Contents

Introduction

Prerequisites

Requirements

Components Used

Conventions

Problem

Solution

Console Session Not Accepting Key Strokes

Related Information

Introduction

This document describes the correct settings to apply when you connect a PC to a router console port and access through Command Line Interface (CLI).

Prerequisites

Requirements

There are no specific requirements for this document.

Components Used

This document is not restricted to specific software and hardware versions.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Problem

When a console cable is connected from a PC COM serial port or from a USB to Serial adapter to the router console port, a router prompt does not appear on the Terminal Emulator. Another symptom that can be observed is that garbage characters appear on the Terminal Emulator software, and the router no longer accepts keystrokes. It appears as if the router has crashed or is not responsive.

Solution

The settings in the Terminal Emulator software need to be set correctly; otherwise, unintelligible characters show up on the screen. When you set up the connection, use these settings:

Bits per sec    :  9600

Data bits       :     8

Parity          :  none

Stop bits       :     1

Flow control    :  none

Here is an example of how to configure these settings on a Windows-based PC with Hyper Terminal:

Here is an example of how to configure these settings on PuTTY Terminal Emulator:

Note: If you use a USB to Serial adapter to establish a connection to the router, remember to verify what COM port is given to the USB adapter and select the appropriate COM number under the terminal emulator settings.

Without these settings, the router can usually display an output but does not accept any keystrokes. The router, therefore, appears as if it is hung or has crashed. With the correct settings, you can use different Terminal Emulators to configure and monitor the router, the software of choice depends on the PC or laptop used for the connection.

Note: On some routers the console speed has been changed in the configuration register, and a bits-per-second speed of 9600 does not work. However, this situation is not common. Valid speeds (other than 9600bps) include 1200, 2400, and 4800 bps. On some platforms, notably the 3600 Series Routers, 19200, 38400, 57600 and 115200 bps are supported. Try these if you fail to connect with the settings described in this document.

Console Session Not Accepting Key Strokes

This issue can be due to any of these reasons:

- Difference in baud rate and the bits per second value

- Bad console cable

- Scroll lock option is enabled on the keyboard (make sure that the scroll lock key is disabled on the Keyboard)

Related Information

- Troubleshoot Router Hangs

- Configure Telnet, Console and AUX Port Passwords on Routers

- Access the CLI via PuTTY use a Console Connection on 300 and 500 Series Managed Switches

- Technology Support Page

- Cisco Technical Support  & Downloads