Cisco Nexus Dashboard is a central management console for multiple data center sites and a common platform for hosting Cisco data center operation services. These services are available for all the data center fabrics and provide real-time analytics, visibility, assurance for network policies and operations, as well as policy orchestration for the data center fabrics, such as Cisco Application Centric Infrastructure (ACI) or NX-OS deployments spanning LAN Fabric, SAN, and IP Fabric for Media (IPFM) networks. The services are as follows:

●     Nexus Dashboard Orchestrator: The intersite policy manager, which provides single-pane management that enables you to monitor the health of all interconnected sites. It also allows you to define centrally the intersite configurations and policies that can then be pushed to the different Cisco Application Policy Infrastructure Controller (APIC), Cisco Cloud Network Controller, or Cisco NDFC fabrics, which in term deploy them in those fabrics. This provides a high degree of control over when and where to deploy the configurations.

●     Nexus Dashboard Insights: Simplifies and automates visibility, troubleshooting, root-cause analysis, and remediation of network issues. By ingesting real-time streamed network telemetries from all devices, Nexus Dashboard Insights provides pervasive infrastructure visibility. It continuously verifies and validates the operational states of the network while proactively detecting any drifts from the operators’ intent, detecting different types of anomalies throughout the network, analyzing the root cause of anomalies, and identifying remediation methods. It modernizes the operation of networks, helping the network team to reduce troubleshooting efforts, increase operation efficiency, and proactively prevent network outages.

●     Nexus Dashboard Fabric Controller (NDFC): A comprehensive management solution for all Cisco NX-OS deployments spanning LAN, SAN, and IP Fabric for Media (IPFM) networks in data centers powered by Cisco. Cisco NDFC also supports devices such as IOS XE switches, IOS XR routers, and third-party devices. Being a multi-fabric controller, Cisco NDFC manages multiple deployment models such as VXLAN EVPN, classic 3-tier, FabricPath, and routed fabrics for LAN while providing ready-to-use control, management, monitoring, and automation capabilities. In addition, when enabled as a SAN controller, NDFC automates Cisco Multilayer Director Switches (MDS) and Cisco Nexus-family infrastructure in NX-OS mode with a focus on storage-specific features and analytics.

This document describes the features, issues, and limitations for this release of Nexus Dashboard. For more information, see the “Related Content” section at the end of this document.

Date

Description

August 4, 2025

Release 3.1(1n) became available.

April 17, 2025

·         Additional open issue CSCwo66733 (Nexus Dashboard).

April 2, 2025

·         Additional open issue CSCwo61222.

·         Updated the “Compatibility” section and added Table 1 Supported UCS server firmware.

June 3, 2024

Additional open issue CSCwd83293.

June 3, 2024

Updated multi-cluster connectivity values in the “Verified Scalability Limits” table.

May 21, 2024

Corrected placement of CSCwj73380 (now correctly placed in Open Issues instead of Resolved Issues).

May 10, 2024

Additional resolved issue CSCwi55341.

May 07, 2024

Release 3.1(1l) became available.

May 01, 2024

Additional resolved issue CSCwj73380.

April 04, 2024

Additional known issue CSCwj44955.

April 01, 2024

Updated the “Compatibility” section with support for CIMC release 4.3(2.240009).

March 07, 2024

Release 3.1(1k) became available.

New Software Features

This release adds the following new features:

Product Impact

Feature

Description

Base Functionality

Unified Installation and Upgrade Image

The platform and the individual services have been unified into a single image and can be deployed and enabled during the initial cluster configuration for a simpler, more streamlined experience.

For additional information about platform and services deployments and upgrade, see the Nexus Dashboard and Services Deployment and Upgrade Guide.

On-boarding Standalone NX-OS switches

In addition to Cisco CNC, APIC, and NDFC sites, you can now also on-board standalone NX-OS switches to your Nexus Dashboard cluster for use with the Insights service.

NOTE: Onboarding standalone switches is supported only on 3-node physical clusters.  Virtual Nexus Dashboard clusters, 1-node physical clusters, and 6-node clusters do not support this use case.

Smart Licensing Support

You can now configure and enable Smart Licensing in Nexus Dashboard to track license consumption by the switches used with the Insights service.

Interoperability

vSphere 8.0 Support

Nexus Dashboard clusters can now be deployed in VMware vSphere 8.0.

Ease of Use

UI Navigation Improvements

This release adds product GUI improvements, including main navigation bar changes for consistency across the platform and services.

Changes in Behavior

If you are installing or upgrading to this release, you must consider the following:

●     Beginning with Nexus Dashboard release 3.1(1n), the bugscan feature will no longer detect active bugs using CLI and device log analysis, but will continue to identify susceptible bugs using platform and software version information only. Active bug detection functionality will be re-introduced in a future release.

●     Beginning with Nexus Dashboard release 3.1(1), all services have been unified into a single deployment image.

You no longer need to download, install, and enable each service individually. Instead, you can simply choose which services to enable during the Nexus Dashboard platform deployment process. As a result, we recommend deploying Nexus Dashboard release 3.1(1) with unified install for all new installations.

Upgrading to this release will also automatically upgrade all services in your existing cluster.

In addition, Cisco DC App Center connectivity has been removed from Nexus Dashboard because downloading the services separately is no longer required.

●     Deploying Nexus Dashboard directly in an existing Red Hat Enterprise Linux (RHEL) is no longer supported.

You can still deploy Nexus Dashboard in Linux KVM which is running in RHEL on CentOS only for Fabric Controller service, as described in Nexus Dashboard and Services Deployment and Upgrade Guide.

●     When upgrading to release 3.1(1), all nodes will restart simultaneously.

Prior to release 3.1(1), the nodes restarted one at a time during the upgrade process.

●     Starting with release 3.1(1), the following commands have been deprecated:

acs clean-wipe

acs factory wipe

acs installer command

acs health differences

●     If you have multiple services enabled in the same Nexus Dashboard cluster, you must not restart multiple services simultaneously.

If you want to restart multiple services, restart one service, wait for it to become healthy, then proceed to restart the next.

●     If you are running Nexus Dashboard Insights service in a 4-node or 5-node physical cluster, you can simply upgrade the cluster and the service to this release as you typically would and continue using the 4-node or 5-node cluster.

Nexus Dashboard release 3.1(1) with Nexus Dashboard Insights supports only 3-node and 6-node profiles for greenfield deployments. However, if you are upgrading an existing 4-node or 5-node cluster from release 2.x without changing your current scale, you can continue using it with release 3.1(1).

●     Virtual Nexus Dashboard clusters now support cohosting of Insights and Orchestrator services.

For detailed cohosting information, see the Nexus Dashboard Capacity Planning tool.

●     Before upgrading your existing Nexus Dashboard cluster to this release, you must disable all services running in the cluster.

You must keep the services disabled until the platform is upgraded to this release; the services will be automatically upgraded and during the platform upgrade.

●     The default CIMC password for Nexus Dashboard physical nodes based on the UCS-225-M6 hardware is "password".

●     Nexus Dashboard does not support platform downgrades.

●     A known issue exists if you are performing a fresh virtual media installation of the 3.1(1k) software on a cluster with UCS-C225-M6 (ND-NODE-L4) nodes and ACI sites, where onboarding the site to NDI or NDO will fail. The workaround for this issue is to perform a fresh installation of the 3.1(1l) version of the software instead. Note that upgrading from release 3.1(1k) to 3.1(1l) will not resolve the issue; you must perform a fresh installation of the 3.1(1l) software to resolve the issue.

Open Issues

This section lists the open issues. Click the bug ID to access the Bug Search Tool and see additional information about the issue. The "Exists In" column of the table specifies the releases in which the issue exists.

Bug ID

Description

Exists in

CSCwo66733

Nexus Dashboard Orchestrator fails to push the DeviceLifName in the vnsAbsFuncConn object for sites running APIC version 5.3.x. This causes configuration drift that doesn't show changes, but works correctly with APIC versions 5.2.x and 6.0.x.

3.0(1i) and later

CSCwo45591

NDI reconnecting to APIC every minute, removing and adding subscriptions and flow exporters.

3.1(1k) and later

CSCwo61222

Nexus Dashboard Physical Appliance is unable to boot after updating the IMC firmware to version 4.3(5.x).

3.1(1k) and later

CSCwd83293

A switch reloads with a core dump of dcgrpc, dc_nae, dc, or any combination of these processes.

3.1(1k) and later

CSCvx93124

You may see the following error:

[2021-04-13 13:48:20,170] ERROR Error while appending records to stats-6 in dir /data/services/kafka/data/0 (kafka.server.LogDirFailureChannel)

java.io.IOException: No space left on device

3.1(1k) and later

CSCwh53145

The in-product documentation that is available from the Nexus Dashboard help center contains a number of broken links.

3.1(1k) and later

CSCwi63356

High memory utilization on some but not all nodes after node failover.

3.1(1k) and later

CSCwi63333

When adding the first member of a federation, the UI returns "Federation manager not enabled" after clicking "save" on the pop-up slider.

3.1(1k) and later

CSCwj06607

In some exceptional cases backend API does not purge audit records to required threshold. That will generate the cluster health warnings as well as audit records will stay high, which will create issues when you view audits from main UI.

3.1(1k) and later

CSCwj11399

Tech support download link is not working properly.

3.1(1k) and later

CSCwj13385

We provide acs command to for troubleshooting and recovery. In 3.1.1, if you want to bootstrap a new node that does not have or 3.1.1 firmware loaded. "acs upgrade update" command can be used to install ND firmware.

As part of these command, you can an option to get firmware from HTTP server, or download on a ND node and use temporary file. In 3.1, we also added option to download this firmware from one of the node running as part of cluster. This avoids customer to have HTTP server or even download the firmware from Cisco CCO to ND offline.

This option is broken and current release. This feature is not documented as part of 3.1 but if customer does run acs health command, they will see this option available.

3.1(1k) and later

CSCwj20057

This issue is seen on OVA setups mostly, but potentially can also happen on physical setups when upgrading the ND clusters. The upgrade process may fail to clean up old firmware images that are no longer required for current version of system, which eventually results in insufficient image repository space required to upgrade to release 3.1.

In this specific case, upgrade to 3.1 will fail without causing any damage to system as it fails during install phase.

3.1(1k) and later

CSCwi08020

On some of the virtual setup we have seen DB we store for prometheus gets full and mond stops working. As a result UI will fail to poll some of the metrics required for cluster health etc.

3.1(1k) and later

CSCwj24254

The issue occurs in the following scenario:

1) During bootstrap, add three nodes

2) Select the NDFC and NDI deployment mode

3) Go back to the previous page and delete two nodes

4) UI does not block bootstrap process afterwards. The API error appears after submitting the bootstrap configuration.

3.1(1k) and later

CSCwj73380

You can configure a custom LDAP filter on the UI, but the UI does not pass the custom LDAP filter to the API request payload. The default LDAP filter is used instead in this case.

3.1(1k) and later

CSCwr05423

Addition/Modification of objects are failing in NDO via automation due to Reactive MongoDB issue.

3.1(1k) and later

Resolved Issues

This section lists the resolved issues. Click the bug ID to access the Bug Search tool and see additional information about the issue. The "Fixed In" column of the table specifies whether the bug was resolved in the base release or a patch release.

Bug ID

Description

Fixed in

CSCwf91890

You may see an "Invalid key, key must be PEM encoded PKCS1 or PKCS8 private key" error on the login screen when login is attempted after disaster recovery (DR) is completed.

3.1(1k) and later

CSCwe65177

In rare cases a system may remain in an unhealthy state after reboot or upgrade because kubernetes is unable to launch new containers.

This will show up as pods having persistent ContainerCreate errors over the course of 10 or more minutes, which do not resolve on their own.

3.1(1k) and later

CSCwh13418

When performing a manual upgrade, you may get 'Could not clear stale upgrade data' error while running the 'acs installer post-update' command.

3.1(1k) and later

CSCwh28363

After a clean reboot of a node, the node can fail to come up. Additional reboot can resolve the issue.

3.1(1k) and later

CSCwh23260

The pods in event manager namespace are crashing or are not in ready state

3.1(1k) and later

CSCwi55341

When configuring a site-specific subnet on a Non-Layer 2 stretched BD, only one subnet can be set to primary. An error occurs when attempting to deploy the template stating that only one preferred subnet per address family is allowed under the BD.

3.1(1k) and later

CSCwj69753

After re-imaging the (ND-NODE-L4) C225 M6 hardware with ND 3.1(1k), unable to onboard ACI site to NDI or NDO app.

3.1(1l) and later

Known Issues

This section lists known behaviors. Click the Bug ID to access the Bug Search Tool and see additional information about the issue.

Bug ID

Description

CSCvy62110

For Nexus Dashboard nodes connected to Catalyst switches packets are tagged with vlan0 even though no VLAN is specified. This causes no reachability over the data network. In this case, 'switchport voice vlan dot1p' command must be added to the switch interfaces where the nodes are connected.

CSCvw39822

On power cycle system lvm initialization may fail due to a slowness in the disks.

CSCvw48448

Upgrade fails and cluster is in diverged state with one or more nodes on the target version.

CSCvw57953

When the system is being recovered with a clean reboot of all nodes, the admin login password will be reset to the day0 password that is entered during the bootstrap of the cluster.

CSCvw70476

When bringing up ND cluster first time, all three primary nodes need to join Kafka cluster before any primary node can be rebooted. Failing to do so, 2 node cluster doesn't become healthy as Kafka cluster requires 3 nodes to be in Kafka cluster first time.

CSCvx89368

After ND upgrade, there will be still pods belonging to the older version running on the cluster.

CSCvx98282

Pods in pending state for a long period upon restart. These pods are usually stateful sets that require specific node placement and capacity must be available on the specific node they are first scheduled. This happens when multiple applications are installed on the same ND cluster and the ND capacity overloaded.

CSCvu21304

Intersight device connector connects to the Intersight over the Cisco Application Services Engine Out-Of-Band Management.

CSCwe04619

The 'acs health' command may show a service as unhealthy and kubectl (available in the Tech Support collection) shows the service is in ContainerCreateError state.

CSCwd84875

Two Nodes RMA requires manual intervention.

CSCwb31373

After node failover, kubernetes scheduling may be unable to find appropriate resources for the pods in an app.

The symptom is that the app health will not converge and kubectl commands will show unhealthy pods.

CSCwj06781

If GUI-based upgrade workflow fails, the UI error message shows a documentation link for using a manual upgrade as a workaround, but the documentation link points to existing release's content which does not apply to the target release.

CSCwj44955

There may be an issue during the bootstrap process on 3-node vND (ESX) clusters which can cause the 'acs health' command to show the following error:

'k8s: services not in desired state - aaamgr,cisco-intersightdc,eventmonitoring,infra-kafka,kafka,mongodb,sm,statscollect'

CSCwj88758

While upgrading ND version 2.3.2b to version 3.1.1k, verifying the current ND deployment will fail with the error:

‘+ NDO + NDI is not a valid deployment mode - please check ND product documentation for supported configurations’.

Contact TAC and raise a support case for assistance on further course of action.

Compatibility

Beginning with release 3.1(1), Nexus Dashboard software also includes the compatible services within the same image.

For Cisco Nexus Dashboard cluster sizing guidelines and the list of supported services for each cluster form factor, see the Nexus Dashboard Capacity Planning tool.

VMware vMotion is not supported for Nexus Dashboard nodes deployed in VMware ESX.

Nexus Dashboard can be claimed in Intersight region 'us-east-1' only, 'eu-central-1' region is not supported.

Supported UCS server firmware

Physical Nexus Dashboard nodes support Cisco UCS-220-M5 (SE-NODE-G2) and UCS-225-M6 (ND-NODE-L4) servers.

Physical Nexus Dashboard nodes must be running a supported version of UCS server firmware (which includes Cisco Integrated Management Controller (CIMC), BIOS, RAID controller, and disk and NIC adapter firmware).

Table 1 Supported UCS server firmware

Product ID

Supported Firmware Releases

SE-NODE-G2

(USC-220-M5)

·       4.2(3b)

·       4.2(3e)

·       4.3(2.230207)

ND-NODE-L4

(UCS-225-M6)

·       4.3(2.230207)

·       4.3(4.240152)

Note:

·         4.3(2.240009) and 4.3(2.240077) are no longer listed as supported releases on the Cisco UCS-220-M5 (SE-NODE-G2) and are not recommended due to the issue related to CSCwn56294.

·         Though other firmware versions than those listed above may be supported on standard UCS C220/C225 servers, they are not supported on Nexus Dashboard appliances and could lead to issues.

Cisco UCS-C220-M3 and earlier servers are not supported for Virtual Nexus Dashboard clusters.

Browser Compatibility

The Cisco Nexus Dashboard and services UI is intended to be compatible with the most recent desktop version of most common browsers, including Chrome, Firefox, Edge, and Safari. In most cases, compatibility will extend one version behind their most recent release.

While not designed for compatibility with mobile devices, most mobile browsers are still able to render majority of Nexus Dashboard and services UI. However, using the above-listed browsers on a desktop or laptop is recommended. Mobile browsers aren’t officially supported by Cisco Nexus Dashboard and services.

Verified Scalability Limits

The following table lists the maximum verified scalability limits for the Nexus Dashboard platform.

Category

Scale

Number of primary and worker nodes in a cluster

Depends on cluster form factor and the specific services enabled in the cluster.

See the Nexus Dashboard Capacity Planning tool for detailed information.

Number of standby nodes in a cluster

For physical cluster, up to 2 standby nodes

For virtual and cloud clusters, standby nodes are not supported

Sites per cluster

Depends on the specific services deployed in the cluster:

●  For Nexus Dashboard Orchestrator, see the Nexus Dashboard Orchestrator Verified Scalability Guide for a specific release.

●  For Nexus Dashboard Fabric Controller, see the Verified Scalability Guide for Cisco Nexus Dashboard Fabric Controller for a specific release.

●  For Nexus Dashboard Insights, see the Release Notes for a specific release.

Admin users

50

Operator users

1000

API sessions

2000 for Nexus Dashboard and Nexus Dashboard Orchestrator

100 for Nexus Dashboard Insights

Login domains

8

Clusters connected via multi-cluster connectivity

10

Sites across all clusters connected via multi-cluster connectivity

20

Maximum latency between any two clusters connected via multi-cluster connectivity

500ms

Related Content

Document

Description

Cisco Nexus Dashboard

Release Notes

Provides release information for the Cisco Nexus Dashboard product.

Nexus Dashboard Capacity Planning

Provides cluster sizing guidelines based on the type and number of services you plan to run in your Nexus Dashboard as well as the target fabrics' sizes.

Cisco Nexus Dashboard Hardware Setup Guide for UCS-C220-M5 Servers

Cisco Nexus Dashboard Hardware Setup Guide for UCS-C225-M6 Servers

Provides information on physical server specifications and installation.

Cisco Nexus Dashboard

Deployment Guide

Provides information on Cisco Nexus Dashboard software deployment.

Cisco Nexus Dashboard Operation and Configuration Articles

Describe how to use Cisco Nexus Dashboard.

Cisco Nexus Dashboard and Services APIs

API reference for the Nexus Dashboard and services.

Documentation Feedback

To provide technical feedback on this document, or to report an error or omission, send your comments to ciscodcnapps-docfeedback@cisco.com. We appreciate your feedback.

Legal Information

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: http://www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2024-2025 Cisco Systems, Inc. All rights reserved.