Table of Contents

Preface

Product Overview

Installing the Router

Connecting the Router

Technical Specifications

null

Preface

This preface describes the objectives, audience, organization, and conventions of this guide and describes related documents that have additional information. It contains the following sections:

n Objective

n Audience

n Conventions

n Safety Warnings

n Searching Cisco Documents

n Obtaining Documentation and Submitting a Service Request

Objective

This guide provides an overview and explains how to install, connect, and perform initial configuration for the IR807.

Audience

This guide is intended for people who have a high level of technical ability, although they may not have experience with Cisco software.

Conventions

This section describes the conventions used in this guide.

NOTE: Means reader take note. Notes contain helpful suggestions or references to additional information and material.

CAUTION: This symbol means reader be careful. In this situation, you might do something that could result in equipment damage or loss of data.

TIP: Means the following information will help you solve a problem. The tip information might not be troubleshooting or even an action, but could be useful information.

WARNING: IMPORTANT SAFETY INSTRUCTIONS

Means danger. You are in a situation that could cause bodily injury. Before you work on any equipment, be aware of the hazards involved with electrical circuitry and be familiar with standard practices for preventing accidents. Use the statement number provided at the end of each warning to locate its translation in the translated safety warnings that accompanied this device.

Safety Warnings

IMPORTANT SAFETY INSTRUCTIONS
This warning symbol means danger. You are in a situation that could cause bodily injury. Before you work on any equipment, be aware of the hazards involved with electrical circuitry and be familiar with standard practices for preventing accidents. Use the statement number provided at the end of each warning to locate its translation in the translated safety warnings that accompanied this device. Statement 1071

SAVE THESE INSTRUCTIONS

Waarschuwing

BELANGRIJKE VEILIGHEIDSINSTRUCTIES

Dit waarschuwingssymbool betekent gevaar. U verkeert in een situatie die lichamelijk letsel kan veroorzaken. Voordat u aan enige apparatuur gaat werken, dient u zich bewust te zijn van de bij elektrische schakelingen betrokken risico's en dient u op de hoogte te zijn van de standaard praktijken om ongelukken te voorkomen. Gebruik het nummer van de verklaring onderaan de waarschuwing als u een vertaling van de waarschuwing die bij het apparaat wordt geleverd, wilt raadplegen.

BEWAAR DEZE INSTRUCTIES

Varoitus

TÄRKEITÄ TURVALLISUUSOHJEITA

Tämä varoitusmerkki merkitsee vaaraa. Tilanne voi aiheuttaa ruumiillisia vammoja. Ennen kuin käsittelet laitteistoa, huomioi sähköpiirien käsittelemiseen liittyvät riskit ja tutustu onnettomuuksien yleisiin ehkäisytapoihin. Turvallisuusvaroitusten käännökset löytyvät laitteen mukana toimitettujen käännettyjen turvallisuusvaroitusten joukosta varoitusten lopussa näkyvien lausuntonumeroiden avulla.

SÄILYTÄ NÄMÄ OHJEET

Attention

IMPORTANTES INFORMATIONS DE SÉCURITÉ

Ce symbole d'avertissement indique un danger. Vous vous trouvez dans une situation pouvant entraîner des blessures ou des dommages corporels. Avant de travailler sur un équipement, soyez conscient des dangers liés aux circuits électriques et familiarisez-vous avec les procédures couramment utilisées pour éviter les accidents. Pour prendre connaissance des traductions des avertissements figurant dans les consignes de sécurité traduites qui accompagnent cet appareil, référez-vous au numéro de l'instruction situé à la fin de chaque avertissement.

CONSERVEZ CES INFORMATIONS

Warnung

WICHTIGE SICHERHEITSHINWEISE

Dieses Warnsymbol bedeutet Gefahr. Sie befinden sich in einer Situation, die zu Verletzungen führen kann. Machen Sie sich vor der Arbeit mit Geräten mit den Gefahren elektrischer Schaltungen und den üblichen Verfahren zur Vorbeugung vor Unfällen vertraut. Suchen Sie mit der am Ende jeder Warnung angegebenen Anweisungsnummer nach der jeweiligen Übersetzung in den übersetzten Sicherheitshinweisen, die zusammen mit diesem Gerät ausgeliefert wurden.

BEWAHREN SIE DIESE HINWEISE GUT AUF.

Avvertenza

IMPORTANTI ISTRUZIONI SULLA SICUREZZA

Questo simbolo di avvertenza indica un pericolo. La situazione potrebbe causare infortuni alle persone. Prima di intervenire su qualsiasi apparecchiatura, occorre essere al corrente dei pericoli relativi ai circuiti elettrici e conoscere le procedure standard per la prevenzione di incidenti. Utilizzare il numero di istruzione presente alla fine di ciascuna avvertenza per individuare le traduzioni delle avvertenze riportate in questo documento.

CONSERVARE QUESTE ISTRUZIONI

Advarsel

VIKTIGE SIKKERHETSINSTRUKSJONER

Dette advarselssymbolet betyr fare. Du er i en situasjon som kan føre til skade på person. Før du begynner å arbeide med noe av utstyret, må du være oppmerksom på farene forbundet med elektriske kretser, og kjenne til standardprosedyrer for å forhindre ulykker. Bruk nummeret i slutten av hver advarsel for å finne oversettelsen i de oversatte sikkerhetsadvarslene som fulgte med denne enheten.

TA VARE PÅ DISSE INSTRUKSJONENE

Aviso

INSTRUÇÕES IMPORTANTES DE SEGURANÇA

Este símbolo de aviso significa perigo. Você está em uma situação que poderá ser causadora de lesões corporais. Antes de iniciar a utilização de qualquer equipamento, tenha conhecimento dos perigos envolvidos no manuseio de circuitos elétricos e familiarize-se com as práticas habituais de prevenção de acidentes. Utilize o número da instrução fornecido ao final de cada aviso para localizar sua tradução nos avisos de segurança traduzidos que acompanham este dispositivo.

GUARDE ESTAS INSTRUÇÕES

¡Advertencia!

INSTRUCCIONES IMPORTANTES DE SEGURIDAD

Este símbolo de aviso indica peligro. Existe riesgo para su integridad física. Antes de manipular cualquier equipo, considere los riesgos de la corriente eléctrica y familiarícese con los procedimientos estándar de prevención de accidentes. Al final de cada advertencia encontrará el número que le ayudará a encontrar el texto traducido en el apartado de traducciones que acompaña a este dispositivo.

GUARDE ESTAS INSTRUCCIONES

Varning!

VIKTIGA SÄKERHETSANVISNINGAR

Denna varningssignal signalerar fara. Du befinner dig i en situation som kan leda till personskada. Innan du utför arbete på någon utrustning måste du vara medveten om farorna med elkretsar och känna till vanliga förfaranden för att förebygga olyckor. Använd det nummer som finns i slutet av varje varning för att hitta dess översättning i de översatta säkerhetsvarningar som medföljer denna anordning.

SPARA DESSA ANVISNINGAR

Aviso

INSTRUÇÕES IMPORTANTES DE SEGURANÇA

Este símbolo de aviso significa perigo. Você se encontra em uma situação em que há risco de lesões corporais. Antes de trabalhar com qualquer equipamento, esteja ciente dos riscos que envolvem os circuitos elétricos e familiarize-se com as práticas padrão de prevenção de acidentes. Use o número da declaração fornecido ao final de cada aviso para localizar sua tradução nos avisos de segurança traduzidos que acompanham o dispositivo.

GUARDE ESTAS INSTRUÇÕES

Advarsel

VIGTIGE SIKKERHEDSANVISNINGER

Dette advarselssymbol betyder fare. Du befinder dig i en situation med risiko for legemesbeskadigelse. Før du begynder arbejde på udstyr, skal du være opmærksom på de involverede risici, der er ved elektriske kredsløb, og du skal sætte dig ind i standardprocedurer til undgåelse af ulykker. Brug erklæringsnummeret efter hver advarsel for at finde oversættelsen i de oversatte advarsler, der fulgte med denne enhed.

GEM DISSE ANVISNINGER

WARNING: When installing the product, please use the provided or designated connection cables/power cables/AC adapters. Using any other cables/adapters could cause a malfunction or a fire. Electrical Appliance and Material Safety Law prohibits the use of UL-certified cables (that have the “UL” shown on the code) for any other electrical devices than products designated by CISCO. The use of cables that are certified by Electrical Appliance and Material Safety Law (that have “PSE” shown on the code) is not limited to CISCO-designated products. Statement 371

WARNING: Read the wall-mounting instructions carefully before beginning installation. Failure to use the correct hardware or to follow the correct procedures could result in a hazardous situation to people and damage to the system. Statement 378

WARNING: To avoid electric shock, do not connect safety extra-low voltage (SELV) circuits to telephone-network voltage (TNV) circuits. LAN ports contain SELV circuits, and WAN ports contain TNV circuits. Some LAN and WAN ports both use RJ-45 connectors. Use caution when connecting cables. Statement 1021

WARNING: This equipment must be grounded. Never defeat the ground conductor or operate the equipment in the absence of a suitably installed ground conductor. Contact the appropriate electrical inspection authority or an electrician if you are uncertain that suitable grounding is available. Statement 1024

WARNING: If the symbol of suitability with an overlaid cross appears above a port, you must not connect the port to a public network that follows the European Union standards. Connecting the port to this type of public network can cause severe personal injury or can damage the unit. Statement 1031

WARNING: Connect the unit only to DC power source that complies with the safety extra-low voltage (SELV) requirements in IEC 60950 based safety standards. Statement 1033

WARNING: For connections outside the building where the equipment is installed, the following ports must be connected through an approved network termination unit with integral circuit protection: 10/100/1000 Ethernet. Statement 1044

WARNING: When installing or replacing the unit, the ground connection must always be made first and disconnected last. Statement 1046

WARNING: Do not locate the antenna near overhead power lines or other electric light or power circuits, or where it can come into contact with such circuits. When installing the antenna, take extreme care not to come into contact with such circuits, because they may cause serious injury or death. For proper installation and grounding of the antenna, please refer to national and local codes (for example, U.S.:NFPA 70, National Electrical Code, Article 810, Canada: Canadian Electrical Code, Section 54). Statement 1052

WARNING: No user-serviceable parts inside. Do not open. Statement 1073

WARNING: Installation of the equipment must comply with local and national electrical codes. Statement 1074

WARNING: Only trained and qualified personnel should be allowed to install, replace, or service this equipment. Statement 1030

WARNING: Read the installation instructions before connecting the system to the power source. Statement 1004

WARNING: Ultimate disposal of this product should be handled according to all national laws and regulations. Statement 1040

WARNING: The covers are an integral part of the safety design of the product. Do not operate the unit without the covers installed. Statement 1077

WARNING: Hot surface. Statement 1079

Searching Cisco Documents

To search an HTML document using a web browser, press Ctrl-F (Windows) or Cmd-F (Apple). In most browsers, the option to search whole words only, invoke case sensitivity, or search forward and backward is also available.

To search a PDF document in Adobe Reader, use the basic Find toolbar (Ctrl-F) or the Full Reader Search window (Shift-Ctrl-F). Use the Find toolbar to find words or phrases within a specific document. Use the Full Reader Search window to search multiple PDF files simultaneously and to change case sensitivity and other options. Adobe Reader’s online help has more information about how to search PDF documents.

Obtaining Documentation and Submitting a Service Request

For information on obtaining documentation, submitting a service request, and gathering additional information, see the monthly What’s New in Cisco Product Documentation, which also lists all new and revised Cisco technical documentation, at:

http://www.cisco.com/en/US/docs/general/whatsnew/whatsnew.html

Product Overview

This chapter provides an overview of the features available for the Cisco 807 Integrated Services Routers (ISRs) and contains the following sections:

n General Description

n Hardware Features

n Antennas

n Power Supply

n RJ45 Ports

n Accessories

NOTE: For compliance and safety information, see Regulatory Compliance and Safety Information for Cisco 800 Series

General Description

The Cisco IR807 Integrated Services Routers (ISRs) (IR807), part of the Cisco Integrated Services Routers Generation 2 (ISR G2) Family, is designed as a next generation ruggedized fixed form factor router. It is a small-form router with 4G, for use in ATM, POS, Telemetry, Billboards, Enterprise Fleet markets, Utilities and other SCADA (Supervisory Control and Data Acquisition) environments.

Hardware Overview

This section covers the overview of the IR807.

SKU Information

Table 1 Supported SKUs for Cisco IR807s

SKU ID

Description

Modem Type

IR807G-LTE-VZ-K9

North America (Verizon)

WP7601

IR807G-LTE-NA-K9

North America (AT&T)

WP7504

IR807G-LTE-GA-K9

EMEA

WP7502

Note : The IR809G-LTE-VZ-K9 SKU has a single SIM card socket. The IR807G-LTE-NA-K9 and IR807G-LTE-GA-K9 are equipped with dual SIM card sockets. Graphics in this guide show the dual SIM SKUs.

Front Panel Icons and LEDs

The IR807 uses icons to show the different features of the device. Icons with LEDs shows Icons and their associated LEDs with descriptions. LEDs are visible from the top cover and from the front panel. The LEDs allows easy visibility for wall and desk mounted installations regardless of chassis orientation. Icons only shows the Icons without associated LEDs and their descriptions.

Icon

Description/Activity

Icon

Description/Activity

Alarm - Alarm Input Status

Off — Normal operation

VPN

Off — No VPN tunnel

Steady Green — At least one VPN tunnel is up

Off — GPS not configured

Steady Green — GPS configured

Slow Flash — GPS Acquiring in Standalone GPS

Fast Flash — GPS Acquiring in Assisted GPS

RJ45 Fast Ethernet Ports -Link Status 0:1

Off — No link

Steady Green — Link is up

Flashing — Transmitting and Receiving data

WWAN - Wireless WAN Activity

Off — Offline

On — In Service

Flash (on 200ms off 5 sec) — No Service

Flash (on 1 sec off 1 sec) — Low Power Mode

Flash (on 5 sec off 200ms) — Roaming

Flash (on 400ms off 100ms) — Data Active

RSSI

RSSI (2)

RSSI (1)

RSSI (0)

Green

Green

Green/Amber

< -110dBm

Off

Off

Off

-110 to -90dBm

Off

Off

On - Amber

-90 to -75dBm

Off

Off

On - Green

-75 to -60dBm

Off

On - Green

On - Green

> -60dBm

On - Green

On - Green

On - Green

Figure 1 Cisco IR807 Front Panel

1

Antenna 1 (TNC) MAIN

7

Antenna 2 (TNC) DIV

2

USB Console (Type B)

8

Reset Button

3

USB Type A

9

FE1 10/100 Base-T RJ-45

4

S0 (DTE)

10

S1 (DCE)

5

FE0 10/100 Base-T RJ-45

11

External DC Power Input and Alarm

6

GPS (SMA)

Cisco IR807 Back Panel shows the back panels details of the Cisco IR807.

Figure 2 Cisco IR807 Back Panel

4

SIM0 (bottom) and SIM1 (top) Slots

Memory

The Cisco IR807 uses flash memory and main memory. The flash memory contains the Cisco IOS software image and the boot flash contains the ROMMON boot code. All memory components are factory default and not upgradeable by the end user.

Cisco IR807 Memory shows the memory allocation.

Memory

Specification

Default and maximum DRAM

1GB

Default and maximum flash memory

4 GB eMMC

Hardware Features

This section provides an overview of the following hardware features for the Cisco 807 ISR.

n Platform Features for Cisco IR807

n Antennas

n Supported Cisco Antennas and Cables

n Power Supply

n RJ45 Ports

n Accessories

Platform Features for Cisco IR807

The following lists the hardware platform features for the Cisco IR807.

n External Power Entry

— Nominal: 12 to 48VDC

— Absolute: 9.6 to 60VDC

— 4-pin 3.8 mm EURO power connector

n External Reset/Recovery Push Button

n WWAN Modem

— Single multi-band 2G/3G/4G/LTE cellular modem

— Dual internal USIM Slots (2 SIM Slots). Provides reliability and multi-homing capabilities over LTE and HSPA-based networks.

n WAN Ports

— 2x RJ45 10/100 Fast Ethernet

n Serial Ports

— Isolated 1 x RJ45 RS232 DTE Port

— Isolated 1 x RJ45 RS232 DCE Port, with NO DCD support

n USB Ports

— 1x USB2.0 Type A External Host Port

— 1x USB 2.0 mini USB Type B console port

n Compliance

— Class A EMC or better

— IP30 compliant when vertical and ports downward

n Industrial temperature [-40ºC to +60ºC, 13.8Kft (operating), 15Kft (non-operating)]

n One alarm input

Antennas

The Cisco IR807 ships without antennas. All antennas are options that can be ordered separately.

There are two TNC connectors on the front side of the device. The TNC connectors are used to connect to the 4G modem. The SMA connector is for the GPS antenna.

NOTE: Before choosing your antenna type and installation scenario, read through the following information.

Supported Cisco Antennas and Cables

The following section lists the supported Antennas and Cables for the Cisco IR807. For detailed information about Cisco Antennas, please refer to the following guides:

Cisco Industrial Routers and Industrial Wireless Access Points Antenna Guide:

http://www.cisco.com/c/en/us/td/docs/routers/connectedgrid/antennas/installing-combined/industrial-routers-and-industrial-wireless-antenna-guide.html

Cisco Aironet Antennas and Accessories Reference Guide

http://www.cisco.com/c/en/us/products/collateral/wireless/aironet-antennas-accessories/product_data_sheet09186a008008883b.html

The following antennas and cables are available:

ANT-3-4G2G1-O

Description: Cisco Quinta 3 element 3-in-1 transportation antenna

n 2x 4G cellular, 1xGPS

n Color: Black radome

n RoHS compliant

n Environment: Outdoor

Electrical Specifications:

n Frequency ranges: 698 to 960 MHz and 1710 to 2700 MHz

n Typical gain (dBi): 698 to 960 MHz = 2.6 dBi, and 1710 to 2700 MHz = 4.6 dBi

n Efficiency: 60%

n Polarization: Linear and vertical

n Port impedance: 50 Ohms

n Voltage standing wave ratio (VSWR): < 2.1:1 (698 to 960 MHz) and < 2.0:1 (1710 to 2700 MHz)

n Radiation pattern: Omnidirectional

n Integrated RF cables: 2 ft, LMR-195 type, TNC (male)

GPS electrical specifications:

n Frequency range: 1575.42 MHz +/–1 MHz (GPS L1)

n Amplifier gain: 27dB +/–3dB

n Noise figure: 4dB max

n Port impedance: 50 Ohms

n Output VSWR: < 2.0:1

n Radiation pattern: RHCP

n DC voltage: 2.7–12V DC

n DC current: < 20 mA over –40 to 85°C temperature range

n Integrated RF cable: 17 ft, LMR-100 type, SMA(m)

Mechanical and environmental specifications:

n Mount style: Vehicular roof or similar; stud and nut mount

n Environment: Outdoor, vehicular roof, transportation ruggedized and qualified to subset of SAE1455 and MILSTD 810G

n Connectors: 2 x TNC(m) cellular and 1 x SMA(m) GPS

n Antenna dimensions: 7.1 in. diameter x 2.4 in. height (18.0 x 6.5 cm), excluding RF cables

n Weight: 1.48 lb (0.67 kg)

n Operating temperature range: –40 to 70°C

n Storage temperature: –40 to 85°C

n Maximum power: 10W

n Radome: Polycarbonate, UV, black

n Material substance compliance: ROHS compliant

ANT-4G-OMNI-OUT-N

Description: Cisco outdoor omnidirectional antenna for 2G, 3G, and 4G LTE cellular

n UV-stable radome

n Mast-mounting bracket

n Applicable for both 2G and 3G solutions

n Domestic LTE 700 band and global LTE 2600 band

n Domestic cellular and global GSM

n WiMAX 2300 and 2500

Electrical Specifications:

n Frequency ranges: 698 to 960 MHz, 1710 to 2170 MHz, and 2300 to 2700 MHz

n Nominal gain (dBi): 698 to 960 MHz = 1.5 dBi, and 1710 to 2700 MHz = 3.5 dBi

n 3 dB beam width (E plane): 698 to 960 MHz = 81 degrees, 1710 to 2170 MHz = 75 degrees, and 2300 to 2700 MHz = 100 degrees

n 3 dB beam width (H plane): 360 degrees, omnidirectional

n Polarization: vertical and linear

n Nominal impedance: 50 Ohms

n VSWR: < 2.5:1 (698 to 960 MHz) and < 2.0:1 (1710 to 2690 MHz)

n Radiation pattern: omnidirectional

Mechanical Specifications:

n Mount style: mast mount, upright position only

n Environment: outdoor

n Connector: N-type socket

n Antenna length (height): 9.8 x 1 in. (24.9 x 2.45 cm)

n Weight: 1.5 lb. (0.68 kg)

n Dimensions (H x Outside dimensions): 9.8 x 1 in. (248 x 24.5 mm)

n Operating temperature range: -22° to 158°F (-30° to 70°C)

n Storage temperature: -40° to 185°F (-40° to 85°C)

n Maximum power: 20W

n Radome: polycarbonate, UV, white

n Material substance compliance: ROHS compliant

ANT-4G-PNL-OUT-N

Description - Cisco multiband panel outdoor 4G LTE antenna:

n Supports 3G and 4G LTE solutions

n Multiband

n Wall mount and mast mount

n Indoor and outdoor

n Dual type-N socket connector

Electrical specifications:

n Frequency ranges: 698 to 960 MHz and 1710 to 2700 MHz

n VSWR: 2.0:1 maximum

n Gain: 5.5 to 10.5 dBi (698 to 960 MHz) and 6.5 to 9.0 dBi (1710 to 2700 MHz)

n 3-dB beam width (vertical plane): 55 to 70 degrees = 698 to 960 MHz, 53 to 98 degrees = 1710 to 2200 MHz, 60 to 70 degrees = 2200 to 2500 MHz, and 55 to 70 degrees = 2500 to 2700 MHz

n 3-dB beam width (horizontal plane): 55 to 70 degrees = 698 to 960 MHz and 50 to 90 degrees = 1710 to 2200 MHz

n F/B ratio: > 15 dB, typical 20 dB = 698 to 960 MHz, and > 17 dB, typical 23 dB = 1700 to 2700 MHz

n Isolation: > 30 dB

n Polarization: slant +/- 45 degrees

n Nominal impedance: 50 Ohms

n Radiation pattern: directional

Mechanical specifications:

n Mount style: wall or mast mount

n Environment: outdoor

n Connector: dual type N female (direct connect or dual 12 in (30 cm))

n Antenna length (height): 11.6" (2.95 cm)

n Temperature Range (Operating): -22 to 158-degrees F (-30 to 70° C)

n Storage temperature: -40 to +85° C

n Wind rating: 160 km/H

n IP rating: IP54

n Radome: polycarbonate, UV resistant, white

n Material substance compliance: ROHS compliant

ANT-4G-SR-OUT-TNC

Description - Cisco integrated 4G LTE low-profile outdoor saucer antenna:

n Applicable for both 3G and 4G LTE solutions

n Domestic LTE 700 band and global LTE 2600 band

n Domestic cellular and global GSM

n Weatherproof UV stable radome

n Performance optimized

n Excellent flame rating

Electrical specifications:

n Frequency ranges: 698 to 960 MHz and 1710 to 2700 MHz

n Peak gain with 1-ft cable: 1.5 dBi (698 to 960 MHz) and 3.7 dBi (1710 to 2700 MHz)

n Peak gain with 15-ft cable: 0.8 dBi (698 to 960 MHz) and 0.2 dBi (1710 to 2700 MHz)

n Average efficiency with 1-ft cable: 90% (698 to 960 MHz) and 82% (1710 to 2700 MHz)

n Average efficiency with 15-ft cable: 60% (698 to 960 MHz) and 40% (1710 to 2700 MHz)

n Nominal impedance: 50 Ohms

n VSWR (maximum): 2.0:1 (698 to 960 MHz) and 2.0:1 (1710 to 2700 MHz)

Mechanical specifications:

n H-plane 3 dB beam width: omnidirectional

n Polarization: linear and vertical

n Power: 3W

n Cable: 15-ft LMR 195

n RF connector: type N (f); TNC (plug) available

n Mount style: ceiling mount

n Radome: PC/ABS, UV stable, black

n Material substance compliance: RoHS compliant

n Operational temperature: -22° to 158°F (-30° to 70°C)

n Storage temperature: -40° to 185°F (-40° to 85°C)

n Environment: indoor

n Dimensions (H x Outside dimensions): 3.4 x 7.9 in. (87 x 200 mm)

ANT-4G-DP-IN-TNC

Description: Cisco indoor swivel-mount dipole antenna

n Low-profile blade style sheath

n Applicable for both 3G and 4G solutions

n Domestic LTE 700 and global LTE 2600 bands

n Domestic cellular and global GSM

n Conformance to RoHS

n Complete cellular and 4G data communications in a single antenna

Electrical Specifications:

n Operating frequency ranges: 698 to 806 MHz, 824 to 894 MHz, 880 to 960 MHz, 1710 to 1880 MHz, 1850 to 1990 MHz, 1920 to 2170MHz, 2100 to 2500 MHz and 2500 to 2690 MHz

n Peak gain: 0.5 dBi (698 to 960 MHz) and 2.2 dBi (1710 to 2700 MHz)

n Average efficiency: 55% (698 to 960 MHz) 73% (1710 to 2700 MHz)

n Maximum input power: 3 watts

n Voltage standing wave ratio (VSWR): < 2.5:1

n Characteristic impedance: 50 Ohms

n Polarization: linear

Mechanical Specifications:

n Type: dipole

n Antenna dimensions (L x W x D): 229 mm x 30.5 mm x 15 mm

n Mount style: direct mount

n Environment: indoor

n RF Connector: TNC (m)

n Antenna weight: 49 g

n Temperature rating: -31 to 158 degrees F (-35 to +70 degrees C)

n Material substance compliance: RoHS compliant

4G-LTE-ANTM-O-3-X

Description:

n Multiband low profile indoor or outdoor omnidirectional antenna (IP67 ingress protection)

n Ceiling mount, dual 4G LTE and standalone GPS

Electrical Specifications:

n Frequency range: 698 to 960 MHz and 1710 to 2700 MHz

n Gain: 2.5 dBi

n Maximum power: 3W

n Connector: SMA with TNC male adapters, and SMA for GPS

n VSWR: < 2.5:1

n Nominal impedance: 50 Ohms

n Polarization: linear vertical

Mechanical Specifications:

n Radome material: white, black, red, or blue ABS, UL-94 V0

n Cable: 4 ft RG174 VW-1 compliant

n Height and base diameter: 90 mm and 137 mm

n Temperature rating: -40° to 185°F (-40° to 85°C)

n Mounting: 5/8-inch lug with serrated face nut (5/8-inch diameter hole through mounting surface)

n Can be used with the following cable extensions: 4G-CAB-ULL-20 and 4G-CAB-ULL-50

4G-LTE-ANTM-O-3-X

Description:

n Multiband low profile indoor or outdoor omnidirectional antenna (IP67 ingress protection)

n Ceiling mount, dual 4G LTE and standalone GPS

Electrical Specifications:

n Frequency range: 698 to 960 MHz and 1710 to 2700 MHz

n Gain: 2.5 dBi

n Maximum power: 3W

n Connector: SMA with TNC male adapters, and SMA for GPS

n VSWR: < 2.5:1

n Nominal impedance: 50 Ohms

n Polarization: linear vertical

Mechanical Specifications:

n Radome material: white, black, red, or blue ABS, UL-94 V0

n Cable: 4 ft RG174 VW-1 compliant

n Height and base diameter: 90 mm and 137 mm

n Temperature rating: -40° to 185°F (-40° to 85°C)

n Mounting: 5/8-inch lug with serrated face nut (5/8-inch diameter hole through mounting surface)

n Can be used with the following cable extensions: 4G-CAB-ULL-20 and 4G-CAB-ULL-50

4G-LTE-ANTM-D

Description:

n Omnidirectional dipole antenna is designed for indoor use with Cisco 4G and Cisco 3G wireless Integrated Services Routers Generation 2 systems

n Articulating Joint —It can be rotated 360 degrees and is capable of maneuvering into three stop positions: 0 degrees, 45 degrees, and 90 degrees.

n Male threaded Neill-Concelman (TNC) Connector —It lets you directly mount the antenna to any Cisco 4G and Cisco 3G wireless Integrated Services Router (ISR) EHWIC with a TNC connector (Cisco 4G-LTE-ANTM-D Ominidirectional Dipole Antenna, TNC Connector, and Articulation Joint). The threads on the connector must comply with the ANSI 7/16-28 UNEF 2B thread specification.

Electrical Specifications:

n Frequency range:

— 698–806 MHz

— 824–894 MHz

— 925–960 MHz

— 1710–1885 MHz

— 1920–1980 MHz

— 2110–2170 MHz

— 2500–2690 MHz

n Maximum input power: 3W

n Connector: TNC male

n VSWR: 2.5:1 or less

n Nominal impedance: 50 Ohms

n Maximum Peak Gain: 2 dBi

Mechanical Specifications:

n Antenna base and radome color: Cisco Raven Black

n Dimensions: 9 (L) x 1.2 (W) x 7/16 in (D) (229 x 30.5 x 11 mm)

n Temperature rating: –22° to 158°F (–30° to 70°C)

Antenna Extension 4G-AE015-R

Description:

n Single-unit antenna extension base (15 ft [457.2 cm])

Electrical Specifications:

n Frequency range: 6 GHz

n Attenuation: less than 3 dB at or below 2.5 GHz

n Base connector: TNC socket

n Pigtail connector: TNC plug

Mechanical Specifications:

n Base material: Cisco gray UL94 V0 PC/ABS plastic

n Dimensions: 2.8 x 2.4 x 1.8 in. (7.1 x 6.1 x 4.6 cm)

n Weight: 6 oz. (0.17 kg)

n Cable: 15 ft. (457.2 cm) non-plenum rated Pro-Flex Plus 195

Antenna Extension 4G-AE010-R

Description:

n Single-unit antenna extension base (10 ft. [304.8 cm], one cable included)

Electrical Specifications:

n Frequency range: 6 GHz

n Attenuation: less than 3 dB at or below 2.5 GHz

n Base connector: TNC socket

n Pigtail connector: TNC plug

Mechanical Specifications:

n Base material: UL 94 V0PC and ABS plastic

n Dimensions: 2.8 x 2.4 x 1.8 in. (7.1 x 6.1 x 4.6 cm)

n Weight: 6 oz. (0.17 kg)

n Cable: 10 ft. (304.8 cm) non-plenum rated Pro-Flex Plus 195

Modem Support

The Cisco IR807 uses the WP7502, WP7504, and WP7601 series modems. The software download page can be found here:

Region/Carrier

Modem Used

4G/LTE

3G UMTS/HSPA

2G GSM/GPRS/EDGE

US / Verizon

WP7601

700 MHz (band 13)

1700/2100 MHz (band 4 AWS)

N/A

N/A

North America/ AT&T

WP7504

700 MHz (band 17)

1900 MHz (band 2 PCS)

1700/2100 MHz (band 4 AWS)

1850-1915 (band 25)

814-849 (band 26)

850 MHz (band 5)

1900 MHz (band 2)

850 MHz

1900 MHz

EMEA

WP7502

800 MHz (band 20)

900 MHz (band 8)

1800 MHz (band 3)

2100 MHz (band 1)

2600 MHz (band 7)

850 MHz

900 MHz

1900 MHz

2100 MHz

850 MHz

900 MHz

1900 MHz

2100 MHz

Power Supply

The Cisco IR807 comes with an external DC power connector. The 4-pin power entry connector (receptacle) is mounted to the unit. The 4-pin power entry mating connector (plug) is attached to the receptacle. It is removed during installation and used to connect to the DC power source, then reattached to provide power to the unit.

Refer to Power Connector Pin-Outs for the location and values of the power connector.

Figure 3 Power Connector Pin-Outs

Pin Number

Name

Description

Color

1

DC In +

DC Power Positive Input

Red

2

DC In -

DC Power Return

Black

3

ALM REF

Alarm Common

N/A

4

ALM IN

Alarm Input

N/A

RJ45 Ports

The IR807 supports two ISOLATED RS232 ports which conforms to EIA-561 standard. RS232 pin out is shown in S0 and S1 Details applies to serial 0 and serial 1, but the directions of the DTE and DCE port are opposite

The RJ45 pinouts are shown in RJ45 pinouts

Figure 4 RJ45 pinouts

RS232 Port

The RS232 DTE pin out applies to both serial 0 and serial 1. This port is not shared with the Console port.

Note: The RS232 DTE pin out is different from the Cisco standard Console/Auxiliary port.

S0 and S1 Characteristics shows the characteristics of the S0 and S1 ports. S0 and S1 Details shows the details.

Figure 5 S0 and S1 Characteristics

Figure 6 S0 and S1 Details

Pin Number

Description

Abbreviation

DTE

DCE

1

DCE Ready, Ring Indicator

DSR/RI

<—

—>

2

Received Line Signal Detector

DCD

<—

—>

3

DTE Ready

DTR

—>

<—

4

Signal Ground

COM

5

Received Data

RxD

<—

—>

6

Transmitted Data

TxD

—>

<—

7

Clear To Send

CTS

<—

—>

8

Request To Send

RTS

—>

<—

Accessories

Table 6 Cisco IR807 Accessories

Cisco Part Number

Accessory

PWR-IE50W-AC

DIN-rail mount AC/DC power supply - Input AC 100-240V/1.25A or Input DC 125-250V/1A, Output DC 24V/2.1A

IR807-DINRAIL(=)

Din rail kit and mounting screws

IR807-WALLMNT(=)

Wall mount kit and mounting screws

CAB-CONSOLE-USB 37-1090-01

Cisco USB Type A Male to Mini B Male 6ft Console Cable

Depending on your particular model of the router, there will be either a single hole or double hole grounding.

n 53-100629-01 - Contains Getting started with the Cisco 807 Integrated Services Router document, associated hardware, and the single hole grounding kit.

Installing the Router

This chapter describes the equipment and the procedures for successfully installing the IR807 and contains the following sections:

n Equipment, Tools, and Connections

n Installing the Router

Before installing the IR807, make sure you have read and understood all of the information included in the documentation included with the product. An on-line version is also available here:

http://www.cisco.com/c/dam/en/us/td/docs/routers/access/800/807/GettingStarted/78-101247.pdf

CAUTION: Do not install the router or power supplies next to a heat source of any kind, including heating vents.

WARNING: Read the installation instructions before connecting the system to the power source. Statement 1004

WARNING: Only trained and qualified personnel should be allowed to install, replace, or service this equipment. Statement 1030

WARNING: No user-serviceable parts inside. Do not open. Statement 1073

WARNING: Ultimate disposal of this product should be handled according to all national laws and regulations. Statement 1040

WARNING: Do not locate the antenna near overhead power lines or other electric light or power circuits, or where it can come into contact with such circuits. When installing the antenna, take extreme care not to come into contact with such circuits, because they may cause serious injury or death. For proper installation and grounding of the antenna, please refer to national and local codes (for example, U.S.:NFPA 70, National Electrical Code, Article 810, Canada: Canadian Electrical Code, Section 54). Statement 1052

WARNING: This product is not intended to be directly connected to the Cable Distribution System. Additional regulatory compliance and legal requirements may apply for direct connection to the Cable Distribution System. This product may connect to the Cable Distribution System ONLY through a device that is approved for direct connection. Statement 1078

Equipment, Tools, and Connections

This section describes the equipment, tools, and connections necessary for installing your Cisco 807 ISR. It contains the following topics:

n Items Shipped with your Router

n Additional Items

n Ethernet Devices

Items Shipped with your Router

Unpack the box and verify that all items listed on the invoice were shipped with the Cisco 807 ISR.

The following items are shipped with your router:

n IR807 Printed Document Of Compliance

n Grounding Lug Kit

n Power Connector

Additional Items

The following items are not shipped with the router but are required for installation:

n Screws for mounting the router on a wall.

n Wire crimper for chassis grounding.

n Wire for connecting the chassis to an earth ground.

n Ethernet cables for connecting devices to the Ethernet ports.

n Ratcheting torque flathead screwdriver that exerts up to 15 in-lb (1.69 N-m) of pressure.

n A number-2 Phillips screwdriver.

Ethernet Devices

Identify the Ethernet devices that you will connect to the router: hub, servers, and workstations or PCs. Ensure that each device has a network interface card (NIC) for connecting to Ethernet ports.

Installing the Router

This section describes how to install the Cisco 807 ISR. This router can be installed on a table top or other flat horizontal surface, mounted on a wall, or DIN rail.

The recommended clearance when horizontally mounted is 1 inch on non-connector sides and 2 inches on bottom. Stacking heat-dissipating objects on top of the router is not allowed. I/O side clearance is needed as it is required to access the cable connections.

Clearance is required to attach, mount the DIN rail bracket, and Wall mount bracket. The same clearances apply when mounted vertically.

This section also describes how to attach external antennas to the routers and contains the following topics:

n Warnings

n Accessing the SIM Slots

n Installing Antennas

n Mounting on a Wall, Table, or Other Flat Surface

n Installing a DIN Rail

n Installing the Router Ground Connection

Warnings

WARNING: For NEC-compliant grounding, use size 14 AWG (1.6mm) or larger copper wire and a ring terminal with an inner diameter of 1/4 in. (5 to 7 mm).

Accessing the SIM Slots

Two USIM sockets are provided with easy access via a secured panel on the back side of the router. The SIM Slots will be connected directly to the 4G radio.

Note: The IR800 series of routers use the Mini-SIM (2FF). Specifications are:

n ISO/IEC 7810:2003, ID-000

n Length - 25mm, Width - 15mm, Thickness - 0.76mm

This section describes how to install and/or replace a SIM card. Ensure that the router is not mounted to a wall, floor, or DIN rail.

CAUTION: Do not touch any part of the exposed PCB circuit area when the SIM cover is removed.

WARNING: The covers are an integral part of the safety design of the product. Do not operate the unit without the covers installed. Statement 1077

WARNING: Hot surface. Statement 1079

To access the SIM card in the Cisco IR807, follow these steps:

1. Power off the router and disconnect the power cable from the power source.

2. Place the router on its bottom and ensure that any installed antennas are carefully oriented or disconnected to be out of the way.

3. Remove the protective cover (1) over the SIM slots by unscrewing the screws and setting them aside.

4. Locate the SIM card you wish to install/replace. SIM0 is the bottom and SIM1 is the top. The following figure shows the slots with the protective cover removed.

5. If SIM card is present, then push the SIM card to eject it out of the slot. Install the new SIM card by pushing it into the slot until you hear a clicking sound.

6. Replace the protective cover and the screws.

Modems

The Cisco IR807 uses the WP7502, WP7504, and WP7601 series modems:

Product

Carrier/Region

Modem Used

4G/LTE Bands Supported

3G UMTS Bands Supported

2G GSM/CDMA Bands supported

IR807-LTE-GA-K9

EMEA

WP7502

1, 3, 7, 8, 20

1, 8

E-GSM 900

DCS 1800

IR807-LTE-NA-K9

North America/AT&T

WP7504

2, 4, 5, 12, 17, 25, 26

2, 4, 5

CDMA

BC0,

BC1

BC1-

IR807-LTE-VZ-K9

Verizon, USA

WP7601

4, 13

N/A

N/A

Installing Antennas

There are two TNC connectors on the device. The TNC connectors are used to connect to the 4G modem. The SMA connector is for the GPS antenna.

Orient the antennas. For optimum wireless performance, the antennas should be perpendicular with respect to the floor.

If the router is being mounted on a desk, orient the antennas straight up.

To attach the radio antennas to your wireless router, follow these steps:

1. Manually screw the antenna tight to the TNC connectors on the front of the router.

2. Orient the antennas. For optimum wireless performance, antennas should be generally perpendicular to each other.

Dual Antennas

In all cases, an antenna must be connected to the main port. It is highly recommended in order to achieve optimal performance that a second antenna is connected to the diversity port:

n Sierra Wireless WP7xxx modem series supports SIMO on LTE. WCDMA UMTS HSPA DC-HSPA+ is diversity only, without SIMO.

n The IR807 must be installed with 2 antennas (Main & Aux) to guarantee the best performance level. Using a single antenna may impact downlink performance by a minimum of 3dB, and can be much more (10-20dB) due to multipath fading (destructive interference between direct and reflected radio waves).

n In case of 3G UMTS, a solo antenna would not be able to switch to the diversity port.

Mounting on a Wall, Table, or Other Flat Surface

The Cisco IR807 can be mounted in a vertical or horizontal orientation. It can be mounted to a wall or other flat surface, and can also be mounted to a DIN rail.

TIP: When choosing a location for wall-mounting the router, consider cable limitations and wall structure.

WARNING: Read the wall-mounting instructions carefully before beginning installation. Failure to use the correct hardware or to follow the correct procedures could result in a hazardous situation to people and damage to the system. Statement 378

To mount the router on a wall or other flat surface, follow these steps:

1. Mark the location for the mounting brackets to attach to the wall. The dimensions are described in Wall Mount Dimensions.

Figure 1 Wall Mount Dimensions

NOTE: For hollow-wall mounting, each bracket requires two wall anchors with washers. Wall anchors and washers must be size number 10.

2. Attach the mounting brackets to the bottom of the router. Refer to Wall Mount Details for guidance.

Figure 2 Wall Mount Details

4. Attach the brackets to the router with the 4 screws provided using a Phillips head driver. Torque to 13-15 in-lbs.

5. Mount the router with the attached brackets to the wall using screws that are adequate for your mounting area.

6. Route the cables so that they do not put a strain on the connectors or mounting hardware.

Installing a DIN Rail

The DIN Rail kit is ordered separately.

The DIN Rail can be installed in two different orientations, horizontally and vertically.

To attach the DIN rail bracket to the Cisco IR807, follow these steps.

Mounting the DIN Rail Bracket on the Router

1. First, attach the DIN rail bracket to the back of the router. The DIN rail bracket mounts in two different ways, depending on the orientation you wish to use. See Attaching the DIN Rail Bracket for vertical mounting for vertical orientation, and Attaching the DIN Rail Bracket for horizontal mounting for horizontal orientation.

Figure 3 Attaching the DIN Rail Bracket for vertical mounting

2. Attach the DIN mounting bracket (1) to the router using the two screws provided in the kit (2). Position the bracket over the two mounting holes (3) that correspond to your orientation. Then use 13-15 in-lbs pounds of torque to screw the bracket onto the router.

3. Once the bracket is attached to the router, it can be mounted onto the DIN Rail.

Attaching the Bracket onto the DIN Rail

To attach the Cisco IR807 with the bracket to a DIN rail, follow these steps. Refer to Attaching the Bracket to the DIN Rail for details.

Figure 5 Attaching the Bracket to the DIN Rail

1. Position the router so that the spring of the Din clip (1) rest on the Din rail (2).

2. Push up the router so that the spring of the Din clip (1) compresses and the top hook of the Din clip (3) slides and clamps to the Din rail (2).

3. To remove the router from the DIN Rail, simply reverse the procedure.

n For NEC-compliant grounding, use size 14 AWG (1.6mm) or larger copper wire and a ring terminal with an inner diameter of 1/4 in. (5 to 7 mm).

n For EN/IEC 60950-1 compliant grounding, use size 18 AWG (1.02mm) or larger copper wire.

WARNING: This equipment must be grounded. Never defeat the ground conductor or operate the equipment in the absence of a suitably installed ground conductor. Contact the appropriate electrical inspection authority or an electrician if you are uncertain that suitable grounding is available. Statement 1024

NOTE: Depending on the kit shipped with your router, the grounding lug may have one hole or two holes.

To install the ground connection, follow these steps:

1.

Locate the ring terminal lug and screws in the packaging kit. Store the ground screws for later use.

2.

Use a wire stripping tool to strip the 14 or 18 AWG (1.6mm or 1.02mm) grounding wire to 0.22 in. (5.56 mm).

3.

Insert the ground wire into the ring terminal lug, and using a crimping tool, crimp the terminal to the wire.

4.

Insert the ground screws ( 2 ) into the grounding lug ( 1 ) shown in the graphic and attach the lug to the router.

5.

Use a ratcheting torque screwdriver to tighten the ground screw and ring terminal to the router side panel to 3.5 in-lb (0.4 N-m). The torque should not exceed 3.5 in-lb (0.4 N-m).

6.

Attach the other end of the ground wire to a grounded bare metal surface, such as a ground bus, a grounded DIN rail, or a grounded bare rack.

Connecting the Router

This chapter describes how to connect Cisco IR807 Integrated Services Router to Ethernet devices and a network. The chapter contains the following sections:

n Preparing to Connect the Router

n Connecting a Terminal or PC to the Console Port

n Connecting to DC Power

n Verifying Connections

Preparing to Connect the Router

Before you connect the router to the devices, install the router according to the instructions in Installing the Router.

Preventing Damage to the Router

Before installation, observe these general guidelines:

n Proper ESD protection should be observed

n Ensure the router is properly grounded

n Ensure there is proper airflow around the router

If you must supply your own cable, see the Technical Specifications for cabling specifications. If this appendix does not provide specifications for a particular cable, we strongly recommend ordering the cable from Cisco.

Connecting a Terminal or PC to the Console Port

The IR807 provides a mini type B USB console port. Connect a terminal or PC to the Console port either to configure the software by using the CLI or to troubleshoot problems with the router.

To connect a terminal or PC to the Console port on the router and access the CLI, follow these steps:

1. Connect the mini-USB console cable to the console port on the router. Connecting a Terminal or PC to the Console Port shows the console location on the router.

Figure 1 Connecting a Terminal or PC to the Console Port

2. Connect the opposite end of the mini-USB cable to the USB port on your laptop or PC.

3. To communicate with the router, wait for your laptop or PC to discover the new device.

4. If your laptop or PC warns you that you do not have the proper drivers to communicate with the router, you can obtain them from your computers manufacturer, or go here:

https://www.silabs.com/products/mcu/Pages/USBtoUARTBridgeVCPDrivers.aspx

Note: If you are connecting to the USB port:

— - a connection (to the USB port) can only be made in a non-hazardous environment

— - the USB port cover must be reinstalled before the router can be deployed in a hazardous environment

Connecting to DC Power

WARNING: This product relies on the building’s installation for short-circuit (overcurrent) protection. Ensure that the protective device is rated not greater than 10A Statement 1005

WARNING: This product requires short-circuit (overcurrent) protection, to be provided as part of the building installation. Install only in accordance with national and local wiring regulations. Statement 1045

WARNING: Connect the unit only to DC power source that complies with the safety extra-low voltage (SELV) requirements in IEC 60950 based safety standards. Statement 1033

Plugs and Pin-Outs

The IR807 ships with a DC power accessory kit.

The power entry receptacle is on the IR807. The pin-outs are shown in Power Connector Pin-Outs.

Figure 2 Power Connector Pin-Outs

Pin Number

Name

Description

Color

1

DC In +

DC Power Positive Input

Red

2

DC In -

DC Power Return (GND-)

Black

3

AC

Alarm Common

N/A

4

AI

Alarm Input

N/A

Wiring the DC Power and Alarm Connections

1.

Locate the power and alarm connector on the router front panel.

NOTE: Your connector may not have the labels V RT A A.

In the labeled connector, the pins are:

V—Positive DC power connection

RT— Return DC power connection

A— Alarm Common

A— Alarm Input

2.

Identify the connector positive and return DC power connections. The connections left to right are:

n 1—Positive DC power connection

n 2—Return DC power connection

n 3—Alarm Common

n 4—Alarm Input

3.

Measure two strands of twisted-pair copper wire (18-to-20 AWG) long enough to connect to the DC power source.

4.

Using an 18-gauge wire-stripping tool, strip each of the two twisted pair wires coming from each DC-input power source to 0.25 inch (6.3 mm) ± 0.02 inch (0.5 mm). Do not strip more than 0.27 inch (6.8 mm) of insulation from the wire. Stripping more than the recommended amount of wire can leave exposed wire from the power connector after installation.

5.

Remove the two captive screws that attach the power and alarm connector to the router, and remove the connector.

6.

On the power and alarm connector, insert the exposed part of the positive wire into the connection labeled "V" and the exposed part of the return wire into the connection labeled "RT". Make sure that you cannot see any wire lead. Only wire with insulation should extend from the connector.

NOTE: Use the same method for wiring the alarm connections.

1—Power connector captive screws

7.

Use a ratcheting torque flathead screwdriver to torque the power connector captive screws (above the installed wire leads) to 2 in-lb (0.23 N-m).

8.

Connect the other end of the positive wire to the positive terminal on the DC power source, and connect the other end of the return wire to the return terminal on the DC power source.

Connect the other end of the Alarm wires to your alarm source.

Verifying Connections

Technical Specifications

This appendix provides router, port, cabling specifications, and power adapters for the device.

NOTE: For compliance and safety information, see the Regulatory Compliance and Safety Information for Cisco 800 Series.

Router Specifications

Table 1 Cisco IR807 Specifications

Description

Design Specification

Physical Characteristics

Dimensions (H x W x D)

(height x width x depth x) are 1.85" x 5.07" x 4.50" (4.69 x 12.85 x 11.43 cm).

Weight

1 lb 8 oz (0.67kg)

Environmental Operating Ranges

Operating Temperature and Altitude

-40° to 140°F (-40° to 60°C) in a sealed NEMA cabinet with no airflow

-40° to 158°F (-40° to 70°C) in a vented cabinet with 40 lfm of air

-40° to 167°F (-40° to 75°C) in a forced air enclosure with 200 lfm of air

(type tested at +85C for 16 hours)

NOTE: This product has been safety certified up to 60C maximum ambient.

-500 to 5,000 feet. Derate max operating temperature 1.5°C per 1000 feet. 10,000 ft maximum

Operating Altitude

13,800 ft. (4206m)

Humidity

5% — 95% non-condensing

Environmental Tests

Vibration

IEC 61850-3, IEEE 1613

Shock

Half Sine (operating)

Duration = <2 ms

Velocity = 2.39 m/s

Number of shocks: A series of 6 shocks, one on each side.

IEEE 1613 and IEC61850-3

NUP T2 shock testing, non-NEBS 3396

Certifications

Standard Safety Certifications

UL 60950-1, 2nd edition

CAN/CSA C22.2 No. 60950-1, 2nd edition

EN 60950-1, 2nd edition

CB to IEC 60950-1, 2nd edition with all group differences and national deviations

EMC Emissions

EN55022/CISPR22, CFR 47 Part 15, ICES003, VCCI-V-3, AS/NZS CISPR22, CNS13438, EN300- 386, EN61000-3-2, EN61000-3-3, and EN55032/CISPR32

EMC Immunity

EN55024/CISPR24, (EN61000-4-2, EN61000-4-3, EN61000-4-4, EN61000-4-5, EN61000-4-6, EN61000-4-11), EN55035/CISPR35, and EN300-386

Radio Immunity

EN301 489-1, EN 303 413, EN 301 489-19, EN 301 489-52, and EN 62311

Cellular Radio

EN 301 908-1, EN 301 908-2, EN 301 511, and EN 301 908-13

Compliance

IP30 compliant when vertical and cables downward.

Transportation/Storage Conditions

Temperature

-40 to +85°C (–40 to +185°F)

Humidity

10 – 95%

Altitude

4570 m (15,000 ft)

Router DC Power Adapter

Input Voltage

Nominal voltage: 12V to 48V DC

Absolute: 9.6 to 60V DC input

Maximum Power Consumption

10 Watts

Country Marks

FCC, CE, BSMI, IC

Hazardous Locations

n ANSI/ISA 12.12.01 (Gas groups A-D)

n CSA 22.2 No 213 (Gas groups A-D)

n UL/CSA 60079-0, -15 (Class I, Zone 2, Gas groups IIC)

n IEC 60079-0, -15 IECEx test report

THE SPECIFICATIONS AND INFORMATION REGARDING THE PRODUCTS IN THIS MANUAL ARE SUBJECT TO CHANGE WITHOUT NOTICE. ALL STATEMENTS, INFORMATION, AND RECOMMENDATIONS IN THIS MANUAL ARE BELIEVED TO BE ACCURATE BUT ARE PRESENTED WITHOUT WARRANTY OF ANY KIND, EXPRESS OR IMPLIED. USERS MUST TAKE FULL RESPONSIBILITY FOR THEIR APPLICATION OF ANY PRODUCTS.

THE SOFTWARE LICENSE AND LIMITED WARRANTY FOR THE ACCOMPANYING PRODUCT ARE SET FORTH IN THE INFORMATION PACKET THAT SHIPPED WITH THE PRODUCT AND ARE INCORPORATED HEREIN BY THIS REFERENCE. IF YOU ARE UNABLE TO LOCATE THE SOFTWARE LICENSE OR LIMITED WARRANTY, CONTACT YOUR CISCO REPRESENTATIVE FOR A COPY.

The following information is for FCC compliance of Class A devices: This equipment has been tested and found to comply with the limits for a Class A digital device, pursuant to part 15 of the FCC rules. These limits are designed to provide reasonable protection against harmful interference when the equipment is operated in a commercial environment. This equipment generates, uses, and can radiate radio-frequency energy and, if not installed and used in accordance with the instruction manual, may cause harmful interference to radio communications. Operation of this equipment in a residential area is likely to cause harmful interference, in which case users will be required to correct the interference at their own expense.

The following information is for FCC compliance of Class B devices: This equipment has been tested and found to comply with the limits for a Class B digital device, pursuant to part 15 of the FCC rules. These limits are designed to provide reasonable protection against harmful interference in a residential installation. This equipment generates, uses and can radiate radio frequency energy and, if not installed and used in accordance with the instructions, may cause harmful interference to radio communications. However, there is no guarantee that interference will not occur in a particular installation. If the equipment causes interference to radio or television reception, which can be determined by turning the equipment off and on, users are encouraged to try to correct the interference by using one or more of the following measures:

Modifications to this product not authorized by Cisco could void the FCC approval and negate your authority to operate the product.

The Cisco implementation of TCP header compression is an adaptation of a program developed by the University of California, Berkeley (UCB) as part of UCB’s public domain version of the UNIX operating system. All rights reserved. Copyright © 1981, Regents of the University of California.

NOTWITHSTANDING ANY OTHER WARRANTY HEREIN, ALL DOCUMENT FILES AND SOFTWARE OF THESE SUPPLIERS ARE PROVIDED “AS IS” WITH ALL FAULTS. CISCO AND THE ABOVE-NAMED SUPPLIERS DISCLAIM ALL WARRANTIES, EXPRESSED OR IMPLIED, INCLUDING, WITHOUT LIMITATION, THOSE OF MERCHANTABILITY, FITNESS FOR A PARTICULAR PURPOSE AND NONINFRINGEMENT OR ARISING FROM A COURSE OF DEALING, USAGE, OR TRADE PRACTICE.

IN NO EVENT SHALL CISCO OR ITS SUPPLIERS BE LIABLE FOR ANY INDIRECT, SPECIAL, CONSEQUENTIAL, OR INCIDENTAL DAMAGES, INCLUDING, WITHOUT LIMITATION, LOST PROFITS OR LOSS OR DAMAGE TO DATA ARISING OUT OF THE USE OR INABILITY TO USE THIS MANUAL, EVEN IF CISCO OR ITS SUPPLIERS HAVE BEEN ADVISED OF THE POSSIBILITY OF SUCH DAMAGES.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

Cisco 807 Industrial Integrated Services Router Hardware Installation Guide

© 2018 Cisco Systems, Inc. All rights reserved.