Contents

Introduction

Prerequisites

Requirements

Components Used

Background Information

Troubleshoot

Hybrid Calendar Setup - Test Account

Microsoft 365 Admin Center

Conclusion

Related Information

Introduction

This document describes how to solve Hybrid Calendar deployment wizard error while testing an Office 365 account.

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- Webex Control Hub.

- Microsoft 365 Tenant.

Components Used

The information in this document is based on these software and hardware versions:

- Control Hub build 20230808-be08fd6 (mfe).

- Office 365 E3 licensing.

- Google Chrome 115.0.5790.170 x64.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Background Information

During the Hybrid Calendar with Office 365 deployment wizard after authorize with the Microsoft 365 global admin account it is required to test the connection with Office 365 calendar.

Troubleshoot

Hybrid Calendar Setup - Test Account

The next error is present after adding an email address to test the connection.

Error

Couldn't save the Microsoft 365 Calendar config. TrackingID: ATLAS_1b8fa3a2-5760-451e-86ea-e7b9b7758e62_13

Debug info:

Referrer: Control Hub notification toaster-links

Browser URL: https://admin.webex.com/hybrid-services?office365=success

Control Hub Build: 20230808-be08fd6

View Org ID: 2fdb923e-1d23-4e1b-a30f-e9cd88845744

Logged-in User ID: 09e7e177-3b96-47a9-bf96-9f607451d8a9

Logged-in User Org ID: 2fdb923e-1d23-4e1b-a30f-e9cd88845744

Logged-in User Clock UTC: Thu, 10 Aug 2023 02:34:31 GMT

Customer Type: Enterprise

Status: 400

Status Text: OK

URL: https://https://calendar-cloud-connector-r.wbx2.com/api/v1/orgs/2fdb923e-1d23-4e1b-a30f-e9cd88845744/services/squared-fusion-cal/provisioning/confirmO365Provisioning?testEmail=cconnector@rtpcloudcollab.com&schedulingAccount=

Tracking ID: ATLAS_1b8fa3a2-5760-451e-86ea-e7b9b7758e62_13

Error: {

"errorCode": 6,

"message": "Bad request",

"errors": [

{

"errorCode": 6,

"description": "Bad request"

}

],

"trackingId": "ATLAS_1b8fa3a2-5760-451e-86ea-e7b9b7758e62_13"

}

Message: Couldn't save the Microsoft 365 Calendar config. TrackingID: ATLAS_1b8fa3a2-5760-451e-86ea-e7b9b7758e62_13

Microsoft 365 Admin Center

Navigate to the Microsoft 365 admin portal with an admin account. Navigate to Users > Active users > account used during test. Select the user and navigate to Licenses and apps tab.

Microsoft 365

Conclusion

It is required to have a Microsoft 365 license assigned in order to test/activate users for Hybrid Calendar with Office 365 service.

Prerequisites

Assigning a license to the user and retry the Calendar integration can succeed now.

Office license

Error cleared

Note: It is not required to have the test account in Control Hub but in order to use Hybrid Calendar service the account needs to be in both sides Control Hub and Microsoft 365.

Related Information

- Deploy cloud-based Hybrid Calendar for Office 365

- Cisco Technical Support & Downloads