Objective

The administrator-level account and the user-level account are the two user accounts available for SPA100 Series Phone Adapters. The User List page is used to manage the two accounts. The two accounts are designed in such a way that not every user has access to all features of the device. Therefore, the user-level account has access to modify a limited set of features, while the administrator-level account has access to configure all the features of the device.

The objective of this article is to explain how to configure the two user account settings on the SPA100 Series Phone Adapters.

Applicable Devices

• SPA100 Series Phone Adapters

Software Version

• v1.1.0

Configure User Accounts

Administrator-level Account

Step 1. Log in to the web configuration utility and choose Administration > Management > User List. The User List page opens:

Step 2. In the User List table, click the pencil icon to update the Admin account. The User Account page opens.

Step 3. (Optional) The username is already defined for the account. Enter a username if you wish to change the existing one in the Username field.

Step 4. Enter the existing password in the Old Password field. The default administrator password is admin.

Step 5. Enter the desired password that you want to use with this account in the New Password field. It is recommended not to use the old password again. The range is up to 32 characters.

Step 6. Re-enter the new password again to verify that the password matches in the Confirm New Password field.

Note: The Level of the account is predetermined from the type of account.

Step 7. Click Submit to save the settings or click Cancel to abort.

User-level Account

Step 1. In the User List table, click the pencil icon to update the User account. The User Account page opens up.

Step 2. (Optional) The username is already defined for the account. Enter a username if you wish to change the existing one in the Username field.

Step 3. Enter the desired password that you want to use with this account in the New Password field. It is recommended not to use the old password again. The range is up to 32 characters.

Step 4. Re-enter the new password again to verify that the password matches in the Confirm New Password field.

Note: The Level of the account is predetermined from the type of account.

Step 5. Click Submit to save the settings or click Cancel to abort.