Chapter 1. Cisco Nexus Dashboard Fabric Controller Compatibility Matrix

The following sections provide information regarding the Compatibility of Cisco NDFC Release 12.1.2e with various platforms, switches, applications, and other devices and their software versions, along with products and components that are supported with NDFC.

- Software Compatibility

- Hardware Compatibility

- Software Compatibility

- Hardware Compatibility

Software Compatibility

The following sections provide information regarding the Compatibility of Cisco Nexus Dashboard Fabric Controller Release 12.1.2e with various switches, applications, and other devices.

- Software Compatibility Matrix for Fabric Controller

- Compatibility Matrix for SAN Controller

- Compatibility Matrix for Cisco Nexus Dashboard and Applications

Software Compatibility Matrix for Fabric Controller

Software Compatibility Matrix for Fabric Controller

Fabric Type

Supported Releases

Recommended Releases

Newly provisioned VXLAN fabrics N9000, N9000v

9.3(3), 9.3(4), 9.3(5), 9.3(6), 9.3(7), 9.3(7a), 9.3(8), 9.3(9), 9.3(10), 9.3(11),

10.1(1), 10.1(2)

10.2(1)F, 10.2(2)F, 10.2(3)F, 10.2(4)M, 10.2(5)M

10.3(1)F, 10.3(2)F, 10.3(3)F

9.3(11), 10.2(5)

Newly provisioned VXLAN fabrics N3600

9.3(3), 9.3(4), 9.3(5), 9.3(6), 9.3(7), 9.3(7a), 9.3(8), 9.3(9), 9.3(10), 9.3(11)

10.1(1), 10.1(2)

10.2(1)F, 10.2(2)F, 10.2(3)F, 10.2(4)M, 10.2(5)M

10.3(1)F, 10.3(2)F, 10.3(3)F

9.3(11), 10.2(5)

Brownfield deployment for N9000

9.3(3), 9.3(4), 9.3(5), 9.3(6), 9.3(7), 9.3(7a), 9.3(8), 9.3(9), 9.3(10), 9.3(11)

10.1(1), 10.1(2)

10.2(1)F, 10.2(2)F, 10.2(3)F, 10.2(4)M, 10.2(5)M

10.3(1)F, 10.3(2)F, 10.3(3)F

9.3(11), 10.2(5)

Brownfield deployment for N3600

9.3(3), 9.3(4), 9.3(5), 9.3(6), 9.3(7), 9.3(7a), 9.3(8), 9.3(9), 9.3(10), 9.3(11)

10.1(1), 10.1(2)

10.2(1)F, 10.2(2)F, 10.2(3)F, 10.2(4)M, 10.2(5)M

10.3(1)F, 10.3(2)F, 10.3(3)F

9.3(11), 10.2(5)

External/LAN Classic Fabric N3000/3100/3500

7.0(3)I7(9), 7.0(3)I7(10)

9.3(3), 9.3(4), 9.3(5), 9.3(6), 9.3(7), 9.3(7a), 9.3(8), 9.3(9), 9.3(10), 9.3(11)

10.1(1), 10.1(2)

10.2(1)F, 10.2(2)F, 10.2(3)F, 10.2(4)M, 10.2(5)M

10.3(1)F, 10.3(2)F, 10.3(3)F

9.3(11), 10.2(5)

External/LAN Classic Fabric N3600

9.3(3), 9.3(4), 9.3(5), 9.3(6), 9.3(7), 9.3(7a), 9.3(8), 9.3(9), 9.3(10), 9.3(11)

10.1(1), 10.1(2)

10.2(1)F, 10.2(2)F, 10.2(3)F, 10.2(4)M, 10.2(5)M

10.3(1)F, 10.3(2)F, 10.3(3)F

9.3(11), 10.2(5)

External/LAN Classic Fabric N5000/5600/6000

7.3(8)N1(1), 7.3(9)N1(1), 7.3(10)N1(1), 7.3(11)N1(1), 7.3(12)N1(1)

7.3(9)N1(1)

External/LAN Classic Fabric N7000/7700

7.3(5)D1(1), 7.3(7)D1(1), 7.3(8)D1(1), 7.3(9)D1(1), 8.2(5), 8.2(7), 8.2(7a), 8.2(8), 8.2(9), 8.4(4), 8.4(4a), 8.4(5), 8.4(6), 8.4(6a)

7.3(8)D1(1), 8.2(7a)

External/LAN Classic/LAN Monitor Fabric N9000, N9000v

7.0(3)I7(9), 7.0(3)I7(10)

9.3(3), 9.3(4), 9.3(5), 9.3(6), 9.3(7), 9.3(7a), 9.3(8), 9.3(9), 9.3(10), 9.3(11)

10.1(1), 10.1(2)

10.2(1)F, 10.2(2)F, 10.2(3)F, 10.2(4)M, 10.2(5)M

10.3(1)F, 10.3(2)F, 10.3(3)F

9.3(11), 10.2(5)

Easy Fabric for IOS XE[1]

IOS XE

- 17.3.3, 17.3.4 for ASR 1K and CSR 1KV

- 17.3.4a for Catalyst 8K and 9K

External Fabric for Non-Nexus Devices[2]

IOS XE

- 17.3.3, 17.3.4 for ASR 1K and CSR 1KV

- 17.3.4a for Catalyst 8K and 9K

IOS XR

- 6.8.1 for ASR 9K

- 6.5.3 for NCS 5500

- EOS 4.23.4.2M for Arista

IPFM Fabric

9.3(5), 9.3(6), 9.3(7), 9.3(8), 9.3(9), 9.3(10)

10.1(1), 10.1(2)

10.2(1)F, 10.2(2)F, 10.2(3)F, 10.2(4)M

10.3(1)F, 10.3(2)F

9.3(8), 9.3(9), 9.3(10)

10.1(1), 10.1(2)

10.2(1)F, 10.2(2)F, 10.2(3)F, 10.2(4)M

10.3(1)F, 10.3(2)F

[1] Only Catalyst 9K series supported. For qualified models, refer to Supported Hardware for Cisco Nexus Dashboard Fabric Controller section.

[2] ASR 1K, ASR 9K, Catalyst 9K, CSR 1KV, NCS 5500, Arista DCS series supported. For qualified models, refer Supported Hardware section in Cisco NDFC Release Notes.

Compatibility Matrix for SAN Controller

Compatibility Matrix for SAN Controller

Switches

Supported Switch Releases

Cisco MDS 9100

9.3(2), 9.3(1), 8.4(2e), 8.4(2d), 9.2(2), 9.2(1), 8.4(2c), 8.5(1), 6.2(33), 8.4(2b), 8.1(1b), 6.2(31), 6.2(29), 8.4(2a), 8.4(2), 8.4.(1a), 6.2(29), 8.4(1), 6.2(27), 8.3(2), 8.3(1), 8.2(2), 8.2(1), 8.1(1a), 7.3(1)DY(1), 7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(25), 6.2(23), 6.2.(21), 6.2(19), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 6.2(11c), 6.2(11b), 6.2(11), 6.2(9c), 6.2(9b), 6.2(9a), 6.2(9), 6.2(7), 6.2(5a), 6.2(5), 6.2(3), 6.2(1), 5.2(8i), 5.2(8h), 5.2(8g), 5.2(8f), 5.2(8e), 5.2(8d), 5.2(8c)

Cisco MDS 9200

9.3(2), 9.3(1), 9.2(2), 9.2(1a), 9.2(1), 8.5(1), 8.3(2), 8.3(1), 7.3(1)DY(1), 7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(25), 6.2(23), 6.2(21), 6.2(19), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 6.2(11c), 6.2(11b), 6.2(11), 6.2(9c), 6.2(9b), 6.2(9a), 6.2(9), 6.2(7), 6.2(5a), 6.2(5), 6.2(3), 6.2(1), 5.2(8h), 5.2(8c), 5.2(8d), 5.2(8e), 5.2(8f), 5.2(8g)

Cisco MDS 9250i

9.3(2), 9.3(1), 9.2(1a), 8.4(2e), 8.4(2d), 9.2(2), 9.2(1), 8.4(2c), 8.5(1), 8.4(2b), 8.4(2a), 8.4(2), 8.1(1b), 8.4(1a), 6.2(31), 6.2(29), 8.4(1), 6.2(27), 8.3(2), 8.3(1), 8.2(2), 8.2(1), 8.1(1a), 7.3(1)DY(1), 7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(25), 6.2(23), 6.2.(21), 6.2(19), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 6.2(11c), 6.2(11b), 6.2(11), 6.2(9c), 6.2(9b), 6.2(9a), 6.2(9), 6.2(7), 6.2(5a), 6.2(5)

Cisco MDS 9220i

9.3(2), 9.3(1), 9.2(2), 9.2(1a), 9.2(1), 8.5(1), 8.4(2d)

Cisco MDS 9300

9.3(2), 9.3(1), 9.2(1a), 8.4(2e), 8.4(2d), 9.2(2), 9.2(1), 8.4(2c), 8.5(1), 6.2(33), 8.4(2b), 8.1(1b), 6.2(31), 6.2(29), 8.4(2a), 8.4(2), 8.4(1a), 6.2(29), 8.4(1), 6.2(27), 8.3(2), 8.3(1), 8.2(2), 8.2(1), 8.1(1a), 8.1(1), 7.3(1)DY(1), 7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(25), 6.2(23), 6.2(21), 6.2(19), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13)

Cisco MDS 9500

6.2(33), 7.3(1)DY(1), 7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(31), 6.2(29), 6.2(25), 6.2(23), 6.2(21), 6.2(19), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 6.2(11c), 6.2(11b), 6.2(11), 6.2(9c), 6.2(9b), 6.2(9a), 6.2(9), 6.2(7), 6.2(5a), 6.2(5), 6.2(3), 6.2(1), 5.2(8h), 5.2(8c), 5.2(8d), 5.2(8e), 5.2(8f), 5.2(8g)

Cisco MDS 9700

9.3(2), 9.3(1), 9.2(1a), 8.4(2e), 8.4(2d), 9.2(2), 9.2(1), 8.4(2c), 8.5(1), 6.2(33), 8.4(2b), 8.1(1b), 6.2(31), 6.2(29), 8.4(2a), 8.4(2), 8.4(1a), 6.2(29), 8.4(1), 6.2(27), 8.3(2), 8.3(1), 8.2(2), 8.2(1), 8.1(1a), 8.1(1), 7.3(1)DY(1), 7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(25), 6.2(23), 6.2(21), 6.2(19), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 6.2(11c), 6.2(11b), 6.2(11), 6.2(9c), 6.2(9b), 6.2(9a), 6.2(9), 6.2(7), 6.2(5a), 6.2(5), 6.2(3), 6.2(1)

Cisco Nexus 9000 Series

10.3(3)F, 10.3(2)F, 10.2(5)M, 10.2(4)M, 10.2(3)F, 9.3(11), 9.3(10), 9.3(9), 10.2(2)F, 10.2(1)F, 7.0(3)I7(10), 9.3(8), 10.1(2), 10.1(1), 9.3(7), 9.3(6), 7.0(3)I7(9), 9.3(5), 9.3(4), 7.0(3)I7(8), 9.3(3), 7.0(3)I7(7), 9.3(2), 9.2(4), 9.3(1), 9.2(3), 7.0(3)I4(9), 7.0(3)I7(6), 9.2(2), 9.2(1), 7.0(3)I7(5), 7.0(3)I7(4), 7.0(3)I7(3), 7.0(3)I7(2), 7.0(3)I7(1), 7.0(3)I4(8), 7.0(3)I4(7), 7.0(3)I4(6), 7.0(3)I4(5), 7.0(3)I4(4), 7.0(3)I4(3), 7.0(3)I4(2), 7.0(3)I4(1), 7.0(3)F3(2), 7.0(3)F3(1), 7.0(3)F1(2), 7.0(3)I6(2), 7.0(3)I6(1), 7.0(3)F2(1), 7.0(3)F1(1), 7.0(3)I2(4), 7.0(3)I2(5), 7.0(3)I5(2), 7.0(3)I5(1), 7.0(3)I3(2), 7.0(3)I3(1), 7.0(3)I2.3, 7.0.3.I2.2c, 7.0(3)l2.2a, 7.0(3)l2.1, 7.0(3)l1.3, 7.0(3)I1.2, 6.2(9), 6.1(2)I3.4, 6.1(2)I3.2, 6.1(2)I3(1), 6.1(2)I2(1), 6.1(2)I1(2), 6.1(2)I1(1)

Cisco Nexus 7000 Series

8.4(6a), 8.4(6), 8.2(9), 7.3(9)D1(1), 7.3(9)D1(1), 8.2(8), 8.4(5), 8.4(4a), 7.3(8)D1(1), 8.2(7a), 8.4(4), 7.3(7)D1(1), 8.2(6), 8.4(3), 8.4(2), 7.3(6)D1(1), 8.2(5), 7.3(5)D1(1), 8.4(1), 8.2(4), 7.3(4)D1(1), 8.3(2), 8.3(1), 8.2(3), 8.2(2), 8.2(1), 8.1(2), 8.1(1), 8.0(1), 7.3(3)D1(1), 7.3(2)D1(3), 7.3(2)D1(2), 7.3(2)D1(1), 7.3(1)D1(1), 7.3(0)D1(1), 7.2(2)D1(4), 7.2(2)D1(2), 7.2(2)D1(1), 7.2(1)D1(1), 7.2(0)D1(2), 7.2(0)D1(1)

Cisco Nexus 7700 Series

8.4(6a), 8.4(6), 8.2(9), 7.3(9)D1(1), 8.2(8), 8.4(5), 8.4(4a), 7.3(8)D1(1), 8.2(7a), 8.4(4), 7.3(7)D1(1), 8.2(6), 8.4(3), 8.4(2), 7.3(6)D1(1), 8.2(5), 7.3(5)D1(1), 8.4(1), 8.2(4), 7.3(4)D1(1), 8.3(2), 8.3(1), 8.2(3), 8.2(2), 8.2(1), 8.1(2), 8.1(1), 8.0(1), 7.3(3) D1(1), 7.3(2)D1(3), 7.3(2)D1(2), 7.3(2)D1(1), 7.3(1)D1(1), 7.3(0)DX(1), 7.3(0)D1(1), 7.2(2)D1(4), 7.2(2)D1(2), 7.2(2)D1(1), 7.2(1)D1(1), 7.2(0)D1(2), 7.2(0)D1(1)

Cisco Nexus 6000/5600 Series

7.3(12)N1(1), 7.3(11)N1(1), 7.3(10)N1(1), 7.3(9)N1(1), 7.3(8)N1(1), 7.3(7)N1(1b), 7.3(7)N1(1a), 7.3(7)N1(1), 7.3(6)N1(1), 7.3(5)N1(1), 7.1(5)N1(1b), 7.3(4)N1(1), 7.3(3)N1(1), 7.3(2)N1(1e), 7.3(2)N1(1), 7.3(1)N1(1), 7.3(0)N1(1), 7.2(1)N1(1), 7.1(5)N1(1), 7.2(0)N1(1), 7.1(5)N1(1), 7.1(4)N1(1), 7.1(3)N1(2), 7.1(3)N1(1), 7.1(2)N1(1), 7.1(1)N1(1), 7.1(0)N1(1), 7.0(8)N1(1), 7.0(7)N1(1), 7.0(6)N1(1), 7.0(5)N1(1), 7.0(4)N1(1), 7.0(3)N1(1), 7.0(2)N1(1), 7.0(1)N1(1), 6.0(2)N2(7), 6.0(2)N2(2), 6.0(2)N2(1), 6.0(2)N1(2)

Cisco Nexus 5000 Series

7.3(12)N1(1), 7.3(11)N1(1), 7.3(10)N1(1), 7.3(9)N1(1), 7.3(8)N1(1), 7.3(7)N1(1b), 7.3(7)N1(1a), 7.3(7)N1(1), 7.3(6)N1(1), 7.3(5)N1(1), 7.1(5)N1(1b), 7.3(4)N1(1), 7.3(3)N1(1), 7.3(2)N1(1e), 7.3(2)N1(1), 7.3(1)N1(1), 7.3(0)N1(1), 7.2(1)N1(1), 7.2(0)N1(1), 7.1(5)N1(1), 7.1(4)N1(1), 7.1(3)N1(2), 7.1(3)N1(1), 7.1(2)N1(1), 7.1(1)N1(1), 7.1(0)N1(1), 7.0(8)N1(1), 7.0(7)N1(1), 7.0(6)N1(1), 7.0(5)N1(1), 7.0(4)N1(1), 7.0(3)N1(1), 7.0(2)N1(1), 7.0(1)N1(1), 6.0(2)N2(7), 6.0(2), 5.2(1)N1(9a), 5.2(1)N1(9), 5.2(1), 5.1(3), 5.0(3), 5.0(2), 4.2(1), 4.1(3)

UCS Infrastructure and UCS Manager Software

4.2(1d), 4.0.4g, 4.1.1a, 3.2.3n, 4.0.4, 4.0.1, 3.2(3k), 2.2.5a

Note

The Cisco NX-OS version of the Cisco Nexus 2000 Series Fabric Extenders will be the same as the NX-OS version of the supported Nexus switch (that is, Cisco Nexus 5000, Cisco Nexus 7000, or Cisco Nexus 9000).

Compatibility Matrix for Cisco Nexus Dashboard and Applications

Cisco Nexus Dashboard and Services compatibility information for specific Cisco Nexus Dashboard, services, and fabric versions. See Cisco Nexus Dashboard and Services Compatibility Matrix.

For recommendation on Nexus Dashboard cluster sizing for co-hosting services, see the Nexus Dashboard Capacity Planning tool instead.

Hardware Compatibility

- Supported Hardware for Cisco Nexus Dashboard Fabric Controller

Supported Hardware for Cisco Nexus Dashboard Fabric Controller

The following tables list the products and components that are supported in the Cisco Nexus Dashboard Fabric Controller, Release 12.1.2d

UCS Fabric Interconnect Integration

Product/Component

Part Number

Cisco UCS Unified Computing System 6454 1-RU In-Chassis FI with 36x10G/25G + 4x 1G/10G/25G + 6x40G/100G + 8 UP Ports

UCS-FI-6454-U

Cisco UCS Unified Computing System 6332 1-RU In-Chassis FI with 16UP + 24x40G Fixed Ports

UCS-FI-6332-16UP

Cisco UCS Unified Computing System 6332 1-RU In-Chassis FI with 32x40G Fixed Ports

UCS-FI-6332

Cisco UCS Unified Computing System 6324 In-Chassis FI with 4UP, 1x40G Exp Port

UCS-FI-M-6324

Cisco UCS Unified Computing System 6296UP 96-Unified Port Fabric Interconnect

UCS-FI-6296UP

Cisco UCS Unified Computing System 6248UP 48-Unified Port Fabric Interconnect

UCS-FI-6248UP

Cisco MDS 9000 Series Switches Family

Product/Component

Part Number

Cisco MDS 9718 Supervisor-1E Modules

DS-X97-SF1-K9

Cisco MDS 9710 Crossbar Fabric-3 Switching Module

DS-X9710-FAB3

Cisco MDS 9700 Series Supervisor-4 Module

DS-X97-SF4-K9

MDS 9706 Crossbar Switching Fabric-3 Module

DS-X9706-FAB3

Cisco MDS 9396T 32 Gbps 96-Port Fibre Channel Switch

DS-C9396T-K9

Cisco MDS 9396S 16G Multilayer Fabric Switch

DS-C9396S-K9

Cisco MDS 9124V 64-Gbps 24-Port Fibre Channel Switch

DS-C9124V-K9

Cisco MDS 9148V 64-Gbps 48-Port Fibre Channel Switch

DS-C9148V-K9

Cisco MDS 9148T 32 Gbps 48-Port Fibre Channel Switch

DS-C9148T-K9

Cisco MDS 9700 48-Port 32-Gbps Fibre Channel Switching Module

DS-X9648-1536K9

Cisco MDS 9700 64-Gbps 48-port Fibre Channel Switching Module

DS-X9748-3072K9

Cisco MDS 9250i Multilayer Fabric Switch

DS-9250I-K9

Cisco MDS 9124 24-Port Multilayer Fabric Switch

DS-C9124-K9

Cisco MDS 9134 34-Port Multilayer Fabric Switch

DS-C9134-K9

Cisco MDS 9148 48-Port Multilayer Fabric Switch

DS-C9148-K9

Cisco MDS 9148 48-Port Multilayer Fabric Switch

DS-C9148S-K9

Cisco MDS 9216i Multilayer Fabric Switch

DS-C9216i-K9

Cisco MDS 9222i Multilayer Fabric Switch

DS-C9222i-K9

Cisco MDS 9220i Intelligent fabric switch chassis, 12X32G FC+6IPS

DS-C9220I-K9

Cisco MDS 9506 Multilayer Director

DS-C9506

Cisco MDS 9509 Multilayer Director

DS-C9509

Cisco MDS 9513 Multilayer Director

DS-C9513

Cisco MDS 9706 Multilayer Director

DS-C9706

Cisco MDS 9710 Multilayer Director

DS-C9710

Cisco MDS 9718 Multilayer Director

DS-C9718

Cisco MDS 9000 32-Port 2-Gbps Fibre Channel Switching Module

DS-X9032

Cisco MDS 9000 32-Port Storage Services Module

DS-X9032-SSM

Cisco MDS 9000 12-port 4-Gbps Fibre Channel Switching Module

DS-X9112

Cisco MDS 9000 12-port 4-Gbps Fibre Channel Switching Module

DS-X9112

Cisco MDS 9000 12-port 4-Gbps Fibre Channel Switching Module

DS-X9112

Cisco MDS 9000 24-port 4-Gbps Fibre Channel Switching Module

DS-X9124

Cisco MDS 9000 48-port 4-Gbps Fibre Channel Switching Module

DS-X9148

Cisco MDS 9000 24-Port 8-Gbps Fibre Channel Switching Module

DS-X9224-96K9

Cisco MDS 9000 32-port 8-Gbps Advanced Fibre Channel Switching Module

DS-X9232-256K9

Cisco MDS 9000 48-port 8-Gbps Advanced Fibre Channel Switching Module

DS-X9248-256K9

Cisco MDS 9000 4/44-Port Host-Optimized 8-Gbps Fibre Channel Switching Module

DS-X9248-48K9

Cisco MDS 9000 48-Port 8-Gbps Fibre Channel Switching Module

DS-X9248-96K9

Cisco MDS 9000 Family 14-Port Fibre Channel and 2-port Gigabit Ethernet Module

DS-X9302-14K9

Cisco MDS 9000 18/4-Port Multiservice Module (MSM-18/4)

DS-X9304-18K9

Cisco MDS 9000 4-port 1-Gbps IP Storage Module

DS-X9304-SMIP

Cisco MDS 9000 8-port 1-Gbps IP Storage Module

DS-X9308-SMIP

Cisco MDS 9000 Family 16-Port Storage Services Node (SSN-16)

DS-X9316-SSNK9

Cisco MDS 9000 Family 24/10 SAN Extension Module

DS-X9334-K9

Cisco MDS 9000 48-port 16-Gbps Fibre Channel Switching Module with SFP LC connectors

DS-X9448-768K9

Cisco MDS 9500 Series Supervisor-1 Module

DS-X9530-SF1-K9

Cisco MDS 9500 Series Supervisor-2 Module

DS-X9530-SF2-K9

Cisco MDS 9500 Series Supervisor-2A Module

DS-X9530-SF2A-K9

Cisco MDS 9000 Family 4-Port 10-Gbps Fibre Channel Switching Module

DS-X9704

Cisco MDS 9000 8-port 10-Gbps Fibre Channel over Ethernet (FCoE) Module

DS-X9708-K9

Cisco MDS 48-Port 10-Gigabit Fibre Channel over Ethernet (FCoE) Module with SFP LC connectors

DS-X9848-480K9

Cisco MDS 9132T 32 Gbps 32-Port Fibre Channel Switch

DS-C9132T-K9

Cisco Nexus 9000 Series Switches

Product/Component

Part Number

Cisco Nexus 9000 Series Switches

32P 40/100G QSFP28, 2P 1/10G SFP

N9K-C9332C

1-RU 48x1/10GT + 6x40G/100G Ethernet Ports

N9K-C93180TC-FX

Cisco Nexus 7700 F4 40G line card

Cisco Nexus 7700 F4 40G line card

Cisco Nexus 9336C-FX2, 1-RU, fixed-port switch with 36 40/100G QSFP28 ports

N9K-C9336C-FX2

Cisco Nexus 9336C-FX2-E, 1-RU, fixed-port switch with 36 40/100G QSFP28 ports

N9K-C9336C-FX2-E

Cisco Nexus 9000 Fixed with 48p 1/10G/25G SFP and 12p 40G/100G QSFP28

N9K-C93240YC-FX2

32-port 100-Gigabit EthernetQuad Small Form-Factor Pluggable 28 (QSFP28) line card

N9K-X9732C-FX

48-port 1 and 10GBASE-T plus 4-port 40/100Gigabit Ethernet QSFP 28 line card

N9K-X9788TC-FX

48-port 1 and 10GBASE-T plus 4-port 40/100Gigabit Ethernet QSFP 28 line card (BMA)

N9K-X9788TC2-FX

FabricModule for Nexus 9516 chassis 100G support (100G/flow), NX-OS and ACI Spine

N9K-C9516-FM-E2

FabricModule for Nexus 9504 R-Series line card, NX-OS only

N9K-C9504-FM-R

Freta 48p 1/10/25G + 4p 100G line card

N9K-X96160YC-R

100-Gigabit N9K-C9508-FM-E2 Fabric Module

N9K-C9508-FM-E2

48P 1/10/25G + 6x100G QSFP28 1-RU

N3K-C36180YC-R

36 40/100G Ethernet module for Nexus 9500 Series

N9K-X9736C-FX

64x100G QSFP28 + 2x10GSFP 1-RU

N9K-C9364C

36x100G Ethernet module for Nexus 9000 Series

N9K-X9636C-RX

1-RU ToR, fixed module 48 100/1000Mbps + 4 25G SFP28 + 2 100G QSFP28

N9K-C9348GC-FXP

1-RU ToR, fixed module 48 100/1000Mbps + 4 25G SFP28 + 2 100G QSFP28 (BMA)

N9K-C9348GC2-FXP

1-RU ToR, fixed module 48 10/25G SFP28 + 6 40/100G QSFP28

N9K-C93180YC-FX

1-RU ToR, fixed module 48 10/25G SFP28 + 6 40/100G QSFP28 (BMA)

N9K-C93180YC2-FX

1-RU ToR, fixed module for Nexus 9300 Series 6 40G/100G QSFP28 + 48 10G BASE-T

N9K-C93108TC-FX

1-RU ToR, fixed module for Nexus 9300 Series 6 40G/100G QSFP28 + 48 10G BASE-T (BMA)

N9K-C93108TC2-FX

Broadwell CPU-based supervisor module for Nexus 9400 Series

N9K-SUPA-PLUS

Broadwell CPU-based supervisor module for Nexus 9400 Series

N9K-SUPB-PLUS

Nexus 9K Fixed with 48p 10G BASE-T and 6p 40G/100G QSFP28

N9K-C93108TC-EX

N9K-C92300YC-Fixed Module

N9K-C92300YC

48-port 1/10/25 Gigabit Ethernet SFP+ and 4-port 40/100 Gigabit Ethernet QSFP Line Card

N9K-X97160YC-EX

Nexus N9K-C9232C Series fixed module with 32x40G/100G

N9K-C9232C

Nexus 9K Fixed with 48p 1/10G/25G SFP+ and 6p 40G/100G QSFP28

N9K-C93180YC-EX

Cisco Nexus 9000 Series 40GE Modules

N9K 32p 40G Ethernet Module

N9K-X9432PQ

36p 40G Ethernet Module

N9K-X9636PQ

36-port 40/100 Gigabit Ethernet QSFP28 line card

N9K-X9636C-R

24-port 400/100 Gigabit Ethernet QSFP-DD line card

N9K-X9624D-R2

Fabric Module for Cisco Nexus 9508 R2-Series line cards – Cisco NX-OS only

N9K-C9508-FM-R2

Cisco Nexus 9364D-GX2A Switch with 64p 400/100-Gbps QSFP-DD ports and 2p 1/10 SFP+ ports

N9K-C9364D-GX2A

Cisco Nexus 9332D-GX2B Switch with 32p 400/100-Gbps QSFP-DD ports and 2p 1/10 SFP+ ports

N9K-C9332D-GX2B

Cisco Nexus 9000 Series 10GE Fiber and Copper Modules

8-port 100-Gigabit CFP2 I/O module

N9K-X9408PC-CFP2

100-Gigabit Ethernet uplink ports

N9K-M4PC-CFP2

Cisco Nexus 9500 Line Card support

N9K-X9564PX

N9K 48x1/10G-T 4x40G Ethernet Module

N9K-X9464PX

Cisco Nexus 9500 Line Card support

N9K-X9564TX

N9K 48x1/10G SFP+ 4x40G Ethernet Module

N9K-X9464TX

Cisco Nexus 9000 Series GEM Module

N9K 40G Ethernet Expansion Module

N9K-M12PQ

N9K 40G Ethernet Expansion Module

N9K-M6PQ

Cisco Nexus 9200 Switches

Nexus 92160YC-X with High-performance 1-RU box, 48 1/10/25-Gb host ports

N9K-C92160YC-X

Nexus 9272Q with high-performance, 72-port/40-Gb fixed switching 2-RU box, 5.76 Tbps of bandwidth

N9K-C9272Q

Nexus 9200 with 56p 40G QSFP+ and 8p 100G QSFP28

N9K-C92304QC

Nexus 9200 with 36p 40G 100G QSFP28

N9K-C9236C

Nexus 9200 with 48p 1/10G/25G SFP+ and 6p 40G QSFP or 4p 100G QSFP28

N9K-C92160YC-X

Nexus 9200 with 72p 40G QSFP+

N9K-C9272Q

Nexus 9200 with 48p 100M/1G Base-T ports and 4p 1/10/25G SPF28 and 2p 40/100G QSFP28

N9K-C92348GC-X

Cisco Nexus 9300 Fixed Switches

Nexus 9300 with 1-rack unit (RU), switch with following fixed ports:

- 48 100M/1/10/25-Gigabit Ethernet SFP28 ports (ports 1–48).

- 6 10/25/40/50/100-Gigabit QSFP28 ports (ports 49–54)

- One management port (one 10/100/1000BASE-T port)

- One console port (RS-232)

- 1 USB port

N9K-C93180YC-FX3

Nexus 9300 with 48p 10G BASE-T and 6p 40G/100G QSFP28, MACsec capable

N9K-C93108TC-FX3P

Nexus 9300 with 48p 1/10G/25G SFP and 6p 40G/100G QSFP28, MACsec, and Unified Ports capable

N9K-C93180YC-FX3S

Nexus 9K Fixed with 96p 1/10G/25G SFP and 12p 40G/100G QSFP28

N9K-C93360YC-FX2

96p 100M/1/10GBASE-T and 12p 40G/100G QSFP28

N9K-C93216TC-FX2

Nexus 9316D Spine and Leaf switch with 28p 100/40G QSFP28 and 8p 400/100G QSFP-DD

N9K-C93600CD-GX

Cisco Nexus 9364C ACI Spine Switch with 64p 40/100G QSFP28, 2p 1/10G SFP

N9K-C9364C-GX

Nexus 9316D spine switch with 16p 400/100G QSFP-DD

N9K-C9316D-GX

Nexus 9300 with 24p 40/50G QSFP+ and 6p 40G/100G QSFP28

N9K-C93180LC-EX

9372-PXE - 48 1/10-Gbps (SFP+) ports and 6 Quad SFP+ (QSFP+) uplink port, 1-RU box

N9K-C9372PX-E

Cisco Nexus 9396PX Switch

N9K-C9396PX

Cisco Nexus 9396TX Switch

N9K-C9396TX

Cisco Nexus 9372PX Switch

N9K-C9372TX

Cisco Nexus 9372PX Switch

N9K-C9372TX

Cisco Nexus 9372TX Switch

N9K-C9372TX

Cisco Nexus 9372TX Switch

N9K-C9372PX

Cisco Nexus 9332PQ Switch

N9K-C9332PQ

Cisco Nexus 93128TX Switch

N9K-C93128TX

Nexus 9300 with 48p 1/10G-T and 6p 40G QSFP+

N9K-C9372TX-E

Cisco Nexus 9400 Modular Chassis

4-rack unit (RU) 8-slot LEM-based modular chassis switch, which is configurable with up to 128 200-Gigabit QSFP56 (256 100-Gigabit by breakout) ports or 64 400-Gigabit ports.

N9K-C9408

Cisco Nexus 9400 CPU card

N9K-C9400-SUP-A

Cisco Nexus 9400 Switch Card

N9K-C9400-SW-GX2A

Cisco Nexus 9400 8p 400G QSFP-DD LEM

N9K-X9400-8D

Cisco Nexus 9400 16p 200G QSFP56 LEM

N9K-X9400-16W

Cisco Nexus 9408 Fan (port-side intake)

N9K-C9400-FAN-PI

Cisco Nexus 9500 Modular Chassis

New fabric module for the Cisco Nexus 9516 Switch chassis

N9K-C9516-FM-E

40/100G Ethernet Module for Nexus 9500 Series chassis

N9K-X9736C-EX

Cisco Nexus 9504 Switch

N9K-C9504

Cisco Nexus 9508 Switch

N9K-C9508

Cisco Nexus 9516 Switch

N9K-C9516

Nexus 9500 line card, 32p 100G QSFP aggregation line card

N9K-X9732C-EX

Nexus 9500 line card, 32p 100G QSFP28 aggregation line card (line rate >250 Bytes)

N9K-X9432C-S

Cisco Nexus 9500 Fabric Modules

Fabric Module for Nexus 9504 with 100G support, NX-OS, and ACI spine

N9K-C9504-FM-E

Fabric Module for Nexus 9504 chassis

N9K-C9504-FM-G

Fan tray for Nexus 9504 chassis

N9K-C9504-FAN2

Fabric Module for Nexus 9504 with 100G support, NX-OS only

N9K-C9504-FM-S

Fan tray for Nexus 9508 chassis

N9K-C9508-FAN2

Fabric Module for Nexus 9508 chassis 100G support, NX-OS, and ACI spine

N9K-C9508-FM-E

Fabric Module for Nexus 9508 chassis

N9K-C9508-FM-G

Fabric Module for Nexus 9508 chassis 100G support, NX-OS only

N9K-C9508-FM-S

Cisco Nexus 9500 16p 400G QSFP-DD cloud-scale line card

N9K-X9716D-GX

Cisco Nexus 9800 Modular Chassis

16-RU modular switch with slots for up to 8 Line Cards in addition to two supervisors, 8 fabric modules, 4 fan trays, and 3 power trays.

N9K-C9808

Cisco Nexus 9800 36-port 400G QSFP-DD Line Card with MACsec.

N9K-X9836DM-A

Cisco Nexus 9800 Platform Supervisor Module

N9K-C9800-SUP-A

Cisco Nexus 9800 QSFP line card (maximum of 8 line cards)

N9K-X9836DM-A

Cisco Nexus 9808 fabric module with maximum of 8 modules (7 fabric modules + 1 fabric module for redundancy)

N9K-C9808-FM-A

Cisco Nexus 9800 8-slot chassis fan tray (1st Generation)

N9K-C9808-FAN-A

Cisco Nexus 7000 Series Switches

Product/Component

Part Number

Supported Chassis

CiscoNexus7702 chassis

N77-C7702

Cisco Nexus 7004 chassis

N7K-C7004

Cisco Nexus 7706 chassis

N77-C7706-FAB2

Cisco Nexus 7009 chassis

N7K-C7009

Cisco Nexus 7010 chassis

N7K-C7010

Cisco Nexus 7018 chassis

N7K-C7018

Cisco Nexus 7710 chassis

N7K-C7710

Cisco Nexus 7718 chassis

N7K-C7718

Fabric module, Cisco Nexus 7009 chassis

N7K-C7009-FAB-2

Fabric module, Cisco Nexus 7010 chassis

N7K-C7010-FAB-1

Fabric module, Cisco Nexus 7010 chassis

N7K-C7010-FAB-2

Fabric module, Cisco Nexus 7018 chassis

N7K-C7018-FAB-1

Fabric module, Cisco Nexus 7018 chassis

N7K-C7018-FAB-2

Fabric module, Cisco Nexus 7710 chassis

N77-C7710-FAB-1

Fabric module, Cisco Nexus 7710 chassis

N77-C7710-FAB-2

Fabric module, Cisco Nexus 7718 chassis

N77-C7718-FAB-2

Supported Supervisor

Cisco Nexus 7000 Supervisor 1 Module

N7K-SUP1

Cisco Nexus 7000 Supervisor 2 Module

N7K-SUP2

Cisco Nexus 7000 Supervisor 2 Enhanced Module

N7K-SUP2E

Cisco Nexus 7700 Supervisor 2 Enhanced Module

N77-SUP2E

Cisco Nexus 7700 Supervisor 3

N77-SUP3E

Supported F Line Cards

Cisco Nexus 7700 Fabric module 3

N77-C7706-FAB-3, N77-C7710-FAB-3

Line card, N77, FANGIO CB100, 30PT, 40GE, zQFSP+

N77-F430CQ-36

32-port 1/10 Gigabit Ethernet SFP+ I/O Module

N7K-F132XP-15

48-port 1/10 Gigabit Ethernet SFP+ I/O Module (F2 Series)

N7K-F248XP-25

48-port 1/10 Gigabit Ethernet SFP+ I/O Module (Enhanced F2 Series)

N7K-F248XP-25E

48-port 1/10 GBase-T RJ-45 Module (Enhanced F2-Series)

N7K-F248XT-25E

Cisco Nexus 7700 Enhanced 48-port 1/10 Gigabit Ethernet SFP+ I/O Module (F2 Series)

N77-F248XP-23E

Cisco Nexus 7000 1 F3 100G

N7K-F306CK-25

Cisco Nexus 7000 F3-Series 6-Port 100G Ethernet Module

N7K-F306CK-25

Cisco Nexus 7000 F3-Series 12-Port 40G Ethernet Module

N7K-F312FQ-25

Cisco Nexus 7700 F3-Series 24-Port 40G Ethernet Module

N77-F324FQ-25

Cisco Nexus 7700 F3-Series 48-Port Fiber 1 and 10G Ethernet Module

N77-F348XP-23

Nexus 7000 F3-Series 48-Port Fiber 1 and 10G Ethernet Module

N7K-F348XP-25

Supported M Line Cards

8-port 10-Gigabit Ethernet Module with XL Option (requires X2)

N7K-M108X2-12L

32-port 10-Gigabit Ethernet SFP+ I/O Module

N7K-M132XP-12

32-port 10-Gigabit Ethernet SFP+ I/O Module with XL Option

N7K-M132XP-12L

48-port 10/100/1000 Ethernet I/O Module

N7K-M148GT-11

48-port 1-Gigabit Ethernet SFP I/O Module

N7K-M148GS-11

48-port 1-Gigabit Ethernet Module with XL Option

N7K-M148GS-11L

2-port 100 Gigabit Ethernet I/O Module with XL Option

N7K-M202CF-22L

6-port 40 Gigabit Ethernet I/O Module with XL Option

N7K-M206FQ-23L

24-port 10 Gigabit Ethernet I/O Module with XL Option

N7K-M224XP-23L

Network Analysis Module NAM-NX1

N7K-SM-NAM-K9

Cisco Nexus 6000 Series Switches

Product/Component

Part Number

N6004X/5696 chassis

Note

This has been rebranded as Cisco Nexus 5000 Series Switches Chassis.

N5K-C5696Q

Cisco Nexus 6001-64T Switch

N6K-C6001-64T

Cisco Nexus 6001-64P Switch

N6K-C6001-64P

Cisco Nexus 6004 EF Switch

N6K-C6004

Cisco Nexus 6004 module 12Q 40-Gigabit Ethernet line card Expansion Module/FCoE, spare

N6004X-M12Q

Cisco Nexus 6004 M20UP LEM

N6004X-M20UP

Cisco Nexus 6004P-96Q Switch

N6K-6004-96Q

Cisco Nexus 5000 Series Switches

Product/Component

Part Number

Cisco Nexus 5648Q Switch is a 2-RU switch, 24 fixed 40-Gbps QSFP+ ports, and 24 additional 40-Gbps QSFP+ ports

N5K-C5648Q

Cisco Nexus 5624Q Switch 1-RU, –12 fixed 40-Gbps QSFP+ ports and 12 X 40-Gbps QSFP+ ports expansion module

N5K-C5624Q

20 port UP LEM

N5696-M20UP

12 port 40G LEM

N5696-M12Q

4 port 100G LEM

N5696-M4C

N5000 1000 Series Module 6-port 10GE

N5K-M1600(=)

N5000 1000 Series Module 4x10GE 4xFC 4/2/1G

N5K-M1404=

N5000 1000 Series Module 8-port 4/2/1G

N5K-M1008=

N5000 1000 Series Module 6-port 8/4/2G

N5K-M1060=

Cisco Nexus 56128P Switch

N5K-C56128P

Cisco Nexus 5010 chassis

N5K-C5010P-BF

Cisco Nexus 5020 chassis

N5K-C5020P-BF

N5K-C5020P-BF-XL

Cisco Nexus 5548P Switch

N5K-C5548P-FA

Cisco Nexus 5548UP Switch

N5K-C5548UP-FA

Cisco Nexus 5672UP Switch

N5K-C5672UP

Cisco Nexus 5596T Switch

N5K-C5596T-FA

Cisco Nexus 5596UP Switch

N5K-C5596UP-FA

Cisco Nexus 0296-UPT chassis and GEM N55-M12T support

N5K-C5596T-FA-SUP

16-port Universal GEM, Cisco Nexus 5500

N5K-M16UP

Version 2, Layer 3 daughter card

N55-D160L3-V2

Cisco Nexus 3000 Series Switches

Product/Component

Part Number

Quad Small Form-Factor Pluggable – Double Density (QSFP-DD) switch with 32 ports

N3K-C3432D-S

Nexus 3408-S switch with 32 ports of QSFP-DD

N3K-C3408-S

1-RU 48 x SFP+/SFP28 and 6 x QSFP+/QSFP28

N3K-C34180YC

Cisco Nexus 34200YC-SM Switch with top-of-rack, Layer 2 and 3 switching

N3K-C34200YC-SM

1-RU 32 Port QSFP28 10/25/40/50/100 Gbps

N3K-C3132C-Z

Nexus 3548-XL Switch, 48 SFP+

N3K-C3548P-XL

Nexus 3264C-E switch with 64 QSFP28

N3K-C3264C-E

Cisco Nexus 3132Q Switch

N3K-C3132C-Z

Cisco Nexus 3132Q-V Switch

N3K-C3132Q-V

Nexus 34180YC programmable switch, 48 10/25G SFP, and 6 40/100G QSFP28 ports

N3K-C34180YC

Cisco Nexus 3464C Switch, 64 x QSFP+/QSFP28 ports and 2 x SFP+

N3K-C3464C

Cisco Nexus 3016 Switch

N3K-C3016Q-40GE

Cisco Nexus 3048 Switch

N3K-C3048TP-1GE

Cisco Nexus 3064-E Switch

N3K-C3064PQ-10GE

Cisco Nexus 3064-X Switch

N3K-C3064PQ-10GX

Cisco Nexus 3064-T Switch

N3K-C3064TQ-10GT

Nexus 31108PC-V, 48 SFP+ and 6 QSFP28 ports

N3K-C31108PC-V

Nexus 31108TC-V, 48 10GBase-T RJ-45, and 6 QSFP28 ports

N3K-C31108TC-V

Cisco Nexus 3132Q Switch

N3K-C3132Q-40GE

Nexus 3132 Chassis

N3K-C3132Q-40GX

Cisco Nexus 3172PQ Switch

N3K-C3172PQ-10GE

Cisco Nexus 3548 Switch

N3K-C3548P-10GX

Cisco Nexus 3636C-R Switch

N3K-C3636C-R

Cisco Nexus 3550-T Switch

N35-T-48X

Cisco Nexus 2000 Series Fabric Extenders

Product/Component

Part Number

Nexus 2348 Chassis

N2K-C2348TQ-10GE

Cisco Nexus 2348UPQ 10GE 48 x 1/10 Gigabit Ethernet and unified port host interfaces (SFP+) and up to 6 QSFP+ 10/40 Gigabit Ethernet fabric interfaces

N2K-C2348UPQ

Cisco Nexus 2148 1 GE Fabric Extender

N2K-C2148T-1GE

Cisco Nexus 2224TP Fabric Extender

N2K-C2224TP-1GE

Cisco Nexus 2232TM 10GE Fabric Extender

N2K-C2232TM-10GE

Cisco Nexus 2232TM 10GE Fabric Extender

N2K-C2232TM-E-10GE

Cisco Nexus 2232PP 10 GE Fabric Extender

N2K-C2232PP-10GE

Cisco Nexus 2248TP 1 GE Fabric Extender

N2K-C2248TP-1GE

Cisco Nexus 2248TP E GE Fabric Extender

N2K-C2248TP-E GE

Cisco Nexus 2248PQ Fabric Extender

N2K-C2248PQ-10GE

Cisco Nexus B22 Fabric Extender for HP

N2K-B22HP-P

Cisco Nexus B22 Fabric Extender for Fujitsu

N2K-B22FTS-P

Cisco Nexus B22 Fabric Extender for Dell

N2K-B22DELL-P

Cisco Nexus 2348TQ-E 10GE Fabric Extender

N2K-C2348TQ-E++

Supported Non-Nexus Devices

- Cisco ASR 1001-X

- Cisco ASR 1002-HX

- Cisco ASR-9001

- Cisco Catalyst 8000V, 8200, 8300, 8500 series routers

- Cisco Catalyst 9300-48U

- Cisco Catalyst 9300-24T

- Cisco Catalyst 9300-48P

- Cisco Catalyst 9500-48YC

- Cisco Catalyst 9500-32C

- Cisco CSR 1000v

- Cisco NCS 5501

- Cisco 8000 series routers

- Arista DCS-7050SX3-48YC12

Supported IBM Directors and Switches

- IBM SAN192C-6 8978-E04 (4 Module) SAN Director

- IBM SAN384C-6 8978-E08 (8 Module) SAN Director

- IBM SAN768C-6 8978-E16 (16 Module) SAN Director

- IBM SAN50C-R 8977-R50 50-Port SAN Extension Switch

- IBM SAN32C-6 8977-T32 32X32G FC SAN Switch

- IBM SAN48C-6 8977-T48 48X32G FC SAN Switch

- IBM SAN96C-6 8977-T96 96X32G FC SAN Switch

- IBM SAN16C-R 8977-R16 SAN Switch Extension Switch

Full Cisco Trademarks with Software License

THE SPECIFICATIONS AND INFORMATION REGARDING THE PRODUCTS IN THIS MANUAL ARE SUBJECT TO CHANGE WITHOUT NOTICE. ALL STATEMENTS, INFORMATION, AND RECOMMENDATIONS IN THIS MANUAL ARE BELIEVED TO BE ACCURATE BUT ARE PRESENTED WITHOUT WARRANTY OF ANY KIND, EXPRESS OR IMPLIED. USERS MUST TAKE FULL RESPONSIBILITY FOR THEIR APPLICATION OF ANY PRODUCTS.

THE SOFTWARE LICENSE AND LIMITED WARRANTY FOR THE ACCOMPANYING PRODUCT ARE SET FORTH IN THE INFORMATION PACKET THAT SHIPPED WITH THE PRODUCT AND ARE INCORPORATED HEREIN BY THIS REFERENCE. IF YOU ARE UNABLE TO LOCATE THE SOFTWARE LICENSE OR LIMITED WARRANTY, CONTACT YOUR CISCO REPRESENTATIVE FOR A COPY.

The Cisco implementation of TCP header compression is an adaptation of a program developed by the University of California, Berkeley (UCB) as part of UCB's public domain version of the UNIX operating system. All rights reserved. Copyright © 1981, Regents of the University of California.

NOTWITHSTANDING ANY OTHER WARRANTY HEREIN, ALL DOCUMENT FILES AND SOFTWARE OF THESE SUPPLIERS ARE PROVIDED “AS IS" WITH ALL FAULTS. CISCO AND THE ABOVE-NAMED SUPPLIERS DISCLAIM ALL WARRANTIES, EXPRESSED OR IMPLIED, INCLUDING, WITHOUT LIMITATION, THOSE OF MERCHANTABILITY, FITNESS FOR A PARTICULAR PURPOSE AND NONINFRINGEMENT OR ARISING FROM A COURSE OF DEALING, USAGE, OR TRADE PRACTICE.

IN NO EVENT SHALL CISCO OR ITS SUPPLIERS BE LIABLE FOR ANY INDIRECT, SPECIAL, CONSEQUENTIAL, OR INCIDENTAL DAMAGES, INCLUDING, WITHOUT LIMITATION, LOST PROFITS OR LOSS OR DAMAGE TO DATA ARISING OUT OF THE USE OR INABILITY TO USE THIS MANUAL, EVEN IF CISCO OR ITS SUPPLIERS HAVE BEEN ADVISED OF THE POSSIBILITY OF SUCH DAMAGES.

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

All printed copies and duplicate soft copies of this document are considered uncontrolled. See the current online version for the latest version.

Cisco has more than 200 offices worldwide. Addresses and phone numbers are listed on the Cisco website at www.cisco.com/go/offices.

The documentation set for this product strives to use bias-free language. For purposes of this documentation set, bias-free is defined as language that does not imply discrimination based on age, disability, gender, racial identity, ethnic identity, sexual orientation, socioeconomic status, and intersectionality. Exceptions may be present in the documentation due to language that is hardcoded in the user interfaces of the product software, language used based on standards documentation, or language that is used by a referenced third-party product.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: https://www.cisco.com/c/en/us/about/legal/trademarks.html. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1721R)