Cisco Network Insights Advisor Application for the Cisco APIC Release Notes, Release 2.1.2

Cisco Network Insights Advisor (NIA) application consists of a monitoring utility that are added to the Cisco Application Policy Infrastructure Controller (APIC).

This document describes the features, issues, and limitations for Cisco NIA on the Cisco APIC.

For more information, see Related Content.

Date

Description

Oct 2 2020

Release 2.1.2 became available.

Contents

■      New Software Features

■      Open Issues

■      Resolved Issues

■      Hardware Requirements

■      Compatibility Information

■      Verified Scalability Limits

■      Usage Guidelines and Limitations

■      Related Content

■      Documentation Feedback

■      Legal Information

New Software Features

Feature

Description

Bug fixes

This release includes bug fixes.

Open Issues

This section lists the open issues in this release. Click the bug ID to access the Bug Search tool and see additional information about the issue. The “Exists In” column of the table specifies the releases in which the issue exists.

Bug ID

Description

Exists In

CSCvs95691

Some fixed bugs may appear under the advisory details section of the Call TAC advisory.

2.1.2

CSCvu84352

Bug scan borg partial failure in a resource intensive scale environment.

2.1.2

CSCvv77014

Cisco NIA allows onboarding of third party sites without any devices being discovered.

2.1.2

Resolved Issues

This section lists the resolved issues in this release. Click the bug ID to access the Bug Search tool and see additional information about the issue. The “Fixed In” column of the table specifies the releases in which the issue exists.

Bug ID

Description

Fixed In

CSCvs12558

Cisco NIA app GUI displays that the Device Connector is not connected.

Cisco APIC Release 4.2(4i)

CSCvv06057

Onboarding Cisco NIA fails when a third party site is added to Cisco Application Services Engine.

Cisco NIA 2.1.2

CSCvv38928

Cisco NIA bug scan for a setup with 100 nodes and Cisco NIR for 10000 flows per second and Cisco NAE scan running together creates missing nodes in Cisco NIR app.

Cisco NIA 2.1.2

CSCvv71541

Cisco NIA bug scan CPU and memory thresholds increased from 50% to 65%.

Cisco NIA 2.1.2

Hardware Requirements

This table describes the Cisco APIC LAN deployment requirements for Cisco NIA software telemetry.

Hardware

Cisco NIA installed in Cisco Application Services Engine cluster connected to Cisco ACI fabric

Cisco NIA installed in Cisco APIC cluster

APIC-CLUSTER-M1

Yes

No

APIC-CLUSTER-M2

Yes

No

APIC-CLUSTER-M3

Yes

Yes (Maximum 20 ACI fabric nodes)

APIC-CLUSTER-L1

Yes

No

APIC-CLUSTER-L2

Yes

No

APIC-CLUSTER-L3

Yes

Yes (Maximum 20 ACI fabric nodes)

In the Lab environment you can  install Cisco NIA app on APIC-CLUSTER-M1/M2 or APIC-CLUSTER-L1/L2. We do not recommend installing Cisco NIA app on APIC-CLUSTER-M1/M2 or APIC-CLUSTER-L1/L2  in the production environment.

Compatibility Information

For Cisco NIA on Cisco APIC and Cisco NIA on Cisco Application Services Engine compatibility with Day-2 Operations apps, see the Cisco Day-2 Operations Apps Support Matrix.

Software/Hardware

Release or PID

Cisco Application Services Engine cluster

SE-CL-L3

Minimum Intersight Device Connector version on Cisco APIC

1.0.9-989

Minimum Intersight Device Connector version on Cisco Application Services Engine

1.0.9-461

Devices supported

Cisco Nexus 9000 series switches

Verified Scalability Limits

Software/Hardware

Number

Fabrics supported for Cisco NIA on Cisco Application Services Engine

8

Fabric nodes supported for Cisco NIA on Cisco APIC

20

Fabric nodes supported for Cisco NIA on Cisco Application Services Engine

500

Maximum support for a 3-node Cisco Application Services Engine cluster

Fabric with 100 nodes

Maximum support for a 6-node Cisco Application Services Engine cluster

Fabric with 500 nodes

Usage Guidelines and Limitations

■      Upgrade from Cisco NIA 2.1.1 to Cisco NIA 2.1.2. App is supported.

■      Cisco NIA checks for metadata update every hour. However, there may not be an update every time.

■      When the Device Connector is unclaimed from the on-premise GUI application, the Device Connector must be unclaimed from Intersight for TAC Assit’s connected TAC functionality to work.

■      TAC Assist started from Cisco NIA 2.1.2 App will not show up in Cisco NI Base and vice versa.

Related Content

The Cisco Network Insights Advisor documentation can be accessed from the following website:

https://www.cisco.com /c/en/us/support/data - center- analytics/network - insights- advisor/model.html

The documentation includes installation, upgrade, configuration, technical references, and release notes, as well as other documentation.

Document

Description

Cisco Network Insights Advisor Application for the Cisco APIC Release Notes

This document.

Cisco Network Insights Advisor Application for the Cisco APIC User Guide

Describes how to download, install, and set up Cisco Network Insights Advisor application in Cisco APIC.

Documentation Feedback

To provide technical feedback on this document, or to report an error or omission, send your comments to cisconetworkinsights - docfeedback@cisco.com.

Legal Information

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a   list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third- party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2020 Cisco Systems, Inc. All rights reserved.