Contents

Introduction

Prerequisites

Requirements

Components Used

Configure

Ports Used

SNMPv2 Configuration on Cat 9800 WLC

SNMPv3 Configuration on Cat 9800 WLC

Netconf Configuration on the Cat 9800 WLC

Configure (Prime Infrastructure 3.5 and Later)

Verify

Verify Telemetry Status

Troubleshoot

Troubleshooting on Prime Infrastructure

Troubleshooting on Catalyst 9800 WLC

Delete All the Telemetry Subscription from the WLC Configuration

Check for Subscription ID for AP Information

Migration from PI to DNA-Center

Introduction

This document describes how to integrate Catalyst 9800 Series Wireless Controllers (C9800 WLC) with Prime Infrastructure (3.x).

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- C9800 WLC

- Prime Infrastructure (PI) Version 3.5

- Simple Network Management Protocol (SNMP)

Components Used

The information in this document is based on these software and hardware versions:

- C9800 WLC

- Cisco IOS XE Gibraltar 16.10.1 to 17.3

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Note: Prime Infra 3.8 only supports 17.x 9800 WLCs. Clients do not show up on Prime Infrastructure if you try to manage a 16.12 WLC with Prime Infra 3.8.

Configure

In order for Prime Infrastructure to configure, manage and monitor Catalyst 9800 Series Wireless LAN Controllers, it needs to be able to access C9800 via CLI, SNMP, and Netconf. When you add C9800 to Prime Infrastructure, telnet/SSH credentials as well as SNMP community string, version, and so on, need to be specified. PI uses this information to verify reachability and to inventory C9800 WLC. It also uses SNMP to push configuration templates as well as support traps for Access Point (AP) and client events. However, in order for PI to gather AP and Client statistics, Netconf is leveraged. Netconf is not enabled by default on C9800 WLC and needs to be manually configured via CLI on the 16.10.1 release (GUI available in 16.11.1).

Ports Used

Communication between C9800 and Prime Infrastructure uses different ports.

- All configurations and templates available in Prime Infra get pushed via SNMP and CLI. This uses UDP port 161.

- Operational data for C9800 WLC itself is obtained over SNMP. This uses UDP Port 162.

- AP and client operational data leverages streaming telemetry.

Prime Infrastructure to WLC: TCP port 830 - This is used by Prime Infra to push the telemetry configuration to 9800 devices (using Netconf).

WLC to Prime Infrastructure: TCP port 20828 (for Cisco® IOS XE 16.10 and 16.11) or 20830 (for Cisco IOS XE 16.12,17.x and later).

Note: Keepalives are sent every 5 seconds even when there is no telemetry to report.

Note: In case there is a firewall between Prime Infrastructure and C9800, be sure to open these ports to establish communication.

SNMPv2 Configuration on Cat 9800 WLC

GUI:

Step 1. Navigate to  Administration > SNMP > Slide to Enable SNMP.

Step 2. Click on Community Strings and create a Read-Only and a Read-Write community name.

CLI:

(config)#snmp-server community <snmpv2-community-name>

(optional)(config)# snmp-server location <site-location>

(optional)(config)# snmp-server contact <contact-number>

SNMPv3 Configuration on Cat 9800 WLC

GUI:

Note: As of 17.1 Cisco IOS XE, the web UI only allows you to create read-only v3 users. You need to run the CLI procedure to create a read-write v3 user.

CLI:

Click on V3 usersand create a user. Choose authPriv, SHA and AES protocols, and choose long passwords. MD5 and DES/3DES are insecure protocols and although they are still an option in the 9800, they must not be selected and are not fully tested anymore.

Note: SNMPv3 User Config is not reflected on running-configuration. Only SNMPv3 group configuration is seen.

CLI:

(config)#snmp-server view primeview iso included

(config)#snmp-server group <v3-group-name> v3 auth write primeview

(config)#snmp-server user <v3username> <v3-group-name> v3 auth {md5 | sha} <AUTHPASSWORD> priv {3des | aes | des} {optional for aes 128 | 192| 256} <PRIVACYPASSWORD>

9800#show snmp user

User name: Nico

Engine ID: 800000090300706D1535998C

storage-type: nonvolatile  active

Authentication Protocol: SHA

Privacy Protocol: AES128

Group-name: SnmpAuthPrivGroup

Netconf Configuration on the Cat 9800 WLC

GUI (starting 16.11):

Navigate to Administration > HTTP/HTTPS/Netconf.

CLI:

(config)#netconf-yang

Caution: If aaa new-model is enabled on C9800, then you also need to configure:

(config)#aaa authorization exec default <local or radius/tacacs group>

(config)#aaa authentication login default <local or radius/tacacs group>

Netconf on C9800 uses the default method (and you cannot change this) for both aaa authentication login as well as aaa authorization exec. In case you want to define a different method for SSH connections, you can do so under the line vty command line. Netconf keeps using the default methods.

Caution: Prime infrastructure, when adding a 9800 controller to its inventory, overwrites the aaa authentication login default and aaa authorization exec default methods you had configured and point them to local authentication only in case Netconf is not already enabled on the WLC. If Prime Infrastructure is able to log in with the Netconf, it does not change the configuration. This means, if you were using TACACS, you lose CLI access after adding the 9800 to Prime. You can revert back those configuration commands afterward and make them point to TACACS if that is your preference.

Configure (Prime Infrastructure 3.5 and Later)

Step 1. Capture the Wireless Management IP address configured on the Catalyst 9800 WLC.

GUI:

Navigate to Configuration > Interface: Wireless.

CLI:

# show wireless interface summary

Step 2. Capture the privilege 15 user credentials as well as enable the password.

GUI:

Navigate to Administration > User Administration.

CLI:

# show run | inc username

# show run | inc enable

Step 3. Get the SNMPv2 community strings and/or SNMPv3 user as applicable.

GUI:

For SNMPv2, navigate to Administration > SNMP > Community Strings.

For SNMPv3, navigate to Administration > SNMP > V3 Users.

CLI:

For SNMPv2 community strings

# show run | sec snmp

For SNMPv3 user

# show user

Step 4. On Prime Infrastructure GUI, navigate to Configuration > Network: Network Devices, click on the drop-down beside + and choose Add Device.

Step 5. On the Add Device pop-up, enter the interface ip address on 9800 that is used to establish communication with Prime Infrastructure.

Step 6. Navigate to the SNMP tab and provide SNMPv2 Read-Only and Read-Write Community Strings configured on C9800 WLC.

Step 7. If using SNMPv3, from the drop-down choose v3, and provide the SNMPv3 username. From Auth-Type drop-down match the previously configured authentication type and from Privacy Type drop-down choose the encryption method configured on C9800 WLC.

Step 8. Navigate to Telnet/SSH tab of Add Device, provide the Privilege 15 Username and Password along with Enable Password. Click on Verify Credentials to ensure CLI and SNMP credentials work fine. Then click on Add.

Verify

Verify Telemetry Status

Step 1. Verify that Netconf is enabled on C9800.

#show run | inc netconf

netconf-yang

If not present, enter the 'NETCONF configuration on the Cat 9800 WLC' section.

Step 2. Verify the telemetry connection to Prime from the C9800.

#show telemetry internal connection

Telemetry connection

Address Port Transport State Profile

------------------------------------------------------------------

x.x.x.x 20828 cntp-tcp Active

Note: x.x.x.x is the ip address of Prime Infrastructure and the state must be Active. If the state is not Active, refer to the Troubleshoot Section.

In 17.9, you have to use a slightly different command:

9800-17-9-2#show telemetry connection all

Telemetry connections

Index Peer Address               Port  VRF Source Address             State      State Description

----- -------------------------- ----- --- -------------------------- ---------- --------------------

0 10.48.39.25                25103 0   10.48.39.228               Active     Connection up

9800-17-9-2#

Step 3. On Prime Infrastructure, navigate to Inventory > Network Devices > Device Type: Wireless Controller.

Step 4. To view the details of the telemetry connection to Prime Infrastructure, run this:

#show telemetry internal protocol cntp-tcp manager x.x.x.x 20828

Telemetry protocol manager stats:

Con str                : x.x.x.x:20828::

Sockfd                 : 79

Protocol               : cntp-tcp

State                  : CNDP_STATE_CONNECTED

Table id               : 0

Wait Mask              :

Connection Retries     : 0

Send Retries           : 0

Pending events         : 0

Source ip              : <9800_IP_ADD>

Bytes Sent             : 1540271694

Msgs Sent              : 1296530

Msgs Received          : 0

Step 5. Verify the telemetry subscription status from C9800 and the fact that they show as 'Valid'.

#show telemetry ietf subscription configured

Telemetry subscription brief

ID Type State Filter type

-----------------------------------------------------

68060586 Configured Valid transform-na

98468759 Configured Valid tdl-uri

520450489 Configured Valid transform-na

551293206 Configured Valid transform-na

657148953 Configured Valid transform-na

824003685 Configured Valid transform-na

996216912 Configured Valid transform-na

1072751042 Configured Valid tdl-uri

1183166899 Configured Valid transform-na

1516559804 Configured Valid transform-na

1944559252 Configured Valid transform-na

2006694178 Configured Valid transform-na

Step 6: The subscription statistics can be viewed per subscription-ID or for all subscriptions using this:

#show telemetry internal subscription { all | id } stats

Telemetry subscription stats:

Subscription ID  Connection Info            Msgs Sent  Msgs Drop  Records Sent

------------------------------------------------------------------------------

865925973        x.x.x.x:20828::      2          0          2

634673555        x.x.x.x:20828::      0          0          0

538584704        x.x.x.x:20828::      0          0          0

1649750869       x.x.x.x:20828::      1          0          2

750608483        x.x.x.x:20828::      10         0          10

129958638        x.x.x.x:20828::      10         0          10

1050262948       x.x.x.x:20828::      1369       0          1369

209286788        x.x.x.x:20828::      15         0          15

1040991478       x.x.x.x:20828::      0          0          0

1775678906       x.x.x.x:20828::      2888       0          2889

1613608097       x.x.x.x:20828::      6          0          6

1202853917       x.x.x.x:20828::      99         0          99

1331436193       x.x.x.x:20828::      743        0          743

1988797793       x.x.x.x:20828::      0          0          0

1885346452       x.x.x.x:20828::      0          0          0

163905892        x.x.x.x:20828::      1668       0          1668

1252125139       x.x.x.x:20828::      13764      0          13764

2078345366       x.x.x.x:20828::      13764      0          13764

239168021        x.x.x.x:20828::      1668       0          1668

373185515        x.x.x.x:20828::      9012       0          9012

635732050        x.x.x.x:20828::      7284       0          7284

1275999538       x.x.x.x:20828::      1236       0          1236

825464779        x.x.x.x:20828::      1225711    0          1225780

169050560        x.x.x.x:20828::      0          0          0

229901535        x.x.x.x:20828::      372        0          372

592451065        x.x.x.x:20828::      8          0          8

2130768585       x.x.x.x:20828::      0          0          0

Troubleshoot

Troubleshooting on Prime Infrastructure

- The first thing to check on Prime infrastructure is the IP address and interfaces. Prime Infrastructure does not support dual-home and does not listen for telemetry on its second port.

- The IP address of the WLC that you add in Prime Infrastructure must be the IP address used as the 'wireless management interface'. Prime Infrastructure IP address must be reachable from that wireless management interface on the controller side.

- If using Service port (gig0/0 on appliances) for discovery, WLC and APs show up in the Managed state in Inventory but telemetry for WLC and associated Access Points does not work.

- If you see the telemetry status to be a 'success' on Prime Infrastructure but the AP count is 0, it could be that Prime Infrastructure can reach out to the WLC on port 830 but the controller cannot reach back the Prime Infrastructure on port 20830.

For any SNMP issues or device configuration issues, collect these logs from Prime Infrastructure:

cd /opt/CSCOlumos/logs/

[root@prime-tdl logs]# ncs-0-0.log

Tdl.logs

For Telemetry/coral issues, the first thing is to check the Coral status:

shell

cd /opt/CSCOlumos/coralinstances/coral2/coral/bin

./coral version 1

./coral status 1

./coral stats 1

If all is well, collect these logs from the prime coral logs folder.

Note: Depending on the Prime Infrastructure version and the amount of Cisco IOS XE version it supports, there can be several Coral instances on Prime Infrastructure. Check releases notes for more details such as: https://www.cisco.com/c/en/us/td/docs/net_mgmt/prime/infrastructure/3-7/release/notes/bk_Cisco_Prime_Infrastructure_3_7_0_Release_Notes.html

Step 1.

cd /opt/CSCOlumos/coral/bin/

[root@prime-tdl bin]# ./coral attach 1

Attached to Coral instance 1 [pid=8511]

Coral-1#cd /tmp/rp/trace/

Coral-1#ls

Collect the  “Prime_TDL_collector_R0-”* logs

Coral-1# cd /tmp/rp/trace/

Coral-1# btdecode P* > coralbtlog.txt

Coral-1# cat  coralbtlog.txt

These logs can also be found in this directory:

*   The decoded trace files are available in the path/opt/CSCOlumos/coralinstances/coral2/coral/run/1/storage/harddisk

*   ade# cd /opt/CSCOlumos/coralinstances/coral2/coral/run/1/storage/harddisk

*   ade# cp coraltrace.txt /localdisk/defaultRepo

Step 2. To enable Coral in debug mode, debug level needs to be set in debug.conf file.

Either from within the container:

echo "rp:0:0:tdlcold:-e BINOS_BTRACE_LEVEL=DEBUG;" > /harddisk/debug.conf

Or on Prime 3.8, Coral service can be restarted outside of the container using:

"sudo /opt/CSCOlumos/coralinstances/coral2/coral/bin/coral restart 1"

If the restart doesn’t help these can be used to wipe the coral instance and start it smoothly:

sudo /opt/CSCOlumos/coralinstances/coral2/coral/bin/coral stop 1

sudo /opt/CSCOlumos/coralinstances/coral2/coral/bin/coral purge 1

sudo /opt/CSCOlumos/coralinstances/coral2/coral/bin/coral start 1

Restart Coral, this is mandatory. You can leave the coral instance if you type 'Exit' then:

./coral/bin/coral restart 1

Note: On Prime 3.8, Coral service can be restarted outside of container using 'sudo /opt/CSCOlumos/coralinstances/coral2/coral/bin/coral restart 1'

If you need to decode Coral log files, you can decode them inside the Coral container with:

btdecode Prime_TDL_collector_*.bin

Note: After enabling debug level of Coral, restarting Coral is mandatory.

Troubleshooting on Catalyst 9800 WLC

To monitor the configuration pushed by Prime Infra to the C9800 WLC, you can run an EEM applet.

#config terminal

#event manager applet catchall

#event cli pattern ".*" sync no skip no

#action 1 syslog msg "$_cli_msg"

Delete All the Telemetry Subscription from the WLC Configuration

There can be times when you want to unconfigure all telemetry subscriptions configured on the WLC. This can be done simply with these commands:

WLC#term shell

WLC#function removeall() {

for id in `sh run | grep telemetry | cut -f4 -d' '`

do

conf t

no telemetry ietf subscription $id

exit

done

}

WLC#removeall

To enable traces:

# debug netconf-yang level debug

To verify:

WLC#show platform software trace level mdt-pubd chassis active R0 | inc Debug

pubd                            Debug

WLC#show platform software trace level ndbman chassis active R0 | inc Debug

ndbmand                         Debug

To view the trace outputs:

show platform software trace message mdt-pubd chassis active R0

show platform software trace message ndbman chassis active R0

Check for Subscription ID for AP Information

Click on DB Query. Navigate tohttps://<Prime_IP>/webacs/ncsDiag.do.

Choose *from ewlcSubscription where OWNINGENTITYID like '%Controller_IP' and CLASSNAME='UnifiedAp'.

From WLC:

Verify that the subscription ID is sending information and no drops on the cntp counters.

show tel int sub all stats

show telemetry internal protocol cntp-tcp connector counters drop

show telemetry internal protocol cntp-tcp connector counters queue

show telemetry internal protocol cntp-tcp connector counters rate

show telemetry internal protocol cntp-tcp connector counters sub-rate

show telemetry internal protocol cntp-tcp connector counters reset

Note: The 9800 WLC supports 100 telemetry subscription before 17.6 and up to 128 subscriptions after 17.6 (as recent release of DNA center can use more than 100 subscriptions.

Migration from PI to DNA-Center

C9800 can not be simultaneously managed by both PI and DNA Center. If there is a plan to move to DNAC as a network management solution, C9800 needs to be removed from Prime Infrastructure before adding it to DNA Center. When C9800 is removed/deleted from PI 3.5, all the configuration that was pushed to C9800 at the time of inventory by PI does not get rolled back and these need to be manually deleted from the system. Specifically, the subscription channels established for C9800 WLC to publish streaming telemetry data do not get removed.

To identify this specific configuration:

#show run | sec telemetry

To remove this configuration, run the no form of the command:

(config) # no telemetry ietf subscription <Subscription-Id>

Repeat this CLI to remove each of the subscription identifiers.

(config) # no telemetry transform <Transform-Name>

Repeat this CLI to remove each of the transform names

Note: If you manage the 9800 controller with both DNAC and Prime Infrastructure, the DNAC inventory compliance fails expectedly because of Prime management.

In recent releases, both Prime Infrastructure and DNAC can use too many telemetry subscriptions for the WLC for both servers to manage the 9800 simultaneously. You therefore cannot manage the 9800 with both DNAC and Prime Infrastructure and have telemetry and statistics working. Migration from PI to DNAC must therefore happen as fast as possible because DNAC is not able to have telemetry data from the 9800 as long as Prime Infrastructure is managing the 9800 controller.