Date Identified

March 24, 2017

Date Resolved

N/A

Products Affected

Model

Firmware Version

WAP150

1.0.0.13, 1.0.1.7

Problem Description

Both 2.4 GHz and 5 Ghz radios go down after configuring a third SSID on either radio. As soon as the third SSID is removed, the radios are up and functional. The issue is present even if only one radio is enabled and multiple SSIDs are configured.

Resolution

Perform an upgrade on the WAP150 to the latest firmware release 1.1.0.5.