Contents

Introduction

Table 1 - Software releases with -B domain AP support

Special Note Regarding the AP802

Introduction

Starting May 1, 2016, the Federal Communications Commission (FCC) restricted distribution of new -A domain access points in the United States.  A new -B domain has been introduced to comply with the new FCC regulations.  Cisco has released new AP SKUs for the -B domain - the following table shows in which software releases -B domain support is introduced.

For more information on the FCC change, see the New -B Domain Product Bulletin.

Table 1 - Software releases with -B domain AP support

AP Series

7.4.150.0

(15.2(2)JB6)

8.0.132.0

(15.3(3)JA7)

8.2.110.0

(15.3(3)JC1)

8.3.102.0

(15.3(3)JD)

IOS-XE

3.6.5

IOS-XE

3.7.4

IOS-XE

3.8.2

IOS-XE

3.9.0

Polaris

16.1.3

Polaris 16.2.2

Polaris

16.3.1

AP-3700i/e

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-2700i/e

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-1700i

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-3700p

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-3600i/e

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-2600i/e

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-1600i/e

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-700i/w

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-1532i/e

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-1572

✓

✓

✓

✓

✓

✓

✓

✓

✓

✓

AP-1552 (IoT)

✓

✓

✓

✓

IW-3702

✓

✓

✓

AP803 (in IR829)

✓

✓

ASA55xx (AP702 embedded)

✓

✓

Special Note Regarding the AP802

The AP802 (embedded in various 800 series ISR models) is not available in a -B SKU.  800 series ISRs with -A SKU AP802s sold after May 1, 2016, are compliant with FCC regulations (and only support the UNII-1 and UNII-3 bands.)