Contents

Introduction

Problem

Troubleshoot

Scenario 1

Scenario 2

Scenario 3

Scenario 4

Introduction

This document describes how to troubleshoot the "blank natted IP" issue in the Event Data Record (EDR).

Problem

EDR can be seen with natted IP field as blank:

06/06/2022 14:53:03:056,01/01/1970 05:30:00:000,a.b.c.d,123,,,e.f.g.h,443,6,0

06/06/2022 14:53:03:098,01/01/1970 05:30:00:000,a1.b1.c1.d1,456,,,e1.f1.g1.h1,443,6,0

06/06/2022 14:53:03:109,01/01/1970 05:30:00:000,a2.b2.c2.d2,789,,,e2.f2.g2.h2,8888,6,0

Troubleshoot

Scenario 1

First, check to which Firewall-and-Nat Policy International Mobile Subscriber Identification (IMSI) is mapped and if the configuration is accurate.

For example, in show subscribers full imsi <> ,you can see Network Address Translation (NAT) Policy NAT44: Not-required which must be in “Required state” and also you do not see any mapped IP pool here:

Firewall-and-Nat Policy: xyz

Firewall Policy IPv4: Required

Firewall Policy IPv6: Not-required

NAT Policy NAT44: Not-required

NAT Policy NAT64: Not-required

CF Policy ID: n/a

Congestion Mgmt Policy: n/a

active input plcy grp: n/a             active output plcy grp: n/a

S6b Auth Status: N/A

When you further check the configuration for Firewall-and-Nat Policy: xyz, there is no natted IP Pool mapped.

fw-and-nat policy fw-policy

access-rule priority 3 access-ruledef acc_P3_Server1 permit

access-rule priority 4 access-ruledef acc_P3_Server2 permit

access-rule priority 5 access-ruledef acc_P3_Server3 permit

access-rule priority 6 access-ruledef acc_P3_Server4 permit

access-rule priority 7 access-ruledef acc_P3_Server5 permit

access-rule priority 8 access-ruledef acc_P3_Server6 permit

access-rule priority 9 access-ruledef acc_P3_Server7 permit

access-rule priority 10 access-ruledef acc_P3_Server8 permit

access-rule priority 11 access-ruledef acc_P3_ipv6_Server1 permit

access-rule priority 16 access-ruledef ACC_ICMP_DENY_ALL deny

If you compare the same with the non-problematic scenario, you can see Firewall-and-Nat Policy: abc , NAT Policy NAT44: Required and Nat Realm: www_nat.

Firewall-and-Nat Policy: abc

Firewall Policy IPv4: Required

Firewall Policy IPv6: Required

NAT Policy NAT44: Required

NAT Policy NAT64: Required

Nat Realm: www_nat                     Nat ip address: a.b.c.d  (on-demand) (publicpool1)

Nexthop ip address: n/a

If you check the configuration for “abc”, you can observe that nat-realm www_nat is configured and nat-realm has IP-Pool configured:

fw-and-nat policy abc

access-rule priority 12 access-ruledef DNSipv41 permit bypass-nat

access-rule priority 13 access-ruledef DNSipv42 permit bypass-nat

access-rule priority 20 access-ruledef DNSipv61 permit bypass-nat

access-rule priority 21 access-ruledef DNSipv62 permit bypass-nat

access-rule priority 36 access-ruledef ACC_ICMP_DENY_ALL deny

access-rule priority 59 access-ruledef NAT64-prefix permit nat-realm www_nat

access-rule priority 60 access-ruledef ipv4_any permit nat-realm www_nat

access-rule priority 2000 access-ruledef ar-all-ipv6 permit bypass-nat

ip pool public_www8 a.b.c.d 255.255.255.0 napt-users-per-ip-address 1100 group-name public_internet max-chunks-per-user 10 port-chunk-size 32

ip pool publicpool1 a1.b1.c1.d1 255.255.252.0 napt-users-per-ip-address 1024 group-name www_nat alert-threshold pool-used 80 clear 70 on-demand max-chunks-per-user 8 port-chunk-size 64

ip pool publicpool2 a2.b2.c2.d2 255.255.252.0 napt-users-per-ip-address 1024 group-name www_nat alert-threshold pool-used 80 clear 70 on-demand max-chunks-per-user 8 port-chunk-size 64

ip pool test a3.b3.c3.d3 255.255.255.248 private 0 group-name Test

Scenario 2

Check if the subscriber has a valid subscription. If for any user Credit-Control is off, the subscriber does not get a public natted IP.

Scenario 3

In some scenarios, natted IP cannot be seen and for those EDRs, you see incorrect end time.

06/29/2022 04:35:57:754,01/01/1970 05:30:00:000,a.b.c.d,51564,,,w.x.y.z,443,6,0

06/29/2022 04:35:57:752,01/01/1970 05:30:00:000,a1.b1.c1.d1,46060,,,w1.x1.y1.z1,443,6,0

06/29/2022 04:35:57:755,01/01/1970 05:30:00:000,a2.b2.c2.d2,60670,,,w1.x1.y1.z1,443,6,0

As per the logs, EDR has a flow end time with the date 01/01/1970.

When there is a NAT failure or some failure on the first packet, and the flow has only the first packet time set, then the last packet's time is in the initialized state. When such type of flow timeout and EDR gets generated, then the last packet time is not set and hence in the EDR, you see the epoch time.

Scenario 4

Internet Control Message Protocol (ICMP) EDRs with no public IP: For a NAT-enabled subscriber, if there is a flow initiated from the server side, NAT translation is not done for such a flow, which means such downlink flows can not be natted. This is expected behavior and as per design.

Also, for an uplink packet, if the server is unreachable (as an example), an ICMP error is returned (in the downlink direction). This ICMP flow cannot be NAT-translated. Therefore, EDR generated for this ICMP flow can not have the public IP/port.

Sample snippet:

In this EDR, it can be seen that the ICMP flow follows a UDP flow just a fraction of a second later for the same server with blank natted IP.