Chapter 1. New and Changed Information

The following table provides an overview of the significant changes to the organization and features in this guide from the time the guide was first published to the latest update.

Latest Updates

Date

Changes

December 05, 2023

Updated the "Service Graph nodes per Service Graph" scale.

September 16, 2022

First release of this document.

- Overview

- ACI Fabrics Scalability Limits

- NDFC Fabrics Scalability Limits

Overview

This guide contains the maximum verified scalability limits for Cisco Multi-Site.

These values are based on a profile where each feature was scaled to the numbers specified in the tables. These numbers do not represent the theoretically possible scale.

Note

The total number of objects within each site must not exceed the maximum verified scalability limit for that fabric version. For more information on site-specific scalability limits, see the Cisco ACI Verified Scalability Guide, Cisco Cloud Network Controller Verified Scalability Guide, or Cisco NDFC Verified Scalability Guide for your fabric type and release.

ACI Fabrics Scalability Limits

This release supports managing only NDFC fabrics or only ACI fabrics by the same Nexus Dashboard Orchestrator. The following scale limits apply when managing ACI fabrics.

General Scalability Limits

Object

Scale

Sites

Up to 100 sites total on-boarded in Nexus Dashboard and managed by Nexus Dashboard Orchestrator.

Up to 14 of those sites can be Multi-Site-enabled with EVPN sessions between them.

For specific details about template object scale, which depends on the type of the templates you deploy (Multi-Site vs Autonomous), see the Table 4 and Table 5 tables below.

Pods per site

12 or 25, depending on the Cisco APIC release managing the site.

For more information, see the Cisco APIC Verified Scalability Guide for your release.

Leaf switches per site

400 in a single pod

500 across all pods in Multi-Pod fabrics

Number of leaf switches supported within each fabric depends on the Cisco APIC release managing that fabric. For more information, see the Cisco APIC Verified Scalability Guide for your release.

Total leaf switches across all sites

(max number of sites) * (max number of leaf switches per site), for example:

- For Multi-Site deployments, if every site is deployed as a Multi-Pod fabric, then max number of leaf switches is (14 sites) * (500 switches) = 7000.

- For Autonomous site deployments, (100 sites) * (500 switches) = 50,000

Note

Maximum scale requires that Nexus Dashboard Orchestrator is deployed in a physical Nexus Dashboard cluster.

In addition, specific objects' scale (such as VRFs, BDs, EPGs, etc.) still applies, as described in the template-specific sections below.

Endpoints per site

The NDO endpoint scale for each site is the same as the scale supported by the site's APIC. For detailed information, see the Cisco APIC Verified Scalability Guide for the APIC release version managing each site.

Note

If the site is part of a Multi-Site domain, the total number of endpoints is the sum of local and remote endpoints.

Note

If a specific object's scale (such as contracts, filters, or VRFs) is not included in the following table, that object does not have a unique scale limit and the general "Policy Objects per Schema" and "Policy Objects per Template" limits apply. If any such objects were explicitly listed in previous releases, those limitations have been lifted and removed from the list.

Application Templates Scale

Object

Scale

Schemas

1000

Templates per Schema

30

Service Graphs per Schema

500

Service Graph nodes per Service Graph

2

Policy Objects per Schema

2000

Policy Objects per Template

2000

Contract Preferred Group (BD/EPG combinations)

500

This value represents the number of EPGs that are part of the Preferred Group (across all the defined VRFs) that can be deployed in each site. This means that the maximum number of EPGs in the Preferred Group that can be managed by a single Nexus Dashboard Orchestrator instance can range from 500 (if all the EPGs are stretched) to 14*500 (if only site-local EPGs are defined in each site).

Note

The following table applies to the Tenant Policies, Fabric Policies, Fabric Resource Policies, and Monitoring Policies templates introduced in Release 4.0(1). For Application template scalability information, see the previous tables in this document.

Tenant Policies, Fabric Policies, Fabric Resource Policies, and Monitoring Policies Templates Scale

Object

Scale

Policy Objects per Template

500

Monitoring Policy Scale

ERSPAN Sessions

20 per site

Fabric SPAN Sessions

30 per site

NDO-Deployed Objects Scale

To better understand the scalability values captured in the following table for traditional Multi-Site deployments, it is important to clarify that there are three kind of NDO-deployed objects:

- Site local objects—these are the objects defined in templates associated to a single site, which get deployed by NDO only in that specific site.

- Shadow objects—these are the objects deployed by NDO in a site as a result of a contract established between site local and remote objects, they are the representation ("shadow)" of the remote object in the local site.

- Stretched objects—these are the objects defined in templates that are associated to multiple sites, which get deployed by NDO concurrently on all those sites.

The table below captures the maximum number of objects that NDO can deploy in a given site and includes the sum of all three kinds of objects described above.

For example, if you have two sites and you define three templates on NDO—template-1 associated to site-1, template-2 associated to site-2, and template-stretched associated to both site-1 and site-2—then:

- If you configure and deploy EPG-1 in template-1, this will count as one EPG towards maximum allowed for site-1.

- If you configure and deploy EPG-2 in template-2, this will count as one EPG towards maximum allowed for site-2.

- If you apply a contract between EPG-1 and EPG-2 or add both EPGs to the Preferred Group), a shadow EPG-2 will be created in site-1 and a shadow EPG-1 in site-2. As a result, two EPGs will now be counted towards maximum allowed in each site.

- Finally, if you configure and deploy EPG-3 in template-stretched, it will count as another EPG in each site, bringing the total to 3 EPGs towards maximum allowed scale.

It is worth adding that the maximum number of objects supported in a given fabric (and captured in the Verified Scalability Guide for Cisco APIC) must not exceed the sum of objects locally defined on APIC plus the objects pushed from NDO to that site (NDO-deployed objects).

Note

For maximum scale Nexus Dashboard Orchestrator configurations with many features enabled simultaneously, we recommend that those configurations be tested in a lab before deployment.

NDO-Deployed Logical Objects Scale for Multi-Site Templates

Object

Maximum number of objects per site for up to 4 sites

Maximum number of objects per site for 5-14 sites

Tenants

1000

400

VRFs

2000

1000

BDs

6000

4000

Contracts

6000

4000

EPGs

6000

4000

Isolated EPGs

500

500

Microsegment EPGs

2000

500

L3Out external EPGs

500

500

Subnets

8000

8000

L4-L7 logical devices

400

400

Graph instances

250

250

Device clusters per tenant

10

10

Number of graph instances per device cluster

125

125

Beginning with Release 4.0(1), Nexus Dashboard Orchestrator adds support for autonomous sites. When creating Multi-Site application templates, you can now choose to designate the template as Autonomous. This allows you to associate the template to one or more sites that are operated independently and are not connected through an Inter-Site Network (no intersite VXLAN communication).

Because autonomous sites are by definition isolated and do not have any intersite connectivity, there is no shadow object configuration across sites and no cross-programming of pctags or VNIDs in the spine switches for intersite traffic flow.

The autonomous templates allow for significantly higher deployment scale as shown in the following table. Since there are no stretched objects or shadow objects, the scale values shown in the table below reflect the specific site-local objects that the Orchestrator deploys in each site. This is in contrast to the scale for Multi-Site templates listed above, where the numbers represent the maximum number of objects across all sites.

NDO-Deployed Objects Scale for Autonomous Templates

Object

Maximum number of objects per site for up to 100 sites

Tenants

1000

VRFs

2000

BDs

6000

Contracts

6000

EPGs

6000

Isolated EPGs

500

Microsegment EPGs

2000

L3Out external EPGs

500

Subnets

8000

Number of L4-L7 logical devices

400

Number of graph instances

250

Number of device clusters per tenant

10

Number of graph instances per device cluster

125

SD-Access and Cisco ACI Integration Scale

Starting with Release 3.7(1), you can onboard a Cisco DNA Center (DNAC) to your Nexus Dashboard Orchestrator for SD-Access and ACI integration.

Note

Cisco Nexus Dashboard and Cisco DNAC integration allows for automation of a subset of network connectivity and macro segmentation scenarios across Nexus and campus SDA fabric deployments. This integration is under limited availability. Please contact your Cisco representative for additional information

The following scale limits apply for this use case:

- Only a single DNAC can be onboarded to your Nexus Dashboard Orchestrator for SD-Access and ACI integration.

- Up to 2 Cisco ACI sites are supported for peering with SD-Access.

Each ACI site can be a single Pod or a Multi-Pod fabric.

- Multiple SD-Access (campus) sites are supported if managed by a single DNAC.

- A virtual network (VN) can be mapped to a maximum of 10 ACI VRFs.

- Up to 32 virtual networks from the SD-Access domain can be extended into the ACI domain.

VRF/BD VNID Translation Scale

VRF/BD VNID Translation Scale

Object

Scale

Fixed spines

21,000

Modular spines

42,000

NDFC Fabrics Scalability Limits

This release of Nexus Dashboard Orchestrator supports managing only NDFC fabrics or only ACI fabrics by the same Nexus Dashboard Orchestrator. The following scale limits apply when managing NDFC fabrics.

General Scalability Limits

Object

Scale

Sites

A "site" in NDO context is equivalent to an NDFC "fabric".

13

Fabrics per NDFC instance

5

Border Gateways per site

4

Nexus Dashboard Orchestrator Objects Scale

Object

Scale

Schemas

80

Templates per Schema

10

Policy Objects per Schema

1000

Note

When NDO manages NDFC fabrics, there is no concept of "shadow" objects. Hence, the scalability values captured in the table below only refer to the sum of site-local and stretched objects deployed by NDO in a given fabric.

NDO-Managed Objects Scale

Object

Scale (Stretched)

VRFs

500

Networks

1000 (L3)

1500 (L2)

Notices