Cisco Network Insights Base Application for the Cisco APIC Release Notes, Release 2.0.1

Cisco Network Insights Base (NI Base) application consists of a monitoring utility that are added to the Cisco Application Policy Infrastructure Controller (APIC).

This document describes the features, issues, and limitations for Cisco Network Insights Base on the Cisco APIC.

For more information, see Related Content.

Date

Description

Mar 27, 2020

Compatibility information for Cisco NI Base.

Dec 23, 2019

Release 2.0.1 became available.

Contents

■       New Software Features

■       Open Issues

■       Resolved Issues

■       Compatibility Information

■       Verified Scalability Limits

■       Related Content

■       Documentation Feedback

■       Legal Information

New Software Features

Feature

Description

TAC Assist

A TAC Assist job collects logs for specified devices and lets the user upload the logs to the cloud.

Enhanced TAC Assist

Enhanced TAC Assist triggered by TAC Assist enables collection of logs for specified devices and uploads the logs to cloud.

Cisco Network Insights Base Application

Cisco Network Insights Base is available on Cisco APIC.

Open Issues

This section lists the open issues in this release. Click the bug ID to access the Bug Search tool and see additional information about the caveat. The “Exists In” column of the table specifies the releases in which the issue exists.

Bug ID

Description

Exists In

CSCvs12558

Cisco NIA app GUI displays that the Device Connector is not connected.

2.0.1

CSCvs53825

When Device Connector is unclaimed from fabric, you will have to delete the claim from Intersight.

2.0.1

CSCvs54162

Multiple concurrent uploads of tech support logs to the cloud fails.

2.0.1

Resolved Issues

There are no resolved issues in this release.

Compatibility Information

For Cisco NI Base on Cisco APIC compatibility with Day-2 Operations apps, see the Cisco Day-2 Operations Apps Support Matrix.

Software/Hardware

Release

Cisco APIC cluster

Any existing APIC cluster.

Devices supported

Cisco Nexus 9000 series switches.

Device Connector

1.0.9

Verified Scalability Limits

Software/Hardware

Number

Fabrics supported for Cisco NI Base on Cisco APIC

1

Fabric nodes supported for Cisco NI Base on Cisco APIC

100

Related Content

The Cisco Network Insights Base documentation can be accessed from the following website:

https://www.cisco.com /c/en/us/support/data - center- analytics/network - insights- advisor/model.html

The documentation includes installation, upgrade, configuration, technical references, and release notes, as well as other documentation.

Document

Description

Cisco Network Insights Base Application for the Cisco APIC Release Notes

This document.

Cisco Network Insights Base Application for the Cisco APIC User Guide

Describes how to download, install, and set up Cisco NI Base application in Cisco APIC.

Documentation Feedback

To provide technical feedback on this document, or to report an error or omission, send your comments to cisconetworkinsights - docfeedback@cisco.com.

Legal Information

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a   list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third- party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2019-2020 Cisco Systems, Inc. All rights reserved.