Chapter 1. Overview

- Overview

- External Features

- Component Location

- Summary of Node Features

Overview

Cisco HyperFlex C225 M6 node is a one-rack unit node that can be used standalone, or as part of the Cisco HyperFlex (HX) System, which unifies computing, networking, management, virtualization, and storage access into a single integrated architecture. Cisco HX also enables end-to-end server visibility, management, and control in both bare metal and virtualized environments.

Cisco HyperFlex C225 M6 Server is orderable in two versions:

- Small form-factor (SFF) drives version (HX-C225-M6S), with 10-drive HDD back-plane front panel configuration:

- Front-loading drive bays 1—10 support 2.5-inch SAS/SATA drives.

- Optionally, front-loading drive bays 1 to 4 support 2.5-inch SSDs .

Following PCIe Riser combinations are available:

- One half-height riser card in PCIe Riser 1

- Three half-height riser cards in PCIe Riser 1, 2, 3

- Two full-height riser cards Riser 1 and 3

- Riser 1—Supports Riser1. Supports single x16 PCIe supporting full height 3/4 length cards in 2 riser configuration (or) Half-height 3/4-length cards in 3 riser configuration and NC-SI from Pilot4.

- Riser 2—Supports Riser 1. Supports single x16 PCIe supporting only Half-height 3/4-length cards in 3-riser configuration.

- Riser 3—Supports Riser 3A, 3B. PCIe slot 3 with the following options:

- Riser3A Supports single x16 PCIe supporting half height 3/4 length cards in 3 riser configuration

and NC-SI.

- Riser3B Supports single x16 PCIe supporting full height 3/4-length cards in 2 riser configuration and NC-SI.

External Features

This topic shows the external features of the server versions.

Cisco HyperFlex C225 M6 Node Front Panel Features

The following figure shows the front panel features of the small form-factor drive versions of the node.

For definitions of LED states, see Front-Panel LEDs.

Cisco HyperFlex C225 M6 Node Front Panel

1

HX-C225-M6S Version—Drive bays 1 – 10 2 Unit identification button/LED support SAS/SATA hard disk drives (HDDs) and solid state drives (SSDs). Drive bays 5 through 10 support only SAS/SATA HDDs or SSDs.

HXC-C225-M6N Version

2

Unit identification button/LED

3

Power button/power status LED

4

KVM connector

(used with KVM cable that provides one DB-15 VGA, one DB-9 serial, and two USB 2.0 connectors)

5

System LED cluster:

- Fan status LED

- System Status LED

- Power supply status LED

- Network link activity LED

- Temperature status LED

-

Cisco HX C225 M6 Server Rear Panel Features

The rear panel features can be different depending on the number and type of PCIe cards in the server.

By default, single CPU servers come with only one half-height riser 1 installed, and dual CPU servers support all three half-height risers.

The following figure shows the rear panel features of the server with three riser configuration.

For definitions of LED states, see Rear-Panel LEDs.

Cisco HyperFlex C225 M6 Node Rear Panel Three Riser Configuration

The following figure shows the rear panel features of the server with two riser configuration.

Cisco HX C225 M6 Node Server Rear Panel Two Riser Configuration

1

PCIe slots

Following PCIe Riser combinations are available:

- One half-height riser card in PCIe Riser 1

- Three half-height riser cards in PCIe Riser 1, 2, 3

- Two full-height riser cards Riser 1 and 3

- Riser 1—Supports Riser1. Supports single x16 PCIe supporting full height 3/4 length cards in 2 riser configuration (or) Half-height 3/4-length cards in 3 riser configuration and NC-SI from Pilot4.

- Riser 2—Supports Riser 1. Supports single x16 PCIe supporting only Half-height 3/4-length cards in 3-riser configuration.

- Riser 3—Supports Riser 3A, 3B. PCIe slot 3 with the following options:

- Riser3A Supports single x16 PCIe supporting half height 3/4 length cards in 3 riser configuration and NC-SI.

- Riser3B Supports single x16 PCIe supporting full height 3/4-length cards in 2 riser configuration and NC-SI.

2

Power supply units (PSUs), two which can be redundant when configured in 1+1 power mode.

3

Modular LAN-on-motherboard (mLOM) card bay (x16 PCIe lane)

4

System identification button/LED

5

USB 3.0 ports (two)

6

Dedicated 1 GB Ethernet management port

7

COM port (RJ-45 connector)

8

VGA video port (DB-15 connector)

Component Location

This topic shows the locations of the field-replaceable components and service-related items. The view in the following figure shows the server with the top cover removed.

Cisco HyperFlex C225 M6 Node, Two Riser Configuration Component Locations

1

Front-loading drive bays 1–10 support SAS/SATA drives.

2

Cisco M6 12G SAS RAID card or Cisco M6 12G SAS HBA Controller

3

Cooling fan modules, eight.

Each fan is hot-swappable

4

SuperCap module mounting bracket

The SuperCap module (not shown) that mounts into this location provides RAID write-cache backup.

5

DIMM sockets on motherboard, 32 total, 16 per CPU

CPUs are arranged in groups of eight sockets above the top CPU and below the bottom CPU, and 16 sockets between the CPUs.

6

Motherboard CPU socket two (CPU2)

7

Motherboard CPU socket one (CPU1)

8

M.2 module connector

Supports a boot-optimized RAID controller with connectors for up to two SATA M.2 SSDs

9

Power Supply Units (PSUs), two

10

PCIe riser slot 2

11

PCIe riser slot 1

12

Modular LOM (mLOM) card bay on chassis floor (x16 PCIe lane)

Cisco HyperFlex C225 M6 Node Three Riser Configuration Serviceable Component Locations

1

Front-loading drive bays 1–10 support SAS/SATA drives.

2

Cisco M6 12G SAS RAID card or Cisco M6 12G SAS HBA Controller

3

Cooling fan modules, eight.

Each fan is hot-swappable

4

SuperCap module mounting bracket

The SuperCap module (not shown) that mounts into this location provides RAID write-cache backup.

5

DIMM sockets on motherboard, 32 total, 16 per CPU

CPUs are arranged in groups of eight sockets above the top CPU and below the bottom CPU, and 16 sockets between the CPUs.

6

Motherboard CPU socket two (CPU2)

7

Motherboard CPU socket one (CPU1)

8

M.2 module connector

Supports a boot-optimized RAID controller with connectors for up to two SATA M.2 SSDs

9

Power Supply Units (PSUs), two

10

PCIe riser slot 3

11

PCIe riser slot 2

12

Modular LOM (mLOM) card bay on chassis floor (x16 PCIe lane)

13

Modular LOM (mLOM) card bay on chassis floor (x16 PCIe lane)

-

-

Summary of Node Features

The following table lists a summary of node features.

Feature

Description

Chassis

One rack-unit (1RU) chassis

Central Processor

Up to two Socket AMD Zen2/3 Architecture supporting Rome/Milan processors

Memory

32 DDR4 DIMMs, up to 3200 MHz(1DPC), 2933 MHz (2DPC), with support for RDIMMs, LRDIMMs

Multi-bit error protection

Multi-bit error protection is supported

Video

The Cisco Integrated Management Controller (CIMC) provides video using the Matrox G200e video/graphics controller:

- Integrated 2D graphics core with hardware acceleration

- Embedded DDR memory interface supports up to 512 MB of addressable memory (8 MB is allocated by default to video memory)

- Supports display resolutions up to 1920 x 1200 16bpp @ 60Hz

- High-speed integrated 24-bit RAMDAC

- Single lane PCI-Express host interface running at Gen 1 speed

Baseboard management

BMC, running Cisco Integrated Management Controller (Cisco IMC) firmware.

Depending on your Cisco IMC settings, Cisco IMC can be accessed through the 1-GB dedicated management port or a Cisco virtual interface card.

Network and management I/O

Rear panel:

- One 1-GB Ethernet dedicated management port (RJ-45 connector)

- One RS-232 serial port (RJ-45 connector)

- One VGA video connector port (DB-15 connector)

- Two USB 3.0 ports

- One flexible modular LAN on motherboard (mLOM)/OCP 3.0 slot that can accommodate various interface cards

- One KVM console connector (supplies two USB 2.0 connectors, one VGA DB15 video connector, and one serial port (RS232) RJ45 connector)

Front panel:

- One KVM console connector (supplies two USB 2.0 connectors, one VGA DB15 video connector, and one serial port (RS232) RJ45 connector)

Modular LAN on Motherboard (mLOM)/ OCP3 3.0 slot

The dedicated mLOM/OCP 3.0 slot on the motherboard can flexibly accommodate the following cards:

- Cisco Virtual Interface Cards

- OCP 3.0 network interface card (HX-O-ID10GC)

Power

Up to two of the following hot-swappable power supplies:

- 770 W (AC)

- 1050 W (AC)

- 1050 W (DC)

- 1600 W (AC)

- 2300 W (AC)

One power supply is mandatory; one more can be added for 1 + 1 redundancy.

ACPI

The advanced configuration and power interface (ACPI) 4.0 standard is supported.

Front Panel

The front panel controller provides status indications and control buttons

Cooling

Eight hot-swappable fan modules for front-to-rear cooling.

PCIe I/O

Horizontal PCIe expansion slots are supported by PCIe riser assemblies. The server supports either of the following configurations:

- One half-height riser card in PCIe Riser 1

- Three half-height riser cards in PCIe Riser 1, 2, 3

- Two full-height riser cards

InfiniBand

The PCIe bus slots in this server support the InfiniBand architecture.

Expansion Slots

Three half-height riser slots

- Riser 1 (controlled by CPU 1): One x16 PCIe Gen4 Slot, (Cisco VIC), half-height, 3/4 length

- Riser 2 (controlled by CPU 1): One x16 PCIe Gen4 Slot, electrical x8, half-height, 3/4 length

- Riser 3 (controlled by CPU 1): One x16 PCIe Gen4 Slot, (Cisco VIC), half-height, 3/4 length

Two full-height riser slots

- Riser 1 (controlled by CPU 1): One x16 PCIe Gen4 Slot, (Cisco VIC), full-height, 3/4 length

- Riser 3 (controlled by CPU 1): One x16 PCIe Gen4 Slot, (Cisco VIC), full-height, 3/4 length

Interfaces

Rear panel:

- One 1Gbase-T RJ-45 management port

- One RS-232 serial port (RJ45 connector)

- One DB15 VGA connector

- Two USB 3.0 port connectors

- One flexible modular LAN on motherboard (mLOM) slot that can accommodate various interface cards

Front panel:

- One KVM console connector (supplies two USB 2.0 connectors, one

- VGA DB15 video connector, and one serial port (RS232) RJ45 connector)

Storage, front-panel

The server is orderable in two different versions, each with a different front panel/drive-backplane configuration.

- Cisco HyperFlex C225 M6 node (HX-C225-M6S)—Small form-factor (SFF) drives, with 10-drive backplane. Supports up to 10 2.5-inch SAS/SATA drives.

- Cisco HyperFlex C225 M6 node (HX-C225-M6N)—SFF drives, with 10-drive backplane.

Internal Storage Devices

Apart from the front panel, server supports a mini-storage module connector on the motherboard supports a boot-optimized RAID controller carrier that holds up two SATA M.2 SSDs. Mixing different capacity SATA M.2 SSDs is not supported. It also supports USB3.0 TypeA connector.

Integrated Management Processor

Baseboard Management Controller (BMC) running Cisco Integrated Management Controller (CIMC) firmware.

Depending on your CIMC settings, the CIMC can be accessed through the 1GE dedicated management port, the 1GE/10GE LOM ports, or a Cisco virtual interface card (VIC).

CIMC manages certain components within the server, such as the Cisco 12G SAS HBA.

Storage Controllers

The Cisco 12G SAS RAID controller or Cisco 12G SAS HBA plugs into a dedicated slot. Only one of these at a time can be used at a time.

- Cisco 12G SAS RAID controller

- RAID support (RAID 0, 1, 5, 6, 10, 50, 60, SRAID0, and JBOD mode)

- Supports up to 10 internal SAS/SATA drives

- Plugs into drive backplane

- Cisco 12G SAS HBA

- No RAID support

- JBOD/Pass-through Mode support

- Supports up to 10 SAS/SATA internal drives

- Plugs into drive backplane

Modular LAN over Motherboard (mLOM) slot

The dedicated mLOM slot on the motherboard can flexibly accommodate the following cards:

- Cisco Virtual Interface Cards (VICs)

Intersight

Intersight provides server management capabilities

Chapter 2. Installing the Node

- Installing the Server in a Rack

- Initial Server Setup

- NIC Mode and NIC Redundancy Settings

- Updating the BIOS and Cisco IMC Firmware

- Accessing the System BIOS

- Smart Access Serial

- Smart Access USB

Installation Warnings and Guidelines

Note

Before you install, operate, or service a server, review the Regulatory Compliance and Safety Information for Cisco UCS C-Series Servers for important safety information.

Warning

IMPORTANT SAFETY INSTRUCTIONS

This warning symbol means danger. You are in a situation that could cause bodily injury. Before you work on any equipment, be aware of the hazards involved with electrical circuitry and be familiar with standard practices for preventing accidents. Use the statement number provided at the end of each warning to locate its translation in the translated safety warnings that accompanied this device.

Statement 1071

Warning

To prevent the system from overheating, do not operate it in an area that exceeds the maximum recommended ambient temperature of: 35° C (95° F).

Statement 1047

Warning

The plug-socket combination must be accessible at all times, because it serves as the main disconnecting device.

Statement 1019

Warning

This product relies on the building’s installation for short-circuit (overcurrent) protection. Ensure that the protective device is rated not greater than: 250 V, 15 A.

Statement 1005

Warning

Installation of the equipment must comply with local and national electrical codes.

Statement 1074

Warning

This unit is intended for installation in restricted access areas. A restricted access area can be accessed only through the use of a special tool, lock, and key, or other means of security.

Statement 1017

Caution

To ensure proper airflow it is necessary to rack the servers using rail kits. Physically placing the units on top of one another or “stacking” without the use of the rail kits blocks the air vents on top of the servers, which could result in overheating, higher fan speeds, and higher power consumption. We recommend that you mount your servers on rail kits when you are installing them into the rack because these rails provide the minimal spacing required between the servers. No additional spacing between the servers is required when you mount the units using rail kits.

Caution

Avoid uninterruptible power supply (UPS) types that use ferroresonant technology. These UPS types can become unstable with systems such as the Cisco UCS, which can have substantial current draw fluctuations from fluctuating data traffic patterns.

When you are installing a server, use the following guidelines:

- Plan your site configuration and prepare the site before installing the server. See the Cisco UCS Site Preparation Guide for the recommended site planning tasks.

- Ensure that there is adequate space around the server to allow for accessing the server and for adequate airflow. The airflow in this server is from front to back.

- Ensure that the air-conditioning meets the thermal requirements listed in the Environmental Specifications.

- Ensure that the cabinet or rack meets the requirements listed in the Rack Requirements.

- Ensure that the site power meets the power requirements listed in the Power Specifications. If available, you can use an uninterruptible power supply (UPS) to protect against power failures.

Rack Requirements

The rack must be of the following type:

- A standard 19-in. (48.3-cm) wide, four-post EIA rack, with mounting posts that conform to English universal hole spacing, per section 1 of ANSI/EIA-310-D-1992.

- The rack-post holes can be square 0.38-inch (9.6 mm), round 0.28-inch (7.1 mm), #12-24 UNC, or #10-32 UNC when you use the Cisco-supplied slide rails.

- The minimum vertical rack space per server must be one rack unit (RU), equal to 1.75 in. (44.45 mm).

Supported Cisco Slide Rail Kits

The server supports the following rail kit options:

- Cisco part HX-RAILB-M6= (ball-bearing slide rail kit)

- Cisco part HX-RAILF-M6= (friction slide rail kit)

- Cisco part HX-CMAF-M6= (cable management arm)

Rack Installation Tools Required

The slide rails sold by Cisco Systems for this server do not require tools for installation.

Slide Rail and Cable Management Arm Dimensions

The slide rails for this server have an adjustment range of 24 to 36 inches (610 to 914 mm).

The optional cable management arm (CMA) adds additional length requirements:

- The additional distance from the rear of the server to the rear of the CMA is 5.4 inches (137.4 mm).

- The total length of the server including the CMA is 35.2 inches (894 mm).

Installing the Server in a Rack

This section describes how to install the server in a rack using the supported rail kit (HX-RAIL-M6) that is sold by Cisco.

Warning

To prevent bodily injury when mounting or servicing this unit in a rack, you must take special precautions to ensure that the system remains stable. The following guidelines are provided to ensure your safety:

This unit should be mounted at the bottom of the rack if it is the only unit in the rack.

When mounting this unit in a partially filled rack, load the rack from the bottom to the top with the heaviest component at the bottom of the rack.

If the rack is provided with stabilizing devices, install the stabilizers before mounting or servicing the unit in the rack.

Statement 1006

Procedure

Step 1

Attach the inner rails to the sides of the server:

1. Align an inner rail with one side of the server so that the three keyed slots in the rail align with the three pegs on the side of the server.

2. Set the keyed slots over the pegs, and then slide the rail toward the front to lock it in place on the pegs.

3. Install the second inner rail to the opposite side of the server.

Attaching the Inner Rail to the Side of the Server

1

Keyed slots in rail

2

Front of server slides into keyed slots

Step 2

Open the front securing plate on both slide-rail assemblies. The front end of the slide-rail assembly has a spring-loaded securing plate that must be open before you can insert the mounting pegs into the rack-post holes.

On the outside of the assembly, push the green-arrow button toward the rear to open the securing plate.

Front Securing Mechanism, Inside of Front End

1

Front mounting pegs

3

Securing plate shown pulled back to the open position

2

Rack post between mounting pegs and opened securing plate

-

Step 3

Install the outer slide rails into the rack:

1. Align one slide-rail assembly front end with the front rack-post holes that you want to use.

The slide rail front-end wraps around the outside of the rack post and the mounting pegs enter the rack-post holes from the outside-front.

Note

The rack post must be between the mounting pegs and the open securing plate.

2. Push the mounting pegs into the rack-post holes from the outside-front.

3. Press the securing plate release button, marked PUSH. The spring-loaded securing plate closes to lock the pegs in place.

4. Adjust the slide-rail length, and then push the rear mounting pegs into the corresponding rear rack-post holes. The slide rail must be level front-to-rear.

The rear mounting pegs enter the rear rack-post holes from the inside of the rack post.

5. Attach the second slide-rail assembly to the opposite side of the rack. Ensure that the two slide-rail assemblies are at the same height and are level front-to-back.

6. Pull the inner slide rails on each assembly out toward the rack front until they hit the internal stops and lock in place.

Step 4

Insert the server into the slide rails:

Caution

This server can weigh up to 60 pounds (27 kilograms) when fully loaded with components. We recommend that you use a minimum of two people or a mechanical lift when lifting the server. Attempting this procedure alone could result in personal injury or equipment damage.

1. Align the rear ends of the inner rails that are attached to the server sides with the front ends of the empty slide rails on the rack.

2. Push the inner rails into the slide rails on the rack until they stop at the internal stops.

3. Slide the inner-rail release clip toward the rear on both inner rails, and then continue pushing the server into the rack until its front slam-latches engage with the rack posts.

Inner-Rail Release Clip

1

Inner-rail release clip

3

Outer slide rail attached to rack post

2

Inner rail attached to server and inserted into outer slide rail

-

Step 5

(Optional) Secure the server in the rack more permanently by using the two screws that are provided with the slide rails. Perform this step if you plan to move the rack with servers installed.

With the server fully pushed into the slide rails, open a hinged slam latch lever on the front of the server and insert a screw through the hole that is under the lever. The screw threads into the static part of the rail on the rack post and prevents the server from being pulled out. Repeat for the opposite slam latch.

Step 6

(Optional) If applicable, do the following:

1. Attach the cable management arm. Go to Installing the Cable Management Arm (Optional) or Reversing the Cable Management Arm (Optional).

2. Attach the locking bezel.

- Installing the Cable Management Arm (Optional)

- Reversing the Cable Management Arm (Optional)

Installing the Cable Management Arm (Optional)

Note

The cable management arm (CMA) is reversible left-to-right. To reverse the CMA, see Reversing the Cable Management Arm (Optional) before installation.

Procedure

Step 1

With the server pushed fully into the rack, slide the CMA tab of the CMA arm that is farthest from the server onto the end of the stationary slide rail that is attached to the rack post. Slide the tab over the end of the rail until it clicks and locks.

Attaching the CMA to the Rear Ends of the Slide Rails

1

CMA tab on arm farthest from server attaches to end of stationary outer slide rail.

3

CMA tab on width-adjustment slider attaches to end of stationary outer slide rail.

2

CMA tab on arm closest to the server attaches to end of inner slide rail attached to server.

4

Rear of server

Step 2

Slide the CMA tab that is closest to the server over the end of the inner rail that is attached to the server. Slide the tab over the end of the rail until it clicks and locks

Step 3

Pull out the width-adjustment slider that is at the opposite end of the CMA assembly until it matches the width of your rack.

Step 4

Slide the CMA tab that is at the end of the width-adjustment slider onto the end of the stationary slide rail that is attached to the rack post. Slide the tab over the end of the rail until it clicks and locks.

Step 5

Open the hinged flap at the top of each plastic cable guide and route your cables through the cable guides as desired.

Reversing the Cable Management Arm (Optional)

Procedure

Step 1

Rotate the entire CMA assembly 180 degrees, left-to-right. The plastic cable guides must remain pointing upward.

Step 2

Flip the tabs at the ends of the CMA arms so that they point toward the rear of the server.

Step 3

Pivot the tab that is at the end of the width-adjustment slider. Depress and hold the metal button on the outside of the tab and pivot the tab 180 degrees so that it points toward the rear of the server.

Reversing the CMA

1

CMA tab on end of width-adjustment slider

2

Metal button on outside of tab

Initial Server Setup

Note

This section describes how to power on the server, assign an IP address, and connect to server management when using the server in standalone mode.

Server Default Settings

The server is shipped with these default settings:

- If the server does not have any VIC card, the default NIC mode is Dedicated. If the server has a VIC card in Riser 1 slot, the default NIC mode is OCP, but the VIC precedence first goes to MLOM, then Riser 1, and then Riser 2.

If you want to use the dedicated management ports to access Cisco IMC, you can connect to the server and change the NIC mode as described in Setting Up the System With the Cisco IMC Configuration Utility.

- In Dedicated mode, NIC redundancy is set to None. In Cisco Card mode, the NIC redundancy is set to Active-Active. All Ethernet ports are utilized simultaneously.

- DHCP is enabled.

- IPv4 and IPv6 are enabled.

Connection Methods

There are two methods for connecting to the system for initial setup:

- Local setup—Use this procedure if you want to connect a keyboard and monitor directly to the system for setup. This procedure can use the VGA and USB ports on the front of the server.

- Remote setup—Use this procedure if you want to perform setup through your dedicated management LAN.

Note

To configure the system remotely, you must have a DHCP server on the same network as the system. Your DHCP server must be preconfigured with the range of MAC addresses for this server node. The MAC address is printed on a label that is on the pull-out asset tag on the front panel. This server node has a range of six MAC addresses assigned to the Cisco IMC. The MAC address printed on the label is the beginning of the range of six contiguous MAC addresses.

- Connecting to the Server Locally For Setup

- Connecting to the Server Remotely For Setup

- Setting Up the System With the Cisco IMC Configuration Utility

Connecting to the Server Locally For Setup

This procedure requires the following equipment:

- VGA monitor

- USB keyboard

- Either the supported Cisco KVM cable (Cisco PID N20-BKVM); or a USB cable and VGA DB-15 cable

Procedure

Step 1

Attach a power cord to each power supply in your server, and then attach each power cord to a grounded power outlet.

Wait for approximately two minutes to let the server boot to standby power during the first bootup. You can verify system power status by looking at the system Power Status LED on the front panel. The system is in standby power mode when the LED is amber.

Step 2

Connect a USB keyboard and VGA monitor to the server using one of the following methods:

- Connect an optional KVM cable (Cisco PID N20-BKVM) to the KVM connector on the front panel. Connect your USB keyboard and VGA monitor to the KVM cable.

- Connect a USB keyboard and VGA monitor to the corresponding connectors on the rear panel.

Step 3

Open the Cisco IMC Configuration Utility:

1. Press and hold the front panel power button for four seconds to boot the server.

2. During bootup, press F8 when prompted to open the Cisco IMC Configuration Utility.

Note

The first time that you enter the Cisco IMC Configuration Utility, you are prompted to change the default password. The default password is password. The Strong Password feature is enabled.

The following are the requirements for Strong Password:

- The password can have minimum 8 characters; maximum 14 characters.

- The password must not contain the user’s name.

- The password must contain characters from three of the following four categories:

- English uppercase letters (A through Z)

- English lowercase letters (a through z)

- Base 10 digits (0 through 9)

- Non-alphabetic characters !, @, #, $, %, ^, &, *, -, _, =, “

Step 4

Continue with Setting Up the System With the Cisco IMC Configuration Utility.

Connecting to the Server Remotely For Setup

This procedure requires the following equipment:

- One RJ-45 Ethernet cable that is connected to your management LAN.

Before you begin

Note

To configure the system remotely, you must have a DHCP server on the same network as the system. Your DHCP server must be preconfigured with the range of MAC addresses for this server node. The MAC address is printed on a label that is on the pull-out asset tag on the front panel. This server node has a range of six MAC addresses assigned to the Cisco IMC. The MAC address printed on the label is the beginning of the range of six contiguous MAC addresses.

Procedure

Step 1

Attach a power cord to each power supply in your server, and then attach each power cord to a grounded power outlet.

Wait for approximately two minutes to let the server boot to standby power during the first bootup. You can verify system power status by looking at the system Power Status LED on the front panel. The system is in standby power mode when the LED is amber.

Step 2

Plug your management Ethernet cable into the dedicated management port on the rear panel.

Step 3

Allow your preconfigured DHCP server to assign an IP address to the server node.

Step 4

Use the assigned IP address to access and log in to the Cisco IMC for the server node. Consult with your DHCP server administrator to determine the IP address.

Note

The default user name for the server is admin. The default password is password.

Step 5

From the Cisco IMC Server Summary page, click Launch KVM Console. A separate KVM console window opens.

Step 6

From the Cisco IMC Summary page, click Power Cycle Server. The system reboots.

Step 7

Select the KVM console window.

Note

The KVM console window must be the active window for the following keyboard actions to work.

Step 8

When prompted, press F8 to enter the Cisco IMC Configuration Utility. This utility opens in the KVM console window.

Note

The first time that you enter the Cisco IMC Configuration Utility, you are prompted to change the default password. The default password is password. The Strong Password feature is enabled.

The following are the requirements for Strong Password:

- The password can have minimum 8 characters; maximum 14 characters.

- The password must not contain the user’s name.

- The password must contain characters from three of the following four categories:

- English uppercase letters (A through Z)

- English lowercase letters (a through z)

- Base 10 digits (0 through 9)

- Non-alphabetic characters !, @, #, $, %, ^, &, *, -, _, =, “

Step 9

Continue with Setting Up the System With the Cisco IMC Configuration Utility.

Setting Up the System With the Cisco IMC Configuration Utility

Before you begin

The following procedure is performed after you connect to the system and open the Cisco IMC Configuration Utility.

Procedure

Step 1

Set the NIC mode to choose which ports to use to access Cisco IMC for server management:

- Shared LOM EXT (default)—This is the shared LOM extended mode, the factory-default setting. With this mode, the Shared LOM and Cisco Card interfaces are both enabled. You must select the default Active-Active NIC redundancy setting in the following step.

In this NIC mode, DHCP replies are returned to both the shared LOM ports and the Cisco card ports. If the system determines that the Cisco card connection is not getting its IP address from a Cisco UCS Manager system because the server is in standalone mode, further DHCP requests from the Cisco card are disabled. Use the Cisco Card NIC mode if you want to connect to Cisco IMC through a Cisco card in standalone mode.

- Shared LOM—The 1-Gb/10-Gb Ethernet ports are used to access Cisco IMC. You must select either the Active-Active or Active-standby NIC redundancy setting in the following step.

- Dedicated—The dedicated management port is used to access Cisco IMC. You must select the None NIC redundancy setting in the following step.

- Cisco Card—The ports on an installed Cisco UCS Virtual Interface Card (VIC) are used to access the Cisco IMC. You must select either the Active-Active or Active-standby NIC redundancy setting in the following step.

See also the required VIC Slot setting below.

- VIC Slot—Only if you use the Cisco Card NIC mode, you must select this setting to match where your VIC is installed. The choices are Riser1, Riser2, or Flex-LOM (the mLOM slot).

- If you select Riser1, you must install the VIC in slot 1.

- If you select Riser2, you must install the VIC in slot 2.

- If you select Flex-LOM, you must install an mLOM-style VIC in the mLOM slot.

Step 2

Set the NIC redundancy to your preference. This server has three possible NIC redundancy settings:

- None—The Ethernet ports operate independently and do not fail over if there is a problem. This setting can be used only with the Dedicated NIC mode.

- Active-standby—If an active Ethernet port fails, traffic fails over to a standby port. Shared LOM and Cisco Card modes can each use either Active-standby or Active-active settings.

- Active-active (default)—All Ethernet ports are utilized simultaneously. The Shared LOM EXT mode must use only this NIC redundancy setting. Shared LOM and Cisco Card modes can each use either Active-standby or Active-active settings.

Step 3

Choose whether to enable DHCP for dynamic network settings, or to enter static network settings.

Note

Before you enable DHCP, you must preconfigure your DHCP server with the range of MAC addresses for this server. The MAC address is printed on a label on the rear of the server. This server has a range of six MAC addresses assigned to Cisco IMC. The MAC address printed on the label is the beginning of the range of six contiguous MAC addresses.

The static IPv4 and IPv6 settings include the following:

- The Cisco IMC IP address.

For IPv6, valid values are 1 - 127.

- The gateway.

For IPv6, if you do not know the gateway, you can set it as none by entering :: (two colons).

- The preferred DNS server address.

For IPv6, you can set this as none by entering :: (two colons).

Step 4

(Optional) Make VLAN settings.

Step 5

Press F1 to go to the second settings window, then continue with the next step.

From the second window, you can press F2 to switch back to the first window.

Step 6

(Optional) Set a hostname for the server.

Step 7

(Optional) Enable dynamic DNS and set a dynamic DNS (DDNS) domain.

Step 8

(Optional) If you check the Factory Default check box, the server reverts to the factory defaults.

Step 9

(Optional) Set a default user password.

Note

The factory default username for the server is admin. The default password is password.

Step 10

(Optional) Enable auto-negotiation of port settings or set the port speed and duplex mode manually.

Note

Auto-negotiation is applicable only when you use the Dedicated NIC mode. Auto-negotiation sets the port speed and duplex mode automatically based on the switch port to which the server is connected. If you disable auto-negotiation, you must set the port speed and duplex mode manually.

Step 11

(Optional) Reset port profiles and the port name.

Step 12

Press F5 to refresh the settings that you made. You might have to wait about 45 seconds until the new settings appear and the message, “Network settings configured” is displayed before you reboot the server in the next step.

Step 13

Press F10 to save your settings and reboot the server.

Note

If you chose to enable DHCP, the dynamically assigned IP and MAC addresses are displayed on the console screen during bootup.

What to do next

Use a browser and the IP address of the Cisco IMC to connect to the Cisco IMC management interface. The IP address is based upon the settings that you made (either a static address or the address assigned by your DHCP server).

Note

The factory default username for the server is admin. The default password is password.

To manage the server, see the Cisco UCS C-Series Rack-Mount Server Configuration Guide or the Cisco UCS C-Series Rack-Mount Server CLI Configuration Guide for instructions on using those interfaces for your Cisco IMC release. The links to the configuration guides are in the Cisco UCS C-Series Documentation Roadmap.

NIC Mode and NIC Redundancy Settings

Valid NIC Redundancy Settings For Each NIC Mode

NIC Mode

Valid NIC Redundancy Settings

Shared LOM EXT

Active-active

Dedicated

None

Shared LOM

Active-active

Active-standby

Cisco Card

Active-active

Active-standby

Share OCP

Active-active

Active-standby

Share OCP Extended

Active-active

Active-standby

This server has the following NIC mode settings that you can choose from:

- Shared LOM EXT—This is the shared LOM extended mode, the factory-default setting. With this mode, the Shared LOM and Cisco Card interfaces are both enabled. You must select the default Active-Active NIC redundancy setting in the following step.

In this NIC mode, DHCP replies are returned to both the shared LOM ports and the Cisco card ports. If the system determines that the Cisco card connection is not getting its IP address from a Cisco UCS Manager system because the server is in standalone mode, further DHCP requests from the Cisco card are disabled. Use the Cisco Card NIC mode if you want to connect to Cisco IMC through a Cisco card in standalone mode.

- Shared LOM—The 1-Gb/10-Gb Ethernet ports are used to access Cisco IMC. You must select either the Active-Active or Active-standby NIC redundancy setting in the following step.

- Dedicated—The dedicated management port is used to access Cisco IMC. You must select the None NIC redundancy setting in the following step.

- Cisco Card—The ports on an installed Cisco UCS Virtual Interface Card (VIC) are used to access the Cisco IMC. You must select either the Active-Active or Active-standby NIC redundancy setting in the following step.

See also the required VIC Slot setting below.

- Shared OCP—The OCP adapter card LOM ports are used to access Cisco IMC. You must select either the Active-Active or Active-standby NIC redundancy setting in the following step.

- Shared OCP Extended—In this NIC mode, DHCP replies are returned to both the OCP adapter card LOM ports and the Cisco virtual interface card (VIC) ports. If the system determines that the Cisco VIC connection is not getting its IP address from a Cisco UCS Manager system because the server is in standalone mode, further DHCP requests from the Cisco VIC are disabled.

Default NIC Mode Setting:

- if the server has a Cisco VIC card with OCP card, then the default NIC mode is Shared OCP Extended and NIC Redundancy is set to active-active.

- if the server has VIC card populated in NCSI supported slots and no OCP card, then the default NIC mode is Cisco Card.

- if the server does not have any VIC card and OCP card, the default NIC mode is Dedicated and NIC Redundancy is set to None.

VIC slot options are as follows:

- Riser 1—Slot 1 is selected.

- Riser 3 —Slot 3 is selected.

- mLOM

Note

After resetting to factory default settings, the slot precedence is as follows:

1. mLOM

2. Riser 1 - Slot 1

3. Riser 3 - Slot 3

This server has the following NIC redundancy settings that you can choose from:

- None—The Ethernet ports operate independently and do not fail over if there is a problem. This setting can be used only with the Dedicated NIC mode.

- Active-standby—If an active Ethernet port fails, traffic fails over to a standby port. Shared LOM and Cisco Card modes can each use either Active-standby or Active-active settings.

- Active-active (default)—All Ethernet ports are utilized simultaneously. The Shared LOM EXT mode must use only this NIC redundancy setting. Shared LOM and Cisco Card modes can each use either Active-standby or Active-active settings.

Updating the BIOS and Cisco IMC Firmware

Caution

When you upgrade the BIOS firmware, you must also upgrade the Cisco IMC firmware to the same version or the server does not boot. Do not power off the server until the BIOS and Cisco IMC firmware are matching or the server does not boot.

Cisco provides the Cisco Host Upgrade Utility to assist with simultaneously upgrading the BIOS, Cisco IMC, and other firmware to compatible levels.

The server uses firmware obtained from and certified by Cisco. Cisco provides release notes with each firmware image. There are several possible methods for updating the firmware:

- Recommended method for firmware update: Use the Cisco Host Upgrade Utility to simultaneously upgrade the Cisco IMC, BIOS, and component firmware to compatible levels.

See the Cisco Host Upgrade Utility Quick Reference Guide for your firmware release at the documentation roadmap link below.

- You can upgrade the Cisco IMC and BIOS firmware by using the Cisco IMC GUI interface.

See the Cisco UCS C-Series Rack-Mount Server Configuration Guide.

- You can upgrade the Cisco IMC and BIOS firmware by using the Cisco IMC CLI interface.

See the Cisco UCS C-Series Rack-Mount Server CLI Configuration Guide.

For links to the documents listed above, see the Cisco UCS C-Series Documentation Roadmap.

Accessing the System BIOS

Procedure

Step 1

Enter the BIOS Setup Utility by pressing the F2 key when prompted during bootup.

Note

The version and build of the current BIOS are displayed on the Main page of the utility.

Step 2

Use the arrow keys to select the BIOS menu page.

Step 3

Highlight the field to be modified by using the arrow keys.

Step 4

Press Enter to select the field that you want to change, and then modify the value in the field.

Step 5

Press the right arrow key until the Exit menu screen is displayed.

Step 6

Follow the instructions on the Exit menu screen to save your changes and exit the setup utility (or press F10). You can exit without saving changes by pressing Esc.

Smart Access Serial

This server supports the Smart Access Serial feature. This feature allows you to switch between host serial and Cisco IMC CLI.

- This feature has the following requirements:

- A serial cable connection, which can use either the RJ-45 serial connector on the server rear panel, or a DB-9 connection when using the KVM cable (Cisco PID N20-BKVM) on the front-panel KVM console connector.

- Console redirection must be enabled in the server BIOS.

- Terminal type must be set to VT100+ or VTUFT8.

- Serial-over-LAN (SOL) must be disabled (SOL is disabled by default).

- To switch from host serial to Cisco IMC CLI, press Esc+9.

You must enter your Cisco IMC credentials to authenticate the connection.

- To switch from Cisco IMC CLI to host serial, press Esc+8.

Note

You cannot switch to Cisco IMC CLI if the serial-over-LAN (SOL) feature is enabled.

- After a session is created, it is shown in the CLI or web GUI by the name serial.

Smart Access USB

This server supports the Smart Access USB feature. The board management controller (BMC) in this server can accept a USB mass storage device and access the data on it. This feature allows you to use the front-panel USB device as a medium to transfer data between the BMC and the user without need for network connectivity. This can be useful, for example, when remote BMC interfaces are not yet available, or are not accessible due to network misconfiguration.

- This feature has the following requirements:

- The KVM cable (Cisco PID N20-BKVM) connected to the front panel KVM console connector.

- A USB storage device connected to one of the USB 2.0 connectors on the KVM cable. The USB device must draw less than 500 mA to avoid disconnect by the current-protection circuit.

Note

Any mouse or keyboard that is connected to the KVM cable is disconnected when you enable Smart Access USB.

- You can use USB 3.0-based devices, but they will operate at USB 2.0 speed.

- We recommend that the USB device have only one partition.

- The file system formats supported are: FAT16, FAT32, MSDOS, EXT2, EXT3, and EXT4. NTFS is not supported.

- The front-panel KVM connector has been designed to switch the USB port between Host OS and BMC.

- Smart Access USB can be enabled or disabled using any of the BMC user interfaces. For example, you can use the Cisco IMC Configuration Utility that is accessed by pressing F8 when prompted during bootup.

- Enabled: the front-panel USB device is connected to the BMC.

- Disabled: the front-panel USB device is connected to the host.

- In a case where no management network is available to connect remotely to Cisco IMC, a Device Firmware Update (DFU) shell over serial cable can be used to generate and download technical support files to the USB device that is attached to front panel USB port.

Chapter 3. Maintaining the Server

- Status LEDs and Buttons

- Preparing For Component Installation

- Removing and Replacing Components

- Replacing SAS/SATA Hard Drives or Solid State Drives

- Replacing Fan Modules

- Replacing CPUs and Heatsinks

- Replacing Memory DIMMs

- Replacing a Mini-Storage Module

- Replacing a USB Drive

- Replacing the RTC Battery

- Replacing Power Supplies

- Replacing a PCIe Riser

- Replacing a PCIe Card

- Cisco VIC mLOM and OCP Card Replacement Considerations

- Replacing an mLOM Card

- Replacing a SAS Storage Controller Card (RAID or HBA)

- Replacing the Supercap (RAID Backup)

- Replacing a Cisco Boot-Optimized M.2 RAID Controller

- Replacing a Chassis Intrusion Switch

- Installing a Trusted Platform Module (TPM)

- Removing the PCB Assembly (PCBA)

- Service DIP Switch, Headers and Jumpers

Status LEDs and Buttons

This section contains information for interpreting front, rear, and internal LED states.

- Front-Panel LEDs

- Rear-Panel LEDs

- Internal Diagnostic LEDs

Front-Panel LEDs

Front Panel LEDs, Definition of States

LED Name

States

1

Power button/LED ()

- Off—There is no AC power to the server.

- Amber—The server is in standby power mode. Power is supplied only to the Cisco IMC and some motherboard functions.

- Green—The server is in main power mode. Power is supplied to all server components.

2

Unit identification ()

- Off—The unit identification function is not in use.

- Blue, blinking—The unit identification function is activated.

3

System health ()

- Green—The server is running in normal operating condition.

- Green, blinking—The server is performing system initialization and memory check.

- Amber, steady—The server is in a degraded operational state (minor fault). For example:

- Power supply redundancy is lost.

- CPUs are mismatched.

- At least one CPU is faulty.

- At least one DIMM is faulty.

- At least one drive in a RAID configuration failed.

- Amber, 2 blinks—There is a major fault with the system board.

- Amber, 3 blinks—There is a major fault with the memory DIMMs.

- Amber, 4 blinks—There is a major fault with the CPUs.

4

Power supply status ()

- Green—All power supplies are operating normally.

- Amber, steady—One or more power supplies are in a degraded operational state.

- Amber, blinking—One or more power supplies are in a critical fault state.

5

Fan status ()

- Green—All fan modules are operating properly.

- Amber, blinking—One or more fan modules breached the non-recoverable threshold.

6

Network link activity ()

- Off—The Ethernet LOM port link is idle.

- Green—One or more Ethernet LOM ports are link-active, but there is no activity.

- Green, blinking—One or more Ethernet LOM ports are link-active, with activity.

7

Temperature status ()

- Green—The server is operating at normal temperature.

- Amber, steady—One or more temperature sensors breached the critical threshold.

- Amber, blinking—One or more temperature sensors breached the non-recoverable threshold.

Rear-Panel LEDs

Rear Panel LEDs, Definition of States

LED Name

States

1

Rear unit identification

- Off—The unit identification function is not in use.

- Blue, blinking—The unit identification function is activated.

2

1-Gb Ethernet dedicated management link speed

- Off—Link speed is 10 Mbps.

- Amber—Link speed is 100 Mbps.

- Green—Link speed is 1 Gbps.

3

1-Gb Ethernet dedicated management link status

- Off—No link is present.

- Green—Link is active.

- Green, blinking—Traffic is present on the active link.

4

Power supply status (one LED each power supply unit)

AC power supplies:

- Off—No AC input (12 V main power off, 12 V standby power off).

- Green, blinking—12 V main power off; 12 V standby power on.

- Green, solid—12 V main power on; 12 V standby power on.

- Amber, blinking—Warning threshold detected but 12 V main power on.

- Amber, solid—Critical error detected; 12 V main power off (for example, over-current, over-voltage, or over-temperature failure).

DC power supplies:

- Off—No DC input (12 V main power off, 12 V standby power off).

- Green, blinking—12 V main power off; 12 V standby power on.

- Green, solid—12 V main power on; 12 V standby power on.

- Amber, blinking—Warning threshold detected but 12 V main power on.

- Amber, solid—Critical error detected; 12 V main power off (for example, over-current, over-voltage, or over-temperature failure).

Internal Diagnostic LEDs

The server has internal fault LEDs for CPUs, DIMMs, and fan modules.

Internal Diagnostic LED Locations

1

Fan module fault LEDs (one behind each fan connector on the motherboard)

- Amber—Fan has a fault or is not fully seated.

- Green—Fan is OK.

2

DIMM fault LEDs (one behind each DIMM socket on the motherboard)

These LEDs operate only when the server is in standby power mode.

- Amber—DIMM has a fault.

- Off—DIMM is OK.

3

CPU fault LEDs (one behind each CPU socket on the motherboard).

These LEDs operate only when the server is in standby power mode.

- Amber—CPU has a fault.

- Off—CPU is OK.

-

Preparing For Component Installation

This section includes information and tasks that help prepare the server for component installation.

- Required Equipment For Service Procedures

- Shutting Down and Removing Power From the Server

- Removing the Server Top Cover

- Hot Swap vs Hot Plug

Required Equipment For Service Procedures

The following tools and equipment are used to perform the procedures in this chapter:

- T-30 Torx driver (supplied with replacement CPUs for heatsink removal)

- #1 flat-head screwdriver (supplied with replacement CPUs for heatsink removal)

- #1 Phillips-head screwdriver (for M.2 SSD and intrusion switch replacement)

- Electrostatic discharge (ESD) strap or other grounding equipment such as a grounded mat

Shutting Down and Removing Power From the Server

The server can run in either of two power modes:

- Main power mode—Power is supplied to all server components and any operating system on your drives can run.

- Standby power mode—Power is supplied only to the service processor and certain components. It is safe for the operating system and data to remove power cords from the server in this mode.

Caution

After a server is shut down to standby power, electric current is still present in the server. To completely remove power as directed in some service procedures, you must disconnect all power cords from all power supplies in the server.

You can shut down the server by using the front-panel power button or the software management interfaces.

- Shutting Down Using the Power Button

- Shutting Down Using The Cisco IMC GUI

- Shutting Down Using The Cisco IMC CLI

Shutting Down Using the Power Button

Procedure

Step 1

Check the color of the Power button/LED:

- Amber—The server is already in standby mode and you can safely remove power.

- Green—The server is in main power mode and must be shut down before you can safely remove power.

Step 2

Invoke either a graceful shutdown or a hard shutdown:

Caution

To avoid data loss or damage to your operating system, you should always invoke a graceful shutdown of the operating system.

- Graceful shutdown—Press and release the Power button. The operating system performs a graceful shutdown and the server goes to standby mode, which is indicated by an amber Power button/LED.

- Emergency shutdown—Press and hold the Power button for 4 seconds to force the main power off and immediately enter standby mode.

Step 3

If a service procedure instructs you to completely remove power from the server, disconnect all power cords from the power supplies in the server.

Shutting Down Using The Cisco IMC GUI

You must log in with user or admin privileges to perform this task.

Procedure

Step 1

In the Navigation pane, click the Server tab.

Step 2

On the Server tab, click Summary.

Step 3

In the Actions area, click Power Off Server.

Step 4

Click OK.

The operating system performs a graceful shutdown and the server goes to standby mode, which is indicated by an amber Power button/LED.

Step 5

If a service procedure instructs you to completely remove power from the server, disconnect all power cords from the power supplies in the server.

Shutting Down Using The Cisco IMC CLI

You must log in with user or admin privileges to perform this task.

Procedure

Step 1

At the server prompt, enter:

Example:

server# scope chassis

Step 2

At the chassis prompt, enter:

Example:

server/chassis# power shutdown

The operating system performs a graceful shutdown and the server goes to standby mode, which is indicated by an amber Power button/LED.

Step 3

If a service procedure instructs you to completely remove power from the server, disconnect all power cords from the power supplies in the server.

Removing the Server Top Cover

Procedure

Step 1

Remove the top cover:

1. If the cover latch is locked, slide the lock sideways to unlock it.

When the latch is unlocked, the handle pops up so that you can grasp it.

2. Lift on the end of the latch so that it pivots vertically to 90 degrees.

3. Simultaneously, slide the cover back and lift the top cover straight up from the server and set it aside.

Step 2

Replace the top cover:

1. With the latch in the fully open position, place the cover on top of the server a few inches behind the lip of the front cover panel.

2. Slide the cover forward until the latch makes contact.

3. Press the latch down to the closed position. The cover is pushed forward to the closed position as you push down the latch.

4. Lock the latch by sliding the lock button to sideways to the left.

Locking the latch ensures that the server latch handle does not protrude when you install the blade.

Removing the Top Cover

1

Cover lock

2

Cover latch handle

Hot Swap vs Hot Plug

Some components can be removed and replaced without shutting down and removing power from the server. This type of replacement has two varieties: hot-swap and hot-plug.

- Hot-swap replacement—You do not have to shut down the component in the software or operating system. This applies to the following components:

- SAS/SATA hard drives

- SAS/SATA solid state drives

- Cooling fan modules

- Power supplies (when redundant as 1+1)

Removing and Replacing Components

Warning

Blank faceplates and cover panels serve three important functions: they prevent exposure to hazardous voltages and currents inside the chassis; they contain electromagnetic interference (EMI) that might disrupt other equipment; and they direct the flow of cooling air through the chassis. Do not operate the system unless all cards, faceplates, front covers, and rear covers are in place.

Statement 1029

Caution

When handling server components, handle them only by carrier edges and use an electrostatic discharge (ESD) wrist-strap or other grounding device to avoid damage.

Tip

You can press the unit identification button on the front panel or rear panel to turn on a flashing, blue unit identification LED on both the front and rear panels of the server. This button allows you to locate the specific server that you are servicing when you go to the opposite side of the rack. You can also activate these LEDs remotely by using the Cisco IMC interface.

This section describes how to install and replace server components.

- Component Location

Component Location

This topic shows the locations of the field-replaceable components and service-related items. The view in the following figure shows the server with the top cover removed.

Cisco HyperFlex C225 M6 Node, Two Riser Configuration Component Locations

1

Front-loading drive bays 1–10 support SAS/SATA drives.

2

Cisco M6 12G SAS RAID card or Cisco M6 12G SAS HBA Controller

3

Cooling fan modules, eight.

Each fan is hot-swappable

4

SuperCap module mounting bracket

The SuperCap module (not shown) that mounts into this location provides RAID write-cache backup.

5

DIMM sockets on motherboard, 32 total, 16 per CPU

CPUs are arranged in groups of eight sockets above the top CPU and below the bottom CPU, and 16 sockets between the CPUs.

6

Motherboard CPU socket two (CPU2)

7

Motherboard CPU socket one (CPU1)

8

M.2 module connector

Supports a boot-optimized RAID controller with connectors for up to two SATA M.2 SSDs

9

Power Supply Units (PSUs), two

10

PCIe riser slot 2

11

PCIe riser slot 1

12

Modular LOM (mLOM) card bay on chassis floor (x16 PCIe lane)

Cisco HyperFlex C225 M6 Node Three Riser Configuration Serviceable Component Locations

1

Front-loading drive bays 1–10 support SAS/SATA drives.

2

Cisco M6 12G SAS RAID card or Cisco M6 12G SAS HBA Controller

3

Cooling fan modules, eight.

Each fan is hot-swappable

4

SuperCap module mounting bracket

The SuperCap module (not shown) that mounts into this location provides RAID write-cache backup.

5

DIMM sockets on motherboard, 32 total, 16 per CPU

CPUs are arranged in groups of eight sockets above the top CPU and below the bottom CPU, and 16 sockets between the CPUs.

6

Motherboard CPU socket two (CPU2)

7

Motherboard CPU socket one (CPU1)

8

M.2 module connector

Supports a boot-optimized RAID controller with connectors for up to two SATA M.2 SSDs

9

Power Supply Units (PSUs), two

10

PCIe riser slot 3

11

PCIe riser slot 2

12

Modular LOM (mLOM) card bay on chassis floor (x16 PCIe lane)

13

Modular LOM (mLOM) card bay on chassis floor (x16 PCIe lane)

Replacing SAS/SATA Hard Drives or Solid State Drives

Note

You do not have to shut down the server or drive to replace SAS/SATA hard drives or SSDs because they are hot-swappable. .

- SAS/SATA Drive Population Guidelines

- 4K Sector Format SAS/SATA Drives Considerations

- Replacing a SAS/SATA Drive

SAS/SATA Drive Population Guidelines

The server is orderable in two different versions, each with a different front panel/drive-backplane configuration.

- Cisco HX C220 M6 SAS/SATA (HX-C225-M6S)—Small form-factor (SFF) drives, with 10-drive backplane. Supports up to 10 2.5-inch SAS/SATA drives.

Drive bay numbering is shown in the following figures.

Drive Bay Numbering

Observe these drive population guidelines for optimum performance:

- When populating drives, add drives to the lowest-numbered bays first.

- Keep an empty drive blanking tray in any unused bays to ensure proper airflow.

- You can mix SAS/SATA hard drives and SAS/SATA SSDs in the same server. However, you cannot configure a logical volume (virtual drive) that contains a mix of hard drives and SSDs. That is, when you create a logical volume, it must contain all SAS/SATA hard drives or all SAS/SATA SSDs.

4K Sector Format SAS/SATA Drives Considerations

- You must boot 4K sector format drives in UEFI mode, not legacy mode. UEFI mode is the system default. Only if the mode has been changed and must be changed back to UEFI mode, see the following procedure.

- Do not configure 4K sector format and 512-byte sector format drives as part of the same RAID volume.

- For operating system support on 4K sector drives, see the interoperability matrix tool for your server: Hardware and Software Interoperability Matrix Tools

Replacing a SAS/SATA Drive

Procedure

Step 1

Remove the drive that you are replacing or remove a blank drive tray from the bay:

1. Press the release button on the face of the drive tray.

2. Grasp and open the ejector lever and then pull the drive tray out of the slot.

3. If you are replacing an existing drive, remove the four drive-tray screws that secure the drive to the tray and then lift the drive out of the tray.

Step 2

Install a new drive:

1. Place a new drive in the empty drive tray and install the four drive-tray screws.

2. With the ejector lever on the drive tray open, insert the drive tray into the empty drive bay.

3. Push the tray into the slot until it touches the backplane, and then close the ejector lever to lock the drive in place.

Replacing a Drive in a Drive Tray

1

Ejector lever

3

Drive tray screws (two on each side)

2

Release button

4

Drive removed from drive tray

Replacing Fan Modules

Tip

Each fan module has a fault LED next to the fan connector on the motherboard. This LED lights green when the fan is correctly seated and is operating OK. The LED lights amber when the fan has a fault or is not correctly seated.

Caution

You do not have to shut down or remove power from the server to replace fan modules because they are hot- swappable. However, to maintain proper cooling, do not operate the server for more than one minute with any fan module removed.

Procedure

Step 1

Remove an existing fan module:

1. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

2. Remove the top cover from the server as described in Removing the Server Top Cover.

3. Grasp the fan module at its front and rear finger-grips. Lift straight up to disengage its connector from the motherboard.

Step 2

Install a new fan module:

1. Set the new fan module in place. The arrow printed on the top of the fan module should point toward the rear of the server.

2. Press down gently on the fan module to fully engage it with the connector on the motherboard.

3. Replace the top cover to the server.

4. Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

Top View of Fan Module

Replacing CPUs and Heatsinks

This section contains CPU configuration rules and the procedure for replacing CPUs and heatsinks:

- CPU Configuration Rules

- Tools Required For CPU Replacement

- Replacing a CPU and Heatsink

- Additional CPU-Related Parts to Order with RMA Replacement CPUs

CPU Configuration Rules

This server has two CPU sockets on the motherboard. Each CPU supports eight DIM channels (16 DIMM slots).

- The server can operate with one CPU or two identical CPUs installed.

- The minimum configuration is that the server must have at least CPU 1 installed. Install CPU 1 first, and then CPU 2.

- The following restrictions apply when using a single-CPU configuration:

- Any unused CPU socket must have the protective dust cover from the factory in place.

- The maximum number of DIMMs is 16 (only CPU 1 channels A, B, C, D, E, F, G, and H).

Tools Required For CPU Replacement

You need the following tools and equipment for this procedure:

- T-20 Torx driver (for heatsink and CPU socket screws)

- Heatsink cleaning kit—Supplied with replacement CPU. Orderable separately as Cisco PID UCSX-HSCK=.

One cleaning kit can clean up to four CPUs.

- Thermal interface material (TIM)—Syringe supplied with replacement CPU. Use only if you are reusing your existing heatsink (new heatsinks have a pre-applied pad of TIM). Orderable separately as Cisco PID UCS-CPU-TIM=.

One TIM kit covers one CPU.

See also Additional CPU-Related Parts to Order with RMA Replacement CPUs.

Replacing a CPU and Heatsink

Caution

CPUs and their sockets are fragile and must be handled with extreme care to avoid damaging pins. The CPUs must be installed with heatsinks and thermal interface material to ensure cooling. Failure to install a CPU correctly might result in damage to the server.

Procedure

Step 1

Remove the existing CPU/heatsink assembly from the server:

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

4. Use the T-20 Torx driver that is supplied with the replacement CPU to loosen the four captive nuts that secure the assembly to the motherboard standoffs.

Note

Alternate loosening the heatsink nuts evenly so that the heatsink remains level as it is raised. Loosen the heatsink nuts in the order shown on the heatsink label: 4, 3, 2, 1, 6, 5.

5. Remove the heatsink.

6. Loosening the three socket frame screws.

7. Open the socket frame.

8. Open the rail frame.

9. Take out the CPU with carrier frame.

Step 2

Install the new CPU:

Caution

The CPU contacts and pins are extremely fragile. In this step, use extreme care to avoid touching or damaging the CPU contacts or the CPU socket pins.

1. Grasping the CPU only by the handling tab on its carrier frame, carefully slide it down into the open rail frame.

2. Gently close the rail frame down to the flat, closed position.

3. Gently close the socket frame down to the flat, closed position.

4. Tighten the three screws on the socket frame in this order: 1, 2, 3.

Step 3

Apply new TIM to the heatsink:

Note

The heatsink must have new TIM on the heatsink-to-CPU surface to ensure proper cooling and performance.

- If you are installing a new heatsink, it is shipped with a pre-applied pad of TIM. Go to step 5.

- If you are reusing a heatsink, you must remove the old TIM from the heatsink and then apply new TIM to the CPU surface from the supplied syringe. Continue with step a below.

1. Apply the cleaning solution that is included with the heatsink cleaning kit (UCSX-HSCK=) to the old TIM on the heatsink and let it soak for a least 15 seconds.

2. Wipe all of the TIM off the heatsink using the soft cloth that is included with the heatsink cleaning kit. Be careful to avoid scratching the heatsink surface.

3. Using the syringe of TIM provided with the new CPU (UCS-CPU-TIM=), apply 4 cubic centimeters of thermal interface material to the top of the CPU. Use the pattern shown below to ensure even coverage.

Thermal Interface Material Application Pattern

Caution

Use only the correct heatsink for your CPUs to ensure proper cooling.

Step 4

Install the heatsink to the CPU:

1. Align the heatsink over the CPU socket. Align the triangle-mark on the heatsink with the triangle-mark on the socket frame.

2. Use a T-20 Torx driver to tighten the six captive screws that secure the heatsink.

Caution

Alternate tightening the heatsink screws evenly so that the heatsink remains level while it is lowered. Tighten the heatsink screws in the order shown on the heatsink label (1, 2, 3, 4, 5, 6).

Step 5

Reconnect any cables that you removed.

Step 6

Power on the server.

Additional CPU-Related Parts to Order with RMA Replacement CPUs

When a return material authorization (RMA) of the CPU is done on a Cisco UCS C-Series server, additional parts might not be included with the CPU spare. The TAC engineer might need to add the additional parts to the RMA to help ensure a successful replacement.

Note

The following items apply to CPU replacement scenarios. If you are replacing a system chassis and moving existing CPUs to the new motherboard, you do not have to separate the heatsink from the CPU.

Scenario 1—You are reusing the existing heatsinks or moving CPUs and heatsinks to a new node:

- Heatsink cleaning kit (HX-HSCK=)

One cleaning kit can clean up to four CPUs.

- Thermal interface material (TIM) kit (HX-CPU-TIM=)

One TIM kit covers one CPU.

Scenario 2—You are replacing the existing heatsinks:

- Heatsink: HX-HSHP-225M6=

New heatsinks have a pre-applied pad of TIM.

- Heatsink cleaning kit (HX-HSCK=)

One cleaning kit can clean up to four CPUs.

A CPU heatsink cleaning kit is good for up to four CPU and heatsink cleanings. The cleaning kit contains two bottles of solution, one to clean the CPU and heatsink of old TIM and the other to prepare the surface of the heatsink.

New heatsink spares come with a pre-applied pad of TIM. It is important to clean any old TIM off of the CPU surface prior to installing the heatsinks. Therefore, even when you are ordering new heatsinks, you must order the heatsink cleaning kit.

Replacing Memory DIMMs

Caution

DIMMs and their sockets are fragile and must be handled with care to avoid damage during installation.

Caution

Cisco does not support third-party DIMMs. Using non-Cisco DIMMs in the server might result in system problems or damage to the motherboard.

Note

To ensure the best server performance, it is important that you are familiar with memory performance guidelines and population rules before you install or replace DIMMs.

- DIMM Population Rules and Memory Performance Guidelines

- Replacing DIMMs

DIMM Population Rules and Memory Performance Guidelines

This topic describes the rules and guidelines for maximum memory performance.

The following figure shows the numbering of the DIMM slots on the motherboard.

DIMM Slot Numbering

DIMM Population Rules

Observe the following guidelines when installing or replacing DIMMs for maximum performance:

- Each CPU supports eight memory channels, A through H.

- CPU 1 supports channels P1 A1, P1 A2, P1 B1, P1 B2, P1 C1, P1 C2, P1 D1, P1 D2, P1 E1, P1 E2, P1 F1, P1 F2, P1 G1, P1 G2, P1 H1, and P1 H2.

- CPU 2 supports channels P2 A1, P2 A2, P2 B1, P2 B2, P2 C1, P2 C2, P2 D1, P2 D2, P2 E1, P2 E2, P2 F1, P2 F2, P2 G1, P2 G2, P2 H1, and P2 H2.

- Each channel has two DIMM sockets (for example, channel A = slots A1, A2).

- When both CPUs are installed, populate the DIMM slots of each CPU identically.

- In a single-CPU configuration, populate the channels for CPU1 only (P1 A1 through P1 H2).

- For optimal performance, populate DIMMs in the order shown in the following table, depending on the number of CPUs and the number of DIMMs per CPU. If your server has two CPUs, balance DIMMs evenly across the two CPUs as shown in the table.

Note

The sections below list recommended configurations. Using 5, 7, 9, 10, or 11 DIMMs per CPU is not recommended.

Memory Population Order

Memory slots are color coded, blue and black. The color coded channel population order is blue slots first, then black.

The following tables show the memory population order for each memory option.

DIMMs Population Order for 2 CPU Configuration

Number of DDR4 DIMMs per CPU (Recommended Configurations)

Populate CPU 1 Slot

Populate CPU2 Slots

1

P1_C2

P2_C2

2

P1_C2

P1_D2

P2_C2

P2_D2

4

P1_C2

P1_D2

P1_G2

P1_H2

P2_C2

P2_D2

P2_G2

P2_H2

6

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

P2_C2

P2_D2

P2_G2

P2_H2

P2_A2

P2_E2

8

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

P1_B2

P1_F2

P2_C2

P2_D2

P2_G2

P2_H2

P2_A2

P2_E2

P2_B2

P2_F2

10

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

P1_B2

P1_F2

P1_D1

P1_E1

P2_C2

P2_D2

P2_G2

P2_H2

P2_A2

P2_E2

P2_B2

P2_F2

P2_D1

P2_E1

12

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

P1_B2

P1_F2

P1_D1

P1_E1

P1_B1

P1_G1

P2_C2

P2_D2

P2_G2

P2_H2

P2_A2

P2_E2

P2_B2

P2_F2

P2_D1

P2_E1

P2_B1

P2_G1

14

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

P1_B2

P1_F2

P1_D1

P1_E1

P1_B1

P1_G1

P1_C1

P1_F1

P2_C2

P2_D2

P2_G2

P2_H2

P2_A2

P2_E2

P2_B2

P2_F2

P2_D1

P2_E1

P2_B1

P2_G1

P2_C1

P2_F1

16

All populated (A1,A2) through (H1, H2)

All populated (A1,A2) through (H1, H2)

DIMMs Population Order for 1 CPU Configuration

Number of DDR4 DIMMs per CPU (Recommended Configurations)

Populate CPU 1 Slot

1

P1_C2

2

P1_C2

P1_D2

4

P1_C2

P1_D2

P1_G2

P1_H2

6

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

8

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

P1_B2

P1_F2

10

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

P1_B2

P1_F2

P1_D1

P1_E1

12

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

P1_B2

P1_F2

P1_D1

P1_E1

P1_B1

P1_G1

14

P1_C2

P1_D2

P1_G2

P1_H2

P1_A2

P1_E2

P1_B2

P1_F2

P1_D1

P1_E1

P1_B1

P1_G1

P1_C1

P1_F1

16

All populated (A1,A2) through (H1, H2)

- The maximum combined memory allowed in the 16 DIMM slots controlled by any one CPU is 16 x 256 GB.

- Memory mirroring reduces the amount of memory available by 50 percent because only one of the two populated channels provides data. When memory mirroring is enabled, you must install DIMMs in even numbers of channels.

- NVIDIA M-Series GPUs can support only less-than 1 TB memory in the server.

- NVIDIA P-Series GPUs can support 1 TB or more memory in the server.

- AMD FirePro S7150 X2 GPUs can support only less-than 1 TB memory in the server.

- Observe the DIMM mixing rules shown in the following table.

DIMM Mixing Rules

DIMM Parameter

DIMMs in the Same Channel

DIMMs in the Same Bank

DIMM Capacity

For example, 8GB, 16GB, 32GB, 64GB, 128GB

You can mix different capacity DIMMs in the same channel (for example, A1, A2).

You cannot mix DIMMs with different capacities and Revisions in the same bank (for example A1, B1). The Revision value depends on the manufactures. Two DIMMs with the same PID can have different Revisions.

DIMM speed

For example, 2666 GHz

You can mix speeds, but DIMMs will run at the speed of the slowest DIMMs/CPUs installed in the channel.

You cannot mix DIMMs with different speeds and Revisions in the same bank (for example A1, B1). The Revision value depends on the manufactures. Two DIMMs with the same PID can have different Revisions.

DIMM type

RDIMMs or LRDIMMs

You cannot mix DIMM types in a channel.

You cannot mix DIMM types in a bank.

Memory Mirroring

The CPUs in the server support memory mirroring only when an even number of channels are populated with DIMMs. If one or three channels are populated with DIMMs, memory mirroring is automatically disabled.

Memory mirroring reduces the amount of memory available by 50 percent because only one of the two populated channels provides data. The second, duplicate channel provides redundancy.

Replacing DIMMs

Identifying a Faulty DIMM

Each DIMM socket has a corresponding DIMM fault LED, directly in front of the DIMM socket. See Internal Diagnostic LEDs for the locations of these LEDs. When the server is in standby power mode, these LEDs light amber to indicate a faulty DIMM.

Procedure

Step 1

Remove an existing DIMM:

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

4. Remove the air baffle that covers the front ends of the DIMM slots to provide clearance.

5. Locate the DIMM that you are removing, and then open the ejector levers at each end of its DIMM slot.

Step 2

Install a new DIMM:

Note

Before installing DIMMs, see the memory population rules for this server: DIMM Population Rules and Memory Performance Guidelines.

1. Align the new DIMM with the empty slot on the motherboard. Use the alignment feature in the DIMM slot to correctly orient the DIMM.

2. Push down evenly on the top corners of the DIMM until it is fully seated and the ejector levers on both ends lock into place.

3. Replace the top cover to the server.

4. Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

Replacing a Mini-Storage Module

The mini-storage module plugs into a motherboard socket to provide additional internal storage. The module is available in two different versions:

- M.2 SSD Carrier—provides two M.2 form-factor SSD sockets.

Note

The Cisco IMC firmware does not include an out-of-band management interface for the M.2 drives installed in the M.2 version of this mini-storage module (HX-MSTOR-M2). The M.2 drives are not listed in Cisco IMC inventory, nor can they be managed by Cisco IMC. This is expected behavior.

- Replacing a Mini-Storage Module Carrier

- Replacing an M.2 SSD in a Mini-Storage Carrier For M.2

Replacing a Mini-Storage Module Carrier

This topic describes how to remove and replace a mini-storage module carrier. The carrier has one media socket on its top and one socket on its underside. Use the following procedure for any type of mini-storage module carrier (SD card or M.2 SSD).

Procedure

Step 1

Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

Step 2

Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

Step 3

Remove the top cover from the server as described in Removing the Server Top Cover.

Step 4

Remove a carrier from its socket:

1. Locate the mini-storage module carrier in its socket just in front of power supply 1.

2. At each end of the carrier, push outward on the clip that secures the carrier.

3. Lift both ends of the carrier to disengage it from the socket on the motherboard.

4. Set the carrier on an anti-static surface.

Step 5

Install a carrier to its socket:

1. Position the carrier over socket, with the carrier's connector facing down and at the same end as the motherboard socket. Two alignment pegs must match with two holes on the carrier.

2. Gently push down the socket end of the carrier so that the two pegs go through the two holes on the carrier.

3. Push down on the carrier so that the securing clips click over it at both ends.

Step 6

Replace the top cover to the server.

Step 7

Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

1

Location of socket on motherboard

3

Securing clips

2

Alignment pegs

-

Replacing an M.2 SSD in a Mini-Storage Carrier For M.2

This topic describes how to remove and replace an M.2 SATA in a mini-storage carrier for M.2 (UCS-MSTOR-M2). The carrier has one M.2 SSD socket on its top and one socket on its underside.

Population Rules For Mini-Storage M.2 SSDs

- Both M.2 SSDs must be SATA.

- You can use one or two M.2 SSDs in the carrier.

- M.2 socket 1 is on the top side of the carrier; M.2 socket 2 is on the underside of the carrier (the same side as the carrier's motherboard connector).

Procedure

Step 1

Power off the server and then remove the mini-storage module carrier from the server as described in Replacing a Mini-Storage Module Carrier.

Step 2

Remove an M.2 SSD:

1. Use a #1 Phillips-head screwdriver to remove the single screw that secures the M.2 SSD to the carrier.

2. Remove the M.2 SSD from its socket on the carrier.

Step 3

Install a new M.2 SSD:

1. Angle the M.2 SSD downward and insert the connector-end into the socket on the carrier. The M.2 SSD's label must face up.

2. Press the M.2 SSD flat against the carrier.

3. Install the single screw that secures the end of the M.2 SSD to the carrier.

Step 4

Install the mini-storage module carrier back into the server and then power it on as described in Replacing a Mini-Storage Module Carrier.

Replacing a USB Drive

Caution

We do not recommend that you hot-swap the internal USB drive while the server is powered on because of the potential for data loss.

Procedure

Step 1

Remove an existing internal USB drive:

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

4. Locate the USB socket on the motherboard, directly in front of PCIe riser 2.

5. Grasp the USB drive and pull it horizontally to free it from the socket.

Step 2

Install a new internal USB drive:

1. Align the USB drive with the socket.

2. Push the USB drive horizontally to fully engage it with the socket.

3. Replace the top cover to the server.

4. Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

Location of Internal USB Port

1

Location of horizontal USB socket on motherboard

-

- Enabling or Disabling the Internal USB Port

Enabling or Disabling the Internal USB Port

The factory default is that all USB ports on the server are enabled. However, the internal USB port can be enabled or disabled in the server BIOS.

Procedure

Step 1

Enter the BIOS Setup Utility by pressing the F2 key when prompted during bootup.

Step 2

Navigate to the Advanced tab.

Step 3

On the Advanced tab, select USB Configuration.

Step 4

On the USB Configuration page, select USB Ports Configuration.

Step 5

Scroll to USB Port: Internal, press Enter, and then choose either Enabled or Disabled from the dialog box.

Step 6

Press F10 to save and exit the utility.

Replacing the RTC Battery

Warning

There is danger of explosion if the battery is replaced incorrectly. Replace the battery only with the same or equivalent type recommended by the manufacturer. Dispose of used batteries according to the manufacturer’s instructions.

[Statement 1015]

Warning

Recyclers: Do not shred the battery! Make sure you dispose of the battery according to appropriate regulations for your country or locale.

The real-time clock (RTC) battery retains system settings when the server is disconnected from power. The battery type is CR2032. Cisco supports the industry-standard CR2032 battery, which can be ordered from Cisco (PID N20-MBLIBATT) or purchased from most electronic stores.

Procedure

Step 1

Remove the RTC battery:

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

4. Locate the RTC battery. The vertical socket is directly in front of PCIe riser 2.

5. Remove the battery from the socket on the motherboard. Gently pry the securing clip on one side open to provide clearance, then lift straight up on the battery.

Step 2

Install a new RTC battery:

1. Insert the battery into its holder and press down until it clicks in place under the clip.

Note

The flat, positive side of the battery marked “3V+” should face left as you face the server front.

2. Replace the top cover to the server.

3. Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

RTC Battery Location on Motherboard

1

RTC battery in vertical socket

-

Replacing Power Supplies

The server can have one or two Titanium 80PLUS rated power supplies. When two power supplies are installed they are redundant as 1+1 by default, but they also support cold redundancy mode. Cold redundancy (CR) suspends power delivery on one or more power supplies and forces the remainder of the load to be supplied by the active PSU(s). As a result, total power efficiency is improved by best utilizing the PSU efficiency when compared to load characteristics.

- See also Power Specifications for more information about the power supplies.

- See also Rear-Panel LEDs for information about the power supply LEDs.

This section includes procedures for replacing AC and DC power supply units. See Replacing AC Power Supplies.

- Replacing DC Power Supplies

- Installing DC Power Supplies (First Time Installation)

- Grounding for DC Power Supplies

- Replacing AC Power Supplies

- Replacing DC Power Supplies

- Installing DC Power Supplies (First Time Installation)

- Grounding for DC Power Supplies

Replacing AC Power Supplies

Note

If you have ordered a server with power supply redundancy (two power supplies), you do not have to power off the server to replace a power supply because they are redundant as 1+1.

Note

Do not mix power supply types or wattages in the server. Both power supplies must be identical.

Procedure

Step 1

Remove the power supply that you are replacing or a blank panel from an empty bay:

1. Perform one of the following actions:

- If your server has only one power supply, shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

- If your server has two power supplies, you do not have to shut down the server.

2. Remove the power cord from the power supply that you are replacing.

3. Grasp the power supply handle while pinching the release lever toward the handle.

4. Pull the power supply out of the bay.

Step 2

Install a new power supply:

1. Grasp the power supply handle and insert the new power supply into the empty bay.

2. Push the power supply into the bay until the release lever locks.

3. Connect the power cord to the new power supply.

4. Only if you shut down the server, press the Power button to boot the server to main power mode.

1

Power Supply location.

Replacing DC Power Supplies

Note

This procedure is for replacing DC power supplies in a server that already has DC power supplies installed. If you are installing DC power supplies to the server for the first time, see Installing DC Power Supplies (First Time Installation).

Warning

A readily accessible two-poled disconnect device must be incorporated in the fixed wiring.

Statement 1022

Warning

This product requires short-circuit (overcurrent) protection, to be provided as part of the building installation. Install only in accordance with national and local wiring regulations.

Statement 1045

Warning

Installation of the equipment must comply with local and national electrical codes.

Statement 1074

Note

If you are replacing DC power supplies in a server with power supply redundancy (two power supplies), you do not have to power off the server to replace a power supply because they are redundant as 1+1.

Note

Do not mix power supply types or wattages in the server. Both power supplies must be identical.

Procedure

Step 1

Remove the DC power supply that you are replacing or a blank panel from an empty bay:

1. Perform one of the following actions:

- If you are replacing a power supply in a server that has only one DC power supply, shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

- If you are replacing a power supply in a server that has two DC power supplies, you do not have to shut down the server.

2. Remove the power cord from the power supply that you are replacing. Lift the connector securing clip slightly and then pull the connector from the socket on the power supply.

3. Grasp the power supply handle while pinching the release lever toward the handle.

4. Pull the power supply out of the bay.

Step 2

Install a new DC power supply:

1. Grasp the power supply handle and insert the new power supply into the empty bay.

2. Push the power supply into the bay until the release lever locks.

3. Connect the power cord to the new power supply. Press the connector into the socket until the securing clip clicks into place.

4. Only if you shut down the server, press the Power button to boot the server to main power mode.

Replacing DC Power Supplies

1

Keyed cable connector (CAB-48DC-40A-8AWG)

3

PSU status LED

2

Keyed DC input socket

-

Installing DC Power Supplies (First Time Installation)

Note

This procedure is for installing DC power supplies to the server for the first time. If you are replacing DC power supplies in a server that already has DC power supplies installed, see .

Warning

A readily accessible two-poled disconnect device must be incorporated in the fixed wiring.

Statement 1022

Warning

This product requires short-circuit (overcurrent) protection, to be provided as part of the building installation. Install only in accordance with national and local wiring regulations.

Statement 1045

Warning

Installation of the equipment must comply with local and national electrical codes.

Statement 1074

Note

Do not mix power supply types or wattages in the server. Both power supplies must be identical.

Caution

As instructed in the first step of this wiring procedure, turn off the DC power source from your facility’s circuit breaker to avoid electric shock hazard.

Procedure

Step 1

Turn off the DC power source from your facility’s circuit breaker to avoid electric shock hazard.

Note

The required DC input cable is Cisco part CAB-48DC-40A-8AWG. This 3-meter cable has a 3-pin connector on one end that is keyed to the DC input socket on the power supply. The other end of the cable has no connector so that you can wire it to your facility’s DC power.

Step 2

Wire the non-terminated end of the cable to your facility’s DC power input source.

Step 3

Connect the terminated end of the cable to the socket on the power supply. The connector is keyed so that the wires align for correct polarity and ground.

Step 4

Return DC power from your facility’s circuit breaker.

Step 5

Press the Power button to boot the server to main power mode.

Installing DC Power Supplies

1

Keyed cable connector (CAB-48DC-40A-8AWG)

3

PSU status LED

2

Keyed DC input socket

-

Grounding for DC Power Supplies

AC power supplies have internal grounding and so no additional grounding is required when the supported AC power cords are used.

When using a DC power supply, additional grounding of the server chassis to the earth ground of the rack is available. Two screw holes for use with your dual-hole grounding lug and grounding wire are supplied on the chassis rear panel.

Note

The grounding points on the chassis are sized for 10-32 screws. You must provide your own screws, grounding lug, and grounding wire. The grounding lug must be dual-hole lug that fits 10-32 screws. The grounding cable that you provide must be 14 AWG (2 mm), minimum 60° C wire, or as permitted by the local code.

Replacing a PCIe Riser

This server has two toolless PCIe risers for horizontal installation of PCIe cards. Each riser is available in multiple versions. See PCIe Slot Specifications for detailed descriptions of the slots and features in each riser version.

Procedure

Step 1

Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

Step 2

Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

Step 3

Remove the top cover from the server as described in Removing the Server Top Cover.

Step 4

Remove the PCIe riser that you are replacing:

1. Grasp the flip-up handle on the riser and the blue forward edge, and then lift up evenly to disengage its circuit board from the socket on the motherboard. Set the riser on an antistatic surface.

2. If the riser has a card installed, remove the card from the riser. See Replacing a PCIe Card.

Step 5

Install a new PCIe riser:

Note

The PCIe risers are not interchangeable. If you plug a PCIe riser into the wrong socket, the server will not boot. Riser 1 must plug into the motherboard socket labeled “RISER1.” Riser 2 must plug into the motherboard socket labeled “RISER2.”

1. If you removed a card from the old PCIe riser, install the card to the new riser. See Replacing a PCIe Card.

2. Position the PCIe riser over its socket on the motherboard and over its alignment slots in the chassis.

3. Carefully push down on both ends of the PCIe riser to fully engage its circuit board connector with the socket on the motherboard.

Step 6

Replace the top cover to the server.

Step 7

Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

PCIe Riser Alignment - Two Riser Configuration

PCIe Riser Alignment - Three Riser Configuration

Replacing a PCIe Card

Note

Cisco supports all PCIe cards qualified and sold by Cisco. PCIe cards not qualified or sold by Cisco are the responsibility of the customer. Although Cisco will always stand behind and support the C-Series rack-mount servers, customers using standard, off-the-shelf, third-party cards must go to the third-party card vendor for support if any issue with that particular card occurs.

- PCIe Slot Specifications

- Replacing a PCIe Card

- Cisco Virtual Interface Card (VIC) Considerations

PCIe Slot Specifications

The following tables describe the specifications for the slots in three riser combination.

PCIe Riser 1

Slot Number

Electrical Lane Width

Connector Length

Maximum Card Length

Card Height (Rear Panel Opening)

NCSI Support

1

Gen-3 and 4 x16

x24 connector

¾ length

Half-height

Yes

PCIe Riser 2

Slot Number

Electrical Lane Width

Connector Length

Maximum Card Length

Card Height (Rear Panel Opening)

NCSI Support

2

Gen-3 and 4 x8

x24 connector

¾ length

½ height

No

PCIe Riser 3

Slot Number

Electrical Lane Width

Connector Length

Maximum Card Length

Card Height (Rear Panel Opening)

NCSI Support

3

Gen-3 and 4 x16

x24 connector

¾ length

Half-height

Yes

The following tables describe the specifications for the slots in two riser combination.

PCIe Riser 1

Slot Number

Electrical Lane Width

Connector Length

Maximum Card Length

Card Height (Rear Panel Opening)

NCSI Support

1

Gen-3 and 4 x16

x24 connector

¾ length

Full-height

Yes

PCIe Riser 3

Slot Number

Electrical Lane Width

Connector Length

Maximum Card Length

Card Height (Rear Panel Opening)

NCSI Support

3

Gen-3 and 4 x16

x24 connector

¾ length

Full-height

Yes

Replacing a PCIe Card

Note

If you are installing a Cisco UCS Virtual Interface Card, there are prerequisite considerations. See Cisco Virtual Interface Card (VIC) Considerations.

Procedure

Step 1

Remove an existing PCIe card (or a blank filler panel) from the PCIe riser:

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

4. Remove any cables from the ports of the PCIe card that you are replacing.

5. Use two hands to grasp the external riser handle and the blue area at the front of the riser.

6. Lift straight up to disengage the riser's connectors from the two sockets on the motherboard. Set the riser upside-down on an antistatic surface.

7. Open the hinged plastic retainer that secures the rear-panel tab of the card.

8. Pull evenly on both ends of the PCIe card to remove it from the socket on the PCIe riser.

If the riser has no card, remove the blanking panel from the rear opening of the riser.

Step 2

Install a new PCIe card:

1. With the hinged tab retainer open, align the new PCIe card with the empty socket on the PCIe riser.

PCIe riser 1/slot 1 has a long-card guide at the front end of the riser. Use the slot in the long-card guide to help support a full-length card.

2. Push down evenly on both ends of the card until it is fully seated in the socket.

3. Ensure that the card’s rear panel tab sits flat against the riser rear-panel opening and then close the hinged tab retainer over the card’s rear-panel tab.

PCIe Riser Card Securing Mechanisms

1

Release latch on hinged securing plate

3

Hinged card-tab retainer

2

Hinged securing plate

4. Position the PCIe riser over its two sockets on the motherboard and over the two chassis alignment channels.

5. Carefully push down on both ends of the PCIe riser to fully engage its two connectors with the two sockets on the motherboard.

6. Replace the top cover to the server.

7. Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

Cisco Virtual Interface Card (VIC) Considerations

This section describes VIC card support and special considerations for this server.

VIC Support and Considerations in This Server

VIC

How Many Supported in Server

Slots That Support VICs

Primary Slot For Cisco Card NIC Mode

Minimum Cisco IMC Firmware

Cisco HX VIC 1467

HX-M-V25-04

1 mLOM

mLOM

mLOM

4.2(1)

Cisco HX VIC 1477

HX-M-V100-04

1 mLOM

mLOM

mLOM

4.2(1)

Cisco HX VIC 1455

HX-PCIE-C25Q-04

2 PCIe

Riser 1 PCIe slot 1 and 2

Riser 2 PCIe slot 4 and 5

Riser 1 PCIe slot 2

Riser 2 PCIe slot 5

Note

Cisco PCIe VICs can be installed in slots 1 and 4 if GPUs are installed in slots 2 and 5.

4.2(1)

Cisco HX VIC 1495

HX-PCIE-C100-04

2 PCIe

Riser 1 PCIe slot 1 and 2

Riser 2 PCIe slot 4 and 5

Riser 1 PCIe slot 2

Riser 2 PCIe slot 5

Note

Cisco PCIe VICs can be installed in slots 1 and 4 if GPUs are installed in slots 2 and 5.

4.2(1)

Cisco VIC mLOM and OCP Card Replacement Considerations

In Cisco HX C225 M6 and C245 M6 servers, Cisco IMC network connection may be lost in the following situations, while replacing Cisco VIC mLOM and OCP cards:

- If OCP card is replaced by Cisco VIC card in MLOM Slot and the NIC mode is set to Shared OCP or Shared OCP Extended.

- If Cisco VIC Card in MLOM Slot is replaced by OCP Card and NIC mode is set to Cisco-card MLOM.

Follow these recommendations while replacing Cisco VIC mLOM or OCP cards in Cisco HX C225 M6 or C245 M6 servers to avoid loss of connectivity:

- Before replacing the card, configure any of the NIC modes that has network connected, other than Cisco card MLOM, Shared OCP, or Shared OCP Extended. After replacing the card, configure the appropriate NIC mode.

- Or, after replacing the card, configure the appropriate NIC mode using Cisco IMC Configuration Utility/F8.

- Or, after replacing the card, perform factory default settings using Cisco IMC Configuration Utility/F8 then perform the following steps:

1. Once the server is rebooted, boot the system to Cisco IMC Configuration Utility/F8 then change the default password.

2. Configure the appropriate NIC mode settings.

Factory Default Settings

VIC in mLOM slot

Intel OCP 3.0 NIC in mLOM Slot

VIC in Riser Slot

Dedicated Management Port

NIC Mode for CIMC Access

Yes

No

No

Yes

Cisco Card mode with the card in mLOM Slot

No

Yes

No

Yes

Shared OCP Extended

No

Yes

Yes

Yes

Shared OCP Extended

No

No

Yes

Yes

Cisco Card with VIC SLOT based on precedence:

For C225 M6:

1. Riser 1 - Slot 1

2. Riser 3 - Slot 3

For C245 M6:

1. Riser 1 - Slot 2

2. Riser 2 - Slot 5

3. Riser 1 - Slot 1

4. Riser 2 - Slot 4

No

No

No

Yes

Dedicated

Replacing an mLOM Card

The server supports a modular LOM (mLOM) card to provide additional rear-panel connectivity. The mLOM socket is on the motherboard, under PCIe Riser 1.

The mLOM socket provides a Gen-3 and Gen-4 x16 PCIe lane. The socket remains powered when the server is in 12 V standby power mode and it supports the network communications services interface (NCSI) protocol.

Procedure

Step 1

Remove any existing mLOM card (or a blanking panel):

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

4. Remove the mRAID riser to provide access to the mLOM socket below the riser.

To remove the mRAID riser, use both hands to grasp the external blue handle on the rear and the blue finger-grip on the front. Lift straight up.

You do not have to disconnect cables from any RAID card or interposer card that is installed in the riser. Carefully move the riser aside only far enough to provide clearance.

5. Loosen the single captive thumbscrew that secures the mLOM card to the threaded standoff on the chassis floor.

6. Slide the mLOM card horizontally to free it from the socket, then lift it out of the server.

Step 2

Install a new mLOM card:

1. Set the mLOM card on the chassis floor so that its connector is aligned with the motherboard socket.

2. Push the card horizontally to fully engage the card's edge connector with the socket.

3. Tighten the captive thumbscrew to secure the card to the standoff on the chassis floor.

4. Return the mRAID riser to its socket.

Carefully align the riser's edge connector with the motherboard socket at the same time you align the two channels on the riser with the two pegs on the inner chassis wall. Press down evenly on both ends of the riser to fully engage its connector with the motherboard socket.

5. Replace the top cover to the server.

6. Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

mLOM Card Location

1

Position of horizontal mLOM card socket

Replacing a SAS Storage Controller Card (RAID or HBA)

For hardware-based storage control, the server can use a Cisco modular SAS RAID controller or SAS HBA that plugs into a dedicated, vertical socket on the motherboard.

- Storage Controller Card Firmware Compatibility

- Replacing a SAS Storage Controller Card (RAID or HBA)

Storage Controller Card Firmware Compatibility

Firmware on the storage controller (RAID or HBA) must be verified for compatibility with the current Cisco IMC and BIOS versions that are installed on the server. If not compatible, upgrade or downgrade the storage controller firmware using the Host Upgrade Utility (HUU) for your firmware release to bring it to a compatible level.

Note

For servers running in standalone mode only: After you replace controller hardware (HX-RAID-M6, HX-RAID-M6HD, HX-SAS-M6, or HX-SAS-M6HD), you must run the Cisco UCS Host Upgrade Utility (HUU) to update the controller firmware, even if the firmware Current Version is the same as the Update Version. This is necessary to program the controller's suboem-id to the correct value for the server SKU. If you do not do this, drive enumeration might not display correctly in the software.

See the HUU guide for your Cisco IMC release for instructions on downloading and using the utility to bring server components to compatible levels: HUU Guides.

Replacing a SAS Storage Controller Card (RAID or HBA)

Procedure

Step 1

Prepare the server for component installation:

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

Step 2

Remove any existing storage controller card from the server:

Note

The chassis includes a plastic mounting bracket that the card must be attached to before installation. During replacement, you must remove the old card from the bracket and then install the new card to the bracket before installing this assembly to the server.

1. Disconnect SAS/SATA cables and any Supercap cable from the existing card.

2. Lift up on the card's blue ejector lever to unseat it from the motherboard socket.

3. Lift straight up on the card's carrier frame to disengage the card from the motherboard socket and to disengage the frame from two pegs on the chassis wall.

4. Remove the existing card from its plastic carrier bracket. Carefully push the retainer tabs aside and then lift the card from the bracket.

Step 3

Install a new storage controller card:

1. Install the new card to the plastic carrier bracket. Make sure that the retainer tabs close over the edges of the card.

2. Position the assembly over the chassis and align the card edge with the motherboard socket. At the same time, align the two slots on the back of the carrier bracket with the pegs on the chassis inner wall.

3. Push on both corners of the card to seat its connector in the riser socket. At the same time, ensure that the slots on the carrier frame engage with the pegs on the inner chassis wall.

4. Fully close the blue ejector lever on the card to lock the card into the socket.

5. Connect SAS/SATA cables and any Supercap cable to the new card.

If this is a first-time installation, see Storage Controller Cable Connectors and Backplanes for cabling instructions.

Step 4

Replace the top cover to the server.

Step 5

Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

Step 6

If your server is running in standalone mode, use the Cisco UCS Host Upgrade Utility to update the controller firmware and program the correct suboem-id for the controller.

Note

For servers running in standalone mode only: After you replace controller hardware (HX-RAID-M6HD and HX-SAS-M6HD), you must run the Cisco UCS Host Upgrade Utility (HUU) to update the controller firmware, even if the firmware Current Version is the same as the Update Version. This is necessary to program the controller's suboem-id to the correct value for the server SKU. If you do not do this, drive enumeration might not display correctly in the software.

See the HUU guide for your Cisco IMC release for instructions on downloading and using the utility to bring server components to compatible levels: HUU Guides.

Storage Controller Card Location

1

Storage controller card location

Replacing the Supercap (RAID Backup)

This server supports installation of one Supercap unit. The unit mounts to a bracket that is in the middle of the row of cooling fan modules.

The Supercap provides approximately three years of backup for the disk write-back cache DRAM in the case of a sudden power loss by offloading the cache to the NAND flash.

Procedure

Step 1

Prepare the server for component installation:

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

Step 2

Remove an existing Supercap:

1. Disconnect the Supercap cable from the existing Supercap.

2. Push aside the securing tab to open the hinged latch that secures the Supercap to its bracket on the removable air baffle.

3. Lift the Supercap free of the bracket and set it aside.

Step 3

Install a new Supercap:

1. Set the new Supercap into the mounting bracket.

2. Close the hinged plastic clip over the Supercap. Push down until the securing tab clicks.

3. Connect the Supercap cable from the RAID controller card to the connector on the new Supercap cable.

Step 4

Replace the top cover to the server.

Step 5

Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

1

Securing tab

2

Hinged latch

Replacing a Cisco Boot-Optimized M.2 RAID Controller

The Cisco Boot-Optimized M.2 RAID Controller module connects to the mini-storage module socket on the motherboard. It includes slots for two SATA M.2 drives that can control the SATA M.2 drives in a RAID 1 array and JBOD mode.

This topic describes how to remove and replace a Cisco Boot-Optimized M.2 RAID Controller. The controller board has one M.2 socket on its top (Slot 1) and one M.2 socket on its underside (Slot 2).

Procedure

Step 1

Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

Step 2

Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

Step 3

Remove the top cover from the server as described in Removing the Server Top Cover.

Step 4

Grasp and remove the air baffle located between CPU 2 and PCIe Riser 3.

Step 5

Remove a controller from its motherboard socket:

1. Locate the controller in its socket just behind CPU 2.

2. At each end of the controller board, push outward on the clip that secures the carrier.

3. Lift both ends of the controller to disengage it from the socket on the motherboard.

4. Set the carrier on an anti-static surface.

1

Location of socket on motherboard

3

Securing clips

2

Alignment pegs

-

Step 6

If you are transferring SATA M.2 drives from the old controller to the replacement controller, do that before installing the replacement controller:

Note

Any previously configured volume and data on the drives are preserved when the M.2 drives are transferred to the new controller. The system will boot the existing OS that is installed on the drives.

1. Use a #1 Phillips-head screwdriver to remove the single screw that secures the M.2 drive to the carrier.

2. Lift the M.2 drive from its socket on the carrier.

3. Position the replacement M.2 drive over the socket on the controller board.

4. Angle the M.2 drive downward and insert the connector-end into the socket on the carrier. The M.2 drive's label must face up.

5. Press the M.2 drive flat against the carrier.

6. Install the single screw that secures the end of the M.2 SSD to the carrier.

7. Turn the controller over and install the second M.2 drive.

Cisco Boot-Optimized M.2 RAID Controller, Showing M.2 Drive Installation

Step 7

Install the controller to its socket on the motherboard:

1. Position the controller over socket, with the controller's connector facing down and at the same end as the motherboard socket. Two alignment pegs must match with two holes on the controller.

2. Gently push down the socket end of the controller so that the two pegs go through the two holes on the controller.

3. Push down on the controller so that the securing clips click over it at both ends.

Step 8

Replace the top cover to the server.

Step 9

Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

Replacing a Chassis Intrusion Switch

The chassis intrusion switch in an optional security feature that logs an event in the system event log (SEL) whenever the cover is removed from the chassis.

Procedure

Step 1

Prepare the server for component installation:

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

Step 2

Remove an existing intrusion switch:

1. Disconnect the intrusion switch cable from the socket on the motherboard.

2. Use a #1 Phillips-head screwdriver to loosen and remove the single screw that holds the switch mechanism to the chassis wall.

3. Slide the switch mechanism straight up to disengage it from the clips on the chassis.

Step 3

Install a new intrusion switch:

1. Slide the switch mechanism down into the clips on the chassis wall so that the screwhole lines up.

2. Use a #1 Phillips-head screwdriver to install the single screw that secures the switch mechanism to the chassis wall.

3. Connect the switch cable to the socket on the motherboard.

Step 4

Replace the cover to the server.

Step 5

Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

Intrusion Switch Location

1

Intrusion switch location

Installing a Trusted Platform Module (TPM)

The trusted platform module (TPM) is a small circuit board that plugs into a motherboard socket and is then permanently secured with a one-way screw.

- TPM Considerations

- Installing and Enabling a TPM

- Installing TPM Hardware

- Enabling the TPM in the BIOS

TPM Considerations

- This server supports either TPM version 1.2 or TPM version 2.0.

- Field replacement of a TPM is not supported; you can install a TPM after-factory only if the server does not already have a TPM installed.

- If there is an existing TPM 1.2 installed in the server, you cannot upgrade to TPM 2.0. If there is no existing TPM in the server, you can install TPM 2.0.

- If the TPM 2.0 becomes unresponsive, reboot the server.

Installing and Enabling a TPM

Note

Field replacement of a TPM is not supported; you can install a TPM after-factory only if the server does not already have a TPM installed.

This topic contains the following procedures, which must be followed in this order when installing and enabling a TPM:

Procedure

Step 1

Installing the TPM Hardware.

Step 2

Enabling the TPM in the BIOS.

Step 3

Enabling the Intel TXT Feature in the BIOS.

Installing TPM Hardware

Note

For security purposes, the TPM is installed with a one-way screw. It cannot be removed with a standard screwdriver.

Procedure

Step 1

Prepare the server for component installation:

1. Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server.

2. Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

3. Remove the top cover from the server as described in Removing the Server Top Cover.

Step 2

Check if there is a card installed in PCIe riser 2:

- If no card is installed in PCIe riser 2, you can access the TPM socket. Go to the next step.

- If a card is installed in PCIe riser 2, remove the PCIe riser assembly from the chassis to provide clearance before continuing with the next step. See Replacing a PCIe Card for instructions on removing the PCIe riser.

Step 3

Install a TPM:

1. Locate the TPM socket on the motherboard, as shown below.

2. Align the connector that is on the bottom of the TPM circuit board with the motherboard TPM socket. Align the screw hole on the TPM board with the screw hole that is adjacent to the TPM socket.

3. Push down evenly on the TPM to seat it in the motherboard socket.

4. Install the single one-way screw that secures the TPM to the motherboard.

5. If you removed the PCIe riser assembly to provide clearance, return it to the server now.

Step 4

Replace the cover to the server.

Step 5

Replace the server in the rack, replace cables, and then fully power on the server by pressing the Power button.

TPM Socket Location on Motherboard

1

TPM socket location on motherboard below any card in PCIe riser 2

Step 6

Continue with Enabling the TPM in the BIOS.

Enabling the TPM in the BIOS

After hardware installation, you must enable TPM support in the BIOS.

Note

You must set a BIOS Administrator password before performing this procedure. To set this password, press the F2 key when prompted during system boot to enter the BIOS Setup utility. Then navigate to Security > Set Administrator Password and enter the new password twice as prompted.

Procedure

Step 1

Enable TPM Support:

1. Watch during bootup for the F2 prompt, and then press F2 to enter BIOS setup.

2. Log in to the BIOS Setup Utility with your BIOS Administrator password.

3. On the BIOS Setup Utility window, choose the Advanced tab.

4. Choose Trusted Computing to open the TPM Security Device Configuration window.

5. Change TPM SUPPORT to Enabled.

6. Press F10 to save your settings and reboot the server.

Step 2

Verify that TPM support is now enabled:

1. Watch during bootup for the F2 prompt, and then press F2 to enter BIOS setup.

2. Log into the BIOS Setup utility with your BIOS Administrator password.

3. Choose the Advanced tab.

4. Choose Trusted Computing to open the TPM Security Device Configuration window.

5. Verify that TPM SUPPORT and TPM State are Enabled.

Removing the PCB Assembly (PCBA)

The PCBA is secured to the server's sheet metal. You must disconnect the PCBA from the tray before recycling the PCBA. The PCBA is secured by different types of fasteners.

Before you begin

Note

For Recyclers Only! This procedure is not a standard field-service option. This procedure is for recyclers who will be reclaiming the electronics for proper disposal to comply with local eco design and e-waste regulations.

To remove the printed circuit board assembly (PCBA), the following requirements must be met:

- The server must be disconnected from facility power.

- The server must be removed from the equipment rack.

- The server's top cover must be removed. See Removing the Server Top Cover.

Following tools are required:

- Pliers

- T10 Torx screwdriver

Procedure

Step 1

Locate the PCBA's mounting screws.

The following figure shows the location of the mounting screws and fasteners.

Screw Locations for Removing the HX C225 M6 PCBA

Step 2

Using a T10 Torx driver, remove all of the indicated screws.

Step 3

Remove the PCBA from the sheetmetal and dispose of each in compliance with your local ewaste and recycling regulations.

Service DIP Switch, Headers and Jumpers

This server includes one DIP switch (SW4) and header (CN4) that you can user for certain service and debug functions.

This section contains the following topics:

Location of DIP Switch and Service Header Blocks SW4 and CN4

1

Location of header block CN4

5

Location of SW4 DIP switches

2

BIOS Recovery Switch (SW4 Switch 5 - 17) Off (Switch 5): Normal; ON (Switch 17): Recovery Mode

6

Boot Alternate Cisco IMC Header: CN4 pins 1 - 2

3

Clear BIOS Password Switch (SW4 Switch 6 - 18) Off (Switch 6): Normal; ON (Switch 18): Clear

7

System Secure Firmware Erase Header: CN3 pins 3 - 4

4

Clear CMOS Switch (SW4 Switch 9 - 21) Off (Switch 9): Normal; ON (Switch 21): Clear

- Using the BIOS Recovery Header (SW4, Pins 5 - 17)

- Using the Clear BIOS Password Switch (SW4, Pins 6 - 18)

- Using the Clear CMOS DIP Switch (SW4, Pins 9 - 21)

- Using the Boot Alternate Cisco IMC Image Header (CN4, Pins 1 - 2)

- Using the Reset Cisco IMC Password to Default Header (CN4, Pins 3 - 4)

Using the BIOS Recovery Header (SW4, Pins 5 - 17)

Depending on which stage the BIOS becomes corrupted, you might see different behavior.

- If the BIOS BootBlock is corrupted, you might see the system get stuck on the following message:

Initializing and configuring memory/hardware

- If it is a non-BootBlock corruption, a message similar to the following is displayed:

****BIOS FLASH IMAGE CORRUPTED****
Flash a valid BIOS capsule file using Cisco IMC WebGUI or CLI interface.
IF Cisco IMC INTERFACE IS NOT AVAILABLE, FOLLOW THE STEPS MENTIONED BELOW.
1. Connect the USB stick with bios.cap file in root folder.
2. Reset the host.
IF THESE STEPS DO NOT RECOVER THE BIOS
1. Power off the system.
2. Mount recovery jumper.
3. Connect the USB stick with bios.cap file in root folder.
4. Power on the system.
Wait for a few seconds if already plugged in the USB stick.
REFER TO SYSTEM MANUAL FOR ANY ISSUES.

Note

As indicated by the message shown above, there are two procedures for recovering the BIOS. Try procedure 1 first. If that procedure does not recover the BIOS, use procedure 2.

- Procedure 1: Reboot With bios.cap Recovery File

- Procedure 2: Use BIOS Recovery DIP Switch and bios.cap Recovery File

Procedure 1: Reboot With bios.cap Recovery File

Procedure

Step 1

Download the BIOS update package and extract it to a temporary location.

Step 2

Copy the contents of the extracted recovery folder to the root directory of a USB drive. The recovery folder contains the bios.cap file that is required in this procedure.

Note

The bios.cap file must be in the root directory of the USB drive. Do not rename this file. The USB drive must be formatted with either the FAT16 or FAT32 file system.

Step 3

Insert the USB drive into a USB port on the server.

Step 4

Reboot the server.

Step 5

Return the server to main power mode by pressing the Power button on the front panel.

The server boots with the updated BIOS boot block. When the BIOS detects a valid bios.cap file on the USB drive, it displays this message:

Found a valid recovery file...Transferring to Cisco IMC
System would flash the BIOS image now...
System would restart with recovered image after a few seconds...

Step 6

Wait for server to complete the BIOS update, and then remove the USB drive from the server.

Note

During the BIOS update, Cisco IMC shuts down the server and the screen goes blank for about 10 minutes. Do not unplug the power cords during this update. Cisco IMC powers on the server after the update is complete.

Procedure 2: Use BIOS Recovery DIP Switch and bios.cap Recovery File

Procedure

Step 1

Download the BIOS update package and extract it to a temporary location.

Step 2

Copy the contents of the extracted recovery folder to the root directory of a USB drive. The recovery folder contains the bios.cap file that is required in this procedure.

Note

The bios.cap file must be in the root directory of the USB drive. Do not rename this file. The USB drive must be formatted with either the FAT16 or FAT32 file system.

Step 3

Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server. Disconnect power cords from all power supplies.

Step 4

Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

Step 5

Remove the top cover from the server as described in Removing the Server Top Cover.

Step 6

Locate the SW4 is DIP Switch shown in Service DIP Switch, Headers and Jumpers. Default position is at Switch 5 (Off: normal). To set to BIOS recovery mode, switch to pin 17 position (ON: recovery mode).

Step 7

Reconnect AC power cords to the server. The server powers up to standby power mode.

Step 8

Insert the USB thumb drive that you prepared in Step 2 into a USB port on the server.

Step 9

Return the server to main power mode by pressing the Power button on the front panel.

The server boots with the updated BIOS boot block. When the BIOS detects a valid bios.cap file on the USB drive, it displays this message:

Found a valid recovery file...Transferring to Cisco IMC
System would flash the BIOS image now...
System would restart with recovered image after a few seconds...

Step 10

Wait for server to complete the BIOS update, and then remove the USB drive from the server.

Note

During the BIOS update, Cisco IMC shuts down the server and the screen goes blank for about 10 minutes. Do not unplug the power cords during this update. Cisco IMC powers on the server after the update is complete.

Step 11

After the server has fully booted, power off the server.

Step 12

Switch SW4 back to pin 5 position (Off: normal).

Step 13

Replace the top cover, replace the server in the rack, replace power cords and any other cables, and then power on the server by pressing the Power button.

Using the Clear BIOS Password Switch (SW4, Pins 6 - 18)

You can use SW4 DIP switch to clear the administrator password.

Procedure

Step 1

Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server. Disconnect power cords from all power supplies.

Step 2

Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

Step 3

Remove the top cover from the server as described in Removing the Server Top Cover.

Step 4

Locate the SW4 DIP Switch and pins 6-18, as shown in Service DIP Switch, Headers and Jumpers.

Default position is at pin 6 (Off: normal).

Step 5

To clear BIOS password, switch to pin 18 position (On: clear).

Step 6

Reinstall the top cover and reconnect AC power cords to the server. The server powers up to standby power mode, indicated when the Power LED on the front panel is amber.

Step 7

Return the server to main power mode by pressing the Power button on the front panel. The server is in main power mode when the Power LED is green.

Note

You must allow the entire server to reboot to main power mode to complete the reset. The state of the jumper cannot be determined without the host CPU running.

Step 8

Press the Power button to shut down the server to standby power mode, and then remove AC power cords from the server to remove all power.

Step 9

Remove the top cover from the server.

Step 10

Switch SW4 back to pin 6 position (Off: normal).

Note

If SW4 is not switched back to pin 6 position, the password is cleared every time you power cycle the server.

Step 11

Replace the top cover, replace the server in the rack, replace power cords and any other cables, and then power on the server by pressing the Power button.

Using the Clear CMOS DIP Switch (SW4, Pins 9 - 21)

You can use this procedure to clear the server’s CMOS settings in the case of a system hang. For example, if the server hangs because of incorrect settings and does not boot, use this jumper to invalidate the settings and reboot with defaults.

Caution

Clearing the CMOS removes any customized settings and might result in data loss. Make a note of any necessary customized settings in the BIOS before you use this clear CMOS procedure.

Procedure

Step 1

Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server. Disconnect power cords from all power supplies.

Step 2

Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

Step 3

Remove the top cover from the server as described in Removing the Server Top Cover.

Step 4

Locate SW4 DIP Swtich and pins 9-21, as shown in Service DIP Switch, Headers and Jumpers.

Default position is at pin 9 (Off: normal).

Step 5

To clear the CMOS, switch to pin 21 position (On: clear).

Step 6

Reinstall the top cover and reconnect AC power cords to the server. The server powers up to standby power mode, indicated when the Power LED on the front panel is amber.

Step 7

Return the server to main power mode by pressing the Power button on the front panel. The server is in main power mode when the Power LED is green.

Note

You must allow the entire server to reboot to main power mode to complete the reset. The state of the jumper cannot be determined without the host CPU running.

Step 8

Press the Power button to shut down the server to standby power mode, and then remove AC power cords from the server to remove all power.

Step 9

Remove the top cover from the server.

Step 10

Switch SW4 back to pin 9 position (Off: normal).

Note

If SW4 is not switched back to pin 9 position, the CMOS settings are reset to the defaults every time you power cycle the server.

Step 11

Replace the top cover, replace the server in the rack, replace power cords and any other cables, and then power on the server by pressing the Power button.

Using the Boot Alternate Cisco IMC Image Header (CN4, Pins 1 - 2)

You can use this Cisco IMC debug header to force the system to boot from an alternate Cisco IMC image.

Procedure

Step 1

Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server. Disconnect power cords from all power supplies.

Step 2

Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

Step 3

Remove the top cover from the server as described in Removing the Server Top Cover.

Step 4

Locate header block CN4, pins 1-2, as shown in Service DIP Switch, Headers and Jumpers.

Step 5

Install a two-pin jumper across CN4 pins 1 and 2.

Step 6

Reinstall the top cover and reconnect AC power cords to the server. The server powers up to standby power mode, indicated when the Power LED on the front panel is amber.

Step 7

Return the server to main power mode by pressing the Power button on the front panel. The server is in main power mode when the Power LED is green.

Note

When you next log in to Cisco IMC, you see a message similar to the following:

'Boot from alternate image' debug functionality is enabled.
CIMC will boot from alternate image on next reboot or input power cycle.

Step 8

Press the Power button to shut down the server to standby power mode, and then remove AC power cords from the server to remove all power.

Step 9

Remove the top cover from the server.

Step 10

Remove the jumper that you installed.

Note

If you do not remove the jumper, the server will boot from an alternate Cisco IMC image every time that you power cycle the server or reboot Cisco IMC.

Step 11

Replace the top cover, replace the server in the rack, replace power cords and any other cables, and then power on the server by pressing the Power button.

Using the Reset Cisco IMC Password to Default Header (CN4, Pins 3 - 4)

You can use this Cisco IMC debug header to force the Cisco IMC password back to the default.

Procedure

Step 1

Shut down and remove power from the server as described in Shutting Down and Removing Power From the Server. Disconnect power cords from all power supplies.

Step 2

Slide the server out the front of the rack far enough so that you can remove the top cover. You might have to detach cables from the rear panel to provide clearance.

Caution

If you cannot safely view and access the component, remove the server from the rack.

Step 3

Remove the top cover from the server as described in Removing the Server Top Cover.

Step 4

Locate header block CN4, pins 3-4, as shown in Service DIP Switch, Headers and Jumpers.

Step 5

Install a two-pin jumper across CN4 pins 3 and 4.

Step 6

Reinstall the top cover and reconnect AC power cords to the server. The server powers up to standby power mode, indicated when the Power LED on the front panel is amber.

Step 7

Return the server to main power mode by pressing the Power button on the front panel. The server is in main power mode when the Power LED is green.

Note

When you next log in to Cisco IMC, you see a message similar to the following:

'Reset to default CIMC password' debug functionality is enabled.
On input power cycle, CIMC password will be reset to defaults.

Step 8

Press the Power button to shut down the server to standby power mode, and then remove AC power cords from the server to remove all power.

Step 9

Remove the top cover from the server.

Step 10

Remove the jumper that you installed.

Note

If you do not remove the jumper, the server will reset the Cisco IMC password to the default every time that you power cycle the server. The jumper has no effect if you reboot Cisco IMC.

Step 11

Replace the top cover, replace the server in the rack, replace power cords and any other cables, and then power on the server by pressing the Power button.

Chapter 4. Server Specifications

- Physical Specifications

- Environmental Specifications

- Power Specifications

- Power Cord Specifications

Physical Specifications

The following table lists the physical specifications for the server.

Physical Specifications

Description

Specification

Height

1.7 in. (43.2 mm)

Width

16.9 in. (429.0 mm)

Depth (length)

Server only: 30 in. (762 mm)

Server with slide rail: 31.5 in (800.1 mm)

Weight

- Maximum, fully configured with rail kit: 42.43 lb (19.30 kg)

- Maximum with 1 HDD, 1 CPU, 1DIMM, and 1 1600 W PSU, no rail kit: 22.32 lb (10.13 kg)

Environmental Specifications

The following table lists the environmental requirements and specifications for the server.

Physical Specifications

Description

Specification

Temperature, Operating

10° C to 35° C (50° F to 95° F) with no direct sunlight

Derate the maximum temperature by 1°C per every 300 meters of altitude above sea level.

Note

Although the ASHRAE guidelines define multiple classes with different operating ranges, the recommended temperature and humidity operating range is the same for each class. The recommended temperature and humidity ranges are:

- Operating Temperature: 64.4°F to 80.6°F (18°C to 27°C)

For general information, see the Cisco Unified Computing System Site Planning Guide: Data Center Power and Cooling.

Temperature, non-operating

(when the server is stored or transported)

Below -40° C or above 65° C (below -40° F or above 149° F)

Maximum rate of change (operating and non-operating) 20° C/hr (36° F/hr)

Extended Operating Temperature

5° C to 40° C (41° F to 104° F) with no direct sunlight

Maximum allowable operating temperature derated

1° C/175 m (1° F/319 ft) above 950 m (3117 ft)

5° C to 45° C (41° F to 113° F) with no direct sunlight

Maximum allowable operating temperature derated

1° C/125 m (1° F/228 ft) above 950 m (3117 ft)

System performance may be impacted when operating in the

extended operating temperature range.

Operation above 40° C is limited to less than 1% of annual

operating hours.

Hardware configuration limits apply to extended operating temperature range.

Humidity (RH), operating

8 to 90% and 24° C (75o F) maximum dew-point temperature, non-condensing environment

Humidity (RH), non-operating

(when the server is stored or transported)

Below 5% or above 95% and 33o C (91o F) maximum dew-point temperature, non-condensing environment

Altitude, operating

0 to 10,000 feet

Altitude, non-operating

(when the server is stored or transported)

0 to 40,000 feet

Sound power level

Measure A-weighted per ISO7779 LwAd (Bels)

Operation at 73°F (23°C)

5.8

Sound pressure level

Measure A-weighted per ISO7779 LpAm (dBA)

Operation at 73°F (23°C)

43

Power Specifications

Note

Do not mix power supply types or wattages in the server. Both power supplies must be identical.

You can get more specific power information for your exact server configuration by using the Cisco UCS Power Calculator:

http://ucspowercalc.cisco.com

The power specifications for the supported power supply options are listed in the following sections.

- 770 W AC Power Supply

- 1050 W AC Power Supply

- 1050 W DC Power Supply

- 1600 W AC Power Supply

- 2300 W AC Power Supply

770 W AC Power Supply

This section lists the specifications for each 770 W AC power supply (Cisco part number HX-PSU1-770W).

770 W AC Specifications

Description

Specification

AC Input Voltage

Nominal range: 100–120 VAC, 200–240 VAC

(Range: 90–132 VAC, 180–264 VAC)

AC Input Frequency

Nominal range: 50 to 60Hz

(Range: 47–63 Hz)

Maximum AC Input current

9.5 A at 100 VAC

4.5 A at 208 VAC

Maximum input volt-amperes

950 VA at 100 VAC

Maximum inrush current

15 A (sub-cycle duration)

Maximum hold-up time

12 ms at 770 W

Maximum output power per PSU

770 W

Power supply output voltage

12 VDC

Power supply standby voltage

12 VDC

Efficiency rating

Climate Savers Platinum Efficiency (80Plus Platinum certified)

Form factor

RSP2

Input connector

IEC320 C14

1050 W AC Power Supply

This section lists the specifications for each 1050 W AC power supply (Cisco part number HX-PSU1-1050W).

1050 W AC Specifications

Description

Specification

AC Input Voltage

Nominal range: 100–120 VAC, 200–240 VAC

(Range: 90–132 VAC, 180–264 VAC)

AC Input Frequency

Nominal range: 50 to 60Hz

(Range: 47–63 Hz)

Maximum AC Input current

12.5 A at 100 VAC

6.0 A at 208 VAC

Maximum input volt-amperes

1250 VA at 100 VAC

Maximum inrush current

15 A (sub-cycle duration)

Maximum hold-up time

12 ms at 1050 W

Maximum output power per PSU

800 W at 100–120 VAC

1050 W at 200–240 VAC

Power supply output voltage

12 VDC

Power supply standby voltage

12 VDC

Efficiency rating

Climate Savers Platinum Efficiency (80Plus Platinum certified)

Form factor

RSP2

Input connector

IEC320 C14

1050 W DC Power Supply

This section lists the specifications for each 1050 W DC power supply (Cisco part number HX-PSUV2-1050DC).

1050 W DC Specifications

Description

Specification

DC Input Voltage

Nominal range: -48 to -60 VDC

(Range: -40 to -72 VDC)

Maximum DC input current

32 A at -40 VDC

Maximum input wattage

1234 W

Maximum inrush current

35 A (sub-cycle duration)

Maximum hold-up time

5 ms at 100% load (1050 W main and 36 W standby)

Maximum output power per PSU

1050 W on 12 VDC main power

36 W on 12 VDC standby power

Power supply output voltage

12 VDC

Power supply standby voltage

12 VDC

Efficiency rating

≥ 92% at 50% load

Form factor

RSP2

Input connector

Fixed 3-wire block

1600 W AC Power Supply

This section lists the specifications for each 1600 W AC power supply (Cisco part number HX-PSU1-1600W).

1600 W AC Specifications

Description

Specification

AC Input Voltage

Nominal range: 200–240 VAC

(Range: 180–264 VAC)

AC Input Frequency

Nominal range: 50 to 60Hz

(Range: 47–63 Hz)

Maximum AC Input current

9.5 A at 200 VAC

Maximum input volt-amperes

1250 VA at 200 VAC

Maximum inrush current

30 A at 35° C

Maximum hold-up time

80 ms at 1600 W

Maximum output power per PSU

1600 W at 200–240 VAC

Power supply output voltage

12 VDC

Power supply standby voltage

12 VDC

Efficiency rating

Climate Savers Platinum Efficiency (80Plus Platinum certified)

Form factor

RSP2

Input connector

IEC320 C14

2300 W AC Power Supply

This section lists the specifications for each 2300 W AC power supply (Cisco part number HX-PSU1-2300).

2300 W AC Specifications

Description

Specification

AC Input Voltage

Nominal range: 100–230 VAC

(Range: 90–264 VAC)

AC Input Frequency

Nominal range: 50 to 60Hz

(Range: 47–63 Hz)

Maximum AC Input current

13 A at 100 VAC

Maximum input volt-amperes

2515 VA at 208 VAC

Maximum inrush current

30 A at 35° C

Maximum hold-up time

80 ms at 1600 W

Maximum output power per PSU

2300W at 220-240V input and 1200W at 110-120V

Power supply output voltage

12 VDC

Power supply standby voltage

12 VDC

Efficiency rating

Climate Savers Platinum Efficiency (80Plus Platinum certified)

Form factor

RSP2

Input connector

IEC320 C20

Power Cord Specifications

Each power supply in the server has a power cord. Standard power cords or jumper power cords are available for connection to the server. The shorter jumper power cords, for use in racks, are available as an optional alternative to the standard power cords.

Note

Only the approved power cords or jumper power cords listed below are supported.

Supported Power Cords

Description

Length (Feet)

Length (Meters)

CAB-48DC-40A-8AWG

DC power cord, -48 VDC, 40 A, 8 AWG

Three-socket Mini-Fit connector to three-wire

11.7

3.5

CAB-C13-C14-AC

AC power cord, 10 A; C13 to C14, recessed receptacle

9.8

3.0

CAB-250V-10A-AR

AC power cord, 250 V, 10 A

Argentina

8.2

2.5

CAB-C13-C14-2M-JP

AC Power Cord, C13 to C14

Japan PSE Mark

6.6

2.0

CAB-9K10A-EU

AC Power Cord, 250 V, 10 A; CEE 7/7 Plug

Europe

8.2

2.5

CAB-250V-10A-IS

AC Power Cord, 250 V, 10 A

Israel

8.2

2.5

CAB-250V-10A-CN

AC power cord, 250 V, 10 A

PR China

8.2

2.5

CAB-ACTW

AC power cord, 250 V, 10 A

Taiwan

7.5

2.3

CAB-C13-CBN

AC cabinet jumper power cord, 250, 10 A,

C13 to C14

2.2

0.68

CAB-C13-C14-2M

AC cabinet jumper power cord, 250 V, 10 A,

C13 to C14

6.6

2.0

CAB-9K10A-AU

AC power cord, 250 V, 10 A, 3112 plug,

Australia

8.2

2.5

CAB-N5K6A-NA

AC power cord, 200/240 V, 6 A,

North America

8.2

2.5

CAB-250V-10A-ID

AC power Cord, 250 V, 10 A,

India

8.2

2.5

CAB-9K10A-SW

AC power cord, 250 V, 10 A, MP232 plug

Switzerland

8.2

2.5

CAB-250V-10A-BR

AC power Cord, 250 V, 10 A

Brazil

8.2

2.5

CAB-9K10A-UK

AC power cord, 250 V, 10 A (13 A fuse), BS1363 plug

United Kingdom

8.2

2.5

CAB-9K12A-NA

AC power cord, 125 V, 13 A, NEMA 5-15 plug

North America

8.2

2.5

CAB-AC-L620-C13

AC power cord, NEMA L6-20 to C13 connectors

6.6

2.0

CAB-9K10A-IT

AC power cord, 250 V, 10 A, CEI 23-16/VII plug

Italy

8.2

2.5

R2XX-DMYMPWRCORD

No power cord; PID option for ordering server with no power cord

NA

NA

Chapter 5. Storage Controller Considerations

- Storage Controller Cable Connectors and Backplanes

Storage Controller Cable Connectors and Backplanes

This section describes cabling for the storage controllers and backplanes. The SAS/SATA cables are factory-installed and are used for all supported internal controllers.

This section also contains diagrams that show the cable-to-drive mapping.

Cisco 12G Modular SAS RAID Controller or HBA For Up To 10 Drives (UCSC-RAID-M6HD or UCSC-SAS-M6HD)

These controller are supported 10-Drives SSD server version.

This HW RAID or HBA option can control up to 10 front-loading SAS/SATA drives in this server version.

1. Server supports one Cisco M6 12G SAS RAID or Cisco M6 12G SAS HBA Controller that connects to the mother board.

- Front-loading drive bays 1—10 support 2.5-inch SAS/SATA drives

Cisco UCS C225 M6 Block Diagram with Cisco M6 12G SAS RAID or Cisco M6 12G SAS HBA Controller

Note

Only the SAS controllers are supported. NVMe is not supported at this time.

Communications, Services, Bias-free Language, and Additional Information

- To receive timely, relevant information from Cisco, sign up at Cisco Profile Manager.

- To get the business impact you’re looking for with the technologies that matter, visit Cisco Services.

- To submit a service request, visit Cisco Support.

- To discover and browse secure, validated enterprise-class apps, products, solutions and services, visit Cisco Marketplace.

- To obtain general networking, training, and certification titles, visit Cisco Press.

- To find warranty information for a specific product or product family, access Cisco Warranty Finder.

Documentation Feedback

To provide feedback about Cisco technical documentation, use the feedback form available in the right pane of every online document.

Cisco Bug Search Tool

Cisco Bug Search Tool (BST) is a web-based tool that acts as a gateway to the Cisco bug tracking system that maintains a comprehensive list of defects and vulnerabilities in Cisco products and software. BST provides you with detailed defect information about your products and software.

Bias-Free Language

The documentation set for this product strives to use bias-free language. For purposes of this documentation set, bias-free is defined as language that does not imply discrimination based on age, disability, gender, racial identity, ethnic identity, sexual orientation, socioeconomic status, and intersectionality. Exceptions may be present in the documentation due to language that is hardcoded in the user interfaces of the product software, language used based on standards documentation, or language that is used by a referenced third-party product.

Introduction

THE SPECIFICATIONS AND INFORMATION REGARDING THE PRODUCTS IN THIS MANUAL ARE SUBJECT TO CHANGE WITHOUT NOTICE. ALL STATEMENTS, INFORMATION, AND RECOMMENDATIONS IN THIS MANUAL ARE BELIEVED TO BE ACCURATE BUT ARE PRESENTED WITHOUT WARRANTY OF ANY KIND, EXPRESS OR IMPLIED. USERS MUST TAKE FULL RESPONSIBILITY FOR THEIR APPLICATION OF ANY PRODUCTS.

THE SOFTWARE LICENSE AND LIMITED WARRANTY FOR THE ACCOMPANYING PRODUCT ARE SET FORTH IN THE INFORMATION PACKET THAT SHIPPED WITH THE PRODUCT AND ARE INCORPORATED HEREIN BY THIS REFERENCE. IF YOU ARE UNABLE TO LOCATE THE SOFTWARE LICENSE OR LIMITED WARRANTY, CONTACT YOUR CISCO REPRESENTATIVE FOR A COPY.

The following information is for FCC compliance of Class A devices: This equipment has been tested and found to comply with the limits for a Class A digital device, pursuant to part 15 of the FCC rules. These limits are designed to provide reasonable protection against harmful interference when the equipment is operated in a commercial environment. This equipment generates, uses, and can radiate radio-frequency energy and, if not installed and used in accordance with the instruction manual, may cause harmful interference to radio communications. Operation of this equipment in a residential area is likely to cause harmful interference, in which case users will be required to correct the interference at their own expense.

The following information is for FCC compliance of Class B devices: This equipment has been tested and found to comply with the limits for a Class B digital device, pursuant to part 15 of the FCC rules. These limits are designed to provide reasonable protection against harmful interference in a residential installation. This equipment generates, uses and can radiate radio frequency energy and, if not installed and used in accordance with the instructions, may cause harmful interference to radio communications. However, there is no guarantee that interference will not occur in a particular installation. If the equipment causes interference to radio or television reception, which can be determined by turning the equipment off and on, users are encouraged to try to correct the interference by using one or more of the following measures:

- Reorient or relocate the receiving antenna.

- Increase the separation between the equipment and receiver.

- Connect the equipment into an outlet on a circuit different from that to which the receiver is connected.

- Consult the dealer or an experienced radio/TV technician for help.

Modifications to this product not authorized by Cisco could void the FCC approval and negate your authority to operate the product.

The Cisco implementation of TCP header compression is an adaptation of a program developed by the University of California, Berkeley (UCB) as part of UCB’s public domain version of the UNIX operating system. All rights reserved. Copyright © 1981, Regents of the University of California.

NOTWITHSTANDING ANY OTHER WARRANTY HEREIN, ALL DOCUMENT FILES AND SOFTWARE OF THESE SUPPLIERS ARE PROVIDED "AS IS" WITH ALL FAULTS. CISCO AND THE ABOVE-NAMED SUPPLIERS DISCLAIM ALL WARRANTIES, EXPRESSED OR IMPLIED, INCLUDING, WITHOUT LIMITATION, THOSE OF MERCHANTABILITY, FITNESS FOR A PARTICULAR PURPOSE AND NONINFRINGEMENT OR ARISING FROM A COURSE OF DEALING, USAGE, OR TRADE PRACTICE.

IN NO EVENT SHALL CISCO OR ITS SUPPLIERS BE LIABLE FOR ANY INDIRECT, SPECIAL, CONSEQUENTIAL, OR INCIDENTAL DAMAGES, INCLUDING, WITHOUT LIMITATION, LOST PROFITS OR LOSS OR DAMAGE TO DATA ARISING OUT OF THE USE OR INABILITY TO USE THIS MANUAL, EVEN IF CISCO OR ITS SUPPLIERS HAVE BEEN ADVISED OF THE POSSIBILITY OF SUCH DAMAGES.

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

All printed copies and duplicate soft copies of this document are considered uncontrolled. See the current online version for the latest version.

Cisco has more than 200 offices worldwide. Addresses and phone numbers are listed on the Cisco website at www.cisco.com/go/offices.

The documentation set for this product strives to use bias-free language. For purposes of this documentation set, bias-free is defined as language that does not imply discrimination based on age, disability, gender, racial identity, ethnic identity, sexual orientation, socioeconomic status, and intersectionality. Exceptions may be present in the documentation due to language that is hardcoded in the user interfaces of the product software, language used based on standards documentation, or language that is used by a referenced third-party product.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: https://www.cisco.com/c/en/us/about/legal/trademarks.html. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1721R)