Objective

The WAP361 Wireless-AC/N Dual Radio Wall Plate Access Point with PoE uses concurrent dual-band radio for improved coverage and user capacity. Gigabit Ethernet LAN interfaces with Power over Ethernet (PoE) facilitate flexible installation and reduce cabling and wiring costs.

To provide highly secure guest access to visitors and other users, WAP361 supports a captive portal with multiple authentication options and the ability to configure rights, roles, and bandwidth. Configure a cluster of WAPs for seamless roaming within a campus and manage them with through a single IP address.

This article explains the product specifications of the WAP361 Wireless-AC/N Dual Radio Wall Plate Access Point with PoE.

Note: To know more about the WAP361 Wireless-AC/N Dual Radio Wall Plate Access Point with PoE, click here.

Product Specifications

Specifications

Description

Cabling type

Category 5e or better

Antennas

Internal antennas optimized for installation on a wall

Operating System

Linux

Physical Interfaces

Specifications

Description

Ports

5 - 10/100/1000 Ethernet, with support for 802.3at. PoE support is only for one port and not five ports.

Buttons

Reset button

LEDs

One multi-function LED

Mounting and Physical Security

Multiple Mounting Options

Mounting bracket included for easy ceiling or wall mounting

Physical Specifications

Physical dimensions

(W x D x H)

6.5 x 4.33 x 1.8 in. (165 x 110 x 45.75 mm)

Weight

1.06 lb or 480 g

Network Capabilities

Specifications

Description

VLAN Support

1 management VLAN plus 16 VLANs for SSIDs (per radio)

Number of VLANs

Yes

802.1X supplicant

Yes

SSID-to-VLAN mapping

Yes

Auto-channel selection

Yes

Spanning tree

Yes

Load balancing

Yes

IPv6

Yes

IPv6 host support

IPv6 RADIUS, syslog, Network Time Protocol (NTP)

Layer 2

802.1Q-based VLANs, 32 active VLANs plus one management VLAN

Security

Specifications

Description

WPA, WPA2

Yes, including Enterprise authentication

Access control

Yes, management access control list (ACL) plus MAC ACL

Secure management

HTTPS

Rogue access point detection

Yes

Performance

Specifications

Description

Wireless throughput

Up to 1.2 Gbps data rate (real-world throughput will vary)

Recommended user support

Up to 128 connective users, 32 active users per radio

Multiple-Access Point Management

Single Point Setup

Yes

Number of access points per cluster

8

Active clients per cluster

240

Management

Management protocols

Web browser, Simple Network Management Protocol (SNMP) v3, Bonjour

Remote management

Yes

Event logging

Local, remote syslog, email alerts

Network diagnostics

Logging and packet capture

Web firmware upgrade

Firmware upgradable through web browser, imported and exported configuration file

Dynamic Host Configuration Protocol (DHCP)

DHCP Client

IPv6 host

Yes

HTTP redirect

Yes

Wireless

Frequency

Dual Concurrent radios (2.4 GHz and 5 GHz)

Radio and modulation type

Dual radio, orthogonal frequency division multiplexing (OFDM) IEEE 802.11 a/n: OFDM(BPSK/QPSK/16QAM/64QAM/256AM)

IEEE 802.11ac: OFDM (BPSK/QPSK/16QAM/64QAM/256QAM)

WLAN

802.11n/ac

2x2 MIMO with 2 spatial streams at 5 GHz

2x2 MIMO with 2 spatial streams at 2.4 GHz

20-, 40-, and 80-Mhz channels for 802.11ac

20- and 40-Mhz for 802.11n

PHY data rate up to 1.2 Gbps

802.11 Dynamic Frequency Selection (DFS)

Data rates supported

802.11a/b/g:

54, 48, 36, 24, 18, 12, 9, 6, 11, 5.5, 2, and 1 Mbps

802.11n: 6.5 to 300 Mbps:

20-MHz bandwidth: MCS 0-15 for supported data rates

40-MHz bandwidth: MCS 0-15 for supported data rates

802.11ac: 6.5 to 867 Mbps:

20-MHz bandwidth: MCS 0-9 for supported data rates

40-MHz bandwidth: MCS 0-9 for supported data rates

80-MHz bandwidth: MCS 0-9 for supported data rates

Transmitter output power

2.4 GHz, 5 GHz

System memory

256 MB RAM

128 MB flash