Objective

An additional spacer kit is available for the Cisco Business Wireless 145AC mesh access point. This article will explain the use, model number, and specifications.

Applicable Devices | Firmware Version

- CBW 145AC (Data Sheet) | 10.4.1.0 (Download latest)

Introduction

If you want to create space between the access point and the mounting surface, there is a kit available. This kit allows the Power over Ethernet (PoE) port to be reached via a jumper cable (included) connected to the pass-through port. The spacer kit is available under part ID AIR-AP1815W-KIT=.

Spacer Kit for the CBW145AC

Jumper Cable Specifications

- Type: CAT5E

- Length: Approximately 65mm +/- 10mm

- Width: Approximately 4.5 mm

Spacer Kit Specifications

All dimensions are in millimeters.

Conclusion

This article explained the specifications for the 145AC optional spacer kit.

If you want more information about your Cisco Business access point, check out the following links:

- Cisco Business 145AC Access Point Data Sheet

- Cisco Business Wireless 145AC Pass-Through Port