping groups

show ip igmp snooping lookup-mode

show ip igmp snooping mrouter

show ip igmp snooping querier

show ip igmp snooping statistics

show ip interface

show ip ospf interface

show ip ospf neighbors

show ip ospf route

show ip ospf traffic

show ip ospf vrf

show ip prefix-list

show ip process

show ip route vrf

show ip static-route

show isis adjacency vrf

show isis database vrf

show isis dteps vrf

show isis interface vrf

show isis protocol vrf

show isis route vrf

show isis statistics vrf

show isis traffic vrf

show lacp counters

show lacp interface

show lacp neighbor

show lacp port-channel

show lacp system-identifier

show lldp entry

show lldp interface

show lldp neighbors

show lldp timers

show lldp tlv-select

show lldp traffic

show locator-led status

show mac address-table

show module

show module fex

show monitor

show monitor session

show ntp authentication-keys

show ntp authentication-status

show ntp peer-status

show ntp peers

show ntp statistics peer ipaddr

show ntp trusted-keys

show port-channel capacity

show port-channel compatibility-parameters

show port-channel database

show port-channel summary

show port-channel traffic

show port-channel usage

show processes

show processes cpu

show processes cpu sort

show processes memory

show radius-server

show redundancy status

show route-map

show snmp community

show snmp context

show snmp user

show sprom

show switchname

show system redundancy status

show system reset-reason

show system reset-reason fex

show system resources

show system uptime

show tacacs-server

show tech-support

show users

show version

show version module

show vlan

show vlan all-ports

show vlan brief

show vlan id

show vlan reserved

show vlan summary

show vpc

show vpc consistency-parameters

show vpc peer-keepalive

show vpc role

show vpc statistics peer-keepalive

show vpc statistics vpc

show vrf

show vrf interface

show zoning-rule

Chapter 7. T Commands

techsupport local

Appendix A. Configuring Switch Management

Configuring Switch Console Settings

Appendix B. Using Boot Loader Commands

Using Boot Loader Commands

boot (loader command)

cmdline (loader command)

set gw (loader command)

set ip (loader command)

Preface

Audience

Document Conventions

Documentation Feedback

Copyright Page

Chapter 1. Using the CLI

- About the ACI Switch CLI

- Bash Conventions and Extensions

About the ACI Switch CLI

The ACI switch command-line interface (CLI) is iBash, which consists of the standard Bash command language interpreter shell plus a set of custom commands for ACI switches.

Note

To reach the iBash shell, you must login as admin, and not as root.

Virtual Shell (VSH or vshell), the traditional Cisco NX-OS switch interface, is not a supported mode for ACI. Limited VSH functionality is present for internal use by typing vsh in the iBash shell, but its use is not intended for normal operation. This guide does not describe VSH.

Bash Conventions and Extensions

Bash (Bourne Again SHell) is a Unix shell or command-line interpreter supported by a variety of operating systems. You can use the Bash interface to directly access the ACI switches or you can develop Bash shell scripts to automate tasks. Bash provides a variety of command line and scripting features.

For more information about the Bash shell , see Click Here .

Network Naming Conventions

Bash uses a forward slash (/) as a separator for interfaces, network addresses, and other settings.

For example, Ethernet interface number 46 on switch module 1 is represented as Eth1/46.

Command Completion

Bash provides tab completion for standard Linux commands and ACI switch-specific commands. When you press the Tab key at the end of a command or option abbreviation, Bash displays the command in full or the next available keyword or argument choice. Bash will also autocomplete unambiguous partial command arguments.

Note

Bash will autocomplete partial commands without the Tab key only after you enter the first level command. For example, show int br will be autocompleted as show interface brief, but sh int br will not be autocompleted.

Command History

The CLI supports the Bash shell history functions. To display the command history, you can use the Up Arrow or Down Arrow, as well as the history command.

You can reenter a command in the history by stepping through the history to recall the desired command and pressing Enter. You can also recall a command and change it before you enter it.

In addition, you can directly search for a previous command by pressing Ctrl-r and then typing part of the desired command until the command is displayed.

Command Help

At any time, you can press the Esc key twice to display the options available at the current state of the command syntax. If you have not entered anything at the prompt, pressing the Esc key twice lists all available commands for the current command mode. If you have partially entered a command, pressing the Esc key twice lists all the keywords and arguments available at your current position in the command syntax.

Note

The iBash CLI uses Esc-ESC instead of ? to avoid a conflict with the use of $? as a possible Bash prompt shortcut.

Chapter 2. C Commands

- clear counters

clear counters

clear counters [ interface [interface-id] ]

Syntax Description

clear

Clear contents

counters

Clear counters

interface

Clear interface counters

interface-id

Interface identifier

Examples

pod1-leaf1# clear counters interface e1/4

Chapter 3. D Commands

- debug reset interface

debug reset interface

debug reset interface interface-id

Syntax Description

debug

CLI debug action

reset

Reset interface

interface

Interface to be reset

interface-id

Interface identifier

Examples

This example shows you how to reset an Ethernet interface. After the reset, a show interface command should show the number of interface resets as one more than before this reset.

pod1-leaf1# debug reset    interface e1/25

pod1-leaf1# show interface e1/25
Ethernet1/25 is up
admin state is up, Dedicated Interface
Belongs to po4
Hardware: 100/1000/10000/auto Ethernet, address: 7c69.f60f.86bc (bia 7c69.f60f.86bc)
MTU 9000 bytes, BW 0 Kbit, DLY 1 usec
reliability 255/255, txload 1/255, rxload 1/255
Encapsulation ARPA, medium is broadcast
Port mode is trunk
full-duplex, 1000 Mb/s, media type is 1G
Beacon is turned off
Auto-Negotiation is turned on
Input flow-control is off, output flow-control is off
Auto-mdix is turned off
Rate mode is dedicated
Switchport monitor is off
EtherType is 0x8100
EEE (efficient-ethernet) : n/a
Last link flapped 00:00:20
Last clearing of "show interface" counters never
4 interface resets
30 seconds input rate 221 bits/sec, 0 packets/sec
30 seconds output rate 5744 bits/sec, 5 packets/sec
Load-Interval #2: 5 minute (300 seconds)
input rate 44064 bps, 75 pps; output rate 1677440 bps, 332 pps
RX
0 unicast packets  209 multicast packets  0 broadcast packets
209 input packets  16599 bytes
0 jumbo packets  0 storm suppression packets
0 runts  0 giants  0 CRC  0 no buffer
0 input error  0 short frame  0 overrun   0 underrun  0 ignored
0 watchdog  0 bad etype drop  0 bad proto drop  0 if down drop
0 input with dribble  0 input discard
0 Rx pause
TX
10261 unicast packets  1344 multicast packets  0 broadcast packets
11605 output packets  8268646 bytes
0 jumbo packets
0 output error  0 collision  0 deferred  0 late collision
0 lost carrier  0 no carrier  0 babble  0 output discard
0 Tx pause

Chapter 4. I Commands

- iping

- iping6

- itraceroute

- itraceroute6

- itraceroute vrf

- itraceroute vrf vxlan

iping

iping [ -V vrf ] [ -c count ] [ -i wait ] [ -p pattern ] [ -s packetsize ] [ -t timeout ] host

Syntax Description

iping

-V vrf

The Virtual Routing and Forwarding (VRF) instance from which to source the ping message.

-c count

Number of ping packets that are sent to the destination address. The default is 5.

-i wait

The time interval between sending of ping packets.

-p pattern

The data pattern of the ping payload. Different data patterns are used to troubleshoot framing errors and clocking problems on serial lines. The default is [0xABCD].

-s packetsize

Size of the ping packet (in bytes).

-t timeout

Timeout interval. The ping is declared successful only if the ECHO REPLY packet is received before this time interval.

host

The IP address or host name of the destination EP.

Examples

pod1-leaf1# iping -V overlay-1 10.0.59.154

PING 10.0.59.154 (10.0.59.154): 56 data bytes
64 bytes from 10.0.59.154: icmp_seq=0 ttl=55 time=0.254 ms
64 bytes from 10.0.59.154: icmp_seq=1 ttl=55 time=0.256 ms
64 bytes from 10.0.59.154: icmp_seq=2 ttl=55 time=0.245 ms
64 bytes from 10.0.59.154: icmp_seq=3 ttl=55 time=0.241 ms
64 bytes from 10.0.59.154: icmp_seq=4 ttl=55 time=0.23 ms

--- 10.0.59.154 ping statistics ---
5 packets transmitted, 5 packets received, 0.00% packet loss
round-trip min/avg/max = 0.23/0.245/0.256 ms

iping6

iping6 [ -V vrf ] [ -c count ] [ -i wait ] [ -p pattern ] [ -s packetsize ] [ -t timeout ] host

Syntax Description

iping6

-V vrf

The Virtual Routing and Forwarding (VRF) instance from which to source the ping message.

-c count

Number of ping packets that are sent to the destination address. The default is 5.

-i wait

The time interval between sending of ping packets.

-p pattern

The data pattern of the ping payload. Different data patterns are used to troubleshoot framing errors and clocking problems on serial lines. The default is [0xABCD].

-s packetsize

Size of the ping packet (in bytes).

-t timeout

Timeout interval. The ping is declared successful only if the ECHO REPLY packet is received before this time interval.

host

The IPv6 address or host name of the destination EP.

Command History

Release

Modification

11.2

This command was introduced.

Examples

pod1-leaf1# iping6 -V overlay-1 2001:0DB8::3/64

itraceroute

itraceroute dest-ip-address [payload-size]

Syntax Description

itraceroute

Trace steps to destination

dest-ip-address

Destination IP address

payload-size

Size of traceroute packet payload field

Usage Guidelines

Use this command to find multiple paths to a destination leaf from the current leaf. This command will execute a trace on the overlay VRF.

The itraceroute command provides the following improvements over traditional traceroute:

- Discovers and reports multiple paths

- Transits only a single probe packet per path

- Reports detailed node information

- Simulates tenant traffic, exploring paths under the applied policies

Examples

pod1-leaf1# itraceroute 10.0.71.61

Node traceroute to 10.0.71.61, infra VRF overlay-1, from [10.0.71.63], payload 56 bytes
Path 1
1: TEP      10.0.71.62  intf  eth1/35  0.596 ms
2: TEP      10.0.71.61  intf  eth1/98  0.392 ms

Path 2
1: TEP      10.0.71.62  intf  eth1/33  0.672 ms
2: TEP      10.0.71.61  intf  eth1/97  0.432 ms

Path 3
1: TEP      10.0.71.62  intf  eth1/35  0.693 ms
2: TEP      10.0.71.61  intf  eth1/97  0.484 ms

Path 4
1: TEP      10.0.71.62  intf  eth1/33  0.954 ms
2: TEP      10.0.71.61  intf  eth1/98  0.824 ms

itraceroute6

itraceroute6 dest-ip-address [payload-size]

Syntax Description

itraceroute6

Trace steps to destination

dest-ip-address

Destination IPv6 address

payload-size

Size of traceroute packet payload field

Usage Guidelines

Use this command to find multiple paths to a destination leaf from the current leaf. This command will execute a trace on the overlay VRF.

The itraceroute6 command provides the following improvements over traditional traceroute:

- Discovers and reports multiple paths

- Transits only a single probe packet per path

- Reports detailed node information

- Simulates tenant traffic, exploring paths under the applied policies

Command History

Release

Modification

11.2

This command was introduced.

Examples

pod1-leaf1# itraceroute6 2001:0DB8::3/64

itraceroute vrf

itraceroute dest-ip-address vrf vrf-name [ encap vlan [vlan-encap] ] [ payload payload-size ]

Syntax Description

itraceroute

Trace steps to destination

dest-ip-address

IP address of the destination EP

vrf

Trace within a virtual routing and forwarding (VRF) instance

vrf-name

Name of the VRF

encap

Source EP is encapsulated

vlan

VLAN encapsulation

vlan-encap

VLAN or EPG encapsulation to which the source EP belongs

payload

Specify the size of the traceroute packet payload field

payload-size

Size of traceroute packet payload field

Usage Guidelines

Use this command to find multiple paths to a destination endpoint (EP) from the current leaf on behalf of a physical link EP that is a directly connected host, and whose endpoint group (EPG) is identified with VLAN encapsulation. The multiple paths will include nodes inside the fabric.

Note

When the destination EP and source EP are in the same leaf (the current leaf), only one node appears in the path and the interface is marked as unspecified.

The itraceroute command provides the following improvements over traditional traceroute:

- Discovers and reports multiple paths

- Transits only a single probe packet per path

- Reports detailed node information

- Simulates tenant traffic, exploring paths under the applied policies

Examples

pod1-leaf1# itraceroute 56.17.0.11 vrf t31:ctx31 encap vlan 594

Tenant traceroute to 56.17.0.11, tenant VRF t31:ctx31, source encap vlan-594, from [10.0.90.157], payload 56 bytes
Path 1
1: TEP     10.0.90.158  intf   eth1/7  0.554 ms
2: TEP     10.0.90.159  intf  eth1/49  0.676 ms

Path 2
1: TEP     10.0.90.158  intf  eth1/29  0.618 ms
2: TEP     10.0.90.159  intf  eth1/51  0.787 ms

Path 3
1: TEP     10.0.90.158  intf   eth1/5  0.656 ms
2: TEP     10.0.90.159  intf  eth1/51  0.855 ms

Path 4
1: TEP     10.0.90.158  intf  eth1/29  0.677 ms
2: TEP     10.0.90.159  intf  eth1/49  0.923 ms

Path 5
1: TEP     10.0.90.158  intf   eth1/7  0.695 ms
2: TEP     10.0.90.159  intf  eth1/51  1.015 ms

Path 6
1: TEP     10.0.90.158  intf   eth1/5  0.808 ms
2: TEP     10.0.90.159  intf  eth1/49  1.311 ms

itraceroute vrf vxlan

itraceroute dest-ip-address vrf vrf-name encap vxlan [vxlan-encap] dst-mac dest-mac-address [ payload payload-size ]

Syntax Description

itraceroute

Trace steps to destination

dest-ip-address

IP address of the destination EP

vrf

Trace within a virtual routing and forwarding (VRF) instance

vrf-name

Name of the VRF

encap

Source EP is encapsulated

vxlan

VXLAN encapsulation

vxlan-encap

VXLAN encapsulation to which the source EP belongs

dst-mac

Specifies MAC address of the destination EP

dest-mac-address

MAC address of the destination EP

payload

Specify the size of the traceroute packet payload field

payload-size

Size of traceroute packet payload field

Usage Guidelines

Use this command to find multiple paths to a destination endpoint (EP) from the current leaf on behalf of an EP that is behind a virtual tunnel endpoint (VTEP), and whose endpoint group (EPG) is identified with VXLAN encapsulation. The multiple paths will include nodes inside the fabric.

Note

When the destination EP and source EP are in different bridge domains, the destination MAC address must be the switch virtual interface (SVI) MAC address of the source EP bridge domain.

The itraceroute command provides the following improvements over traditional traceroute:

- Discovers and reports multiple paths

- Transits only a single probe packet per path

- Reports detailed node information

- Simulates tenant traffic, exploring paths under the applied policies

Examples

pod1-leaf1# itraceroute 100.2.2.201 vrf t2:L3C2 encap vxlan 5003 dst-mac 00:50:56:B3:5E:3D

Tenant traceroute to 100.2.2.201, tenant VRF t2:L3C2, source encap vxlan-5003, VTEP IP 10.0.0.95, from [10.0.90.159], payload 56 bytes
Path 1
1: TEP     10.0.90.128  intf   eth4/1  0.608 ms
2: TEP     10.0.90.131  intf  eth1/49  0.566 ms

Path 2
1: TEP     10.0.90.128  intf   eth3/1  0.879 ms
2: TEP     10.0.90.131  intf  eth1/50  0.810 ms

Path 3
1: TEP     10.0.90.128  intf   eth4/1  0.943 ms
2: TEP     10.0.90.131  intf  eth1/50  1.057 ms

Path 4
1: TEP     10.0.90.128  intf   eth3/1  0.957 ms
2: TEP     10.0.90.131  intf  eth1/49  1.116 ms

Chapter 5. R Commands

- reload

- reload fex

- reload module

reload

reload

Syntax Description

reload

Reload the chassis

reload fex

reload fex [fex-number]

Syntax Description

reload

Reload Information

fex

FEX module

fex-number

FEX module number

reload module

reload module [module-number]

Syntax Description

reload

Reload Information

module

Module

module-number

Module number

Usage Guidelines

Reloading an active supervisor module causes a switchover to the standby supervisor.

Chapter 6. S Commands

- setinservice

- show aaa

- show aaa user default-role

- show bgp ipv4 unicast vrf

- show bgp sessions vrf

- show bgp vpnv4 unicast vrf

- show cdp all

- show cdp entry

- show cdp global

- show cdp interface

- show cdp neighbors

- show cdp traffic interface

- show clock

- show copp policy

- show cores

- show diagnostic content module

- show diagnostic result module

- show diagnostic status module

- show endpoint

- show environment

- show environment fex

- show fex

- show hardware

- show hostname

- show interface

- show interface brief

- show interface capabilities

- show interface counters

- show interface counters brief

- show interface counters detailed

- show interface counters errors

- show interface counters snmp

- show interface debounce

- show interface description

- show interface fex-fabric

- show interface flowcontrol

- show interface mac-address

- show interface snmp-ifindex

- show interface status

- show interface switchport

- show interface transceiver

- show interface trunk

- show inventory

- show ip adjacency vrf

- show ip arp

- show ip bgp neighbors vrf

- show ip bgp nexthop-database vrf

- show ip dhcp client

- show ip dhcp global statistics

- show ip dhcp relay

- show ip igmp snooping

- show ip igmp snooping explicit-tracking

- show ip igmp snooping groups

- show ip igmp snooping lookup-mode

- show ip igmp snooping mrouter

- show ip igmp snooping querier

- show ip igmp snooping statistics

- show ip interface

- show ip ospf interface

- show ip ospf neighbors

- show ip ospf route

- show ip ospf traffic

- show ip ospf vrf

- show ip prefix-list

- show ip process

- show ip route vrf

- show ip static-route

- show isis adjacency vrf

- show isis database vrf

- show isis dteps vrf

- show isis interface vrf

- show isis protocol vrf

- show isis route vrf

- show isis statistics vrf

- show isis traffic vrf

- show lacp counters

- show lacp interface

- show lacp neighbor

- show lacp port-channel

- show lacp system-identifier

- show lldp entry

- show lldp interface

- show lldp neighbors

- show lldp timers

- show lldp tlv-select

- show lldp traffic

- show locator-led status

- show mac address-table

- show module

- show module fex

- show monitor

- show monitor session

- show ntp authentication-keys

- show ntp authentication-status

- show ntp peer-status

- show ntp peers

- show ntp statistics peer ipaddr

- show ntp trusted-keys

- show port-channel capacity

- show port-channel compatibility-parameters

- show port-channel database

- show port-channel summary

- show port-channel traffic

- show port-channel usage

- show processes

- show processes cpu

- show processes cpu sort

- show processes memory

- show radius-server

- show redundancy status

- show route-map

- show snmp community

- show snmp context

- show snmp user

- show sprom

- show switchname

- show system redundancy status

- show system reset-reason

- show system reset-reason fex

- show system resources

- show system uptime

- show tacacs-server

- show tech-support

- show users

- show version

- show version module

- show vlan

- show vlan all-ports

- show vlan brief

- show vlan id

- show vlan reserved

- show vlan summary

- show vpc

- show vpc consistency-parameters

- show vpc peer-keepalive

- show vpc role

- show vpc statistics peer-keepalive

- show vpc statistics vpc

- show vrf

- show vrf interface

- show zoning-rule

setinservice

setinservice

Syntax Description

setinservice

Brings previously blacklisted ports back into service.

Usage Guidelines

Use this command to bring the fabric, controller, and infra ports back into service in the case where all ports have been inadvertently blacklisted and the controller has no way to communicate with the switch. This command is not used in normal operation.

Examples

pod1-leaf1# setinservice

Starting node port bringup
Bringing up controller,epg,infra port: sys/phys-[eth1/7]
Bringing up fabric,epg port: sys/phys-[eth1/8]
Bringing up infra port: sys/phys-[eth1/9]
Bringing up controller port: sys/phys-[eth1/10]
.
. [EXAMPLE TRUNCATED]
.

show aaa

show aaa [ authentication | groups ]

Syntax Description

show

Show Information

aaa

aaa

authentication

Authentication

groups

Groups

Examples

pod1-leaf1# show aaa groups

inb-radius
ins-radius
Tacacs-oob

pod1-leaf1# show aaa authentication

default: group ins-radius
console: group inb-radius

show aaa user default-role

show aaa user default-role

Syntax Description

show

Show Information

aaa

aaa

user

User

default-role

Default role assigned by aaa-admin for remote authentication

Examples

pod1-leaf1# show aaa user default-role

enabled

show bgp ipv4 unicast vrf

show bgp ipv4 unicast vrf { all | vrf-name }

Syntax Description

show

Show running system information

bgp

Show BGP information

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for IPv4 unicast address family

vrf

Show BGP information for a VRF

all

Show BGP information for all VRFs

vrf-name

Name of the VRF

Examples

pod1-leaf1# show bgp ipv4 unicast vrf t1:ctx0

BGP routing table information for VRF t1:ctx0, address family IPv4 Unicast
BGP table version is 18, local router ID is 100.20.1.1
Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best
Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist
Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath

Network            Next Hop            Metric     LocPrf     Weight Path
*>r10.10.1.0/29       0.0.0.0                  0        100      32768  ?
* i                   10.0.113.221             0        100          0  ?
*>r10.20.1.0/29       0.0.0.0                  0        100      32768  ?
* i                   10.0.113.221             0        100          0  ?
*>r100.10.1.0/29      0.0.0.0                  0        100      32768  ?
*>r100.20.1.1/32      0.0.0.0                  0        100      32768  ?
*>i100.20.1.2/32      10.0.113.221             0        100          0  ?
*>r11.0.1.0/24        0.0.0.0                  0        100      32768  ?
*>r11.0.2.0/24        0.0.0.0                  0        100      32768  ?
*>r11.2.1.0/24        0.0.0.0                  0        100      32768  ?
*>r11.2.2.0/24        0.0.0.0                  0        100      32768  ?

show bgp sessions vrf

show bgp sessions vrf { all | vrf-name }

Syntax Description

show

Show running system information

bgp

Show BGP information

sessions

Show BGP sessions

vrf

Show BGP sessions in a VRF

all

Show BGP sessions for all VRFs

vrf-name

Name of the VRF

Examples

This example shows how to display BGP sessions for a single VRF:

pod1-leaf1# show bgp sessions vrf t1:ctx0

Total peers 2, established peers 0
ASN 100
VRF t1:ctx0, local ASN 100
peers 2, established peers 0, local router-id 100.20.1.1
State: I-Idle, A-Active, O-Open, E-Established, C-Closing, S-Shutdown

Neighbor        ASN    Flaps LastUpDn|LastRead|LastWrit St Port(L/R)  Notif(S/R)
10.17.1.4        100 0     22:57:07|never   |never    I  0/0        0/0
10.17.1.3        100 0     22:57:07|never   |never    I  0/0        0/0

show bgp vpnv4 unicast vrf

show bgp vpnv4 unicast vrf { all | vrf-name }

Syntax Description

show

Show running system information

bgp

Show BGP information

vpnv4

Display BGP information for VPNv4 address family

unicast

Display BGP information for VPNv4 unicast address family

vrf

Show BGP information for a VRF

all

Show BGP information for all VRFs

vrf-name

Name of the VRF

Examples

pod1-leaf1# show bgp vpnv4 unicast vrf overlay-1

BGP routing table information for VRF overlay-1, address family VPNv4 Unicast
BGP table version is 945, local router ID is 10.0.113.223
Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best
Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist
Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath

Network            Next Hop            Metric     LocPrf     Weight Path
Route Distinguisher: 10.0.113.221:1
*>i10.10.1.0/29       10.0.113.221             0        100          0  ?
*>i10.20.1.0/29       10.0.113.221             0        100          0  ?
*>i100.20.1.2/32      10.0.113.221             0        100          0  ?

Route Distinguisher: 10.0.113.221:2
*>i10.10.1.0/29       10.0.113.221             0        100          0  ?
*>i10.20.1.0/29       10.0.113.221             0        100          0  ?
*>i100.20.1.2/32      10.0.113.221             0        100          0  ?
.
. [EXAMPLE TRUNCATED]
.
Route Distinguisher: 10.0.113.223:73     (VRF t14:ctx0)
*>r10.10.1.0/29       0.0.0.0                  0        100      32768  ?
* i                   10.0.113.221             0        100          0  ?
*>r10.20.1.0/29       0.0.0.0                  0        100      32768  ?
* i                   10.0.113.221             0        100          0  ?
*>r100.10.1.0/29      0.0.0.0                  0        100      32768  ?
*>r100.20.1.1/32      0.0.0.0                  0        100      32768  ?
*>i100.20.1.2/32      10.0.113.221             0        100          0  ?
*>r114.0.1.0/24       0.0.0.0                  0        100      32768  ?
*>r114.0.2.0/24       0.0.0.0                  0        100      32768  ?
*>r114.2.1.0/24       0.0.0.0                  0        100      32768  ?
*>r114.2.2.0/24       0.0.0.0                  0        100      32768  ?

show cdp all

show cdp all

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

all

Show all interfaces in CDP database

Examples

pod1-leaf1# show cdp all

mgmt0 is up
CDP disabled on interface
Refresh time is 60 seconds
Hold time is 180 seconds
Ethernet1/1 is up
CDP disabled on interface
Refresh time is 60 seconds
Hold time is 180 seconds
Ethernet1/2 is down
CDP disabled on interface
Refresh time is 60 seconds
Hold time is 180 seconds
Ethernet1/3 is down
CDP disabled on interface
Refresh time is 60 seconds
Hold time is 180 seconds
Ethernet1/4 is down
CDP disabled on interface
Refresh time is 60 seconds
Hold time is 180 seconds
Ethernet1/5 is up
CDP disabled on interface
Refresh time is 60 seconds
Hold time is 180 seconds
.
. [EXAMPLE TRUNCATED]
.
Ethernet1/60 is down
CDP disabled on interface
Refresh time is 60 seconds
Hold time is 180 seconds
Ethernet101/1/1 is up
CDP disabled on interface
Refresh time is 60 seconds
Hold time is 180 seconds
.
. [EXAMPLE TRUNCATED]
.
Ethernet102/1/48 is up
CDP disabled on interface
Refresh time is 60 seconds
Hold time is 180 seconds

show cdp entry

show cdp entry { all | name dev-id }

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

entry

Show CDP entries in database

all

Show all CDP entries in database

name

Show a specific CDP entry matching a name

dev-id

Type: string

Device ID (Max Size 256)

show cdp global

show cdp global

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

global

Show CDP global parameters

show cdp interface

show cdp interface arg0

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

interface

Show CDP parameters for an interface

arg0

Type: interface

Interface

show cdp neighbors

show cdp neighbors [ interface arg0 ] [detail]

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

neighbors

Show CDP neighbors

interface

Show CDP neighbors on an interface

arg0

Type: interface

Interface

detail

Show CDP neighbors detailed

Examples

pod1-leaf1# show cdp neighbors

Capability Codes: R - Router, T - Trans-Bridge, B - Source-Route-Bridge
S - Switch, H - Host, I - IGMP, r - Repeater,
V - VoIP-Phone, D - Remotely-Managed-Device,
s - Supports-STP-Dispute
Device-ID          Local Intrfce  Hldtme  Capability  Platform      Port ID
ifav32-n3k-1(FOC1732R0RY)
Eth1/17         143     R S I s    N3K-C3064PQ-   Eth1/17
ifav32-n3k-1(FOC1732R0RY)
Eth1/18         148     R S I s    N3K-C3064PQ-   Eth1/18
ifav32-n3k-1(FOC1732R0RY)
Eth1/19         148     R S I s    N3K-C3064PQ-   Eth1/19
ifav32-n3k-1(FOC1732R0RY)
Eth1/20         148     R S I s    N3K-C3064PQ-   Eth1/20

show cdp traffic interface

show cdp traffic interface arg0

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

traffic

Show cdp traffic statistics

interface

Show cdp traffic statistics on an interface

arg0

Type: interface

Interface

show clock

show clock

Syntax Description

show

Show running system information

clock

Display current date and time

Examples

pod1-leaf1# show clock

16:14:59.405604 UTC Sat Jun 07 2014

show copp policy

show copp polivy

Syntax Description

show

Show running system information

copp

Display control plane policing (copp) information

policy

Display control plane policing policy information

Examples

pod1-leaf1# show copp policy

COPP Class           COPP proto           COPP Rate            COPP Burst
ifc                  ifc                  5000                 5000
igmp                 igmp                 1500                 1500
cdp                  cdp                  1000                 1000
pim                  pim                  500                  500
dhcp                 dhcp                 1360                 340
lacp                 lacp                 1000                 1000
ospf                 ospf                 2000                 2000
arp                  arp                  1360                 340
lldp                 lldp                 1000                 1000
acllog               acllog               500                  500
stp                  stp                  1000                 1000
coop                 coop                 5000                 5000
traceroute           traceroute           500                  500
isis                 isis                 1500                 5000
icmp                 icmp                 500                  500
bgp                  bgp                  5000                 5000

show cores

show cores

Syntax Description

show

Show information

cores

Show all core dumps for the current vdc

show diagnostic content module

show diagnostic content module { all | module_id } [ test test-number ] [detail]

Syntax Description

show

Show information

diagnostic

Diagnostic commands

content

Show diagnostic test content

module

Module Keyword

all

Select all module ID

module_id

Module ID

test

Display the specified test

test-number

Test number

detail

Display detailed information

Examples

This example shows the diagnostic content available for module 1:

pod1-spine2# show diagnostic content mod 1

Module 1: 36p 40G Ethernet Module

Diagnostics test suite attributes:
B/C/* - Bypass bootup level test / Complete bootup level test / NA
P/*   - Per port test / NA
M/S/* - Only applicable to active / standby unit / NA
D/N/* - Disruptive test / Non-disruptive test / NA
H/O/* - Always enabled monitoring test / Conditionally enabled test / NA
F/*   - Fixed monitoring interval test / NA
X/*   - Not a health monitoring test / NA
E/*   - Sup to line card test / NA
L/*   - Exclusively run this test / NA
T/*   - Not an ondemand test / NA
A/I/* - Monitoring is active / Monitoring is inactive / NA

Testing Interval
ID   Name                               Attributes      (hh:mm:ss)
__  _________________________________ ____________   _________________
1)  bios-mem---------------------->     B**N**X****     -NA-
4)  nsa-mem----------------------->     B**D**X****     -NA-
6)  fabp-prbs--------------------->     CP*D**XE***     -NA-
9)  mvl4p-eobc-snake-------------->     B**D**X****     -NA-
22)  cpu-cache--------------------->     ***N******A     00:05:00
23)  mem-health-------------------->     ***N******A     00:05:00
25)  act2-acc---------------------->     ***N******A     00:05:00
27)  spi-cksum--------------------->     ***N******A     00:05:00
31)  obfl-acc---------------------->     ***N******A     00:05:00
33)  fpga-reg-chk------------------>     ***N******A     00:05:00
34)  asic-scratch------------------>     ***N******A     00:05:00
35)  eobc-mon---------------------->     ***N******A     00:05:00
37)  flash-acc--------------------->     ***N******A     00:05:00
39)  lcfc-conn--------------------->     ***N***E**I     00:05:00

This example displays the detailed results of test number 1:

pod1-spine2# show diagnostic result mod 1 test 1 detail

Current bootup diagnostic level: bypass
Module 1: 36p 40G Ethernet Module

Test results: (. = Pass, F = Fail, I = Incomplete,
U = Untested, A = Abort, E = Error disabled)
----------------------------------------------------------------------

1) bios-mem .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 1
Last test execution time ----> 2014-06-07 02:53:46
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-06-07 02:53:46
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time --------->  n/a

----------------------------------------------------------------------

show diagnostic result module

show diagnostic result module { module_id | all } [detail]

Syntax Description

show

Show information

diagnostic

Diagnostic commands

result

Show test results

module

<1-30> Module number

module_id

Type: string

Module ID

all

Show information for all modules

detail

Detailed information

Examples

pod1-leaf1# show diagnostic result module 1

Current bootup diagnostic level: bypass
Module 1: 1/10G Ethernet Module  (Active)

Test results: (. = Pass, F = Fail, I = Incomplete,
U = Untested, A = Abort, E = Error disabled)

1) bios-mem----------------------->  .
2) mgmtp-lb----------------------->  .
3) cpu-cache---------------------->  .
4) mem-health--------------------->  .
5) ssd-acc------------------------>  .
6) act2-acc----------------------->  .
7) ge-eeprom---------------------->  .
8) spi-cksum---------------------->  .
9) usb-bus------------------------>  .
10) cons-dev----------------------->  .
11) obfl-acc----------------------->  F
12) nvram-cksum-------------------->  .
13) rtc-test----------------------->  .
14) nsa-mem------------------------>  .
15) fpga-reg-chk------------------->  .
16) asic-scratch------------------->  .
17) fabp-prbs:

Port     1  2  3  4  5  6  7  8  9 10 11 12
-----------------------------------------
.  .  .  .  .  .  .  .  .  .  .  .

pod1-leaf1# show diagnostic result module 1 detail

Current bootup diagnostic level: bypass
Module 1: 1/10G Ethernet Module  (Active)

Test results: (. = Pass, F = Fail, I = Incomplete,
U = Untested, A = Abort, E = Error disabled)
----------------------------------------------------------------------

1) bios-mem .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 1
Last test execution time ----> 2014-04-23 22:00:32
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-23 22:00:50
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time --------->  n/a

----------------------------------------------------------------------

2) mgmtp-lb .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 1
Last test execution time ----> 2014-04-23 22:00:32
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-23 22:00:50
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time --------->  n/a

----------------------------------------------------------------------

3) cpu-cache .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:55
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

4) mem-health .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:55
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

5) ssd-acc .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:55
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

6) act2-acc .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:55
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

7) ge-eeprom .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:55
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

8) spi-cksum .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:55
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

9) usb-bus .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:55
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

10) cons-dev .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:55
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

11) obfl-acc F

Error code ------------------> DIAG TEST FAIL
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time -----> 2014-04-23 22:05:50
Last test failure time ------> 2014-04-25 00:00:55
Last test pass time --------->  n/a
Total failure count ---------> 312
Consecutive failure count ---> 312
Last failure reason ---------> DIAG TEST FAIL
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

12) nvram-cksum .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:55
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

13) rtc-test .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:00:55
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:00:59
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:05:55

----------------------------------------------------------------------

14) nsa-mem .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 1
Last test execution time ----> 2014-04-23 22:00:59
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-23 22:00:59
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time --------->  n/a

----------------------------------------------------------------------

15) fpga-reg-chk .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:01:25
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:01:25
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:06:25

----------------------------------------------------------------------

16) asic-scratch .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 312
Last test execution time ----> 2014-04-25 00:01:25
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-25 00:01:25
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time ---------> 2014-04-25 00:06:25

----------------------------------------------------------------------

17) fabp-prbs

Port     1  2  3  4  5  6  7  8  9 10 11 12
-----------------------------------------
.  .  .  .  .  .  .  .  .  .  .  .

Error code ------------------> DIAG TEST SUCCESS
Total run count -------------> 12
Last test execution time ----> 2014-04-23 22:01:22
First test failure time ----->  n/a
Last test failure time ------>  n/a
Last test pass time ---------> 2014-04-23 22:01:22
Total failure count ---------> 0
Consecutive failure count ---> 0
Last failure reason ---------> DIAG TEST SUCCESS
Next Execution time --------->  n/a

----------------------------------------------------------------------

show diagnostic status module

show diagnostic status module module_id

Syntax Description

show

Show information

diagnostic

Diagnostic commands

status

Show test status(running/enqueued)

module

<1-30> Module number

module_id

Type: string

Module ID

Examples

pod1-leaf1# show diagnostic status module 1

<BU>-Bootup Diagnostics, <HM>-Health Monitoring Diagnostics

<OD>-OnDemand Diagnostics, <SCH>-Scheduled Diagnostics

==============================================
Card:(1) 1/10G Ethernet Module
==============================================
Current running test               Run by
-NA-                           -NA-

show endpoint

show endpoint [ address mac-address | vlan vlan-id ] [ interface interface-id ] [summary]

Syntax Description

show

Show Information

endpoint

Endpoint information

address

Endpoint address

mac-address

MAC address

interface

Endpoint interface

interface-id

Interface identifier

vlan

Interface VLAN

vlan-id

VLAN number

summary

Summarize information about different types of endpoints in the switch

Usage Guidelines

This command shows all the endpoints, both static and dynamically learned, that are known to the switch. The command output indicates the type of interface, such as a physical port or port channel, a virtual port (FEX), or a tunnel interface. Additional flags indicate whether the endpoint is behind a virtual port channel (vPC), is a hypervisor, or is a static endpoint.

With the address option, you can specify the MAC address in one of the following formats:

- E.E.E

- EE-EE-EE-EE-EE-EE

- EE:EE:EE:EE:EE:EE

- EEEE.EEEE.EEEE

Examples

pod1-leaf1# show endpoint

Legend:
P - peer-attached    H - vtep             A - locally-aged     S - static
V - vpc-attached     P - peer-aged        L - local            p - span
s - static-arp       B - bounce
+---------------+---------------+-----------------+--------------+-------------+
VLAN/       Encap           MAC Address       MAC Info/       Interface
Domain      VLAN            IP Address        IP Info
+---------------+---------------+-----------------+--------------+-------------+
538/t32:ctx1            vlan-227    0000.0000.0080 L                     eth1/18
538/t32:ctx1            vlan-227    0000.0000.017a P                     eth1/18
540/t32:ctx1            vlan-226    0000.0000.007f L                     eth1/18
.
. [EXAMPLE TRUNCATED]
.
536/t42:ctx1            vlan-267    0000.0000.00a8 L                     eth1/18
536/t42:ctx1            vlan-267    0000.0000.01a2 P                     eth1/18
13/overlay-1      vxlan-16777209    90e2.ba45.a454 L                      eth1/1
overlay-1                              10.0.63.127
overlay-1                               10.0.36.66
+------------------------------------------------------------------------------+
Endpoint Summary
+------------------------------------------------------------------------------+
Total number of Local Endpoints     : 222
Total number of Remote Endpoints    : 0
Total number of Peer Endpoints      : 245
Total number of Orphan Endpoints    : 222
Total number of VPC Endpoints       : 0
Total number of MACs                : 467
Total number of VTEPs               : 0
Total number of Local IPs           : 0
Total number of Remote IPs          : 2
Total number All EPs                : 467

pod1-leaf1# show endpoint summary

+------------------------------------------------------------------------------+
Endpoint Summary
+------------------------------------------------------------------------------+
Total number of Local Endpoints     : 222
Total number of Remote Endpoints    : 0
Total number of Peer Endpoints      : 245
Total number of Orphan Endpoints    : 222
Total number of VPC Endpoints       : 0
Total number of MACs                : 467
Total number of VTEPs               : 0
Total number of Local IPs           : 0
Total number of Remote IPs          : 2
Total number All EPs                : 467

pod1-leaf1# show endpoint address 0000.d0c0.342a

Legend:
P - peer-attached    H - vtep             A - locally-aged     S - static
V - vpc-attached     P - peer-aged        L - local            p - span
s - static-arp       B - bounce
+---------------+---------------+-----------------+--------------+-------------+
VLAN/       Encap           MAC Address       MAC Info/       Interface
Domain      VLAN            IP Address        IP Info
+---------------+---------------+-----------------+--------------+-------------+
455/DuIPTV:ctx0        vlan-3510    0000.d0c0.342a LV                        po1
+------------------------------------------------------------------------------+
Endpoint Summary
+------------------------------------------------------------------------------+
Total number of Local Endpoints     : 1
Total number of Remote Endpoints    : 1
Total number of Peer Endpoints      : 0
Total number of VPC Endpoints       : 1
Total number of Orphan Endpoints    : 0
Total number of MACs                : 2
Total number of VTEPs               : 0
Total number of Local IPs           : 304
Total number of Remote IPs          : 0
Total number All EPs                : 2

pod1-leaf1# show endpoint interface port-channel 1

Legend:
P - peer-attached    H - vtep             A - locally-aged     S - static
V - vpc-attached     P - peer-aged        L - local            p - span
s - static-arp       B - bounce
+---------------+---------------+-----------------+--------------+-------------+
VLAN/       Encap           MAC Address       MAC Info/       Interface
Domain      VLAN            IP Address        IP Info
+---------------+---------------+-----------------+--------------+-------------+
455/DuIPTV:ctx0        vlan-3510    0000.d0c0.342a LV                        po1
+------------------------------------------------------------------------------+
Endpoint Summary
+------------------------------------------------------------------------------+
Total number of Local Endpoints     : 1
Total number of Remote Endpoints    : 1
Total number of Peer Endpoints      : 0
Total number of VPC Endpoints       : 1
Total number of Orphan Endpoints    : 0
Total number of MACs                : 2
Total number of VTEPs               : 0
Total number of Local IPs           : 304
Total number of Remote IPs          : 0
Total number All EPs                : 2

pod1-leaf1# show endpoint vlan 454

Legend:
P - peer-attached    H - vtep             A - locally-aged     S - static
V - vpc-attached     P - peer-aged        L - local            p - span
s - static-arp       B - bounce
+---------------+---------------+-----------------+--------------+-------------+
VLAN/       Encap           MAC Address       MAC Info/       Interface
Domain      VLAN            IP Address        IP Info
+---------------+---------------+-----------------+--------------+-------------+
454/DuIPTV:ctx0   vxlan-15368108    d867.d97d.48fe                      tunnel17
+------------------------------------------------------------------------------+
Endpoint Summary
+------------------------------------------------------------------------------+
Total number of Local Endpoints     : 1
Total number of Remote Endpoints    : 1
Total number of Peer Endpoints      : 0
Total number of VPC Endpoints       : 1
Total number of Orphan Endpoints    : 0
Total number of MACs                : 2
Total number of VTEPs               : 0
Total number of Local IPs           : 304
Total number of Remote IPs          : 0
Total number All EPs                : 2

show environment

show environment [ fan | power | temperature ]

Syntax Description

show

Show Information

environment

Environment Information

fan

Fan Information

power

Power supply Information

temperature

Sensor Temperature Information

Examples

pod1-leaf1# show environment

Power Supply:
Voltage: 12.0 Volts

Power                              Actual        Total
Supply    Model                    Output     Capacity    Status
(Watts )     (Watts )
-------  -------------------  -----------  -----------  --------------
1        UCSC-PSU-650W              178 W        648 W        ok
2        UCSC-PSU-650W                0 W        648 W       shut

Actual        Power
Module     Model                     Draw    Allocated    Status
(Watts )     (Watts )
--------  -------------------  -----------  -----------  --------------
1         N9K-C9396PX                178 W        456 W    Powered-Up
fan1      N9K-C9508-FAN                N/A          N/A    Powered-Up
fan2      N9K-C9508-FAN                N/A          N/A    Powered-Up
fan3      N9K-C9508-FAN                N/A          N/A    Powered-Up

N/A - Per module power not available

Power Usage Summary:
--------------------
Power Supply redundancy mode (configured)                Non-Redundant(combined)
Power Supply redundancy mode (operational)               Non-Redundant(combined)

Total Power Capacity (based on configured mode)               648  W
Total Power of all Inputs (cumulative)                        648  W
Total Power Output (actual draw)                              178  W
Total Power Allocated (budget)                                N/A
Total Power Available for additional modules                  N/A

Fan:
------------------------------------------------------
Fan             Model                Hw         Status
------------------------------------------------------
Fan1(sys_fan1)  N9K-C9300-FAN1-B     --         ok
Fan2(sys_fan2)  N9K-C9300-FAN1-B     --         ok
Fan3(sys_fan3)  N9K-C9300-FAN1-B     --         ok
Fan_in_PS1      --                   --         ok
Fan_in_PS2      --                   --         ok
Fan Speed: Zone 1:  0x50
Fan Air Filter : Absent

Temperature:
--------------------------------------------------------------------
Module   Sensor        MajorThresh   MinorThres   CurTemp     Status
(Celsius)     (Celsius)    (Celsius)
--------------------------------------------------------------------
1        Inlet(1)       60            42           30         normal
1        outlet(2)      70            60           44         normal
1        x86 processor( 90            80           51         normal
1        platform contr 100           90           51         normal
1        x86 processor  110           100          51         normal
1        Trident 2 volt 110           100          63         normal
1        Trident 2(7)   105           95           71         normal
1        NorthState int 105           95           61         normal
1        NorthState Vol 110           100          53         normal

show environment fex

show environment fex [ fexid | all ] [ fan | power | temperature ]

Syntax Description

show

Show running system information

environment

System environment information

fex

Show fex environment information

fexid

FEX number

all

Show information for all FEX

fan

Fan information

power

Power capacity and power distribution information

temperature

Temperature sensor information

Examples

pod1-leaf1# show environment fex 114

Temperature Fex 114:
--------------------------------------------------------------------
Module   Sensor        MajorThresh   MinorThres   CurTemp     Status
(Celsius)     (Celsius)    (Celsius)
--------------------------------------------------------------------
1        Outlet-1        70              59         46         ok
1        Outlet-2        64              53         34         ok
1        Inlet-1         58              41         34         ok
1        Die-1           95              85         53         ok
1        Die-2           95              85         55         ok
1        Die-3           95              85         54         ok
1        Die-4           95              85         57         ok

Fan Fex : 114:
------------------------------------------------------
Fan             Model                Hw         Status
------------------------------------------------------
Chassis         N2K-C2248PQ-FAN      --         ok
Chassis         N2K-C2248PQ-FAN      --         ok
Chassis         N2K-C2248PQ-FAN      --         ok
Chassis         N2K-C2248PQ-FAN      --         ok
PS-1            N2200-PAC-400W       --         failure
PS-2            N2200-PAC-400W       --         ok

Power Supply Fex 114:
---------------------------------------------------------------------------
Voltage: 12 Volts
-----------------------------------------------------
PS  Model                Power       Power     Status
(Watts)     (Amp)
-----------------------------------------------------
1   N2200-PAC-400W            --        --     fail/shutdown
2   N2200-PAC-400W        396.00     33.00     ok

Mod Model                Power     Power       Power     Power       Status
Requested Requested   Allocated Allocated
(Watts)   (Amp)       (Watts)   (Amp)
--- -------------------  -------   ----------  --------- ----------  ----------
1    N2K-C2248PQ-10GE    92.00     7.67        92.00     7.67        powered-up

Power Usage Summary:
--------------------
Power Supply redundancy mode:                  redundant
Total Power Capacity                 396.00
Power reserved for Supervisor(s)          92.00
Power currently used by Modules               0.00
-------------
Total Power Available                 304.00
-------------

show fex

show fex [fexid] [detail] [version] [transceiver]

Syntax Description

show

Show running system information

fex

Show FEX information

detail

Detailed information

transceiver

Show FEX

version

Show the software version

fexid

FEX number

Examples

pod1-leaf1# show fex 114 transceiver

Fex Uplink: 1
Fabric Port : eth1/20
sfp is present
name is CISCO-LEONI
type is QSFP-40G-CR4
part number is L45593-D168-B50
revision is 02

serial number is LSC1544003K
nominal bitrate is 10300 MBits/sec
Link length supported for 50/125mm fiber is 0 m(s)
Link length supported for 62.5/125mm fiber is 0 m(s)
Link length supported for copper is 5 m
cisco id is 13
cisco extended id number is 0

Fex Uplink: 2
Fabric Port : eth1/18
sfp is present
name is CISCO-LEONI
type is QSFP-40G-CR4
part number is L45593-D168-B50
revision is 02

serial number is LSC1544003K
nominal bitrate is 10300 MBits/sec
Link length supported for 50/125mm fiber is 0 m(s)
Link length supported for 62.5/125mm fiber is 0 m(s)
Link length supported for copper is 5 m
cisco id is 13
cisco extended id number is 0

Fex Uplink: 3
Fabric Port : --
sfp information is not available

Fex Uplink: 4
Fabric Port : eth1/17
sfp is present
name is CISCO-LEONI
type is QSFP-40G-CR4
part number is L45593-D168-B50
revision is 02

serial number is LSC1544003K
nominal bitrate is 10300 MBits/sec
Link length supported for 50/125mm fiber is 0 m(s)
Link length supported for 62.5/125mm fiber is 0 m(s)
Link length supported for copper is 5 m
cisco id is 13
cisco extended id number is 0

Fex Uplink: 5
Fabric Port : --
sfp information is not available
.
. [EXAMPLE TRUNCATED]
.
Fex Uplink: 16
Fabric Port : --
sfp information is not available

pod1-leaf1# show fex 114 version

Software
Bootloader version:           1.9
System boot mode:             primary
System image version:         11.0(1) [build 11.0(0.800c)]

Hardware
Module:                       Fabric Extender 48x10GE + 4x40GE Module
CPU:                          Motorola, e500v2, core 0
Serial number:                FOC16442F5P
Bootflash:                    locked

Kernel uptime is 5 day(s), 21 hour(s), 57 minutes(s), 57 second(s)

Last reset at Sun Jun  1 17:43:32 2014
Reason: reboot
Service: Reload new image
43-leaf4#  show fex 114 detail
FEX: 114  Description: FEX0114   state: Online
FEX version: 11.0(1) [Switch version: 11.0(1)]
FEX Interim version: 11.0(0.800c)
Switch Interim version: 11.0(0.800c)
Extender Model: N2K-C2248PQ-10GE,  Extender Serial: FOC1646R0JB
Part No: 68-4614-01
Card Id: 207, Mac Addr: 34:bd:c8:50:96, Num Macs: 64
Module Sw Gen: 22  [Switch Sw Gen: 21]
pinning-mode: static    Max-links: 1
Fabric port for control traffic: Eth1/20
Fabric interface state:
Eth1/17 - Interface Up. State: Active
Eth1/18 - Interface Up. State: Active
Eth1/19 - Interface Down. State: Configured
Eth1/20 - Interface Up. State: Active
Po1 - Interface Up. State: Active
Fex Port        State  Fabric Port
Eth114/1/1  Down         Po1
Eth114/1/2  Down         Po1
Eth114/1/3  Down         Po1
Eth114/1/4  Down         Po1
Eth114/1/5  Down         Po1
Eth114/1/6  Down         Po1
Eth114/1/7  Down         Po1
Eth114/1/8  Down         Po1
Eth114/1/9  Down         Po1
Eth114/1/10  Down         Po1
Eth114/1/11  Down         Po1
Eth114/1/12  Down         Po1
Eth114/1/13  Down         Po1
Eth114/1/14  Down         Po1
Eth114/1/15  Down         Po1
Eth114/1/16  Down         Po1
Eth114/1/17    Up         Po1
Eth114/1/18  Down         Po1
Eth114/1/19    Up         Po1
Eth114/1/20  Down         Po1
Eth114/1/21  Down         Po1
.
. [EXAMPLE TRUNCATED]
.
Eth114/1/48  Down         Po1

show hardware

show hardware

Syntax Description

show

Show running system information

hardware

Show hardware information

Examples

43-leaf4# show hardware

Cisco Nexus Operating System (NX-OS) Software
TAC support: http://www.cisco.com/tac
Documents:                                                                           \
http://www.cisco.com/en/US/products/ps9372/tsd_products_support_series_home.html
Copyright (c) 2002-2014, Cisco Systems, Inc. All rights reserved.
The copyrights to certain works contained in this software are
owned by other third parties and used and distributed under
license. Certain components of this software are licensed under
the GNU General Public License (GPL) version 2.0 or the GNU
Lesser General Public License (LGPL) Version 2.1. A copy of each
such license is available at
http://www.opensource.org/licenses/gpl-2.0.php and
http://www.opensource.org/licenses/lgpl-2.1.php

Software
BIOS:      version 07.09
kickstart: version 11.0(1) [build 11.0(0.800c)] [gdb]
system:    version 11.0(1) [build 11.0(0.800c)] [gdb]
BIOS compile time:       04/25/2014
kickstart image file is: bootflash:///auto-k
kickstart compile time:  06/04/2014 08:14:57 [06/04/2014 08:14:57]
system image file is:    bootflash:///auto-s
system compile time:     06/04/2014 08:14:57 [06/04/2014 08:14:57]

Hardware
cisco N9K-C9396PX ("supervisor")
Intel(R) Pentium(R) CPU  @ 1.50GHz with 16400384 kB of memory.
Processor Board ID SAL17299J85

Device name: 43-leaf4
bootflash:    62522368 kB

Kernel uptime is 00 day(s), 14 hour(s), 11 minute(s), 07 second(s)

Last reset at 989000 usecs after Mon Jun 02 20:25:29 2014
Reason: reload
System version: 11.0(0.800c)
Service: Reboot

plugin
Core Plugin, Ethernet Plugin
--------------------------------
Switch hardware ID information
--------------------------------

Switch is booted up
Switch type is : Nexus C9396PX Chassis
Model number is N9K-C9396PX
H/W version is 0.2010
Part Number is 73-15298-01
Part Revision is 1
Manufacture Date is Year 17 Week 29
Serial number is SAL17299J85
CLEI code is 73-15298-01

--------------------------------
Chassis has one slot
--------------------------------

Module1 ok
Module type is : 1/10G Ethernet Module
1 submodules are present
Model number is N9K-C9396PX
H/W version is 0.2050
Part Number is 73-15605-02
Part Revision is 05
Manufacture Date is Year 17 Week 29
Serial number is SAL17299J85
CLEI code is 73-15605-02

GEM ok
Module type is : 40G Ethernet Expansion Module
1 submodules are present
Model number is N9K-M12PQ
H/W version is 0.3070
Part Number is 73-15576-03
Part Revision is 07
Manufacture Date is Year 17 Week 43
Serial number is SAL1743F2GR
CLEI code is 73-15576-03

---------------------------------------
Chassis has  2 PowerSupply Slots
---------------------------------------

PS1 ok
Power supply type is : 54.000000W 220v AC
Model number is UCSC-PSU-650W
H/W version is 0.0
Part Number is 341-0490-02
Part Revision is A0
Manufacture Date is Year 17 Week 19
Serial number is LIT17190BH3
CLEI code is 341-0490-02

PS2 shut
Power supply type is : 54.000000W 220v AC
Model number is UCSC-PSU-650W
H/W version is 0.0
Part Number is 341-0490-02
Part Revision is A0
Manufacture Date is Year 17 Week 19
Serial number is LIT17190BGY
CLEI code is 341-0490-02

---------------------------------------
Chassis has  3 Fans
---------------------------------------

Fan1(sys_fan1)                                is inserted but info is not available

Fan2(sys_fan2)                                is inserted but info is not available

Fan3(sys_fan3)                                is inserted but info is not available

show hostname

show hostname

Syntax Description

show

Show running system information

hostname

Hostname

Examples

pod1-leaf1# show hostname

pod1-leaf1

show interface

show interface [arg0]

Syntax Description

show

Show running system information

interface

Interface

arg0

Type: interface_mrange

Interface

Examples

pod1-leaf1# show interface eth1/1

Ethernet1/1 is up
admin state is up, Dedicated Interface
Hardware: 100/1000/10000/auto Ethernet, address: 7c69.f60f.aa60 (bia 7c69.f60f.aa60)
MTU 9000 bytes, BW 0 Kbit, DLY 1 usec
reliability 255/255, txload 1/255, rxload 1/255
Encapsulation ARPA, medium is broadcast
Port mode is trunk
full-duplex, 10 Gb/s, media type is 10G
Beacon is turned off
Auto-Negotiation is turned on
Input flow-control is off, output flow-control is off
Auto-mdix is turned off
Rate mode is dedicated
Switchport monitor is off
EtherType is 0x8100
EEE (efficient-ethernet) : n/a
Last link flapped 05:23:54
Last clearing of "show interface" counters never
1 interface resets
30 seconds input rate 281 bits/sec, 2 packets/sec
30 seconds output rate 2008 bits/sec, 1 packets/sec
Load-Interval #2: 5 minute (300 seconds)
input rate 2248 bps, 2 pps; output rate 2008 bps, 1 pps
RX
223976 unicast packets  682 multicast packets  5 broadcast packets
224663 input packets  165217254 bytes
0 jumbo packets  0 storm suppression packets
0 runts  0 giants  0 CRC  0 no buffer
0 input error  0 short frame  0 overrun   0 underrun  0 ignored
0 watchdog  0 bad etype drop  0 bad proto drop  0 if down drop
0 input with dribble  0 input discard
0 Rx pause
TX
180042 unicast packets  657 multicast packets  62 broadcast packets
180761 output packets  117111731 bytes
0 jumbo packets
0 output error  0 collision  0 deferred  0 late collision
0 lost carrier  0 no carrier  0 babble  0 output discard
0 Tx pause

show interface brief

show interface [arg0] brief

Syntax Description

show

Show running system information

interface

Interface

arg0

Type: interface_mrange

Interface

brief

Show brief info of interface

Examples

pod1-leaf1# show interface brief

--------------------------------------------------------------------------------
Port   VRF          Status IP Address                              Speed   MTU
--------------------------------------------------------------------------------
mgmt0  --           up     172.23.49.1                             1000    9216
--------------------------------------------------------------------------------
Ethernet      VLAN    Type Mode    Status Reason                   Speed   Port
Interface                                                                  Ch #
--------------------------------------------------------------------------------
Eth1/1        0       eth  trunk   up     none                     10G(D)  --
Eth1/2        0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/3        0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/4        0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/5        0       eth  trunk   up     none                     10G(D)  --
Eth1/6        0       eth  trunk   up     none                     10G(D)  --
Eth1/7        0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/8        0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/9        0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/10       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/11       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/12       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/13       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/14       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/15       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/16       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/17       --      eth  routed  up     none                     10G(D)  --
Eth1/17.36    1001    eth  routed  up     none                     10G(D)  --
Eth1/17.37    1002    eth  routed  up     none                     10G(D)  --
Eth1/18       0       eth  trunk   up     none                     10G(D)  --
Eth1/19       0       eth  trunk   up     none                     10G(D)  --
Eth1/20       0       eth  trunk   up     none                     10G(D)  --
Eth1/21       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/22       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/23       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/24       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/25       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/26       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/27       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/28       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/29       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/30       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/31       0       eth  trunk   up     none                     10G(D)  --
Eth1/32       0       eth  trunk   up     none                     10G(D)  --
Eth1/33       --      eth  fabric  up     none                     10G(D)  4
Eth1/34       --      eth  fabric  up     none                     10G(D)  4
Eth1/35       --      eth  fabric  up     none                     10G(D)  2
Eth1/36       --      eth  fabric  up     none                     10G(D)  2
Eth1/37       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/38       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/39       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/40       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/41       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/42       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/43       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/44       0       eth  trunk   down   sfp-missing              10G(D)  --
Eth1/45       0       eth  trunk   up     none                     10G(D)  --
Eth1/46       0       eth  trunk   up     none                     10G(D)  --
Eth1/47       0       eth  trunk   up     none                     10G(D)  --
Eth1/48       0       eth  trunk   up     none                     10G(D)  --
Eth1/49       --      eth  routed  up     none                     40G(D)  --
Eth1/49.1     2       eth  routed  up     none                     40G(D)  --
Eth1/50       --      eth  routed  up     none                     40G(D)  --
Eth1/50.2     2       eth  routed  up     none                     40G(D)  --
Eth1/51       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/51.3     2       eth  routed  down   sfp-missing              40G(D)  --
Eth1/52       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/52.4     2       eth  routed  down   sfp-missing              40G(D)  --
Eth1/53       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/53.5     2       eth  routed  down   sfp-missing              40G(D)  --
Eth1/54       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/54.6     2       eth  routed  down   sfp-missing              40G(D)  --
Eth1/55       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/55.7     2       eth  routed  down   sfp-missing              40G(D)  --
Eth1/56       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/56.8     2       eth  routed  down   sfp-missing              40G(D)  --
Eth1/57       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/57.9     2       eth  routed  down   sfp-missing              40G(D)  --
Eth1/58       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/58.10    2       eth  routed  down   sfp-missing              40G(D)  --
Eth1/59       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/59.11    2       eth  routed  down   sfp-missing              40G(D)  --
Eth1/60       --      eth  routed  down   sfp-missing              40G(D)  --
Eth1/60.12    2       eth  routed  down   sfp-missing              40G(D)  --
Eth101/1/1    0       eth  trunk   down   err-disabled             10G(I)  --
Eth101/1/2    0       eth  trunk   down   err-disabled             10G(I)  --

.
. [EXAMPLE TRUNCATED]
.
Eth102/1/47   0       eth  trunk   down   err-disabled             10G(I)  --
Eth102/1/48   0       eth  trunk   down   err-disabled             10G(I)  --
--------------------------------------------------------------------------------
Port-channel VLAN    Type Mode    Status Reason                   Speed   Protocol
Interface
--------------------------------------------------------------------------------
Po2          --      eth  fabric  up     none                      10G(I)  none
Po4          --      eth  fabric  up     none                      10G(I)  none
--------------------------------------------------------------------------------
Interface    Status     Description
--------------------------------------------------------------------------------
Lo0          up         --
Lo1          up         --
Lo2          up         --
Lo1023       up         --
--------------------------------------------------------------------------------
Interface Secondary VLAN(Type)                    Status Reason
--------------------------------------------------------------------------------
Vlan13    --                                      up     --
Vlan15    --                                      up     --
Vlan17    --                                      up     --
Vlan19    --                                      up     --
Vlan21    --                                      up     --
Vlan23    --                                      up     --
Vlan25    --                                      up     --
Vlan27    --                                      up     --
Vlan29    --                                      up     --
Vlan32    --                                      up     --
Vlan50    --                                      up     --
--------------------------------------------------------------------------------
Interface               Status    IP Address       Encap type      MTU
--------------------------------------------------------------------------------
Tunnel1                 up        --               ivxlan          8946
Tunnel2                 up        --               ivxlan          8946
Tunnel3                 up        --               ivxlan          8946
Tunnel4                 up        --               ivxlan          8946

show interface capabilities

show interface [arg0] capabilities

Syntax Description

show

Show running system information

interface

Interface

arg0

Type: interface_mrange

Ethernet Interface

capabilities

Show interface capabilities information

show interface counters

show interface [interface-id] counters [ fex fex-id | module mod-id ]

Syntax Description

show

Show running system information

interface

Show interface status and information

interface-id

Interface identifier

counters

Show interface counters

fex

Limit display to FEX interfaces

fex-id

FEX identifier

module

Limit display to interfaces on module

mod-id

Module number

Examples

pod1-leaf1# show interface counters fex 110

--------------------------------------------------------------------------------
Port                                 InOctets                      InUcastPkts
--------------------------------------------------------------------------------
Eth110/1/1                                  0                                0
Eth110/1/2                                  0                                0
Eth110/1/3                                  0                                0
.
. [EXAMPLE TRUNCATED]
.
Eth110/1/47                                 0                                0
Eth110/1/48                                 0                                0

--------------------------------------------------------------------------------
Port                              InMcastPkts                      InBcastPkts
--------------------------------------------------------------------------------
Eth110/1/1                                  0                                0
Eth110/1/2                                  0                                0
.
. [EXAMPLE TRUNCATED]
.
Eth110/1/47                                 0                                0
Eth110/1/48                                 0                                0

--------------------------------------------------------------------------------
Port                                OutOctets                     OutUcastPkts
--------------------------------------------------------------------------------
Eth110/1/1                                  0                                0
Eth110/1/2                                  0                                0
.
. [EXAMPLE TRUNCATED]
.
Eth110/1/47                                 0                                0
Eth110/1/48                                 0                                0

--------------------------------------------------------------------------------
Port                             OutMcastPkts                     OutBcastPkts
--------------------------------------------------------------------------------
Eth110/1/1                                  0                                0
Eth110/1/2                                  0                                0
.
. [EXAMPLE TRUNCATED]
.

pod1-leaf1# show interface module 1

--------------------------------------------------------------------------------
Port                                 InOctets                      InUcastPkts
--------------------------------------------------------------------------------
Eth1/1                              254662734                           991855
Eth1/2                                      0                                0
Eth1/3                                 138696                                0
.
. [EXAMPLE TRUNCATED]
.
Eth1/59                                     0                                0
Eth1/59.11                                  0                                0
Eth1/60                                     0                                0
Eth1/60.12                                  0                                0

--------------------------------------------------------------------------------
Port                              InMcastPkts                      InBcastPkts
--------------------------------------------------------------------------------
Eth1/1                                   1847                               27
Eth1/2                                      0                                0
Eth1/3                                    908                               10
.
. [EXAMPLE TRUNCATED]
.
Eth1/59                                     0                                0
Eth1/59.11                                  0                                0
Eth1/60                                     0                                0
Eth1/60.12                                  0                                0

--------------------------------------------------------------------------------
Port                                OutOctets                     OutUcastPkts
--------------------------------------------------------------------------------
Eth1/1                              995277850                          1145190
Eth1/2                                      0                                0
Eth1/3                               44887102                                0
.
. [EXAMPLE TRUNCATED]
.
Eth1/59                                     0                                0
Eth1/59.11                                  0                                0
Eth1/60                                     0                                0
Eth1/60.12                                  0                                0

--------------------------------------------------------------------------------
Port                             OutMcastPkts                     OutBcastPkts
--------------------------------------------------------------------------------
Eth1/1                                 318655                                0
Eth1/2                                      0                                0
Eth1/3                                 318650                                0
.
. [EXAMPLE TRUNCATED]
.

show interface counters brief

show interface interface-id counters brief

Syntax Description

show

Show running system information

interface

Show interface status and information

interface-id

Interface identifier

counters

Show interface counters

brief

Show interface counters in brief

show interface counters detailed

show interface [interface-id] counters detailed [ all [snmp] | snmp ]

Syntax Description

show

Show running system information

interface

Show interface status and information

interface-id

Interface identifier

counters

Show interface counters

detailed

Show only non-zero counters

all

Show every interface counter

snmp

Show SNMP MIB values

Examples

pod1-leaf1# show interface counters detailed all snmp

--------------------------------------------------------------------------------
Port                                 InOctets                      InUcastPkts
--------------------------------------------------------------------------------
mgmt0                                96124499                            39768
Eth1/1                              255667727                           996341
Eth1/2                                      0                                0
Eth1/3                                 139152                                0
Eth1/4                                      0                                0
.
. [EXAMPLE TRUNCATED]
.
Vlan566                                     0                                0
Vlan568                                     0                                0

--------------------------------------------------------------------------------
Port                              InMcastPkts                      InBcastPkts
--------------------------------------------------------------------------------
mgmt0                                    3218                          1314292
Eth1/1                                   1853                               27
Eth1/2                                      0                                0
.
. [EXAMPLE TRUNCATED]
.
Vlan566                                     0                                0
Vlan568                                     0                                0

--------------------------------------------------------------------------------
Port                                OutOctets                     OutUcastPkts
--------------------------------------------------------------------------------
mgmt0                                16007024                            57888
Eth1/1                             1000328054                          1150545
Eth1/2                                      0                                0
.
. [EXAMPLE TRUNCATED]
.
Vlan566                                     0                                0
Vlan568                                     0                                0

--------------------------------------------------------------------------------
Port                             OutMcastPkts                     OutBcastPkts
--------------------------------------------------------------------------------
mgmt0                                     103                                0
Eth1/1                                 319793                                0
Eth1/2                                      0                                0
.
. [EXAMPLE TRUNCATED]
.

show interface counters errors

show interface [interface-id] counters errors [ fex fex-id | module mod-id ]

Syntax Description

show

Show running system information

interface

Show interface status and information

interface-id

Interface identifier

counters

Show interface counters

errors

Show interface error counters

fex

Limit display to FEX interfaces

fex-id

FEX identifier

module

Limit display to interfaces on module

mod-id

Module number

Examples

pod1-leaf1# show interface counters errors module 1

--------------------------------------------------------------------------------
Port          Align-Err    FCS-Err   Xmit-Err    Rcv-Err  UnderSize OutDiscards
--------------------------------------------------------------------------------
Eth1/1               --         --         --         --         --          --
Eth1/2               --         --         --         --         --          --
Eth1/3               --         --         --         --         --          --
.
. [EXAMPLE TRUNCATED]
.
Eth1/59              --         --         --         --         --          --
Eth1/59.11           --         --         --         --         --          --
Eth1/60              --         --         --         --         --          --
Eth1/60.12           --         --         --         --         --          --

--------------------------------------------------------------------------------
Port         Single-Col  Multi-Col   Late-Col  Exces-Col  Carri-Sen       Runts
--------------------------------------------------------------------------------
Eth1/1               --         --         --         --         --          --
Eth1/2               --         --         --         --         --          --
.
. [EXAMPLE TRUNCATED]
.
Eth1/59              --         --         --         --         --          --
Eth1/59.11           --         --         --         --         --          --
Eth1/60              --         --         --         --         --          --
Eth1/60.12           --         --         --         --         --          --

--------------------------------------------------------------------------------
Port          Giants SQETest-Err Deferred-Tx IntMacTx-Er IntMacRx-Er Symbol-Err
--------------------------------------------------------------------------------
Eth1/1            --          --          --          --          --         --
Eth1/2            --          --          --          --          --         --
.
. [EXAMPLE TRUNCATED]
.

show interface counters snmp

show interface [interface-id] counters snmp [ fex fex-id | module mod-id ]

Syntax Description

show

Show running system information

interface

Show interface status and information

interface-id

Interface identifier

counters

Show interface counters

snmp

Show SNMP MIB values

fex

Limit display to interfaces on FEX

fex-id

FEX identifier

module

Limit display to interfaces on module

mod-id

Module number

Examples

pod1-leaf1# show interface counters snmp fex 110

--------------------------------------------------------------------------------
Port                                 InOctets                      InUcastPkts
--------------------------------------------------------------------------------
Eth110/1/1                                  0                                0
Eth110/1/2                                  0                                0
Eth110/1/3                                  0                                0
.
. [EXAMPLE TRUNCATED]
.
Eth110/1/47                                 0                                0
Eth110/1/48                                 0                                0

--------------------------------------------------------------------------------
Port                              InMcastPkts                      InBcastPkts
--------------------------------------------------------------------------------
Eth110/1/1                                  0                                0
Eth110/1/2                                  0                                0
.
. [EXAMPLE TRUNCATED]
.
Eth110/1/47                                 0                                0
Eth110/1/48                                 0                                0

--------------------------------------------------------------------------------
Port                                OutOctets                     OutUcastPkts
--------------------------------------------------------------------------------
Eth110/1/1                                  0                                0
Eth110/1/2                                  0                                0
.
. [EXAMPLE TRUNCATED]
.
Eth110/1/47                                 0                                0
Eth110/1/48                                 0                                0

--------------------------------------------------------------------------------
Port                             OutMcastPkts                     OutBcastPkts
--------------------------------------------------------------------------------
Eth110/1/1                                  0                                0
Eth110/1/2                                  0                                0
.
. [EXAMPLE TRUNCATED]
.

show interface debounce

show interface [arg0] debounce

Syntax Description

show

Show running system information

interface

Show interface status and information

arg0

Type: interface_mrange

Interface

debounce

Show interface debounce time information

show interface description

show interface [arg0] description

Syntax Description

show

Show running system information

interface

Interface

arg0

Type: interface_mrange

Interface

description

Show interface description

Examples

pod1-leaf1# show interface description

-----------------------------------------------------------------------------------
Interface                 Description
-----------------------------------------------------------------------------------
mgmt0                     --

-------------------------------------------------------------------------------------
Port           Type    Speed    Description
-------------------------------------------------------------------------------------
Eth1/1         eth     10G      --
Eth1/2         eth     10G      --
Eth1/3         eth     10G      --
Eth1/4         eth     10G      --
Eth1/5         eth     10G      --
Eth1/6         eth     10G      --
Eth1/7         eth     10G      --
Eth1/8         eth     10G      --
Eth1/9         eth     10G      --
Eth1/10        eth     10G      --
Eth1/11        eth     10G      --
Eth1/12        eth     10G      --
Eth1/13        eth     10G      --
Eth1/14        eth     10G      --
Eth1/15        eth     10G      --
Eth1/16        eth     10G      --
Eth1/17        eth     10G      --
Eth1/17.36     eth     --       --
Eth1/17.37     eth     --       --
Eth1/18        eth     10G      --
Eth1/19        eth     10G      --
Eth1/20        eth     10G      --
Eth1/21        eth     10G      --
Eth1/22        eth     10G      --
Eth1/23        eth     10G      --
Eth1/24        eth     10G      --
Eth1/25        eth     10G      --
Eth1/26        eth     10G      --
Eth1/27        eth     10G      --
Eth1/28        eth     10G      --
Eth1/29        eth     10G      --
Eth1/30        eth     10G      --
Eth1/31        eth     10G      --
Eth1/32        eth     10G      --
Eth1/33        eth     10G      --
Eth1/34        eth     10G      --
Eth1/35        eth     10G      --
Eth1/36        eth     10G      --
Eth1/37        eth     10G      --
Eth1/38        eth     10G      --
Eth1/39        eth     10G      --
Eth1/40        eth     10G      --
Eth1/41        eth     10G      --
Eth1/42        eth     10G      --
Eth1/43        eth     10G      --
Eth1/44        eth     10G      --
Eth1/45        eth     10G      --
Eth1/46        eth     10G      --
Eth1/47        eth     10G      --
Eth1/48        eth     10G      --
Eth1/49        eth     40G      --
Eth1/49.1      eth     --       --
Eth1/50        eth     40G      --
Eth1/50.2      eth     --       --
Eth1/51        eth     40G      --
Eth1/51.3      eth     --       --
Eth1/52        eth     40G      --
Eth1/52.4      eth     --       --
Eth1/53        eth     40G      --
Eth1/53.5      eth     --       --
Eth1/54        eth     40G      --
Eth1/54.6      eth     --       --
Eth1/55        eth     40G      --
Eth1/55.7      eth     --       --
Eth1/56        eth     40G      --
Eth1/56.8      eth     --       --
Eth1/57        eth     40G      --
Eth1/57.9      eth     --       --
Eth1/58        eth     40G      --
Eth1/58.10     eth     --       --
Eth1/59        eth     40G      --
Eth1/59.11     eth     --       --
Eth1/60        eth     40G      --
Eth1/60.12     eth     --       --
Eth101/1/1     eth     10G      --
Eth101/1/2     eth     10G      --
Eth101/1/3     eth     10G      --
Eth101/1/4     eth     10G      --
Eth101/1/5     eth     10G      --
Eth101/1/6     eth     10G      --
Eth101/1/7     eth     10G      --
Eth101/1/8     eth     10G      --
Eth101/1/9     eth     10G      --
Eth101/1/10    eth     10G      --
Eth101/1/11    eth     10G      --
Eth101/1/12    eth     10G      --
.
. [EXAMPLE TRUNCATED]
.
Eth102/1/47    eth     10G      --
Eth102/1/48    eth     10G      --

-----------------------------------------------------------------------------------
Interface                 Description
-----------------------------------------------------------------------------------
Po2                       --
Po4                       --

-----------------------------------------------------------------------------------
Interface                 Description
-----------------------------------------------------------------------------------
Lo0                       --
Lo1                       --
Lo2                       --
Lo1023                    --

-----------------------------------------------------------------------------------
Interface                 Description
-----------------------------------------------------------------------------------
Lo0                       --
Lo1                       --
Lo2                       --
Lo1023                    --
Vlan13                    --
Vlan15                    --
Vlan17                    --
Vlan19                    --
Vlan21                    --
Vlan23                    --
Vlan25                    --
Vlan27                    --
Vlan29                    --
Vlan32                    --
Vlan50                    --

-----------------------------------------------------------------------------------
Interface                 Description
-----------------------------------------------------------------------------------
Tunnel1                   --
Tunnel2                   --
Tunnel3                   --
Tunnel4                   --

show interface fex-fabric

show interface fex-fabric

Syntax Description

show

Show running system information

interface

Show interface status and information

fex-fabric

Show all FEX fabric ports

Examples

pod1-leaf1# show interface fex-fabric

Fabric      Fabric       Fex                FEX
Fex  Port      Port State    Uplink    Model         Serial
---------------------------------------------------------------
114   Eth1/17        Active       4  N2K-C2248PQ-10GE  FOC1646R0JB
114   Eth1/18        Active       2  N2K-C2248PQ-10GE  FOC1646R0JB
114   Eth1/19    Configured       0  N2K-C2248PQ-10GE  FOC1646R0JB
114   Eth1/20        Active       1  N2K-C2248PQ-10GE  FOC1646R0JB

show interface flowcontrol

show interface [arg0] flowcontrol [ fex fex-id | module mod-id ]

Syntax Description

show

Show running system information

interface

Show interface status and information

arg0

Type: interface_mrange

Interface

flowcontrol

Show interface flowcontrol information

fex

Limit display to interfaces on a FEX

fex-id

Type: integer

Enter FEX number

module

Limit display to interfaces on module

mod-id

Type: integer

Enter module number

Examples

pod1-leaf1# show interface flowcontrol

--------------------------------------------------------------------------------
Port         Send        FlowControl Receive     FlowControl RxPause     TxPause
admin       oper        admin       oper
--------------------------------------------------------------------------------
Eth1/1       off         off         off         off         0           0
Eth1/2       off         off         off         off         0           0
Eth1/3       off         off         off         off         0           0
.
. [EXAMPLE TRUNCATED]
.
Eth114/1/47  off         off         off         off         0           0
Eth114/1/48  off         off         off         off         0           0
Po1          off         off         off         off         0           0
Po2          off         off         off         off         0           0

pod1-leaf1# show interface flowcontrol fex 114

--------------------------------------------------------------------------------
Port         Send        FlowControl Receive     FlowControl RxPause     TxPause
admin       oper        admin       oper
--------------------------------------------------------------------------------
Eth114/1/1   off         off         off         off         0           0
Eth114/1/2   off         off         off         off         0           0
Eth114/1/3   off         off         off         off         0           0
.
. [EXAMPLE TRUNCATED]
.
Eth114/1/46  off         off         off         off         0           0
Eth114/1/47  off         off         off         off         0           0
Eth114/1/48  off         off         off         off         0           0

show interface mac-address

show interface [arg0] mac-address

Syntax Description

show

Show running system information

interface

Show interface status and information

arg0

Type: interface_mrange

Interface

mac-address

Show interface MAC address

show interface snmp-ifindex

show interface snmp-ifindex

Syntax Description

show

Show running system information

interface

Show interface status and information

snmp-ifindex

Show snmp interface index list

Examples

pod1-leaf1# show interface snmp-ifindex

-----------------------------------------------------------------------------------
Port              IFMIB Ifindex (hex)
-----------------------------------------------------------------------------------
mgmt0             83886080   (0x05000000)
Eth1/1            436207616  (0x1a000000)
Eth1/2            436211712  (0x1a001000)
Eth1/3            436215808  (0x1a002000)
Eth1/4            436219904  (0x1a003000)
Eth1/5            436224000  (0x1a004000)
.
. [EXAMPLE TRUNCATED]
.

show interface status

show interface [interface-id] status [ down | err-disabled | err-vlans | fex fex-id | inactive | module mod-id | up ]

Syntax Description

show

Show running system information

interface

Show interface status and information

interface-id

Interface

status

Show interface line status

down

Show interface down state

err-disabled

Show interface error disabled state

err-vlans

Show errored vlans

fex

Limit display to interfaces on a FEX

fex-id

FEX number

inactive

Show interface inactive state

module

Limit display to interfaces on module

mod-id

Module number

up

Show interface up state

Examples

pod1-leaf1# show interface status err-disabled

------------------------------------------------------------------------------------
Port          Name                Status              Reason
------------------------------------------------------------------------------------
Ethernet1/32  --                  err-disabled        err-disabled
Ethernet1/46  --                  err-disabled        err-disabled

pod1-leaf1# show interface status err-vlan

--------------------------------------------------------------------------------
Port          Name                Err-Vlans                      Status
--------------------------------------------------------------------------------

pod1-leaf1# show interface status up

------------------------------------------------------------------------------------
Port           Name                Status     Vlan       Duplex   Speed    Type
------------------------------------------------------------------------------------
mgmt0          --                  connected  routed     full     1G       --
Eth1/10        --                  connected  trunk      full     10G   SFP-H10GB-C
Eth1/13        --                  connected  trunk      full     10G   SFP-H10GB-C
Eth1/14        --                  connected  trunk      full     10G   SFP-H10GB-C
Eth1/15        --                  connected  trunk      full     10G   SFP-H10GB-C
Eth1/16        --                  connected  trunk      full     10G   SFP-H10GB-C
Eth1/17        --                  connected  unknown    full     10G   SFP-H10GB-C
Eth1/18        --                  connected  unknown    full     10G   SFP-H10GB-C
Eth1/20        --                  connected  unknown    full     10G   SFP-H10GB-C
Eth1/45        --                  connected  trunk      full     10G   SFP-H10GB-C
Eth1/47        --                  out-of-ser trunk      full     10G   SFP-H10GB-C
Eth1/48        --                  out-of-ser trunk      full     10G   SFP-H10GB-C
Eth1/49        --                  connected  routed     full     40G   QSFP-40G-CR
Eth1/49.1      --                  connected  routed     full     40G   QSFP-40G-CR
Eth1/56        --                  connected  routed     full     40G   QSFP-40G-CR
Eth1/56.8      --                  connected  routed     full     40G   QSFP-40G-CR
Eth114/1/17    --                  out-of-ser trunk      full     10G   SFP-H10GB-C
Eth114/1/19    --                  out-of-ser trunk      full     10G   SFP-H10GB-C
Po1            --                  connected  unknown    full     10G      --
Po2            --                  connected  trunk      full     10G      --
Lo0            --                  connected  routed     auto     --       --
Lo1            --                  connected  routed     auto     --       --
Lo1023         --                  connected  routed     auto     --       --

----------------------------------------------------------------
Interface     Name                Status    Reason
----------------------------------------------------------------
Tunnel1       --                  up        no-reason
Tunnel2       --                  up        no-reason
Tunnel3       --                  up        no-reason
Tunnel4       --                  up        no-reason
Tunnel5       --                  up        no-reason
Tunnel6       --                  up        no-reason
Tunnel7       --                  up        no-reason
Tunnel8       --                  up        no-reason
Tunnel9       --                  up        no-reason
Tunnel10      --                  up        no-reason
Tunnel11      --                  up        no-reason
Tunnel12      --                  up        no-reason
Tunnel13      --                  up        no-reason
Tunnel14      --                  up        no-reason
Tunnel15      --                  up        no-reason
Tunnel16      --                  up        no-reason
Tunnel17      --                  up        no-reason
Tunnel18      --                  up        no-reason

show interface switchport

show interface [interface-id] switchport

Syntax Description

show

Show running system information

interface

Show interface status and information

interface-id

Interface identifier

switchport

Show interface switchport information

Examples

pod1-leaf1# show interface e1/1 switchport

Name: Ethernet1/1
Switchport: Enabled
Switchport Monitor: not-a-span-dest
Operational Mode: trunk
Access Mode Vlan: unknown (default)
Trunking Native Mode VLAN: unknown (default)
Trunking VLANs Allowed: none
FabricPath Topology List Allowed: 0
Administrative private-vlan primary host-association: none
Administrative private-vlan secondary host-association: none
Administrative private-vlan primary mapping: none
Administrative private-vlan secondary mapping: none
Administrative private-vlan trunk native VLAN: none
Administrative private-vlan trunk encapsulation: dot1q
Administrative private-vlan trunk normal VLANs: none
Administrative private-vlan trunk private VLANs: none
Operational private-vlan: none

show interface transceiver

show interface [interface-id] transceiver [fex-fabric] [ calibrations | details | sprom ]

Syntax Description

show

Show Information

interface

Interface

interface-id

Ethernet Interface identifier

transceiver

Transceiver Information

fex-fabric

Show FEX interface transceiver information

calibrations

Show interface transceiver calibration information

details

Show interface transceiver detail information

sprom

Show interface transceiver sprom information

Examples

pod1-leaf1# show interface transceiver fex-fabric details

Ethernet1/17
transceiver is present
type is SFP-H10GB-CU5M
name is CISCO-LEONI
part number is L45593-D168-B50
revision is 02
serial number is LSC1544003K
nominal bitrate is 10300 MBit/sec
Link length supported for copper is 5 m
cisco id is --
cisco extended id number is 4

DOM is not supported

Ethernet1/18
transceiver is present
type is SFP-H10GB-CU5M
name is CISCO-LEONI
part number is L45593-D168-B50
revision is 02
serial number is LSC1544003K
nominal bitrate is 10300 MBit/sec
Link length supported for copper is 5 m
cisco id is --
cisco extended id number is 4

DOM is not supported

Ethernet1/19
transceiver is not present

Ethernet1/20
transceiver is present
type is SFP-H10GB-CU5M
name is CISCO-LEONI
part number is L45593-D168-B50
revision is 02
serial number is LSC1544003K
nominal bitrate is 10300 MBit/sec
Link length supported for copper is 5 m
cisco id is --
cisco extended id number is 4

DOM is not supported

pod1-leaf1# show interface e1/47 transceiver details

Ethernet1/47
transceiver is present
type is SFP-H10GB-CU1M
name is CISCO-TYCO
part number is 1-2053783-1
revision is R
serial number is TED1728A201
nominal bitrate is 10300 MBit/sec
Link length supported for copper is 1 m
cisco id is --
cisco extended id number is 4

DOM is not supported

pod1-leaf1# show interface e1/47 transceiver sprom

Ethernet1/47
transceiver is present
type is SFP-H10GB-CU1M
name is CISCO-TYCO
part number is 1-2053783-1
revision is R
serial number is TED1728A201
nominal bitrate is 10300 MBit/sec
Link length supported for copper is 1 m
cisco id is --
cisco extended id number is 4

Identifier                      : 0x03 (SFP)
Ext_Identifier                  : 0x04
Connector                       : 0x21 (Copper Pigtail)
10G Ethernet Compliance Code    : 0x00 (Copper Passive)
Sonet Compliance Code           : 0x0000
Gigabit Ethernet Compliance Code: 0x00 (None)
Encoding                        : 0x00 (Unspecified)
BR_Nominal                      : 0x67  [10300]
Reserved1                       : 0x00
Length_9u_1                     : 0x00  0 KM
Length_9u_2                     : 0x00  0 Meters
Length_50u                      : 0x00  0 Meters
Length_60u                      : 0x00  0 Meters
Length_Copper                   : 0x01  1 Meters
Reserved2                       : 0x00
Vendor Name                     : CISCO-TYCO
Reserved3                       : 0x00
Vendor OUI                      : 0x004020
Vendor Part No                  : 1-2053783-1
Vendor Revision                 : R
Reserved4                       : 0x010000
Check Code ID                   : 0x0c (OK)
Options                         : 0x0000
BR Max                          : 0x00
BR Min                          : 0x00
Vendor Serial No                : TED1728A201
Date Code                       : 17071000
Diagnostic Monitoring Type      : 0x00
enchancedOptions                : 0x00
SFF8472Compliance               : 0x00
Check Code EXT                  : 0xb3 (OK)
Vendor Specific ID Data         : 0x80000000000000000000000000000000
: 0x00000000000000000000000069f98e5a

show interface trunk

show interface [interface-id] trunk [ vlan vlan-id | fex fex-id | module mod-id ]

Syntax Description

show

Show running system information

interface

Show interface status and information

interface-id

Interface identifier

trunk

Show interface trunk information

fex

Limit display to interfaces on a FEX

fex-id

FEX number

module

Limit display to interfaces on module

mod-id

Module number

vlan

Show per VLAN information for trunk

vlan-id

VLAN range

Examples

pod1-leaf1# show interface e1/47 trunk

--------------------------------------------------------------------------------
Port           Native   Status         Port
Vlan                    Channel
--------------------------------------------------------------------------------
Eth1/47        unknown  trunking       --

-----------------------------------------------------------------------------------
Port           Vlans Allowed on Trunk
-----------------------------------------------------------------------------------
Eth1/47        261-348,361-364,367-368,389-390,397-398,429-432,435-436,445-446,45
3-454,459-460,465-466,469-470,483-486,493-494,541-544,553-554,565-
570,575-578,603-604,613-614,625-626,647-650,655-656,661-662,669-67
0,677-680,683-684,689-690,713-714,717-718,725-728,733-734,739-740,
747-748,753-754,757-758,765-766,783-784,789-790,793-794,803-804,80
7-808,819-820,823-828,837-838

-----------------------------------------------------------------------------------
Port           Vlans Err-disabled on Trunk
-----------------------------------------------------------------------------------
Eth1/47        none

-----------------------------------------------------------------------------------
Port           STP Forwarding
-----------------------------------------------------------------------------------
Eth1/47        none

-----------------------------------------------------------------------------------
Port           Vlans in spanning tree forwarding state and not pruned
-----------------------------------------------------------------------------------
Eth1/47        none

-----------------------------------------------------------------------------------
Port           Vlans Forwarding on FabricPath
-----------------------------------------------------------------------------------
Eth1/47        none

show inventory

show inventory [ chassis | fans | power_supply | module [mod-id] ]

Syntax Description

show

Show running system information

inventory

system inventory information

module

system inventory module information

fans

system inventory fan information

chassis

system inventory chassis information

power_supply

system inventory power supply information

mod-id

module number

Examples

pod1-leaf1# show inventory

NAME: "Chassis",  DESCR: "Nexus C9396PX Chassis"
PID: N9K-C9396PX         ,  VID: V01  ,  SN: SAL1748GYVM

NAME: "Slot 1 ",  DESCR: "1/10G Ethernet Module"
PID: N9K-C9396PX         ,  VID: V01  ,  SN: SAL1748GYVM

NAME: "GEM    ",  DESCR: "40G Ethernet Expansion Module"
PID: N9K-M12PQ           ,  VID: V01  ,  SN: SAL1747GVCB

NAME: "power Supply 1",  DESCR: "PSU                 "
PID: N9K-PAC-650W        ,  VID: V01  ,  SN: DCB1749X007

NAME: "power Supply 2",  DESCR: "PSU                 "
PID: N9K-PAC-650W        ,  VID: V01  ,  SN: DCB1749X00Q

NAME: "Fan 1  ",  DESCR: "fan                 "
PID: N9K-C9300-FAN1-B    ,  VID: N/A  ,  SN: N/A

NAME: "Fan 2  ",  DESCR: "fan                 "
PID: N9K-C9300-FAN1-B    ,  VID: N/A  ,  SN: N/A

NAME: "Fan 3  ",  DESCR: "fan                 "
PID: N9K-C9300-FAN1-B    ,  VID: N/A  ,  SN: N/A

show ip adjacency vrf

show ip adjacency [ interface [summary] | ip-addr [ non-best | detail ] | detail | summary | non-best ] vrf { vrf-name | all }

Syntax Description

show

Show running system information

ip

Display IP information

adjacency

Display adjacency table

interface

Type: interface

Display specific interface adjacencies only

summary

Show adjacency summary

ip-addr

Type: ipaddr

IPV4 source address

non-best

Show both best/non-best entries

detail

Show detail information of adjacency entries

vrf

Display per-VRF information

vrf-name

Type: string

VRF name

all

Show adjacency entries for all vrfs

show ip arp

show ip arp [ ip-address | detail | static | interface | summary [interface] | statistics [interface] ] [ vrf { all | vrf-name } ]

Syntax Description

show

Show running system information

ip

Display IP information

arp

Display ARP table and statistics

statistics

Display ARP statistics

static

Display Static ARP entries

summary

Display ARP adjacency summary

detail

Display detailed information

vrf

Display per-VRF information

all

Display all VRFs

interface

Name of the Interface

ip-address

Target IP address

vrf-name

Name of the VRF

Examples

This example shows how to display ARP adjacency information for an IP address:

pod1-leaf1# show ip arp 10.20.1.2

Flags: * - Adjacencies learnt on non-active FHRP router
+ - Adjacencies synced via CFSoE
# - Adjacencies Throttled for Glean
D - Static Adjacencies attached to down interface

IP ARP Table for all contexts
Total number of entries: 50
Address         Age       MAC Address     Interface
10.20.1.2       00:27:02  0022.bdf8.19ff  vlan15
10.20.1.2       00:26:59  0022.bdf8.19ff  vlan17
10.20.1.2       00:27:03  0022.bdf8.19ff  vlan19
10.20.1.2       00:27:05  0022.bdf8.19ff  vlan23
10.20.1.2       00:27:06  0022.bdf8.19ff  vlan26
10.20.1.2       00:27:01  0022.bdf8.19ff  vlan31
10.20.1.2       00:27:02  0022.bdf8.19ff  vlan36
10.20.1.2       00:27:02  0022.bdf8.19ff  vlan39
10.20.1.2       00:27:04  0022.bdf8.19ff  vlan45
10.20.1.2       00:27:00  0022.bdf8.19ff  vlan48
.
. [EXAMPLE TRUNCATED]
.

pod1-leaf1# show ip arp statistics

ARP packet statistics for all contexts
Sent:
Total 4112459, Requests 4112444, Replies 1, Requests on L2 0, Replies on L2 0,
Gratuitous 14, Tunneled 0, Dropped 0
Send packet drops details:
MBUF operation failed               : 0
Context not yet created             : 0
Invalid context                     : 0
Invalid ifindex                     : 0
Invalid SRC IP                      : 0
Invalid DEST IP                     : 0
Destination is our own IP           : 0
Unattached IP                       : 0
Adjacency Couldn't be added         : 0
Null Source IP                      : 0
Null Source MAC                     : 0
Client Enqueue Failed               : 0
Dest. not reachable for proxy arp   : 0
Invalid Local proxy arp             : 0
Invalid proxy arp                   : 0
VIP is not active                   : 0
Received:
Total 38, Requests 1, Replies 37, Requests on L2 0, Replies on L2 0
Proxy arp 0, Local-Proxy arp 0, Tunneled 0, Fastpath 0, Snooped 0, Dropped 0
Received packet drops details:
Appeared on a wrong interface       : 0
Incorrect length                    : 0
Invalid protocol packet             : 0
Invalid context                     : 0
Context not yet created             : 0
Invalid layer 2 address length      : 0
Invalid layer 3 address length      : 0
Invalid source IP address           : 0
Source IP address is our own        : 0
No mem to create per intf structure : 0
Source address mismatch with subnet : 0
Directed broadcast source           : 0
Invalid destination IP address      : 0
Non-local destination IP address    : 0
Non-active FHRP dest IP address. Learn and drop
: 0
Invalid source MAC address          : 0
Source MAC address is our own       : 0
Received before arp initialization  : 0
L2 packet on proxy-arp-enabled interface
: 0
L2 packet on untrusted L2 port      : 0
Packet with VIP on standby FHRP     : 0
Grat arp received on proxy-arp-enabled interface
: 0
Requests came for exising entries   : 0
Requests came on a L2 interface     : 0
L2FM query failed for a L2 Address  : 0
Dropping due to tunneling failures  : 0

ARP adjacency statistics

Adds 1, Deletes 0, Timeouts 0

pod1-leaf1# show ip arp summary

IP ARP Table - Adjacency Summary
Resolved   : 1
Incomplete : 0
Unknown    : 0
Total      : 1

pod1-leaf1# show ip arp detail

Flags: * - Adjacencies learnt on non-active FHRP router
+ - Adjacencies synced via CFSoE
# - Adjacencies Throttled for Glean
D - Static Adjacencies attached to down interface

IP ARP Table for all contexts
Total number of entries: 2
Address         Age       MAC Address     Interface        Physical Interface
10.0.0.1        00:26:54  b838.617e.a44b  vlan13           eth1/1
10.0.0.1         -        b838.617e.a44b  vlan13

show ip bgp neighbors vrf

show ip bgp neighbors [arg0] vrf { all | vrf-name }

Syntax Description

show

Show running system information

ip

Display BGP information for IPv4 address family

bgp

Show BGP information

neighbors

Display all configured BGP neighbors

arg0

Type: ipaddr

Display one particular BGP neighbor

vrf

Show BGP sessions in a VRF

all

Show BGP sessions for all VRFs

vrf-name

Type: string

Name of the VRF

show ip bgp nexthop-database vrf

show ip bgp nexthop-database vrf { all | vrf-name }

Syntax Description

show

Show running system information

ip

Display BGP information for IPv4 address family

bgp

Show BGP information

nexthop-database

Display nexthop database

vrf

Show BGP sessions in a VRF

all

Show BGP sessions for all VRFs

vrf-name

Name of the VRF

Examples

pod1-leaf1# show ip bgp nexthop-database vrf overlay-1

Next Hop table for VRF overlay-1, address family VPNv4 Unicast:
Next-hop trigger-delay(miliseconds)
Critical: 3000 Non-critical: 10000

Nexthop: 10.0.75.26, Refcount: 32, IGP cost: 3
IGP Route type: 0, IGP preference: 115
Attached nexthop: 10.0.75.30, Interface: Ethernet1/49.1
Attached nexthop: 10.0.75.29, Interface: Ethernet1/50.2
Nexthop is not-attached not-local reachable not-labeled
Nexthop last resolved: 11:37:07, using 10.0.75.26/32
Metric next advertise: -11:26:33
RNH epoch: 1
Leaf5# show ip bgp neighbors vrf overlay-1
VRF overlay-1
BGP neighbor is 10.0.75.29,  remote AS 200, ibgp link,  Peer index 1
BGP version 4, remote router ID 10.0.75.29
BGP state = Established, up for 11:37:52
Using Loopback0 as update source for this peer
Last read 0.000000, hold time = 180, keepalive interval is 60 seconds
Last written 0.000000 , keepalive timer expiry due 00:09:39
Received 724 messages, 0 notifications, 0 bytes in queue
Sent 728 messages, 0 notifications, 0 bytes in queue
Connections established 1, dropped 0
Last reset by us 11:48:22, due to No error
Last reset by peer 11:48:22, due to No error

Neighbor capabilities:
Dynamic capability:advertised (mp, refresh, gr)received (mp,refresh,gr)
Dynamic capability (old): advertised received
Route refresh capability (old): advertised received
4-Byte AS capability: advertised received
Address family VPNv4 Unicast: advertised received
Graceful Restart capability: advertised received

Graceful Restart Parameters:
Address families advertised to peer:
VPNv4 Unicast
Address families received from peer:
VPNv4 Unicast
Forwarding state preserved by peer for:

Restart time advertised to peer: 120 seconds
Stale time for routes advertised by peer: 300 seconds
Restart time advertised by peer: 120 seconds

Capabilities parameter not sent by neighbor
Exchanging IPv4 Unicast NLRI by default

Message statistics:
Sent               Rcvd
Opens:                         1                  1
Notifications:                 0                  0
Updates:                      10                 17
Keepalives:                  706                704
Route Refresh:                11                  2
Capability:                    0                  0
Total:                       728                724
Total bytes:               13938              15409
Bytes in queue:                0                  0

For address family: VPNv4 Unicast
BGP table version 158, neighbor version 158
16 accepted paths consume 1216 bytes of memory
0 sent paths
Community attribute sent to this neighbor
Extended community attribute sent to this neighbor
Nexthop always set to local peering address, 10.0.75.31
Third-party Nexthop will not be computed.
Maximum prefixes allowed 300000
Threshold for warning messages 75%
Outbound route-map configured is deny-pervasive, handle obtained
0 paths flushed from peer
Last End-of-RIB received 2014-06-07T06:15:22.325+00:00 after session start
Local host: 10.0.75.31, Local port: 58989
Foreign host: 10.0.75.29/32, Foreign port: 179
fd = 52

VRF overlay-1
BGP neighbor is 10.0.75.30,  remote AS 200, ibgp link,  Peer index 2
BGP version 4, remote router ID 10.0.75.30
BGP state = Established, up for 11:37:52
Using Loopback0 as update source for this peer
Last read 0.000000, hold time = 180, keepalive interval is 60 seconds
Last written 0.000000 , keepalive timer expiry due 00:09:39
Received 724 messages, 0 notifications, 0 bytes in queue
Sent 728 messages, 0 notifications, 0 bytes in queue
Connections established 1, dropped 0
Last reset by us 11:48:22, due to No error
Last reset by peer 11:48:22, due to No error

Neighbor capabilities:
Dynamic capability:advertised (mp, refresh, gr)received (mp,refresh,gr)
Dynamic capability (old): advertised received
Route refresh capability (old): advertised received
4-Byte AS capability: advertised received
Address family VPNv4 Unicast: advertised received
Graceful Restart capability: advertised received

Graceful Restart Parameters:
Address families advertised to peer:
VPNv4 Unicast
Address families received from peer:
VPNv4 Unicast
Forwarding state preserved by peer for:

Restart time advertised to peer: 120 seconds
Stale time for routes advertised by peer: 300 seconds
Restart time advertised by peer: 120 seconds

Capabilities parameter not sent by neighbor
Exchanging IPv4 Unicast NLRI by default

Message statistics:
Sent               Rcvd
Opens:                         1                  1
Notifications:                 0                  0
Updates:                      10                 17
Keepalives:                  706                704
Route Refresh:                11                  2
Capability:                    0                  0
Total:                       728                724
Total bytes:               13938              15409
Bytes in queue:                0                  0

For address family: VPNv4 Unicast
BGP table version 158, neighbor version 158
16 accepted paths consume 1216 bytes of memory
0 sent paths
Community attribute sent to this neighbor
Extended community attribute sent to this neighbor
Nexthop always set to local peering address, 10.0.75.31
Third-party Nexthop will not be computed.
Maximum prefixes allowed 300000
Threshold for warning messages 75%
Outbound route-map configured is deny-pervasive, handle obtained
0 paths flushed from peer
Last End-of-RIB received 2014-06-07T06:15:22.318+00:00 after session start
Local host: 10.0.75.31, Local port: 60311
Foreign host: 10.0.75.30/32, Foreign port: 179
fd = 51

show ip dhcp client

show ip dhcp client [statistics]

Syntax Description

show

Show running system information

ip

Display IP information

dhcp

Show items in DHCP

client

DHCP client

statistics

Statistics related to DHCP

Examples

Leaf5# show ip dhcp client

DHCP client service is enabled
DHCP client interface loopback0 has the following properties:
Client ID              :  SAL1748GYVM
Hostname               :  Leaf5
Mode                   :  normal
Requested Address      :  10.0.75.31
Vendor ID              :  cisco
Pseudo Interfaces      :  vlan13
UByte TLVs:            :  code: 1  , value: 2;   code: 6  , value: 1;
UInt16 TLVs:           :  code: 3  , value: 1;
UInt32 TLVs:           :  code: 4  , value: 135;
Text TLVs:             :  code: 7  , value: N9K-C9396PX;
Obtained Client Address:  10.0.75.31
Obtained client response has the following properties:
Client Hardware Address       :  7C:69:F6:10:1C:B3
Bootup Scipt File Name        :  fwrepo/boot/node-135
Host Name                     :  Leaf5
Interface ID                  :  vlan13
Lease Time                    :  65535
Message Type                  :  ack
Server ID                     :  10.0.0.1
Server IP Address             :  10.0.0.1
Subnet Mask                   :  255.255.255.255
Your IP Address               :  10.0.75.31
UByte TLVs:  code: 1  , value: 2;   code: 5  , value: 1;   code: 6  , value: 1;
UInt16 TLVs:  code: 3  , value: 1;
UInt32 TLVs:  code: 4  , value: 135;
Text TLVs:

Leaf5# show ip dhcp client statistics

DHCP client service statistics:
DHCP client statistics for client interface loopback0:
----------------------------------------------------------------------
Message Type             Rx              Tx           Drops
----------------------------------------------------------------------
Discover                  0               3               0
Offer                     1               0               0
Request(*)                0               1               0
Ack                       1               0               0
Release(*)                0               0               0
Decline                   0               0               0
Nack                      0               0               0
Inform                    0               0               0
----------------------------------------------------------------------
Total                     2               4               0
----------------------------------------------------------------------

show ip dhcp global statistics

show ip dhcp global statistics

Syntax Description

show

Show running system information

ip

Display IP information

dhcp

Show items in DHCP

global

DHCP global stats

statistics

Statistics related to DHCP

Examples

Leaf5# show ip dhcp global statistics

Packets processed 708
Packets received through cfsoe 0
Packets forwarded 0
Packets forwarded on cfsoe 0
Total packets dropped 0
Packets dropped from untrusted ports 0
Packets dropped due to MAC address check failure 0
Packets dropped due to Option 82 insertion failure 0
Packets dropped due to o/p intf unknown 0
Packets dropped which were unknown 0
Packets dropped due to dhcp relay not enabled 0
Packets dropped due to no binding entry 0
Packets dropped due to interface error/no interface 0
Packets dropped due to max hops exceeded 0
Packets dropped due to no trusted ports 0

show ip dhcp relay

show ip dhcp relay [ statistics [ interface intfname ] | address [ detail | interface intfname [detail] ] | discover [ interface intfname ] | detail ]

Syntax Description

show

Show running system information

ip

Display IP information

dhcp

Show items in DHCP

relay

DHCP Relay

address

DHCP relay address

discover

DHCP relay node discovery

statistics

Statistics related to DHCP

detail

DHCP relay detailed information

interface

DHCP relay address of the interface

intfname

Interface slot/chassis number

Examples

pod1-leaf1# show ip dhcp relay

DHCP relay service is enabled
Insertion of option 82 is enabled
Insertion of VPN suboptions is enabled
Insertion of cisco suboptions is disabled
Global smart-relay is disabled

Smart-relay is enabled on the following interfaces:
------------------------------------------------------

Subnet-broadcast is enabled on the following interfaces:
------------------------------------------------------

Helper addresses are configured on the following interfaces:
Interface        Relay Address     VRF Name
-------------    -------------     --------
loopback0        10.0.0.1          overlay-1
loopback0        10.0.0.2          overlay-1
loopback0        10.0.0.3          overlay-1
Vlan854          20.20.20.50       dhcp:dhcpCtx
Vlan854          20.20.20.51       dhcp:dhcpCtx

pod1-leaf1# show ip dhcp relay statistics

----------------------------------------------------------------------
Message Type             Rx              Tx           Drops
----------------------------------------------------------------------
Discover                  692             1384            0
Offer                     4               4               0
Request(*)                2               2               0
Ack                       2               2               0
Release(*)                0               0               0
Decline                   0               0               0
Nack                      0               0               0
Inform                    0               0               0
----------------------------------------------------------------------
Total                     708             1400            0
----------------------------------------------------------------------

DHCP L3 FWD:
Total Packets Received                           :         0
Total Packets Forwarded                          :         0
Total Packets Dropped                            :         0
Non DHCP:
Total Packets Received                           :         0
Total Packets Forwarded                          :         0
Total Packets Dropped                            :         0
DROP:
DHCP Relay not enabled                           :         0
Invalid DHCP message type                        :         0
Interface error                                  :         0
Tx failure towards server                        :         0
Tx failure towards client                        :         0
Unknown output interface                         :         0
Unknown vrf or interface for server              :         0
Max hops exceeded                                :         0
Option 82 validation failed                      :         0
Packet Malformed                                 :         0
*  -  These counters will show correct value when switch
recieves DHCP request packet with destination ip as broadcast
address. If request is unicast it will be HW switched
Leaf5# show ip dhcp relay discover

DHCP appliance node discovery is configured on the following interfaces:

Relay interface loopback0 has the following appliance node option definitions:
---------------------------------------------------------------

Relay interface Vlan854 has the following appliance node option definitions:
---------------------------------------------------------------

show ip igmp snooping

show ip igmp snooping [ vlan vlan ]

Syntax Description

show

Show running system information

ip

Show IP information

igmp

Show IGMP information

snooping

IGMP Snooping information

vlan

Display Vlan IGMP snooping membership information

vlan

Type: integer

Specify vlan-id

Examples

This example shows how to display IGMP snooping information for all VLANs:

pod1-leaf1# show ip igmp snooping

Global IGMP Snooping Information:
IGMP Snooping enabled
Optimised Multicast Flood (OMF) enabled
IGMPv1/v2 Report Suppression enabled
IGMPv3 Report Suppression disabled
Link Local Groups Suppression enabled

IGMP Snooping information for vlan 24
IGMP snooping enabled
Lookup mode: IP
Optimised Multicast Flood (OMF) enabled
IGMP querier present, address: 24.0.0.1, version: 3
Querier interval: 125 secs
Querier last member query interval: 1 secs
Querier robustness: 2
Switch-querier enabled, address 24.0.0.1/16, currently running
IGMPv3 Explicit tracking enabled
IGMPv2 Fast leave disabled
IGMPv1/v2 Report suppression enabled
IGMPv3 Report suppression enabled
Link Local Groups suppression enabled
Router port detection using PIM Hellos, IGMP Queries
Number of router-ports: 0
Number of groups: 1500
VLAN vPC function enabled
Active ports:

IGMP Snooping information for vlan 35
IGMP snooping enabled
Lookup mode: IP
Optimised Multicast Flood (OMF) enabled
IGMP querier present, address: 26.0.0.1, version: 3
Querier interval: 125 secs
Querier last member query interval: 1 secs
Querier robustness: 2
Switch-querier enabled, address 26.0.0.1/16, currently running
IGMPv3 Explicit tracking enabled
IGMPv2 Fast leave disabled
IGMPv1/v2 Report suppression enabled
IGMPv3 Report suppression enabled
Link Local Groups suppression enabled
Router port detection using PIM Hellos, IGMP Queries
Number of router-ports: 0
Number of groups: 0
VLAN vPC function enabled
Active ports:

show ip igmp snooping explicit-tracking

show ip igmp snooping explicit-tracking [ vlan vlan-id ] [encap]

Syntax Description

show

Show running system information

ip

Show IP information

igmp

Show IGMP information

snooping

IGMP Snooping information

explicit-tracking

Display explicit-tracking database for IGMPv3

vlan

Display VLAN explicit-tracking database

encap

Display encapsulated VLAN explicit-tracking database

vlan-id

VLAN number

Examples

pod1-leaf1# show ip igmp snooping explicit-tracking

IGMPv3 Snooping Explicit-tracking information
Vlan Source/Group
Intf           Reporter      Uptime    Last-Join Expires
24   *          /232.255.120.1
Eth1/24        24.0.0.69     00:52:08  00:00:42  00:03:37
24   *          /232.255.120.1
Eth1/25        24.0.0.70     00:52:35  00:00:45  00:03:34
24   *          /232.255.120.1
.
. [EXAMPLE TRUNCATED]
.
24   *          /232.255.132.238
Eth1/25        24.0.0.70     00:51:55  00:00:48  00:03:31
24   *          /232.255.132.238
Eth1/26        24.0.0.71     00:52:15  00:00:24  00:03:55
24   *          /232.255.132.238
Eth1/23        24.0.0.68     00:52:01  00:02:17  00:02:02

show ip igmp snooping groups

show ip igmp snooping groups [ [group] [source] [ vlan vlan-id ] ] [ detail | summary ] [encap]

Syntax Description

show

Show running system information

ip

Show IP information

igmp

Show IGMP information

snooping

Show IGMP Snooping information

groups

Display snooping information for group address

group

Multicast IP address of single group to display

source

Source IP address

detail

Display detailed information for the group

summary

Display snooping group summary

vlan

Display VLAN IGMP snooping membership information

encap

Display encapsulated VLAN IGMP snooping membership information

vlan-id

VLAN number

Examples

pod1-leaf1# show ip igmp snooping groups vlan 24

Type: S - Static, D - Dynamic, R - Router port, F - Fabricpath core port

Vlan  Group Address      Ver  Type  Port list
24    232.255.120.1      v3   D     Eth1/23 Eth1/24 Eth1/25
Eth1/26
24    232.255.120.2      v3   D     Eth1/23 Eth1/24 Eth1/25
Eth1/26
24    232.255.120.3      v3   D     Eth1/23 Eth1/24 Eth1/25
Eth1/26
.
. [EXAMPLE TRUNCATED]
.

pod1-leaf1# show ip igmp snooping groups detail

IGMP Snooping group membership for vlan 24
Group addr: 232.255.120.1
Group ver: v3 [old-host-timer: not running]
Last reporter: 24.0.0.68
IGMPv3 memb ports:
Ethernet1/23 [expires never]
Ethernet1/24 [expires never]
Ethernet1/25 [expires never]
Ethernet1/26 [expires never]

vPC grp peer-link flag: exclude
M2RIB vPC grp peer-link flag: include
IGMPv3 report suppress flag: not set
Num of sources joined: 0

Group addr: 232.255.120.2
Group ver: v3 [old-host-timer: not running]
Last reporter: 24.0.0.68
IGMPv3 memb ports:
Ethernet1/23 [expires never]
Ethernet1/24 [expires never]
Ethernet1/25 [expires never]
Ethernet1/26 [expires never]

vPC grp peer-link flag: exclude
M2RIB vPC grp peer-link flag: include
IGMPv3 report suppress flag: not set
Num of sources joined: 0
.
. [EXAMPLE TRUNCATED]
.

pod1-leaf1# show ip igmp snooping groups encap

Type: S - Static, D - Dynamic, R - Router port, F - Fabricpath core port

Vlan  Group Address      Ver  Type  Encap  Port list
24    232.255.120.1      v3   D
v3_star_g                   33     Eth1/25
32     Eth1/24
31     Eth1/26
34     Eth1/23
24    232.255.120.2      v3   D
v3_star_g                   33     Eth1/25
32     Eth1/24
31     Eth1/26
34     Eth1/23
.
. [EXAMPLE TRUNCATED]
.

pod1-leaf1# show ip igmp snooping groups summary

Legend: E - Enabled, D - Disabled

Vlan Snoop OMF (*,G)-Count (S,G)-Count
24    E      E    1500         0
35    E      E    0            0
Total number of (*,G) entries: 1500
Total number of (S,G) entries: 0

show ip igmp snooping lookup-mode

show ip igmp snooping lookup-mode [ vlan vlan-id ]

Syntax Description

show

Show running system information

ip

Show IP information

igmp

Show IGMP information

snooping

IGMP Snooping information

lookup-mode

IGMP Snooping lookup mode information

vlan

Display VLAN information

vlan-id

VLAN identifier

Examples

pod1-leaf1# show ip igmp snooping lookup-mode

Global lookup-mode:
configured : IP
operational: IP
VLAN lookup-mode
24 IP
35 IP

show ip igmp snooping mrouter

show ip igmp snooping mrouter [ vlan vlan-id ] [detail] [encap]

Syntax Description

show

Show running system information

ip

Show IP information

igmp

Show IGMP information

snooping

IGMP Snooping information

mrouter

Display multicast routers detected

detail

Display detailed mrouter information

vlan

Display VLAN multicast router information

vlan-id

VLAN number

Examples

pod1-leaf1# show ip igmp snooping mrouter

Type: S - Static, D - Dynamic, V - vPC Peer Link
I - Internal, F - Fabricpath core port
U - User Configured
Vlan  Router-port   Type      Uptime      Expires
37    Po1           D         00:55:36    00:04:48

pod1-leaf1# show ip igmp snooping mrouter encap

Type: S - Static, D - Dynamic, V - vPC Peer Link
I - Internal, F - Fabricpath core port
U - User Configured
Vlan  Encap   Router-port   Type      Uptime      Expires
37    38      Po1           D         00:58:09    00:04:36

show ip igmp snooping querier

show ip igmp snooping querier [ vlan vlan-id ] [detail]

Syntax Description

show

Show running system information

ip

Show IP information

igmp

Show IGMP information

snooping

IGMP Snooping information

querier

Display snooping querier information

detail

Display detailed information

vlan

Display VLAN IGMP snooping querier information

vlan-id

VLAN identifier

Examples

pod1-leaf1# show ip igmp snooping querier

Vlan  IP Address       Version   Expires     Port
24    24.0.0.1         v3        00:01:17     Switch querier
35    26.0.0.1         v3        00:01:17     Switch querier

pod1-leaf1# show ip igmp snooping querier detail vlan 24

Vlan  IP Address       Version   Expires     Port
24    24.0.0.1         v3        00:01:16     Switch querier
IGMP snooping querier configuration for VLAN 24
IGMP snooping last member query count: 0, configured value: 0
IGMP snooping version: 3, configured value: 3
IGMP snooping robustness variable: 2, configured value: 2
IGMP snooping startup query count: 2, configured value: 2
IGMP snooping startup query interval: 125 secs, configured value: 125 secs
IGMP snooping last member query interval: 1 secs, configured value: 1 secs
IGMP snooping query interval: 125 secs, configured value: 125 secs
IGMP snooping query max response time: 10 secs, configured value: 10 secs
IGMP snooping configured querier timeout: 255 secs, default

show ip igmp snooping statistics

show ip igmp snooping statistics [ global | vlan vlan-id ]

Syntax Description

show

Show running system information

ip

Show IP information

igmp

Show IGMP information

snooping

IGMP Snooping information

statistics

Display packet/error counter statistics

global

Display global statistics

vlan

Display VLAN statistics

vlan-id

VLAN identifier

Examples

pod1-leaf1# show ip igmp snooping statistics vlan 27

Global IGMP snooping statistics: (only non-zero values displayed)
vPC ZMQ message response sent: 6
vPC ZMQ message response rcvd: 6
VLAN 27 IGMP snooping statistics, last reset:  (only non-zero values displayed)
Packets received: 42
IGMPv3 queries received: 42
vPC Peer Link ZMQ packet statistics:
IGMP packets (sent/recv/fail): 2/21/0

show ip interface

show ip interface [ brief [include-secondary] | interface | ip-addr ] [operational] [ vrf { all | vrf-name } ]

Syntax Description

show

Show running system information

ip

Display IP information

interface

Display IP related interface information

brief

Show brief info of interface

include-secondary

Display summary of all IP addresses

operational

Display only interfaces that are administratively enabled

vrf

Display per-VRF information

all

Display all VRFs

interface

Name of the Interface

ip-addr

IP address

vrf-name

Name of the VRF

local-addr

Interface for local IP address

Examples

pod1-leaf1# show ip interface brief

IP Interface Status for VRF "overlay-1"(4)
Interface            Address         Interface Status
eth1/49              unassigned      protocol-up/link-up/admin-up
eth1/49.1            unnumbered      protocol-up/link-up/admin-up
(lo0)
eth1/50              unassigned      protocol-down/link-down/admin-up
eth1/50.2            unnumbered      protocol-down/link-down/admin-up
(lo0)
eth1/51              unassigned      protocol-down/link-down/admin-up
eth1/51.3            unnumbered      protocol-down/link-down/admin-up
(lo0)
eth1/52              unassigned      protocol-down/link-down/admin-up
eth1/52.4            unnumbered      protocol-down/link-down/admin-up
(lo0)
eth1/53              unassigned      protocol-down/link-down/admin-up
eth1/53.5            unnumbered      protocol-down/link-down/admin-up
(lo0)
eth1/54              unassigned      protocol-down/link-down/admin-up
eth1/54.6            unnumbered      protocol-down/link-down/admin-up
(lo0)
eth1/55              unassigned      protocol-down/link-down/admin-up
eth1/55.7            unnumbered      protocol-down/link-down/admin-up
(lo0)
eth1/56              unassigned      protocol-down/link-down/admin-up
eth1/56.8            unnumbered      protocol-down/link-down/admin-up
(lo0)
eth1/57              unassigned      protocol-down/link-down/admin-up
eth1/57.9            unnumbered      protocol-down/link-down/admin-up
(lo0)
eth1/58              unassigned      protocol-up/link-up/admin-up
eth1/58.10           unnumbered      protocol-up/link-up/admin-up
(lo0)
eth1/59              unassigned      protocol-down/link-down/admin-up
eth1/59.11           unnumbered      protocol-down/link-down/admin-up
(lo0)
eth1/60              unassigned      protocol-down/link-down/admin-up
eth1/60.12           unnumbered      protocol-down/link-down/admin-up
(lo0)
vlan23               10.0.0.30/27    protocol-up/link-up/admin-up
lo0                  10.0.47.251/32  protocol-up/link-up/admin-up
lo1                  10.0.20.69/32   protocol-up/link-up/admin-up
lo1023               10.0.0.32/32    protocol-up/link-up/admin-up

IP Interface Status for VRF "black-hole"(3)
Interface            Address         Interface Status
IP Interface Status for VRF "DuIPTV:ctx0"(5)
Interface            Address         Interface Status
vlan15               28.0.0.254/24   protocol-up/link-up/admin-up
vlan24               20.0.0.254/24   protocol-up/link-up/admin-up
vlan27               22.0.0.254/24   protocol-up/link-up/admin-up
vlan37               27.0.0.254/24   protocol-up/link-up/admin-up

IP Interface Status for VRF "AsTenant3:ctx2"(9)
Interface            Address         Interface Status
IP Interface Status for VRF "AsTenant4:ctx2"(6)
Interface            Address         Interface Status
IP Interface Status for VRF "AsTenant4:ctxtn4_ctx0"(7)
Interface            Address         Interface Status
IP Interface Status for VRF "DuCorpIT:ctx1"(8)
Interface            Address         Interface Status
IP Interface Status for VRF "management"(2)
Interface            Address         Interface Status

show ip ospf interface

show ip ospf interface [ interface-id | [brief] [ vrf { all | vrf-name } ] ]

Syntax Description

show

Show running system information

ip

Ipv4

ospf

Display OSPF status and configuration

interface

OSPF enabled interface

interface-id

Interface identifier

brief

Display summary of OSPF interfaces

vrf

Display per-VRF information

all

Display information for all VRFs

vrf-name

VRF name (Max Size 32)

Examples

pod1-leaf1# show ip ospf interface brief vrf Conformance:C1

OSPF Process ID default VRF Conformance:C1
Total number of interface: 4
Interface               ID     Area            Cost   State    Neighbors Status
Eth1/4                  0      0.0.0.108       1      P2P      0         up
Lo102                   0      0.0.0.108       1      LOOPBACK 0         up
Eth1/2                  0      0.0.0.108       1      P2P      0         up
Eth1/10                 0      0.0.0.108       10     P2P      0         up

pod1-leaf1# show ip ospf interface vrf Conformance:C1

Ethernet1/4 is up, line protocol is up
IP address 95.95.95.254/24, Process ID default VRF Conformance:C1, area 0.0.0.108
Enabled by interface configuration
State P2P, Network type P2P, cost 1
Index 0, Transmit delay 1 sec
0 Neighbors, flooding to 0, adjacent with 0
Timer intervals: Hello 10, Dead 40, Wait 40, Retransmit 5
Hello timer due in 00:00:00
Simple authentication
Number of opaque link LSAs: 0, checksum sum 0
loopback102 is up, line protocol is up
IP address 101.101.101.101/32, Process ID default VRF Conformance:C1, area 0.0.0.108
Enabled by interface configuration
State LOOPBACK, Network type LOOPBACK, cost 1

Ethernet1/2 is up, line protocol is up
IP address 94.94.94.254/24, Process ID default VRF Conformance:C1, area 0.0.0.108
Enabled by interface configuration
State P2P, Network type P2P, cost 1
Index 0, Transmit delay 1 sec
0 Neighbors, flooding to 0, adjacent with 0
Timer intervals: Hello 10, Dead 40, Wait 40, Retransmit 5
Hello timer due in 00:00:00
Simple authentication
Number of opaque link LSAs: 0, checksum sum 0
Ethernet1/10 is up, line protocol is up
IP address 96.96.96.254/24, Process ID default VRF Conformance:C1, area 0.0.0.108
Enabled by interface configuration
State P2P, Network type P2P, cost 10
Index 0, Transmit delay 1 sec
0 Neighbors, flooding to 0, adjacent with 0
Timer intervals: Hello 10, Dead 40, Wait 40, Retransmit 5
Hello timer due in 00:00:00
Simple authentication
Number of opaque link LSAs: 0, checksum sum 0

show ip ospf neighbors

show ip ospf neighbors [ interface-id [ ip-address [detail] | detail | summary ] ] | [ ip-address [detail] | detail | summary ] [ vrf { all | vrf-name } ]

Syntax Description

show

Show running system information

ip

Ipv4

ospf

Display OSPF status and configuration

neighbors

Neighbor list

ip-address

Router IP address of neighbor

detail

Show detailed neighbor display

interface-id

Interface identifier

summary

Summary of neighbors

vrf

Display per-VRF information

all

Display information for all VRFs

vrf-name

VRF name (Max Size 32)

Examples

pod1-leaf1# show ip ospf neighbors vrf t5:ctx56

OSPF Process ID default VRF t5:ctx56
Total number of neighbors: 1
Neighbor ID     Pri State            Up Time  Address         Interface
44.44.44.44       0 FULL/DROTHER     1d01h    20.1.54.3       Eth1/17.489

pod1-leaf1# show ip ospf neighbors detail

Neighbor 44.44.44.44, interface address 20.1.54.3
Process ID default VRF t14:ctx191, in area 0.0.0.57 via interface Ethernet1/17.466
State is FULL, 6 state changes, last change 1d01h
Neighbor priority is 0
DR is 20.1.54.2 BDR is 0.0.0.0
Hello options 0x8, dbd options 0x40
Last non-hello packet received 00:04:53
Dead timer due in 00:00:40

Neighbor 44.44.44.44, interface address 20.1.54.3
Process ID default VRF t18:ctx192, in area 0.0.0.57 via interface Ethernet1/17.506
State is FULL, 6 state changes, last change 1d01h
Neighbor priority is 0
DR is 20.1.54.2 BDR is 0.0.0.0
Hello options 0x8, dbd options 0x40
Last non-hello packet received 00:04:49
Dead timer due in 00:00:41
.
. [EXAMPLE TRUNCATED]
.

show ip ospf route

show ip ospf route [ summary | ippfx [longer-prefixes] [summary] | ip ] [ vrf { all | vrf-name } ]

Syntax Description

show

Show running system information

ip

Ipv4

ospf

Display OSPF status and configuration

route

Internal OSPF routes

ip

IP address (show single OSPF route)

ippfx

IP prefix (show single exact match OSPF route)

summary

Show route counts

longer-prefixes

Show exact match and more specific routes

vrf

Display per-VRF information

all

Display information for all VRFs

vrf-name

VRF name (Max Size 32)

Examples

pod1-leaf1# show ip ospf route vrf Conformance:C1

OSPF Process ID default VRF Conformance:C1, Routing Table
(D) denotes route is directly attached      (R) denotes route is in RIB
94.94.94.0/24 (intra)(D) area 0.0.0.108
via 94.94.94.0/Eth1/2* , cost 1 distance 110
95.95.95.0/24 (intra)(D) area 0.0.0.108
via 95.95.95.0/Eth1/4* , cost 1 distance 110
96.96.96.0/24 (intra)(D) area 0.0.0.108
via 96.96.96.0/Eth1/10* , cost 10 distance 110
101.101.101.101/32 (intra)(D) area 0.0.0.108
via 101.101.101.101/lo102* , cost 1 distance 110

pod1-leaf1# show ip ospf route summary vrf Conformance:C1

OSPF Process ID default VRF Conformance:C1, Routing Table
(D) denotes route is directly attached      (R) denotes route is in RIB

Total number of routes: 4
Total number of paths: 4

Total number of (routes, paths) per path type:
nopath          : (       0,        0)
intra           : (       4,        4)
discard-internal: (       0,        0)
inter           : (       0,        0)
discard-external: (       0,        0)
type-1          : (       0,        0)
nssa type-1     : (       0,        0)
type-2          : (       0,        0)
nssa type-2     : (       0,        0)

Number of (routes,paths) per mask-length:
/24: (       3,        3)   /32: (       1,        1)

show ip ospf traffic

show ip ospf traffic { interface-id | vrf { all | vrf-name } }

Syntax Description

show

Show running system information

ip

Ipv4

ospf

Display OSPF status and configuration

traffic

Packet counters

interface-id

Interface identifier

vrf

Display per-VRF information

all

Display information for all VRFs

vrf-name

VRF name (Max Size 32)

Examples

pod1-leaf1# show ip ospf traffic vrf Conformance:C1

OSPF Process ID default VRF Conformance:C1, Packet Counters (cleared 04:18:42 ago)
Total: 22 in, 5319 out
LSU transmissions: first 0, rxmit 0, for req 0 nbr xmit 0
Flooding packets output throttled (IP/tokens): 00 (0/0)
Ignored LSAs: 0, LSAs dropped during SPF: 0
LSAs dropped during graceful restart: 0
Errors: drops in        0, drops out       0, errors in      22,
errors out      0, hellos in      22, dbds in         0,
lsreq in        0, lsu in          0, lsacks in       0,
unknown in      0, unknown out     0, no ospf         0,
bad version     0, bad crc         0, dup rid         0,
dup src         0, invalid src     0, invalid dst     0,
no nbr          0, passive         0, wrong area      3,
pkt length      0, nbr changed rid/ip addr            0
bad auth        0, no vrf          0

hellos       dbds     lsreqs       lsus       acks
In:         22          0          0          0          0
Out:       5319          0          0          0          0

show ip ospf vrf

show ip ospf vrf { all | vrf-name }

Syntax Description

show

Show running system information

ip

Ipv4

ospf

Display OSPF status and configuration

vrf

Display per-VRF information

all

Display information for all VRFs

vrf-name

VRF name (Max Size 32)

Examples

pod1-leaf1# show ip ospf vrf t14:ctx191

Routing Process default with ID 20.1.55.2 VRF t14:ctx191
Stateful High Availability enabled
Graceful-restart is configured
Grace period: 60 state: Inactive
Last graceful restart exit status: None
Supports only single TOS(TOS0) routes
Supports opaque LSA
This router is an autonomous system boundary.
Redistributing External Routes from

Administrative distance 100
Reference Bandwidth is 40000 Mbps
SPF throttling delay time of 200.000 msecs,
SPF throttling hold time of 1000.000 msecs,
SPF throttling maximum wait time of 5000.000 msecs
LSA throttling start time of 0.000 msecs,
LSA throttling hold interval of 5000.000 msecs,
LSA throttling maximum wait time of 5000.000 msecs
Minimum LSA arrival 1000.000 msec
LSA group pacing timer 10 secs
Maximum paths to destination 3
Number of external LSAs 0, checksum sum 0x0
Number of opaque AS LSAs 0, checksum sum 0x0
Number of areas is 1, 0 normal, 0 stub, 1 nssa
Number of active areas is 1, 0 normal, 0 stub, 1 nssa
Area (0.0.0.57)
Area has existed for 1d03h
Interfaces in this area: 2 Active interfaces: 2
Passive interfaces: 1  Loopback interfaces: 1
This area is a NSSA area
Perform type-7/type-5 LSA translation
Summarization is disabled
No authentication available
SPF calculation has run 16 times
Last SPF ran for 0.001554s
Area ranges are
Number of LSAs: 5, checksum sum 0x0

show ip prefix-list

show ip prefix-list [strarg]

Syntax Description

show

Show running system information

ip

Display IP information

prefix-list

List IP prefix lists

strarg

Type: string

Name of prefix list (Max Size 100)

show ip process

show ip process [ vrf { all | vrf-name } ]

Syntax Description

show

Show running system information

ip

Display IP information

process

Display IP global information

vrf

Display per-VRF information

all

Display all VRFs

vrf-name

Name of the VRF

Examples

pod1-leaf1# show ip process

VRF overlay-1
VRF id is 4
Base table id is 2
Iodlist: 101 109 102 110 103 111 104 112 105 113 106 114 107 115 108 116 117 4 146 129
Local address list:  10.0.0.30         10.0.75.24        10.0.106.3
10.0.0.32

VRF black-hole
VRF id is 3
Base table id is 1
Iodlist:
Local address list:

VRF DU1:ctx1
VRF id is 5
Base table id is 3
Iodlist:
Local address list:

VRF management
VRF id is 2
Base table id is 4
Iodlist:
Local address list:

VRF Nikola:Nikola
VRF id is 6
Base table id is 5
Iodlist:
Local address list:

VRF Nikola:spanCtx
VRF id is 7
Base table id is 6
Iodlist:
Local address list:

VRF testPing:testPing
VRF id is 8
Base table id is 7
Iodlist:
Local address list:

show ip route vrf

show ip route [ ip-addr | ip-prefix [ longer-prefixes | shorter-prefixes ] ] [ next-hop nh | interface interface-id | updated [ since stime ] [ until utime ] ] + [ summary | detail ] vrf { vrf-name | all }

Syntax Description

show

Show running system information

ip

Display IP information

route

Display routing information

ip-addr

Display single route longest match lookup

ip-prefix

Display single exact match route

longer-prefixes

Display matching routes with mask-lengths >= prefix

shorter-prefixes

Display matching routes with mask-lengths <= prefix

next-hop

Display routes with this next-hop only

nh

Next hop address

interface

Display routes with this output interface only

interface-id

Interface Name

updated

Display routes filtered by last updated time

since

Display those routes updated since this time

stime

Type: string

Since this date/time [[CC]YY-][MM-DD-]HH:MM[:SS]

until

Display those routes updated until this time

utime

Type: string

Until this date/time [[CC]YY-][MM-DD-]HH:MM[:SS]

summary

Display route counts

detail

Display routes in full detail

vrf

Display per-VRF information

vrf-name

VRF name

all

Display information for all VRFs

Examples

pod1-leaf1# show ip route vrf overlay-1

IP Route Table for VRF "overlay-1"
'*' denotes best ucast next-hop
'**' denotes best mcast next-hop
'[x/y]' denotes [preference/metric]
'%<string>' in via output denotes VRF <string>

10.0.0.0/27, ubest/mbest: 1/0, attached, direct
*via 10.0.0.30, vlan9, [1/0], 12:15:43, direct
10.0.0.1/32, ubest/mbest: 3/0
*via 10.0.75.29, eth1/99.3, [115/12], 12:10:48, isis-isis_infra, L1
*via 10.0.75.30, eth1/101.5, [115/12], 12:10:48, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/12], 12:10:41, isis-isis_infra, L1
10.0.0.3/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/12], 00:30:07, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/12], 00:30:07, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/12], 00:30:07, isis-isis_infra, L1
10.0.0.30/32, ubest/mbest: 1/0, attached
*via 10.0.0.30, vlan9, [1/0], 12:15:43, local
10.0.0.32/32, ubest/mbest: 2/0, attached, direct
*via 10.0.0.32, lo1023, [1/0], 12:10:42, local
*via 10.0.0.32, lo1023, [1/0], 12:10:42, direct
10.0.0.64/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:10:48, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/2], 12:10:46, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:10:41, isis-isis_infra, L1
10.0.0.65/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:10:48, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/2], 12:10:46, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:10:41, isis-isis_infra, L1
10.0.36.65/32, ubest/mbest: 2/0
*via 10.0.75.29, eth1/99.3, [115/2], 12:10:46, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:10:41, isis-isis_infra, L1
10.0.36.66/32, ubest/mbest: 2/0
*via 10.0.75.29, eth1/99.3, [115/2], 12:10:46, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:10:41, isis-isis_infra, L1
10.0.36.69/32, ubest/mbest: 1/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:10:22, isis-isis_infra, L1
10.0.36.70/32, ubest/mbest: 1/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:10:22, isis-isis_infra, L1
10.0.75.24/32, ubest/mbest: 2/0, attached, direct
*via 10.0.75.24, lo0, [1/0], 12:10:55, local
*via 10.0.75.24, lo0, [1/0], 12:10:55, direct
10.0.75.25/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 11:49:55, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 11:49:55, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 11:49:55, isis-isis_infra, L1
10.0.75.26/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:10:48, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:10:32, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:10:32, isis-isis_infra, L1
10.0.75.27/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 00:17:19, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 00:17:19, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 00:17:19, isis-isis_infra, L1
10.0.75.28/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:10:48, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:10:48, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:10:41, isis-isis_infra, L1
10.0.75.29/32, ubest/mbest: 2/0
*via 10.0.75.29, eth1/99.3, [115/2], 12:10:49, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:10:41, isis-isis_infra, L1
10.0.75.30/32, ubest/mbest: 1/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:10:48, isis-isis_infra, L1
10.0.75.31/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:10:48, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:10:48, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:10:41, isis-isis_infra, L1
10.0.106.0/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:07:03, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:07:03, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:07:03, isis-isis_infra, L1
10.0.106.1/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:07:05, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:07:05, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:07:05, isis-isis_infra, L1
10.0.106.3/32, ubest/mbest: 2/0, attached, direct
*via 10.0.106.3, lo1, [1/0], 12:07:05, local
*via 10.0.106.3, lo1, [1/0], 12:07:05, direct

pod1-leaf1# show ip route next-hop 10.0.75.30 vrf overlay-1

IP Route Table for VRF "overlay-1"
'*' denotes best ucast next-hop
'**' denotes best mcast next-hop
'[x/y]' denotes [preference/metric]
'%<string>' in via output denotes VRF <string>

10.0.0.1/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/12], 12:13:15, isis-isis_infra, L1
10.0.0.3/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/12], 00:32:34, isis-isis_infra, L1
10.0.0.64/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:13:15, isis-isis_infra, L1
10.0.0.65/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:13:15, isis-isis_infra, L1
10.0.36.69/32, ubest/mbest: 1/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:12:49, isis-isis_infra, L1
10.0.36.70/32, ubest/mbest: 1/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:12:49, isis-isis_infra, L1
10.0.75.25/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 11:52:22, isis-isis_infra, L1
10.0.75.26/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:13:15, isis-isis_infra, L1
10.0.75.27/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 00:19:46, isis-isis_infra, L1
10.0.75.28/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:13:15, isis-isis_infra, L1
10.0.75.30/32, ubest/mbest: 1/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:13:15, isis-isis_infra, L1
10.0.75.31/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:13:15, isis-isis_infra, L1
10.0.106.0/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:09:30, isis-isis_infra, L1
10.0.106.1/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:09:32, isis-isis_infra, L1
Leaf1# show ip route summary  vrf overlay-1
IP Route Table for VRF "overlay-1"
Total number of routes: 25
Total number of paths:  54

Best paths per protocol:      Backup paths per protocol:
broadcast      : 2            static         : 1
am             : 1
local          : 4
direct         : 4
isis-isis_infra: 42

Number of routes per mask-length:
/27: 1       /32: 24

pod1-leaf1# show ip route summary vrf overlay-1

IP Route Table for VRF "overlay-1"
Total number of routes: 25
Total number of paths:  54

Best paths per protocol:      Backup paths per protocol:
broadcast      : 2            static         : 1
am             : 1
local          : 4
direct         : 4
isis-isis_infra: 42

Number of routes per mask-length:
/27: 1       /32: 24

pod1-leaf1# show ip route updated vrf overlay-1

IP Route Table for VRF "overlay-1"
'*' denotes best ucast next-hop
'**' denotes best mcast next-hop
'[x/y]' denotes [preference/metric]
'%<string>' in via output denotes VRF <string>

10.0.0.0/27, ubest/mbest: 1/0, attached, direct
*via 10.0.0.30, vlan9, [1/0], 12:18:46, direct
10.0.0.1/32, ubest/mbest: 3/0
*via 10.0.75.29, eth1/99.3, [115/12], 12:13:51, isis-isis_infra, L1
*via 10.0.75.30, eth1/101.5, [115/12], 12:13:51, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/12], 12:13:44, isis-isis_infra, L1
10.0.0.3/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/12], 00:33:10, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/12], 00:33:10, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/12], 00:33:10, isis-isis_infra, L1
10.0.0.30/32, ubest/mbest: 1/0, attached
*via 10.0.0.30, vlan9, [1/0], 12:18:46, local
10.0.0.32/32, ubest/mbest: 2/0, attached, direct
*via 10.0.0.32, lo1023, [1/0], 12:13:45, local
*via 10.0.0.32, lo1023, [1/0], 12:13:45, direct
10.0.0.64/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:13:51, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/2], 12:13:49, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:13:44, isis-isis_infra, L1
10.0.0.65/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:13:51, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/2], 12:13:49, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:13:44, isis-isis_infra, L1
10.0.36.65/32, ubest/mbest: 2/0
*via 10.0.75.29, eth1/99.3, [115/2], 12:13:49, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:13:44, isis-isis_infra, L1
10.0.36.66/32, ubest/mbest: 2/0
*via 10.0.75.29, eth1/99.3, [115/2], 12:13:49, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:13:44, isis-isis_infra, L1
10.0.36.69/32, ubest/mbest: 1/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:13:25, isis-isis_infra, L1
10.0.36.70/32, ubest/mbest: 1/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:13:25, isis-isis_infra, L1
10.0.75.24/32, ubest/mbest: 2/0, attached, direct
*via 10.0.75.24, lo0, [1/0], 12:13:58, local
*via 10.0.75.24, lo0, [1/0], 12:13:58, direct
10.0.75.25/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 11:52:58, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 11:52:58, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 11:52:58, isis-isis_infra, L1
10.0.75.26/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:13:51, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:13:35, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:13:35, isis-isis_infra, L1
10.0.75.27/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 00:20:22, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 00:20:22, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 00:20:22, isis-isis_infra, L1
10.0.75.28/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:13:51, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:13:51, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:13:44, isis-isis_infra, L1
10.0.75.29/32, ubest/mbest: 2/0
*via 10.0.75.29, eth1/99.3, [115/2], 12:13:52, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/2], 12:13:44, isis-isis_infra, L1
10.0.75.30/32, ubest/mbest: 1/0
*via 10.0.75.30, eth1/101.5, [115/2], 12:13:51, isis-isis_infra, L1
10.0.75.31/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:13:51, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:13:51, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:13:44, isis-isis_infra, L1
10.0.106.0/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:10:06, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:10:06, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:10:06, isis-isis_infra, L1
10.0.106.1/32, ubest/mbest: 3/0
*via 10.0.75.30, eth1/101.5, [115/3], 12:10:08, isis-isis_infra, L1
*via 10.0.75.29, eth1/98.2, [115/3], 12:10:08, isis-isis_infra, L1
*via 10.0.75.29, eth1/99.3, [115/3], 12:10:08, isis-isis_infra, L1
10.0.106.3/32, ubest/mbest: 2/0, attached, direct
*via 10.0.106.3, lo1, [1/0], 12:10:08, local
*via 10.0.106.3, lo1, [1/0], 12:10:08, direct

show ip static-route

show ip static-route [ vrf { all | vrf-name } ]

Syntax Description

show

Show running system information

ip

Display IP information

static-route

Display configured static routes

vrf

Display per-VRF information

all

Display all VRFs

vrf-name

Name of the VRF

Examples

pod1-leaf1# show ip static-route vrf overlay-1

Static-route for VRF "overlay-1"(4)
IPv4 Unicast Static Routes:
10.0.0.2/32, configured nh: 10.0.0.2
(not installed in urib)
rnh(not installed in urib)

show isis adjacency vrf

show isis adjacency [ system-id sid ] [interface] [detail] vrf { all | vrf-name }

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

adjacency

Display IS-IS adjacency information

interface

IS-IS interface

system-id

Hostname or System ID

sid

Hostname or System ID (in the form of XXXX.XXXX.XXXX)

detail

Display IS-IS detail adjacency information

vrf

VRF name

all

Display information for all VRFs

vrf-name

VRF Name

Examples

pod1-leaf1# show isis adjacency vrf all

IS-IS process: isis_infra VRF:overlay-1
IS-IS adjacency database:
System ID         SNPA            Level  State  Hold Time  Interface
7800.0000.0000     N/A            1      UP     00:00:50   Ethernet1/101.5
7900.0000.0000     N/A            1      UP     00:00:55   Ethernet1/99.3
7900.0000.0000     N/A            1      UP     00:00:59   Ethernet1/98.2

pod1-leaf1# show isis adjacency system-id fc03.0000.0000 vrf overlay-1

IS-IS process: isis_infra VRF:overlay-1
IS-IS adjacency database:
System ID         SNPA            Level  State  Hold Time  Interface
FC03.0000.0000     N/A            1      UP     00:00:19   Ethernet3/31.31

pod1-leaf1# show isis adjacency detail vrf overlay-1

IS-IS process: isis_infra VRF:overlay-1
IS-IS adjacency database:
System ID         SNPA            Level  State  Hold Time  Interface
F903.0000.0000     N/A            1      UP     00:00:14   Ethernet4/33.69
Up/Down transitions: 0, Last transition: 02:06:04 ago
Circuit Type: L1
IPv4 Address: 10.0.20.95
FA03.0000.0000     N/A            1      UP     00:00:22   Ethernet3/33.33
Up/Down transitions: 0, Last transition: 02:06:03 ago
Circuit Type: L1
IPv4 Address: 10.0.20.90
FB03.0000.0000     N/A            1      UP     00:00:14   Ethernet4/31.67
Up/Down transitions: 0, Last transition: 02:06:04 ago
Circuit Type: L1
IPv4 Address: 10.0.20.89
FC03.0000.0000     N/A            1      UP     00:00:20   Ethernet3/31.31
Up/Down transitions: 0, Last transition: 02:06:00 ago
Circuit Type: L1
IPv4 Address: 10.0.20.91

show isis database vrf

show isis database [level-1] [lid] vrf { all | vrf-name }

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

database

Display IS-IS database information

level-1

level-1

lid

Type: lsp_id

LSP ID in the form of XXXX.XXXX.XXXX.XX-XX

vrf

VRF name

all

Display information for all VRFs

vrf-name

Type: string

Specify VRF Name

show isis dteps vrf

show isis dteps vrf { all | vrf-name }

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

dteps

ISIS Dynamic Tunnel EndPoint database

vrf

VRF name

all

Display information for all VRFs

vrf-name

Type: string

Specify VRF Name

Examples

pod1-leaf1# show isis dteps vrf overlay-1

IS-IS Dynamic Tunnel End Point (DTEP) database:
DTEP-Address       Role    Encapsulation   Type
10.0.67.67         LEAF    N/A             PHYSICAL
10.0.20.95         LEAF    N/A             PHYSICAL
10.0.20.90         LEAF    N/A             PHYSICAL
10.0.67.66         LEAF    N/A             PHYSICAL
10.0.20.91         LEAF    N/A             PHYSICAL
10.0.20.89         LEAF    N/A             PHYSICAL
10.0.67.64         SPINE   N/A             PHYSICAL,PROXY-ACAST-V4
10.0.67.65         SPINE   N/A             PHYSICAL,PROXY-ACAST-MAC
10.0.20.93         SPINE   N/A             PHYSICAL
10.0.20.94         SPINE   N/A             PHYSICAL

show isis interface vrf

show isis interface [ level-1 | brief | intf_arg ] vrf { all | vrf-name }

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

interface

Display IS-IS interface information

level-1

Display Level-1 interfaces

brief

Brief display of IS-IS interfaces

intf_arg

Type: interface

IS-IS interface

vrf

VRF name

all

Display information for all VRFs

vrf-name

Type: string

Specify VRF Name

Examples

pod1-leaf1# show isis interface brief vrf overlay-1

IS-IS process: isis_infra VRF: overlay-1
Interface    Type  Idx State        Circuit   MTU  Metric  Priority  Adjs/AdjsUp
L1  L2  L1  L2    L1    L2
loopback0 LOOP   2    Down//Ready  0x01/L1  0 1  1   64  64    0/0   0/0
loopback1 LOOP   3    Down//Ready  0x01/L1  0 1  1   64  64    0/0   0/0
loopback2 LOOP   4    Down//Ready  0x01/L1  0 1  1   64  64    0/0   0/0
loopback3 LOOP   5    Down//Ready  0x01/L1  0 1  1   64  64    0/0   0/0
loopback4 LOOP   6    Down//Ready  0x01/L1  0 1  1   64  64    0/0   0/0
Ethernet3/31.31 P2P   7    Up//Ready  0x01/L1  9150 1 1 64 64 1/1 0/0
Ethernet3/33.33 P2P   8    Up//Ready  0x01/L1  9150 1 1 64 64 1/1 0/0
Ethernet4/31.67 P2P   9    Up//Ready  0x01/L1  9150 1 1 64 64 1/1 0/0
Ethernet4/33.69 P2P   10    Up//Ready  0x01/L1  9150 1 1 64 64 1/1 0/0

pod1-leaf1# show isis interface Ethernet3/31.31 vrf overlay-1

IS-IS process: isis_infra VRF: overlay-1
Ethernet3/31.31, Interface status: protocol-up/link-up/admin-up
Extended Local Circuit ID: 0x1a11e01f, P2P Circuit ID: 0000.0000.0000.00
LSP interval: 33ms, MTU: 9150, IIH Padding:  Never
P2P Adjs: 1, AdjsUp: 1, Priority 64
Hello Interval: 10, Multi: 3, Next IIH: N/A
Level   Adjs   AdjsUp  Metric   CSNP  Next CSNP  Last LSP ID
1          1        1       1     60   N/A    ffff.ffff.ffff.ff-ff

pod1-leaf1# show isis interface level-1 vrf overlay-1

IS-IS process: isis_infra VRF: overlay-1
loopback0, Interface status: protocol-up/link-up/admin-up
ISIS interface operation state : no/Ready
Interface is disabled because :
Passive level: level-1-2
Level      Metric
1              1
loopback1, Interface status: protocol-up/link-up/admin-up
ISIS interface operation state : no/Ready
Interface is disabled because :
Passive level: level-1-2
Level      Metric
1              1
loopback2, Interface status: protocol-up/link-up/admin-up
ISIS interface operation state : no/Ready
Interface is disabled because :
Passive level: level-1-2
Level      Metric
1              1
loopback3, Interface status: protocol-up/link-up/admin-up
ISIS interface operation state : no/Ready
Interface is disabled because :
Passive level: level-1-2
Level      Metric
1              1
loopback4, Interface status: protocol-up/link-up/admin-up
ISIS interface operation state : no/Ready
Interface is disabled because :
Passive level: level-1-2
Level      Metric
1              1
Ethernet3/31.31, Interface status: protocol-up/link-up/admin-up
Extended Local Circuit ID: 0x1a11e01f, P2P Circuit ID: 0000.0000.0000.00
LSP interval: 33ms, MTU: 9150, IIH Padding:  Never
P2P Adjs: 1, AdjsUp: 1, Priority 64
Hello Interval: 10, Multi: 3, Next IIH: N/A
Level   Adjs   AdjsUp  Metric   CSNP  Next CSNP  Last LSP ID
1          1        1       1     60   N/A    ffff.ffff.ffff.ff-ff

Ethernet3/33.33, Interface status: protocol-up/link-up/admin-up
Extended Local Circuit ID: 0x1a120021, P2P Circuit ID: 0000.0000.0000.00
LSP interval: 33ms, MTU: 9150, IIH Padding:  Never
P2P Adjs: 1, AdjsUp: 1, Priority 64
Hello Interval: 10, Multi: 3, Next IIH: N/A
Level   Adjs   AdjsUp  Metric   CSNP  Next CSNP  Last LSP ID
1          1        1       1     60   N/A    ffff.ffff.ffff.ff-ff

Ethernet4/31.67, Interface status: protocol-up/link-up/admin-up
Extended Local Circuit ID: 0x1a19e043, P2P Circuit ID: 0000.0000.0000.00
LSP interval: 33ms, MTU: 9150, IIH Padding:  Never
P2P Adjs: 1, AdjsUp: 1, Priority 64
Hello Interval: 10, Multi: 3, Next IIH: N/A
Level   Adjs   AdjsUp  Metric   CSNP  Next CSNP  Last LSP ID
1          1        1       1     60   N/A    ffff.ffff.ffff.ff-ff

Ethernet4/33.69, Interface status: protocol-up/link-up/admin-up
Extended Local Circuit ID: 0x1a1a0045, P2P Circuit ID: 0000.0000.0000.00
LSP interval: 33ms, MTU: 9150, IIH Padding:  Never
P2P Adjs: 1, AdjsUp: 1, Priority 64
Hello Interval: 10, Multi: 3, Next IIH: N/A
Level   Adjs   AdjsUp  Metric   CSNP  Next CSNP  Last LSP ID
1          1        1       1     60   N/A    ffff.ffff.ffff.ff-ff

show isis protocol vrf

show isis protocol vrf [ all | vrf-name ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

protocol

Display IS-IS process information

vrf

VRF name

all

Display information for all VRFs

vrf-name

Type: string

Specify VRF Name

Examples

pod1-leaf1# show isis protocol vrf overlay-1

ISIS process : isis_infra
VRF: overlay-1
System ID : FD:03:00:00:00:00  IS-Type :  L1
SAP : 412  Queue Handle : 14
Maximum LSP MTU: 1492
Metric-style : advertise(narrow, wide), accept(narrow, wide)
Area address(es) :
01
Process is up and running
Interfaces supported by IS-IS :
loopback0
Ethernet3/31.31
Ethernet3/33.33
Ethernet4/33.69
Ethernet4/31.67
loopback1
loopback2
loopback3
loopback4
Address family IPv4 unicast :
Number of interface : 9
Adjacency check disabled
Distance : 115

show isis route vrf

show isis route vrf [ all | vrf-name ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

route

Display IS-IS route information

vrf

VRF name

all

Display information for all VRFs

vrf-name

Type: string

Specify VRF Name

show isis statistics vrf

show isis statistics vrf { all | vrf-name }

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

statistics

Display IS-IS protocol statistics

vrf

VRF statistics

all

Display information for all VRFs

vrf-name

VRF Name

Examples

pod1-leaf1# show isis statistics vrf overlay-1

IS-IS Process:      isis_infra
VRF:                overlay-1
SPF calculations:   28
LSPs sourced:       16
LSPs refreshed:     1280
LSPs purged:        0

show isis traffic vrf

show isis traffic [interface] vrf { all | vrf-name }

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

traffic

Display IS-IS traffic information

interface

Type: interface

IS-IS interface

vrf

VRF name

all

Display information for all VRFs

vrf-name

Type: string

Specify VRF Name

Examples

pod1-leaf1# show isis traffic vrf overlay-1

IS-IS process: isis-infra
VRF: overlay-1
PDU        Received        Sent  RcvAuthErr  OtherRcvErr ReTransmit
LAN-IIH           0           0           0           0        n/a
P2P-IIH        3209        3223           0           0        n/a
CSNP              4          19           0           0        n/a
PSNP              3         167           0           0        n/a
LSP             203          10           0           0          0
FASTLSP           0         114         n/a         n/a        n/a
FASTCSNP          0         115         n/a         n/a        n/a

pod1-leaf1# show isis traffic Ethernet3/31.31 vrf overlay-1

IS-IS process: isis-infra
VRF: overlay-1
PDU        Received        Sent  RcvAuthErr  OtherRcvErr ReTransmit
LAN-IIH           0           0           0           0        n/a
P2P-IIH         802         806           0           0        n/a
CSNP              1           5           0           0        n/a
PSNP              1          41           0           0        n/a
LSP              46           7           0           0          0
FASTLSP           0           0         n/a         n/a        n/a
FASTCSNP          0           0         n/a         n/a        n/a

show lacp counters

show lacp counters [ interface arg0 ]

Syntax Description

show

Show running system information

lacp

LACP protocol

counters

LACP counters

interface

Specify a port-channel

arg0

Type: interface_mrange

Port Channel interface

show lacp interface

show lacp interface interface-id

Syntax Description

show

Show running system information

lacp

LACP protocol

interface

Specify an interface

interface-id

Interface identifier

Examples

pod1-leaf1# show lacp interface e1/14

Interface Ethernet1/14 is up
Channel group is 13 port channel is Po13
PDUs sent: 1493
PDUs rcvd: 1495
Markers sent: 0
Markers rcvd: 0
Marker response sent: 0
Marker response rcvd: 0
Unknown packets rcvd: 0
Illegal packets rcvd: 0
Lag Id: [ [(80a2, 00-23-04-ee-be-03, 82af, 8000, 10e), (8000, 54-7f-ee-ee-5a-c1, d, 8000, 10e)] ]
Operational as aggregated link since  Sat Jun 07 06:15:39 2014

Local Port: Eth1/14   MAC Address= 7c-69-f6-10-3d-73
System Identifier=0x8000,7c-69-f6-10-3d-73
Port Identifier=0x8000,0x10e
Operational key=33455
LACP_Activity=active
LACP_Timeout=Long Timeout (30s)
Synchronization=IN_SYNC
Collecting=true
Distributing=true
Partner information refresh timeout=Long Timeout (90s)
Actor Admin State=(Ac-1:To-0:Ag-1:Sy-1:Co-1:Di-1:De-0:Ex-0)
Actor Oper State=Ac-1:To-0:Ag-1:Sy-1:Co-1:Di-1:De-0:Ex-0
Neighbor: 0x10e
MAC Address= 54-7f-ee-ee-5a-c1
System Identifier=0x8000,54-7f-ee-ee-5a-c1
Port Identifier=0x8000,0x10e
Operational key=13
LACP_Activity=active
LACP_Timeout=Long Timeout (30s)
Synchronization=IN_SYNC
Collecting=true
Distributing=true
Partner Admin State=(Ac-1:To-0:Ag-1:Sy-1:Co-1:Di-1:De-0:Ex-0)
Partner Oper State=Ac-1:To-0:Ag-1:Sy-1:Co-1:Di-1:De-0:Ex-0
Aggregate or Individual(True=1)= 1

show lacp neighbor

show lacp neighbor [ interface pc-id ]

Syntax Description

show

Show running system information

lacp

LACP protocol

neighbor

LACP interface neighbor

interface

Specify a port-channel

pc-id

Port Channel interface identifier

Examples

pod1-leaf1# show lacp neighbor

Flags:  S - Device is sending Slow LACPDUs F - Device is sending Fast LACPDUs
A - Device is in Active mode       P - Device is in Passive mode
port-channel1 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/18     0x8000,54-7f-ee-ee-5a-c10x112           43914       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0x11                        0x3d

port-channel2 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/12     0x8000,54-7f-ee-ee-5a-c10x10c           43915       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0xb                         0x3d

port-channel3 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/16     0x8000,54-7f-ee-ee-5a-c10x110           43924       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0xf                         0x3d

port-channel4 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/11     0x8000,54-7f-ee-ee-5a-c10x10b           43915       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0xa                         0x3d

port-channel5 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/17     0x8000,54-7f-ee-ee-5a-c10x111           43924       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0x10                        0x3d

port-channel8 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/4      0x8000,54-7f-ee-ee-5a-c10x104           44052       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0x3                         0x3d

Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/5      0x8000,54-7f-ee-ee-5a-c10x105           44051       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0x3                         0x3d

port-channel9 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/13     0x8000,54-7f-ee-ee-5a-c10x10d           43924       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0xc                         0x3d

port-channel13 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/14     0x8000,54-7f-ee-ee-5a-c10x10e           43924       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0xd                         0x3d

port-channel14 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/15     0x8000,54-7f-ee-ee-5a-c10x10f           43915       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0xe                         0x3d

port-channel15 neighbors
Partner's information
Partner                Partner                     Partner
Port        System ID              Port Number     Age         Flags
Eth1/10     0x8000,54-7f-ee-ee-5a-c10x10a           43925       SA

LACP Partner           Partner                     Partner
Port Priority          Oper Key                    Port State
32768                  0x9                         0x3d

show lacp port-channel

show lacp port-channel [ interface pc-id ]

Syntax Description

show

Show running system information

lacp

LACP protocol

port-channel

LACP port-channels

interface

Specify a port-channel

pc-id

Port Channel interface identifier

Examples

pod1-leaf1# show lacp port-channel

port-channel1
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x82b0
Operational key=0x82b0
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0x11
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/18

port-channel2
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x815c
Operational key=0x815c
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0xb
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/12

port-channel3
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x82ad
Operational key=0x82ad
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0xf
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/16

port-channel4
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x8159
Operational key=0x8159
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0xa
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/11

port-channel5
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x815b
Operational key=0x815b
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0x10
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/17

port-channel8
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x8003
Operational key=0x8003
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0x3
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/4 Eth1/5

port-channel9
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x815d
Operational key=0x815d
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0xc
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/13

port-channel13
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x82af
Operational key=0x82af
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0xd
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/14

port-channel14
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x815a
Operational key=0x815a
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0xe
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/15

port-channel15
System Mac=7c-69-f6-10-3d-73
Local System Identifier=0x8000,7c-69-f6-10-3d-73
Admin key=0x8002
Operational key=0x8002
Partner System Identifier=0x8000,54-7f-ee-ee-5a-c1
Operational key=0x9
Max delay=0
Aggregate or individual=1
Member Port List= Eth1/10

show lacp system-identifier

show lacp system-identifier

Syntax Description

show

Show running system information

lacp

LACP protocol

system-identifier

Show system-identifier information

Examples

pod1-leaf1# show lacp system-identifier

32768,7c-69-f6-10-3d-73

show lldp entry

show lldp entry [sys-name]

Syntax Description

show

Show running system information

lldp

Show information about lldp

entry

Show lldp entry information

sys-name

Type: string

Peer's System name

show lldp interface

show lldp interface arg0

Syntax Description

show

Show running system information

lldp

Show information about lldp

interface

Show lldp interface information

arg0

Type: interface

Interface

show lldp neighbors

show lldp neighbors [ interface arg0 ] [detail]

Syntax Description

show

Show running system information

lldp

Show information about lldp

neighbors

Show lldp neighbor information

interface

Show lldp neighbor information on an interface

arg0

Type: interface

Interface

detail

Show lldp neighbor detail information

Examples

This example shows how to display summary information about all LLDP neighbors:

pod1-leaf1# show lldp neighbors

Capability codes:
(R) Router, (B) Bridge, (T) Telephone, (C) DOCSIS Cable Device
(W) WLAN Access Point, (P) Repeater, (S) Station, (O) Other
Device ID            Local Intf      Hold-time  Capability  Port ID
ifav32-ifc1           Eth1/1          120                    90:e2:ba:40:75:5c
ifav32-n3k-1          Eth1/17         120        B           Eth1/17
ifav32-n3k-1          Eth1/18         120        B           Eth1/18
ifav32-n3k-1          Eth1/19         120        B           Eth1/19
ifav32-n3k-1          Eth1/20         120        B           Eth1/20
ifav32-n3k-1          Eth1/31         120        B           Eth1/31
ifav32-n3k-1          Eth1/32         120        B           Eth1/32
ifav32-spine1         Eth1/49         120        BR          Eth1/33
ifav32-spine1         Eth1/50         120        BR          Eth1/34
Total entries displayed: 9

This example shows how to display detailed information about all LLDP neighbors:

pod1-leaf1# show lldp neighbors detail

Capability codes:
(R) Router, (B) Bridge, (T) Telephone, (C) DOCSIS Cable Device
(W) WLAN Access Point, (P) Repeater, (S) Station, (O) Other
Device ID            Local Intf      Hold-time  Capability  Port ID

Chassis id: 90:e2:ba:40:75:5c
Port id: 90:e2:ba:40:75:5c
Local Port id: Eth1/1
Port Description: eth2-1
System Name: ifav32-ifc1
System Description: topology/pod-1/node-1
Time remaining: 96 seconds
System Capabilities:
Enabled Capabilities:
Management Address: 10.0.0.1
Vlan ID: not advertised

Chassis id: 4c:00:82:ca:e4:58
Port id: Eth1/17
Local Port id: Eth1/17
Port Description: Ethernet1/17
System Name: ifav32-n3k-1
System Description: Cisco Nexus Operating System (NX-OS) Software 6.0(2)U1(1a) TAC support: http://www.cisco.com/tac Copyright (c) 2002-2013, Cisco
Time remaining: 105 seconds
System Capabilities: B
Enabled Capabilities: B
Management Address: 172.23.48.250
Vlan ID: not advertised

Chassis id: 4c:00:82:ca:e4:59
Port id: Eth1/18
Local Port id: Eth1/18
Port Description: Ethernet1/18
System Name: ifav32-n3k-1
System Description: Cisco Nexus Operating System (NX-OS) Software 6.0(2)U1(1a) TAC support: http://www.cisco.com/tac Copyright (c) 2002-2013, Cisco
Time remaining: 114 seconds
System Capabilities: B
Enabled Capabilities: B
Management Address: 172.23.48.250
Vlan ID: not advertised

Chassis id: 4c:00:82:ca:e4:5a
Port id: Eth1/19
Local Port id: Eth1/19
Port Description: Ethernet1/19
System Name: ifav32-n3k-1
System Description: Cisco Nexus Operating System (NX-OS) Software 6.0(2)U1(1a) TAC support: http://www.cisco.com/tac Copyright (c) 2002-2013, Cisco
Time remaining: 114 seconds
System Capabilities: B
Enabled Capabilities: B
Management Address: 172.23.48.250
Vlan ID: 1

Chassis id: 4c:00:82:ca:e4:5b
Port id: Eth1/20
Local Port id: Eth1/20
Port Description: Ethernet1/20
System Name: ifav32-n3k-1
System Description: Cisco Nexus Operating System (NX-OS) Software 6.0(2)U1(1a) TAC support: http://www.cisco.com/tac Copyright (c) 2002-2013, Cisco
Time remaining: 114 seconds
System Capabilities: B
Enabled Capabilities: B
Management Address: 172.23.48.250
Vlan ID: 1

Chassis id: 4c:00:82:ca:e4:66
Port id: Eth1/31
Local Port id: Eth1/31
Port Description: Ethernet1/31
System Name: ifav32-n3k-1
System Description: Cisco Nexus Operating System (NX-OS) Software 6.0(2)U1(1a) TAC support: http://www.cisco.com/tac Copyright (c) 2002-2013, Cisco
Time remaining: 113 seconds
System Capabilities: B
Enabled Capabilities: B
Management Address: 172.23.48.250
Vlan ID: 1

Chassis id: 4c:00:82:ca:e4:67
Port id: Eth1/32
Local Port id: Eth1/32
Port Description: Ethernet1/32
System Name: ifav32-n3k-1
System Description: Cisco Nexus Operating System (NX-OS) Software 6.0(2)U1(1a) TAC support: http://www.cisco.com/tac Copyright (c) 2002-2013, Cisco
Time remaining: 113 seconds
System Capabilities: B
Enabled Capabilities: B
Management Address: 172.23.48.250
Vlan ID: 1

Chassis id: 00:3a:99:fe:17:d4
Port id: Eth1/33
Local Port id: Eth1/49
Port Description: topology/pod-1/node-18/sys/conng/path-[eth1/33]
System Name: ifav32-spine1
System Description: topology/pod-1/node-18
Time remaining: 92 seconds
System Capabilities: B, R
Enabled Capabilities: B, R
Management Address: 172.23.50.238
Vlan ID: not advertised

Chassis id: 00:3a:99:fe:17:d5
Port id: Eth1/34
Local Port id: Eth1/50
Port Description: topology/pod-1/node-18/sys/conng/path-[eth1/34]
System Name: ifav32-spine1
System Description: topology/pod-1/node-18
Time remaining: 97 seconds
System Capabilities: B, R
Enabled Capabilities: B, R
Management Address: 172.23.50.238
Vlan ID: not advertised

Total entries displayed: 9

show lldp timers

show lldp timers

Syntax Description

show

Show running system information

lldp

Show information about lldp

timers

Show lldp timers

Examples

pod1-leaf1# show lldp timers

LLDP Timers:

Holdtime in seconds: 120
Reinit-time in seconds: 2
Transmit interval in seconds: 30

show lldp tlv-select

show lldp tlv-select

Syntax Description

show

Show running system information

lldp

Show information about lldp

tlv-select

Show lldp tlv-select

Examples

pod1-leaf1# show lldp tlv-select

management-address
port-description
port-vlan
system-capabilities
system-description
system-name

show lldp traffic

show lldp traffic [ interface interface-id ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

traffic

Show lldp counters

interface

Show lldp interface information

interface-id

Interface identifier

Examples

pod1-leaf1# show lldp traffic

LLDP traffic statistics:

Total frames transmitted: 24624
Total entries aged: 0
Total frames received: 24702
Total frames received in error: 0
Total frames discarded: 0
Total unrecognized TLVs: 0

show locator-led status

show locator-led status

Syntax Description

show

Show running system information

locator-led

Blink locator LED on device

status

Status

Examples

Spine1# show locator-led status

Component        Locator LED Status
--------------------------------------
Chassis          off
Module 1         off
Module 4         off
Module 22        off
Module 24        off
Module 26        off
Module 27        off
Module 29        off
Module 30        off
Fan 1            off
Fan 2            off
Fan 3            off

show mac address-table

show mac address-table [ static | dynamic ] [ address mac-addr ] [ vlan id ] [ interface interface-name ]

Syntax Description

show

MAC configuration commands

mac

Mac addr information

address-table

MAC Address Table

static

Display Static Entries

dynamic

Display Dynamic Entries

address1

address

vlan1

VLAN

address

address

interface

Interface

vlan

VLAN

mac-addr

Type: ethernet

MAC Address

id

Type: integer

VLAN ID

interface-name

Type: interface

Interface name

Usage Guidelines

This command shows all the MAC addresses, both static and dynamically learned, that are known to the switch. For each MAC address, the interface behind which the MAC is located is displayed. In the case of local MACs, the interface is either a physical port or port-channel, or a virtual port (FEX). In the case of virtual machines (VM), the tunnel interface of the corresponding hypervisor is displayed. In the case of remote MACs, the tunnel interface to the leaf/ToR where the MAC is located is displayed.

Examples

This example shows how to display the MAC address table:

pod1-leaf1# show mac address-table

Legend:
* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC
age - seconds since last seen,+ - primary entry using vPC Peer-Link,
(T) - True, (F) - False
VLAN     MAC Address      Type      age     Secure NTFY Ports/SWID.SSID.LID
---------+-----------------+--------+---------+------+----+------------------

* 9        0000.1d00.0030    dynamic      -       F    F    tunnel16431
* 9        0000.1a00.002d    dynamic      -       F    F    tunnel16430
* 201      5254.01cd.09eb    dynamic      -       F    F    eth1/1
* 201      5254.03cd.09eb    dynamic      -       F    F    po7

show module

show module [arg0]

Syntax Description

show

Show Information

module

Module

arg0

Type: integer

enter the module number

Examples

pod1-spine1# show module

Mod  Ports  Module-Type                         Model              Status
---  -----  ----------------------------------- ------------------ ----------
1    36     36p 40G Ethernet Module             N9K-X9736PQ        ok
2    36     36p 40G Ethernet Module             N9K-X9736PQ        ok
3    36     36p 40G Ethernet Module             N9K-X9736PQ        ok
4    36     36p 40G Ethernet Module             N9K-X9736PQ        ok
8    36     36p 40G Ethernet Module             N9K-X9736PQ        ok
21   0      Fabric Module                       N9K-C9508-FM       ok
22   0      Fabric Module                       N9K-C9508-FM       ok
23   0      Fabric Module                       N9K-C9508-FM       ok
24   0      Fabric Module                       N9K-C9508-FM       ok
26   0      Fabric Module                       N9K-C9508-FM       ok
27   0      Supervisor Module                   N9K-SUP-A          active
29   0      System Controller                   N9K-SC-A           active
30   0      System Controller                   N9K-SC-A           standby

Mod  Sw              Hw
---  --------------  ------
1    6.1(1.748)      0.3020
2    6.1(1.748)      0.3020
3    6.1(1.748)      0.3020
4    6.1(1.748)      0.3020
8    6.1(1.748)      0.3020
21   6.1(1.748)      0.1011
22   6.1(1.748)      1.1
23   6.1(1.748)      0.1011
24   6.1(1.748)      0.1011
26   6.1(1.748)      1.1
27   6.1(1.748)      1.0
29   6.1(1.748)      0.2010
30   6.1(1.748)      0.2020

Mod  MAC-Address(es)                         Serial-Num
---  --------------------------------------  ----------
1    e4-c7-22-f7-80-0c to e4-c7-22-f7-80-34  SAL1745FYAZ
2    78-da-6e-74-52-d0 to 78-da-6e-74-52-f8  SAL1746G53F
3    78-da-6e-73-cb-e4 to 78-da-6e-73-cc-0d  SAL1745FYAV
4    78-da-6e-73-fa-8c to 78-da-6e-73-fa-b4  SAL1746G56U
8    78-da-6e-74-76-c4 to 78-da-6e-74-76-ec  SAL1746G542
21   00-00-00-00-00-00 to 00-00-00-00-00-00  SAL17163BM2
22   00-00-00-00-00-00 to 00-00-00-00-00-00  SAL1745G1TS
23   00-00-00-00-00-00 to 00-00-00-00-00-00  SAL17194HWI
24   00-00-00-00-00-00 to 00-00-00-00-00-00  SAL17194HUD
26   00-00-00-00-00-00 to 00-00-00-00-00-00  SAL1745G1UY
27   c0-67-af-a0-d9-1e to c0-67-af-a0-d9-30  SAL1747GLPX
29   00-00-00-00-00-00 to 00-00-00-00-00-00  SAL17173TFL
30   00-00-00-00-00-00 to 00-00-00-00-00-00  SAL171225YGG

show module fex

show module fex { all | fexid }

Syntax Description

show

Show running system information

module

Show module information

fex

Show fex module information

fexid

Type: integer

Enter FEX identifier

all

Show information for all FEX

show monitor

show monitor

Syntax Description

show

Show running system information

monitor

Show SPAN information

show monitor session

show monitor session { all | session_id | range session_range } [ brief | extended ]

Syntax Description

show

Show running system information

monitor

Show SPAN information

session

Show session information

all

All sessions

session_id

Session Id 1-48

range

Specify a range

session_range

Session range(s): 1-4, 7, or 1-5,7-19

brief

Brief information

extended

Session extended info like encaps, vlan filters per interfaces

Examples

pod1-leaf1# show monitor session 1 extended

session 1
---------------
description       : Span session 1
type              : erspan
version           : 2
state             : up (active)
erspan-id         : 1
granularity       :
vrf-name          : Nikola:spanCtx
acl-name          :
ip-ttl            : 64
ip-dscp           : 46
destination-ip    : 5.1.1.2/32
origin-ip         : 5.1.1.1
mtu               : 1518
mode              : access
source intf       :
rx            :
tx            :
both          :
source VLANs      :
rx            : 1146(vlan-1851)
tx            : 1146(vlan-1851)
both          : 1146(vlan-1851)
filter VLANs      :
rx            :
tx            :
both          :

show ntp authentication-keys

show ntp authentication-keys

Syntax Description

show

Show running system information

ntp

Show NTP information

authentication-keys

Display authentication keys

show ntp authentication-status

show ntp authentication-status

Syntax Description

show

Show running system information

ntp

Show NTP information

authentication-status

NTP Authentication Status

show ntp peer-status

show ntp peer-status

Syntax Description

show

Show running system information

ntp

Show NTP information

peer-status

Show the status for all the server/peers

Examples

pod1-leaf1# show ntp peer-status

Total peers : 2
* - selected for sync, + - peer mode(active),
- - peer mode(passive), = - polled in client mode
remote                local                st   poll   reach delay   vrf
-------------------------------------------------------------------------------
=10.81.254.202           0.0.0.0               1    64     377   0.07716 management
*10.81.254.131           0.0.0.0               1    64     377   0.07703 management

show ntp peers

show ntp peers

Syntax Description

show

Show running system information

ntp

Show NTP information

peers

Show all the peers.

Examples

pod1-leaf1# show ntp peers

--------------------------------------------------
Peer IP Address               Serv/Peer
--------------------------------------------------
10.81.254.202                 Server (configured)
10.81.254.131                 Server (configured)

show ntp statistics peer ipaddr

show ntp statistics peer ipaddr ip-address

Syntax Description

show

Show running system information

ntp

Show NTP information

statistics

Show the NTP statistics

peer

Show the per-peer statistics counter of a peer.

ipaddr

Peer's IP address

ip-address

IP address

Examples

pod1-leaf1# show ntp statistics peer ipadd 10.81.254.202

remote host:          10.81.254.202
local interface:      Unresolved
time last received:   20s
time until next send: 43s
reachability change:  44675s
packets sent:         2656
packets received:     2648
bad authentication:   0
bogus origin:         0
duplicate:            0
bad dispersion:       0
bad reference time:   0
candidate order:      4

show ntp trusted-keys

show ntp trusted-keys

Syntax Description

show

Show running system information

ntp

Show NTP information

trusted-keys

Display trusted keys

show port-channel capacity

show port-channel capacity

Syntax Description

show

Show running system information

port-channel

Show port-channel information

capacity

Capacity information

show port-channel compatibility-parameters

show port-channel compatibility-parameters

Syntax Description

show

Show running system information

port-channel

Show port-channel information

compatibility-parameters

Show compatibility parameters

Examples

pod1-leaf1# show port-channel compatibility-parameters

* port mode

Members must have the same port mode configured, either E,F or AUTO. If
they are configured in AUTO port mode, they have to negotiate E or F mode
when they come up. If a member negotiates a different mode, it will be
suspended.

* speed

Members must have the same speed configured. If they are configured in AUTO
speed, they have to negotiate the same speed when they come up. If a member
negotiates a different speed, it will be suspended.

* MTU

Members have to have the same MTU configured. This only applies to ethernet
port-channel.

* MEDIUM

Members have to have the same medium type configured. This only applies to
ethernet port-channel.

* Span mode

Members must have the same span mode.

* load interval

Member must have same load interval configured.

* sub interfaces

Members must not have sub-interfaces.

* Duplex Mode

Members must have same Duplex Mode configured.

* Ethernet Layer

Members must have same Ethernet Layer (switchport/no-switchport) configured.

* Span Port

Members cannot be SPAN ports.

* Storm Control

Members must have same storm-control configured.

* Flow Control

Members must have same flowctrl configured.

* Capabilities

Members must have common capabilities.

* Capabilities speed

Members must have common speed capabilities.

* Capabilities duplex

Members must have common speed duplex capabilities.

* rate mode

Members must have the same rate mode configured.

* Capabilities FabricPath

Members must have common fabricpath capability.

* Port is PVLAN host

Port Channel cannot be created for PVLAN host

* 1G port is not capable of acting as peer-link

Members must be 10G to become part of a vPC peer-link.

* EthType

Members must have same EthType configured.

* shared interface

Members can not be shared-interfaces.

* Capabilities SpanDest

Members must be capable of span destination configuration

* Module Type Incompatible

Module type for interfaces is not compatible.

* Port Mode Fabricpath Incompatible

Members are Fabricpath Enforce locked, not compatible.

* Port auto negotiation Incompatible

Members must have same auto negotiation configured.

* port

Members port VLAN info.

* port

Members port does not exist.

* switching port

Members must be switching port, Layer 2.

* port access VLAN

Members must have the same port access VLAN.

* port native VLAN

Members must have the same port native VLAN.

* port allowed VLAN list

Members must have the same port allowed VLAN list.

* Members should have same fex config

Members must have same FEX configuration.

* FEX pinning max-links not one

FEX pinning max-links config is not one.

* Multiple port-channels with same Fex-id

Multiple port-channels to same FEX not allowed.

* Pinning Params

Members must have the same pinning parameters.

* All HIF member ports not in same pinning group

All HIF member ports not in same pinning group

* Slot in host vpc mode

Cannot add cfged slot member to fabric po vpc.

* Members in multiple FEX

Members must belong to same FEX.

* Members are of different type

Members must of same interface type.

* port egress queuing policy

10G port-channel members must have the same egress queuing policy as the
port-channel.

* Port Security policy

Members must have the same port-security enable status as port-channel

* Port priority-flow-control

PFC config should be the same for all the members

* Dot1x policy

Members must have host mode as multi-host with no mab configuration. Dot1X
cannot be enabled on members when Port Security is configured on port
channel

* PC Queuing policy

Queuing policy for Non-DCE PC should be non-dce

* PC Queuing policy

Queuing policy for the PC should be same as system queuing policy

* Emulated switch port type policy

vPC ports in emulated switch complex should be L2MP capable.

* VFC bound to port

Members cannot have VFCs bound to them.

* VFC bound to port channel

Port Channels that have VFCs bound to them cannot have more than one member

* VFC bound to FCoE capable port channel

Port Channels that have VFCs bound to them cannot have non fcoe capable
member

* VFC bound to FCoE capable port channel

Port Channels that have VFCs bound to them cannot have non fcoe licensed
member

* Fex ports for span

Port-Channel is already a SPAN source. Cannot add FEX ports connected
through                         Ricard to this PC

show port-channel database

show port-channel database [ interface interface-id ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

database

Show port-channel database

interface

Specify a port-channel

interface-id

Interface identifier

Examples

pod1-leaf1# show port-channel database

port-channel1
Last membership update is successful
1 ports in total, 1 ports up
First operational port is Ethernet1/18
Age of the port-channel is 0d:12h:29m:22s
Time since last bundle is 0d:12h:29m:21s
Last bundled member is Ethernet1/18
Ports:   Ethernet1/18    [active ] [up] *

port-channel2
Last membership update is successful
1 ports in total, 1 ports up
First operational port is Ethernet1/12
Age of the port-channel is 0d:12h:29m:22s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/12
Ports:   Ethernet1/12    [active ] [up] *

port-channel3
Last membership update is successful
1 ports in total, 1 ports up
First operational port is Ethernet1/16
Age of the port-channel is 0d:12h:29m:22s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/16
Ports:   Ethernet1/16    [active ] [up] *

port-channel4
Last membership update is successful
1 ports in total, 1 ports up
First operational port is Ethernet1/11
Age of the port-channel is 0d:12h:29m:21s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/11
Ports:   Ethernet1/11    [active ] [up] *

port-channel5
Last membership update is successful
1 ports in total, 1 ports up
First operational port is Ethernet1/17
Age of the port-channel is 0d:12h:29m:21s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/17
Ports:   Ethernet1/17    [active ] [up] *

port-channel6
Last membership update is successful
1 ports in total, 0 ports up
Age of the port-channel is 0d:12h:29m:21s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/26
Ports:   Ethernet1/26    [active ] [down]

port-channel8
Last membership update is successful
2 ports in total, 2 ports up
First operational port is Ethernet1/4
Age of the port-channel is 0d:12h:29m:21s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/5
Ports:   Ethernet1/4     [active ] [up] *
Ethernet1/5     [active ] [up]

port-channel9
Last membership update is successful
1 ports in total, 1 ports up
First operational port is Ethernet1/13
Age of the port-channel is 0d:12h:29m:21s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/13
Ports:   Ethernet1/13    [active ] [up] *

port-channel10
Last membership update is successful
1 ports in total, 0 ports up
Age of the port-channel is 0d:12h:29m:21s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/25
Ports:   Ethernet1/25    [active ] [down]

port-channel11
Last membership update is successful
1 ports in total, 0 ports up
Age of the port-channel is 0d:12h:29m:21s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/19
Ports:   Ethernet1/19    [active ] [down]

port-channel12
Last membership update is successful
1 ports in total, 0 ports up
Age of the port-channel is 0d:12h:29m:21s
Time since last bundle is 0d:12h:29m:20s
Last bundled member is Ethernet1/27
Ports:   Ethernet1/27    [active ] [down]

port-channel13
Last membership update is successful
1 ports in total, 1 ports up
First operational port is Ethernet1/14
Age of the port-channel is 0d:12h:29m:22s
Time since last bundle is 0d:12h:29m:21s
Last bundled member is Ethernet1/14
Ports:   Ethernet1/14    [active ] [up] *

port-channel14
Last membership update is successful
1 ports in total, 1 ports up
First operational port is Ethernet1/15
Age of the port-channel is 0d:12h:29m:22s
Time since last bundle is 0d:12h:29m:21s
Last bundled member is Ethernet1/15
Ports:   Ethernet1/15    [active ] [up] *

port-channel15
Last membership update is successful
1 ports in total, 1 ports up
First operational port is Ethernet1/10
Age of the port-channel is 0d:12h:29m:22s
Time since last bundle is 0d:12h:29m:21s
Last bundled member is Ethernet1/10
Ports:   Ethernet1/10    [active ] [up] *

show port-channel summary

show port-channel summary [ interface interface-id ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

summary

Show port-channel summary

interface

Specify a port-channel

interface-id

Interface identifier

Examples

This example shows how to display a summary of information about current port-channels:

pod1-leaf1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)
I - Individual  H - Hot-standby (LACP only)
s - Suspended   r - Module-removed
S - Switched    R - Routed
U - Up (port-channel)
M - Not in use. Min-links not met
--------------------------------------------------------------------------------
Group Port-       Type     Protocol  Member Ports
Channel
--------------------------------------------------------------------------------
1     Po1(SU)     Eth      LACP      Eth1/18(P)
2     Po2(SU)     Eth      LACP      Eth1/12(P)
3     Po3(SU)     Eth      LACP      Eth1/16(P)
4     Po4(SU)     Eth      LACP      Eth1/11(P)
5     Po5(SU)     Eth      LACP      Eth1/17(P)
6     Po6(SD)     Eth      LACP      Eth1/26(D)
8     Po8(SU)     Eth      LACP      Eth1/4(P)    Eth1/5(P)
9     Po9(SU)     Eth      LACP      Eth1/13(P)
10    Po10(SD)    Eth      LACP      Eth1/25(D)
11    Po11(SD)    Eth      LACP      Eth1/19(D)
12    Po12(SD)    Eth      LACP      Eth1/27(D)
13    Po13(SU)    Eth      LACP      Eth1/14(P)
14    Po14(SU)    Eth      LACP      Eth1/15(P)
15    Po15(SU)    Eth      LACP      Eth1/10(P)

show port-channel traffic

show port-channel traffic [ interface interface-id ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

traffic

Show port-channel traffic statistics

interface

Specify a port-channel

interface-id

Interface identifier

Examples

pod1-leaf1# show port-channel traffic

NOTE: Clear the port-channel member counters to get accurate statistics

ChanId      Port Rx-Ucst Tx-Ucst Rx-Mcst Tx-Mcst Rx-Bcst Tx-Bcst
------ --------- ------- ------- ------- ------- ------- -------
1   Eth1/18 100.00% 100.00% 100.00% 100.00%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
2   Eth1/12 100.00% 100.00% 100.00% 100.00%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
3   Eth1/16 100.00% 100.00% 100.00% 100.00%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
4   Eth1/11 100.00% 100.00% 100.00% 100.00%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
5   Eth1/17 100.00% 100.00% 100.00% 100.00%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
6   Eth1/26    0.0%    0.0%    0.0%    0.0%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
8    Eth1/4    0.0%  49.59%   0.70%  50.02%    0.0%    0.0%
8    Eth1/5 100.00%  50.40%  99.29%  49.97% 100.00%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
9   Eth1/13 100.00% 100.00% 100.00% 100.00%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
10   Eth1/25    0.0%    0.0%    0.0%    0.0%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
11   Eth1/19    0.0%    0.0%    0.0%    0.0%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
12   Eth1/27    0.0%    0.0%    0.0%    0.0%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
13   Eth1/14 100.00% 100.00% 100.00% 100.00%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
14   Eth1/15 100.00% 100.00% 100.00% 100.00%    0.0%    0.0%
------ --------- ------- ------- ------- ------- ------- -------
15   Eth1/10 100.00% 100.00% 100.00% 100.00%    0.0%    0.0%

show port-channel usage

show port-channel usage

Syntax Description

show

Show running system information

port-channel

Show port-channel information

usage

Show port-channel number usage

Examples

pod1-leaf1# show port-channel usage

Total 14 port-channel numbers used
====================================
Used  :   1 - 6 , 8 - 15
Unused:   7 , 16 - 4096

show processes

show processes

Syntax Description

show

Show running system information

processes

Show processes

Examples

pod1-leaf1# show process

PID    State  PC        Start_cnt    TTY   Process
-----  -----  --------  -----------  ----  -------------
4764      S  f7708430            1     -  ufdm
4765      S  f7780430            1     -  stats_manager
4766      S  f77c6430            1     -  rpm
.
. [EXAMPLE TRUNCATED]
.
4407      S         0            1     -  rm
4412      S         0            1     -  rm
4420      S  f777c430            1     -  vdc_mgr
4448      S  f7737430            1     -  ntp
4761      S  f77bc430            1     -  vshd
4762      S  f7730430            1     -  vntag_mgr
4763      S  f778d430            1     -  urib

State: R(runnable), S(sleeping), Z(defunct)
NR(not running), ER(terminated etc)

show processes cpu

show processes cpu

Syntax Description

show

Show running system information

processes

Show processes

cpu

Show processes CPU Info

show processes cpu sort

show processes cpu sort

Syntax Description

show

Show running system information

processes

Show processes

cpu

Show processes CPU Info

sort

Show processes CPU Info (Sorted by Cpu Util)

Examples

pod1-leaf1# show process cpu sort

PID    Runtime(ms)  Invoked   uSecs  1Sec    Process
-----  -----------  --------  -----  ------  -----------
4775      2244885  11254066    199    4.0%  epm
4281          810       478   1696    1.8%  svc_ifc_observe
4825         1015      1514    670    1.7%  arp
4024        71807    601832    119    1.5%  t2usd_tor
.
. [EXAMPLE TRUNCATED]
.
4407            1         2    552    0.0%  rm
4412            1         2    529    0.0%  rm
4420         1375     10617    129    0.0%  vdc_mgr
4448         2759     51266     53    0.0%  ntp
4761          170      5882     29    0.0%  vshd
4762          985     10831     91    0.0%  vntag_mgr

CPU util  :   8.4% user,   5.8% kernel,   85.8% idle
Please note that only processes from the requested vdc are shown above

show processes memory

show processes memory

Syntax Description

show

Show running system information

processes

Show processes

memory

Show processes Memory Info

Examples

pod1-leaf1# show proc memory

PID    MemAlloc  MemLimit    MemUsed     StackBase/Ptr      Process
-----  --------  ----------  ----------  -----------------  ----------------
4764     43408  0           1233100     ffd024d0/ffd01000  ufdm
4765     64512  0           2144812     ffad7610/ffad60f8  stats_manager
4766     49560  0           2117020     fff269a0/fff26880  rpm
4767     53304  0           2368728     ffba9790/ffb9c250  oam
.
. [EXAMPLE TRUNCATED]
.
4407         0  0           0                  0/0         rm
4412         0  0           0                  0/0         rm
4420     40964  0           1219032     ff82c7b0/ff82b840  vdc_mgr
4448     41336  0           2095536     ffcdab00/ffcda110  ntp
4761      1616  0           559656      ffe3b690/ffffffff  vshd
4762    105760  0           709588      ff7fdd00/ff7fca90  vntag_mgr
4763     94788  0           2217112     fffb0db0/fffb0960  urib

All processes: MemAlloc = 5907696

show radius-server

show radius-server [ sorted | groups ]

Syntax Description

show

Show Information

radius-server

Radius-server

sorted

Sorted server list

groups

Radius server groups

Examples

pod1-leaf1# show radius-server

retransmission count:1
timeout value:5
deadtime value:0
source interface:any available
total number of servers:2

following RADIUS servers are configured:
10.193.208.9:
available for authentication on port:1645
AAA_User:
available for authentication on port:1812

show redundancy status

show redundancy status

Syntax Description

show

Show running system information

redundancy

Show system redundancy status

status

Current redundancy status

Usage Guidelines

Note

This command is supported only on modular systems.

Examples

Spine1# show redundancy status

Redundancy mode
---------------
administrative:   Warm
operational:   None

This supervisor (sup-27)
-----------------------
Redundancy state:   Active
Supervisor state:   Active
Internal state:   Active with no standby

Other supervisor (sup-28)
-----------------------
Redundancy state:   Not present
Supervisor state:   offline
Internal state:   offline

System start time:

System uptime:              00 days, 12 hours, 47 minutes, 28 seconds
Kernel uptime:
Active supervisor uptime:   00 days, 12 hours, 47 minutes, 28 seconds

show route-map

show route-map [name]

Syntax Description

show

Show running system information

route-map

Route-map information

name

Route-map name (Max Size 100)

Examples

pod1-leaf1# show route-map

route-map permit-all, permit, sequence 2
Match clauses:
Set clauses:
route-map deny-pervasive, deny, sequence 1
Match clauses:
Set clauses:
route-map deny-pervasive, permit, sequence 2
Match clauses:
Set clauses:

show snmp community

show snmp community

Syntax Description

show

Show running system information

snmp

Display SNMP information

community

Display SNMP Community information

Examples

pod1-leaf1# show snmp community

Community           Context
_________           _______
insieme
ciscoPublic

show snmp context

show snmp context

Syntax Description

show

Show running system information

snmp

Display SNMP information

context

Display SNMP Context information

Examples

pod1-leaf1# show snmp context

Context             VRF
-------             ---
snmpct1             Cisco:ciscoCtx1
snmpct2             Cisco:ciscoCtx2

show snmp user

show snmp user

Syntax Description

show

Show running system information

snmp

Display SNMP information

user

Display SNMP User information

Examples

pod1-leaf1# show snmp user

--------------------------------------------------------------
SNMP USERS
--------------------------------------------------------------
User                          Auth  Priv(Enforce)
----                          ----  -------------
uInsMd5Aes                     md5    aes-128(no)
uInsShaDes                     sha    des(no)
uInsShaAes                     sha    aes-128(no)
uInsMd5Des                     md5    des(no)
uInsMd5Np                      md5    none
uInsShaNp                      sha    none

show sprom

show sprom { backplane | module arg1 | fan arg0 | powersupply arg2 | sup | stby-sup | all }

Syntax Description

show

Show running system information

sprom

show SPROM contents

all

show all sproms contents

powersupply

show powersupply sprom contents

module

show linecard module sprom contents

fan

show fan module sprom contents

stby-sup

show stanby supervisor sprom contents

sup

show supervisor sprom contents

backplane

show backplane clock module sprom contents

arg0

Type: integer

please enter the fan number

arg1

Type: integer

please enter the module number

arg2

Type: integer

please enter the powersupply number

show switchname

show switchname

Syntax Description

show

Show running system information

switchname

Show the system's hostname

show system redundancy status

show system redundancy [ha] status

Syntax Description

show

Show running system information

system

System-related show commands

redundancy

Show system redundancy status

status

Current redundancy status

ha

VDC redundancy status

Usage Guidelines

Note

This command is supported only on modular systems.

Examples

pod1-leaf1# show system redundancy status

Redundancy mode
---------------
administrative:   Warm
operational:   None

This supervisor (sup-27)
-----------------------
Redundancy state:   Active
Supervisor state:   Active
Internal state:   Active with no standby

Other supervisor (sup-28)
-----------------------
Redundancy state:   Not present
Supervisor state:   offline
Internal state:   offline

show system reset-reason

show system reset-reason [ module module-id ]

Syntax Description

show

Show running system information

system

System-related show commands

reset-reason

Show last reset reason

module

Module

module-id

Module number

Examples

Spine1# show system reset-reason

----- reset reason for Supervisor-module 27 (from Supervisor in slot 27) ---
0) At 2014-06-06T23:41:46.831+00:00
Reason: reset-requested-by-cli-command-reload
Service:Decommissioning switch
Version: 11.0(0.800c)
----- reset reason for Supervisor-module 27 (from Supervisor in slot 28) ---
0) At 2013-11-18T14:57:07.681+00:00
Reason: reset-requested-by-cli-command-reload
Service:
Version: 6.1(2)I1(1)
1) At 2013-11-18T14:54:26.084+00:00
Reason: reset-requested-by-cli-command-reload
Service:
Version: 6.1(2)I1(1)
2) At 2013-11-18T14:51:46.434+00:00
Reason: reset-requested-by-cli-command-reload
Service:
Version: 6.1(2)I1(1)
3) At 2013-11-18T14:49:08.804+00:00
Reason: reset-requested-by-cli-command-reload
Service:
Version: 6.1(2)I1(1)
----- reset reason for Supervisor-module 28 (from Supervisor in slot 28) ---
----- reset reason for Supervisor-module 28 (from Supervisor in slot 27) ---

show system reset-reason fex

show system reset-reason fex fexid

Syntax Description

show

Show running system information

system

System-related show commands

reset-reason

Show last reset reason

fex

Show FEX last reset reason

fexid

Enter FEX identifier

Examples

pod1-leaf1# show system reset-reason fex 114

----- reset reason for FEX 114 ---
1) At Sat Jun  7 17:45:40 2014
Reset Reason: reboot
Service (Additional Info): Reload new image
Image Version: 11.0(1)

2) At Sun Jun  1 17:43:32 2014
Reset Reason: reboot
Service (Additional Info): Reload new image
Image Version: 11.0(1)

3) At Thu May 29 23:38:01 2014
Reset Reason: reboot
Service (Additional Info): Reload new image
Image Version: 11.0(1)

4) At Thu May 22 22:59:07 2014
Reset Reason: reload
Service (Additional Info): Reload requested by supervisor
Image Version: 11.0(1)

show system resources

show system resources

Syntax Description

show

Show running system information

system

System-related show commands

resources

Show system resources

Examples

pod1-leaf1# show system resources

Load average:   1 minute: 1.09   5 minutes: 0.57   15 minutes: 0.55
Processes   :   463 total, 2 running
CPU states  :   6.2% user,   6.1% kernel,   87.7% idle
Memory usage:   16400488K total,   7802584K used,   8597904K free
Current memory status: OK

show system uptime

show system uptime

Syntax Description

show

Show running system information

system

System information

uptime

How long the system has been up

Examples

pod1-leaf1# show system uptime

System start time:          Sat Jun 07 17:29:47 2014
System uptime:              0 days, 1 hours, 29 minutes, 29 seconds
Kernel uptime:              0 days, 1 hours, 29 minutes, 29 seconds
Active supervisor uptime:   0 days, 1 hours, 29 minutes, 29 seconds

show tacacs-server

show tacacs-server [ sorted | groups ]

Syntax Description

show

Show Information

tacacs-server

Tacacs-server

sorted

Sorted server list

groups

Tacacs server groups

Examples

pod1-leaf1# show tacacs-server

timeout value:5
deadtime value:0
source interface:any available
total number of servers:2

following TACACS+ servers are configured:
10.193.208.9:
available on port:49
TACACS_USER:
available on port:49

show tech-support

show tech-support

Syntax Description

show

Show Command

tech-support

Show technical support information

Usage Guidelines

This command creates a file named 'show_tech_info' in the local file system.

Examples

pod1-leaf1# show tech-support

---- show tech-support ----
Show tech output files are at /bootflash/show_tech_info/
Show tech brief will take about 10  minutes to complete. Please Wait ...
############Collecting Data from fexs###########
Collecting show-tech from vdc 1 at Mon May 12 18:57:29 2014

---- Show of Part 0 Completed ----

---- Show of Part 1 Completed ----

---- Show of Part 2 Completed ----

---- Show of Part 3 Completed ----

---- Show of Part 4 Completed ----

---- Show of Part 5 Completed ----

---- Show of Part 6 Completed ----

---- Show of Part 7 Completed ----

RSIP-DBG: Total Time Taken = 93s

RSIP-DBG: PT 00: 0091s

RSIP-DBG: PT 01: 0085s

RSIP-DBG: PT 02: 0030s

RSIP-DBG: PT 03: 0025s

RSIP-DBG: PT 04: 0063s

RSIP-DBG: PT 05: 0026s

RSIP-DBG: PT 06: 0069s

RSIP-DBG: PT 07: 0079s
Done collecting show-tech from vdc 1 at Mon May 12 18:59:02 2014

############Collecting Data from Line=cards###########

show users

show users

Syntax Description

show

Show running system information

users

Show users logged onto the system and their sessions

Examples

pod1-leaf1# show users

NAME     LINE         TIME         IDLE          PID COMMENT

ishell   pts/0        Jun  7 18:57   .         17198 (10.21.145.75)  session=ssh  *

admin    pts/0        Jun  7 18:57   .         17208  session=ssh  *

show version

show version

Syntax Description

show

Show running system information

version

Show running firmware version and basic system information

Examples

pod1-spine1# show version

Cisco Nexus Operating System (NX-OS) Software
TAC support: http://www.cisco.com/tac
Documents: http://www.cisco.com/en/US/products/ps9372/tsd_products_support_series_home.html
Copyright (c) 2002-2013, Cisco Systems, Inc. All rights reserved.
The copyrights to certain works contained in this software are
owned by other third parties and used and distributed under
license. Certain components of this software are licensed under
the GNU General Public License (GPL) version 2.0 or the GNU
Lesser General Public License (LGPL) Version 2.1. A copy of each
such license is available at
http://www.opensource.org/licenses/gpl-2.0.php and
http://www.opensource.org/licenses/lgpl-2.1.php

Software
BIOS:      version 06.25
kickstart: version 6.1(2) [build 6.1(1.748)] [gdb]
system:    version 6.1(2) [build 6.1(1.748)] [gdb]
BIOS compile time:       12/16/2013
kickstart image file is: bootflash:///auto-k
kickstart compile time:  03/18/2014 09:01:28 [03/18/2014 09:01:28]
system image file is:    bootflash:///auto-s
system compile time:     03/18/2014 09:01:28 [03/18/2014 09:01:28]

Hardware
cisco N9K-SUP-A ("supervisor")
Intel(R) Xeon(R) CPU E5-2403 0 @ 1.80GHz with 16399360 kB of memory.
Processor Board ID SAL17257PCK

Device name: ifav37-spine1
bootflash:    62522368 kB

Kernel uptime is 00 day(s), 01 hour(s), 25 minute(s), 30 second(s)

Last reset at 931000 usecs after Tue Mar 18 19:15:16 2014
Reason: dme-clean-config-reset
System version: 6.1(1.748)
Service: Reboot

plugin
Core Plugin, Ethernet Plugin

show version module

show version module [arg0]

Syntax Description

show

Show running system information

version

Show the software version

module

Module

arg0

Type: integer

please enter the module number

show vlan

show vlan [extended]

Syntax Description

show

Show running system information

vlan

VLAN status

extended

VLAN extended info like encaps

show vlan all-ports

show vlan all-ports

Syntax Description

show

Show running system information

vlan

VLAN status

all-ports

Show all ports on VLAN

show vlan brief

show vlan brief

Syntax Description

show

Show running system information

vlan

VLAN status

brief

All VLAN status in brief

show vlan id

show vlan id vlan-id [extended]

Syntax Description

show

Show running system information

vlan

VLAN status

id

VLAN status by VLAN id

vlan-id

Type: integer_mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

extended

VLAN extended info such as encaps

Examples

pod1-leaf1# show vlan
VLAN Name                             Status    Ports
---- -------------------------------- --------- -------------------------------
13   :                                active    Eth1/1, Eth1/3, Po3
14   t7:bd0                           active    Eth1/18, Eth1/25, Eth120/1/17,
Po5
15   :                                active    Eth1/26, Po1
16   :                                active    Eth1/25, Po5
17   :                                active    Eth1/26, Po1
18   :                                active    Eth1/25, Po5
19   :                                active    Eth1/26, Po1
20   :                                active    Eth1/25, Po5
21   t4:bd0                           active    Eth1/18, Eth1/25, Eth120/1/17,
Po5

VLAN Type  Vlan-mode
---- ----- ----------
13   enet  CE
14   enet  CE
15   enet  CE
16   enet  CE
17   enet  CE
18   enet  CE
19   enet  CE
20   enet  CE
21   enet  CE

pod1-leaf1# show vlan extended

VLAN Name                             Status    Ports
---- -------------------------------- --------- -------------------------------
13   :                                active    Eth1/1, Eth1/3, Po3
14   t7:bd0                           active    Eth1/18, Eth1/25, Eth120/1/17,
Po5
15   :                                active    Eth1/26, Po1
16   :                                active    Eth1/25, Po5
17   :                                active    Eth1/26, Po1
18   :                                active    Eth1/25, Po5
19   :                                active    Eth1/26, Po1
20   :                                active    Eth1/25, Po5
21   t4:bd0                           active    Eth1/18, Eth1/25, Eth120/1/17,
Po5

VLAN Type  Vlan-mode  Encap
---- ----- ---------- -------------------------------
13   enet  CE         vxlan-16777209, vlan-2
14   enet  CE         vxlan-14778357
15   enet  CE         vxlan-14876649, vlan-2507
16   enet  CE         vxlan-15662987, vlan-2007
17   enet  CE         vxlan-14974940, vlan-2509
18   enet  CE         vxlan-15630222, vlan-2009
19   enet  CE         vxlan-15335352, vlan-2504
20   enet  CE         vxlan-15040468, vlan-2004
21   enet  CE         vxlan-15302581

pod1-leaf1# show vlan id 35

VLAN Name                             Status    Ports
---- -------------------------------- --------- -------------------------------
35   t48:bd0                          active    Eth1/18, Eth1/25, Eth120/1/17,
Po5

VLAN Type  Vlan-mode
---- ----- ----------
35   enet  CE

pod1-leaf1# show vlan id 35 extended

VLAN Name                             Status    Ports
---- -------------------------------- --------- -------------------------------
35   t48:bd0                          active    Eth1/18, Eth1/25, Eth120/1/17,
Po5

VLAN Type  Vlan-mode  Encap
---- ----- ---------- -------------------------------
35   enet  CE         vxlan-15204290

show vlan reserved

show vlan reserved [extended]

Syntax Description

show

Show running system information

vlan

VLAN status

reserved

Internal reserved VLANs

extended

VLAN extended info like encaps

show vlan summary

show vlan summary

Syntax Description

show

Show running system information

vlan

VLAN status

summary

VLAN summary information

Examples

pod1-leaf1# show vlan summary

Number of existing VLANs           : 1211
Number of existing user VLANs      : 993
Number of existing extended VLANs  : 218

show vpc

show vpc [ vpc-number | brief [ vpc vpc-number ] ]

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

brief

Brief display of vPC status

vpc-number

Type: integer

Enter a Virtual Port Channel number

Examples

pod1-leaf1# show vpc

Legend:
(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 10
Peer status                       : peer adjacency formed ok
vPC keep-alive status             : Disabled
Configuration consistency status  : success
Per-vlan consistency status       : success
Type-2 inconsistency reason       : Consistency Check Not Performed
vPC role                          : primary, operational secondary
Number of vPCs configured         : 3
Peer Gateway                      : Disabled
Dual-active excluded VLANs        : -
Graceful Consistency Check        : Enabled
Auto-recovery status              : Enabled (timeout = 240 seconds)
Operational Layer3 Peer           : Disabled

vPC Peer-link status
---------------------------------------------------------------------
id   Port   Status Active vlans
--   ----   ------ --------------------------------------------------
1           up     -

vPC status
----------------------------------------------------------------------
id   Port   Status Consistency Reason                     Active vlans
--   ----   ------ ----------- ------                     ------------
343  Po1    up     success     success                    2501-2550

1    Po3    up     success     success                    2

344  Po5    down*  Not         Consistency Check Not      -
Applicable  Performed

pod1-leaf1# show vpc brief

Legend:
(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 10
Peer status                       : peer adjacency formed ok
vPC keep-alive status             : Disabled
Configuration consistency status  : success
Per-vlan consistency status       : success
Type-2 inconsistency reason       : Consistency Check Not Performed
vPC role                          : primary, operational secondary
Number of vPCs configured         : 3
Peer Gateway                      : Disabled
Dual-active excluded VLANs        : -
Graceful Consistency Check        : Enabled
Auto-recovery status              : Enabled (timeout = 240 seconds)
Operational Layer3 Peer           : Disabled

vPC Peer-link status
---------------------------------------------------------------------
id   Port   Status Active vlans
--   ----   ------ --------------------------------------------------
1           up     -

vPC status
----------------------------------------------------------------------
id   Port   Status Consistency Reason                     Active vlans
--   ----   ------ ----------- ------                     ------------
343  Po1    up     success     success                    2501-2550

1    Po3    up     success     success                    2

344  Po5    down*  Not         Consistency Check Not      -
Applicable  Performed

pod1-leaf1# show vpc brief vpc 344

vPC status
----------------------------------------------------------------------
id   Port   Status Consistency Reason                     Active vlans
--   ----   ------ ----------- ------                     ------------
344  Po5    down*  Not         Consistency Check Not      -
Applicable  Performed

show vpc consistency-parameters

show vpc consistency-parameters { global | interface if | vpc vpc-num }

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

consistency-parameters

Show vPC Consistency Parameters

global

Global Parameters

interface

Specify interface

if

Type: interface

vpc-num

Type: integer

Enter a Virtual Port Channel number

Examples

pod1-leaf1# show vpc consistency-parameters interface port-channel 3

Legend:
Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value
-------------               ----  ---------------------- -----------------------
mode                        1     on                     on
Speed                       1     1000 Mb/s              1000 Mb/s
Duplex                      1     full                   full
Port Mode                   1     trunk                  trunk
Native Vlan                 1     0                      0
MTU                         1     9000                   9000
vPC card type               1     Empty                  Empty
Allowed VLANs               -     2                      2
Local suspended VLANs       -     -                      -

show vpc peer-keepalive

show vpc peer-keepalive

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

peer-keepalive

vPC keepalive status

Examples

pod1-leaf1# show vpc peer-keepalive

vPC keep-alive status             : Disabled
--Send status                   : Failed
--Receive status                : Failed
--Last update from peer         : (-n-a-) seconds, (-n-a-) msec

vPC Keep-alive parameters
--Destination                   : N/A
--Keepalive interval            : 1000 msec
--Keepalive timeout             : 5 seconds
--Keepalive hold timeout        : 3 seconds
--Keepalive vrf                 : management
--Keepalive udp port            : 3200
--Keepalive tos                 : 192

show vpc role

show vpc role

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

role

vPC role status

Examples

pod1-leaf1# show vpc role

vPC Role status
----------------------------------------------------
vPC role                        : primary, operational secondary
Dual Active Detection Status    : 0
vPC system-mac                  : 00:23:04:ee:be:0a
vPC system-priority             : 34702
vPC local system-mac            : 7c:69:f6:0f:86:e7
vPC local role-priority         : 1017

show vpc statistics peer-keepalive

show vpc statistics peer-keepalive

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

statistics

Statistics

peer-keepalive

peer keepalive module related statistics

Examples

pod1-leaf1# show vpc statistics peer-keepalive

vPC keep-alive status             : Disabled

vPC keep-alive statistics
----------------------------------------------------
peer-keepalive tx count:          0
peer-keepalive rx count:          0
average interval for peer rx:     0
Count of peer state changes:      0

show vpc statistics vpc

show vpc statistics vpc vpc_num

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

statistics

Statistics

vpc_num

Type: integer

Enter a Virtual Port Channel number

Examples

pod1-leaf1# show vpc statistics vpc 344

port-channel5 is down (port-channel-members-down)
admin state is up
Hardware: Port-Channel, address: 0000.0000.0000 (bia 0000.0000.0000)
MTU 9000 bytes, BW 0 Kbit, DLY 1 usec
reliability 255/255, txload 1/255, rxload 1/255
Encapsulation ARPA, medium is broadcast
Port mode is trunk
auto-duplex, unknow nb/s
Input flow-control is off, output flow-control is off
Auto-mdix is turned on
EtherType is 0x8100
Members in this channel: Eth1/25
Last clearing of "show interface" counters never
0 interface resets
30 seconds input rate 0 bits/sec, 0 packets/sec
30 seconds output rate 5472 bits/sec, 4 packets/sec
Load-Interval #2: 5 minute (300 seconds)
input rate 0 bps, 0 pps; output rate 6536 bps, 5 pps
RX
0 unicast packets  0 multicast packets  0 broadcast packets
0 input packets  0 bytes
0 jumbo packets  0 storm suppression packets
0 runts  0 giants  0 CRC  0 no buffer
0 input error  0 short frame  0 overrun   0 underrun  0 ignored
0 watchdog  0 bad etype drop  0 bad proto drop  0 if down drop
0 input with dribble  0 input discard
0 Rx pause
TX
0 unicast packets  492069 multicast packets  0 broadcast packets
492069 output packets  68931828 bytes
0 jumbo packets
0 output error  0 collision  0 deferred  0 late collision
0 lost carrier  0 no carrier  0 babble  0 output discard
0 Tx pause

show vrf

show vrf [ vrf-name | all ] [ detail [extended] ] [ order id ]

Syntax Description

show

Show running system information

vrf

Display VRF information

vrf-name

Type: string

VRF name

all

Display VRF information for all VRFs

order

Specify ordering

id

Order by ID

detail

Display VRF detail information

extended

Display extended VRF information such as encaps

Examples

pod1-leaf1# show vrf t1:ctx0

VRF-Name                           VRF-ID State    Reason
t1:ctx0                                15 Up       --

pod1-leaf1# show vrf detail extended

VRF-Name: black-hole, VRF-ID: 11, State: Up
VPNID: unknown
RD: 0:0
Max Routes: 0  Mid-Threshold: 0
Encap: vxlan-16777200
Table-ID: 0x80000009, AF: IPv6, Fwd-ID: 0x80000009, State: Up
Table-ID: 0x00000009, AF: IPv4, Fwd-ID: 0x00000009, State: Up

VRF-Name: management, VRF-ID: 2, State: Up
VPNID: unknown
RD: 0:0
Max Routes: 0  Mid-Threshold: 0
Encap: vxlan-16777201
Table-ID: 0x80000035, AF: IPv6, Fwd-ID: 0x80000035, State: Up
Table-ID: 0x00000035, AF: IPv4, Fwd-ID: 0x00000035, State: Up

VRF-Name: mgmt:inb, VRF-ID: 59, State: Up
VPNID: unknown
RD: 10.0.113.223:48
Max Routes: 0  Mid-Threshold: 0
Encap: vxlan-3047424
Table-ID: 0x8000003a, AF: IPv6, Fwd-ID: 0x8000003a, State: Up
Table-ID: 0x0000003a, AF: IPv4, Fwd-ID: 0x0000003a, State: Up

pod1-leaf1# show vrf detail extended order id

VRF-Name: management, VRF-ID: 2, State: Up
VPNID: unknown
RD: 0:0
Max Routes: 0  Mid-Threshold: 0
Encap: vxlan-16777201
Table-ID: 0x80000035, AF: IPv6, Fwd-ID: 0x80000035, State: Up
Table-ID: 0x00000035, AF: IPv4, Fwd-ID: 0x00000035, State: Up

VRF-Name: t46:ctx1, VRF-ID: 3, State: Up
VPNID: unknown
RD: 10.0.113.223:95
Max Routes: 0  Mid-Threshold: 0
Encap: vxlan-2523139
Table-ID: 0x80000001, AF: IPv6, Fwd-ID: 0x80000001, State: Up
Table-ID: 0x00000001, AF: IPv4, Fwd-ID: 0x00000001, State: Up

VRF-Name: t37:ctx1, VRF-ID: 4, State: Up
VPNID: unknown
RD: 10.0.113.223:96
Max Routes: 0  Mid-Threshold: 0
Encap: vxlan-2719750
Table-ID: 0x80000002, AF: IPv6, Fwd-ID: 0x80000002, State: Up
Table-ID: 0x00000002, AF: IPv4, Fwd-ID: 0x00000002, State: Up

show vrf interface

show vrf [ vrf-name | all ] interface [interface]

Syntax Description

show

Show running system information

vrf

Display VRF information

vrf-name

Type: string

VRF name

all

Display VRF information for all VRFs

interface

Display interface VRF information

interface

Type: interface

Display interface VRF information

show zoning-rule

show zoning-rule [ src-epg epg0 ] [ dst-epg epg1 ]

Syntax Description

show

Show running system information

zoning-rule

Display Zoning-Rule information

src-epg

Display Source EPG information

epg0

Type: integer

Source EPG number

dst-epg

Display Destination EPG information

epg1

Type: integer

Source EPG number

Examples

This example shows how to display configured zoning rules:

pod1-leaf1# show zoning-rule

Rule ID         SrcEPG          DstEPG          operSt          Scope           Action
=======         ======          ======          ======          =====           ======
65336           68              67              enabled         32              permit
65335           68              66              enabled         32              permit
65334           68              69              enabled         32              permit
65333           0               70              enabled         32              permit
65332           0               65              enabled         32              permit

This example shows how to display configured zoning rules from a specific EPG:

pod1-leaf1# show zoning-rule src-epg 68

Rule ID         SrcEPG          DstEPG          operSt          Scope           Action
=======         ======          ======          ======          =====           ======
65336           68              67              enabled         32              permit
65335           68              66              enabled         32              permit
65334           68              69              enabled         32              permit
65529           68              66              enabled         32              deny
65338           68              71              enabled         32              permit
65337           68              72              enabled         32              permit
65414           68              67              enabled         31              permit

This example shows how to display configured zoning rules between a pair of EPGs:

pod1-leaf1# show zoning-rule src-epg 68 dst-epg 67

Rule ID         SrcEPG          DstEPG          operSt          Scope           Action
=======         ======          ======          ======          =====           ======
65336           68              67              enabled         32              permit

Chapter 7. T Commands

- techsupport local

techsupport local

techsupport local

Syntax Description

techsupport

Export a technical support collection file

local

Export to a local file system

Usage Guidelines

Use this command when an APIC-based TechSupport export cannot be triggered, such as when the APIC is in minority, or when communication between the APIC and a leaf has failed.

Appendix A. Configuring Switch Management

- Configuring Switch Console Settings

Configuring Switch Console Settings

In the switch command line interface, use the console_speed_setup.sh command to locally configure the console settings.

Note

When you configure the settings from the console, the new settings take effect immediately. When you configure the settings from an SSH session, the new settings take effect upon the next switch reboot.

The following example shows the use of the command. To change a setting, type y and follow the prompts. To view the settings without making changes, type n to every question.

Leaf-1# console_speed_setup.sh

Configure the Baud rate? (yes/no) [y]: n
Configure the Databits? (yes/no) [y]: n
Configure the Parity? (yes/no) [y]: n
Configure the Stop bits? (yes/no) [y]: n
databits_val 3
stopbits_val 0
parity_val 0
These are the new settings
Serial parameters become effective immediately on serial console
For SSH session, the serial parameters will take effect on the next reboot
/isan/utils/cmosio -w console 12.3
/bin/stty 115200 cs8  -cstopb

Would you like to proceed? (yes/no) [n]: n
Leaf-1#

For the default console settings, including the initial baud rate, refer to the Hardware Installation Guide for the switch model.

Appendix B. Using Boot Loader Commands

- Using Boot Loader Commands

- boot (loader command)

- cmdline (loader command)

- set gw (loader command)

- set ip (loader command)

Using Boot Loader Commands

When the switch starts up in the boot loader mode, a set of commands is available to set kernel kickstart parameters that may be required during advanced troubleshooting and recovery options. These commands are not used in normal operation.

boot (loader command)

boot protocol:// location

Syntax Description

protocol

Only tftp is supported.

location

The server address or hostname and path to the image file to be booted.

Usage Guidelines

Use this command to download and boot from an image file on a remote TFTP server.

Examples

This example causes the switch to download and boot from the specified image file on the remote server.

loader> boot tftp://192.2.0.123/images/bootimage1

cmdline (loader command)

cmdline [clear_config] [clear_log] [init_system] [no_hap_reset]

Syntax Description

clear_config

Clears all configuration databases and causes a stateless reload. This option is useful when upgrading the switch from an old and incompatible software image, such as a pre-release image.

clear_log

Completely clears all core files and logs within the switch. This option is useful when the switch fails to boot due to full partitions.

init_system

Securely erases and repartitions the disk.

no_hap_reset

Prevents a switch from continuously reloading due to a process failure. With this option, the switch will not reload after a failure, but will stop with a login prompt to allow troubleshooting.

Usage Guidelines

One or more options can be appended to the base cmdline command, but the entire command must be entered on a single line.

Examples

This example shows the command with one option:

Aborting config file read and autoboot
No autoboot or failed autoboot. falling to loader

Loader Version 7.17

loader > cmdline no_hap_reset
loader >

This example shows the command with two options:

loader > cmdline init_system clear_config
loader >

set gw (loader command)

set gw ipaddress

Syntax Description

ipaddress

The gateway IP address for the switch.

Usage Guidelines

Use this command to configure the gateway IP address for the switch.

Examples

loader> set gw 192.2.0.1

set ip (loader command)

set ip ipaddress mask

Syntax Description

ipaddress

The management IP address to be assigned to the switch.

mask

The subnet mask of the management IP address.

Usage Guidelines

Use this command to configure the initial management IP address for the switch.

Examples

loader> set ip 192.2.0.123 255.255.255.0

Preface

This preface includes the following sections:

- Audience

- Document Conventions

- Documentation Feedback

Audience

This publication is for network administrators who configure and maintain Cisco Nexus devices.

Document Conventions

Command descriptions use the following conventions:

Convention

Description

bold

Bold text indicates the commands and keywords that you enter literally as shown.

Italic

Italic text indicates arguments for which the user supplies the values.

[x]

Square brackets enclose an optional element (keyword or argument).

[x | y]

Square brackets enclosing keywords or arguments separated by a vertical bar indicate an optional choice.

{x | y}

Braces enclosing keywords or arguments separated by a vertical bar indicate a required choice.

[x {y | z}]

Nested set of square brackets or braces indicate optional or required choices within optional or required elements. Braces and a vertical bar within square brackets indicate a required choice within an optional element.

variable

Indicates a variable for which you supply values, in context where italics cannot be used.

string

A nonquoted set of characters. Do not use quotation marks around the string or the string will include the quotation marks.

Examples use the following conventions:

Convention

Description

screen font

Terminal sessions and information the switch displays are in screen font.

boldface screen font

Information you must enter is in boldface screen font.

italic screen font

Arguments for which you supply values are in italic screen font.

< >

Nonprinting characters, such as passwords, are in angle brackets.

[ ]

Default responses to system prompts are in square brackets.

!, #

An exclamation point (!) or a pound sign (#) at the beginning of a line of code indicates a comment line.

This document uses the following conventions:

Note

Means reader take note. Notes contain helpful suggestions or references to material not covered in the manual.

Caution

Means reader be careful. In this situation, you might do something that could result in equipment damage or loss of data.

Warning

IMPORTANT SAFETY INSTRUCTIONS

This warning symbol means danger. You are in a situation that could cause bodily injury. Before you work on any equipment, be aware of the hazards involved with electrical circuitry and be familiar with standard practices for preventing accidents. Use the statement number provided at the end of each warning to locate its translation in the translated safety warnings that accompanied this device.

SAVE THESE INSTRUCTIONS

Documentation Feedback

To provide technical feedback on this document, or to report an error or omission, please send your comments to apic-docfeedback@cisco.com. We appreciate your feedback.

THE SPECIFICATIONS AND INFORMATION REGARDING THE PRODUCTS IN THIS MANUAL ARE SUBJECT TO CHANGE WITHOUT NOTICE. ALL STATEMENTS, INFORMATION, AND RECOMMENDATIONS IN THIS MANUAL ARE BELIEVED TO BE ACCURATE BUT ARE PRESENTED WITHOUT WARRANTY OF ANY KIND, EXPRESS OR IMPLIED. USERS MUST TAKE FULL RESPONSIBILITY FOR THEIR APPLICATION OF ANY PRODUCTS.

THE SOFTWARE LICENSE AND LIMITED WARRANTY FOR THE ACCOMPANYING PRODUCT ARE SET FORTH IN THE INFORMATION PACKET THAT SHIPPED WITH THE PRODUCT AND ARE INCORPORATED HEREIN BY THIS REFERENCE. IF YOU ARE UNABLE TO LOCATE THE SOFTWARE LICENSE OR LIMITED WARRANTY, CONTACT YOUR CISCO REPRESENTATIVE FOR A COPY.

The Cisco implementation of TCP header compression is an adaptation of a program developed by the University of California, Berkeley (UCB) as part of UCB's public domain version of the UNIX operating system. All rights reserved. Copyright © 1981, Regents of the University of California.

NOTWITHSTANDING ANY OTHER WARRANTY HEREIN, ALL DOCUMENT FILES AND SOFTWARE OF THESE SUPPLIERS ARE PROVIDED “AS IS" WITH ALL FAULTS. CISCO AND THE ABOVE-NAMED SUPPLIERS DISCLAIM ALL WARRANTIES, EXPRESSED OR IMPLIED, INCLUDING, WITHOUT LIMITATION, THOSE OF MERCHANTABILITY, FITNESS FOR A PARTICULAR PURPOSE AND NONINFRINGEMENT OR ARISING FROM A COURSE OF DEALING, USAGE, OR TRADE PRACTICE.

IN NO EVENT SHALL CISCO OR ITS SUPPLIERS BE LIABLE FOR ANY INDIRECT, SPECIAL, CONSEQUENTIAL, OR INCIDENTAL DAMAGES, INCLUDING, WITHOUT LIMITATION, LOST PROFITS OR LOSS OR DAMAGE TO DATA ARISING OUT OF THE USE OR INABILITY TO USE THIS MANUAL, EVEN IF CISCO OR ITS SUPPLIERS HAVE BEEN ADVISED OF THE POSSIBILITY OF SUCH DAMAGES.

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: Click Here . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)