Table of Contents

7000-series-welcome.fm

Welcome to the

FirePOWER 7000 Series

See the following URLs for detailed information about installing, connecting, configuring, and troubleshooting your FirePOWER 7000 Series.

1. Install the Appliance

For information on deploying, installing, and setting up your appliance, see the Installation Guide and quick start guide for your appliance:

The Installation Guide also provides hardware specifications, information on reimaging the appliance to factory defaults or to a new version, and information on field-replaceable components.

If you need help finding information on feature licenses during setup, see the Firepower licensing documentation roadmap:

2. Check the Release Notes for Important Notes

For important information about resolved issues, caveats, and patch or update installation procedures, make sure you review the release notes for your version and the most recent patch to that version:

3. Configure the Appliance

For information on configuring Firepower devices, including adding devices to your Firepower Management Center and setting up users and policies, see the Firepower Management Center Configuration Guide for your version:

4. See Also

Software Downloads

Note: A Cisco.com login and Cisco service contract are required.

All Firepower Documentation

Troubleshooting TechNotes

Cisco Support Community Forums

Compliance Information

- Regulatory compliance and safety information: http://www.cisco.com/go/firepower-compliance

Warranty, License, and Privacy Information

- Warranty and End User License Agreement: http://www.cisco.com/go/warranty

- Privacy Portal: http://www.cisco.com/go/privacy