Objective

The interactive voice response provides instructions for different configurations within the device.  These instructions are obtained when a telephone is connected to the device. This document provides an increased understanding of SPA3102's Interactive Voice Response (IVR) Menu.

Applicable Devices

•SPA8000

•SPA3102

•SPA9000

•SPA2102

•SPA112

•PAP2T

Software Version

• v6.1.12

Interactive Voice Response (IVR) Menu

Accessing the Interactive Voice Response Menu

Step 1. Use a telephone connected to the PHONE port of the Voice Gateway. The Interactive Voice Response Menu can only be accessed through an analog telephone.

Step 2. Press four asterisk (*) keys.

Step 3. Wait until hearing the voice prompt say "Linksys configuration menu. Please enter the option followed by the # (pound) key or hang up to exit".

Step 4. Refer to the following table that lists actions, commands, menu choices, and descriptions. After selecting an option, press the # (pound) key. To exit the menu, hang up the telephone.

The Interactive Voice Response Menu

Note: If the Administrator password is not set or the user is allowed to change it, the items marked Requires Password will not require a password.