Cisco Application Policy Infrastructure Controller Release Notes, Release 4.2(2)

The Cisco Application Centric Infrastructure (ACI) is an architecture that allows the application to define the networking requirements in a programmatic way. This architecture simplifies, optimizes, and accelerates the entire application deployment lifecycle. Cisco Application Policy Infrastructure Controller (APIC) is the software, or operating system, that acts as the controller.

The Cisco Application Centric Infrastructure Fundamentals, Release 4.2(x) document provides complete details about the Cisco ACI, including a glossary of terms that are used in the Cisco ACI.

This document describes the features, bugs, and limitations for the Cisco APIC.

Note: Use this document with the Cisco Nexus 9000 ACI-Mode Switches Release Notes, Release 14.2(2).

Release notes are sometimes updated with new information about restrictions and bugs. See the following website for the most recent version of this document:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

You can watch videos that demonstrate how to perform specific tasks in the Cisco APIC on the Cisco ACI YouTube channel.

For the verified scalability limits (except the CLI limits), see the Verified Scalability Guide for Cisco APIC, Release 4.2(2), Multi-Site, Release 2.2(2), and Cisco Nexus 9000 Series ACI-Mode Switches, Release 14.2(2).

For the CLI verified scalability limits, see the Cisco APIC NX-OS Style CLI Configuration Guide, Release 4.2(x).

Note: The documentation set for this product strives to use bias-free language. For the purposes of this documentation set, bias-free is defined as language that does not imply discrimination based on age, disability, gender, racial identity, ethnic identity, sexual orientation, socioeconomic status, and intersectionality. Exceptions may be present in the documentation due to language that is hardcoded in the user interfaces of the product software, language used based on RFP documentation, or language that is used by a referenced third-party product.

Table 1 shows the online change history for this document.

Table 1 Online History Change

Date

Description

April 29, 2024

In the Miscellaneous Compatibility Information section, added:

■        4.2(3j) CIMC HUU ISO (recommended) for UCS C220/C240 M5 (APIC-L3/M3)

■        4.1(3m) CIMC HUU ISO for UCS C220/C240 M5 (APIC-L3/M3)

■        4.1(2m) CIMC HUU ISO (recommended) for UCS C220/C240 M4 (APIC-L2/M2)

December 9, 2022

In the Open Bugs section, added bug CSCvw33061.

November 18, 2022

In the Open Issues section, added bug CSCwc66053.

August 1, 2022

In the Miscellaneous Compatibility Information section, added:

■        4.2(2a) CIMC HUU ISO (recommended) for UCS C220/C240 M5 (APIC-L3/M3)

■        4.1(2k) CIMC HUU ISO (recommended) for UCS C220/C240 M4 (APIC-L2/M2)

March 21, 2022

In the Miscellaneous Compatibility Information section, added:

■        4.1(3f) CIMC HUU ISO (recommended) for UCS C220/C240 M5 (APIC-L3/M3)

February 23, 2022

In the Miscellaneous Compatibility Information section, added:

■        4.1(2g) CIMC HUU ISO (recommended) for UCS C220/C240 M4 (APIC-L2/M2)

November 2, 2021

In the Miscellaneous Compatibility Information section, added:

■        4.1(3d) CIMC HUU ISO (recommended) for UCS C220/C240 M5 (APIC-L3/M3)

August 4, 2021

In the Open Issues section, added bugs CSCvy30453 and CSCvy44940.

July 26, 2021

In the Miscellaneous Compatibility Information section, the CIMC 4.1(3c) release is now recommended for UCS C220/C240 M5 (APIC-L3/M3).

March 25, 2021

In the Open Bugs section, added bug CSCvu74478.

March 11, 2021

In the Miscellaneous Compatibility Information section, for CIMC HUU ISO, added:

■        4.1(3b) CIMC HUU ISO (recommended) for UCS C220/C240 M5 (APIC-L3/M3)

Changed:

■        4.1(2b) CIMC HUU ISO (recommended) for UCS C220/C240 M4 (APIC-L2/M2) and M5 (APIC-L3/M3)

To:

■        4.1(2b) CIMC HUU ISO (recommended) for UCS C220/C240 M4 (APIC-L2/M2

February 9, 2021

In the Open Bugs section, added bug CSCvt07565.

February 3, 2021

In the Miscellaneous Compatibility Information section, for CIMC HUU ISO, added:

■        4.1(2b) CIMC HUU ISO (recommended) for UCS C220/C240 M4 (APIC-L2/M2) and M5 (APIC-L3/M3)

September 29, 2020

In the Miscellaneous Compatibility Information section, specified that the 4.1(1f) CIMC release is deferred. The recommended release is now 4.1(1g).

September 16, 2020

In the Known Behaviors section, added the bullet that begins with:

Beginning in Cisco APIC release 4.1(1), the IP SLA monitor policy validates the IP SLA port value.

April 17, 2020

In the Miscellaneous Compatibility Information section, updated the CIMC HUU ISO information to include the 4.1(1c) and 4.1(1d) releases.

March 6, 2020

In the Miscellaneous Compatibility Information section, updated the CIMC HUU ISO information for the 4.0(2g) and 4.0(4e) CIMC releases.

November 25, 2019

4.2(2e): In the Known Behaviors section, added bug CSCvs19322.

November 14, 2019

4.2(2g): Release 4.2(2g) became available; there are no changes to this document for this release. See the Cisco Nexus 9000 ACI-Mode Switches Release Notes, Release 14.2(2) for the changes in this release.

October 26, 2019

4.2(2f): Release 4.2(2f) became available; there are no changes to this document for this release. See the Cisco Nexus 9000 ACI-Mode Switches Release Notes, Release 14.2(2) for the changes in this release.

October 17, 2019

4.2(2e): In the Resolved Bugs section, added bugs CSCvq86573 and CSCvq89967.

October 10, 2019

4.2(2e): Release 4.2(2e) became available.

Contents

This document includes the following sections:

■        New and Changed Information

■        Upgrade and Downgrade Information

■        Bugs

■        Compatibility Information

■        Usage Guidelines

■        Related Documentation

New and Changed Information

This section lists the new and changed features in this release and includes the following topics:

■        New Software Features

■        New Hardware Features

New Software Features

The following table lists the new software features in this release:

Table 2 New Software Features

Feature

Description

Guidelines and Restrictions

Remote leaf switch failover

In a multipod setup, if a remote leaf switch in a pod loses connectivity to the spine switch, the remote leaf switch now moves to another pod. This ensures that traffic continues to flow between endpoints of remote leaf switches that are connected to the original pod.

For more information, see the Cisco APIC Layer 3 Networking Configuration Guide, Release 4.2(x).

■        Configure multipod in route reflector mode instead of full mesh mode.

■        Enable direct traffic forwarding with a routable IP address on the remote leaf switches.

■        Configure an external Border Gateway Protocol (BGP) route reflector.

New Hardware Features

For new hardware features, see the Cisco Nexus 9000 ACI-Mode Switches Release Notes, Release 14.2(2).

Changes in Behavior

For the changes in behavior, see the Cisco ACI Releases Changes in Behavior document.

Upgrade and Downgrade Information

For upgrade and downgrade considerations for the Cisco APIC, see the "Upgrading and Downgrading the Cisco APIC and Switch Software" section of the Cisco APIC Installation, Upgrade, and Downgrade Guide.

Bugs

This section contains lists of open and resolved bugs and known behaviors.

■        Open Bugs

■        Resolved Bugs

■        Known Behaviors

Open Bugs

This section lists the open bugs. Click the bug ID to access the Bug Search tool and see additional information about the bug. The "Exists In" column of the table specifies the 4.2(2) releases in which the bug exists. A bug might also exist in releases other than the 4.2(2) releases.

Table 3 Open Bugs in This Release

Bug ID

Description

Exists in

CSCvq54761

The application EPG or the corresponding bridge domain's public subnet may be advertised out of an L3Out in another VRF instance without a contract with the L3Out under certain conditions.

4.2(2g) and later

CSCvs06139

Dynamic VLANs are programmed on interfaces that are not associated to the VLAN pool/AEP.  This behaviour is seen when a UCS Fabric Interconnect blade switch has multiple uplinks to the fabric. Although some of those uplinks are mapped to a different AEP and the is EPG set for pre-provision, dynamic EPGs still are reported for that EPG.

4.2(2g) and later

CSCvs10339

This is an enhancement to add columns in "Fabric > Inventory> Fabric Membership" to show BGP Route Reflectors for within pod and across pods (external BGP RR).

4.2(2g) and later

CSCvs22023

If pre-provision is not in place, there can be a complete outage to VMM integrated endpoints. If the host discovery is not successful, the policy will not be dynamically pushed to the leaf switches because virtual machines are attached.

4.2(2g) and later

CSCvs46872

An admin read-only user can not see the System Settings tab in the Cisco APIC GUI.

4.2(2g) and later

CSCvs01864

This bug is an enhacement to add an option to configure an interface description for subport blocks in the Cisco APIC GUI.

4.2(2f) and later

CSCvs10127

The vmmmgr process crashes, and the process is unable to restart properly and crashes after every restart.

4.2(2f) and later

CSCvs11202

After exiting Maintenance (GIR) mode, the switch reloads automatically after 5 minutes without warning.This enhancement will provide messaging in the GUI to indicate that the reload is expected.

4.2(2f) and later

CSCvs15870

Fibre Channel conversion is allowed on an unsupported switch. The only switch that supports Fibre Channel conversion is the Cisco N9K-C93180YC-FX.

4.2(2f) and later

CSCvs15964

The GUI does not provide a "Revert" option for interfaces that are converted to Fibre Channel.

4.2(2f) and later

CSCvs29375

The Cisco APIC GUI hangs on a loading screen when trying to configure interfaces policies from the following location: Fabric -> Inventory -> Pod -> Leaf switch -> Interface tab -> Configuration mode.

4.2(2f) and later

CSCvs30837

In a Fabric Interconnect topology, a vPC may not be detected by the OpflexAgent on a HyperV host.

4.2(2f) and later

CSCvs50986

When the PSU is powered off, a fault indicates that it is in a failed state.

4.2(2f) and later

CSCvs52100

In the Cisco APIC GUI, go to Admin->Firmware->Infrastructure->Nodes. Open an existing update group. While the group loads, the following text appears: "Click on + to add nodes to Node Upgrade Group". The text disappears after the nodes are loaded. The update groups cannot be edited (there is no "+" or "trash" symbol).

4.2(2f) and later

CSCvs53480

When togging between "Configured and Operational" under Tenants >Tenant_name > Contracts > Contract_name > Topology, contract lines are not visible when the toggle is on operational mode even though contracts are still operational.

4.2(2f) and later

CSCvs55246

Clicking on Fabric --> Access Policies --> Interfaces --> Leaf Interfaces -->  Profiles --> <any_profile> --> "Show Usage" --> "Nodes using this policy" --> "Usage details of node" results in logging off the user and freezing the GUI screen.

4.2(2f) and later

CSCvs64425

"*,G" got created in both MRIB and MFDM, is present for nearly 9 minutes, and then got expired.

4.2(2f) and later

CSCvs71669

Time zone/local time on a Cisco APIC and switches differ when set to the EET timezone.

4.2(2f) and later

CSCvs81421

It is difficult to configure interface selectors in the GUI, because "interface policy group" window is too narrow.

4.2(2f) and later

CSCvs81429

It is difficult to configure interface selectors, because there is no search option available for the interface policy group window.

4.2(2f) and later

CSCvs81944

The following example shows UNIX time in the subject header:

Subject: Configuration import/export job 2020-01-27T09-00-16 finished with status: success Created: 1580144423366

ContentType: plain/text

4.2(2f) and later

CSCvs82098

When navigating to System -> Controllers -> Cluster as Seen by Node for any Cisco APIC, the following error displays:

The Request failed due to a server-side error.

4.2(2f) and later

CSCvs97474

TACACS external logging is not supported at the tenant level.

4.2(2f) and later

CSCvt00078

Hosts that require a DHCP-obtained address (Hyper-V, for example) from the Cisco APIC do not work. Checking the DHCP logs shows the DHCP discovers coming in frequently.

4.2(2f) and later

CSCvt10029

This is an enhancement to include the managed object class name and isPersisted attribute in the DME log line.

4.2(2f) and later

CSCvt29894

A switch entered into a bootloop and an upgrade is triggered multiple times if the maintenance policy is pushed with a REST API call that has the incorrect version.

4.2(2f) and later

CSCvt40498

For Cisco APIC, snmpwalk/get returns unexpected values for object cpmCPUMemoryUsed and cpmCPUMemoryUsed.

4.2(2f) and later

CSCvt48790

There is a stale fvIfConn entry after physically removing the ESXi host after a host is removed from the datacenter or VMware vCenter.

4.2(2f) and later

CSCvt79906

After creating a BGP-peer connectivity profile with the loopback option (no presence loopback on L3Out node) in a vPC setup, the BGP session is getting established with a secondary IP address.

4.2(2f) and later

CSCvt92961

A TEP endpoint can expire on the leaf switch if the host does not respond on a unicast ARP refresh packet initiated by the leaf switch.

4.2(2f) and later

CSCvt94286

Deploy the TACACS server for in-band management. When adding or modifying the TACACS+ provider key, the Cisco APIC can be reached only through SSH and the login fails on the fabric. After deleting the provider entry and reconfiguring, the fabric can be logged into.

4.2(2f) and later

CSCvu01711

Traffic from newly added subnet(s) is allowed on one or more Cisco APIC(s) and blocked on the other one or more Cisco APIC(s). As Ext Mgmt NW Inst Prof Subnets are applied/programmed on all Cisco APICs, traffic should work on all Cisco APICs.

4.2(2f) and later

CSCvu01818

There is a message in the Cisco APIC GUI saying that vleaf_elem has restarted several times and may not have recovered, and there are core files of the vleaf_elem process.

4.2(2f) and later

CSCvu06061

A switch entered into a bootloop and an upgrade is triggered multiple times if the maintenance policy is pushed with a REST API call that has the incorrect version.

4.2(2f) and later

CSCvu08274

The Smart Licensing GUI page fails to load due to the JavaScript function erroring out while trying to parse an invalid LicenseManager object. The JavaScript error can be seen in the browser developer tools - console logs.

4.2(2f) and later

CSCvu12478

Fabric > Inventory > Topology > Topology shows the wrong Cisco APIC counts (Active + Standby) in different pods.

4.2(2f) and later

CSCvu41160

VMware vCenter is offline according to the Cisco APIC. The Cisco APIC is unable to push port groups into VMware vCenter. The leader Cisco APIC for VMware vCenter connections shows as disconnected. There are faults on the VMM domain related to incorrect credentials, but the credentials are actually correct. The same credentials can be used to log in to the VMware vCenter GUI successfully. The "administrator@vsphere.local" account does not work either, so permissions should not be a problem.

4.2(2f) and later

CSCvu44730

Associating an EPG to a FEX interface from Fabric->Inventory->Pod1->leaf->interface in the Cisco APIC GUI creates an unexpected tDn.

As a side effect, this type of static EPG association will cause the following error if you use Cisco APIC CLI to verify the leaf node configuration:

Error while processing mode: configure

Error: Key [eh101/1/218] is in FEX format, we expect in extpath format

4.2(2f) and later

CSCvu56364

Cisco APIC accepts the "_" (underscore) symbol as delimiter for VMware VMM Domain Association, even though it is not a supported symbol. This is an enhancement request to implement a check in the Cisco APIC GUI to not accept "_".

4.2(2f) and later

CSCvu67941

TACACS+ users are unable to login to a Cisco APIC when an AV pair is in use with a dot '.' character in the domain portion. Users may be able to login with minimal permissions if the "Remote user login policy" allows it. The following example shows an AV pair that causes the issue:

shell:domains = aci.domain/admin/

Additionally, NGINX logs on the Cisco APIC show the following log line:

23392||2020-06-16T21:04:56.534944300+00:00||aaa||INFO||||Failed to parse AVPair string (shell:domains = aci.domain/admin/) into required data components - error was Invalid shell:domains string (shell:domains = aci.domain/admin/) received from AAA server||../svc/extXMLApi/src/gen/ifc/app/./pam/PamRequest.cc||813

This log can be found at /var/log/dme/log/nginx.bin.log on the Cisco APIC.

4.2(2f) and later

CSCvv50268

Port-groups named "||" may be created in VMware vCenter when a vmmEpPD MO (VMM port group) is not present when the l3extRsDynPathAtt (L3Out dynamic attachment) associated with a vmmDom is deleted. L3Out dynamic attachments in VMM are created when the floating SVI feature is implemented on the L3Outs.

The port-groups named "||" that get installed in VMware vCenter can cause bug CSCvu41160 to occur, where the Cisco APIC is unable to properly parse the port group names. Bug CSCvu41160 prevents the parsing issue, while this bug aims to prevent the "||" port-group creation in the first place.

4.2(2f) and later

CSCvv70570

A standby Cisco APIC doesn't upgrade during a Cisco APIC cluster upgrade and raises fault F1824.

4.2(2f) and later

CSCvd66359

The Port ID LLDP Neighbors panel displays the port ID when the interface does not have a description. Example:  Ethernet 1/5, but if the interface has description, the Port ID property shows the Interface description instead of the port ID.

4.2(2e) and later

CSCvf70362

This enhancement is to change the name of "Limit IP Learning To Subnet" under the bridge domains to be more self-explanatory.

Original :

Limit IP Learning To Subnet: [check box]

Suggestion :

Limit Local IP Learning To BD/EPG Subnet(s): [check box]

4.2(2e) and later

CSCvg00627

A tenant's flows/packets information cannot be exported.

4.2(2e) and later

CSCvg35344

Requesting an enhancement to allow exporting a contract by right clicking the contract itself and choosing "Export Contract" from the right click context menu. The current implementation of needing to right click the Contract folder hierarchy to export a contract is not intuitive.

4.2(2e) and later

CSCvg81020

For strict security requirements, customers require custom certificates that have RSA key lengths of 3072 and 4096.

4.2(2e) and later

CSCvh52046

This is an enhancement to allow for text-based banners for the Cisco APIC GUI login screen.

4.2(2e) and later

CSCvh54578

For a client (browser or ssh client) that is using IPv6, the Cisco APIC aaaSessionLR audit log shows "0.0.0.0" or some bogus value.

4.2(2e) and later

CSCvi20535

When a VRF table is configured to receive leaked external routes from multiple VRF tables, the Shared Route Control scope to specify the external routes to leak will be applied to all VRF tables. This results in an unintended external route leaking. This is an enhancement to ensure the Shared Route Control scope in each VRF table should be used to leak external routes only from the given VRF table.

4.2(2e) and later

CSCvj14053

The health status of DHCP was not updated after a leaf switch upgrade for some of the leaf switches.

4.2(2e) and later

CSCvj56726

The connectivity filter configuration of an access policy group is deprecated and should be removed from GUI.

4.2(2e) and later

CSCvk04072

There is no record of who acknowledged a fault in the Cisco APIC, nor when the acknowledgement occurred.

4.2(2e) and later

CSCvk18014

The action named 'Launch SSH' is disabled when a user with read-only access logs into the Cisco APIC.

4.2(2e) and later

CSCvm32345

A port group cannot be renamed. This is an enhancement request to enable the renaming of port groups.

4.2(2e) and later

CSCvm42914

This is an enhancement request to add policy group information to the properties page of physical interfaces.

4.2(2e) and later

CSCvm56946

Support for local user (admin) maximum tries and login delay configuration.

4.2(2e) and later

CSCvm64933

The Cisco APIC setup script will not accept an ID outside of the range of 1 through 12, and the Cisco APIC cannot be added to that pod. This issue will be seen in a multi-pod setup when trying add a Cisco APIC to a pod ID that is not between 1 through 12.

4.2(2e) and later

CSCvn12839

Error "mac.add.ress not a valid MAC or IP address or VM name" is seen when searching the EP Tracker.

4.2(2e) and later

CSCvo24284

Fault delegates are raised on the Cisco APIC, but the original fault instance is already gone because the affected node has been removed from the fabric.

4.2(2e) and later

CSCvo87667

Post reload, the IGMP snooping table is not populated even when the IGMP report is sent by the receiver.

4.2(2e) and later

CSCvp26694

A leaf switch gets upgraded when a previously-configured maintenance policy is triggered.

4.2(2e) and later

CSCvp62048

New port groups in VMware vCenter may be delayed when pushed from the Cisco APIC.

4.2(2e) and later

CSCvq22658

Description fields are not available for resource pools (VLAN, VSAN, Mcast, VXLAN etc).

4.2(2e) and later

CSCvq54761

The application EPG or the corresponding bridge domain's public subnet may be advertised out of an L3Out in another VRF instance without a contract with the L3Out under certain conditions.

4.2(2e) and later

CSCvq57942

In a RedHat OpenStack platform deployment running the Cisco ACI Unified Neutron ML2 Plugin and with the CompHosts running OVS in VLAN mode, when toggling the resolution immediacy on the EPG<->VMM domain association (fvRsDomAtt.resImedcy) from Pre-Provision to On-Demand, the encap VLANs (vlanCktEp mo's) are NOT programmed on the leaf switches.

This problem surfaces sporadically, meaning that it might take several resImedcy toggles between PreProv and OnDemand to reproduce the issue.

4.2(2e) and later

CSCvq63415

Disabling dataplane learning is only required to support a policy-based redirect (PBR) use case on pre-"EX" leaf switches.  There are few other reasons otherwise this feature should be disabled.  There currently is no confirmation/warning of the potential impact that can be caused by disabling dataplane learning.

4.2(2e) and later

CSCvq63842

F0467 fault is present on the infra overlay L3Out when the domain is not associated correctly. However, this fault should not be raised on infra overlay L3Out even when the domain association is incorrect.

4.2(2e) and later

CSCvq74727

When making a configuration change to an L3Out (such as contract removal or addition), the BGP peer flaps or the bgpPeerP object is deleted from the leaf switch.  In the leaf switch policy-element traces, 'isClassic = 0, wasClassic =1' is set post-update from the Cisco APIC.

4.2(2e) and later

CSCvq77297

Plugin-handler triggers pre-remove the lifecycle hook for a scale-out app that is being removed. It keeps checking the status of pre-remove lifecycle hook using a Kron API, but if Kron is down, the plugin-handler waits for Kron to come back in the same transaction. This can cause the APIC cluster to diverge.

4.2(2e) and later

CSCvq80820

A previously-working traffic is policy dropped after the subject is modified to have the "no stats" directive.

4.2(2e) and later

CSCvq88632

This is an enhancement request for allowing DVS MTU to be configured from a VMM domain policy and be independent of fabricMTU.

4.2(2e) and later

CSCvq95687

Currently, under Fabric > Inventory > Pod > Leaf Switch > General, the memory usage takes in consideration the MemFree field rather than the MemAvailable, which would be a more accurate representation of the usable memory in the system.

In some cases, the GUI might show that the memory utilization is around 90% while in reality it's 50%, because there is still the cached/buffered memory to take into account. This buffered/cached memory will free up a big chunk of memory in case more memory is needed.

4.2(2e) and later

CSCvq96516

There is an event manager process crash.

4.2(2e) and later

CSCvr10020

Fault alarms get generated at a higher rate with a lower threshold. There is no functional impact.

4.2(2e) and later

CSCvr11388

When the VRF instance of both of the service device bridge domains is changed, the svcredirHealthGrp managed objects in the switch may not be created for the new VRF instance. As a result traffic will get impacted and there will be faults raised in the switch and in the APIC at the tenant level.

4.2(2e) and later

CSCvr12971

The Cisco APIC GUI produces the following error messages when opening an EPG policy:  Received Invalid Json String.  The server returned an unintelligible response.This issue might affect backup/restore functionality.

4.2(2e) and later

CSCvr19693

When configuring local SPAN in access mode using the GUI or CLI and then running the "show running-config monitor access session<session>" command, the output does not include all source span interfaces.

4.2(2e) and later

CSCvr30815

vmmPLInf objects are created with epgKey's and DN's that have truncated EPG names ( truncated at ".").

4.2(2e) and later

CSCvr33833

A static subnet can be configured under an EPG even if the EPG is a part of bridge domain that already is associated with another static subnet, and the subnet space is the same as or is a super range of the subnet space of the EPG. Therefore, there can be situations where both the bridge domain and associated EPG have the same subnets, or he EPG's subnet can be part of the bridge domain subnet at the same time.

4.2(2e) and later

CSCvr36851

Descending option will not work for the Static Ports table. Even when the user clicks descending, the sort defaults to ascending.

4.2(2e) and later

CSCvr38278

When using AVE with Cisco APIC, fault F0214 gets raised, but there is no noticeable impact on AVE operation:

descr: Fault delegate: Operational issues detected for OpFlex device: ..., error: [Inventory not available on the node at this time]

4.2(2e) and later

CSCvr41750

Policies may take a long time (over 10 minutes) to get programmed on the leaf switches. In addition, the APIC pulls inventory from the VMware vCenter repeatedly, instead of following the usual 24 hour interval.

4.2(2e) and later

CSCvr48322

When there are standby APICs in the fabric, the "show controller" command will take time to process the command.

4.2(2e) and later

CSCvr51069

In some circumstances, fault F1188 is generated. This fault is cosmetic.

4.2(2e) and later

CSCvr51121

If the current VMware vCenter crashes and is not recoverable, then a new VMware vCenter with an identical configuration is built, the Cisco APIC pushes  the DVS and Quarantine port-groups. However, the APIC does not push the EPG port group.

4.2(2e) and later

CSCvr58476

The Cisco ACI Simulator version 4.2 gets stuck at the "installing the APIC software, this may take a few minutes...." screen and the installation does not proceed.

4.2(2e) and later

CSCvr62453

When a Cisco ACI fabric upgrade is triggered and a scheduler is created and associated to the maintenance group, the scheduler will remain associated to the maintenance group. If the version is changed in the maintenance group, it will trigger the upgrade. This enhancement is to avoid unwanted fabric upgrades. Post-upgrade, the association of the scheduler should be removed from the maintenance group after the node upgrade reaches 100%.

4.2(2e) and later

CSCvr67887

Fault: F3060 "license-manager-license-authorization-expired" is raised although "show license status" shows the REGISTERED status and the license authorization shows AUTHORIZED.

4.2(2e) and later

CSCvr75684

The admin password of ACI fabric is initially configured using the setup-script during the APIC node initialization, for example pw1. After that, customer may choose to change the admin password to a new one such as pw2. The new password pw2 is not preserved in the event of a database clean-up, which causes pw1 to be required for after a clean reload. The impact to the operation team is that they may not always document the very first Cisco APIC password, hence they will not be able to login to the Cisco APIC again due to forgetting the original admin password if the Cisco APIC had to be clean reloaded.

4.2(2e) and later

CSCvr76318

Cisco ACI plugin containers do not get updated.

4.2(2e) and later

CSCvr77120

When configuring a vzAny contract (regardless of the details) as a "Provided" contract, the command "show vrf XYZ detail" executed directly in the APIC CLI will display it as "Consumed", and if configured as "Consumed", it will show it as "Provided".

4.2(2e) and later

CSCvr82224

A leaf switch port flaps without raising a warning.

4.2(2e) and later

CSCvr82304

vPod deployment fails in the VMware vCenter plugin with the following error:

"Deploy ACI Virtual Pod - An Error Occured"

In the logs (/var/log/vmware/vsphere-client/logs/vsphere_client_virgo.log), the following error can be seen:

The following PortGroup could not be resolved

4.2(2e) and later

CSCvr85515

When trying to track an AVE endpoint IP address, running the "show endpoint ip x.x.x.x" command in the Cisco APIC CLI to see the IP address and checking the IP address on the EP endpoint in the GUI shows incorrect or multiple VPC names.

4.2(2e) and later

CSCvr85821

The API query /api/class/compCtrlr.json?rsp-subtree=full? returns a malformed JSON file.

4.2(2e) and later

CSCvr85945

There should be a description field in the subnet IP address tables.

4.2(2e) and later

CSCvr86180

Process vmmmgr crashes while processing a DvsUpgradedEvent from VMware vCenter.

4.2(2e) and later

CSCvr89025

If a Cisco APIC is receiving a large number of DHCP requests with unique client addresses, each request will result in a unique dhcpClient managed object being created on the APIC in the requesting state. Depending on the number of unique requests, these could add up over time and cause the dhcpd process on the APIC to hit scale issues, potentially crashing, although the APIC itself will not crash and the dhcpd process will crash and recover. The dhcpd crashing issue was observed with the dhcpClient managed object count was over 4 million.

4.2(2e) and later

CSCvr89940

An APIC tenant purge fails after the OpenStack project is deleted if the public OpenStack endpoint URL access is blocked from the OpenStack mgmt network.

4.2(2e) and later

CSCvr92169

The scope for host routes should be configurable; however, the option to define the scope is not available.

4.2(2e) and later

CSCvr94305

When a user logs into the Cisco APIC GUI and selects the SAL login domain, the authorization fails and the user gets thrown back to the initial login screen. The Cisco APIC NGINX logs show a failure to parse the AVPair value that is sent back by the SAML IDP. When checking the AVPair value returned by the Okta SAML IDP "<inRole value="shell:domains=all//read-all"/>", the value seems to have correct syntax.

4.2(2e) and later

CSCvr94614

There is a minor memory leak in svc_ifc_policydist when performing various tenant configuration removals and additions.

4.2(2e) and later

CSCvr96408

Active uplinks are removed for a portgroup in VMware vCenter after changing the security settings (macChanges|forgedTransmits) in the "Edit VMM Domain Association" tab under the EPG domain configuration.

4.2(2e) and later

CSCvr96785

Configuring a static endpoint through the Cisco APIC CLI fails with the following error:

Error: Unable to process the query, result dataset is too big

Command execution failed.

4.2(2e) and later

CSCvr98638

When migrating an AVS VMM domain to Cisco ACI Virtual Edge, the Cisco ACI Virtual Edge that gets deployed is configured in VLAN mode rather than VXLAN Mode.  Because of this, you will see faults for the EPGs with the following error message:

"No valid encapsulation identifier allocated for the epg"

4.2(2e) and later

CSCvs03055

While configuring a logical node profile in any L3Out, the static routes do not have a description.

4.2(2e) and later

CSCvs03648

Cisco ACI UCSM integration does not work as expected. The Cisco APIC cannot discover a loose node UCS Fabric interconnect 6400 series when it is connected to the Cisco ACI fabric with a 100G interface.

4.2(2e) and later

CSCvs04899

When you run the 'show vpc map' command in the APIC CLI, it only prints the column headers, but none of the vPC information. If you go to the leaf switch CLI and run the 'show vpc extended' command, it will show the vPCs there.

4.2(2e) and later

CSCvs04981

F2928 "KeyRing Certificate expired" faults raised and do not get cleared.

4.2(2e) and later

CSCvs05817

While using the UCSM plugin/VMM domain, during a vPC link failover test, VLANs from the vNIC template are removed. However, global (uplink) VLANs and the VLAN group remain untouched. In addition, the VMM domain is removed.

4.2(2e) and later

CSCvs10076

An error is raised while building an ACI container image because of a conflict with the /opt/ciscoaci-tripleo-heat-templates/tools/build_openstack_aci_containers.py package.

4.2(2e) and later

CSCvs12118

After removing and re-applying the IP SLA monitoring policy on a PBR policy, tracking does not work correctly.

4.2(2e) and later

CSCvs13857

L3Out encapsulated routed interfaces and routed interfaces do not have any monitoring policy attached to them. As a result, there is no option to change the threshold values of the faults that occur due to these interfaces.

4.2(2e) and later

CSCvs13980

Upgrading to the 4.2(1i) release, Layer 3 packet drops are no longer seen, but Layer 3 drop flows are still seen. However, Layer 3 drop flows do not give as much information.

4.2(2e) and later

CSCvs14967

There is high memory usage by the svc_ifc_ae.bin process (AE service). The AE process uses more than 3 GB and the memory usage constantly increases for the process.

Check for "PERF-STATS-LOG" in the svc_ifc_ae.bin.log. If you see a value more than 1000 for "Configs:", then you are hitting this bug. This file is located at /var/log/dme/log.

4.2(2e) and later

CSCvs16317

An app does not get fully removed from all Cisco APICs.

4.2(2e) and later

CSCvs16565

An endpoint is unreachable from the leaf node because the static pervasive route (toward the remote bridge domain subnet) is missing.

4.2(2e) and later

CSCvs17431

A native VLAN for a VMM domain does not work if resolution immediacy is set to pre-provision. In this case, the untag policy is pushed to VMware vCenter and a port group is created (this is expected). However, the policy is programed as trunk on switch side, which prevents the ESXi vmkernal and switch from communicating.

4.2(2e) and later

CSCvs21834

Randomly, the Cisco APIC GUI alert list shows an incorrect license expiry time.Sometimes it is correct, while at others times it is incorrect.

4.2(2e) and later

CSCvs22599

RADIUS authentication cannot be configured from the Cisco APIC GUI.

4.2(2e) and later

CSCvs29281

An SNMP v3 trap is sent 2 minutes after a PSU is removed from the Cisco APIC, and a core file for the eventmgr is generated.

4.2(2e) and later

CSCvs29366

For a DVS with a controller, if another controller is created in that DVS using the same host name, the following fault gets generated: "hostname or IP address conflicts same controller creating controller with same name DVS".

4.2(2e) and later

CSCvs29556

When logging into the Cisco APIC using "apic#fallback\\user", the "Error: list index out of range" log message displays and the lastlogin command fails. There is no operational impact.

4.2(2e) and later

CSCvs31335

App techsupport collection does not work sometimes when triggered from the Cisco APIC GUI.

4.2(2e) and later

CSCvs32589

In Cisco ACI Virtual Edge, there are faults related to VMNICs. On the Cisco ACI Virtual Edge domain, there are faults related to the HpNic, such as "Fault F2843 reported for AVE | Uplink portgroup marked as invalid".

4.2(2e) and later

CSCvs39652

Host subnets (/32) that are created under an SCVMM-integrated EPG get pushed as a virtual machine subnet under the virtual machine network in SCVMM. Virtual machine networks on SCVMM  do not support /32 virtual machine subnets and fail to come up. Virtual machines that were previously associated to the virtual machine networks lose connectivity.

4.2(2e) and later

CSCvs42756

Configuration rollback fails with the following error:

VRF Validation failed for VRF = : - ARP policy default in uni/tn-Prod/out-PROD_L3OUT/Inodep - L3OUT_PROD_LEAF103/lifp-PROD_L3OUT_INTERFACE/rsArplfPol is currently not supported on the interface

4.2(2e) and later

CSCvs47757

The plgnhandler process crashes on the Cisco APIC, which causes the cluster to enter a data layer partially diverged state.

4.2(2e) and later

CSCvs48552

When physical domains and external routed domains are attached to a security domain, these domains are mapped as associated tenants instead of associated objects under Admin > AAA > security management > Security domains.

4.2(2e) and later

CSCvs49411

Special characters are not allowed in the GUI for the SNMP community string, but you can still post a configuration that has special characters in the string by using the REST API.

4.2(2e) and later

CSCvs53247

OpenStack supports more named IP protocols for service graph rules than are supported in the Cisco APIC OpenStack Plug-in.

4.2(2e) and later

CSCvs53468

A Cisco APIC-generated CSR contains the "unstructuredName" field, which does not work with some CA certificates.

4.2(2e) and later

CSCvs55753

A Cisco ACI leaf switch does not have MP-BGP route reflector peers in the output of "show bgp session vrf overlay-1". As a result, the switch is not able to install dynamic routes that are normally advertised by MP-BGP route reflectors. However, the spine switch route reflectors are configured in the affected leaf switch's pod, and pod policies have been correctly defined to deploy the route reflectors to the leaf switch. Additionally, the bgpPeer managed objects are missing from the leaf switch's local MIT.

4.2(2e) and later

CSCvs57061

In a GOLF configuration, when an L3Out is deleted, the bridge domains stop getting advertised to the GOLF router even though another L3Out is still active.

4.2(2e) and later

CSCvs62693

The Name column of the the output of the "show zoning-rule" CLI command that is executed on a leaf switch running a 14.x release does not populate all of the expected contracts names. This issue makes it difficult to identify which rule ID is associated to which contract  from the "show zoning-rule" command that is executed on a given leaf switch.

4.2(2e) and later

CSCvs66244

The CLI command "show interface x/x switchport" shows VLANs configured and allowed through a port. However, when going to the GUI under Fabric > Inventory > node_name > Interfaces > Physical Interfaces > Interface x/x > VLANs, the VLANs do not show.

4.2(2e) and later

CSCvs68074

When viewing leaf switch interface profiles in access policies, the list cannot be sorted by name or description.

4.2(2e) and later

CSCvs74120

Selecting the RADIUS login domain from the GUI results in the following error:

Error: 400 - unknown property value test, name realm, class aaaConsoleAuth [(Dn0)] Dn0=uni/userext/authrealm/consoleauth,

4.2(2e) and later

CSCvs76244

The tmpfs file system that is mounted on /data/log becomes 100% utilized.

4.2(2e) and later

CSCvs78996

The policy manager (PM) may crash when use testapi to delete MO from policymgr db.

4.2(2e) and later

CSCvs81881

The Cisco APIC PSU voltage and amperage values are zero.

4.2(2e) and later

CSCvs81907

SNMP does not respond to GETs or sending traps on one or more Cisco APICs despite previously working properly.

4.2(2e) and later

CSCvs84984

Fault F3243 will be raised when changing the VMM configuration if the VMM domain has already been associated to the EPG, even though the change is not related to the current configuration.

4.2(2e) and later

CSCvs92041

Service Graph rendering fails if a service graph is attached to a unidirectional filter in a contract subject. For example:

filter chain for provider to consumer: use service graph with PBR

filter chain for consumer to provider: no service graph

4.2(2e) and later

CSCvs94915

If a FEX hardware model is N2K-C2348UPQ-10GE, this FEX does not consume a FEX_48_10G license.

4.2(2e) and later

CSCvt00796

The policymgr DME process can crash because of an OOM issue, and there are many pcons.DelRef managed objects in the DB.

4.2(2e) and later

CSCvt01558

A Cisco APIC might report high memory utilization when polling through SNMP.

4.2(2e) and later

CSCvt03360

Zookeeper creates transactions files when the cluster is converging. During long periods of network unreachability, these files may get created at a more frequent rate, leading to space filling up.

4.2(2e) and later

CSCvt07565

The eventmgr database size may grow to be very large (up to 7GB). With that size, the Cisco APIC upgrade will take 1 hour for the Cisco APIC node that contains the eventmgr database.

In rare cases, this could lead to a failed upgrade process, as it times out while working on the large database file of the specified controller.

4.2(2e) and later

CSCvt07825

After removing a configuration from Cisco ACI Multi-Site, the fabric nodes started reloading.

The "show system reset-reason" command shows the following:

Reason: reset-triggered-due-to-ha-policy-of-reset

Service:policy_mgr hap reset

4.2(2e) and later

CSCvt08833

In a transit L3Out, after adding one new static route (a subnet of a summary route) on a border leaf switch, the OSPF summary route disappears from the route table of the border leaf switch because the route is deleted.

4.2(2e) and later

CSCvt13978

VPC protection created in prior to the 2.2(2e) release may not to recover the original virtual IP address after fabric ID recovery. Instead, some of vPC groups get a new vIP allocated, which does not get pushed to the leaf switch. The impact to the dataplane does not come until the leaf switch had a clean reboot/upgrade, because the rebooted leaf switch gets a new virtual IP that is not matched with a vPC peer. As a result, both sides bring down the virtual port channels, then the hosts  behind the vPC become unreachable.

4.2(2e) and later

CSCvt19061

Updating the interface policy group breaks LACP if eLACP is enabled on a VMM domain. If eLACP was enabled on the domain,  Creating, updating, or removing an interface policy group with the VMM AEP deletes the basic LACP that is used by the domain.

4.2(2e) and later

CSCvt28235

Fault F1527 is raised when the /data/log directory is over 75%  full. The /data/log directory contains a large amount of gzipped 21M svc_ifc_licensemgr.bin.warnplus.log files. The /data/log directory does not reach 80% or 90% full.

4.2(2e) and later

CSCvt28411

Fault F0135 is raised when using an AVE VMM domain, stating "Unsupported remote operation detected on EPG: detected in controller: controller-ip with name controller-name in datacenter dc-name in domain vmm-domain-name, error [VLAN is set to none for port group on vcenter but untagged access is not enabled for EPG]"

4.2(2e) and later

CSCvt37066

When migrating an EPG from one VRF table to a new VRF table, and the EPG keeps the contract relation with other EPGs in the original VRF table. Some bridge domain subnets in the original VRF table get leaked to the new VRF table due to the contract relation, even though the contract does not have the global scope and the bridge domain subnet is not configured as shared between VRF tables. The leaked static route is not deleted even if the contract relation is removed.

4.2(2e) and later

CSCvt40736

The login history of local users is not updated in Admin > AAA > Users > (double click on local user) Operational > Session.

4.2(2e) and later

CSCvt44854

- Leaf or spine switch is stuck in 'downloading-boot-script' status. The node never fully registers and does not become active in the fabric.

- You can check the status by running 'cat /mit/sys/summary | grep state' on the CLI of the spine or leaf:

If the state is set to 'downloading-boot-script' for a long period of time (> 5 minutes), you may be running into this issue.

- Checking policy element logs on the spine or leaf switch will confirm if the bootscript file cannot be found on the Cisco APIC:

1. Change directory to /var/log/dme/log.

2. Grep all svc_ifc_policyelem.log files for "downloadUrl - failed, error=HTTP response code said error".

If you see this error message, check to make sure all Cisco APICs have the node bootscript files located in /firmware/fwrepos/fwrepo/boot.

4.2(2e) and later

CSCvt48819

When using the Internet Explore browser, there is console error. This error will break some pages under Fabric -> Inventory -> [ANY POD] -> [ANY LEAF] / [ANY SPINE] -> Interfaces -> Physical, PC, VPC, FC, FC PC.

4.2(2e) and later

CSCvt55566

In the Cisco APIC GUI, after removing the Fabric Policy Group from "System > Controllers > Controller Policies > show usage", the option to select the policy disappears, and there is no way in the GUI to re-add the policy.

4.2(2e) and later

CSCvt67279

After VMware vCenter generates a huge amount of events and after the eventId increments beyond 0xFFFFFFFF, the Cisco APIC VMM manager service may start ignoring the newest event if the eventId is lower than the last biggest event ID that Cisco APIC received. As a result, the changes to virtual distributed switch or AVE would not reflect to the Cisco APIC, causing required policies to not get pushed to the Cisco ACI leaf switch. For AVE, missing those events could put the port in the WAIT_ATTACH_ACK status.

4.2(2e) and later

CSCvt68786

A Cisco ACI Virtual Edge EPG is not programmed on a port channel toward the blade switch after it is deleted and recreated.

4.2(2e) and later

CSCvt87506

SSD lifetime can be exhausted prematurely if unused Standby slot exists

4.2(2e) and later

CSCvt91540

- After decommissioning a fabric node, it is not displayed in the maintenance group configuration anymore.

- Due to the lingering configuration pointing to the decommissioned node, F1300 gets raised with the description:

"A Fabric Node Group (fabricNodeGrp) configuration was not deployed on the fabric node <#> because: Node Not Registered for Node Group Policies"

- The dn mentioned in the fault will point to a maintenance group (maintgrp).

4.2(2e) and later

CSCvt93482

The per feature container for techsupport "objectstore_debug_info" fails to collect on spines due to invalid filepath.

Given filepath: more /debug/leaf/nginx/objstore*/mo | cat

Correct filepath: more /debug/spine/nginx/objstore*/mo | cat

TAC uses this file/data to collect information about excessive DME writes.

4.2(2e) and later

CSCvu01259

AAEP gets deleted while changing some other policy in the policy group. This only happens when using Firefox and changing a value in the leaf access port policy group. The issue is not seen when using other browsers.

4.2(2e) and later

CSCvu01452

The MD5 checksum for the downloaded Cisco APIC images is not verified before adding it to the image repository.

4.2(2e) and later

CSCvu08233

Inside the /firmware/fwrepos/fwrepo/boot directory, there is a Node-0 bootscript that seemingly points to a random leaf SN, depending on the Cisco APIC from which you're viewing the directory.

4.2(2e) and later

CSCvu12092

AVE is not getting the VTEP IP address from the Cisco APIC. The logs show a "pending pool" and "no free leases".

4.2(2e) and later

CSCvu21530

Protocol information is not shown in the GUI when a VRF table from the common tenant is being used in any user tenant.

4.2(2e) and later

CSCvu39569

The following error is encountered when accessing the Infrastructure page in the ACI vCenter plugin after inputting vCenter credentials.

"The Automation SDK is not authenticated"

VMware vCenter plug-in is installed using powerCLI. The following log entry is also seen in vsphere_client_virgo.log on the VMware vCenter:

/var/log/vmware/vsphere-client/log/vsphere_client_virgo.log

[ERROR] http-bio-9090-exec-3314       com.cisco.aciPluginServices.core.Operation

sun.security.validator.ValidatorException: PKIX path validation failed:

java.security.cert.CertPathValidatorException: signature check failed

4.2(2e) and later

CSCvu49644

A tunnel endpoint doesn't receive a DHCP lease. This occurs with a newly deployed or upgraded Cisco ACI Virtual Edge.

4.2(2e) and later

CSCvu50088

When trying to assign a description to a FEX downlink/host port using the Config tab in the Cisco APIC GUI, the description will get applied to the GUI, but it will not propagate to the actual interface when queried using the CLI or GUI.

4.2(2e) and later

CSCvu51617

When changing the SNMP policy from policy1 to policy2 and if policy2 has the same SNMP v3 user configured with a different authentication key, the pod policy reports fault F2194 for all switches. The Cisco APICs in the cluster will accept the new policy; however, the switches in the fabric will not and will continue using the older policy1.

4.2(2e) and later

CSCvu62465

For an EPG containing a static leaf node configuration, the Cisco APIC GUI returns the following error when clicking the health of Fabric Location:

Invalid DN topology/pod-X/node-Y/local/svc-policyelem-id-0/ObservedEthIf, wrong rn prefix ObservedEthIf at position 63

4.2(2e) and later

CSCvu67388

When creating a VMware VMM domain and specifying a custom delimiter using the character _ (underscore), it is rejected, even though the help page says it is an acceptable character.

4.2(2e) and later

CSCvu69932

This product includes a version of Third-party Software that is affected by the vulnerabilities identified by the following Common Vulnerability and Exposures (CVE) IDs: CVE-2020-11022

This bug was opened to address the potential impact on this product.

4.2(2e) and later

CSCvu74478

A prefix with an aggregate entry gets removed from Cisco APIC when downgrading the Cisco APIC from 4.2(5) to an earlier release. Due to this, the route map does not get created on the switches, and so routes are not advertised externally.

4.2(2e) and later

CSCvu74566

There is a BootMgr memory leak on a standby Cisco APIC. If the BootMgr process crashes due to being out of memory, it continues to crash, but system will not be rebooted. After the standby Cisco APIC is rebooted by hand, such as by power cycling the host using CIMC, the login prompt of the Cisco APIC will be changed to localhost and you will not be able to log into the standby Cisco APIC.

4.2(2e) and later

CSCvv18827

The data in the Cisco APIC database may get deleted during an upgrade from a 3.0 or 3.1 release to a 4.0 or 4.1 release if the target release is rolled back to current running release within 2 minutes after the upgrade was started. The upgrade will continue anyway, but the Cisco APIC will lose all data in the database and a user with admin credentials cannot log in. Only the rescue-user/admin can log in.  All shards for a process show as unexpected, and the database files are removed. The last working pre-upgrade database files are copied to the purgatory directory.

4.2(2e) and later

CSCvv21442

The Cisco APIC does not allow an upgrade to be cancelled. Rolling back the target version after an upgrade is started does not stop the upgrade and may cause Cisco APIC database loss. This enhancement is filed to block a Cisco APIC target version change unless the following conditions are met:

1. All Cisco APICs are online and the cluster is fully fit.

2. The upgrade job (maintUpgJob) for all Cisco APICs are completed.

3. The Installer.py process is not running on any of the Cisco APICs.

4.2(2e) and later

CSCvv25475

After a delete/add of a Cisco ACI-managed DVS, dynamic paths are not programmed on the leaf switch and the compRsDlPol managed object has a missing target. The tDn property references the old DVS OID instead of the latest value.# moquery -c compRsDlPol

4.2(2e) and later

CSCvv28749

A bridge domain subnet is explicitly marked as public. The same EPG subnet has the shared flag enabled and has an implicit private scope. The private scope should take precedence over the public scope and should not get advertised. However, the bridge domain subnet does get advertised through the L3Out.

4.2(2e) and later

CSCvv30303

The configuration of a bridge domain subnet scope as "public" and an EPG scope as "private" should not be allowed.

4.2(2e) and later

CSCvv41784

EIGRP summary routes are not advertised from one of the many interfaces under same interface profile.

4.2(2e) and later

CSCvv62861

A leaf switch reloads due to an out-of-memory condition after changing the contract scope to global.

4.2(2e) and later

CSCvv87993

Some configuration is missing on a switch node due to the corresponding policies not being pushed to the switch from the Cisco APIC. This may manifest as a vast variety of symptoms depending on which particular policies weren't pushed.

4.2(2e) and later

CSCvw05302

+ ACI reports fault F1419.

+ The processes show process ID zero from the scheduler.

+ The processes are actually running when checked using systemctl with root access.

4.2(2e) and later

CSCvw33061

Traffic loss is observed from multiple endpoints deployed on two different vPC leaf switches.

4.2(2e) and later

CSCvw69692

If a service graph gets attached to the inter-VRF contract after it was already attached to the intra-VRF contract, the pctag for the shadow EPG gets reprogrammed with a global value. The zoning-rule entries that matched the previous pctag as the source and EPG1 and EPG2 as the destination do not get reprogrammed and they remain in a stale status in the table.

Traffic between EPG1 and EPG2 gets broken as the packets flowing from the PBR get classified with the new global pctag.

4.2(2e) and later

CSCvy30453

For a Cisco ACI fabric that is configured with fabricId=1, if APIC3 is replaced from scratch with an incorrect fabricId of "2," APIC3's DHCPd will set the nodeRole property to "0" (unsupported) for all dhcpClient managed objects. This will be propagated to the appliance director process for all of the Cisco APICs. The process then stops sending the AV/FNV update for any unknown switch types (switches that are not spine nor leaf switches). In this scenario, commissioning/decommissioning of the Cisco APICs will not be propagated to the switches, which causes new Cisco APICs to be blocked out of the fabric.

Another symptom is that the "acidag fnvread" command's output has a value of "unknown" in the role column.

4.2(2e) and later

CSCwc66053

Preconfiguration validations for L3Outs that occur whenever a new configuration is pushed to the Cisco APIC might not get triggered.

4.2(2e) and later

Resolved Bugs

This section lists the resolved bugs. Click the bug ID to access the Bug Search tool and see additional information about the bug. The "Fixed In" column of the table specifies whether the bug was resolved in the base release or a patch release.

Table 4 Resolved Bugs in This Release

Bug ID

Description

Fixed in

CSCvd43548

The stats for a given leaf switch rule cannot be viewed if a rule is double-clicked.

4.2(2e)

CSCvf70411

A route will be advertised, but will not contain the tag value that is set from the VRF route tag policy.

4.2(2e)

CSCvh59843

Enabling Multicast under the VRF on one or more bridge domains is difficult due to how the drop-down menu is designed. This is an enhancement request to make the drop-down menu searchable.

4.2(2e)

CSCvi82903

When authenticating with the Cisco APIC using ISE (TACACS), all logins over 31 characters fail.

4.2(2e)

CSCvq31052

Log3 is sometimes missing from  the switch techsupport logs on the APIC when selecting the controller as the export destination.

4.2(2e)

CSCvq86573

Under a corner case, the Cisco APIC cluster DB may become partially diverged after upgrading to a release that introduces new services. A new release that introduces a new DME service (such as the domainmgr in the 2.3 release) could fail to receive the full size shard vector update in first two-minute window, which causes the new service flag file to be removed before all local leader shards are able to boot into the green field mode. This results in the Cisco APIC cluster DB becoming partially diverged.

4.2(2e)

CSCvq89967

An OSPF L3Out with a check in the BGP check box is missing the redistribute route-map.

4.2(2e)

CSCvq92628

If you downgrade from a 4.2 release to a 4.1 release or from a 4.2 release to a 4.0 release with the PIM v6 checkbox enabled, and then you upgrade to 4.2, the PIM v6 interface will not be created.

4.2(2e)

CSCvq95817

The F3083 fault is thrown, notifying the user that an IP address is being used by multiple MAC addresses.

When navigating to the Fabric -> Inventory -> Duplicate IP Usage section, AVS VTEP IP addresses are seen as being learned individually across multiple leaf switches, such as 1 entry for Leaf 101, and 1 entry for Leaf 102.

Querying for the endpoint in the CLI of the leaf switch ("show endpoint ip <IP>") shows that the endpoint is learned behind a port channel/vPC, and not an individual link.

4.2(2e)

CSCvq97675

A service cannot be reached by using the APIC out-of-band management that exists within the 172.17.0.0/16 sub-net. This enhancement request implements the GUI option to change the Docker0 IP address. Bug CSCve84297 implements REST API way to change it.

4.2(2e)

CSCvr10510

There is a stale F2736 fault after configuring in-band IP addresses with the out-of-band IP addresses for the Cisco APIC.

4.2(2e)

CSCvr43275

While configuring a node in-band address using a wizard  or configuring a subnet under the bridge domain (tenant > bridge domain > subnet), and "x.x.x.0/subnet" is chosen as the range, the following message displays:

Incorrect message " Error 400 - Broadcast IP x.x.x.0/subnet" during inband config

4.2(2e)

Known Behaviors

This section lists bugs that describe known behaviors. Click the Bug ID to access the Bug Search Tool and see additional information about the bug. The "Exists In" column of the table specifies the 4.2(2) releases in which the known behavior exists. A bug might also exist in releases other than the 4.2(2) releases.

Table 5 Known Behaviors in This Release

Bug ID

Description

Exists in

CSCvj26666

The "show run leaf|spine <nodeId>" command might produce an error for scaled up configurations.

4.2(2e) and later

CSCvj90385

With a uniform distribution of EPs and traffic flows, a fabric module in slot 25 sometimes reports far less than 50% of the traffic compared to the traffic on fabric modules in non-FM25 slots.

4.2(2e) and later

CSCvq39764

When you click Restart for the Microsoft System Center Virtual Machine Manager (SCVMM) agent on a scaled-out setup, the service may stop. You can restart the agent by clicking Start.

4.2(2e) and later

CSCvq58953

One of the following symptoms occurs:

■        App installation/enable/disable takes a long time and does not complete.

■        Nomad leadership is lost. The output of the acidiag scheduler logs members command contains the following error:

Error querying node status: Unexpected response code: 500 (rpc error: No cluster leader)

4.2(2e) and later

CSCvs19322

Upgrading Cisco APIC from a 3.x release to a 4.x release causes Smart Licensing to lose its registration. Registering Smart Licensing again will clear the fault.

4.2(2e) and later

CSCvs77929

In the 4.x and later releases, if a firmware policy is created with different name than the maintenance policy, the firmware policy will be deleted and a new firmware policy gets created with the same name, which causes the upgrade process to fail.

4.2(2e) and later

■        Beginning in Cisco APIC release 4.1(1), the IP SLA monitor policy validates the IP SLA port value. Because of the validation, when TCP is configured as the IP SLA type, Cisco APIC no longer accepts an IP SLA port value of 0, which was allowed in previous releases. An IP SLA monitor policy from a previous release that has an IP SLA port value of 0 becomes invalid if the Cisco APIC is upgraded to release 4.1(1) or later. This results in a failure for the configuration import or snapshot rollback.

The workaround is to configure a non-zero IP SLA port value before upgrading the Cisco APIC, and use the snapshot and configuration export that was taken after the IP SLA port change.

■        If you use the REST API to upgrade an app, you must create a new firmware.OSource to be able to download a new app image.

■        In a multipod configuration, before you make any changes to a spine switch, ensure that there is at least one operationally "up" external link that is participating in the multipod topology. Failure to do so could bring down the multipod connectivity. For more information about multipod, see the Cisco Application Centric Infrastructure Fundamentals document and the Cisco APIC Getting Started Guide.

■        With a non-english SCVMM 2012 R2 or SCVMM 2016 setup and where the virtual machine names are specified in non-english characters, if the host is removed and re-added to the host group, the GUID for all the virtual machines under that host changes. Therefore, if a user has created a micro segmentation endpoint group using "VM name" attribute specifying the GUID of respective virtual machine, then that micro segmentation endpoint group will not work if the host (hosting the virtual machines) is removed and re-added to the host group, as the GUID for all the virtual machines would have changed. This does not happen if the virtual name has name specified in all english characters.

■        A query of a configurable policy that does not have a subscription goes to the policy distributor. However, a query of a configurable policy that has a subscription goes to the policy manager. As a result, if the policy propagation from the policy distributor to the policy manager takes a prolonged amount of time, then in such cases the query with the subscription might not return the policy simply because it has not reached policy manager yet.

■        When there are silent hosts across sites, ARP glean messages might not be forwarded to remote sites if a leaf switch without -EX or a later designation in the product ID happens to be in the transit path and the VRF is deployed on that leaf switch, the switch does not forward the ARP glean packet back into the fabric to reach the remote site. This issue is specific to transit leaf switches without -EX or a later designation in the product ID and does not affect leaf switches that have -EX or a later designation in the product ID. This issue breaks the capability of discovering silent hosts.

Compatibility Information

The following sections list compatibility information for the Cisco APIC software.

Virtualization Compatibility Information

This section lists virtualization compatibility information for the Cisco APIC software.

■        For a table that shows the supported virtualization products, see the ACI Virtualization Compatibility Matrix.

■        This release supports VMM Integration and VMware Distributed Virtual Switch (DVS) 6.5 and 6.7. For more information about guidelines for upgrading VMware DVS from 5.x to 6.x and VMM integration, see the Cisco ACI Virtualization Guide, Release 4.2(x).

■        For information about Cisco APIC compatibility with Cisco UCS Director, see the appropriate Cisco UCS Director Compatibility Matrix document at the following URL:

https://www.cisco.com/c/en/us/support/servers-unified-computing/ucs-director/products-device-support-tables-list.html

Hardware Compatibility Information

This release supports the following Cisco APIC servers:

Product ID

Description

APIC-L1

Cisco APIC with large CPU, hard drive, and memory configurations (more than 1000 edge ports)

APIC-L2

Cisco APIC with large CPU, hard drive, and memory configurations (more than 1000 edge ports)

APIC-L3

Cisco APIC with large CPU, hard drive, and memory configurations (more than 1200 edge ports)

APIC-M1

Cisco APIC with medium-size CPU, hard drive, and memory configurations (up to 1000 edge ports)

APIC-M2

Cisco APIC with medium-size CPU, hard drive, and memory configurations (up to 1000 edge ports)

APIC-M3

Cisco APIC with medium-size CPU, hard drive, and memory configurations (up to 1200 edge ports)

The following list includes additional hardware compatibility information:

■        For the supported hardware, see the Cisco Nexus 9000 ACI-Mode Switches Release Notes, Release 14.2(2).

■        To connect the N2348UPQ to Cisco ACI leaf switches, the following options are available:

—      Directly connect the 40G FEX ports on the N2348UPQ to the 40G switch ports on the Cisco ACI leaf switches

—      Break out the 40G FEX ports on the N2348UPQ to 4x10G ports and connect to the 10G ports on all other Cisco ACI leaf switches.

Note: A fabric uplink port cannot be used as a FEX fabric port.

■        The Cisco UCS M5-based Cisco APIC supports dual speed 10G and 25G interfaces. The Cisco UCS M4-based Cisco APIC and previous versions support only the 10G interface. Connecting the Cisco APIC to the Cisco ACI fabric requires a same speed interface on the Cisco ACI leaf switch. You cannot connect the Cisco APIC directly to the Cisco N9332PQ ACI leaf switch, unless you use a 40G to 10G converter (part number CVR-QSFP-SFP10G), in which case the port on the Cisco N9332PQ switch auto-negotiate to 10G without requiring any manual configuration.

■        The Cisco N9K-X9736C-FX (ports 29 to 36) and Cisco N9K-C9364C-FX (ports 49-64) switches do not support 1G SFPs with QSA.

■        Cisco N9K-C9508-FM-E2 fabric modules must be physically removed before downgrading to releases earlier than Cisco APIC 3.0(1).

■        The Cisco N9K-C9508-FM-E2 and N9K-X9736C-FX locator LED enable/disable feature is supported in the GUI and not supported in the Cisco ACI NX-OS Switch CLI.

■        Contracts using matchDscp filters are only supported on switches with "EX" on the end of the switch name. For example, N9K-93108TC-EX.

■        N9K-C9508-FM-E2 and N9K-C9508-FM-E fabric modules in the mixed mode configuration are not supported on the same spine switch.

■        The N9K-C9348GC-FXP switch does not read SPROM information if the PSU is in a shut state. You might see an empty string in the Cisco APIC output.

■        When the fabric node switch (spine or leaf) is out-of-fabric, the environmental sensor values, such as Current Temperature, Power Draw, and Power Consumption, might be reported as "N/A." A status might be reported as "Normal" even when the Current Temperature is "N/A."

■        First generation switches (switches without -EX, -FX, -GX, or a later suffix in the product ID) do not support Contract filters with match type "IPv4" or "IPv6." Only match type "IP" is supported. Because of this, a contract will match both IPv4 and IPv6 traffic when the match type of "IP" is used.

Adaptive Security Appliance (ASA) Compatibility Information

This section lists ASA compatibility information for the Cisco APIC software.

■        This release supports Adaptive Security Appliance (ASA) device package version 1.2.5.5 or later.

■        If you are running a Cisco Adaptive Security Virtual Appliance (ASA) version that is prior to version 9.3(2), you must configure SSL encryption as follows:

(config)# ssl encryption aes128-sha1

Miscellaneous Compatibility Information

This section lists miscellaneous compatibility information for the Cisco APIC software.

■        This release supports the following software:

—      Cisco NX-OS Release 14.2(2)

—      Cisco AVS, Release 5.2(1)SV3(4.10)

For more information about the supported AVS releases, see the AVS software compatibility information in the Cisco AVS Release Notes, Release 5.2(1)SV3(4.10).

—      Cisco UCS Manager software release 2.2(1c) or later is required for the Cisco UCS Fabric Interconnect and other components, including the BIOS, CIMC, and the adapter.

—      Network Insights Base, Network Insights Advisor, and Network Insights for Resources

For the release information, documentation, and download links, see the Cisco Network Insights for Data Center page. For the supported releases, see the Cisco Day-2 Operations Apps Support Matrix

■        This release supports the following firmware:

—      4.2(3j) CIMC HUU ISO (recommended) for UCS C220/C240 M5 (APIC-L3/M3)

—      4.2(3e) CIMC HUU ISO for UCS C220/C240 M5 (APIC-L3/M3)

—      4.2(3b) CIMC HUU ISO for UCS C220/C240 M5 (APIC-L3/M3)

—      4.2(2a) CIMC HUU ISO for UCS C220/C240 M5 (APIC-L3/M3)

—      4.1(3m) CIMC HUU ISO for UCS C220/C240 M5 (APIC-L3/M3)

—      4.1(3f) CIMC HUU ISO for UCS C220/C240 M5 (APIC-L3/M3)

—      4.1(3d) CIMC HUU ISO for UCS C220/C240 M5 (APIC-L3/M3)

—      4.1(3c) CIMC HUU ISO for UCS C220/C240 M5 (APIC-L3/M3)

—      4.1(2m) CIMC HUU ISO (recommended) for UCS C220/C240 M4 (APIC-L2/M2)

—      4.1(2k) CIMC HUU ISO for UCS C220/C240 M4 (APIC-L2/M2)

—      4.1(2g) CIMC HUU ISO for UCS C220/C240 M4 (APIC-L2/M2)

—      4.1(2b) CIMC HUU ISO for UCS C220/C240 M4 (APIC-L2/M2)

—      4.1(1g) CIMC HUU ISO for UCS C220/C240 M4 (APIC-L2/M2) and M5 (APIC-L3/M3)

—      4.1(1f) CIMC HUU ISO for UCS C220 M4 (APIC-L2/M2) (deferred release)

—      4.1(1d) CIMC HUU ISO for UCS C220 M5 (APIC-L3/M3)

—      4.1(1c) CIMC HUU ISO for UCS C220 M4 (APIC-L2/M2)

—      4.0(4e) CIMC HUU ISO for UCS C220 M5 (APIC-L3/M3)

—      4.0(2g) CIMC HUU ISO for UCS C220/C240 M4 and M5 (APIC-L2/M2 and APIC-L3/M3)

—      4.0(1a) CIMC HUU ISO for UCS C220 M5 (APIC-L3/M3)

—      3.0(4l) CIMC HUU ISO (recommended) for UCS C220/C240 M3 (APIC-L1/M1)

—      3.0(4d) CIMC HUU ISO for UCS C220/C240 M3 and M4 (APIC-L1/M1 and APIC-L2/M2)

—      3.0(3f) CIMC HUU ISO for UCS C220/C240 M4 (APIC-L2/M2)

—      3.0(3e) CIMC HUU ISO for UCS C220/C240 M3 (APIC-L1/M1)

—      2.0(13i) CIMC HUU ISO

—      2.0(9c) CIMC HUU ISO

—      2.0(3i) CIMC HUU ISO

■        This release supports the partner packages specified in the L4-L7 Compatibility List Solution Overview document.

■        A known issue exists with the Safari browser and unsigned certificates, which applies when connecting to the Cisco APIC GUI. For more information, see the Cisco APIC Getting Started Guide, Release 4.2(x).

■        For compatibility with OpenStack and Kubernetes distributions, see the Cisco Application Policy Infrastructure Controller Container Plugins Release 4.2(2), Release Notes.

■        For compatibility with Day-2 Operations apps, see the Cisco Day-2 Operations Apps Support Matrix.

Usage Guidelines

The following sections list usage guidelines for the Cisco APIC software.

Virtualization Compatibility Guidelines

This section lists virtualization-related usage guidelines for the Cisco APIC software.

■        Do not separate virtual port channel (vPC) member nodes into different configuration zones. If the nodes are in different configuration zones, then the vPCs’ modes become mismatched if the interface policies are modified and deployed to only one of the vPC member nodes.

■        If you are upgrading VMware vCenter 6.0 to vCenter 6.7, you should first delete the following folder on the VMware vCenter: C:\ProgramData\cisco_aci_plugin.

If you do not delete the folder and you try to register a fabric again after the upgrade, you will see the following error message:

Error while saving setting in C:\ProgramData\cisco_aci_plugin\<user>_<domain>.properties.

The user is the user that is currently logged in to the vSphere Web Client, and domain is the domain to which the user belongs. Although you can still register a fabric, you do not have permissions to override settings that were created in the old VMware vCenter. Enter any changes in the Cisco APIC configuration again after restarting VMware vCenter.

■        If the communication between the Cisco APIC and VMware vCenter is impaired, some functionality is adversely affected. The Cisco APIC relies on the pulling of inventory information, updating VDS configuration, and receiving event notifications from the VMware vCenter for performing certain operations.

■        After you migrate VMs using a cross-data center VMware vMotion in the same VMware vCenter, you might find a stale VM entry under the source DVS. This stale entry can cause problems, such as host removal failure. The workaround for this problem is to enable "Start monitoring port state" on the vNetwork DVS. See the KB topic "Refreshing port state information for a vNetwork Distributed Virtual Switch" on the VMware Web site for instructions.

■        When creating a vPC domain between two leaf switches, both switches either must not have -EX or a later designation in the product ID or must have -EX or a later designation in the product ID.

■        The following Red Hat Virtualization (RHV) guidelines apply:

—      We recommend that you use release 4.1.6 or later.

—      Only one controller (compCtrlr) can be associated with a Red Hat Virtualization Manager (RHVM) data center.

—      Deployment immediacy is supported only as pre-provision.

—      IntraEPG isolation, micro EPGs, and IntraEPG contracts are not supported.

—      Using service nodes inside a RHV domain have not been validated.

GUI Guidelines

This section lists GUI-related usage guidelines for the Cisco APIC software.

■        The Cisco APIC GUI includes an online version of the Quick Start Guide that includes video demonstrations.

■        To reach the Cisco APIC CLI from the GUI: choose System > Controllers, highlight a controller, right-click, and choose "launch SSH". To get the list of commands, press the escape key twice.

■        When using the APIC GUI to configure an integration group, you cannot specify the connection URL (connUrl). You can only specify the connection URL by using the REST API.

■        The Basic GUI mode is deprecated. We do not recommend using Cisco APIC Basic mode for configuration. However, if you want to use Cisco APIC Basic mode, use the following URL:

APIC_URL/indexSimple.html

CLI Guidelines

This section lists CLI-related usage guidelines for the Cisco APIC software.

■        The output from show commands issued in the NX-OS-style CLI are subject to change in future software releases. We do not recommend using the output from the show commands for automation.

■        The CLI is supported only for users with administrative login privileges.

■        If FIPS is enabled in the Cisco ACI setups, then SHA256 support is mandatory on the SSH Client. Additionally, to have the SHA256 support, the openssh-client must be running version 6.6.1 or higher.

■        When using the APIC CLI to configure an integration group, you cannot specify the connection URL (connUrl). You can only specify the connection URL by using the REST API.

Layer 2 and Layer 3 Configuration Guidelines

This section lists Layer 2 and Layer 3-related usage guidelines for the Cisco APIC software.

■        For Layer 3 external networks created through the API or GUI and updated through the CLI, protocols need to be enabled globally on the external network through the API or GUI, and the node profile for all the participating nodes needs to be added through the API or GUI before doing any further updates through the CLI.

■        When configuring two Layer 3 external networks on the same node, the loopbacks need to be configured separately for both Layer 3 networks.

■        All endpoint groups (EPGs), including application EPGs and Layer 3 external EPGs, require a domain. Interface policy groups must also be associated with an Attach Entity Profile (AEP), and the AEP must be associated with domains. Based on the association of EPGs to domains and of the interface policy groups to domains, the ports VLANs that the EPG uses are validated. This applies to all EPGs including bridged Layer 2 outside and routed Layer 3 outside EPGs. For more information, see the Cisco APIC Layer 2 Networking Configuration Guide.

Note: When creating static paths for application EPGs or Layer 2/Layer 3 outside EPGs, the physical domain is not required. Upgrading without the physical domain raises a fault on the EPG stating "invalid path configuration."

■        In a multipod fabric, if a spine switch in POD1 uses the infra tenant L3extOut-1, the TORs of the other pods (POD2, POD3) cannot use the same infra L3extOut (L3extOut-1) for Layer 3 EVPN control plane connectivity. Each POD must use its own spine switch and infra L3extOut.

■        You do not need to create a customized monitoring policy for each tenant. By default, a tenant shares the common policy under tenant common. The Cisco APIC automatically creates a default monitoring policy and enables common observable. You can modify the default policy under tenant common based on the requirements of your fabric.

■        The Cisco APIC does not provide IPAM services for tenant workloads.

■        Do not mis-configure Control Plane Policing (CoPP) pre-filter entries. CoPP pre-filter entries might impact connectivity to multi-pod configurations, remote leaf switches, and Cisco ACI Multi-Site deployments.

IP Address Guidelines

This section lists IP address-related usage guidelines for the Cisco APIC software.

■        For the following services, use a DNS-based hostname with out-of-band management connectivity. IP addresses can be used with both in-band and out-of-band management connectivity.

—      Syslog server

—      Call Home SMTP server

—      Tech support export server

—      Configuration export server

—      Statistics export server

■        The infrastructure IP address range must not overlap with other IP addresses used in the fabric for in-band and Out-of-band networks.

■        If an IP address is learned on one of two endpoints for which you are configuring an atomic counter policy, you should use an IP-based policy and not a client endpoint-based policy.

■        A multipod deployment requires the 239.255.255.240 system Global IP Outside (GIPo) to be configured on the inter-pod network (IPN) as a PIM BIDIR range. This 239.255.255.240 PIM BIDIR range configuration on the IPN devices can be avoided by using the Infra GIPo as System GIPo feature. The Infra GIPo as System GIPo feature must be enabled only after upgrading all of the switches in the Cisco ACI fabric, including the leaf switches and spine switches, to the latest Cisco APIC release.

■        Cisco ACI does not support a class E address as a VTEP address.

Miscellaneous Guidelines

This section lists miscellaneous usage guidelines for the Cisco APIC software.

■        User passwords must meet the following criteria:

—      Minimum length is 8 characters

—      Maximum length is 64 characters

—      Fewer than three consecutive repeated characters

—      At least three of the following character types: lowercase, uppercase, digit, symbol

—      Cannot be easily guessed

—      Cannot be the username or the reverse of the username

—      Cannot be any variation of "cisco", "isco", or any permutation of these characters or variants obtained by changing the capitalization of letters therein

■        In some of the 5-minute statistics data, the count of ten-second samples is 29 instead of 30.

■        The power consumption statistics are not shown on leaf node slot 1.

■        If you defined multiple login domains, you can choose the login domain that you want to use when logging in to a Cisco APIC. By default, the domain drop-down list is empty, and if you do not choose a domain, the DefaultAuth domain is used for authentication. This can result in login failure if the username is not in the DefaultAuth login domain. As such, you must enter the credentials based on the chosen login domain.

■        A firmware maintenance group should contain a maximum of 80 nodes.

■        When contracts are not associated with an endpoint group, DSCP marking is not supported for a VRF with a vzAny contract. DSCP is sent to a leaf switch along with the actrl rule, but a vzAny contract does not have an actrl rule. Therefore, the DSCP value cannot be sent.

■        The Cisco APICs must have 1 SSD and 2 HDDs, and both RAID volumes must be healthy before upgrading to this release. The Cisco APIC will not boot if the SSD is not installed.

■        In a multipod fabric setup, if a new spine switch is added to a pod, it must first be connected to at least one leaf switch in the pod. Then the spine switch is able to discover and join the fabric.

Caution: If you install 1-Gigabit Ethernet (GE) or 10GE links between the leaf and spine switches in the fabric, there is risk of packets being dropped instead of forwarded, because of inadequate bandwidth. To avoid the risk, use 40GE or 100GE links between the leaf and spine switches.

■        For a Cisco APIC REST API query of event records, the Cisco APIC system limits the response to a maximum of 500,000 event records. If the response is more than 500,000 events, it returns an error. Use filters to refine your queries. For more information, see Cisco APIC REST API Configuration Guide, Release 4.2(x).

■        Subject Alternative Names (SANs) contain one or more alternate names and uses any variety of name forms for the entity that is bound by the Certificate Authority (CA) to the certified public key. These alternate names are called "Subject Alternative Names" (SANs). Possible names include:

—      DNS name

—      IP address

■        If a node has port profiles deployed on it, some port configurations are not removed if you decommission the node. You must manually delete the configurations after decommissioning the node to cause the ports to return to the default state. To do this, log into the switch, run the setup-clean-config.sh script, wait for the script to complete, then enter the reload command.

■        When using the SNMP trap aggregation feature, if you decommission Cisco APICs, the trap forward server will receive redundant traps.

■        If you upgraded from a release prior to the 3.2(1) release and you had any apps installed prior to the upgrade, the apps will no longer work. To use the apps again, you must uninstall and reinstall them.

■        Connectivity filters were deprecated in the 3.2(4) release. Feature deprecation implies no further testing has been performed and that Cisco recommends removing any and all configurations that use this feature. The usage of connectivity filters can result in unexpected access policy resolution, which in some cases will lead to VLANs being removed/reprogrammed on leaf interfaces. You can search for the existence of any connectivity filters by using the moquery command on the APIC:

> moquery -c infraConnPortBlk

> moquery -c infraConnNodeBlk

> moquery -c infraConnNodeS

> moquery -c infraConnFexBlk

> moquery -c infraConnFexS

■        Fabric connectivity ports can operate at 10G or 25G speeds (depending on the model of the APIC server) when connected to leaf switch host interfaces.  We recommend connecting two fabric uplinks, each to a separate leaf switch or vPC leaf switch pair.

For APIC-M3/L3, virtual interface card (VIC) 1445 has four ports (port-1, port-2, port-3, and port-4 from left to right). Port-1 and port-2 make a single pair corresponding to eth2-1 on the APIC server; port-3 and port-4 make another pair corresponding to eth2-2 on the APIC server. Only a single connection is allowed for each pair. For example, you can connect one cable to either port-1 or port-2 and another cable to either port-3 or port-4, but not 2 cables to both ports on the same pair. Connecting 2 cables to both ports on the same pair creates instability in the APIC server. All ports must be configured for the same speed: either 10G or 25G.

■        When you create an access port selector in a leaf interface rofile, the fexId property is configured with a default value of 101 even though a FEX is not connected and the interface is not a FEX interface. The fexId property is only used when the port selector is associated with an infraFexBndlGrp managed object.

Related Documentation

The Cisco Application Policy Infrastructure Controller (APIC) documentation can be accessed from the following website:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

The documentation includes installation, upgrade, configuration, programming, and troubleshooting guides, technical references, release notes, and knowledge base (KB) articles, as well as other documentation. KB articles provide information about a specific use case or a specific topic.

By using the "Choose a topic" and "Choose a document type" fields of the APIC documentation website, you can narrow down the displayed documentation list to make it easier to find the desired document.

The following list provides links to the release notes documentation:

■        Verified Scalability Guide for Cisco APIC, Release 4.2(2), Multi-Site, Release 2.2(2), and Cisco Nexus 9000 Series ACI-Mode Switches, Release 14.2(2)

■        Cisco Application Centric Infrastructure Simulator Release Notes, Release 4.2(2)

■        Cisco Nexus 9000 ACI-Mode Switches Release Notes, Release 14.2(2)

■        Cisco Application Policy Infrastructure Controller OpenStack Plug-in Release Notes, Release 4.2(2)

■        Cisco Application Policy Infrastructure Controller Container Plug-ins Release Notes, Release 4.2(2)

New Documentation

This section lists the new Cisco ACI product documents for this release.

■        Cisco ACI Virtual Edge Configuration Guide, Release 2.2(1a)

■        Cisco ACI Virtual Edge Release Notes, Release 2.2(1a)

■        Cisco ACI Virtual Pod Release Notes, Release 4.2(2e)

■        Cisco AVS Release Notes, Release 5.2(1)SV3(4.10)

You can find these documents on the following website:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2019-2023 Cisco Systems, Inc. All rights reserved.