Chapter 1. New and Changed Information

The following table provides an overview of the significant changes up to the current release. The table does not provide an exhaustive list of all changes or of the new features up to this release.

New Features and Changed Information

Cisco APIC Release

Feature

Description

5.2(3)

The Platform Insights Engine (PIE) was introduced.

--

- About the Platform Insights Engine

- About the Platform Insights Engine Application

- Guideline and Limitations for the Platform Insights Engine

- Platform Insights Engine Information Model

- Platform Insights Engine CLI Commands

About the Platform Insights Engine

The Platform Insights Engine (PIE) is an on-switch real time root cause analysis application. To keep the service outages in a switch to a minimum, PIE gives insights about the current issues on the switch and visibility about the potential issues.

The PIE application enables you to:

- Collect data on a switch periodically or during a failure.

- Analyze the collected data.

- Find a root cause for the issue.

- Reduce the time to resolve issues.

While the data collection should happen on a switch, the analysis can happen on the switch or off the switch. The collection and analysis can happen either online or offline.

About the Platform Insights Engine Application

The Platform Insights Engine (PIE) application is implemented as an independent process. The application has an internal client that implements a set of insight engines. The actual engine logic is component-specific. The internal PIE client provides a simpler way to plug in new insight engines.

PIEs subscribe to events they can analyze. The PIEs analyze raw data and generate insights, such as root cause analysis, about the event. The insights are published back to the broker as new events, which could be used for analysis in other PIEs.

The following list describes the PIEs:

- Link flap PIE: The link flap PIE analyzes link flap events published by user space drivers (USDs) and determines the root cause for a link flap. The PIE publishes the root cause analysis insight to the broker. Link flap events are published by the USDs (PIE client) when a link flaps. The USDs collect all of the relevant data from the ASIC and USD that is required for root cause analysis and publish the data to the broker. The link flap PIE analyzes the data and arrives at the most probable root cause for the flap.

- Link down PIE: The link down PIE finds the root cause for a link not coming up. The USD collects data about an interface when the interface is configured to be up, but the interface's operating state is not up. This data is published to the PIE application. The link down PIE subscribes to these events, receives the data from the broker, and analyzes the data to find the root cause.

- Optics PIE: The optics PIE is a continuous monitoring engine that performs a time series analysis of the DOM data collected at regular intervals. By tracking various parameters in the DOM over a period, the PIE arrives at a metric to describe the state of optics for each optical port. The metric is an insight about the trending health of an optical transceiver.

- SSD PIE: The SSD PIE provides a mechanism to debug high SSD usage. This PIE provides the top 10 process usage information.

- CPU PIE: The CPU PIE provides a mechanism to debug high CPU usage. This PIE provides the top 10 processes that use the most CPU. The data is collected periodically to have a history of top 10 users of CPU usage.

- Sensor PIE: The sensor PIE provides a mechanism to debug issues with the temperature sensors by maintaining a history of temperature sensor readings for the past 30 days. The PIE enables system environment readings (PSU, fan, and sensor) to be correlated and derives an insights metric.

- Memory PIE: The memory PIE monitors the memory usage of the box. This PIE finds the top 10 users of memory and provides the data collection for detecting memory leaks.

- PSU PIE: The PSU PIE monitors the health of the PSU and predicts if the PSU will have a failure. This PIE analyzes the relation ship between power, voltage, and current, and captures the hardware state periodically.

- Fan PIE: The fan PIE monitors the health of the fans. This PIE analyzes the relationship between pulse width modulation (PWM) and RPM, and makes it easier to find fans that have failed.

Guideline and Limitations for the Platform Insights Engine

The following guidelines and limitations are for the Platform Insights Engine (PIE):

- The PIE application does not require licensing information.

- The following hardware is not supported:

- All modular chassis (Cisco N9K-9504, N9K-9508, N9K-9516)

- All Cisco Nexus 3000 leaf switches

- All data that is collected in the EventDB is not written to persistent storage. Therefore, data is lost when the system is restarted, powered off, or reloaded.

- Fabric extenders (FEXes) are not supported with the PIE application.

Platform Insights Engine Information Model

The following table describes the Platform Insights Engine (PIE) information parameters:

Information Parameter

Description

Event

A piece of information exchanged by clients associated with a timestamp.

Event ID

A unique identity number to identify an event in the database.

Event Class

An event class identifies the type of event.

Client ID

Identifies a PIE client.

Source ID

Identifies a logical source of an event.

Event Meta Data

Consists of event ID, class ID, source ID, timestamp, and event data length. This parameter is common to all events.

Event Data

The raw data collected by the source or the insight data that is published by the PIE.

Platform Insights Engine CLI Commands

The following show commands display Platform Insights Engine (PIE)-related information:

Command

Purpose

switch# show pie eventdb all

Lists all events in the eventdb.

switch# show pie eventdb dom

Lists the transceiver digital optical monitoring (DOM) events.

switch# show pie eventdb dom_db

Lists health metrics of transceivers based on health metrics computed by the optics PIE.

switch# show pie eventdb link-down [detail]

Lists all link-down events. If you specify the detail flag, the output includes more information.

switch# show pie eventdb link-down-rca [detail]

Lists all the link-down events with the reason for the link being down, computed by the link-down PIE. If you specify the detail flag, the output includes more information.

switch# show pie eventdb link-flaps [detail]

Lists all link-flap events. If you specify the detail flag, the output includes more information.

switch# show pie eventdb link-flap-rca

Lists all the link-flap events with the reason for flaps, based on the root cause analysis by the on-switch link-flap insight engine.

switch# show pie eventdb ssd-overall

Lists all overall SSD events.

switch# show system internal bootflash-stats ? current Show SSD IO stats from bootup overall Show SSD IO overall usage summary Show SSD aggregate summary

Lists all current SSD events.

switch# show pie eventdb ssd-cur

List all current SSD events.

switch# show pie eventdb ssd-summary

List the SSD aggregate summary events.

switch# show pie interface ethernet 1/19 link-down-rca

Lists the link-down events for a specific interface.

switch# show pie eventid 26

List the details of specific event, if the eventid is known.

switch# show pie interface ethernet 1/20 link-flap-rca

Lists the link flaps for a specific interface.

switch# show pie interface ethernet 1/15 transceiver-insights

Lists the transceiver insights for a specific interface.

switch# show pie eventdb psu insights [detail]

Lists all fan insights. If you specify the detail flag, the output includes more information.

switch# show pie envmon psu all [detail]

Lists all fan events. If you specify the detail flag, the output includes more information.

switch# show pie eventdb fan insights [detail]

Lists all fan insights. If you specify the detail flag, the output includes more information.

switch# show pie envmon fan [detail]

Lists all fan events. If you specify the detail flag, the output includes more information.

switch# show pie envmon mem-usage [detail]

Lists all memory usage insights. If you specify the detail flag, the output includes more information.

switch# show pie eventdb mem-usage [detail]

Lists all memory usage events. If you specify the detail flag, the output includes more information.

switch# show pie envmon cpu [detail]

Lists all CPU insights. If you specify the detail flag, the output includes more information.

switch# show pie eventdb cpu [detail]

Lists all CPU events. If you specify the detail flag, the output includes more information.

switch# show pie envmon sensor [detail]

Lists all sensor insights. If you specify the detail flag, the output includes more information.

switch# show pie eventdb sensor [detail]

Lists all sensor events. If you specify the detail flag, the output includes more information.

CLI Command Output Examples

The following examples show the output for some of the PIE-related commands:

switch# show pie eventdb link-flap-rca
2021-10-11 21:06:42   Event Id: 00008592     Ethernet1/23      Source Id: 436297728     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer
2021-10-11 21:06:42   Event Id: 00008590     Ethernet1/19      Source Id: 436281344     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer
2021-10-08 20:46:02   Event Id: 00001826     Ethernet1/23      Source Id: 436297728     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer
2021-10-08 20:46:02   Event Id: 00001824     Ethernet1/19      Source Id: 436281344     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer
2021-10-08 03:35:46   Event Id: 00000588     Ethernet1/32      Source Id: 436334592     RCA Code: 28
Reason:  Link flapped due to UnderRun error on MAC

switch# show pie eventdb link-flap-rca detail
2021-10-11 21:06:42   Event Id: 00008592     Ethernet1/23      Source Id: 436297728     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer
Link flap Reason :      Link flapped/down due to Local Fault, check peer
Source Event id  :      8591
*************** Meta Details*************************
ifindex                    :    0x0
port_no                    :    88
phy_port_no                :    0
link_event_type            :    0
link_status                :    0
retimer_port               :    0
asic_type                  :    0
phy_type                   :    0
phy_mode                   :    0
link_down_rca              :    0
xcvr_supported             :    1
is_phy_port                :    0
is_copper                  :    0

*************** SW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    20000
sw_port_fec                :    0
sw_port_loopback           :    0
sw_port_mtu                :    9022
sw_breaklout_map           :    0
sw_port_ipg                :    0
sw_port_prbs               :    0
sw_xcvr_present            :    0
sw_glct_present            :    0
sw_qsa_present             :    0
sw_phy_present             :    0
sw_port_purged             :    0
hw_port_present            :    0

*************** HW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    20000
sw_port_fec                :    0
sw_port_loopback           :    0
sw_port_mtu                :    0

***************Port SM Details*************************
port_sm_type               :    0
port_sm_state              :    0

***************MAC Layer Details*************************
signal_detect              :    1
num_lanes                  :    2
start_lane                 :    4
tx_enable                  :    0
rx_enable                  :    0
fault_status               :    1
rx_crc_errors              :    0
tx_crc_errors              :    0
len_errors                 :    0
framing_errors             :    0
tx_fifo_err                :    0
rx_fifo_err                :    0

***************PCS Layer Details*************************
block_lock_loss           :     0
fault                     :     0
phy_fifo_error            :     0
decoder_trap              :     0
deskew_overflow           :     0
sync_loss                 :     0
high_ber                  :     0
high_ser                  :     0
error_blocks              :     0
alignment_loss            :     0
alignment_status          :     0
rx_pcs_block_err          :     0
rx_pcs_test_err           :     0
rx_pcs_sync_err           :     0
rx_pcs_bip_err            :     0
rx_pcs_align_map_err      :     0
rx_pcs_align_skew_err     :     0
rx_pcs_fec_cw_err         :     0
rx_pcs_align_marker_err   :     0

***************Fec Layer Details*************************
FC_ECC_error              :     0
RS_ECC_error              :     0
RS_alignment_lost         :     0
RS_uncorr_err             :     0
RS_deskew_err             :     0
RS_BER_over_thres_err     :     0
FC_uncorr_err             :     0
FC_bad_uncorr_code_word   :     0

***************PHY Details*************************
hrx_lanes                 :     0x30
htx_lanes                 :     0x30
lrx_lanes                 :     0xf
ltx_lanes                 :     0xf
op_mode                   :     2
fec_mode                  :     1

***************XCVR Details*************************
xcvr_type                 :     57
xcvr_present              :     1
laser_disabled            :     0
diags_supported           :     0
tx_los                    :     0
rx_los                    :     0
tx_fault                  :     0
tx_adapt_eq_fault         :     0
tx_cdr_lol                :     0
rx_cdr_lol                :     0
temp_high_alarm           :     0
temp_low_alarm            :     0
temp_high_warning         :     0
temp_low_warning          :     0
voltage_high_alarm        :     0
voltage_low_alarm         :     0
voltage_high_warning      :     0
voltage_low_warning       :     0
rx_power_high_alarm       :     0
rx_power_low_alarm        :     0
rx_power_high_warning     :     0
rx_power_low_warning      :     0
tx_power_high_alarm       :     0
tx_power_low_alarm        :     0
tx_power_high_warning     :     0
tx_power_low_warning      :     0
bias_current_high_alarm   :     0
bias_current_low_alarm    :     0
bias_current_high_warning :     0
bias_current_low_warning  :     0
laser_temp_high_alarm     :     0
laser_temp_low_alarm      :     0
laser_temp_high_warning   :     0
laser_temp_low_warning    :     0
tec_current_high_alarm    :     0
tec_current_low_alarm     :     0
tec_current_high_warning  :     0
tec_current_low_warning   :     0
2021-10-11 21:06:42   Event Id: 00008590     Ethernet1/19      Source Id: 436281344     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer
Link flap Reason :      Link flapped/down due to Local Fault, check peer
Source Event id  :      8589
*************** Meta Details*************************
ifindex                    :    0x0
port_no                    :    72
phy_port_no                :    0
link_event_type            :    0
link_status                :    0
retimer_port               :    0
asic_type                  :    0
phy_type                   :    0
phy_mode                   :    0
link_down_rca              :    0
xcvr_supported             :    1
is_phy_port                :    0
is_copper                  :    0

*************** SW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    50000
sw_port_fec                :    2
sw_port_loopback           :    0
sw_port_mtu                :    9022
sw_breaklout_map           :    0
sw_port_ipg                :    0
sw_port_prbs               :    0
sw_xcvr_present            :    0
sw_glct_present            :    0
sw_qsa_present             :    0
sw_phy_present             :    0
sw_port_purged             :    0
hw_port_present            :    0

*************** HW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    50000
sw_port_fec                :    2
sw_port_loopback           :    0
sw_port_mtu                :    0

***************Port SM Details*************************
port_sm_type               :    0
port_sm_state              :    0

***************MAC Layer Details*************************
signal_detect              :    1
num_lanes                  :    2
start_lane                 :    4
tx_enable                  :    0
rx_enable                  :    0
fault_status               :    1
rx_crc_errors              :    0
tx_crc_errors              :    0
len_errors                 :    0
framing_errors             :    0
tx_fifo_err                :    0
rx_fifo_err                :    0

***************PCS Layer Details*************************
block_lock_loss           :     0
fault                     :     0
phy_fifo_error            :     0
decoder_trap              :     0
deskew_overflow           :     0
sync_loss                 :     0
high_ber                  :     0
high_ser                  :     0
error_blocks              :     0
alignment_loss            :     0
alignment_status          :     0
rx_pcs_block_err          :     0
rx_pcs_test_err           :     0
rx_pcs_sync_err           :     0
rx_pcs_bip_err            :     0
rx_pcs_align_map_err      :     0
rx_pcs_align_skew_err     :     0
rx_pcs_fec_cw_err         :     0
rx_pcs_align_marker_err   :     0

***************Fec Layer Details*************************
FC_ECC_error              :     0
RS_ECC_error              :     0
RS_alignment_lost         :     0
RS_uncorr_err             :     0
RS_deskew_err             :     0
RS_BER_over_thres_err     :     0
FC_uncorr_err             :     0
FC_bad_uncorr_code_word   :     0

***************PHY Details*************************
hrx_lanes                 :     0x30
htx_lanes                 :     0x30
lrx_lanes                 :     0xf
ltx_lanes                 :     0xf
op_mode                   :     2
fec_mode                  :     2

***************XCVR Details*************************
xcvr_type                 :     80
xcvr_present              :     1
laser_disabled            :     0
diags_supported           :     0
tx_los                    :     0
rx_los                    :     0
tx_fault                  :     0
tx_adapt_eq_fault         :     0
tx_cdr_lol                :     0
rx_cdr_lol                :     0
temp_high_alarm           :     0
temp_low_alarm            :     0
temp_high_warning         :     0
temp_low_warning          :     0
voltage_high_alarm        :     0
voltage_low_alarm         :     0
voltage_high_warning      :     0
voltage_low_warning       :     0
rx_power_high_alarm       :     0
rx_power_low_alarm        :     0
rx_power_high_warning     :     0
rx_power_low_warning      :     0
tx_power_high_alarm       :     0
tx_power_low_alarm        :     0
tx_power_high_warning     :     0
tx_power_low_warning      :     0
bias_current_high_alarm   :     0
bias_current_low_alarm    :     0
bias_current_high_warning :     0
bias_current_low_warning  :     0
laser_temp_high_alarm     :     0
laser_temp_low_alarm      :     0
laser_temp_high_warning   :     0
laser_temp_low_warning    :     0
tec_current_high_alarm    :     0
tec_current_low_alarm     :     0
tec_current_high_warning  :     0
tec_current_low_warning   :     0

switch# show pie eventdb link-down-rca
2021-10-11 21:23:38   Event Id: 00008624     Ethernet1/1      Source Id: 436207616     RCA Code: 16
Reason:  No PCS alignment detected. Please check Fec, speed, Autoneg configurations with peer
2021-10-11 21:23:23   Event Id: 00008622     Ethernet1/1      Source Id: 436207616     RCA Code: 1
Reason:  No Signal from peer is detected .Please check peer configuration.
2021-10-11 21:17:13   Event Id: 00008616     Ethernet1/23     Source Id: 436297728     RCA Code: 1
Reason:  No Signal from peer is detected .Please check peer configuration.
2021-10-11 21:16:28   Event Id: 00008614     Ethernet1/23     Source Id: 436297728     RCA Code: 16
Reason:  No PCS alignment detected. Please check Fec, speed, Autoneg configurations with peer
2021-10-11 21:16:22   Event Id: 00008612     Ethernet1/1      Source Id: 436207616     RCA Code: 16
Reason:  No PCS alignment detected. Please check Fec, speed, Autoneg configurations with peer
2021-10-11 21:07:13   Event Id: 00008598     Ethernet1/23     Source Id: 436297728     RCA Code: 1
Reason:  No Signal from peer is detected .Please check peer configuration.
2021-10-11 21:07:12   Event Id: 00008596     Ethernet1/19     Source Id: 436281344     RCA Code: 1
Reason:  No Signal from peer is detected .Please check peer configuration.
2021-10-11 21:07:07   Event Id: 00008594     Ethernet1/1      Source Id: 436207616     RCA Code: 1
Reason:  No Signal from peer is detected .Please check peer configuration.

switch# show pie eventdb link-down-rca detail
2021-10-11 21:23:38   Event Id: 00008624     Ethernet1/1      Source Id: 436207616     RCA Code: 16
Reason:  No PCS alignment detected. Please check Fec, speed, Autoneg configurations with peer
Link Down Reason     :No PCS alignment detected. Please check Fec, speed, Autoneg configurations with peer
Link Down Event id   :8623
Source Event id      :8623

*************** Meta Details*************************
ifindex                    :    0x1a000000
port_no                    :    0
phy_port_no                :    0
link_event_type            :    0
link_status                :    0
retimer_port               :    0
asic_type                  :    0
phy_type                   :    0
phy_mode                   :    0
link_down_rca              :    0
xcvr_supported             :    1
is_phy_port                :    0
is_copper                  :    0

*************** SW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    50000
sw_port_fec                :    2
sw_port_loopback           :    0
sw_port_mtu                :    9022
sw_breaklout_map           :    0
sw_port_ipg                :    0
sw_port_prbs               :    0
sw_xcvr_present            :    0
sw_glct_present            :    0
sw_qsa_present             :    0
sw_phy_present             :    0
sw_port_purged             :    0
hw_port_present            :    0

*************** HW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    50000
sw_port_fec                :    2
sw_port_loopback           :    0
sw_port_mtu                :    0

***************Port SM Details*************************
port_sm_type               :    0
port_sm_state              :    0

***************MAC Layer Details*************************
signal_detect              :    1
num_lanes                  :    2
start_lane                 :    0
tx_enable                  :    0
rx_enable                  :    0
fault_status               :    0
rx_crc_errors              :    0
tx_crc_errors              :    0
len_errors                 :    0
framing_errors             :    0
tx_fifo_err                :    0
rx_fifo_err                :    0

***************PCS Layer Details*************************
block_lock_loss           :     0
fault                     :     0
phy_fifo_error            :     0
decoder_trap              :     0
deskew_overflow           :     0
sync_loss                 :     0
high_ber                  :     0
high_ser                  :     0
error_blocks              :     0
alignment_loss            :     0
alignment_status          :     0
rx_pcs_block_err          :     0
rx_pcs_test_err           :     0
rx_pcs_sync_err           :     0
rx_pcs_bip_err            :     0
rx_pcs_align_map_err      :     0
rx_pcs_align_skew_err     :     0
rx_pcs_fec_cw_err         :     0
rx_pcs_align_marker_err   :     0

***************Fec Layer Details*************************
FC_ECC_error              :     0
RS_ECC_error              :     0
RS_alignment_lost         :     0
RS_uncorr_err             :     0
RS_deskew_err             :     0
RS_BER_over_thres_err     :     0
FC_uncorr_err             :     0
FC_bad_uncorr_code_word   :     0

***************PHY Details*************************
hrx_lanes                 :     0xc0
htx_lanes                 :     0xc0
lrx_lanes                 :     0xf0
ltx_lanes                 :     0xf0
op_mode                   :     2
fec_mode                  :     2

***************XCVR Details*************************
xcvr_type                 :     80
xcvr_present              :     1
laser_disabled            :     0
diags_supported           :     0
tx_los                    :     240
rx_los                    :     0
tx_fault                  :     0
tx_adapt_eq_fault         :     0
tx_cdr_lol                :     0
rx_cdr_lol                :     0
temp_high_alarm           :     0
temp_low_alarm            :     0
temp_high_warning         :     0
temp_low_warning          :     0
voltage_high_alarm        :     0
voltage_low_alarm         :     0
voltage_high_warning      :     0
voltage_low_warning       :     0
rx_power_high_alarm       :     0
rx_power_low_alarm        :     0
rx_power_high_warning     :     0
rx_power_low_warning      :     0
tx_power_high_alarm       :     0
tx_power_low_alarm        :     0
tx_power_high_warning     :     0
tx_power_low_warning      :     0
bias_current_high_alarm   :     0
bias_current_low_alarm    :     0
bias_current_high_warning :     0
bias_current_low_warning  :     0
laser_temp_high_alarm     :     0
laser_temp_low_alarm      :     0
laser_temp_high_warning   :     0
laser_temp_low_warning    :     0
tec_current_high_alarm    :     0
tec_current_low_alarm     :     0
tec_current_high_warning  :     0
tec_current_low_warning   :     0
2021-10-11 21:23:23   Event Id: 00008622     Ethernet1/1                Source Id: 436207616     RCA Code: 1
Reason:  No Signal from peer is detected .Please check peer configuration.
Link Down Reason     :No Signal from peer is detected .Please check peer configuration.
Link Down Event id   :8621
Source Event id      :8621

*************** Meta Details*************************
ifindex                    :    0x1a000000
port_no                    :    0
phy_port_no                :    0
link_event_type            :    0
link_status                :    0
retimer_port               :    0
asic_type                  :    0
phy_type                   :    0
phy_mode                   :    0
link_down_rca              :    0
xcvr_supported             :    1
is_phy_port                :    0
is_copper                  :    0

*************** SW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    50000
sw_port_fec                :    2
sw_port_loopback           :    0
sw_port_mtu                :    9022
sw_breaklout_map           :    0
sw_port_ipg                :    0
sw_port_prbs               :    0
sw_xcvr_present            :    0
sw_glct_present            :    0
sw_qsa_present             :    0
sw_phy_present             :    0
sw_port_purged             :    0
hw_port_present            :    0

*************** HW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    50000
sw_port_fec                :    2
sw_port_loopback           :    0
sw_port_mtu                :    0

***************Port SM Details*************************
port_sm_type               :    0
port_sm_state              :    0

***************MAC Layer Details*************************
signal_detect              :    0
num_lanes                  :    2
start_lane                 :    0
tx_enable                  :    0
rx_enable                  :    0
fault_status               :    0
rx_crc_errors              :    0
tx_crc_errors              :    0
len_errors                 :    0
framing_errors             :    0
tx_fifo_err                :    0
rx_fifo_err                :    0

***************PCS Layer Details*************************
block_lock_loss           :     0
fault                     :     0
phy_fifo_error            :     0
decoder_trap              :     0
deskew_overflow           :     0
sync_loss                 :     0
high_ber                  :     0
high_ser                  :     0
error_blocks              :     0
alignment_loss            :     0
alignment_status          :     0
rx_pcs_block_err          :     0
rx_pcs_test_err           :     0
rx_pcs_sync_err           :     0
rx_pcs_bip_err            :     0
rx_pcs_align_map_err      :     0
rx_pcs_align_skew_err     :     0
rx_pcs_fec_cw_err         :     0
rx_pcs_align_marker_err   :     0

***************Fec Layer Details*************************
FC_ECC_error              :     0
RS_ECC_error              :     0
RS_alignment_lost         :     0
RS_uncorr_err             :     0
RS_deskew_err             :     0
RS_BER_over_thres_err     :     0
FC_uncorr_err             :     0
FC_bad_uncorr_code_word   :     0

***************PHY Details*************************
hrx_lanes                 :     0xc0
htx_lanes                 :     0xc0
lrx_lanes                 :     0xf0
ltx_lanes                 :     0xf0
op_mode                   :     2
fec_mode                  :     2

***************XCVR Details*************************
xcvr_type                 :     80
xcvr_present              :     1
laser_disabled            :     0
diags_supported           :     0
tx_los                    :     240
rx_los                    :     15
tx_fault                  :     0
tx_adapt_eq_fault         :     0
tx_cdr_lol                :     0
rx_cdr_lol                :     0
temp_high_alarm           :     0
temp_low_alarm            :     0
temp_high_warning         :     0
temp_low_warning          :     0
voltage_high_alarm        :     0
voltage_low_alarm         :     0
voltage_high_warning      :     0
voltage_low_warning       :     0
rx_power_high_alarm       :     0
rx_power_low_alarm        :     0
rx_power_high_warning     :     0
rx_power_low_warning      :     0
tx_power_high_alarm       :     0
tx_power_low_alarm        :     0
tx_power_high_warning     :     0
tx_power_low_warning      :     0
bias_current_high_alarm   :     0
bias_current_low_alarm    :     0
bias_current_high_warning :     0
bias_current_low_warning  :     0
laser_temp_high_alarm     :     0
laser_temp_low_alarm      :     0
laser_temp_high_warning   :     0
laser_temp_low_warning    :     0
tec_current_high_alarm    :     0
tec_current_low_alarm     :     0
tec_current_high_warning  :     0
tec_current_low_warning   :     0

switch# show pie interface ethernet 1/1 link-down-rca
2021-10-11 21:23:38   Event Id: 00008624     Ethernet1/1                Source Id: 436207616     RCA Code: 16
Reason:  No PCS alignment detected. Please check Fec, speed, Autoneg configurations with peer

switch# show pie interface ethernet 1/1 link-down-rca detail
2021-10-11 21:23:38   Event Id: 00008624     Ethernet1/1                Source Id: 436207616     RCA Code: 16
Reason:  No PCS alignment detected. Please check Fec, speed, Autoneg configurations with peer
Link Down Reason     :No PCS alignment detected. Please check Fec, speed, Autoneg configurations with peer
Link Down Event id   :8623
Source Event id      :8623

*************** Meta Details*************************
ifindex                    :    0x1a000000
port_no                    :    0
phy_port_no                :    0
link_event_type            :    0
link_status                :    0
retimer_port               :    0
asic_type                  :    0
phy_type                   :    0
phy_mode                   :    0
link_down_rca              :    0
xcvr_supported             :    1
is_phy_port                :    0
is_copper                  :    0

*************** SW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    50000
sw_port_fec                :    2
sw_port_loopback           :    0
sw_port_mtu                :    9022
sw_breaklout_map           :    0
sw_port_ipg                :    0
sw_port_prbs               :    0
sw_xcvr_present            :    0
sw_glct_present            :    0
sw_qsa_present             :    0
sw_phy_present             :    0
sw_port_purged             :    0
hw_port_present            :    0

*************** HW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    50000
sw_port_fec                :    2
sw_port_loopback           :    0
sw_port_mtu                :    0

***************Port SM Details*************************
port_sm_type               :    0
port_sm_state              :    0

***************MAC Layer Details*************************
signal_detect              :    1
num_lanes                  :    2
start_lane                 :    0
tx_enable                  :    0
rx_enable                  :    0
fault_status               :    0
rx_crc_errors              :    0
tx_crc_errors              :    0
len_errors                 :    0
framing_errors             :    0
tx_fifo_err                :    0
rx_fifo_err                :    0

***************PCS Layer Details*************************
block_lock_loss           :     0
fault                     :     0
phy_fifo_error            :     0
decoder_trap              :     0
deskew_overflow           :     0
sync_loss                 :     0
high_ber                  :     0
high_ser                  :     0
error_blocks              :     0
alignment_loss            :     0
alignment_status          :     0
rx_pcs_block_err          :     0
rx_pcs_test_err           :     0
rx_pcs_sync_err           :     0
rx_pcs_bip_err            :     0
rx_pcs_align_map_err      :     0
rx_pcs_align_skew_err     :     0
rx_pcs_fec_cw_err         :     0
rx_pcs_align_marker_err   :     0

***************Fec Layer Details*************************
FC_ECC_error              :     0
RS_ECC_error              :     0
RS_alignment_lost         :     0
RS_uncorr_err             :     0
RS_deskew_err             :     0
RS_BER_over_thres_err     :     0
FC_uncorr_err             :     0
FC_bad_uncorr_code_word   :     0

***************PHY Details*************************
hrx_lanes                 :     0xc0
htx_lanes                 :     0xc0
lrx_lanes                 :     0xf0
ltx_lanes                 :     0xf0
op_mode                   :     2
fec_mode                  :     2

***************XCVR Details*************************
xcvr_type                 :     80
xcvr_present              :     1
laser_disabled            :     0
diags_supported           :     0
tx_los                    :     240
rx_los                    :     0
tx_fault                  :     0
tx_adapt_eq_fault         :     0
tx_cdr_lol                :     0
rx_cdr_lol                :     0
temp_high_alarm           :     0
temp_low_alarm            :     0
temp_high_warning         :     0
temp_low_warning          :     0
voltage_high_alarm        :     0
voltage_low_alarm         :     0
voltage_high_warning      :     0
voltage_low_warning       :     0
rx_power_high_alarm       :     0
rx_power_low_alarm        :     0
rx_power_high_warning     :     0
rx_power_low_warning      :     0
tx_power_high_alarm       :     0
tx_power_low_alarm        :     0
tx_power_high_warning     :     0
tx_power_low_warning      :     0
bias_current_high_alarm   :     0
bias_current_low_alarm    :     0
bias_current_high_warning :     0
bias_current_low_warning  :     0
laser_temp_high_alarm     :     0
laser_temp_low_alarm      :     0
laser_temp_high_warning   :     0
laser_temp_low_warning    :     0
tec_current_high_alarm    :     0
tec_current_low_alarm     :     0
tec_current_high_warning  :     0
tec_current_low_warning   :     0

switch# show pie interface ethernet 1/23 link-flap-rca
2021-10-11 21:06:42   Event Id: 00008592     Ethernet1/23               Source Id: 436297728     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer

2021-10-08 20:46:02   Event Id: 00001826     Ethernet1/23               Source Id: 436297728     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer

switch# show pie interface ethernet 1/23 link-flap-rca detail
2021-10-11 21:06:42   Event Id: 00008592     Ethernet1/23               Source Id: 436297728     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer

Link flap Reason :      Link flapped/down due to Local Fault, check peer

Source Event id  :      8591

*************** Meta Details*************************
ifindex                    :    0x0
port_no                    :    88
phy_port_no                :    0
link_event_type            :    0
link_status                :    0
retimer_port               :    0
asic_type                  :    0
phy_type                   :    0
phy_mode                   :    0
link_down_rca              :    0
xcvr_supported             :    1
is_phy_port                :    0
is_copper                  :    0

*************** SW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    20000
sw_port_fec                :    0
sw_port_loopback           :    0
sw_port_mtu                :    9022
sw_breaklout_map           :    0
sw_port_ipg                :    0
sw_port_prbs               :    0
sw_xcvr_present            :    0
sw_glct_present            :    0
sw_qsa_present             :    0
sw_phy_present             :    0
sw_port_purged             :    0
hw_port_present            :    0

*************** HW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    20000
sw_port_fec                :    0
sw_port_loopback           :    0
sw_port_mtu                :    0

***************Port SM Details*************************
port_sm_type               :    0
port_sm_state              :    0

***************MAC Layer Details*************************
signal_detect              :    1
num_lanes                  :    2
start_lane                 :    4
tx_enable                  :    0
rx_enable                  :    0
fault_status               :    1
rx_crc_errors              :    0
tx_crc_errors              :    0
len_errors                 :    0
framing_errors             :    0
tx_fifo_err                :    0
rx_fifo_err                :    0

***************PCS Layer Details*************************
block_lock_loss           :     0
fault                     :     0
phy_fifo_error            :     0
decoder_trap              :     0
deskew_overflow           :     0
sync_loss                 :     0
high_ber                  :     0
high_ser                  :     0
error_blocks              :     0
alignment_loss            :     0
alignment_status          :     0
rx_pcs_block_err          :     0
rx_pcs_test_err           :     0
rx_pcs_sync_err           :     0
rx_pcs_bip_err            :     0
rx_pcs_align_map_err      :     0
rx_pcs_align_skew_err     :     0
rx_pcs_fec_cw_err         :     0
rx_pcs_align_marker_err   :     0

***************Fec Layer Details*************************
FC_ECC_error              :     0
RS_ECC_error              :     0
RS_alignment_lost         :     0
RS_uncorr_err             :     0
RS_deskew_err             :     0
RS_BER_over_thres_err     :     0
FC_uncorr_err             :     0
FC_bad_uncorr_code_word   :     0

***************PHY Details*************************
hrx_lanes                 :     0x30
htx_lanes                 :     0x30
lrx_lanes                 :     0xf
ltx_lanes                 :     0xf
op_mode                   :     2
fec_mode                  :     1

***************XCVR Details*************************
xcvr_type                 :     57
xcvr_present              :     1
laser_disabled            :     0
diags_supported           :     0
tx_los                    :     0
rx_los                    :     0
tx_fault                  :     0
tx_adapt_eq_fault         :     0
tx_cdr_lol                :     0
rx_cdr_lol                :     0
temp_high_alarm           :     0
temp_low_alarm            :     0
temp_high_warning         :     0
temp_low_warning          :     0
voltage_high_alarm        :     0
voltage_low_alarm         :     0
voltage_high_warning      :     0
voltage_low_warning       :     0
rx_power_high_alarm       :     0
rx_power_low_alarm        :     0
rx_power_high_warning     :     0
rx_power_low_warning      :     0
tx_power_high_alarm       :     0
tx_power_low_alarm        :     0
tx_power_high_warning     :     0
tx_power_low_warning      :     0
bias_current_high_alarm   :     0
bias_current_low_alarm    :     0
bias_current_high_warning :     0
bias_current_low_warning  :     0
laser_temp_high_alarm     :     0
laser_temp_low_alarm      :     0
laser_temp_high_warning   :     0
laser_temp_low_warning    :     0
tec_current_high_alarm    :     0
tec_current_low_alarm     :     0
tec_current_high_warning  :     0
tec_current_low_warning   :     0
2021-10-08 20:46:02   Event Id: 00001826     Ethernet1/23               Source Id: 436297728     RCA Code: 41
Reason:  Link flapped/down due to Local Fault, check peer
Link flap Reason :      Link flapped/down due to Local Fault, check peer
Source Event id  :      1825
*************** Meta Details*************************
ifindex                    :    0x0
port_no                    :    88
phy_port_no                :    0
link_event_type            :    0
link_status                :    0
retimer_port               :    0
asic_type                  :    0
phy_type                   :    0
phy_mode                   :    0
link_down_rca              :    0
xcvr_supported             :    1
is_phy_port                :    0
is_copper                  :    0

*************** SW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    20000
sw_port_fec                :    0
sw_port_loopback           :    0
sw_port_mtu                :    9022
sw_breaklout_map           :    0
sw_port_ipg                :    0
sw_port_prbs               :    0
sw_xcvr_present            :    0
sw_glct_present            :    0
sw_qsa_present             :    0
sw_phy_present             :    0
sw_port_purged             :    0
hw_port_present            :    0

*************** HW Admin Details*************************
sw_port_admin_state        :    1
sw_port_oper_state         :    2
sw_port_autoneg            :    1
sw_port_speed              :    20000
sw_port_fec                :    0
sw_port_loopback           :    0
sw_port_mtu                :    0

***************Port SM Details*************************
port_sm_type               :    0
port_sm_state              :    0

***************MAC Layer Details*************************
signal_detect              :    1
num_lanes                  :    2
start_lane                 :    4
tx_enable                  :    0
rx_enable                  :    0
fault_status               :    1
rx_crc_errors              :    0
tx_crc_errors              :    0
len_errors                 :    0
framing_errors             :    0
tx_fifo_err                :    0
rx_fifo_err                :    0

***************PCS Layer Details*************************
block_lock_loss           :     0
fault                     :     0
phy_fifo_error            :     0
decoder_trap              :     0
deskew_overflow           :     0
sync_loss                 :     0
high_ber                  :     0
high_ser                  :     0
error_blocks              :     0
alignment_loss            :     0
alignment_status          :     0
rx_pcs_block_err          :     0
rx_pcs_test_err           :     0
rx_pcs_sync_err           :     0
rx_pcs_bip_err            :     0
rx_pcs_align_map_err      :     0
rx_pcs_align_skew_err     :     0
rx_pcs_fec_cw_err         :     0
rx_pcs_align_marker_err   :     0

***************Fec Layer Details*************************
FC_ECC_error              :     0
RS_ECC_error              :     0
RS_alignment_lost         :     0
RS_uncorr_err             :     0
RS_deskew_err             :     0
RS_BER_over_thres_err     :     0
FC_uncorr_err             :     0
FC_bad_uncorr_code_word   :     0

***************PHY Details*************************
hrx_lanes                 :     0x30
htx_lanes                 :     0x30
lrx_lanes                 :     0xf
ltx_lanes                 :     0xf
op_mode                   :     2
fec_mode                  :     1

***************XCVR Details*************************
xcvr_type                 :     57
xcvr_present              :     1
laser_disabled            :     0
diags_supported           :     0
tx_los                    :     0
rx_los                    :     0
tx_fault                  :     0
tx_adapt_eq_fault         :     0
tx_cdr_lol                :     0
rx_cdr_lol                :     0
temp_high_alarm           :     0
temp_low_alarm            :     0
temp_high_warning         :     0
temp_low_warning          :     0
voltage_high_alarm        :     0
voltage_low_alarm         :     0
voltage_high_warning      :     0
voltage_low_warning       :     0
rx_power_high_alarm       :     0
rx_power_low_alarm        :     0
rx_power_high_warning     :     0
rx_power_low_warning      :     0
tx_power_high_alarm       :     0
tx_power_low_alarm        :     0
tx_power_high_warning     :     0
tx_power_low_warning      :     0
bias_current_high_alarm   :     0
bias_current_low_alarm    :     0
bias_current_high_warning :     0
bias_current_low_warning  :     0
laser_temp_high_alarm     :     0
laser_temp_low_alarm      :     0
laser_temp_high_warning   :     0
laser_temp_low_warning    :     0
tec_current_high_alarm    :     0
tec_current_low_alarm     :     0
tec_current_high_warning  :     0
tec_current_low_warning   :     0

Trademarks

THE SPECIFICATIONS AND INFORMATION REGARDING THE PRODUCTS REFERENCED IN THIS DOCUMENTATION ARE SUBJECT TO CHANGE WITHOUT NOTICE. EXCEPT AS MAY OTHERWISE BE AGREED BY CISCO IN WRITING, ALL STATEMENTS, INFORMATION, AND RECOMMENDATIONS IN THIS DOCUMENTATION ARE PRESENTED WITHOUT WARRANTY OF ANY KIND, EXPRESS OR IMPLIED.

The Cisco End User License Agreement and any supplemental license terms govern your use of any Cisco software, including this product documentation, and are located at: http://www.cisco.com/go/softwareterms.Cisco product warranty information is available at http://www.cisco.com/go/warranty. US Federal Communications Commission Notices are found here http://www.cisco.com/c/en/us/products/us-fcc-notice.html.

IN NO EVENT SHALL CISCO OR ITS SUPPLIERS BE LIABLE FOR ANY INDIRECT, SPECIAL, CONSEQUENTIAL, OR INCIDENTAL DAMAGES, INCLUDING, WITHOUT LIMITATION, LOST PROFITS OR LOSS OR DAMAGE TO DATA ARISING OUT OF THE USE OR INABILITY TO USE THIS MANUAL, EVEN IF CISCO OR ITS SUPPLIERS HAVE BEEN ADVISED OF THE POSSIBILITY OF SUCH DAMAGES.

Any products and features described herein as in development or available at a future date remain in varying stages of development and will be offered on a when-and if-available basis. Any such product or feature roadmaps are subject to change at the sole discretion of Cisco and Cisco will have no liability for delay in the delivery or failure to deliver any products or feature roadmap items that may be set forth in this document.

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

The documentation set for this product strives to use bias-free language. For the purposes of this documentation set, bias-free is defined as language that does not imply discrimination based on age, disability, gender, racial identity, ethnic identity, sexual orientation, socioeconomic status, and intersectionality. Exceptions may be present in the documentation due to language that is hardcoded in the user interfaces of the product software, language used based on RFP documentation, or language that is used by a referenced third-party product.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com go trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1721R)