Table of Contents

fxos112_rn

Cisco FXOS Release Notes, 1.1(2)

September 28, 2015

This document contains release information for Cisco Firepower eXtensible Operating System 1.1(2).

Use this release note as a supplement with the other documents listed in the documentation roadmap:

The online versions of the user documentation are occasionally updated after the initial release. As a result, the information contained in the documentation on Cisco.com supersedes any information contained in the context-sensitive help included with the product.

This document contains the following sections:

■Introduction

■What’s New

■Important Notes

■System Requirements

■Open and Resolved Bugs

–Open Bugs

–Resolved Bugs

■Related Documentation

■Obtaining Documentation and Submitting a Service Request

Introduction

The Cisco Firepower 9300 security appliance is a next-generation platform for network and content security solutions. The Firepower 9300 is part of the Cisco Application Centric Infrastructure (ACI) Security Solution and provides an agile, open, secure platform that is built for scalability, consistent control, and simplified management.

The Firepower 9300 provides the following features:

■Modular chassis-based security system—provides high performance, flexible input/output configurations, and scalability.

■Firepower Chassis Manager—graphical user interface provides a streamlined, visual representation of the current chassis status and allows for simplified configuration of chassis features.

■FXOS CLI—provides command-based interface for configuring features, monitoring chassis status, and accessing advanced troubleshooting features.

■FXOS REST API—allows users to programmatically configure and manage their chassis.

What’s New

Cisco Firepower eXtensible Operating System 1.1(2) introduces the following new features:

■Firepower Chassis Manager now provides a Security Modules page from which you can view the status of the installed security modules and can perform the following functions on those security modules: decommission/recommission, acknowledge, power cycle, reinitialize, and power off/on the security module.

Important Notes

■To use ASDM and other strong encryption features such as VPN, after you deploy the cluster you must enable the Strong Encryption (3DES) license on the master unit using the ASA CLI.

■If you encounter any issues with accessing the ASA console, we recommend that you switch to a different SSH client or upgrade to a newer version.

System Requirements

You can access the Firepower Chassis Manager using the following browsers:

■Mozilla Firefox – Version 36 and above

■Google Chrome – Version 34 and above

Open and Resolved Bugs

The open and resolved bugs for this release are accessible through the Cisco Bug Search Tool. This web-based tool provides you with access to the Cisco bug tracking system, which maintains information about bugs and vulnerabilities in this product and other Cisco hardware and software products.

.

.

Open Bugs

All open bugs severity 3 and higher for Firepower eXtensible Operating System 1.1(2) can be accessed using the following search and are also listed in the table below:

Table 1 Open Caveats affecting FXOS 1.1(2)

Identifier

Description

CSCus73654

ASA do not mark management-only for the mgmt interface assign by LD

CSCuu17780

CLI allows to configure trap as "priv" even when user is set to "sha"

CSCuu18497

NTP radio button not selected even if configured

CSCuu22893

Dates not displayed on Updates screen

CSCuv31523

BakerSt: Some values in ciscoEntityFRUControlMIB are incorrect

CSCuv55362

Service Blades do not sync time with MIO when NTP configured as hostname

CSCuv59357

SSP3RU: Cluster: Unable to add 3 logical device in cluster

CSCuv65571

PSU PID and product name doesn't show after inserting new PSU

CSCuv76823

1G Copper and Fiber blink on EPM. Should stay Solid Green

CSCuv78619

Delete App object fails even if no slot has that application installed.

CSCuv86427

Blade Health-LED showing green in fprm even though it's amber

CSCuw03704

FXOS SW displays incorrect Supervisor VID

CSCuw11646

App-instance goes from started to starting state

CSCuw18186

REST local Cookies - not working osx Yosemite release and chrome 45.0

CSCuw24997

FP9300: "demux drops" on ASA's Internal-Data ifcs increasing constantly

CSCuw30963

FP9300: Unable to 'fsck flash' for ASA CSP

Resolved Bugs

The following table lists the customer-found defects that were resolved in Firepower eXtensible Operating System 1.1(2):

Table 2 Customer-Found Defects Fixed in FXOS 1.1(2)

Identifier

Description

CSCus94149

CRC errors on backplane

CSCut48938

Synch Timezone FSM generates critical fault

CSCuu13385

Bundle Upgrade: Add message to alert user of reboot after install cmd

CSCuu19026

Poor wording in warning message when setting default package

CSCuu22941

show download-task detail should show dates and times

CSCuu47189

Customers want 1G Copper support on Fixed and 10G EPM ports.

CSCuu63830

Core Files filled Bootflash without critical fault

CSCuv00061

ASA crash when configure multiple context

CSCuv06397

"show tech-support chassis 1 all" hangs at `show post`

CSCuv06400

"Unavailable" blade status

CSCuv12402

Formatting of show app-instance detail needs to be better

Related Documentation

.

Obtaining Documentation and Submitting a Service Request

.

, which lists all new and revised Cisco technical documentation as an RSS feed and delivers content directly to your desktop using a reader application. The RSS feeds are a free service.

. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

© 2015 Cisco Systems, Inc. All rights reserved.