Table of Contents

Supplicant Settings Configuration

Authenticator Settings Configuration

Step 12

Step 10

Step 8

Step 11

Objective

IEEE 802.1X authentication allows the WAP device to gain access to a secured wired network. You can configure the WAP device as an 802.1X supplicant (client) on the wired network. The WAP351 can also be configured as an authenticator. An encrypted user name and password can be configured to allow the WAP device to authenticate using 802.1X.

On the networks that use IEEE 802.1X port-based network access control, a supplicant cannot gain access to the network until the 802.1X authenticator grants access. If your network uses 802.1X, you must configure 802.1X authentication information on the WAP device, so that it can supply it to the authenticator.

The objective of this document is to show you how to configure 802.1X Supplicant settings on the WAP351.

Applicable Devices

• WAP351

Software Version

• v1.0.1.3

Configuring 802.1X Supplicant Settings

Step 1. Log in to the web configuration utility and choose System Security > 802.1X. The 802.1X page opens.

Step 2. The Port Table shows five LAN interfaces that can be configured for 802.1X authentication. Check the check box(s) corresponding to the port(s) you wish to edit.

Step 3. Click the Edit button. The checked port(s) will now be available for editing.

Step 4. In the Enable field, check the check box(s) of the port(s) that you want to enable 802.1X settings on.

Step 5. In the Role drop-down list, select whether the corresponding port will be configured as a Supplicant or an Authenticator. If you chose Supplicant, go the Supplicant Settings Configuration section. If you chose Authenticator, go to the Authenticator Settings Configuration section. An Authenticator lies in between the client (Supplicant) wishing to gain access to the network and the RADIUS server itself. It is responsible for handling all communication between the two. A Supplicant provides credentials to an Authenticator in order to gain access to the network. A typical setup on the WAP351 would have the WAN port be a Supplicant (so the WAP can access the network) and have the LAN ports be Authenticators (so the WAP can authorize devices underneath it).

Supplicant Settings Configuration

Step 1. Click on Show Details to display the Supplicant settings information.

Note: This information may open automatically after you make a selection in the Mode field.

Step 2. In the EAP Method drop-down list, choose the algorithm that will be used to encrypt usernames and passwords. EAP stands for Extensible Authentication Protocol, and is used as a basis for encryption algorithms.

The available options are:

• MD5 — The MD5 message-digest algorithm utilizes a hash function to provide basic security. This algorithm is not recommended, as the other two have higher security.

• PEAP — PEAP stands for Protected Extensible Authentication Protocol. It encapsulates EAP and provides higher security than MD5 by using a TLS tunnel to transmit data.

• TLS — TLS stands for Transport Layer Security, and is an open standard that provides high security.

Step 3. In the Username field, enter in the username that the WAP device will use when responding to requests from an 802.1X authenticator. The username must be 1 – 64 characters long, and can include alphanumeric and special characters.

Step 4. In the Password field, enter in the password that the WAP device will use when responding to requests from an 802.1X authenticator. The username must be 1 - 64 characters long, and can include alphanumeric and special characters.

Step 5. The Certificate File Status area shows whether an HTTP SSL certificate file exists on the WAP device. The Certificate File Present field will show “Yes” if a certificate is present; the default is “No”. If a certificate is present, the Certificate Expiration Date will show when it expires; otherwise, the default is “Not present”. To display the latest information, click the Refresh button to get the most current certificate information.

Step 6. If you do not want to upload an HTTP SSL certificate file, skip to Step 12. Otherwise, select either the HTTP or TFTP radio buttons in the Transfer Method field to choose which protocol you want to use to upload the certificate.

Step 7. If you selected TFTP, continue to Step 8. If you selected HTTP, click the Browse… button to find the certificate file on your PC. Skip to Step 10.

Step 8. If you selected TFTP in the Transfer Method field, enter in the filename of the certificate in the Filename field.

Note: The file must end in .pem.

Step 9. Enter the IP address of the TFTP server in the TFTP Server IPv4 Address field.

Step 10. Click Upload.

Step 11. A confirmation window appears. Click OK to begin the upload.

Step 12. Repeat this section for every port that you want to configure as an 802.1X Supplicant. Then, click Save.

Authenticator Settings Configuration

Step 1. Click on Show Details to display the Authenticator settings information.

Note: This information may open automatically after you make a selection in the Mode field.

Step 2. Check the Use global RADIUS Server Settings checkbox if you want the port to use the global RADIUS settings during authentication. If you want the port to use a different RADIUS server (or servers), uncheck this checkbox; otherwise, skip to Step 8.

Note: For more information, see the article Configuring Global RADIUS Server Settings on the WAP131 and WAP351.

Step 3. In the Server IP Address Type field, select the radio button for the IP version that the RADIUS server uses. The available options are IPv4 and IPv6.

Note: You can toggle between the address types to configure IPv4 and IPv6 RADIUS address settings, but the WAP device contacts only the RADIUS server or servers with the address type that you select in this field. It is not possible to have multiple servers use different address types in one configuration.

Step 4. In the Server IP Address 1 or Server IPv6 Address 1 field, enter either an IPv4 or IPv6 address for the RADIUS server depending on the address type you chose in Step 3.

Note: The address entered in this field will designate the port’s primary RADIUS server. Addresses entered in subsequent fields (Server IP Address 2 through 4) will designate the backup RADIUS servers that will be tried in sequence if authentication fails with the primary server.

Step 5. In the Key field, enter the shared secret key corresponding to the primary RADIUS server that the WAP device uses to authenticate to the RADIUS server. You can use from 1 to 64 standard alphanumeric and special characters. Repeat this step for each subsequent RADIUS server you have configured for the port in the Key 2 through 4 fields.

Note: The keys are case sensitive and must match the key configured on the RADIUS server.

Step 6. In the Authentication Port field, enter the port that the WAP will use to connect to the RADIUS server. Repeat this step for each backup RADIUS server you have configured in the Authentication Port 2 through 4 fields. The default is 1812.

Step 7. Check the Enable RADIUS Accounting checkbox to enable tracking and measuring of the resources a user has consumed (system time, amount of data transmitted, etc.). Checking this checkbox will enable RADIUS accounting for the primary and backup servers.

Step 8. In the Active Server drop-down list, choose one of the configured RADIUS servers to be set as the active server. This setting lets the WAP immediately try to contact the active server, rather than trying to contact each server in sequence and choosing the first one available.

Step 9. In the Periodic Reauthentication field, check the Enable checkbox to turn on EAP reauthentication. If you do not want to enable EAP reauthentication, skip to Step 11.

Step 10. If you checked the Enable checkbox in the Periodic Reauthentication field, enter the EAP reauthentication period in seconds in the Reauthentication Period field. The default is 3600. The valid range is 300 – 4294967295 seconds.

Step 11. Repeat this section for every port that you want to configure as an 802.1X Authenticator. Then, click Save.